{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID_RV","type":"number","width":9,"decimals":0},{"name":"DATA_ACAO","type":"date","width":8},{"name":"COD_INE","type":"number","width":10,"decimals":0},{"name":"DESIGNACAO","type":"character","width":20},{"name":"OPERAC","type":"character","width":4},{"name":"REDE_DFCI","type":"number","width":16,"decimals":0},{"name":"TIPO_PISO","type":"character","width":2},{"name":"COMPRIM","type":"number","width":10,"decimals":0},{"name":"LARGURA","type":"number","width":16,"decimals":2},{"name":"INTER_2015","type":"character","width":10},{"name":"EXEC_2015","type":"number","width":10,"decimals":0},{"name":"FIN_2015","type":"number","width":10,"decimals":0},{"name":"FASE_2015","type":"number","width":10,"decimals":0},{"name":"INTER_2016","type":"character","width":10},{"name":"EXEC_2016","type":"number","width":10,"decimals":0},{"name":"FIN_2016","type":"number","width":10,"decimals":0},{"name":"FASE_2016","type":"number","width":10,"decimals":0},{"name":"INTER_2017","type":"character","width":10},{"name":"EXEC_2017","type":"number","width":10,"decimals":0},{"name":"FIN_2017","type":"number","width":10,"decimals":0},{"name":"FASE_2017","type":"number","width":10,"decimals":0},{"name":"INTER_2018","type":"character","width":10},{"name":"EXEC_2018","type":"number","width":10,"decimals":0},{"name":"FIN_2018","type":"number","width":10,"decimals":0},{"name":"FASE_2018","type":"number","width":10,"decimals":0},{"name":"INTER_2019","type":"character","width":10},{"name":"EXEC_2019","type":"number","width":10,"decimals":0},{"name":"FIN_2019","type":"number","width":10,"decimals":0},{"name":"FASE_2019","type":"number","width":10,"decimals":0},{"name":"TIPO_VEICU","type":"character","width":16},{"name":"OBSERV","type":"character","width":254},{"name":"FREGUESIA","type":"character","width":100},{"name":"CONCELHO","type":"character","width":50},{"name":"REGIãO","type":"character","width":50},{"name":"TIPO","type":"character","width":16},{"name":"ID_GERAL","type":"number","width":16,"decimals":0},{"name":"LENGTH","type":"number","width":16,"decimals":3}],"n_rows":6856,"rows_kept":6856,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[41,{"$raw":"00000000"},21121,"GC.3.1",null,3,"T",1046,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",1,1046.158]
[42,{"$raw":"00000000"},21121,"GC.3.2",null,3,"T",1227,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",2,1227.349]
[43,{"$raw":"00000000"},21121,"GC.3.3",null,3,"T",1678,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3,1677.824]
[44,{"$raw":"00000000"},21121,"GC.3.4",null,3,"T",1805,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4,1804.742]
[45,{"$raw":"00000000"},21121,"GC.3.5",null,3,"T",776,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5,776.007]
[46,{"$raw":"00000000"},21121,"GC.3.6",null,3,"T",273,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",6,272.501]
[47,{"$raw":"00000000"},21121,"GC.3.7",null,3,"T",1310,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",7,1310.333]
[48,{"$raw":"00000000"},21121,"GC.3.8",null,3,"T",706,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",8,706.038]
[49,{"$raw":"00000000"},21121,"GC.3.9",null,3,"T",604,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",9,603.973]
[50,{"$raw":"00000000"},21121,"GC.3.10",null,3,"T",422,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",10,421.595]
[51,{"$raw":"00000000"},21121,"GC.3.11",null,3,"T",893,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",11,892.727]
[52,{"$raw":"00000000"},21121,"GC.3.12",null,3,"T",1088,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",12,1088.088]
[53,{"$raw":"00000000"},21121,"GC.3.13",null,3,"T",1217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",13,1216.709]
[54,{"$raw":"00000000"},21121,"GC.3.14",null,3,"T",749,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",14,749.038]
[55,{"$raw":"00000000"},21121,"GC.3.15",null,3,"T",1074,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",15,1073.801]
[57,{"$raw":"00000000"},21121,"GC.3.16",null,3,"T",1711,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",16,1711.207]
[58,{"$raw":"00000000"},21121,"GC.3.17",null,3,"T",1491,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",17,1490.786]
[59,{"$raw":"00000000"},21121,"GC.3.18",null,3,"T",1644,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",18,1643.975]
[60,{"$raw":"00000000"},21121,"GC.3.19",null,3,"T",702,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",19,702.029]
[61,{"$raw":"00000000"},21121,"GC.3.20",null,3,"T",987,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",20,987.413]
[63,{"$raw":"00000000"},21121,"GC.3.21",null,3,"T",737,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",21,736.508]
[66,{"$raw":"00000000"},21121,"GC.3.22",null,3,"T",874,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",22,873.934]
[67,{"$raw":"00000000"},21121,"GC.3.23",null,3,"T",340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",23,340.287]
[68,{"$raw":"00000000"},21121,"GC.3.24",null,3,"T",1272,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",24,1271.719]
[69,{"$raw":"00000000"},21121,"GC.3.25",null,3,"T",402,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",25,401.611]
[70,{"$raw":"00000000"},21121,"GC.3.26",null,3,"T",433,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",26,432.559]
[71,{"$raw":"00000000"},21121,"GC.3.27",null,3,"T",1370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",27,1369.940]
[72,{"$raw":"00000000"},21121,"GC.3.28",null,3,"T",182,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",28,181.886]
[73,{"$raw":"00000000"},21121,"GC.3.29",null,3,"T",2074,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",29,2073.542]
[74,{"$raw":"00000000"},21121,"GC.3.30",null,3,"T",210,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",30,210.354]
[75,{"$raw":"00000000"},21115,"GC.3.31",null,3,"T",612,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",31,611.715]
[76,{"$raw":"00000000"},21115,"GC.3.32",null,3,"T",364,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",32,363.549]
[77,{"$raw":"00000000"},21115,"GC.3.33",null,3,"T",394,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",33,393.585]
[78,{"$raw":"00000000"},21115,"GC.3.34",null,3,"T",665,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",34,665.097]
[79,{"$raw":"00000000"},21115,"GC.3.35",null,3,"T",2307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",35,2306.981]
[81,{"$raw":"00000000"},21115,"GC.3.37",null,3,"T",1822,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",36,1821.727]
[82,{"$raw":"00000000"},21120,"GC.3.38",null,3,"T",394,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",37,394.446]
[85,{"$raw":"00000000"},21120,"GC.3.41",null,3,"T",653,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",38,653.190]
[89,{"$raw":"00000000"},21120,"GC.3.45",null,3,"T",732,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",39,731.633]
[90,{"$raw":"00000000"},21120,"GC.3.46",null,3,"T",2803,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",40,2803.207]
[91,{"$raw":"00000000"},21120,"GC.3.47",null,3,"T",1223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",41,1222.804]
[92,{"$raw":"00000000"},21120,"GC.3.48",null,3,"T",1870,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",42,1870.136]
[93,{"$raw":"00000000"},21120,"GC.3.49",null,3,"T",1190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",43,1189.660]
[94,{"$raw":"00000000"},21120,"GC.3.50",null,3,"T",846,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",44,846.304]
[96,{"$raw":"00000000"},21120,"GC.3.52",null,3,"T",1704,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",45,1704.051]
[97,{"$raw":"00000000"},21103,"GC.3.53",null,3,"T",570,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",46,569.732]
[98,{"$raw":"00000000"},21103,"GC.3.54",null,3,"T",368,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",47,368.111]
[99,{"$raw":"00000000"},21103,"GC.3.55",null,3,"T",2507,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",48,2506.639]
[100,{"$raw":"00000000"},21103,"GC.3.56",null,3,"T",413,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",49,413.215]
[101,{"$raw":"00000000"},21103,"GC.3.57",null,3,"T",3245,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",50,3244.632]
[102,{"$raw":"00000000"},21103,"GC.3.58",null,3,"T",2077,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",51,2076.926]
[103,{"$raw":"00000000"},21103,"GC.3.59",null,3,"T",1823,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",52,1823.201]
[104,{"$raw":"00000000"},21103,"GC.3.60",null,3,"T",135,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",53,135.115]
[105,{"$raw":"00000000"},21103,"GC.3.61",null,3,"T",3286,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",54,3286.146]
[106,{"$raw":"00000000"},21103,"GC.3.62",null,3,"T",833,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",55,832.690]
[107,{"$raw":"00000000"},21103,"GC.3.63",null,3,"T",2274,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",56,2274.245]
[108,{"$raw":"00000000"},21103,"GC.3.64",null,3,"T",181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",57,181.381]
[109,{"$raw":"00000000"},21103,"GC.3.65",null,3,"T",1425,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",58,1425.301]
[110,{"$raw":"00000000"},21103,"GC.3.66",null,3,"T",696,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",59,696.223]
[111,{"$raw":"00000000"},21103,"GC.3.67",null,3,"T",1788,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",60,1788.269]
[112,{"$raw":"00000000"},21103,"GC.3.68",null,3,"T",373,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",61,373.295]
[113,{"$raw":"00000000"},21103,"GC.3.69",null,3,"T",439,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",62,439.469]
[114,{"$raw":"00000000"},21103,"GC.3.70",null,3,"T",581,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",63,580.736]
[115,{"$raw":"00000000"},21103,"GC.3.71",null,3,"T",609,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",64,608.988]
[116,{"$raw":"00000000"},21103,"GC.3.72",null,3,"T",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",65,334.085]
[117,{"$raw":"00000000"},21103,"GC.3.73",null,3,"T",1332,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",66,1332.458]
[118,{"$raw":"00000000"},21103,"GC.3.74",null,3,"T",568,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",67,567.781]
[119,{"$raw":"00000000"},21103,"GC.3.75",null,3,"T",596,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",68,596.155]
[120,{"$raw":"00000000"},21103,"GC.3.76",null,3,"T",1783,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",69,1782.725]
[121,{"$raw":"00000000"},21103,"GC.3.77",null,3,"T",960,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",70,959.520]
[122,{"$raw":"00000000"},21103,"GC.3.78",null,3,"T",542,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",71,541.934]
[123,{"$raw":"00000000"},21103,"GC.3.79",null,3,"T",1157,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",72,1157.156]
[124,{"$raw":"00000000"},21103,"GC.3.80",null,3,"T",448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",73,447.909]
[126,{"$raw":"00000000"},21103,"GC.3.82",null,3,"T",279,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",74,279.096]
[127,{"$raw":"00000000"},21103,"GC.3.83",null,3,"T",87,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",75,87.357]
[129,{"$raw":"00000000"},21103,"GC.3.84",null,3,"T",1403,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",76,1402.665]
[130,{"$raw":"00000000"},21119,"GC.3.85",null,3,"T",1999,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",77,1998.956]
[131,{"$raw":"00000000"},21119,"GC.3.86",null,3,"T",352,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",78,351.972]
[132,{"$raw":"00000000"},21119,"GC.3.87",null,3,"T",453,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",79,453.122]
[136,{"$raw":"00000000"},21119,"GC.3.90",null,3,"T",1174,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",80,1173.651]
[137,{"$raw":"00000000"},21121,"GC.3.91",null,3,"T",714,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",81,713.518]
[138,{"$raw":"00000000"},21121,"GC.3.92",null,3,"T",1479,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",82,1478.857]
[139,{"$raw":"00000000"},21121,"GC.3.93",null,3,"T",1967,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",83,1966.706]
[140,{"$raw":"00000000"},21121,"GC.3.94",null,3,"T",1054,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",84,1054.327]
[141,{"$raw":"00000000"},21121,"GC.3.95",null,3,"T",90,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",85,90.422]
[142,{"$raw":"00000000"},21121,"GC.3.96",null,3,"T",664,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",86,663.778]
[143,{"$raw":"00000000"},21121,"GC.3.97",null,3,"T",1531,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",87,1530.982]
[145,{"$raw":"00000000"},21121,"GC.3.98",null,3,"T",979,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",88,978.831]
[146,{"$raw":"00000000"},21121,"GC.3.99",null,3,"T",581,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",89,580.900]
[147,{"$raw":"00000000"},21121,"GC.3.100",null,3,"T",1738,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",90,1737.936]
[148,{"$raw":"00000000"},21121,"GC.3.101",null,3,"T",1235,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",91,1235.083]
[149,{"$raw":"00000000"},21121,"GC.3.102",null,3,"T",1282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",92,1282.043]
[150,{"$raw":"00000000"},21121,"GC.3.103",null,3,"T",938,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",93,938.154]
[151,{"$raw":"00000000"},21121,"GC.3.104",null,3,"T",128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",94,127.898]
[152,{"$raw":"00000000"},21121,"GC.3.105",null,3,"T",1992,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",95,1992.111]
[153,{"$raw":"00000000"},21121,"GC.3.106",null,3,"T",52,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",96,51.679]
[154,{"$raw":"00000000"},21121,"GC.3.107",null,3,"T",731,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",97,730.891]
[156,{"$raw":"00000000"},21121,"GC.3.108",null,3,"T",1505,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",98,1505.495]
[158,{"$raw":"00000000"},21121,"GC.3.109",null,3,"T",1350,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",99,1350.452]
[159,{"$raw":"00000000"},21121,"GC.3.110",null,3,"T",1634,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",100,1634.271]
[160,{"$raw":"00000000"},21121,"GC.3.111",null,3,"T",182,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",101,181.508]
[161,{"$raw":"00000000"},21121,"GC.3.112",null,3,"T",1693,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",102,1693.095]
[162,{"$raw":"00000000"},21121,"GC.3.113",null,3,"T",663,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",103,663.151]
[163,{"$raw":"00000000"},21121,"GC.3.114",null,3,"T",176,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",104,176.466]
[164,{"$raw":"00000000"},21121,"GC.3.115",null,3,"T",1295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",105,1295.305]
[165,{"$raw":"00000000"},21121,"GC.3.116",null,3,"T",737,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",106,736.637]
[166,{"$raw":"00000000"},21121,"GC.3.117",null,3,"T",583,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",107,583.140]
[167,{"$raw":"00000000"},21121,"GC.3.118",null,3,"T",769,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",108,768.972]
[169,{"$raw":"00000000"},21121,"GC.3.119",null,3,"T",1233,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",109,1233.053]
[170,{"$raw":"00000000"},21121,"GC.3.120",null,3,"T",878,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",110,877.796]
[171,{"$raw":"00000000"},21121,"GC.3.121",null,3,"T",537,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",111,536.597]
[172,{"$raw":"00000000"},21121,"GC.3.122",null,3,"T",180,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",112,179.947]
[173,{"$raw":"00000000"},21121,"GC.3.123",null,3,"T",856,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",113,855.750]
[174,{"$raw":"00000000"},21121,"GC.3.124",null,3,"T",904,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",114,904.466]
[175,{"$raw":"00000000"},21121,"GC.3.125",null,3,"T",496,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",115,496.338]
[176,{"$raw":"00000000"},21121,"GC.3.126",null,3,"T",3340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",116,3339.835]
[177,{"$raw":"00000000"},21121,"GC.3.127",null,3,"T",209,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",117,208.894]
[178,{"$raw":"00000000"},21121,"GC.3.128",null,3,"T",963,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",118,963.215]
[179,{"$raw":"00000000"},21121,"GC.3.129",null,3,"T",2039,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",119,2038.539]
[180,{"$raw":"00000000"},21121,"GC.3.130",null,3,"T",1392,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",120,1391.972]
[181,{"$raw":"00000000"},21121,"GC.3.131",null,3,"T",384,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",121,384.278]
[182,{"$raw":"00000000"},21121,"GC.3.132",null,3,"T",1822,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",122,1821.795]
[183,{"$raw":"00000000"},21121,"GC.3.133",null,3,"T",941,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",123,941.401]
[184,{"$raw":"00000000"},21121,"GC.3.134",null,3,"T",533,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",124,532.968]
[185,{"$raw":"00000000"},21121,"GC.3.135",null,3,"T",1347,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",125,1346.777]
[186,{"$raw":"00000000"},21121,"GC.3.136",null,3,"T",398,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",126,398.469]
[187,{"$raw":"00000000"},21121,"GC.3.137",null,3,"T",102,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",127,102.386]
[188,{"$raw":"00000000"},21121,"GC.3.138",null,3,"T",471,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",128,470.532]
[189,{"$raw":"00000000"},21121,"GC.3.139",null,3,"T",774,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",129,773.997]
[190,{"$raw":"00000000"},21121,"GC.3.140",null,3,"T",527,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",130,527.387]
[191,{"$raw":"00000000"},21121,"GC.3.141",null,3,"T",1070,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",131,1069.556]
[192,{"$raw":"00000000"},21121,"GC.3.142",null,3,"T",2192,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",132,2192.196]
[193,{"$raw":"00000000"},21121,"GC.3.143",null,3,"T",2476,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",133,2476.495]
[194,{"$raw":"00000000"},21121,"GC.3.144",null,3,"T",1806,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",134,1805.960]
[195,{"$raw":"00000000"},21121,"GC.3.145",null,3,"T",1188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",135,1187.703]
[196,{"$raw":"00000000"},21121,"GC.3.146",null,3,"T",284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",136,284.328]
[197,{"$raw":"00000000"},21121,"GC.3.147",null,3,"T",575,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",137,574.809]
[198,{"$raw":"00000000"},21121,"GC.3.148",null,3,"T",1507,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",138,1506.747]
[199,{"$raw":"00000000"},21121,"GC.3.149",null,3,"T",932,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",139,932.229]
[200,{"$raw":"00000000"},21121,"GC.3.150",null,3,"T",840,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",140,839.569]
[202,{"$raw":"00000000"},21121,"GC.3.151",null,3,"T",1857,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",141,1856.947]
[203,{"$raw":"00000000"},21121,"GC.3.152",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",142,92.042]
[205,{"$raw":"00000000"},21121,"GC.3.153",null,3,"T",1507,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",143,1507.371]
[207,{"$raw":"00000000"},21121,"GC.3.154",null,3,"T",147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",144,147.275]
[212,{"$raw":"00000000"},21121,"GC.3.155",null,3,"T",285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",145,284.743]
[213,{"$raw":"00000000"},21121,"GC.3.156",null,3,"T",1378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",146,1378.226]
[214,{"$raw":"00000000"},21121,"GC.3.157",null,3,"T",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",147,369.930]
[215,{"$raw":"00000000"},21121,"GC.3.158",null,3,"T",1535,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",148,1535.494]
[216,{"$raw":"00000000"},21121,"GC.3.159",null,3,"T",2152,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",149,2152.350]
[217,{"$raw":"00000000"},21121,"GC.3.160",null,3,"T",1365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",150,1364.656]
[219,{"$raw":"00000000"},21121,"GC.3.161",null,3,"T",1112,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",151,1112.245]
[220,{"$raw":"00000000"},21121,"GC.3.162",null,3,"T",294,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",152,293.557]
[223,{"$raw":"00000000"},21121,"GC.3.163",null,3,"T",1277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",153,1277.021]
[224,{"$raw":"00000000"},21121,"GC.3.164",null,3,"T",1078,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",154,1078.037]
[225,{"$raw":"00000000"},21121,"GC.3.165",null,3,"T",853,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",155,853.467]
[226,{"$raw":"00000000"},21121,"GC.3.166",null,3,"T",1098,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",156,1098.477]
[227,{"$raw":"00000000"},21121,"GC.3.167",null,3,"T",806,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",157,805.885]
[228,{"$raw":"00000000"},21121,"GC.3.168",null,3,"T",2372,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",158,2371.687]
[229,{"$raw":"00000000"},21121,"GC.3.169",null,3,"T",873,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",159,873.419]
[230,{"$raw":"00000000"},21121,"GC.3.170",null,3,"T",2910,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",160,2909.736]
[231,{"$raw":"00000000"},21121,"GC.3.171",null,3,"T",1011,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",161,1010.593]
[232,{"$raw":"00000000"},21121,"GC.3.172",null,3,"T",322,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",162,322.257]
[233,{"$raw":"00000000"},21121,"GC.3.173",null,3,"T",1227,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",163,1226.950]
[234,{"$raw":"00000000"},21121,"GC.3.174",null,3,"T",758,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",164,757.662]
[235,{"$raw":"00000000"},21121,"GC.3.175",null,3,"T",191,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",165,190.792]
[236,{"$raw":"00000000"},21121,"GC.3.176",null,3,"T",694,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",166,694.399]
[237,{"$raw":"00000000"},21121,"GC.3.177",null,3,"T",437,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",167,436.680]
[238,{"$raw":"00000000"},21121,"GC.3.178",null,3,"T",440,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",168,440.372]
[239,{"$raw":"00000000"},21121,"GC.3.179",null,3,"T",762,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",169,761.988]
[240,{"$raw":"00000000"},21121,"GC.3.180",null,3,"T",962,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",170,961.929]
[241,{"$raw":"00000000"},21121,"GC.3.181",null,3,"T",596,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",171,595.554]
[242,{"$raw":"00000000"},21121,"GC.3.182",null,3,"T",215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",172,215.485]
[243,{"$raw":"00000000"},21121,"GC.3.183",null,3,"T",2000,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",173,1999.733]
[244,{"$raw":"00000000"},21121,"GC.3.184",null,3,"T",2933,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",174,2933.268]
[245,{"$raw":"00000000"},21121,"GC.3.185",null,3,"T",2670,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",175,2669.728]
[246,{"$raw":"00000000"},21121,"GC.3.186",null,3,"T",470,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",176,469.529]
[247,{"$raw":"00000000"},21121,"GC.3.187",null,3,"T",980,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",177,980.424]
[248,{"$raw":"00000000"},21121,"GC.3.188",null,3,"T",225,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",178,224.886]
[249,{"$raw":"00000000"},21121,"GC.3.189",null,3,"T",1395,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",179,1395.392]
[250,{"$raw":"00000000"},21121,"GC.3.190",null,3,"T",3050,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",180,3049.513]
[251,{"$raw":"00000000"},21121,"GC.3.191",null,3,"T",1255,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",181,1255.183]
[252,{"$raw":"00000000"},21121,"GC.3.192",null,3,"T",685,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",182,685.117]
[253,{"$raw":"00000000"},21121,"GC.3.193",null,3,"T",808,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",183,808.367]
[254,{"$raw":"00000000"},21121,"GC.3.194",null,3,"T",1674,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",184,1674.427]
[255,{"$raw":"00000000"},21121,"GC.3.195",null,3,"T",1255,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",185,1255.311]
[256,{"$raw":"00000000"},21121,"GC.3.196",null,3,"T",816,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",186,816.249]
[257,{"$raw":"00000000"},21121,"GC.3.197",null,3,"T",298,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",187,298.162]
[258,{"$raw":"00000000"},21121,"GC.3.198",null,3,"T",182,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",188,182.483]
[259,{"$raw":"00000000"},21121,"GC.3.199",null,3,"T",636,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",189,636.390]
[260,{"$raw":"00000000"},21121,"GC.3.200",null,3,"T",2712,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",190,2712.166]
[261,{"$raw":"00000000"},21121,"GC.3.201",null,3,"T",649,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",191,648.545]
[262,{"$raw":"00000000"},21121,"GC.3.202",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",192,8.959]
[263,{"$raw":"00000000"},21121,"GC.3.203",null,3,"T",1689,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",193,1688.976]
[264,{"$raw":"00000000"},21121,"GC.3.204",null,3,"T",374,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",194,373.886]
[265,{"$raw":"00000000"},21121,"GC.3.205",null,3,"T",2448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",195,2448.010]
[266,{"$raw":"00000000"},21121,"GC.3.206",null,3,"T",3378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",196,3378.174]
[267,{"$raw":"00000000"},21121,"GC.3.207",null,3,"T",953,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",197,952.646]
[268,{"$raw":"00000000"},21121,"GC.3.208",null,3,"T",512,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",198,512.092]
[269,{"$raw":"00000000"},21121,"GC.3.209",null,3,"T",345,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",199,344.732]
[271,{"$raw":"00000000"},21121,"GC.3.210",null,3,"T",193,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",200,193.180]
[272,{"$raw":"00000000"},21121,"GC.3.211",null,3,"T",3858,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",201,3858.072]
[273,{"$raw":"00000000"},21121,"GC.3.212",null,3,"T",168,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",202,167.870]
[274,{"$raw":"00000000"},21121,"GC.3.213",null,3,"T",404,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",203,404.102]
[275,{"$raw":"00000000"},21121,"GC.3.214",null,3,"T",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",204,257.395]
[276,{"$raw":"00000000"},21121,"GC.3.215",null,3,"T",999,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",205,998.717]
[277,{"$raw":"00000000"},21121,"GC.3.216",null,3,"T",933,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",206,932.592]
[278,{"$raw":"00000000"},21121,"GC.3.217",null,3,"T",582,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",207,581.569]
[279,{"$raw":"00000000"},21121,"GC.3.218",null,3,"T",1287,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",208,1287.053]
[280,{"$raw":"00000000"},21121,"GC.3.219",null,3,null,335,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",209,334.952]
[281,{"$raw":"00000000"},21121,"GC.3.220",null,3,"T",613,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",210,612.852]
[284,{"$raw":"00000000"},21121,"GC.3.221",null,3,"T",2281,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",211,2281.121]
[285,{"$raw":"00000000"},21121,"GC.3.222",null,3,"T",392,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",212,391.856]
[287,{"$raw":"00000000"},21121,"GC.3.223",null,3,"T",1722,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",213,1722.171]
[288,{"$raw":"00000000"},21121,"GC.3.224",null,3,"T",470,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",214,469.899]
[289,{"$raw":"00000000"},21121,"GC.3.225",null,3,"T",634,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",215,634.072]
[290,{"$raw":"00000000"},21121,"GC.3.226",null,3,"T",916,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",216,916.036]
[292,{"$raw":"00000000"},21121,"GC.3.227",null,3,"T",1378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",217,1378.129]
[294,{"$raw":"00000000"},21121,"GC.3.228",null,3,"T",2696,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",218,2696.464]
[295,{"$raw":"00000000"},21121,"GC.3.229",null,3,"T",1090,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",219,1089.821]
[296,{"$raw":"00000000"},21121,"GC.3.230",null,3,"T",558,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",220,558.193]
[297,{"$raw":"00000000"},21121,"GC.3.231",null,3,"T",2218,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",221,2218.498]
[298,{"$raw":"00000000"},21121,"GC.3.232",null,3,"T",440,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",222,439.617]
[299,{"$raw":"00000000"},21121,"GC.3.233",null,3,"T",1619,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",223,1619.384]
[300,{"$raw":"00000000"},21121,"GC.3.234",null,3,"T",47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",224,46.558]
[301,{"$raw":"00000000"},21121,"GC.3.235",null,3,"T",882,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",225,882.167]
[302,{"$raw":"00000000"},21121,"GC.3.236",null,3,"T",836,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",226,836.055]
[303,{"$raw":"00000000"},21121,"GC.3.237",null,3,"T",269,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",227,269.386]
[304,{"$raw":"00000000"},21121,"GC.3.238",null,3,"T",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",228,23.092]
[305,{"$raw":"00000000"},21121,"GC.3.239",null,3,"T",543,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",229,542.645]
[306,{"$raw":"00000000"},21121,"GC.3.240",null,3,"T",972,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",230,971.702]
[307,{"$raw":"00000000"},21121,"GC.3.241",null,3,"T",69,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",231,68.862]
[308,{"$raw":"00000000"},21121,"GC.3.242",null,3,"T",732,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",232,732.317]
[310,{"$raw":"00000000"},21121,"GC.3.243",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",233,6.236]
[311,{"$raw":"00000000"},21121,"GC.3.244",null,3,"T",1264,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",234,1264.331]
[312,{"$raw":"00000000"},21121,"GC.3.245",null,3,"T",148,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",235,148.240]
[313,{"$raw":"00000000"},21121,"GC.3.246",null,3,"T",1655,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",236,1655.251]
[315,{"$raw":"00000000"},21121,"GC.3.247",null,3,"T",1898,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",237,1898.178]
[316,{"$raw":"00000000"},21121,"GC.3.248",null,3,"T",2219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",238,2219.441]
[317,{"$raw":"00000000"},21121,"GC.3.249",null,3,"T",499,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",239,498.894]
[318,{"$raw":"00000000"},21121,"GC.3.250",null,3,"T",767,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",240,766.833]
[319,{"$raw":"00000000"},21121,"GC.3.251",null,3,"T",231,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",241,231.242]
[320,{"$raw":"00000000"},21121,"GC.3.252",null,3,"T",916,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",242,916.396]
[322,{"$raw":"00000000"},21121,"GC.3.253",null,3,"T",848,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",243,848.400]
[323,{"$raw":"00000000"},21121,"GC.3.254",null,3,"T",3560,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",244,3559.727]
[324,{"$raw":"00000000"},21121,"GC.3.255",null,3,"T",154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",245,153.614]
[325,{"$raw":"00000000"},21121,"GC.3.256",null,3,"T",1150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",246,1150.479]
[326,{"$raw":"00000000"},21121,"GC.3.257",null,3,"T",604,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",247,603.966]
[328,{"$raw":"00000000"},21121,"GC.3.258",null,3,"T",655,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",248,655.194]
[329,{"$raw":"00000000"},21121,"GC.3.259",null,3,"T",1162,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",249,1161.782]
[330,{"$raw":"00000000"},21121,"GC.3.260",null,3,"T",1516,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",250,1515.505]
[332,{"$raw":"00000000"},21121,"GC.3.261",null,3,"T",206,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",251,205.821]
[333,{"$raw":"00000000"},21121,"GC.3.262",null,3,"T",149,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",252,148.725]
[334,{"$raw":"00000000"},21121,"GC.3.263",null,3,"T",1864,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",253,1864.021]
[336,{"$raw":"00000000"},21121,"GC.3.264",null,3,"T",656,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",254,656.243]
[337,{"$raw":"00000000"},21121,"GC.3.265",null,3,"T",1523,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",255,1523.296]
[338,{"$raw":"00000000"},21121,"GC.3.266",null,3,"T",480,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",256,479.789]
[339,{"$raw":"00000000"},21121,"GC.3.267",null,3,"T",373,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",257,373.001]
[340,{"$raw":"00000000"},21121,"GC.3.268",null,3,"T",1139,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",258,1138.535]
[342,{"$raw":"00000000"},21121,"GC.3.269",null,3,"T",1902,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",259,1902.116]
[343,{"$raw":"00000000"},21121,"GC.3.270",null,3,"T",1945,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",260,1945.164]
[346,{"$raw":"00000000"},21121,"GC.3.271",null,3,"T",135,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",261,134.862]
[347,{"$raw":"00000000"},21121,"GC.3.272",null,3,"T",1433,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",262,1432.995]
[348,{"$raw":"00000000"},21121,"GC.3.273",null,3,"T",941,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",263,940.932]
[349,{"$raw":"00000000"},21121,"GC.3.274",null,3,"T",74,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",264,73.827]
[350,{"$raw":"00000000"},21121,"GC.3.275",null,3,"T",706,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",265,706.444]
[351,{"$raw":"00000000"},21121,"GC.3.276",null,3,"T",2582,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",266,2581.579]
[352,{"$raw":"00000000"},21121,"GC.3.277",null,3,"T",1486,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",267,1485.682]
[354,{"$raw":"00000000"},21121,"GC.3.278",null,3,"T",298,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",268,297.555]
[355,{"$raw":"00000000"},21121,"GC.3.279",null,3,"T",994,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",269,993.970]
[357,{"$raw":"00000000"},21121,"GC.3.280",null,3,"T",1996,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",270,1995.955]
[358,{"$raw":"00000000"},21121,"GC.3.281",null,3,"T",4953,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",271,4953.048]
[360,{"$raw":"00000000"},21121,"GC.3.282",null,3,"T",2055,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",272,2055.204]
[361,{"$raw":"00000000"},21121,"GC.3.283",null,3,"T",1773,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",273,1772.724]
[362,{"$raw":"00000000"},21121,"GC.3.284",null,3,"T",2541,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",274,2541.206]
[363,{"$raw":"00000000"},21121,"GC.3.285",null,3,"T",475,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",275,474.701]
[364,{"$raw":"00000000"},21121,"GC.3.286",null,3,"T",490,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",276,489.840]
[365,{"$raw":"00000000"},21121,"GC.3.287",null,3,"T",416,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",277,416.184]
[366,{"$raw":"00000000"},21121,"GC.3.288",null,3,"T",2981,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",278,2980.641]
[367,{"$raw":"00000000"},21121,"GC.3.289",null,3,"T",494,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",279,493.912]
[368,{"$raw":"00000000"},21121,"GC.3.290",null,3,"T",420,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",280,419.834]
[369,{"$raw":"00000000"},21121,"GC.3.291",null,3,"T",2443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",281,2443.214]
[370,{"$raw":"00000000"},21121,"GC.3.292",null,3,"T",607,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",282,606.749]
[371,{"$raw":"00000000"},21121,"GC.3.293",null,3,"T",217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",283,217.421]
[372,{"$raw":"00000000"},21121,"GC.3.294",null,3,"T",469,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",284,469.467]
[373,{"$raw":"00000000"},21121,"GC.3.295",null,3,"T",501,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",285,501.235]
[374,{"$raw":"00000000"},21121,"GC.3.296",null,3,"T",1762,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",286,1762.326]
[376,{"$raw":"00000000"},21121,"GC.3.298",null,3,"T",2004,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",287,2003.835]
[377,{"$raw":"00000000"},21121,"GC.3.299",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",288,39.030]
[378,{"$raw":"00000000"},21121,"GC.3.300",null,3,"T",780,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",289,779.991]
[379,{"$raw":"00000000"},21121,"GC.3.301",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",290,5.335]
[380,{"$raw":"00000000"},21121,"GC.3.302",null,3,"T",459,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",291,459.412]
[381,{"$raw":"00000000"},21121,"GC.3.303",null,3,"T",2277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",292,2276.967]
[382,{"$raw":"00000000"},21121,"GC.3.304",null,3,"T",2030,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",293,2029.598]
[383,{"$raw":"00000000"},21121,"GC.3.305",null,3,"T",242,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",294,242.386]
[384,{"$raw":"00000000"},21121,"GC.3.306",null,3,"T",1708,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",295,1707.744]
[385,{"$raw":"00000000"},21121,"GC.3.307",null,3,"T",1834,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",296,1834.114]
[386,{"$raw":"00000000"},21121,"GC.3.308",null,3,"T",805,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",297,805.319]
[387,{"$raw":"00000000"},21121,"GC.3.309",null,3,"T",911,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",298,910.775]
[388,{"$raw":"00000000"},21121,"GC.3.310",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",299,23.778]
[389,{"$raw":"00000000"},21121,"GC.3.311",null,3,"T",1199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",300,1199.433]
[392,{"$raw":"00000000"},21103,"GC.3.314",null,3,"T",100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",301,99.991]
[395,{"$raw":"00000000"},0,"GC.3.316",null,3,"T",119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",302,119.457]
[398,{"$raw":"00000000"},21121,"GC.3.318",null,3,"T",2770,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",303,2769.729]
[399,{"$raw":"00000000"},21121,"GC.3.319",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",304,0.267]
[401,{"$raw":"00000000"},21103,"GC.3.321",null,3,"T",2492,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",305,2492.038]
[403,{"$raw":"00000000"},21103,"GC.3.323",null,3,"T",1067,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",306,1066.734]
[404,{"$raw":"00000000"},21103,"GC.3.324",null,3,"T",687,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",307,687.075]
[405,{"$raw":"00000000"},21103,"GC.3.325",null,3,"T",620,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",308,620.253]
[406,{"$raw":"00000000"},21103,"GC.3.326",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",309,338.519]
[407,{"$raw":"00000000"},21103,"GC.3.327",null,3,"T",905,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",310,905.059]
[408,{"$raw":"00000000"},21103,"GC.3.328",null,3,"T",673,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",311,672.525]
[409,{"$raw":"00000000"},21103,"GC.3.329",null,3,"T",1156,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",312,1156.370]
[410,{"$raw":"00000000"},21103,"GC.3.330",null,3,"T",1811,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",313,1811.371]
[411,{"$raw":"00000000"},21103,"GC.3.331",null,3,"T",738,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",314,737.705]
[412,{"$raw":"00000000"},21103,"GC.3.332",null,3,"T",1537,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",315,1537.476]
[414,{"$raw":"00000000"},21103,"GC.3.333",null,3,"T",1043,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",316,1043.031]
[415,{"$raw":"00000000"},21103,"GC.3.334",null,3,"T",2781,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",317,2781.079]
[417,{"$raw":"00000000"},21103,"GC.3.335",null,3,"T",226,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",318,225.817]
[418,{"$raw":"00000000"},21103,"GC.3.336",null,3,"T",2016,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",319,2016.151]
[419,{"$raw":"00000000"},21103,"GC.3.337",null,3,"T",2579,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",320,2578.544]
[420,{"$raw":"00000000"},21103,"GC.3.338",null,3,"T",995,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",321,994.509]
[421,{"$raw":"00000000"},21103,"GC.3.339",null,3,"T",1775,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",322,1775.266]
[422,{"$raw":"00000000"},21103,"GC.3.340",null,3,"T",1635,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",323,1635.087]
[424,{"$raw":"00000000"},21103,"GC.3.342",null,3,"T",1992,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",324,1991.908]
[425,{"$raw":"00000000"},21103,"GC.3.343",null,3,"T",1131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",325,1130.635]
[427,{"$raw":"00000000"},21121,"GC.3.344",null,3,"T",596,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",326,596.147]
[431,{"$raw":"00000000"},21103,"GC.3.345",null,3,"T",1077,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",327,1076.593]
[432,{"$raw":"00000000"},21103,"GC.3.346",null,3,"T",1586,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",328,1586.133]
[433,{"$raw":"00000000"},21103,"GC.3.347",null,3,"T",26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",329,25.919]
[434,{"$raw":"00000000"},21103,"GC.3.348",null,3,"T",1932,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",330,1931.932]
[435,{"$raw":"00000000"},21121,"GC.3.349",null,3,"T",96,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",331,95.665]
[437,{"$raw":"00000000"},21121,"GC.3.350",null,3,"T",582,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",332,581.741]
[438,{"$raw":"00000000"},21103,"GC.3.351",null,3,"T",3100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",333,3099.779]
[439,{"$raw":"00000000"},21103,"GC.3.352",null,3,"T",158,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",334,158.361]
[442,{"$raw":"00000000"},21103,"GC.3.355",null,3,"T",256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",335,255.821]
[443,{"$raw":"00000000"},21103,"GC.3.356",null,3,"T",721,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",336,720.548]
[444,{"$raw":"00000000"},21103,"GC.3.357",null,3,"T",1575,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",337,1574.775]
[445,{"$raw":"00000000"},21103,"GC.3.358",null,3,"T",1553,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",338,1552.662]
[446,{"$raw":"00000000"},21103,"GC.3.359",null,3,"T",798,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",339,798.009]
[447,{"$raw":"00000000"},21103,"GC.3.360",null,3,"T",548,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",340,547.727]
[448,{"$raw":"00000000"},21103,"GC.3.361",null,3,"T",1443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",341,1443.393]
[449,{"$raw":"00000000"},21103,"GC.3.362",null,3,"T",1449,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",342,1449.233]
[450,{"$raw":"00000000"},21103,"GC.3.363",null,3,"T",839,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",343,838.569]
[451,{"$raw":"00000000"},21103,"GC.3.364",null,3,"T",887,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",344,887.103]
[452,{"$raw":"00000000"},21103,"GC.3.365",null,3,"T",1973,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",345,1972.573]
[455,{"$raw":"00000000"},21103,"GC.3.366",null,3,"T",1076,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",346,1076.371]
[456,{"$raw":"00000000"},21103,"GC.3.367",null,3,"T",113,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",347,113.172]
[457,{"$raw":"00000000"},21103,"GC.3.368",null,3,"T",1127,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",348,1126.806]
[459,{"$raw":"00000000"},21103,"GC.3.369",null,3,"T",2522,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",349,2522.023]
[461,{"$raw":"00000000"},21103,"GC.3.370",null,3,"T",1682,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",350,1682.296]
[462,{"$raw":"00000000"},21103,"GC.3.371",null,3,"T",1678,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",351,1677.792]
[463,{"$raw":"00000000"},21103,"GC.3.372",null,3,"T",336,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",352,335.554]
[465,{"$raw":"00000000"},21103,"GC.3.373",null,3,"T",521,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",353,521.139]
[466,{"$raw":"00000000"},21103,"GC.3.374",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",354,52.500]
[467,{"$raw":"00000000"},21103,"GC.3.375",null,3,"T",1264,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",355,1264.142]
[468,{"$raw":"00000000"},21103,"GC.3.376",null,3,"T",816,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",356,815.980]
[469,{"$raw":"00000000"},21103,"GC.3.377",null,3,"T",108,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",357,108.361]
[471,{"$raw":"00000000"},21103,"GC.3.378",null,3,"T",1810,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",358,1810.029]
[474,{"$raw":"00000000"},21103,"GC.3.381",null,3,"T",1548,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",359,1547.724]
[477,{"$raw":"00000000"},21103,"GC.3.384",null,3,"T",62,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",360,61.530]
[479,{"$raw":"00000000"},21103,"GC.3.386",null,3,"T",65,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",361,64.539]
[480,{"$raw":"00000000"},21103,"GC.3.387",null,3,"T",732,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",362,731.639]
[481,{"$raw":"00000000"},21103,"GC.3.388",null,3,"T",762,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",363,762.004]
[482,{"$raw":"00000000"},21103,"GC.3.389",null,3,"T",2070,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",364,2069.579]
[484,{"$raw":"00000000"},21103,"GC.3.390",null,3,"T",1858,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",365,1858.033]
[485,{"$raw":"00000000"},21103,"GC.3.391",null,3,"T",2050,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",366,2050.159]
[486,{"$raw":"00000000"},21103,"GC.3.392",null,3,"T",2247,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",367,2246.545]
[487,{"$raw":"00000000"},21103,"GC.3.393",null,3,"T",1271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",368,1270.570]
[492,{"$raw":"00000000"},21103,"GC.3.394",null,3,"T",3720,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",369,3719.506]
[494,{"$raw":"00000000"},21103,"GC.3.395",null,3,"T",890,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",370,889.807]
[496,{"$raw":"00000000"},21103,"GC.3.396",null,3,"T",807,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",371,807.215]
[498,{"$raw":"00000000"},21103,"GC.3.397",null,3,"T",1932,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",372,1932.330]
[499,{"$raw":"00000000"},21103,"GC.3.398",null,3,"T",622,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",373,621.739]
[500,{"$raw":"00000000"},21103,"GC.3.399",null,3,"T",96,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",374,96.065]
[501,{"$raw":"00000000"},21103,"GC.3.400",null,3,"T",1474,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",375,1474.305]
[503,{"$raw":"00000000"},21121,"GC.3.401",null,3,"T",965,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",376,964.962]
[504,{"$raw":"00000000"},21121,"GC.3.402",null,3,"T",1112,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",377,1111.878]
[505,{"$raw":"00000000"},21121,"GC.3.403",null,3,"T",1911,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",378,1911.332]
[507,{"$raw":"00000000"},21121,"GC.3.404",null,3,"T",1764,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",379,1763.743]
[510,{"$raw":"00000000"},21121,"GC.3.405",null,3,"T",1379,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",380,1379.133]
[512,{"$raw":"00000000"},21121,"GC.3.406",null,3,"T",1303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",381,1302.553]
[513,{"$raw":"00000000"},21121,"GC.3.407",null,3,"T",1397,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",382,1396.570]
[514,{"$raw":"00000000"},21121,"GC.3.408",null,3,"T",1169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",383,1169.246]
[515,{"$raw":"00000000"},21121,"GC.3.409",null,3,"T",1713,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",384,1713.261]
[516,{"$raw":"00000000"},21121,"GC.3.410",null,3,"T",1757,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",385,1756.756]
[517,{"$raw":"00000000"},21121,"GC.3.411",null,3,"T",569,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",386,568.838]
[518,{"$raw":"00000000"},21121,"GC.3.412",null,3,"T",1951,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",387,1950.973]
[519,{"$raw":"00000000"},21121,"GC.3.413",null,3,"T",1131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",388,1130.984]
[521,{"$raw":"00000000"},21121,"GC.3.414",null,3,"T",649,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",389,649.114]
[522,{"$raw":"00000000"},21121,"GC.3.415",null,3,"T",2127,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",390,2126.710]
[524,{"$raw":"00000000"},21121,"GC.3.416",null,3,"T",660,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",391,659.660]
[527,{"$raw":"00000000"},21121,"GC.3.417",null,3,"T",2480,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",392,2480.217]
[530,{"$raw":"00000000"},21106,"GC.3.419",null,3,"T",2179,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",393,2178.829]
[531,{"$raw":"00000000"},21106,"GC.3.420",null,3,"T",2947,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",394,2946.652]
[532,{"$raw":"00000000"},21106,"GC.3.421",null,3,"T",2186,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",395,2186.146]
[534,{"$raw":"00000000"},21106,"GC.3.422",null,3,"T",4600,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",396,4599.663]
[535,{"$raw":"00000000"},21106,"GC.3.423",null,3,"T",592,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",397,592.483]
[536,{"$raw":"00000000"},21106,"GC.3.424",null,3,"T",1221,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",398,1221.054]
[537,{"$raw":"00000000"},21106,"GC.3.425",null,3,"T",354,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",399,354.345]
[540,{"$raw":"00000000"},21106,"GC.3.426",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",400,0.065]
[541,{"$raw":"00000000"},21106,"GC.3.427",null,3,"T",301,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",401,301.238]
[542,{"$raw":"00000000"},21106,"GC.3.428",null,3,"T",481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",402,481.047]
[543,{"$raw":"00000000"},21106,"GC.3.429",null,3,"T",553,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",403,553.402]
[544,{"$raw":"00000000"},21106,"GC.3.430",null,3,"T",529,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",404,529.248]
[545,{"$raw":"00000000"},21106,"GC.3.431",null,3,"T",855,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",405,855.081]
[546,{"$raw":"00000000"},21106,"GC.3.432",null,3,"T",736,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",406,735.507]
[547,{"$raw":"00000000"},21106,"GC.3.433",null,3,"T",632,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",407,632.171]
[548,{"$raw":"00000000"},21106,"GC.3.434",null,3,"T",850,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",408,850.103]
[549,{"$raw":"00000000"},21106,"GC.3.435",null,3,"T",307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",409,306.615]
[550,{"$raw":"00000000"},21106,"GC.3.436",null,3,"T",883,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",410,883.265]
[551,{"$raw":"00000000"},21106,"GC.3.437",null,3,"T",1359,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",411,1358.937]
[552,{"$raw":"00000000"},21106,"GC.3.438",null,3,"T",2039,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",412,2038.753]
[553,{"$raw":"00000000"},21106,"GC.3.439",null,3,"T",679,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",413,678.730]
[554,{"$raw":"00000000"},21106,"GC.3.440",null,3,"T",748,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",414,748.339]
[555,{"$raw":"00000000"},21106,"GC.3.441",null,3,"T",985,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",415,985.311]
[556,{"$raw":"00000000"},21106,"GC.3.442",null,3,"T",439,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",416,439.367]
[557,{"$raw":"00000000"},21106,"GC.3.443",null,3,"T",1991,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",417,1991.490]
[558,{"$raw":"00000000"},21106,"GC.3.444",null,3,"T",808,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",418,808.165]
[559,{"$raw":"00000000"},21106,"GC.3.445",null,3,"T",228,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",419,228.429]
[560,{"$raw":"00000000"},21106,"GC.3.446",null,3,"T",1037,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",420,1037.490]
[561,{"$raw":"00000000"},21106,"GC.3.447",null,3,"T",2136,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",421,2136.070]
[562,{"$raw":"00000000"},21106,"GC.3.448",null,3,"T",1347,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",422,1346.707]
[563,{"$raw":"00000000"},21106,"GC.3.449",null,3,"T",618,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",423,617.559]
[564,{"$raw":"00000000"},21106,"GC.3.450",null,3,"T",1060,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",424,1060.130]
[566,{"$raw":"00000000"},21120,"GC.3.451",null,3,"T",3581,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",425,3581.158]
[569,{"$raw":"00000000"},21120,"GC.3.452",null,3,"T",3350,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",426,3350.481]
[570,{"$raw":"00000000"},21120,"GC.3.453",null,3,"T",4317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",427,4317.268]
[571,{"$raw":"00000000"},21120,"GC.3.454",null,3,"T",483,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",428,482.772]
[572,{"$raw":"00000000"},21120,"GC.3.455",null,3,"T",116,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",429,115.787]
[573,{"$raw":"00000000"},21120,"GC.3.456",null,3,"T",890,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",430,890.435]
[575,{"$raw":"00000000"},21106,"GC.3.457",null,3,"T",736,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",431,735.826]
[577,{"$raw":"00000000"},21106,"GC.3.458",null,3,"T",670,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",432,669.670]
[578,{"$raw":"00000000"},21106,"GC.3.459",null,3,"T",520,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",433,520.343]
[579,{"$raw":"00000000"},21120,"GC.3.460",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",434,28.503]
[580,{"$raw":"00000000"},21120,"GC.3.461",null,3,"T",580,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",435,580.226]
[581,{"$raw":"00000000"},21120,"GC.3.462",null,3,"T",1607,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",436,1607.018]
[585,{"$raw":"00000000"},21120,"GC.3.463",null,3,"T",1285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",437,1284.741]
[587,{"$raw":"00000000"},21120,"GC.3.464",null,3,"T",810,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",438,809.783]
[588,{"$raw":"00000000"},21120,"GC.3.465",null,3,"T",487,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",439,486.534]
[589,{"$raw":"00000000"},21120,"GC.3.466",null,3,"T",1645,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",440,1644.699]
[591,{"$raw":"00000000"},21120,"GC.3.467",null,3,"T",616,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",441,616.197]
[592,{"$raw":"00000000"},21120,"GC.3.468",null,3,"T",3618,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",442,3617.584]
[594,{"$raw":"00000000"},21120,"GC.3.469",null,3,"T",1710,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",443,1709.662]
[595,{"$raw":"00000000"},21120,"GC.3.470",null,3,"T",767,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",444,766.730]
[596,{"$raw":"00000000"},21120,"GC.3.471",null,3,"T",2677,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",445,2677.413]
[597,{"$raw":"00000000"},21120,"GC.3.472",null,3,"T",1321,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",446,1320.864]
[598,{"$raw":"00000000"},21120,"GC.3.473",null,3,"T",1322,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",447,1321.518]
[599,{"$raw":"00000000"},21120,"GC.3.474",null,3,"T",383,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",448,383.272]
[600,{"$raw":"00000000"},21120,"GC.3.475",null,3,"T",1471,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",449,1471.056]
[601,{"$raw":"00000000"},21120,"GC.3.476",null,3,"T",1749,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",450,1749.012]
[602,{"$raw":"00000000"},21120,"GC.3.477",null,3,"T",78,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",451,78.425]
[603,{"$raw":"00000000"},21120,"GC.3.478",null,3,"T",1829,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",452,1828.623]
[604,{"$raw":"00000000"},21120,"GC.3.479",null,3,"T",96,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",453,96.055]
[605,{"$raw":"00000000"},21120,"GC.3.480",null,3,"T",2801,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",454,2801.239]
[606,{"$raw":"00000000"},21120,"GC.3.481",null,3,"T",890,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",455,889.507]
[607,{"$raw":"00000000"},21120,"GC.3.482",null,3,"T",1315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",456,1314.795]
[612,{"$raw":"00000000"},21120,"GC.3.486",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",457,12.540]
[613,{"$raw":"00000000"},21115,"GC.3.487",null,3,"T",815,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",458,814.690]
[617,{"$raw":"00000000"},21115,"GC.3.488",null,3,"T",1398,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",459,1397.933]
[619,{"$raw":"00000000"},21115,"GC.3.489",null,3,"T",1950,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",460,1950.379]
[621,{"$raw":"00000000"},21120,"GC.3.490",null,3,"T",328,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",461,327.851]
[622,{"$raw":"00000000"},21120,"GC.3.491",null,3,"T",2628,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",462,2628.242]
[623,{"$raw":"00000000"},21120,"GC.3.492",null,3,"T",1807,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",463,1807.201]
[625,{"$raw":"00000000"},21120,"GC.3.493",null,3,"T",1462,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",464,1461.793]
[626,{"$raw":"00000000"},21120,"GC.3.494",null,3,"T",1061,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",465,1061.282]
[627,{"$raw":"00000000"},21120,"GC.3.495",null,3,"T",104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",466,104.128]
[628,{"$raw":"00000000"},21120,"GC.3.496",null,3,"T",2629,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",467,2629.299]
[629,{"$raw":"00000000"},21120,"GC.3.497",null,3,"T",2496,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",468,2495.987]
[630,{"$raw":"00000000"},21116,"GC.3.498",null,3,"T",1208,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",469,1208.132]
[631,{"$raw":"00000000"},21116,"GC.3.499",null,3,"T",1054,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",470,1054.215]
[632,{"$raw":"00000000"},21116,"GC.3.500",null,3,"T",890,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",471,890.195]
[633,{"$raw":"00000000"},21116,"GC.3.501",null,3,"T",163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",472,162.752]
[635,{"$raw":"00000000"},21116,"GC.3.502",null,3,"T",822,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",473,821.566]
[636,{"$raw":"00000000"},21116,"GC.3.503",null,3,"T",894,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",474,893.913]
[638,{"$raw":"00000000"},21116,"GC.3.504",null,3,"T",665,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",475,665.224]
[639,{"$raw":"00000000"},21116,"GC.3.505",null,3,"T",110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",476,110.038]
[640,{"$raw":"00000000"},21116,"GC.3.506",null,3,"T",813,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",477,812.728]
[641,{"$raw":"00000000"},21116,"GC.3.507",null,3,"T",1560,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",478,1560.280]
[642,{"$raw":"00000000"},21116,"GC.3.508",null,3,"T",2738,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",479,2737.715]
[644,{"$raw":"00000000"},21116,"GC.3.510",null,3,"T",557,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",480,556.905]
[646,{"$raw":"00000000"},21121,"GC.3.512",null,3,"T",1497,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",481,1496.657]
[648,{"$raw":"00000000"},21116,"GC.3.514",null,3,"T",887,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",482,887.362]
[649,{"$raw":"00000000"},21116,"GC.3.515",null,3,"T",759,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",483,758.779]
[650,{"$raw":"00000000"},21116,"GC.3.516",null,3,"T",273,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",484,272.692]
[653,{"$raw":"00000000"},21121,"GC.3.519",null,3,"T",1381,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",485,1380.575]
[654,{"$raw":"00000000"},21121,"GC.3.520",null,3,"T",1351,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",486,1351.219]
[661,{"$raw":"00000000"},21116,"GC.3.526",null,3,"T",269,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",487,269.002]
[662,{"$raw":"00000000"},21103,"GC.3.527",null,3,"T",284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",488,283.807]
[663,{"$raw":"00000000"},21103,"GC.3.528",null,3,"T",666,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",489,666.067]
[664,{"$raw":"00000000"},21103,"GC.3.529",null,3,"T",2413,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",490,2413.120]
[665,{"$raw":"00000000"},21103,"GC.3.530",null,3,"T",58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",491,58.189]
[666,{"$raw":"00000000"},21103,"GC.3.531",null,3,"T",688,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",492,688.052]
[668,{"$raw":"00000000"},21121,"GC.3.533",null,3,"T",354,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",493,354.437]
[670,{"$raw":"00000000"},21116,"GC.3.535",null,3,"T",2042,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",495,2042.118]
[672,{"$raw":"00000000"},21121,"GC.3.536",null,3,"T",2616,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",496,2616.486]
[673,{"$raw":"00000000"},21121,"GC.3.537",null,3,"T",1018,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",497,1017.797]
[674,{"$raw":"00000000"},21121,"GC.3.538",null,3,"T",4011,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",498,4010.824]
[676,{"$raw":"00000000"},21120,"GC.3.539",null,3,"T",149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",499,149.228]
[678,{"$raw":"00000000"},21120,"GC.3.541",null,3,"T",45,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",500,45.277]
[679,{"$raw":"00000000"},21120,"GC.3.542",null,3,"T",1173,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",501,1172.688]
[680,{"$raw":"00000000"},21120,"GC.3.543",null,3,"T",3018,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",502,3018.006]
[681,{"$raw":"00000000"},21120,"GC.3.544",null,3,"T",2351,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",503,2350.934]
[682,{"$raw":"00000000"},21120,"GC.3.545",null,3,"T",2379,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",504,2378.882]
[683,{"$raw":"00000000"},21120,"GC.3.546",null,3,"T",182,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",505,181.777]
[684,{"$raw":"00000000"},21120,"GC.3.547",null,3,"T",581,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",506,581.201]
[685,{"$raw":"00000000"},21115,"GC.3.548",null,3,"T",184,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",507,184.290]
[689,{"$raw":"00000000"},21115,"GC.3.551",null,3,"T",1287,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",508,1286.804]
[691,{"$raw":"00000000"},21115,"GC.3.553",null,3,"T",332,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",509,331.801]
[692,{"$raw":"00000000"},21115,"GC.3.554",null,3,"T",523,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",510,523.213]
[693,{"$raw":"00000000"},21120,"GC.3.555",null,3,"T",1496,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",511,1495.647]
[696,{"$raw":"00000000"},21103,"GC.3.558",null,3,"T",2048,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",512,2047.636]
[697,{"$raw":"00000000"},21103,"GC.3.559",null,3,"T",575,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",513,575.052]
[699,{"$raw":"00000000"},21103,"GC.3.561",null,3,"T",891,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",514,891.103]
[701,{"$raw":"00000000"},21103,"GC.3.563",null,3,"T",1432,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",515,1432.194]
[703,{"$raw":"00000000"},21115,"GC.3.565",null,3,"T",560,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",516,560.312]
[704,{"$raw":"00000000"},21115,"GC.3.566",null,3,"T",1633,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",517,1633.233]
[705,{"$raw":"00000000"},21103,"GC.3.567",null,3,"T",797,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",518,796.957]
[706,{"$raw":"00000000"},21103,"GC.3.568",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",519,7.846]
[707,{"$raw":"00000000"},21103,"GC.3.569",null,3,"T",4242,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",520,4242.353]
[708,{"$raw":"00000000"},21103,"GC.3.570",null,3,"T",146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",521,146.044]
[710,{"$raw":"00000000"},21103,"GC.3.572",null,3,"T",864,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",522,864.073]
[711,{"$raw":"00000000"},21103,"GC.3.573",null,3,"T",1572,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",523,1572.432]
[712,{"$raw":"00000000"},21103,"GC.3.574",null,3,"T",2334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",524,2334.492]
[713,{"$raw":"00000000"},21103,"GC.3.575",null,3,"T",2475,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",525,2475.062]
[714,{"$raw":"00000000"},21103,"GC.3.576",null,3,"T",2381,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",526,2380.637]
[716,{"$raw":"00000000"},21103,"GC.3.578",null,3,"T",187,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",527,186.766]
[717,{"$raw":"00000000"},21103,"GC.3.579",null,3,"T",1387,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",528,1386.545]
[718,{"$raw":"00000000"},21103,"GC.3.580",null,3,"T",1629,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",529,1628.685]
[719,{"$raw":"00000000"},21103,"GC.3.581",null,3,"T",1314,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",530,1314.039]
[720,{"$raw":"00000000"},21103,"GC.3.582",null,3,"T",231,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",531,231.203]
[721,{"$raw":"00000000"},21103,"GC.3.583",null,3,"T",1949,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",532,1949.104]
[722,{"$raw":"00000000"},21103,"GC.3.584",null,3,"T",1953,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",533,1953.213]
[723,{"$raw":"00000000"},21103,"GC.3.585",null,3,"T",1463,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",534,1462.893]
[726,{"$raw":"00000000"},21103,"GC.3.587",null,3,"T",1834,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",535,1834.085]
[728,{"$raw":"00000000"},21115,"GC.3.588",null,3,"T",394,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",536,394.036]
[730,{"$raw":"00000000"},21103,"GC.3.589",null,3,"T",4400,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",537,4399.650]
[731,{"$raw":"00000000"},21115,"GC.3.590",null,3,"T",501,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",538,501.040]
[732,{"$raw":"00000000"},21115,"GC.3.591",null,3,"T",2164,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",539,2163.742]
[733,{"$raw":"00000000"},21115,"GC.3.592",null,3,"T",805,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",540,805.328]
[734,{"$raw":"00000000"},21115,"GC.3.593",null,3,"T",358,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",541,357.644]
[735,{"$raw":"00000000"},21115,"GC.3.594",null,3,"T",432,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",542,431.716]
[736,{"$raw":"00000000"},21115,"GC.3.595",null,3,"T",705,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",543,704.853]
[737,{"$raw":"00000000"},21115,"GC.3.596",null,3,"T",44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",544,43.501]
[738,{"$raw":"00000000"},21115,"GC.3.597",null,3,"T",715,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",545,715.239]
[739,{"$raw":"00000000"},21115,"GC.3.598",null,3,"T",1296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",546,1295.580]
[740,{"$raw":"00000000"},21115,"GC.3.599",null,3,"T",720,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",547,720.069]
[741,{"$raw":"00000000"},21115,"GC.3.600",null,3,"T",1273,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",548,1273.351]
[742,{"$raw":"00000000"},21115,"GC.3.601",null,3,"T",1272,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",549,1271.785]
[743,{"$raw":"00000000"},21115,"GC.3.602",null,3,"T",533,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",550,533.046]
[744,{"$raw":"00000000"},21115,"GC.3.603",null,3,"T",631,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",551,630.691]
[745,{"$raw":"00000000"},21115,"GC.3.604",null,3,"T",754,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",552,754.149]
[746,{"$raw":"00000000"},21115,"GC.3.605",null,3,"T",1965,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",553,1965.303]
[747,{"$raw":"00000000"},21115,"GC.3.606",null,3,"T",707,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",554,706.731]
[748,{"$raw":"00000000"},21115,"GC.3.607",null,3,"T",836,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",555,835.938]
[749,{"$raw":"00000000"},21115,"GC.3.608",null,3,"T",1048,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",556,1047.991]
[750,{"$raw":"00000000"},21115,"GC.3.609",null,3,"T",292,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",557,291.542]
[751,{"$raw":"00000000"},21115,"GC.3.610",null,3,"T",967,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",558,966.847]
[752,{"$raw":"00000000"},21115,"GC.3.611",null,3,"T",2735,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",559,2734.513]
[753,{"$raw":"00000000"},21115,"GC.3.612",null,3,"T",35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",560,34.895]
[754,{"$raw":"00000000"},21115,"GC.3.613",null,3,"T",988,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",561,987.650]
[755,{"$raw":"00000000"},21115,"GC.3.614",null,3,"T",788,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",562,787.611]
[756,{"$raw":"00000000"},21115,"GC.3.615",null,3,"T",1164,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",563,1163.735]
[757,{"$raw":"00000000"},21115,"GC.3.616",null,3,"T",1907,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",564,1907.120]
[758,{"$raw":"00000000"},21115,"GC.3.617",null,3,"T",530,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",565,529.588]
[759,{"$raw":"00000000"},21115,"GC.3.618",null,3,"T",1244,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",566,1243.849]
[760,{"$raw":"00000000"},21115,"GC.3.619",null,3,"T",401,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",567,400.634]
[761,{"$raw":"00000000"},21115,"GC.3.620",null,3,"T",1103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",568,1102.694]
[762,{"$raw":"00000000"},21115,"GC.3.621",null,3,"T",1100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",569,1099.972]
[763,{"$raw":"00000000"},21115,"GC.3.622",null,3,"T",271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",570,271.311]
[766,{"$raw":"00000000"},21115,"GC.3.623",null,3,"T",3147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",571,3147.264]
[767,{"$raw":"00000000"},21115,"GC.3.624",null,3,"T",2021,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",572,2020.646]
[768,{"$raw":"00000000"},21115,"GC.3.625",null,3,"T",537,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",573,537.131]
[770,{"$raw":"00000000"},21115,"GC.3.626",null,3,"T",895,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",574,895.134]
[772,{"$raw":"00000000"},21115,"GC.3.627",null,3,"T",110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",575,110.334]
[773,{"$raw":"00000000"},21115,"GC.3.628",null,3,"T",2181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",576,2181.285]
[775,{"$raw":"00000000"},21121,"GC.3.630",null,3,"T",3462,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",577,3462.224]
[779,{"$raw":"00000000"},21103,"GC.3.632",null,3,"T",1916,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",578,1916.090]
[781,{"$raw":"00000000"},21115,"GC.3.634",null,3,"T",879,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",579,879.457]
[782,{"$raw":"00000000"},21115,"GC.3.635",null,3,"T",1282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",580,1282.413]
[788,{"$raw":"00000000"},21115,"GC.3.636",null,3,"T",1906,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",581,1906.040]
[789,{"$raw":"00000000"},21115,"GC.3.637",null,3,"T",1155,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",582,1155.259]
[790,{"$raw":"00000000"},21115,"GC.3.638",null,3,"T",253,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",583,252.671]
[791,{"$raw":"00000000"},21115,"GC.3.639",null,3,"T",217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",584,216.512]
[792,{"$raw":"00000000"},21115,"GC.3.640",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",585,39.169]
[797,{"$raw":"00000000"},21102,"GC.3.645",null,3,"T",859,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",586,859.076]
[800,{"$raw":"00000000"},21115,"GC.3.648",null,3,"T",1284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",587,1283.825]
[801,{"$raw":"00000000"},21107,"GC.3.649",null,3,"T",987,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",588,986.958]
[803,{"$raw":"00000000"},21107,"GC.3.650",null,3,"T",1659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",589,1658.869]
[806,{"$raw":"00000000"},21115,"GC.3.652",null,3,"T",1702,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",590,1702.077]
[807,{"$raw":"00000000"},21107,"GC.3.653",null,3,"T",652,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",591,651.884]
[809,{"$raw":"00000000"},21107,"GC.3.654",null,3,"T",2843,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",592,2842.559]
[810,{"$raw":"00000000"},21107,"GC.3.655",null,3,"T",1847,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",593,1847.201]
[811,{"$raw":"00000000"},21107,"GC.3.656",null,3,"T",2385,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",594,2385.354]
[812,{"$raw":"00000000"},21107,"GC.3.657",null,3,"T",251,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",595,250.989]
[813,{"$raw":"00000000"},21107,"GC.3.658",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",596,40.664]
[814,{"$raw":"00000000"},21107,"GC.3.659",null,3,"T",301,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",597,300.793]
[815,{"$raw":"00000000"},21107,"GC.3.660",null,3,"T",153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",598,153.333]
[817,{"$raw":"00000000"},21107,"GC.3.661",null,3,"T",344,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",599,343.963]
[818,{"$raw":"00000000"},21107,"GC.3.662",null,3,"T",3401,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",600,3400.622]
[819,{"$raw":"00000000"},21107,"GC.3.663",null,3,"T",1719,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",601,1718.998]
[820,{"$raw":"00000000"},21107,"GC.3.664",null,3,"T",1505,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",602,1505.400]
[821,{"$raw":"00000000"},21119,"GC.3.665",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",603,0.119]
[824,{"$raw":"00000000"},21119,"GC.3.668",null,3,"T",512,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",604,511.949]
[825,{"$raw":"00000000"},21119,"GC.3.669",null,3,"T",1541,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",605,1541.468]
[827,{"$raw":"00000000"},21119,"GC.3.671",null,3,"T",723,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",606,723.127]
[829,{"$raw":"00000000"},21115,"GC.3.673",null,3,"T",326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",607,326.468]
[830,{"$raw":"00000000"},21107,"GC.3.674",null,3,"T",1394,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",608,1394.170]
[833,{"$raw":"00000000"},21107,"GC.3.677",null,3,"T",398,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",609,398.305]
[834,{"$raw":"00000000"},21107,"GC.3.678",null,3,"T",2979,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",610,2979.271]
[836,{"$raw":"00000000"},21107,"GC.3.680",null,3,"T",122,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",611,122.332]
[837,{"$raw":"00000000"},21107,"GC.3.681",null,3,"T",804,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",612,803.955]
[838,{"$raw":"00000000"},21107,"GC.3.682",null,3,"T",1259,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",613,1259.018]
[839,{"$raw":"00000000"},21107,"GC.3.683",null,3,"T",1843,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",614,1842.763]
[841,{"$raw":"00000000"},21107,"GC.3.685",null,3,"T",1009,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",615,1009.014]
[842,{"$raw":"00000000"},21119,"GC.3.686",null,3,"T",338,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",616,337.592]
[844,{"$raw":"00000000"},21107,"GC.3.687",null,3,"T",3727,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",617,3726.680]
[845,{"$raw":"00000000"},21107,"GC.3.688",null,3,"T",1376,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",618,1376.379]
[846,{"$raw":"00000000"},21107,"GC.3.689",null,3,"T",387,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",619,386.662]
[847,{"$raw":"00000000"},21107,"GC.3.690",null,3,"T",2185,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",620,2185.220]
[849,{"$raw":"00000000"},21115,"GC.3.691",null,3,"T",404,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",621,403.527]
[850,{"$raw":"00000000"},21115,"GC.3.692",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",622,65.716]
[851,{"$raw":"00000000"},21115,"GC.3.693",null,3,"T",920,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",623,920.384]
[852,{"$raw":"00000000"},21115,"GC.3.694",null,3,"T",766,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",624,766.028]
[853,{"$raw":"00000000"},21107,"GC.3.695",null,3,"T",315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",625,315.323]
[854,{"$raw":"00000000"},21115,"GC.3.696",null,3,"T",1520,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",626,1519.732]
[856,{"$raw":"00000000"},21119,"GC.3.698",null,3,"T",1666,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",627,1666.327]
[858,{"$raw":"00000000"},21119,"GC.3.700",null,3,"T",2882,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",628,2881.678]
[859,{"$raw":"00000000"},21119,"GC.3.701",null,3,"T",1894,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",629,1893.586]
[861,{"$raw":"00000000"},21107,"GC.3.702",null,3,"T",947,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",630,947.197]
[862,{"$raw":"00000000"},21107,"GC.3.703",null,3,"T",81,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",631,81.466]
[863,{"$raw":"00000000"},21107,"GC.3.704",null,3,"T",729,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",632,728.603]
[865,{"$raw":"00000000"},21107,"GC.3.705",null,3,"T",495,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",633,495.039]
[867,{"$raw":"00000000"},21107,"GC.3.706",null,3,"T",891,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",634,891.429]
[868,{"$raw":"00000000"},21107,"GC.3.707",null,3,"T",1366,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",635,1366.366]
[869,{"$raw":"00000000"},21107,"GC.3.708",null,3,"T",1302,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",636,1302.233]
[870,{"$raw":"00000000"},21107,"GC.3.709",null,3,"T",447,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",637,446.788]
[872,{"$raw":"00000000"},21120,"GC.3.710",null,3,"T",1309,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",638,1309.006]
[874,{"$raw":"00000000"},21121,"GC.3.711",null,3,"T",776,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",639,775.610]
[879,{"$raw":"00000000"},21117,"GC.3.714",null,3,"T",836,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",640,835.568]
[883,{"$raw":"00000000"},21121,"GC.3.715",null,3,"T",254,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",641,253.997]
[884,{"$raw":"00000000"},21121,"GC.3.716",null,3,"T",451,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",642,450.589]
[886,{"$raw":"00000000"},21121,"GC.3.717",null,3,"T",640,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",643,639.783]
[887,{"$raw":"00000000"},21121,"GC.3.718",null,3,"T",818,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",644,817.542]
[891,{"$raw":"00000000"},21121,"GC.3.719",null,3,"T",1309,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",645,1308.742]
[892,{"$raw":"00000000"},21121,"GC.3.720",null,3,"T",961,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",646,960.628]
[893,{"$raw":"00000000"},21121,"GC.3.721",null,3,"T",517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",647,516.999]
[894,{"$raw":"00000000"},21121,"GC.3.722",null,3,"T",3824,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",648,3824.328]
[895,{"$raw":"00000000"},21121,"GC.3.723",null,3,"T",2081,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",649,2081.107]
[896,{"$raw":"00000000"},21121,"GC.3.724",null,3,"T",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",650,257.241]
[897,{"$raw":"00000000"},21121,"GC.3.725",null,3,"T",276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",651,275.643]
[898,{"$raw":"00000000"},21121,"GC.3.726",null,3,"T",1008,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",652,1008.118]
[900,{"$raw":"00000000"},21117,"GC.3.727",null,3,"T",671,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",653,670.651]
[901,{"$raw":"00000000"},21117,"GC.3.728",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",654,339.082]
[903,{"$raw":"00000000"},21117,"GC.3.729",null,3,"T",740,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",655,740.320]
[905,{"$raw":"00000000"},21117,"GC.3.730",null,3,"T",574,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",656,574.466]
[906,{"$raw":"00000000"},21117,"GC.3.731",null,3,"T",599,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",657,599.257]
[910,{"$raw":"00000000"},21117,"GC.3.734",null,3,"T",649,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",658,648.862]
[911,{"$raw":"00000000"},21121,"GC.3.735",null,3,"T",1077,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",659,1077.252]
[912,{"$raw":"00000000"},21121,"GC.3.736",null,3,"T",268,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",660,267.936]
[914,{"$raw":"00000000"},21121,"GC.3.737",null,3,"T",223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",661,223.326]
[915,{"$raw":"00000000"},21121,"GC.3.738",null,3,"T",723,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",662,723.278]
[916,{"$raw":"00000000"},21121,"GC.3.739",null,3,"T",623,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",663,623.154]
[924,{"$raw":"00000000"},21121,"GC.3.740",null,3,"T",875,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",664,875.050]
[926,{"$raw":"00000000"},21121,"GC.3.742",null,3,"T",1796,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",665,1796.415]
[927,{"$raw":"00000000"},21116,"GC.3.743",null,3,"T",796,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",666,795.738]
[928,{"$raw":"00000000"},21116,"GC.3.744",null,3,"T",1462,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",667,1461.803]
[930,{"$raw":"00000000"},21116,"GC.3.745",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",668,0.453]
[934,{"$raw":"00000000"},21121,"GC.3.747",null,3,"T",1789,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",669,1789.466]
[935,{"$raw":"00000000"},21121,"GC.3.748",null,3,"T",596,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",670,596.470]
[936,{"$raw":"00000000"},21121,"GC.3.749",null,3,"T",465,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",671,464.792]
[937,{"$raw":"00000000"},21121,"GC.3.750",null,3,"T",619,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",672,619.174]
[939,{"$raw":"00000000"},21121,"GC.3.751",null,3,"T",465,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",673,465.085]
[941,{"$raw":"00000000"},21121,"GC.3.752",null,3,"T",491,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",674,490.514]
[942,{"$raw":"00000000"},21121,"GC.3.753",null,3,"T",2128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",675,2128.126]
[943,{"$raw":"00000000"},21121,"GC.3.754",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",676,17.340]
[944,{"$raw":"00000000"},21121,"GC.3.755",null,3,"T",851,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",677,850.958]
[947,{"$raw":"00000000"},21121,"GC.3.756",null,3,"T",940,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",678,939.646]
[948,{"$raw":"00000000"},21121,"GC.3.757",null,3,"T",286,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",679,285.847]
[949,{"$raw":"00000000"},21121,"GC.3.758",null,3,"T",781,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",680,780.622]
[954,{"$raw":"00000000"},21121,"GC.3.759",null,3,"T",1042,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",681,1041.975]
[955,{"$raw":"00000000"},21121,"GC.3.760",null,3,"T",299,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",682,299.056]
[956,{"$raw":"00000000"},21121,"GC.3.761",null,3,"T",602,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",683,602.045]
[957,{"$raw":"00000000"},21121,"GC.3.762",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",684,1.739]
[958,{"$raw":"00000000"},21121,"GC.3.763",null,3,"T",623,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",685,623.379]
[959,{"$raw":"00000000"},21121,"GC.3.764",null,3,"T",341,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",686,341.163]
[960,{"$raw":"00000000"},21121,"GC.3.765",null,3,"T",1579,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",687,1579.140]
[961,{"$raw":"00000000"},21121,"GC.3.766",null,3,"T",851,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",688,851.181]
[962,{"$raw":"00000000"},21121,"GC.3.767",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",689,19.913]
[963,{"$raw":"00000000"},21121,"GC.3.768",null,3,"T",1823,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",690,1823.484]
[964,{"$raw":"00000000"},21121,"GC.3.769",null,3,"T",393,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",691,393.442]
[965,{"$raw":"00000000"},21121,"GC.3.770",null,3,"T",669,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",692,668.863]
[966,{"$raw":"00000000"},21121,"GC.3.771",null,3,"T",2613,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",693,2613.168]
[967,{"$raw":"00000000"},21121,"GC.3.772",null,3,"T",696,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",694,696.269]
[968,{"$raw":"00000000"},21121,"GC.3.773",null,3,"T",279,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",695,278.743]
[969,{"$raw":"00000000"},21121,"GC.3.774",null,3,"T",1492,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",696,1491.983]
[970,{"$raw":"00000000"},21121,"GC.3.775",null,3,"T",291,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",697,291.399]
[971,{"$raw":"00000000"},21121,"GC.3.776",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",698,34.149]
[973,{"$raw":"00000000"},21121,"GC.3.777",null,3,"T",1539,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",699,1539.329]
[974,{"$raw":"00000000"},21121,"GC.3.778",null,3,"T",497,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",700,497.419]
[975,{"$raw":"00000000"},21121,"GC.3.779",null,3,"T",871,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",701,870.848]
[976,{"$raw":"00000000"},21121,"GC.3.780",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",702,40.990]
[977,{"$raw":"00000000"},21121,"GC.3.781",null,3,"T",559,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",703,558.535]
[978,{"$raw":"00000000"},21121,"GC.3.782",null,3,"T",1215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",704,1215.026]
[979,{"$raw":"00000000"},21121,"GC.3.783",null,3,"T",596,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",705,595.716]
[980,{"$raw":"00000000"},21121,"GC.3.784",null,3,"T",349,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",706,349.005]
[981,{"$raw":"00000000"},21121,"GC.3.785",null,3,"T",2716,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",707,2716.360]
[982,{"$raw":"00000000"},21121,"GC.3.786",null,3,"T",2710,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",708,2709.548]
[983,{"$raw":"00000000"},21121,"GC.3.787",null,3,"T",833,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",709,833.208]
[984,{"$raw":"00000000"},21121,"GC.3.788",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",710,20.321]
[985,{"$raw":"00000000"},21121,"GC.3.789",null,3,"T",833,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",711,833.476]
[986,{"$raw":"00000000"},21121,"GC.3.790",null,3,"T",977,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",712,977.385]
[987,{"$raw":"00000000"},21121,"GC.3.791",null,3,"T",512,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",713,511.523]
[988,{"$raw":"00000000"},21121,"GC.3.792",null,3,"T",1457,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",714,1457.222]
[989,{"$raw":"00000000"},21121,"GC.3.793",null,3,"T",412,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",715,411.775]
[990,{"$raw":"00000000"},21121,"GC.3.794",null,3,"T",2182,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",716,2182.031]
[991,{"$raw":"00000000"},21121,"GC.3.795",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",717,0.243]
[992,{"$raw":"00000000"},21121,"GC.3.796",null,3,"T",838,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",718,838.177]
[993,{"$raw":"00000000"},21121,"GC.3.797",null,3,"T",43,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",719,43.426]
[994,{"$raw":"00000000"},21121,"GC.3.798",null,3,"T",1015,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",720,1015.176]
[995,{"$raw":"00000000"},21121,"GC.3.799",null,3,"T",195,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",721,194.997]
[996,{"$raw":"00000000"},21121,"GC.3.800",null,3,"T",654,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",722,654.347]
[997,{"$raw":"00000000"},21121,"GC.3.801",null,3,"T",1495,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",723,1494.667]
[998,{"$raw":"00000000"},21121,"GC.3.802",null,3,"T",2889,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",724,2888.520]
[1000,{"$raw":"00000000"},21121,"GC.3.803",null,3,"T",867,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",725,867.101]
[1004,{"$raw":"00000000"},21121,"GC.3.804",null,3,"T",762,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",726,762.017]
[1005,{"$raw":"00000000"},21121,"GC.3.805",null,3,"T",853,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",727,852.768]
[1006,{"$raw":"00000000"},21121,"GC.3.806",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",728,24.054]
[1007,{"$raw":"00000000"},21117,"GC.3.807",null,3,"T",1041,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",729,1041.390]
[1010,{"$raw":"00000000"},21117,"GC.3.808",null,3,"T",382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",730,381.790]
[1011,{"$raw":"00000000"},21117,"GC.3.809",null,3,"T",637,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",731,636.575]
[1014,{"$raw":"00000000"},21117,"GC.3.812",null,3,"T",711,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",732,710.875]
[1015,{"$raw":"00000000"},21121,"GC.3.813",null,3,"T",266,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",733,265.864]
[1025,{"$raw":"00000000"},21121,"GC.3.817",null,3,"T",18,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",734,17.659]
[1026,{"$raw":"00000000"},21121,"GC.3.818",null,3,"T",473,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",735,472.505]
[1028,{"$raw":"00000000"},21121,"GC.3.819",null,3,"T",224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",736,224.092]
[1029,{"$raw":"00000000"},21121,"GC.3.820",null,3,"T",1256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",737,1255.764]
[1030,{"$raw":"00000000"},21121,"GC.3.821",null,3,"T",977,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",738,977.109]
[1031,{"$raw":"00000000"},21121,"GC.3.822",null,3,"T",1115,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",739,1114.897]
[1032,{"$raw":"00000000"},21121,"GC.3.823",null,3,"T",158,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",740,158.045]
[1033,{"$raw":"00000000"},21116,"GC.3.824",null,3,"T",1355,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",741,1354.753]
[1035,{"$raw":"00000000"},21116,"GC.3.825",null,3,"T",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",742,303.633]
[1036,{"$raw":"00000000"},21116,"GC.3.826",null,3,"T",1535,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",743,1535.414]
[1037,{"$raw":"00000000"},21116,"GC.3.827",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",744,9.124]
[1038,{"$raw":"00000000"},21116,"GC.3.828",null,3,"T",1591,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",745,1590.965]
[1039,{"$raw":"00000000"},21116,"GC.3.829",null,3,"T",1978,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",746,1978.119]
[1040,{"$raw":"00000000"},21116,"GC.3.830",null,3,"T",119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",747,118.524]
[1043,{"$raw":"00000000"},21121,"GC.3.831",null,3,"T",478,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",748,477.957]
[1045,{"$raw":"00000000"},21121,"GC.3.832",null,3,"T",1017,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",749,1017.010]
[1046,{"$raw":"00000000"},21121,"GC.3.833",null,3,"T",36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",750,36.339]
[1047,{"$raw":"00000000"},21121,"GC.3.834",null,3,"T",343,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",751,343.310]
[1048,{"$raw":"00000000"},21121,"GC.3.835",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",752,17.017]
[1049,{"$raw":"00000000"},21121,"GC.3.836",null,3,"T",993,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",753,992.514]
[1050,{"$raw":"00000000"},21121,"GC.3.837",null,3,"T",341,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",754,341.058]
[1052,{"$raw":"00000000"},21121,"GC.3.838",null,3,"T",735,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",755,735.041]
[1055,{"$raw":"00000000"},21121,"GC.3.839",null,3,"T",721,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",756,721.240]
[1056,{"$raw":"00000000"},21121,"GC.3.840",null,3,"T",575,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",757,574.633]
[1058,{"$raw":"00000000"},21121,"GC.3.841",null,3,"T",986,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",758,986.071]
[1062,{"$raw":"00000000"},21116,"GC.3.844",null,3,"T",2055,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",759,2055.254]
[1065,{"$raw":"00000000"},21121,"GC.3.846",null,3,"T",1670,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",760,1670.384]
[1066,{"$raw":"00000000"},21121,"GC.3.847",null,3,"T",965,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",761,964.960]
[1067,{"$raw":"00000000"},21121,"GC.3.848",null,3,"T",537,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",762,537.061]
[1068,{"$raw":"00000000"},21121,"GC.3.849",null,3,"T",244,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",763,243.899]
[1069,{"$raw":"00000000"},21119,"GC.3.850",null,3,"T",2005,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",764,2004.896]
[1070,{"$raw":"00000000"},21119,"GC.3.851",null,3,"T",495,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",765,494.501]
[1071,{"$raw":"00000000"},21119,"GC.3.852",null,3,"T",1937,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",766,1937.272]
[1072,{"$raw":"00000000"},21119,"GC.3.853",null,3,"T",665,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",767,664.907]
[1073,{"$raw":"00000000"},21119,"GC.3.854",null,3,"T",1343,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",768,1343.329]
[1074,{"$raw":"00000000"},21119,"GC.3.855",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",769,338.653]
[1076,{"$raw":"00000000"},21119,"GC.3.856",null,3,"T",993,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",770,992.995]
[1077,{"$raw":"00000000"},21119,"GC.3.857",null,3,"T",301,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",771,300.989]
[1078,{"$raw":"00000000"},21119,"GC.3.858",null,3,"T",4335,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",772,4334.657]
[1079,{"$raw":"00000000"},21119,"GC.3.859",null,3,"T",1756,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",773,1755.897]
[1080,{"$raw":"00000000"},21119,"GC.3.860",null,3,"T",447,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",774,446.827]
[1081,{"$raw":"00000000"},21119,"GC.3.861",null,3,"T",938,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",775,938.134]
[1082,{"$raw":"00000000"},21119,"GC.3.862",null,3,"T",768,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",776,767.942]
[1083,{"$raw":"00000000"},21119,"GC.3.863",null,3,"T",25,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",777,25.401]
[1084,{"$raw":"00000000"},21119,"GC.3.864",null,3,"T",1008,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",778,1008.468]
[1085,{"$raw":"00000000"},21119,"GC.3.865",null,3,"T",391,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",779,390.760]
[1086,{"$raw":"00000000"},21119,"GC.3.866",null,3,"T",115,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",780,115.422]
[1087,{"$raw":"00000000"},21119,"GC.3.867",null,3,"T",870,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",781,869.795]
[1088,{"$raw":"00000000"},21119,"GC.3.868",null,3,"T",1266,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",782,1266.341]
[1090,{"$raw":"00000000"},21119,"GC.3.869",null,3,"T",1438,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",783,1438.043]
[1091,{"$raw":"00000000"},21119,"GC.3.870",null,3,"T",1167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",784,1166.850]
[1092,{"$raw":"00000000"},21119,"GC.3.871",null,3,"T",1497,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",785,1497.264]
[1093,{"$raw":"00000000"},21119,"GC.3.872",null,3,"T",995,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",786,995.281]
[1095,{"$raw":"00000000"},21119,"GC.3.873",null,3,"T",2734,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",787,2733.520]
[1096,{"$raw":"00000000"},21119,"GC.3.874",null,3,"T",1291,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",788,1291.310]
[1098,{"$raw":"00000000"},21119,"GC.3.875",null,3,"T",1030,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",789,1030.364]
[1099,{"$raw":"00000000"},21119,"GC.3.876",null,3,"T",2219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",790,2218.681]
[1100,{"$raw":"00000000"},21119,"GC.3.877",null,3,"T",2951,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",791,2951.177]
[1101,{"$raw":"00000000"},21119,"GC.3.878",null,3,"T",738,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",792,738.040]
[1102,{"$raw":"00000000"},21119,"GC.3.879",null,3,"T",964,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",793,964.124]
[1103,{"$raw":"00000000"},21119,"GC.3.880",null,3,"T",1423,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",794,1422.694]
[1104,{"$raw":"00000000"},21119,"GC.3.881",null,3,"T",364,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",795,363.872]
[1105,{"$raw":"00000000"},21119,"GC.3.882",null,3,"T",1617,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",796,1617.404]
[1106,{"$raw":"00000000"},21119,"GC.3.883",null,3,"T",378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",797,377.538]
[1107,{"$raw":"00000000"},21119,"GC.3.884",null,3,"T",143,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",798,142.810]
[1108,{"$raw":"00000000"},21119,"GC.3.885",null,3,"T",2406,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",799,2406.378]
[1110,{"$raw":"00000000"},21119,"GC.3.887",null,3,"T",888,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",800,887.845]
[1111,{"$raw":"00000000"},21119,"GC.3.888",null,3,"T",1481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",801,1480.929]
[1112,{"$raw":"00000000"},21119,"GC.3.889",null,3,"T",2173,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",802,2173.023]
[1113,{"$raw":"00000000"},21119,"GC.3.890",null,3,"T",330,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",803,330.463]
[1114,{"$raw":"00000000"},21119,"GC.3.891",null,3,"T",879,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",804,878.661]
[1115,{"$raw":"00000000"},21119,"GC.3.892",null,3,"T",385,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",805,385.063]
[1116,{"$raw":"00000000"},21119,"GC.3.893",null,3,"T",1375,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",806,1375.116]
[1117,{"$raw":"00000000"},21119,"GC.3.894",null,3,"T",32,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",807,31.734]
[1118,{"$raw":"00000000"},21119,"GC.3.895",null,3,"T",1666,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",808,1665.839]
[1119,{"$raw":"00000000"},21119,"GC.3.896",null,3,"T",38,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",809,38.222]
[1120,{"$raw":"00000000"},21119,"GC.3.897",null,3,"T",652,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",810,652.215]
[1121,{"$raw":"00000000"},21119,"GC.3.898",null,3,"T",768,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",811,768.294]
[1122,{"$raw":"00000000"},21119,"GC.3.899",null,3,"T",1312,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",812,1311.907]
[1123,{"$raw":"00000000"},21119,"GC.3.900",null,3,"T",733,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",813,732.794]
[1124,{"$raw":"00000000"},21119,"GC.3.901",null,3,"T",1398,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",814,1398.150]
[1125,{"$raw":"00000000"},21119,"GC.3.902",null,3,"T",821,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",815,821.437]
[1126,{"$raw":"00000000"},21119,"GC.3.903",null,3,"T",1455,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",816,1455.415]
[1127,{"$raw":"00000000"},21119,"GC.3.904",null,3,"T",1414,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",817,1414.322]
[1129,{"$raw":"00000000"},21107,"GC.3.905",null,3,"T",1731,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",818,1731.054]
[1130,{"$raw":"00000000"},21107,"GC.3.906",null,3,"T",758,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",819,758.228]
[1131,{"$raw":"00000000"},21107,"GC.3.907",null,3,"T",685,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",820,684.994]
[1132,{"$raw":"00000000"},21107,"GC.3.908",null,3,"T",952,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",821,951.703]
[1133,{"$raw":"00000000"},21107,"GC.3.909",null,3,"T",1508,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",822,1507.708]
[1134,{"$raw":"00000000"},21107,"GC.3.910",null,3,"T",565,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",823,565.005]
[1135,{"$raw":"00000000"},21107,"GC.3.911",null,3,"T",1173,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",824,1172.535]
[1136,{"$raw":"00000000"},21107,"GC.3.912",null,3,"T",1970,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",825,1969.759]
[1140,{"$raw":"00000000"},21107,"GC.3.913",null,3,"T",2658,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",826,2657.956]
[1141,{"$raw":"00000000"},21107,"GC.3.914",null,3,"T",1733,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",827,1733.263]
[1142,{"$raw":"00000000"},21107,"GC.3.915",null,3,"T",960,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",828,959.788]
[1143,{"$raw":"00000000"},21107,"GC.3.916",null,3,"T",558,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",829,557.613]
[1144,{"$raw":"00000000"},21107,"GC.3.917",null,3,"T",425,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",830,424.858]
[1145,{"$raw":"00000000"},21107,"GC.3.918",null,3,"T",460,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",831,459.652]
[1148,{"$raw":"00000000"},21107,"GC.3.919",null,3,"T",325,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",832,325.260]
[1149,{"$raw":"00000000"},21107,"GC.3.920",null,3,"T",1792,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",833,1791.902]
[1150,{"$raw":"00000000"},21107,"GC.3.921",null,3,"T",1222,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",834,1222.115]
[1151,{"$raw":"00000000"},21107,"GC.3.922",null,3,"T",786,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",835,786.244]
[1152,{"$raw":"00000000"},21102,"GC.3.923",null,3,"T",594,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",836,593.992]
[1153,{"$raw":"00000000"},21102,"GC.3.924",null,3,"T",858,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",837,857.982]
[1154,{"$raw":"00000000"},21102,"GC.3.925",null,3,"T",327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",838,327.062]
[1155,{"$raw":"00000000"},21102,"GC.3.926",null,3,"T",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",839,248.445]
[1159,{"$raw":"00000000"},21107,"GC.3.930",null,3,"T",310,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",840,309.856]
[1160,{"$raw":"00000000"},21107,"GC.3.931",null,3,"T",1278,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",841,1277.566]
[1161,{"$raw":"00000000"},21107,"GC.3.932",null,3,"T",1090,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",842,1090.321]
[1162,{"$raw":"00000000"},21107,"GC.3.933",null,3,"T",917,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",843,916.812]
[1163,{"$raw":"00000000"},21107,"GC.3.934",null,3,"T",1332,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",844,1331.857]
[1164,{"$raw":"00000000"},21107,"GC.3.935",null,3,"T",1280,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",845,1280.270]
[1165,{"$raw":"00000000"},21107,"GC.3.936",null,3,"T",716,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",846,716.284]
[1166,{"$raw":"00000000"},21115,"GC.3.937",null,3,"T",527,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",847,526.909]
[1167,{"$raw":"00000000"},21115,"GC.3.938",null,3,"T",2601,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",848,2601.260]
[1171,{"$raw":"00000000"},21115,"GC.3.939",null,3,"T",1408,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",849,1407.583]
[1175,{"$raw":"00000000"},21117,"GC.3.941",null,3,"T",3001,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",850,3000.974]
[1178,{"$raw":"00000000"},21115,"GC.3.942",null,3,"T",1354,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",851,1354.257]
[1183,{"$raw":"00000000"},21115,"GC.3.946",null,3,"T",691,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",852,690.652]
[1188,{"$raw":"00000000"},21102,"GC.3.947",null,3,"T",1760,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",853,1759.636]
[1189,{"$raw":"00000000"},21102,"GC.3.948",null,3,"T",718,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",854,718.104]
[1191,{"$raw":"00000000"},21102,"GC.3.949",null,3,"T",1126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",855,1125.857]
[1194,{"$raw":"00000000"},21120,"GC.3.951",null,3,"T",1196,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",856,1195.821]
[1195,{"$raw":"00000000"},21120,"GC.3.952",null,3,"T",2088,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",857,2087.616]
[1196,{"$raw":"00000000"},21120,"GC.3.953",null,3,"T",1969,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",858,1969.470]
[1197,{"$raw":"00000000"},21120,"GC.3.954",null,3,"T",726,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",859,725.662]
[1201,{"$raw":"00000000"},0,"GC.3.956",null,3,"T",91,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",860,91.349]
[1202,{"$raw":"00000000"},0,"GC.3.957",null,3,"T",200,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",861,200.068]
[1204,{"$raw":"00000000"},21122,"GC.3.959",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",862,4.115]
[1205,{"$raw":"00000000"},21122,"GC.3.960",null,3,"T",402,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",863,402.390]
[1207,{"$raw":"00000000"},21107,"GC.3.962",null,3,"T",263,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",864,262.792]
[1209,{"$raw":"00000000"},21107,"GC.3.963",null,3,"T",495,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",865,495.274]
[1210,{"$raw":"00000000"},21107,"GC.3.964",null,3,"T",374,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",866,373.749]
[1211,{"$raw":"00000000"},21107,"GC.3.965",null,3,"T",212,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",867,211.616]
[1212,{"$raw":"00000000"},21107,"GC.3.966",null,3,"T",347,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",868,346.825]
[1213,{"$raw":"00000000"},21107,"GC.3.967",null,3,"T",668,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",869,668.486]
[1215,{"$raw":"00000000"},21107,"GC.3.969",null,3,"T",519,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",870,519.370]
[1217,{"$raw":"00000000"},0,"GC.3.971",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",871,84.604]
[1218,{"$raw":"00000000"},0,"GC.3.972",null,3,"T",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",872,18.728]
[1220,{"$raw":"00000000"},21122,"GC.3.974",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",873,6.142]
[1221,{"$raw":"00000000"},21122,"GC.3.975",null,3,"T",76,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",874,76.047]
[1222,{"$raw":"00000000"},21122,"GC.3.976",null,3,"T",841,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",875,841.025]
[1224,{"$raw":"00000000"},21122,"GC.3.977",null,3,"T",856,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",876,855.721]
[1225,{"$raw":"00000000"},21122,"GC.3.978",null,3,"T",695,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",877,695.253]
[1231,{"$raw":"00000000"},21122,"GC.3.983",null,3,"T",543,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",878,543.128]
[1232,{"$raw":"00000000"},21122,"GC.3.984",null,3,"T",771,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",879,770.995]
[1233,{"$raw":"00000000"},21122,"GC.3.985",null,3,"T",482,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",880,481.563]
[1234,{"$raw":"00000000"},21122,"GC.3.986",null,3,"T",462,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",881,461.785]
[1237,{"$raw":"00000000"},21122,"GC.3.988",null,3,"T",1222,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",882,1222.175]
[1238,{"$raw":"00000000"},21122,"GC.3.989",null,3,"T",710,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",883,710.130]
[1239,{"$raw":"00000000"},21122,"GC.3.990",null,3,"T",505,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",884,504.936]
[1240,{"$raw":"00000000"},21122,"GC.3.991",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",885,9.861]
[1241,{"$raw":"00000000"},21122,"GC.3.992",null,3,"T",468,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",886,468.070]
[1242,{"$raw":"00000000"},21122,"GC.3.993",null,3,"T",331,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",887,331.070]
[1243,{"$raw":"00000000"},21122,"GC.3.994",null,3,"T",528,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",888,528.249]
[1244,{"$raw":"00000000"},21122,"GC.3.995",null,3,"T",351,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",889,350.791]
[1246,{"$raw":"00000000"},21122,"GC.3.996",null,3,"T",530,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",890,529.718]
[1251,{"$raw":"00000000"},21107,"GC.3.998",null,3,"T",146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",891,146.002]
[1252,{"$raw":"00000000"},21107,"GC.3.999",null,3,"T",886,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",892,886.274]
[1253,{"$raw":"00000000"},21107,"GC.3.1000",null,3,"T",627,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",893,626.643]
[1254,{"$raw":"00000000"},21107,"GC.3.1001",null,3,null,919,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","OV",894,918.716]
[1255,{"$raw":"00000000"},21107,"GC.3.1002",null,3,"T",774,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",895,773.500]
[1256,{"$raw":"00000000"},21107,"GC.3.1003",null,3,"T",1551,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",896,1550.690]
[1257,{"$raw":"00000000"},21107,"GC.3.1004",null,3,"T",309,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",897,308.758]
[1258,{"$raw":"00000000"},21107,"GC.3.1005",null,3,"T",327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",898,327.236]
[1259,{"$raw":"00000000"},21107,"GC.3.1006",null,3,"T",33,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",899,32.878]
[1261,{"$raw":"00000000"},21107,"GC.3.1008",null,3,"T",637,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",900,636.681]
[1262,{"$raw":"00000000"},21107,"GC.3.1009",null,3,"T",376,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",901,375.715]
[1263,{"$raw":"00000000"},21107,"GC.3.1010",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",902,14.960]
[1266,{"$raw":"00000000"},21107,"GC.3.1012",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",903,6.927]
[1267,{"$raw":"00000000"},21107,"GC.3.1013",null,3,"T",1060,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",904,1060.073]
[1269,{"$raw":"00000000"},21107,"GC.3.1015",null,3,"T",1495,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",905,1494.693]
[1270,{"$raw":"00000000"},21107,"GC.3.1016",null,3,"T",467,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",906,466.854]
[1272,{"$raw":"00000000"},21107,"GC.3.1018",null,3,"T",826,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",907,825.828]
[1273,{"$raw":"00000000"},21107,"GC.3.1019",null,3,"T",3476,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",908,3475.826]
[1274,{"$raw":"00000000"},0,"GC.3.1020",null,3,"T",14,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",909,13.790]
[1283,{"$raw":"00000000"},21107,"GC.3.1029",null,3,"T",1301,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",910,1301.290]
[1284,{"$raw":"00000000"},21107,"GC.3.1030",null,3,"T",762,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",911,761.834]
[1285,{"$raw":"00000000"},21107,"GC.3.1031",null,3,"T",933,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",912,933.477]
[1286,{"$raw":"00000000"},21107,"GC.3.1032",null,3,"T",381,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",913,380.588]
[1287,{"$raw":"00000000"},21107,"GC.3.1033",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",914,296.061]
[1288,{"$raw":"00000000"},21107,"GC.3.1034",null,3,"T",545,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",915,545.484]
[1289,{"$raw":"00000000"},21107,"GC.3.1035",null,3,"T",1241,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",916,1241.053]
[1291,{"$raw":"00000000"},21107,"GC.3.1037",null,3,"T",1114,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",917,1113.742]
[1292,{"$raw":"00000000"},21107,"GC.3.1038",null,3,"T",659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",918,659.306]
[1294,{"$raw":"00000000"},0,"GC.3.1040",null,3,"T",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",919,21.460]
[1296,{"$raw":"00000000"},0,"GC.3.1042",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",920,24.116]
[1297,{"$raw":"00000000"},21107,"GC.3.1043",null,3,"T",1451,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",921,1451.021]
[1299,{"$raw":"00000000"},21107,"GC.3.1044",null,3,"T",3001,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",922,3000.617]
[1300,{"$raw":"00000000"},21107,"GC.3.1045",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",923,41.353]
[1301,{"$raw":"00000000"},21107,"GC.3.1046",null,3,"T",1912,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",924,1912.354]
[1302,{"$raw":"00000000"},21107,"GC.3.1047",null,3,"T",1563,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",925,1562.654]
[1303,{"$raw":"00000000"},21107,"GC.3.1048",null,3,"T",1494,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",926,1494.196]
[1304,{"$raw":"00000000"},21107,"GC.3.1049",null,3,"T",1606,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",927,1605.887]
[1305,{"$raw":"00000000"},21107,"GC.3.1050",null,3,"T",513,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",928,513.267]
[1306,{"$raw":"00000000"},21107,"GC.3.1051",null,3,"T",100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",929,99.809]
[1307,{"$raw":"00000000"},21107,"GC.3.1052",null,3,"T",1300,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",930,1300.292]
[1309,{"$raw":"00000000"},21107,"GC.3.1053",null,3,"T",1557,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",931,1557.100]
[1310,{"$raw":"00000000"},21107,"GC.3.1054",null,3,"T",259,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",932,259.382]
[1313,{"$raw":"00000000"},21107,"GC.3.1055",null,3,"T",1244,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",933,1243.509]
[1314,{"$raw":"00000000"},21107,"GC.3.1056",null,3,"T",1362,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",934,1361.793]
[1315,{"$raw":"00000000"},21107,"GC.3.1057",null,3,"T",131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",935,131.415]
[1316,{"$raw":"00000000"},21107,"GC.3.1058",null,3,"T",1505,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",936,1505.390]
[1317,{"$raw":"00000000"},21107,"GC.3.1059",null,3,"T",782,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",937,781.626]
[1318,{"$raw":"00000000"},21107,"GC.3.1060",null,3,"T",152,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",938,152.249]
[1319,{"$raw":"00000000"},21107,"GC.3.1061",null,3,"T",923,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",939,923.067]
[1321,{"$raw":"00000000"},21119,"GC.3.1063",null,3,"T",666,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",940,665.937]
[1322,{"$raw":"00000000"},21119,"GC.3.1064",null,3,"T",2005,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",941,2004.781]
[1323,{"$raw":"00000000"},21119,"GC.3.1065",null,3,"T",2782,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",942,2781.655]
[1325,{"$raw":"00000000"},21119,"GC.3.1066",null,3,"T",1455,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",943,1455.083]
[1326,{"$raw":"00000000"},21119,"GC.3.1067",null,3,"T",507,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",944,506.651]
[1328,{"$raw":"00000000"},21119,"GC.3.1069",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",945,40.111]
[1334,{"$raw":"00000000"},21119,"GC.3.1074",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",946,143.693]
[1338,{"$raw":"00000000"},21119,"GC.3.1075",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",947,16.696]
[1339,{"$raw":"00000000"},21119,"GC.3.1076",null,3,"T",764,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",948,763.626]
[1340,{"$raw":"00000000"},21119,"GC.3.1077",null,3,"T",815,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",949,815.065]
[1341,{"$raw":"00000000"},21119,"GC.3.1078",null,3,"T",963,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",950,963.333]
[1344,{"$raw":"00000000"},21119,"GC.3.1081",null,3,"T",254,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",951,253.851]
[1345,{"$raw":"00000000"},21119,"GC.3.1082",null,3,"T",1032,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",952,1032.318]
[1346,{"$raw":"00000000"},21119,"GC.3.1083",null,3,"T",237,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",953,237.177]
[1347,{"$raw":"00000000"},21111,"GC.3.1084",null,3,"T",1589,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",954,1589.223]
[1348,{"$raw":"00000000"},21111,"GC.3.1085",null,3,"T",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",955,317.287]
[1349,{"$raw":"00000000"},21111,"GC.3.1086",null,3,"T",262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",956,261.594]
[1352,{"$raw":"00000000"},21111,"GC.3.1089",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",957,11.292]
[1354,{"$raw":"00000000"},21111,"GC.3.1091",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",958,5.843]
[1355,{"$raw":"00000000"},0,"GC.3.1092",null,3,"T",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",959,59.880]
[1357,{"$raw":"00000000"},21106,"GC.3.1094",null,3,"T",646,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",960,646.158]
[1359,{"$raw":"00000000"},21106,"GC.3.1096",null,3,"T",838,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",961,837.732]
[1360,{"$raw":"00000000"},21106,"GC.3.1097",null,3,"T",108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",962,108.096]
[1361,{"$raw":"00000000"},21118,"GC.3.1098",null,3,"T",63,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",963,63.206]
[1362,{"$raw":"00000000"},21118,"GC.3.1099",null,3,"T",803,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",964,803.179]
[1363,{"$raw":"00000000"},21118,"GC.3.1100",null,3,"T",323,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",965,323.309]
[1364,{"$raw":"00000000"},21118,"GC.3.1101",null,3,"T",845,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",966,845.407]
[1365,{"$raw":"00000000"},21118,"GC.3.1102",null,3,"T",1211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",967,1210.981]
[1366,{"$raw":"00000000"},21118,"GC.3.1103",null,3,"T",306,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",968,305.676]
[1367,{"$raw":"00000000"},21118,"GC.3.1104",null,3,"T",343,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",969,342.624]
[1368,{"$raw":"00000000"},21102,"GC.3.1105",null,3,"T",251,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",970,251.264]
[1369,{"$raw":"00000000"},21102,"GC.3.1106",null,3,"T",1162,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",971,1161.881]
[1370,{"$raw":"00000000"},21102,"GC.3.1107",null,3,"T",958,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",972,958.431]
[1371,{"$raw":"00000000"},21102,"GC.3.1108",null,3,"T",91,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",973,91.137]
[1373,{"$raw":"00000000"},21102,"GC.3.1110",null,3,"T",657,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",974,656.843]
[1374,{"$raw":"00000000"},21118,"GC.3.1111",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",975,6.367]
[1375,{"$raw":"00000000"},21118,"GC.3.1112",null,3,"T",417,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",976,417.287]
[1376,{"$raw":"00000000"},21118,"GC.3.1113",null,3,"T",89,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",977,89.454]
[1377,{"$raw":"00000000"},21118,"GC.3.1114",null,3,"T",399,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",978,399.219]
[1378,{"$raw":"00000000"},21118,"GC.3.1115",null,3,"T",170,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",979,170.007]
[1380,{"$raw":"00000000"},21118,"GC.3.1117",null,3,"T",83,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",980,83.092]
[1381,{"$raw":"00000000"},21118,"GC.3.1118",null,3,"T",608,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",981,608.129]
[1382,{"$raw":"00000000"},21118,"GC.3.1119",null,3,"T",611,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",982,611.497]
[1383,{"$raw":"00000000"},21118,"GC.3.1120",null,3,"T",1226,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",983,1226.178]
[1384,{"$raw":"00000000"},21118,"GC.3.1121",null,3,"T",717,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",984,717.266]
[1385,{"$raw":"00000000"},21118,"GC.3.1122",null,3,"T",1651,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",985,1650.647]
[1387,{"$raw":"00000000"},21122,"GC.3.1124",null,3,"T",105,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",986,104.712]
[1388,{"$raw":"00000000"},21122,"GC.3.1125",null,3,"T",1130,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",987,1129.944]
[1389,{"$raw":"00000000"},21122,"GC.3.1126",null,3,"T",1075,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",988,1074.622]
[1390,{"$raw":"00000000"},21122,"GC.3.1127",null,3,"T",299,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",989,299.296]
[1391,{"$raw":"00000000"},21122,"GC.3.1128",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",990,339.037]
[1392,{"$raw":"00000000"},21122,"GC.3.1129",null,3,"T",158,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",991,157.898]
[1393,{"$raw":"00000000"},21122,"GC.3.1130",null,3,"T",673,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",992,672.646]
[1394,{"$raw":"00000000"},21122,"GC.3.1131",null,3,"T",278,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",993,277.769]
[1395,{"$raw":"00000000"},21122,"GC.3.1132",null,3,"T",149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",994,149.007]
[1396,{"$raw":"00000000"},21122,"GC.3.1133",null,3,"T",100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",995,99.961]
[1397,{"$raw":"00000000"},21122,"GC.3.1134",null,3,"T",623,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",996,623.032]
[1398,{"$raw":"00000000"},21122,"GC.3.1135",null,3,"T",463,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",997,463.331]
[1399,{"$raw":"00000000"},21122,"GC.3.1136",null,3,"T",289,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",998,288.557]
[1400,{"$raw":"00000000"},21122,"GC.3.1137",null,3,"T",31,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",999,30.923]
[1403,{"$raw":"00000000"},21118,"GC.3.1140",null,3,"T",47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1000,46.557]
[1404,{"$raw":"00000000"},21118,"GC.3.1141",null,3,"T",572,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1001,572.257]
[1405,{"$raw":"00000000"},21118,"GC.3.1142",null,3,"T",453,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1002,453.340]
[1406,{"$raw":"00000000"},21118,"GC.3.1143",null,3,"T",1204,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1003,1204.208]
[1407,{"$raw":"00000000"},21118,"GC.3.1144",null,3,"T",733,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1004,733.314]
[1408,{"$raw":"00000000"},21118,"GC.3.1145",null,3,"T",736,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1005,735.670]
[1410,{"$raw":"00000000"},21120,"GC.3.1146",null,3,"T",1891,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1006,1891.306]
[1411,{"$raw":"00000000"},21118,"GC.3.1147",null,3,"T",238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1007,238.161]
[1412,{"$raw":"00000000"},21118,"GC.3.1148",null,3,"T",749,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1008,748.733]
[1413,{"$raw":"00000000"},21118,"GC.3.1149",null,3,"T",342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1009,341.595]
[1414,{"$raw":"00000000"},21118,"GC.3.1150",null,3,"T",878,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1010,877.768]
[1415,{"$raw":"00000000"},21118,"GC.3.1151",null,3,"T",1076,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1011,1075.559]
[1416,{"$raw":"00000000"},21118,"GC.3.1152",null,3,"T",712,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1012,711.858]
[1417,{"$raw":"00000000"},21118,"GC.3.1153",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1013,19.710]
[1418,{"$raw":"00000000"},21111,"GC.3.1154",null,3,"T",514,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1014,514.097]
[1420,{"$raw":"00000000"},21111,"GC.3.1156",null,3,"T",336,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1015,335.779]
[1423,{"$raw":"00000000"},21122,"GC.3.1157",null,3,"T",403,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",1016,402.613]
[1425,{"$raw":"00000000"},21122,"GC.3.1159",null,3,"T",417,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",1017,416.925]
[1427,{"$raw":"00000000"},21118,"GC.3.1160",null,3,"T",1211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1018,1210.687]
[1428,{"$raw":"00000000"},21118,"GC.3.1161",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1019,6.675]
[1432,{"$raw":"00000000"},21106,"GC.3.1163",null,3,"T",97,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1020,97.155]
[1433,{"$raw":"00000000"},21106,"GC.3.1164",null,3,"T",129,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1021,129.339]
[1434,{"$raw":"00000000"},21106,"GC.3.1165",null,3,"T",441,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1022,441.177]
[1435,{"$raw":"00000000"},21106,"GC.3.1166",null,3,"T",468,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1023,468.046]
[1436,{"$raw":"00000000"},21106,"GC.3.1167",null,3,"T",624,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1024,624.010]
[1437,{"$raw":"00000000"},21106,"GC.3.1168",null,3,"T",585,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1025,584.585]
[1440,{"$raw":"00000000"},21122,"GC.3.1169",null,3,"T",159,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",1026,159.410]
[1441,{"$raw":"00000000"},21122,"GC.3.1170",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",1027,62.365]
[1443,{"$raw":"00000000"},21122,"GC.3.1171",null,3,"T",90,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",1028,89.691]
[1444,{"$raw":"00000000"},21118,"GC.3.1172",null,3,"T",150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1029,150.231]
[1445,{"$raw":"00000000"},21118,"GC.3.1173",null,3,"T",528,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1030,527.663]
[1446,{"$raw":"00000000"},21118,"GC.3.1174",null,3,"T",232,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1031,232.191]
[1447,{"$raw":"00000000"},21118,"GC.3.1175",null,3,"T",590,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1032,590.204]
[1448,{"$raw":"00000000"},21118,"GC.3.1176",null,3,"T",103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1033,103.012]
[1449,{"$raw":"00000000"},21102,"GC.3.1177",null,3,"T",152,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1034,151.725]
[1450,{"$raw":"00000000"},21102,"GC.3.1178",null,3,"T",174,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1035,173.632]
[1451,{"$raw":"00000000"},21102,"GC.3.1179",null,3,"T",215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1036,215.258]
[1452,{"$raw":"00000000"},21102,"GC.3.1180",null,3,"T",196,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1037,196.302]
[1453,{"$raw":"00000000"},21102,"GC.3.1181",null,3,"T",154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1038,154.302]
[1454,{"$raw":"00000000"},21116,"GC.3.1182",null,3,"T",1250,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",1039,1250.398]
[1455,{"$raw":"00000000"},21116,"GC.3.1183",null,3,"T",123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",1040,122.596]
[1456,{"$raw":"00000000"},21116,"GC.3.1184",null,3,"T",669,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",1041,668.836]
[1460,{"$raw":"00000000"},21119,"GC.3.1185",null,3,"T",230,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",1042,230.480]
[1461,{"$raw":"00000000"},21119,"GC.3.1186",null,3,"T",337,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",1043,337.256]
[1462,{"$raw":"00000000"},21119,"GC.3.1187",null,3,"T",485,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",1044,485.246]
[1463,{"$raw":"00000000"},21121,"GC.3.1188",null,3,"T",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",1045,23.174]
[1467,{"$raw":"00000000"},21107,"GC.3.1189",null,3,"T",1001,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",1046,1000.529]
[1468,{"$raw":"00000000"},21107,"GC.3.1190",null,3,null,32,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","OV",1047,31.717]
[1471,{"$raw":"00000000"},21102,"GC.3.1191",null,3,null,88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","OV",1048,88.209]
[1472,{"$raw":"00000000"},21102,"GC.3.1192",null,3,null,22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","OV",1049,21.602]
[1473,{"$raw":"00000000"},21107,"GC.3.1193",null,3,null,128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","OV",1050,128.256]
[1475,{"$raw":"00000000"},21107,"GC.3.1194",null,3,null,302,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","OV",1051,301.962]
[1477,{"$raw":"00000000"},21118,"GC.3.1195",null,3,"T",533,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1052,533.328]
[1479,{"$raw":"00000000"},21118,"GC.3.1196",null,3,"T",644,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1053,644.000]
[1483,{"$raw":"00000000"},21111,"GC.3.1197",null,3,null,318,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1054,318.313]
[1484,{"$raw":"00000000"},21118,"GC.3.1198",null,3,"T",256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1055,256.159]
[1485,{"$raw":"00000000"},21118,"GC.3.1199",null,3,"T",693,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",1056,692.716]
[1486,{"$raw":"00000000"},21111,"GC.3.1200",null,3,"T",597,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1057,597.169]
[1487,{"$raw":"00000000"},21111,"GC.3.1201",null,3,"T",35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1058,35.130]
[1488,{"$raw":"00000000"},21111,"GC.3.1202",null,3,"T",221,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1059,220.872]
[1489,{"$raw":"00000000"},21111,"GC.3.1203",null,3,"T",346,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1060,346.339]
[1490,{"$raw":"00000000"},21111,"GC.3.1204",null,3,"T",1194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1061,1193.752]
[1492,{"$raw":"00000000"},21111,"GC.3.1206",null,3,"T",214,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1062,213.685]
[1493,{"$raw":"00000000"},21111,"GC.3.1207",null,3,"T",287,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1063,286.785]
[1495,{"$raw":"00000000"},21111,"GC.3.1209",null,3,"T",191,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1064,191.454]
[1496,{"$raw":"00000000"},21111,"GC.3.1210",null,3,"T",752,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1065,751.896]
[1497,{"$raw":"00000000"},21111,"GC.3.1211",null,3,"T",591,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1066,590.976]
[1498,{"$raw":"00000000"},21111,"GC.3.1212",null,3,"T",619,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1067,618.975]
[1499,{"$raw":"00000000"},21111,"GC.3.1213",null,3,"T",61,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1068,61.166]
[1502,{"$raw":"00000000"},21111,"GC.3.1214",null,3,"T",445,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1069,445.387]
[1503,{"$raw":"00000000"},21111,"GC.3.1215",null,3,"T",229,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1070,229.402]
[1504,{"$raw":"00000000"},21111,"GC.3.1216",null,3,"T",422,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1071,422.284]
[1505,{"$raw":"00000000"},21111,"GC.3.1217",null,3,"T",414,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1072,413.512]
[1506,{"$raw":"00000000"},21111,"GC.3.1218",null,3,"T",964,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1073,963.905]
[1507,{"$raw":"00000000"},21111,"GC.3.1219",null,3,"T",1233,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1074,1232.769]
[1508,{"$raw":"00000000"},21111,"GC.3.1220",null,3,"T",1163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1075,1163.323]
[1509,{"$raw":"00000000"},21111,"GC.3.1221",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1076,3.942]
[1510,{"$raw":"00000000"},21111,"GC.3.1222",null,3,"T",562,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1077,562.275]
[1511,{"$raw":"00000000"},21111,"GC.3.1223",null,3,"T",691,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1078,690.701]
[1512,{"$raw":"00000000"},21111,"GC.3.1224",null,3,"T",677,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1079,677.232]
[1513,{"$raw":"00000000"},21111,"GC.3.1225",null,3,"T",399,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1080,398.663]
[1515,{"$raw":"00000000"},21111,"GC.3.1226",null,3,"T",896,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1081,895.963]
[1516,{"$raw":"00000000"},21111,"GC.3.1227",null,3,"T",481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1082,481.344]
[1517,{"$raw":"00000000"},21111,"GC.3.1228",null,3,"T",545,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1083,544.775]
[1518,{"$raw":"00000000"},21111,"GC.3.1229",null,3,"T",112,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1084,111.677]
[1519,{"$raw":"00000000"},21111,"GC.3.1230",null,3,"T",774,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1085,773.942]
[1520,{"$raw":"00000000"},21111,"GC.3.1231",null,3,"T",1103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1086,1103.165]
[1521,{"$raw":"00000000"},21111,"GC.3.1232",null,3,"T",209,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1087,208.564]
[1522,{"$raw":"00000000"},21111,"GC.3.1233",null,3,"T",1130,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1088,1129.939]
[1523,{"$raw":"00000000"},21111,"GC.3.1234",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1089,189.073]
[1524,{"$raw":"00000000"},21111,"GC.3.1235",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1090,10.164]
[1525,{"$raw":"00000000"},21111,"GC.3.1236",null,3,"T",438,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1091,438.470]
[1526,{"$raw":"00000000"},21111,"GC.3.1237",null,3,"T",357,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1092,357.423]
[1527,{"$raw":"00000000"},21111,"GC.3.1238",null,3,"T",805,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1093,805.177]
[1528,{"$raw":"00000000"},21111,"GC.3.1239",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1094,9.531]
[1529,{"$raw":"00000000"},21111,"GC.3.1240",null,3,"T",589,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1095,589.337]
[1530,{"$raw":"00000000"},21111,"GC.3.1241",null,3,"T",719,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1096,718.893]
[1531,{"$raw":"00000000"},21111,"GC.3.1242",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1097,0.097]
[1532,{"$raw":"00000000"},21111,"GC.3.1243",null,3,"T",136,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1098,136.089]
[1533,{"$raw":"00000000"},21111,"GC.3.1244",null,3,"T",140,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1099,140.115]
[1534,{"$raw":"00000000"},21111,"GC.3.1245",null,3,"T",215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1100,215.416]
[1535,{"$raw":"00000000"},21111,"GC.3.1246",null,3,"T",191,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1101,191.165]
[1536,{"$raw":"00000000"},21111,"GC.3.1247",null,3,"T",774,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1102,773.829]
[1537,{"$raw":"00000000"},21111,"GC.3.1248",null,3,"T",536,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1103,536.352]
[1538,{"$raw":"00000000"},21111,"GC.3.1249",null,3,"T",567,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1104,566.539]
[1539,{"$raw":"00000000"},21111,"GC.3.1250",null,3,"T",26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1105,25.673]
[1540,{"$raw":"00000000"},21111,"GC.3.1251",null,3,"T",628,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1106,627.540]
[1541,{"$raw":"00000000"},21111,"GC.3.1252",null,3,"T",1337,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1107,1336.960]
[1542,{"$raw":"00000000"},21111,"GC.3.1253",null,3,"T",758,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1108,757.914]
[1543,{"$raw":"00000000"},21111,"GC.3.1254",null,3,"T",946,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1109,946.455]
[1544,{"$raw":"00000000"},21111,"GC.3.1255",null,3,"T",555,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1110,555.162]
[1545,{"$raw":"00000000"},21111,"GC.3.1256",null,3,"T",371,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1111,371.382]
[1546,{"$raw":"00000000"},21111,"GC.3.1257",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1112,40.848]
[1548,{"$raw":"00000000"},21111,"GC.3.1258",null,3,"T",216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1113,216.054]
[1550,{"$raw":"00000000"},21111,"GC.3.1259",null,3,"T",229,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1114,228.762]
[1551,{"$raw":"00000000"},21111,"GC.3.1260",null,3,"T",120,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1115,120.422]
[1552,{"$raw":"00000000"},21111,"GC.3.1261",null,3,"T",226,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1116,225.865]
[1553,{"$raw":"00000000"},21111,"GC.3.1262",null,3,"T",784,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1117,783.834]
[1554,{"$raw":"00000000"},21111,"GC.3.1263",null,3,"T",462,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1118,461.772]
[1555,{"$raw":"00000000"},21111,"GC.3.1264",null,3,"T",382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1119,381.638]
[1556,{"$raw":"00000000"},21111,"GC.3.1265",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1120,249.323]
[1557,{"$raw":"00000000"},21111,"GC.3.1266",null,3,"T",47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1121,46.841]
[1559,{"$raw":"00000000"},21111,"GC.3.1267",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1122,4.235]
[1560,{"$raw":"00000000"},21111,"GC.3.1268",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1123,295.625]
[1562,{"$raw":"00000000"},21111,"GC.3.1269",null,3,"T",689,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1124,689.255]
[1564,{"$raw":"00000000"},21111,"GC.3.1270",null,3,"T",588,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1125,588.488]
[1566,{"$raw":"00000000"},21111,"GC.3.1271",null,3,"T",634,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1126,634.064]
[1567,{"$raw":"00000000"},21111,"GC.3.1272",null,3,"T",1580,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1127,1579.834]
[1569,{"$raw":"00000000"},21111,"GC.3.1273",null,3,"T",215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1128,215.121]
[1570,{"$raw":"00000000"},21111,"GC.3.1274",null,3,"T",242,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1129,241.730]
[1572,{"$raw":"00000000"},21111,"GC.3.1275",null,3,"T",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1130,316.919]
[1573,{"$raw":"00000000"},21111,"GC.3.1276",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1131,16.233]
[1575,{"$raw":"00000000"},21111,"GC.3.1277",null,3,null,423,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1132,422.717]
[1576,{"$raw":"00000000"},21111,"GC.3.1278",null,3,"T",407,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1133,406.662]
[1577,{"$raw":"00000000"},21111,"GC.3.1279",null,3,"T",83,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1134,82.717]
[1578,{"$raw":"00000000"},21111,"GC.3.1280",null,3,"T",466,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1135,466.099]
[1579,{"$raw":"00000000"},21111,"GC.3.1281",null,3,"T",403,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1136,403.350]
[1580,{"$raw":"00000000"},21111,"GC.3.1282",null,3,"T",163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1137,162.916]
[1581,{"$raw":"00000000"},21111,"GC.3.1283",null,3,"T",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1138,219.464]
[1582,{"$raw":"00000000"},21111,"GC.3.1284",null,3,"T",261,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1139,260.609]
[1583,{"$raw":"00000000"},21111,"GC.3.1285",null,3,"T",263,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1140,263.226]
[1584,{"$raw":"00000000"},21111,"GC.3.1286",null,3,"T",434,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1141,434.027]
[1585,{"$raw":"00000000"},21111,"GC.3.1287",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1142,15.780]
[1586,{"$raw":"00000000"},21111,"GC.3.1288",null,3,"T",149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1143,148.855]
[1587,{"$raw":"00000000"},21111,"GC.3.1289",null,3,"T",446,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1144,445.968]
[1589,{"$raw":"00000000"},21111,"GC.3.1290",null,3,"T",213,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1145,213.226]
[1591,{"$raw":"00000000"},21111,"GC.3.1291",null,3,"T",591,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1146,590.713]
[1592,{"$raw":"00000000"},21111,"GC.3.1292",null,3,"T",539,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1147,539.079]
[1593,{"$raw":"00000000"},21111,"GC.3.1293",null,3,"T",525,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1148,525.172]
[1595,{"$raw":"00000000"},21111,"GC.3.1294",null,3,"T",927,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1149,927.263]
[1597,{"$raw":"00000000"},21111,"GC.3.1295",null,3,"T",294,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1150,294.407]
[1599,{"$raw":"00000000"},21111,"GC.3.1296",null,3,"T",556,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1151,556.445]
[1600,{"$raw":"00000000"},21111,"GC.3.1297",null,3,"T",907,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1152,906.682]
[1601,{"$raw":"00000000"},21111,"GC.3.1298",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1153,38.765]
[1602,{"$raw":"00000000"},21111,"GC.3.1299",null,3,"T",816,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1154,816.059]
[1603,{"$raw":"00000000"},21111,"GC.3.1300",null,3,"T",187,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1155,186.654]
[1604,{"$raw":"00000000"},21111,"GC.3.1301",null,3,"T",1039,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1156,1038.665]
[1605,{"$raw":"00000000"},21111,"GC.3.1302",null,3,"T",644,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1157,644.187]
[1606,{"$raw":"00000000"},21111,"GC.3.1303",null,3,"T",544,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1158,544.333]
[1607,{"$raw":"00000000"},21111,"GC.3.1304",null,3,"T",554,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1159,554.463]
[1608,{"$raw":"00000000"},21111,"GC.3.1305",null,3,"T",622,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1160,622.373]
[1609,{"$raw":"00000000"},21111,"GC.3.1306",null,3,"T",2054,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1161,2053.961]
[1610,{"$raw":"00000000"},21111,"GC.3.1307",null,3,"T",306,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1162,306.317]
[1611,{"$raw":"00000000"},21111,"GC.3.1308",null,3,"T",101,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1163,101.070]
[1612,{"$raw":"00000000"},21111,"GC.3.1309",null,3,"T",52,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1164,52.171]
[1613,{"$raw":"00000000"},21111,"GC.3.1310",null,3,"T",497,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1165,496.553]
[1615,{"$raw":"00000000"},21111,"GC.3.1311",null,3,"T",283,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1166,283.175]
[1617,{"$raw":"00000000"},21111,"GC.3.1312",null,3,"T",289,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1167,289.182]
[1619,{"$raw":"00000000"},21111,"GC.3.1313",null,3,"T",581,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1168,580.668]
[1620,{"$raw":"00000000"},21111,"GC.3.1314",null,3,"T",593,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1169,593.340]
[1621,{"$raw":"00000000"},21111,"GC.3.1315",null,3,"T",88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1170,88.497]
[1622,{"$raw":"00000000"},21111,"GC.3.1316",null,3,"T",567,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1171,567.086]
[1623,{"$raw":"00000000"},21111,"GC.3.1317",null,3,"T",126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1172,126.163]
[1624,{"$raw":"00000000"},21111,"GC.3.1318",null,3,"T",1099,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1173,1099.419]
[1625,{"$raw":"00000000"},21111,"GC.3.1319",null,3,"T",254,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1174,254.193]
[1626,{"$raw":"00000000"},21111,"GC.3.1320",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1175,0.460]
[1628,{"$raw":"00000000"},21111,"GC.3.1321",null,3,"T",1110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1176,1110.237]
[1630,{"$raw":"00000000"},21111,"GC.3.1322",null,3,"T",1141,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1177,1140.849]
[1631,{"$raw":"00000000"},21111,"GC.3.1323",null,3,"T",1295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1178,1294.635]
[1632,{"$raw":"00000000"},21111,"GC.3.1324",null,3,"T",787,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1179,787.134]
[1633,{"$raw":"00000000"},21111,"GC.3.1325",null,3,"T",1148,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1180,1148.319]
[1634,{"$raw":"00000000"},21111,"GC.3.1326",null,3,"T",1051,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1181,1051.314]
[1635,{"$raw":"00000000"},21111,"GC.3.1327",null,3,"T",354,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1182,354.120]
[1637,{"$raw":"00000000"},21111,"GC.3.1328",null,3,"T",411,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1183,410.806]
[1638,{"$raw":"00000000"},21111,"GC.3.1329",null,3,"T",452,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1184,451.567]
[1639,{"$raw":"00000000"},21111,"GC.3.1330",null,3,"T",601,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1185,601.354]
[1640,{"$raw":"00000000"},21111,"GC.3.1331",null,3,"T",129,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1186,129.141]
[1641,{"$raw":"00000000"},21111,"GC.3.1332",null,3,"T",443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1187,442.884]
[1642,{"$raw":"00000000"},21111,"GC.3.1333",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1188,0.375]
[1643,{"$raw":"00000000"},21111,"GC.3.1334",null,3,"T",550,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1189,549.677]
[1645,{"$raw":"00000000"},21111,"GC.3.1335",null,3,"T",926,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1190,926.349]
[1646,{"$raw":"00000000"},21111,"GC.3.1336",null,3,"T",357,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1191,357.498]
[1647,{"$raw":"00000000"},21111,"GC.3.1337",null,3,"T",751,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1192,751.068]
[1648,{"$raw":"00000000"},21111,"GC.3.1338",null,3,"T",188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1193,187.566]
[1649,{"$raw":"00000000"},21111,"GC.3.1339",null,3,"T",205,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1194,204.520]
[1650,{"$raw":"00000000"},21111,"GC.3.1340",null,3,"T",254,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1195,253.713]
[1651,{"$raw":"00000000"},21111,"GC.3.1341",null,3,"T",675,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1196,674.600]
[1652,{"$raw":"00000000"},21111,"GC.3.1342",null,3,"T",940,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1197,939.758]
[1653,{"$raw":"00000000"},21111,"GC.3.1343",null,3,"T",70,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1198,69.934]
[1654,{"$raw":"00000000"},21111,"GC.3.1344",null,3,"T",914,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1199,914.483]
[1655,{"$raw":"00000000"},21111,"GC.3.1345",null,3,"T",591,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1200,590.960]
[1656,{"$raw":"00000000"},21111,"GC.3.1346",null,3,"T",688,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1201,687.700]
[1657,{"$raw":"00000000"},21111,"GC.3.1347",null,3,"T",647,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1202,646.795]
[1658,{"$raw":"00000000"},21111,"GC.3.1348",null,3,"T",378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1203,377.689]
[1659,{"$raw":"00000000"},21111,"GC.3.1349",null,3,"T",319,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1204,318.754]
[1660,{"$raw":"00000000"},21111,"GC.3.1350",null,3,"T",153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1205,153.326]
[1662,{"$raw":"00000000"},21111,"GC.3.1351",null,3,"T",358,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1206,357.904]
[1663,{"$raw":"00000000"},21111,"GC.3.1352",null,3,"T",291,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1207,291.402]
[1667,{"$raw":"00000000"},21111,"GC.3.1353",null,3,"T",190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1208,190.386]
[1668,{"$raw":"00000000"},21111,"GC.3.1354",null,3,"T",216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1209,215.662]
[1669,{"$raw":"00000000"},21111,"GC.3.1355",null,3,"T",244,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1210,243.650]
[1670,{"$raw":"00000000"},21111,"GC.3.1356",null,3,"T",172,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1211,171.544]
[1672,{"$raw":"00000000"},21111,"GC.3.1357",null,3,"T",1163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1212,1163.495]
[1673,{"$raw":"00000000"},21111,"GC.3.1358",null,3,"T",792,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1213,791.861]
[1674,{"$raw":"00000000"},21111,"GC.3.1359",null,3,"T",1108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1214,1107.644]
[1675,{"$raw":"00000000"},21111,"GC.3.1360",null,3,"T",209,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1215,209.242]
[1676,{"$raw":"00000000"},21111,"GC.3.1361",null,3,"T",766,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1216,766.193]
[1677,{"$raw":"00000000"},21111,"GC.3.1362",null,3,"T",462,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1217,462.092]
[1678,{"$raw":"00000000"},21111,"GC.3.1363",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1218,10.754]
[1680,{"$raw":"00000000"},21111,"GC.3.1365",null,3,"T",529,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1219,528.724]
[1681,{"$raw":"00000000"},21111,"GC.3.1366",null,3,"T",609,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1220,609.262]
[1682,{"$raw":"00000000"},21111,"GC.3.1367",null,3,"T",321,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1221,321.374]
[1683,{"$raw":"00000000"},21111,"GC.3.1368",null,3,"T",471,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1222,471.156]
[1684,{"$raw":"00000000"},21111,"GC.3.1369",null,3,"T",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1223,82.386]
[1685,{"$raw":"00000000"},21111,"GC.3.1370",null,3,"T",915,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1224,915.374]
[1686,{"$raw":"00000000"},21111,"GC.3.1371",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1225,4.885]
[1687,{"$raw":"00000000"},21111,"GC.3.1372",null,3,"T",200,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1226,200.408]
[1688,{"$raw":"00000000"},21111,"GC.3.1373",null,3,"T",168,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1227,168.024]
[1689,{"$raw":"00000000"},21111,"GC.3.1374",null,3,"T",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1228,59.705]
[1690,{"$raw":"00000000"},21111,"GC.3.1375",null,3,"T",54,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1229,53.665]
[1691,{"$raw":"00000000"},21111,"GC.3.1376",null,3,"T",172,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1230,172.216]
[1692,{"$raw":"00000000"},21111,"GC.3.1377",null,3,"T",128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1231,128.085]
[1693,{"$raw":"00000000"},21111,"GC.3.1378",null,3,"T",64,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1232,63.684]
[1694,{"$raw":"00000000"},21111,"GC.3.1379",null,3,"T",164,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1233,164.424]
[1696,{"$raw":"00000000"},21111,"GC.3.1380",null,3,"T",818,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1234,818.141]
[1697,{"$raw":"00000000"},21111,"GC.3.1381",null,3,"T",282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1235,282.213]
[1698,{"$raw":"00000000"},21111,"GC.3.1382",null,3,"T",365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1236,364.922]
[1699,{"$raw":"00000000"},21111,"GC.3.1383",null,3,"T",140,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1237,140.473]
[1700,{"$raw":"00000000"},21111,"GC.3.1384",null,3,"T",608,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1238,607.764]
[1702,{"$raw":"00000000"},21111,"GC.3.1385",null,3,"T",786,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1239,786.403]
[1703,{"$raw":"00000000"},21111,"GC.3.1386",null,3,"T",549,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1240,549.499]
[1705,{"$raw":"00000000"},21111,"GC.3.1387",null,3,"T",451,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1241,450.730]
[1706,{"$raw":"00000000"},21111,"GC.3.1388",null,3,"T",371,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1242,370.700]
[1707,{"$raw":"00000000"},21111,"GC.3.1389",null,3,"T",73,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1243,73.383]
[1709,{"$raw":"00000000"},0,"GC.3.1391",null,3,"T",88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",1244,87.771]
[1710,{"$raw":"00000000"},21111,"GC.3.1392",null,3,"T",721,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1245,720.927]
[1711,{"$raw":"00000000"},21111,"GC.3.1393",null,3,"T",1042,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1246,1041.561]
[1712,{"$raw":"00000000"},21111,"GC.3.1394",null,3,"T",705,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1247,704.715]
[1713,{"$raw":"00000000"},21111,"GC.3.1395",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1248,41.429]
[1714,{"$raw":"00000000"},21111,"GC.3.1396",null,3,"T",348,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1249,347.523]
[1715,{"$raw":"00000000"},21111,"GC.3.1397",null,3,"T",367,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1250,367.283]
[1716,{"$raw":"00000000"},21111,"GC.3.1398",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1251,1.724]
[1717,{"$raw":"00000000"},21111,"GC.3.1399",null,3,"T",351,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1252,350.762]
[1718,{"$raw":"00000000"},21111,"GC.3.1400",null,3,"T",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1253,304.387]
[1719,{"$raw":"00000000"},21111,"GC.3.1401",null,3,"T",267,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1254,266.622]
[1720,{"$raw":"00000000"},21111,"GC.3.1402",null,3,"T",265,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1255,265.184]
[1721,{"$raw":"00000000"},21111,"GC.3.1403",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1256,0.641]
[1724,{"$raw":"00000000"},21111,"GC.3.1404",null,3,"T",236,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1257,235.920]
[1725,{"$raw":"00000000"},21111,"GC.3.1405",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1258,338.601]
[1727,{"$raw":"00000000"},21111,"GC.3.1406",null,3,"T",523,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1259,523.382]
[1728,{"$raw":"00000000"},21111,"GC.3.1407",null,3,"T",540,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1260,539.546]
[1729,{"$raw":"00000000"},21111,"GC.3.1408",null,3,"T",283,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1261,283.003]
[1730,{"$raw":"00000000"},21111,"GC.3.1409",null,3,"T",377,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1262,376.671]
[1732,{"$raw":"00000000"},21111,"GC.3.1410",null,3,"T",117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1263,117.107]
[1733,{"$raw":"00000000"},21111,"GC.3.1411",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1264,11.315]
[1736,{"$raw":"00000000"},21111,"GC.3.1412",null,3,"T",891,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1265,890.501]
[1738,{"$raw":"00000000"},21111,"GC.3.1413",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1266,4.572]
[1739,{"$raw":"00000000"},21111,"GC.3.1414",null,3,"T",391,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1267,391.179]
[1740,{"$raw":"00000000"},21111,"GC.3.1415",null,3,"T",685,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1268,684.762]
[1741,{"$raw":"00000000"},21111,"GC.3.1416",null,3,"T",472,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1269,471.815]
[1742,{"$raw":"00000000"},21111,"GC.3.1417",null,3,"T",126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1270,125.993]
[1743,{"$raw":"00000000"},21111,"GC.3.1418",null,3,"T",315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1271,315.140]
[1744,{"$raw":"00000000"},21111,"GC.3.1419",null,3,"T",504,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1272,503.802]
[1745,{"$raw":"00000000"},21111,"GC.3.1420",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1273,2.723]
[1746,{"$raw":"00000000"},21111,"GC.3.1421",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1274,5.222]
[1747,{"$raw":"00000000"},21111,"GC.3.1422",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1275,0.730]
[1748,{"$raw":"00000000"},21111,"GC.3.1423",null,3,"T",210,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1276,209.534]
[1749,{"$raw":"00000000"},21111,"GC.3.1424",null,3,"T",261,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1277,261.047]
[1750,{"$raw":"00000000"},21111,"GC.3.1425",null,3,"T",42,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1278,42.347]
[1751,{"$raw":"00000000"},21111,"GC.3.1426",null,3,"T",375,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1279,375.468]
[1752,{"$raw":"00000000"},21111,"GC.3.1427",null,3,"T",406,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1280,405.929]
[1753,{"$raw":"00000000"},21111,"GC.3.1428",null,3,"T",475,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1281,475.004]
[1754,{"$raw":"00000000"},21111,"GC.3.1429",null,3,"T",226,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1282,225.632]
[1755,{"$raw":"00000000"},21111,"GC.3.1430",null,3,"T",648,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1283,648.339]
[1756,{"$raw":"00000000"},21111,"GC.3.1431",null,3,"T",542,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1284,542.367]
[1757,{"$raw":"00000000"},21111,"GC.3.1432",null,3,"T",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1285,94.606]
[1758,{"$raw":"00000000"},21111,"GC.3.1433",null,3,"T",146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1286,145.890]
[1759,{"$raw":"00000000"},21111,"GC.3.1434",null,3,"T",150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1287,149.674]
[1760,{"$raw":"00000000"},21111,"GC.3.1435",null,3,"T",839,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1288,839.343]
[1761,{"$raw":"00000000"},21111,"GC.3.1436",null,3,"T",226,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1289,226.096]
[1762,{"$raw":"00000000"},21111,"GC.3.1437",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1290,0.668]
[1763,{"$raw":"00000000"},21111,"GC.3.1438",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1291,52.624]
[1764,{"$raw":"00000000"},21111,"GC.3.1439",null,3,"T",587,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1292,587.456]
[1765,{"$raw":"00000000"},21111,"GC.3.1440",null,3,"T",630,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1293,630.454]
[1766,{"$raw":"00000000"},21111,"GC.3.1441",null,3,"T",853,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1294,853.487]
[1767,{"$raw":"00000000"},21111,"GC.3.1442",null,3,"T",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1295,22.808]
[1768,{"$raw":"00000000"},21111,"GC.3.1443",null,3,"T",454,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1296,454.382]
[1769,{"$raw":"00000000"},21111,"GC.3.1444",null,3,"T",1266,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1297,1266.297]
[1770,{"$raw":"00000000"},21111,"GC.3.1445",null,3,"T",1083,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1298,1083.186]
[1771,{"$raw":"00000000"},21111,"GC.3.1446",null,3,"T",305,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1299,305.216]
[1772,{"$raw":"00000000"},21111,"GC.3.1447",null,3,"T",27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1300,27.014]
[1773,{"$raw":"00000000"},21111,"GC.3.1448",null,3,"T",326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1301,325.941]
[1774,{"$raw":"00000000"},21111,"GC.3.1449",null,3,"T",348,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1302,348.340]
[1775,{"$raw":"00000000"},21111,"GC.3.1450",null,3,"T",32,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1303,32.091]
[1776,{"$raw":"00000000"},21111,"GC.3.1451",null,3,"T",475,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1304,474.716]
[1777,{"$raw":"00000000"},21111,"GC.3.1452",null,3,"T",290,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1305,289.797]
[1778,{"$raw":"00000000"},21111,"GC.3.1453",null,3,"T",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1306,218.780]
[1779,{"$raw":"00000000"},21111,"GC.3.1454",null,3,"T",1136,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1307,1135.981]
[1781,{"$raw":"00000000"},21111,"GC.3.1455",null,3,"T",583,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1308,582.887]
[1782,{"$raw":"00000000"},21111,"GC.3.1456",null,3,"T",893,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1309,893.128]
[1783,{"$raw":"00000000"},21111,"GC.3.1457",null,3,"T",2205,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1310,2204.862]
[1785,{"$raw":"00000000"},21111,"GC.3.1458",null,3,"T",1088,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1311,1088.317]
[1786,{"$raw":"00000000"},21111,"GC.3.1459",null,3,"T",1214,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1312,1213.788]
[1787,{"$raw":"00000000"},21111,"GC.3.1460",null,3,"T",825,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1313,825.044]
[1788,{"$raw":"00000000"},21111,"GC.3.1461",null,3,"T",200,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1314,200.092]
[1789,{"$raw":"00000000"},21111,"GC.3.1462",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1315,295.825]
[1790,{"$raw":"00000000"},21111,"GC.3.1463",null,3,"T",170,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1316,170.280]
[1791,{"$raw":"00000000"},21111,"GC.3.1464",null,3,"T",651,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1317,650.589]
[1792,{"$raw":"00000000"},21111,"GC.3.1465",null,3,"T",649,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1318,649.270]
[1793,{"$raw":"00000000"},21111,"GC.3.1466",null,3,"T",42,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1319,42.270]
[1794,{"$raw":"00000000"},21111,"GC.3.1467",null,3,"T",544,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1320,543.655]
[1795,{"$raw":"00000000"},21111,"GC.3.1468",null,3,"T",143,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1321,142.822]
[1797,{"$raw":"00000000"},21111,"GC.3.1470",null,3,"T",118,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1322,117.980]
[1798,{"$raw":"00000000"},21111,"GC.3.1471",null,3,"T",313,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1323,313.433]
[1799,{"$raw":"00000000"},21111,"GC.3.1472",null,3,"T",599,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1324,599.075]
[1800,{"$raw":"00000000"},21111,"GC.3.1473",null,3,"T",147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1325,146.628]
[1801,{"$raw":"00000000"},21111,"GC.3.1474",null,3,"T",239,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1326,238.900]
[1802,{"$raw":"00000000"},21111,"GC.3.1475",null,3,"T",133,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1327,132.600]
[1803,{"$raw":"00000000"},21111,"GC.3.1476",null,3,"T",33,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1328,32.966]
[1806,{"$raw":"00000000"},21111,"GC.3.1479",null,3,"T",373,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1329,372.739]
[1807,{"$raw":"00000000"},21111,"GC.3.1480",null,3,"T",352,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1330,351.896]
[1808,{"$raw":"00000000"},21111,"GC.3.1481",null,3,"T",223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1331,222.976]
[1809,{"$raw":"00000000"},21111,"GC.3.1482",null,3,"T",286,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1332,285.794]
[1810,{"$raw":"00000000"},21111,"GC.3.1483",null,3,"T",161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1333,160.699]
[1811,{"$raw":"00000000"},21111,"GC.3.1484",null,3,"T",180,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1334,179.565]
[1812,{"$raw":"00000000"},21111,"GC.3.1485",null,3,"T",329,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1335,329.167]
[1813,{"$raw":"00000000"},21111,"GC.3.1486",null,3,"T",229,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1336,228.822]
[1814,{"$raw":"00000000"},21111,"GC.3.1487",null,3,"T",58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1337,57.718]
[1815,{"$raw":"00000000"},21111,"GC.3.1488",null,3,"T",187,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1338,187.296]
[1816,{"$raw":"00000000"},21111,"GC.3.1489",null,3,"T",303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1339,302.656]
[1817,{"$raw":"00000000"},21111,"GC.3.1490",null,3,"T",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1340,369.838]
[1818,{"$raw":"00000000"},21111,"GC.3.1491",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1341,13.131]
[1819,{"$raw":"00000000"},21111,"GC.3.1492",null,3,"T",656,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1342,655.997]
[1820,{"$raw":"00000000"},21111,"GC.3.1493",null,3,"T",38,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1343,38.130]
[1821,{"$raw":"00000000"},21111,"GC.3.1494",null,3,"T",126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1344,125.620]
[1822,{"$raw":"00000000"},21111,"GC.3.1495",null,3,"T",536,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1345,535.882]
[1823,{"$raw":"00000000"},21111,"GC.3.1496",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1346,33.800]
[1824,{"$raw":"00000000"},21111,"GC.3.1497",null,3,"T",54,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1347,53.991]
[1825,{"$raw":"00000000"},21111,"GC.3.1498",null,3,"T",375,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1348,375.249]
[1826,{"$raw":"00000000"},21111,"GC.3.1499",null,3,"T",593,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1349,593.255]
[1827,{"$raw":"00000000"},21111,"GC.3.1500",null,3,"T",333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1350,333.465]
[1828,{"$raw":"00000000"},21111,"GC.3.1501",null,3,"T",210,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1351,209.543]
[1829,{"$raw":"00000000"},21111,"GC.3.1502",null,3,"T",167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1352,167.468]
[1830,{"$raw":"00000000"},21111,"GC.3.1503",null,3,"T",159,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1353,159.379]
[1831,{"$raw":"00000000"},21111,"GC.3.1504",null,3,"T",251,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1354,251.068]
[1832,{"$raw":"00000000"},21111,"GC.3.1505",null,3,"T",123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1355,122.845]
[1833,{"$raw":"00000000"},21111,"GC.3.1506",null,3,"T",183,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1356,182.749]
[1834,{"$raw":"00000000"},21111,"GC.3.1507",null,3,"T",387,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1357,386.759]
[1836,{"$raw":"00000000"},21111,"GC.3.1509",null,3,"T",554,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1358,554.009]
[1837,{"$raw":"00000000"},21111,"GC.3.1510",null,3,"T",156,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1359,155.525]
[1839,{"$raw":"00000000"},21111,"GC.3.1512",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1360,20.465]
[1841,{"$raw":"00000000"},21106,"GC.3.1514",null,3,"T",84,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1361,83.540]
[1842,{"$raw":"00000000"},21111,"GC.3.1515",null,3,"T",195,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1362,195.260]
[1843,{"$raw":"00000000"},21111,"GC.3.1516",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1363,17.117]
[1844,{"$raw":"00000000"},21111,"GC.3.1517",null,3,"T",659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1364,658.956]
[1845,{"$raw":"00000000"},21111,"GC.3.1518",null,3,"T",488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1365,488.235]
[1848,{"$raw":"00000000"},21111,"GC.3.1521",null,3,"T",829,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1366,829.419]
[1849,{"$raw":"00000000"},21111,"GC.3.1522",null,3,"T",359,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1367,359.368]
[1850,{"$raw":"00000000"},21111,"GC.3.1523",null,3,"T",196,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1368,195.726]
[1851,{"$raw":"00000000"},21111,"GC.3.1524",null,3,"T",898,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1369,898.430]
[1852,{"$raw":"00000000"},21111,"GC.3.1525",null,3,"T",223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1370,223.010]
[1853,{"$raw":"00000000"},21111,"GC.3.1526",null,3,"T",135,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1371,134.866]
[1854,{"$raw":"00000000"},21111,"GC.3.1527",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1372,66.196]
[1855,{"$raw":"00000000"},21111,"GC.3.1528",null,3,"T",212,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1373,211.582]
[1856,{"$raw":"00000000"},21111,"GC.3.1529",null,3,"T",123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1374,122.932]
[1857,{"$raw":"00000000"},21111,"GC.3.1530",null,3,"T",142,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1375,142.388]
[1858,{"$raw":"00000000"},21111,"GC.3.1531",null,3,"T",99,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1376,98.618]
[1859,{"$raw":"00000000"},21111,"GC.3.1532",null,3,"T",283,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1377,283.450]
[1860,{"$raw":"00000000"},21111,"GC.3.1533",null,3,"T",125,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1378,125.389]
[1861,{"$raw":"00000000"},21111,"GC.3.1534",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1379,14.903]
[1862,{"$raw":"00000000"},21111,"GC.3.1535",null,3,"T",155,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1380,154.589]
[1863,{"$raw":"00000000"},21111,"GC.3.1536",null,3,"T",364,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1381,364.490]
[1864,{"$raw":"00000000"},21111,"GC.3.1537",null,3,"T",238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1382,237.808]
[1865,{"$raw":"00000000"},21111,"GC.3.1538",null,3,"T",485,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1383,484.600]
[1866,{"$raw":"00000000"},21111,"GC.3.1539",null,3,"T",205,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1384,205.448]
[1867,{"$raw":"00000000"},21111,"GC.3.1540",null,3,"T",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1385,94.509]
[1868,{"$raw":"00000000"},21111,"GC.3.1541",null,3,"T",1072,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1386,1071.943]
[1869,{"$raw":"00000000"},21111,"GC.3.1542",null,3,"T",42,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1387,41.986]
[1870,{"$raw":"00000000"},21111,"GC.3.1543",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1388,92.167]
[1871,{"$raw":"00000000"},21111,"GC.3.1544",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1389,29.105]
[1872,{"$raw":"00000000"},21111,"GC.3.1545",null,3,"T",682,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1390,681.938]
[1873,{"$raw":"00000000"},21111,"GC.3.1546",null,3,"T",363,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1391,362.798]
[1874,{"$raw":"00000000"},21111,"GC.3.1547",null,3,"T",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1392,95.019]
[1875,{"$raw":"00000000"},21111,"GC.3.1548",null,3,"T",293,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1393,292.746]
[1876,{"$raw":"00000000"},21111,"GC.3.1549",null,3,"T",142,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1394,141.693]
[1877,{"$raw":"00000000"},21111,"GC.3.1550",null,3,"T",235,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1395,234.541]
[1878,{"$raw":"00000000"},21111,"GC.3.1551",null,3,"T",91,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1396,91.037]
[1879,{"$raw":"00000000"},21111,"GC.3.1552",null,3,"T",303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1397,302.893]
[1880,{"$raw":"00000000"},21111,"GC.3.1553",null,3,"T",213,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1398,213.118]
[1881,{"$raw":"00000000"},21111,"GC.3.1554",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1399,16.189]
[1882,{"$raw":"00000000"},21111,"GC.3.1555",null,3,"T",499,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1400,499.302]
[1883,{"$raw":"00000000"},21111,"GC.3.1556",null,3,"T",130,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1401,129.996]
[1884,{"$raw":"00000000"},21111,"GC.3.1557",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1402,98.321]
[1885,{"$raw":"00000000"},21111,"GC.3.1558",null,3,"T",127,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1403,127.484]
[1886,{"$raw":"00000000"},21111,"GC.3.1559",null,3,"T",346,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1404,345.816]
[1887,{"$raw":"00000000"},21111,"GC.3.1560",null,3,"T",140,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1405,139.930]
[1888,{"$raw":"00000000"},21111,"GC.3.1561",null,3,"T",513,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1406,513.438]
[1889,{"$raw":"00000000"},21111,"GC.3.1562",null,3,"T",52,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1407,52.462]
[1890,{"$raw":"00000000"},21111,"GC.3.1563",null,3,"T",70,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1408,70.443]
[1891,{"$raw":"00000000"},21111,"GC.3.1564",null,3,"T",254,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1409,254.077]
[1892,{"$raw":"00000000"},21111,"GC.3.1565",null,3,"T",242,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1410,242.119]
[1893,{"$raw":"00000000"},21111,"GC.3.1566",null,3,"T",251,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1411,250.729]
[1894,{"$raw":"00000000"},21111,"GC.3.1567",null,3,"T",553,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1412,553.132]
[1895,{"$raw":"00000000"},21111,"GC.3.1568",null,3,"T",94,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1413,93.606]
[1896,{"$raw":"00000000"},21111,"GC.3.1569",null,3,"T",102,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1414,101.732]
[1897,{"$raw":"00000000"},21111,"GC.3.1570",null,3,"T",146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1415,146.472]
[1898,{"$raw":"00000000"},21111,"GC.3.1571",null,3,"T",245,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1416,245.040]
[1899,{"$raw":"00000000"},21111,"GC.3.1572",null,3,"T",266,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1417,266.237]
[1900,{"$raw":"00000000"},21111,"GC.3.1573",null,3,"T",365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1418,365.317]
[1901,{"$raw":"00000000"},21111,"GC.3.1574",null,3,"T",432,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1419,431.962]
[1902,{"$raw":"00000000"},21111,"GC.3.1575",null,3,"T",498,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1420,498.177]
[1903,{"$raw":"00000000"},21111,"GC.3.1576",null,3,"T",55,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1421,54.824]
[1904,{"$raw":"00000000"},21111,"GC.3.1577",null,3,"T",181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1422,180.828]
[1905,{"$raw":"00000000"},21111,"GC.3.1578",null,3,"T",389,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1423,388.666]
[1906,{"$raw":"00000000"},21111,"GC.3.1579",null,3,"T",655,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1424,655.052]
[1907,{"$raw":"00000000"},21111,"GC.3.1580",null,3,"T",659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1425,658.798]
[1908,{"$raw":"00000000"},21111,"GC.3.1581",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1426,189.252]
[1909,{"$raw":"00000000"},21111,"GC.3.1582",null,3,"T",600,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1427,600.068]
[1910,{"$raw":"00000000"},21111,"GC.3.1583",null,3,"T",187,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1428,186.779]
[1911,{"$raw":"00000000"},21111,"GC.3.1584",null,3,"T",180,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1429,180.177]
[1913,{"$raw":"00000000"},21111,"GC.3.1585",null,3,"T",202,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1430,201.677]
[1914,{"$raw":"00000000"},21111,"GC.3.1586",null,3,"T",12,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1431,11.512]
[1915,{"$raw":"00000000"},21111,"GC.3.1587",null,3,"T",104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1432,103.604]
[1916,{"$raw":"00000000"},21111,"GC.3.1588",null,3,"T",627,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1433,627.230]
[1917,{"$raw":"00000000"},21111,"GC.3.1589",null,3,"T",310,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1434,309.789]
[1918,{"$raw":"00000000"},21111,"GC.3.1590",null,3,"T",262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1435,262.226]
[1920,{"$raw":"00000000"},21106,"GC.3.1591",null,3,"T",449,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1436,448.866]
[1921,{"$raw":"00000000"},21106,"GC.3.1592",null,3,"T",165,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1437,164.603]
[1922,{"$raw":"00000000"},21106,"GC.3.1593",null,3,"T",55,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1438,54.620]
[1923,{"$raw":"00000000"},21106,"GC.3.1594",null,3,"T",424,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1439,424.289]
[1924,{"$raw":"00000000"},21106,"GC.3.1595",null,3,"T",378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1440,377.899]
[1925,{"$raw":"00000000"},21106,"GC.3.1596",null,3,"T",496,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1441,496.364]
[1926,{"$raw":"00000000"},21106,"GC.3.1597",null,3,"T",96,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1442,96.056]
[1927,{"$raw":"00000000"},21106,"GC.3.1598",null,3,"T",781,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1443,780.608]
[1928,{"$raw":"00000000"},21106,"GC.3.1599",null,3,"T",101,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1444,101.458]
[1929,{"$raw":"00000000"},21106,"GC.3.1600",null,3,"T",106,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1445,105.635]
[1930,{"$raw":"00000000"},21106,"GC.3.1601",null,3,"T",634,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1446,633.932]
[1931,{"$raw":"00000000"},21106,"GC.3.1602",null,3,"T",32,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1447,31.858]
[1932,{"$raw":"00000000"},21106,"GC.3.1603",null,3,"T",54,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1448,54.411]
[1933,{"$raw":"00000000"},21106,"GC.3.1604",null,3,"T",689,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1449,688.772]
[1934,{"$raw":"00000000"},21106,"GC.3.1605",null,3,"T",675,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1450,675.349]
[1935,{"$raw":"00000000"},21106,"GC.3.1606",null,3,"T",757,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1451,757.187]
[1936,{"$raw":"00000000"},21106,"GC.3.1607",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1452,249.288]
[1937,{"$raw":"00000000"},21106,"GC.3.1608",null,3,"T",202,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1453,202.404]
[1938,{"$raw":"00000000"},21111,"GC.3.1609",null,3,"T",1721,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1454,1720.751]
[1939,{"$raw":"00000000"},21111,"GC.3.1610",null,3,"T",481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1455,481.204]
[1941,{"$raw":"00000000"},21111,"GC.3.1612",null,3,"T",153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1456,152.992]
[1942,{"$raw":"00000000"},21111,"GC.3.1613",null,3,"T",597,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1457,597.331]
[1943,{"$raw":"00000000"},21111,"GC.3.1614",null,3,"T",325,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1458,324.599]
[1944,{"$raw":"00000000"},21111,"GC.3.1615",null,3,"T",966,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1459,966.212]
[1945,{"$raw":"00000000"},21111,"GC.3.1616",null,3,"T",194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1460,194.282]
[1946,{"$raw":"00000000"},21111,"GC.3.1617",null,3,"T",291,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1461,290.627]
[1948,{"$raw":"00000000"},21111,"GC.3.1619",null,3,"T",766,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1462,765.785]
[1949,{"$raw":"00000000"},21111,"GC.3.1620",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1463,338.858]
[1950,{"$raw":"00000000"},21111,"GC.3.1621",null,3,"T",614,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1464,614.172]
[1951,{"$raw":"00000000"},21106,"GC.3.1622",null,3,"T",535,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1465,534.649]
[1952,{"$raw":"00000000"},21106,"GC.3.1623",null,3,"T",555,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1466,554.504]
[1953,{"$raw":"00000000"},21106,"GC.3.1624",null,3,"T",784,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1467,784.053]
[1954,{"$raw":"00000000"},21106,"GC.3.1625",null,3,"T",905,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1468,905.320]
[1955,{"$raw":"00000000"},21106,"GC.3.1626",null,3,"T",100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1469,99.880]
[1956,{"$raw":"00000000"},21106,"GC.3.1627",null,3,"T",535,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1470,535.198]
[1957,{"$raw":"00000000"},21106,"GC.3.1628",null,3,"T",1379,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1471,1379.004]
[1958,{"$raw":"00000000"},21106,"GC.3.1629",null,3,"T",323,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1472,322.609]
[1959,{"$raw":"00000000"},21106,"GC.3.1630",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1473,249.200]
[1960,{"$raw":"00000000"},21106,"GC.3.1631",null,3,"T",276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1474,275.686]
[1963,{"$raw":"00000000"},21106,"GC.3.1634",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1475,33.647]
[1964,{"$raw":"00000000"},21111,"GC.3.1635",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1476,15.535]
[1966,{"$raw":"00000000"},21111,"GC.3.1637",null,3,"T",392,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1477,391.761]
[1967,{"$raw":"00000000"},21111,"GC.3.1638",null,3,"T",712,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1478,711.706]
[1968,{"$raw":"00000000"},21111,"GC.3.1639",null,3,"T",172,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1479,172.383]
[1969,{"$raw":"00000000"},21111,"GC.3.1640",null,3,"T",403,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1480,403.419]
[1971,{"$raw":"00000000"},21111,"GC.3.1641",null,3,"T",462,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1481,461.608]
[1972,{"$raw":"00000000"},21111,"GC.3.1642",null,3,null,333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1482,332.781]
[1973,{"$raw":"00000000"},21111,"GC.3.1643",null,3,null,35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1483,34.503]
[1974,{"$raw":"00000000"},21111,"GC.3.1644",null,3,null,305,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1484,305.429]
[1975,{"$raw":"00000000"},21111,"GC.3.1645",null,3,"T",811,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1485,810.937]
[1976,{"$raw":"00000000"},21111,"GC.3.1646",null,3,null,295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1486,295.018]
[1977,{"$raw":"00000000"},21111,"GC.3.1647",null,3,"T",657,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1487,656.958]
[1978,{"$raw":"00000000"},21111,"GC.3.1648",null,3,"T",282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1488,281.842]
[1979,{"$raw":"00000000"},21111,"GC.3.1649",null,3,"T",502,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1489,502.231]
[1980,{"$raw":"00000000"},21111,"GC.3.1650",null,3,"T",94,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1490,94.272]
[1981,{"$raw":"00000000"},21111,"GC.3.1651",null,3,"T",470,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1491,470.188]
[1982,{"$raw":"00000000"},21111,"GC.3.1652",null,3,"T",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1492,247.983]
[1983,{"$raw":"00000000"},21111,"GC.3.1653",null,3,"T",273,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1493,273.430]
[1984,{"$raw":"00000000"},21111,"GC.3.1654",null,3,"T",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1494,317.129]
[1985,{"$raw":"00000000"},21111,"GC.3.1655",null,3,"T",282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1495,281.640]
[1986,{"$raw":"00000000"},21111,"GC.3.1656",null,3,null,404,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1496,403.648]
[1987,{"$raw":"00000000"},21111,"GC.3.1657",null,3,"T",810,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1497,809.877]
[1988,{"$raw":"00000000"},21111,"GC.3.1658",null,3,null,353,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1498,353.498]
[1989,{"$raw":"00000000"},21111,"GC.3.1659",null,3,null,276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1499,276.085]
[1990,{"$raw":"00000000"},21111,"GC.3.1660",null,3,null,0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1500,0.121]
[1991,{"$raw":"00000000"},21111,"GC.3.1661",null,3,null,475,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1501,475.445]
[1992,{"$raw":"00000000"},21111,"GC.3.1662",null,3,null,211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1502,211.450]
[1993,{"$raw":"00000000"},21111,"GC.3.1663",null,3,null,161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1503,161.149]
[1994,{"$raw":"00000000"},21111,"GC.3.1664",null,3,null,169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1504,169.138]
[1995,{"$raw":"00000000"},21111,"GC.3.1665",null,3,null,154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1505,153.928]
[1996,{"$raw":"00000000"},21111,"GC.3.1666",null,3,null,25,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1506,25.335]
[1997,{"$raw":"00000000"},21111,"GC.3.1667",null,3,null,255,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1507,255.495]
[1998,{"$raw":"00000000"},21111,"GC.3.1668",null,3,"T",256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1508,256.022]
[2002,{"$raw":"00000000"},21111,"GC.3.1669",null,3,null,340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1509,340.192]
[2003,{"$raw":"00000000"},21111,"GC.3.1670",null,3,null,536,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1510,536.217]
[2004,{"$raw":"00000000"},21111,"GC.3.1671",null,3,null,161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1511,161.234]
[2005,{"$raw":"00000000"},21111,"GC.3.1672",null,3,null,13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1512,12.903]
[2006,{"$raw":"00000000"},21111,"GC.3.1673",null,3,null,672,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1513,671.981]
[2007,{"$raw":"00000000"},21111,"GC.3.1674",null,3,null,248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1514,247.849]
[2008,{"$raw":"00000000"},21111,"GC.3.1675",null,3,null,129,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1515,129.299]
[2009,{"$raw":"00000000"},21111,"GC.3.1676",null,3,null,35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1516,34.756]
[2010,{"$raw":"00000000"},21111,"GC.3.1677",null,3,null,1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1517,0.772]
[2011,{"$raw":"00000000"},21111,"GC.3.1678",null,3,null,131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1518,130.738]
[2012,{"$raw":"00000000"},21111,"GC.3.1679",null,3,null,126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1519,126.224]
[2014,{"$raw":"00000000"},21111,"GC.3.1680",null,3,null,202,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1520,202.401]
[2015,{"$raw":"00000000"},21111,"GC.3.1681",null,3,null,46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1521,46.022]
[2016,{"$raw":"00000000"},21111,"GC.3.1682",null,3,null,133,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1522,133.357]
[2017,{"$raw":"00000000"},21111,"GC.3.1683",null,3,null,80,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1523,80.378]
[2018,{"$raw":"00000000"},21111,"GC.3.1684",null,3,null,77,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1524,76.859]
[2019,{"$raw":"00000000"},21111,"GC.3.1685",null,3,null,84,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1525,83.590]
[2020,{"$raw":"00000000"},21111,"GC.3.1686",null,3,null,195,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1526,194.822]
[2021,{"$raw":"00000000"},21111,"GC.3.1687",null,3,null,92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1527,91.781]
[2022,{"$raw":"00000000"},21111,"GC.3.1688",null,3,null,54,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1528,53.804]
[2023,{"$raw":"00000000"},21111,"GC.3.1689",null,3,null,126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1529,125.666]
[2024,{"$raw":"00000000"},21111,"GC.3.1690",null,3,null,227,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1530,226.721]
[2025,{"$raw":"00000000"},21111,"GC.3.1691",null,3,null,194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1531,194.303]
[2026,{"$raw":"00000000"},21111,"GC.3.1692",null,3,null,56,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1532,55.625]
[2027,{"$raw":"00000000"},21111,"GC.3.1693",null,3,null,220,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1533,219.836]
[2028,{"$raw":"00000000"},21111,"GC.3.1694",null,3,null,69,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1534,69.084]
[2029,{"$raw":"00000000"},21111,"GC.3.1695",null,3,null,375,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1535,374.541]
[2030,{"$raw":"00000000"},21111,"GC.3.1696",null,3,null,75,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1536,74.696]
[2031,{"$raw":"00000000"},21111,"GC.3.1697",null,3,null,1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1537,1.092]
[2032,{"$raw":"00000000"},21111,"GC.3.1698",null,3,null,281,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",1538,280.532]
[2034,{"$raw":"00000000"},21111,"GC.3.1699",null,3,"T",314,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1539,314.487]
[2036,{"$raw":"00000000"},21111,"GC.3.1700",null,3,"T",818,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1540,818.420]
[2037,{"$raw":"00000000"},21111,"GC.3.1701",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1541,295.620]
[2038,{"$raw":"00000000"},21111,"GC.3.1702",null,3,"T",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1542,303.539]
[2039,{"$raw":"00000000"},21111,"GC.3.1703",null,3,"T",405,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1543,404.690]
[2040,{"$raw":"00000000"},21111,"GC.3.1704",null,3,"T",352,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1544,352.293]
[2041,{"$raw":"00000000"},21111,"GC.3.1705",null,3,"T",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1545,370.339]
[2042,{"$raw":"00000000"},21111,"GC.3.1706",null,3,"T",461,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1546,460.526]
[2043,{"$raw":"00000000"},21111,"GC.3.1707",null,3,"T",300,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1547,300.398]
[2044,{"$raw":"00000000"},21111,"GC.3.1708",null,3,"T",123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1548,123.385]
[2045,{"$raw":"00000000"},21111,"GC.3.1709",null,3,"T",324,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1549,324.026]
[2046,{"$raw":"00000000"},21111,"GC.3.1710",null,3,"T",583,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1550,583.477]
[2047,{"$raw":"00000000"},21111,"GC.3.1711",null,3,"T",43,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1551,42.818]
[2048,{"$raw":"00000000"},21111,"GC.3.1712",null,3,"T",90,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1552,90.111]
[2049,{"$raw":"00000000"},21111,"GC.3.1713",null,3,"T",353,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1553,352.664]
[2050,{"$raw":"00000000"},21111,"GC.3.1714",null,3,"T",241,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1554,240.734]
[2051,{"$raw":"00000000"},21111,"GC.3.1715",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",1555,38.806]
[2052,{"$raw":"00000000"},21117,"GC.3.1716",null,3,"T",1241,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1556,1240.997]
[2053,{"$raw":"00000000"},21117,"GC.3.1717",null,3,"T",1897,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1557,1896.976]
[2054,{"$raw":"00000000"},21117,"GC.3.1718",null,3,"T",1411,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1558,1411.120]
[2055,{"$raw":"00000000"},21117,"GC.3.1719",null,3,"T",266,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1559,265.791]
[2056,{"$raw":"00000000"},21117,"GC.3.1720",null,3,"T",371,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1560,370.586]
[2057,{"$raw":"00000000"},21117,"GC.3.1721",null,3,"T",250,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1561,250.194]
[2058,{"$raw":"00000000"},21117,"GC.3.1722",null,3,"T",772,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1562,771.933]
[2059,{"$raw":"00000000"},21117,"GC.3.1723",null,3,"T",2040,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1563,2040.109]
[2061,{"$raw":"00000000"},21117,"GC.3.1724",null,3,"T",621,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1564,620.922]
[2062,{"$raw":"00000000"},21117,"GC.3.1725",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1565,338.723]
[2063,{"$raw":"00000000"},21117,"GC.3.1726",null,3,"T",1098,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1566,1097.867]
[2064,{"$raw":"00000000"},21117,"GC.3.1727",null,3,"T",316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1567,316.226]
[2065,{"$raw":"00000000"},21117,"GC.3.1728",null,3,"T",1264,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1568,1263.790]
[2066,{"$raw":"00000000"},21117,"GC.3.1729",null,3,"T",2337,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1569,2337.342]
[2067,{"$raw":"00000000"},21117,"GC.3.1730",null,3,"T",666,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1570,665.636]
[2070,{"$raw":"00000000"},21117,"GC.3.1731",null,3,"T",557,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1571,556.789]
[2071,{"$raw":"00000000"},21117,"GC.3.1732",null,3,"T",491,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1572,490.917]
[2072,{"$raw":"00000000"},21117,"GC.3.1733",null,3,"T",210,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1573,209.743]
[2073,{"$raw":"00000000"},21117,"GC.3.1734",null,3,"T",527,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1574,526.722]
[2074,{"$raw":"00000000"},21117,"GC.3.1735",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1575,85.306]
[2075,{"$raw":"00000000"},21117,"GC.3.1736",null,3,"T",1465,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1576,1464.797]
[2077,{"$raw":"00000000"},21117,"GC.3.1737",null,3,"T",982,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1577,981.872]
[2078,{"$raw":"00000000"},21106,"GC.3.1738",null,3,"T",129,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1578,128.507]
[2079,{"$raw":"00000000"},21106,"GC.3.1739",null,3,"T",564,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1579,563.610]
[2080,{"$raw":"00000000"},21106,"GC.3.1740",null,3,"T",184,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1580,184.498]
[2081,{"$raw":"00000000"},21106,"GC.3.1741",null,3,"T",649,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1581,648.978]
[2082,{"$raw":"00000000"},21106,"GC.3.1742",null,3,"T",796,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1582,795.706]
[2083,{"$raw":"00000000"},21106,"GC.3.1743",null,3,"T",262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1583,262.157]
[2084,{"$raw":"00000000"},21106,"GC.3.1744",null,3,"T",331,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1584,331.224]
[2085,{"$raw":"00000000"},21106,"GC.3.1745",null,3,"T",452,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1585,452.259]
[2086,{"$raw":"00000000"},21106,"GC.3.1746",null,3,"T",448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1586,448.232]
[2087,{"$raw":"00000000"},21106,"GC.3.1747",null,3,"T",568,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1587,568.182]
[2088,{"$raw":"00000000"},21106,"GC.3.1748",null,3,"T",440,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1588,440.319]
[2090,{"$raw":"00000000"},21106,"GC.3.1750",null,3,"T",670,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1589,669.744]
[2091,{"$raw":"00000000"},21106,"GC.3.1751",null,3,"T",719,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1590,719.251]
[2092,{"$raw":"00000000"},21106,"GC.3.1752",null,3,"T",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1591,94.571]
[2093,{"$raw":"00000000"},21106,"GC.3.1753",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1592,1.312]
[2094,{"$raw":"00000000"},21106,"GC.3.1754",null,3,"T",271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1593,271.025]
[2096,{"$raw":"00000000"},21106,"GC.3.1755",null,3,"T",373,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1594,372.990]
[2097,{"$raw":"00000000"},21106,"GC.3.1756",null,3,"T",312,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1595,311.930]
[2099,{"$raw":"00000000"},0,"GC.3.1758",null,3,"T",74,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",1596,74.493]
[2102,{"$raw":"00000000"},21106,"GC.3.1761",null,3,"T",794,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1597,793.872]
[2103,{"$raw":"00000000"},21106,"GC.3.1762",null,3,"T",177,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1598,176.782]
[2105,{"$raw":"00000000"},21106,"GC.3.1763",null,3,"T",1420,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1599,1419.617]
[2106,{"$raw":"00000000"},21106,"GC.3.1764",null,3,"T",241,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1600,240.728]
[2107,{"$raw":"00000000"},21106,"GC.3.1765",null,3,"T",80,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1601,80.435]
[2108,{"$raw":"00000000"},21106,"GC.3.1766",null,3,"T",91,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1602,90.863]
[2109,{"$raw":"00000000"},21106,"GC.3.1767",null,3,"T",117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1603,116.735]
[2110,{"$raw":"00000000"},21106,"GC.3.1768",null,3,"T",541,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1604,540.794]
[2111,{"$raw":"00000000"},21106,"GC.3.1769",null,3,"T",419,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1605,419.175]
[2112,{"$raw":"00000000"},21117,"GC.3.1770",null,3,"T",1139,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1606,1138.635]
[2113,{"$raw":"00000000"},21117,"GC.3.1771",null,3,"T",99,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1607,99.024]
[2114,{"$raw":"00000000"},21117,"GC.3.1772",null,3,"T",652,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1608,652.142]
[2115,{"$raw":"00000000"},21117,"GC.3.1773",null,3,"T",874,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1609,874.118]
[2116,{"$raw":"00000000"},21117,"GC.3.1774",null,3,"T",37,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1610,37.333]
[2117,{"$raw":"00000000"},21117,"GC.3.1775",null,3,"T",782,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1611,782.377]
[2118,{"$raw":"00000000"},21117,"GC.3.1776",null,3,"T",119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1612,118.749]
[2119,{"$raw":"00000000"},21117,"GC.3.1777",null,3,"T",393,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1613,393.495]
[2120,{"$raw":"00000000"},21117,"GC.3.1778",null,3,"T",696,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1614,696.419]
[2121,{"$raw":"00000000"},21117,"GC.3.1779",null,3,"T",1595,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1615,1594.910]
[2123,{"$raw":"00000000"},21117,"GC.3.1780",null,3,"T",468,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1616,467.606]
[2125,{"$raw":"00000000"},21117,"GC.3.1781",null,3,null,15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","OV",1617,15.084]
[2127,{"$raw":"00000000"},21117,"GC.3.1782",null,3,"T",336,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1618,335.749]
[2128,{"$raw":"00000000"},21117,"GC.3.1783",null,3,"T",270,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1619,269.841]
[2130,{"$raw":"00000000"},21117,"GC.3.1784",null,3,null,371,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","OV",1620,371.332]
[2132,{"$raw":"00000000"},21117,"GC.3.1785",null,3,"T",1271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1621,1271.363]
[2133,{"$raw":"00000000"},21117,"GC.3.1786",null,3,"T",1181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1622,1181.176]
[2136,{"$raw":"00000000"},21117,"GC.3.1787",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1623,62.321]
[2138,{"$raw":"00000000"},21117,"GC.3.1788",null,3,"T",446,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1624,446.385]
[2139,{"$raw":"00000000"},21117,"GC.3.1789",null,3,"T",439,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1625,439.012]
[2140,{"$raw":"00000000"},21117,"GC.3.1790",null,3,"T",756,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1626,755.611]
[2142,{"$raw":"00000000"},21117,"GC.3.1791",null,3,"T",342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1627,341.674]
[2143,{"$raw":"00000000"},21117,"GC.3.1792",null,3,"T",773,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1628,772.724]
[2144,{"$raw":"00000000"},21117,"GC.3.1793",null,3,"T",186,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1629,186.324]
[2145,{"$raw":"00000000"},21117,"GC.3.1794",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1630,0.905]
[2146,{"$raw":"00000000"},21117,"GC.3.1795",null,3,"T",479,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1631,478.622]
[2147,{"$raw":"00000000"},21117,"GC.3.1796",null,3,"T",494,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1632,493.687]
[2150,{"$raw":"00000000"},21117,"GC.3.1797",null,3,"T",383,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1633,383.230]
[2151,{"$raw":"00000000"},21117,"GC.3.1798",null,3,"T",335,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1634,334.717]
[2152,{"$raw":"00000000"},21117,"GC.3.1799",null,3,"T",746,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1635,746.415]
[2153,{"$raw":"00000000"},21117,"GC.3.1800",null,3,"T",286,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1636,285.797]
[2154,{"$raw":"00000000"},21117,"GC.3.1801",null,3,"T",265,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1637,265.163]
[2155,{"$raw":"00000000"},21117,"GC.3.1802",null,3,"T",209,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1638,209.306]
[2157,{"$raw":"00000000"},21117,"GC.3.1803",null,3,"T",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1639,256.688]
[2158,{"$raw":"00000000"},21117,"GC.3.1804",null,3,"T",803,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1640,803.188]
[2159,{"$raw":"00000000"},21117,"GC.3.1805",null,3,"T",3171,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1641,3171.206]
[2160,{"$raw":"00000000"},21117,"GC.3.1806",null,3,"T",2354,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1642,2354.348]
[2161,{"$raw":"00000000"},21117,"GC.3.1807",null,3,"T",710,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1643,709.867]
[2162,{"$raw":"00000000"},21117,"GC.3.1808",null,3,"T",1244,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1644,1244.061]
[2163,{"$raw":"00000000"},21117,"GC.3.1809",null,3,"T",380,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1645,379.969]
[2164,{"$raw":"00000000"},21117,"GC.3.1810",null,3,"T",901,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1646,900.975]
[2165,{"$raw":"00000000"},21117,"GC.3.1811",null,3,"T",740,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1647,740.205]
[2166,{"$raw":"00000000"},21117,"GC.3.1812",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1648,39.784]
[2168,{"$raw":"00000000"},21117,"GC.3.1813",null,3,"T",272,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1649,272.495]
[2169,{"$raw":"00000000"},21117,"GC.3.1814",null,3,"T",265,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1650,264.881]
[2170,{"$raw":"00000000"},21117,"GC.3.1815",null,3,"T",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1651,219.269]
[2171,{"$raw":"00000000"},21117,"GC.3.1816",null,3,"T",573,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1652,572.877]
[2179,{"$raw":"00000000"},21117,"GC.3.1817",null,3,"T",1035,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",1653,1035.476]
[2181,{"$raw":"00000000"},21106,"GC.3.1818",null,3,"T",566,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1654,566.253]
[2182,{"$raw":"00000000"},21106,"GC.3.1819",null,3,"T",452,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1655,452.375]
[2183,{"$raw":"00000000"},21106,"GC.3.1820",null,3,"T",299,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1656,299.308]
[2184,{"$raw":"00000000"},21106,"GC.3.1821",null,3,"T",1089,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1657,1089.265]
[2186,{"$raw":"00000000"},21106,"GC.3.1822",null,3,"T",69,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1658,69.367]
[2187,{"$raw":"00000000"},21106,"GC.3.1823",null,3,"T",1507,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1659,1506.626]
[2188,{"$raw":"00000000"},21106,"GC.3.1824",null,3,"T",408,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1660,408.343]
[2189,{"$raw":"00000000"},21106,"GC.3.1825",null,3,"T",1224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1661,1224.101]
[2190,{"$raw":"00000000"},21106,"GC.3.1826",null,3,"T",336,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1662,336.465]
[2191,{"$raw":"00000000"},21106,"GC.3.1827",null,3,"T",860,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1663,860.452]
[2192,{"$raw":"00000000"},21106,"GC.3.1828",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1664,40.953]
[2193,{"$raw":"00000000"},21106,"GC.3.1829",null,3,"T",357,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1665,356.543]
[2194,{"$raw":"00000000"},21106,"GC.3.1830",null,3,"T",136,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1666,136.087]
[2195,{"$raw":"00000000"},21106,"GC.3.1831",null,3,"T",199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1667,199.317]
[2196,{"$raw":"00000000"},21106,"GC.3.1832",null,3,"T",660,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1668,659.535]
[2197,{"$raw":"00000000"},21106,"GC.3.1833",null,3,"T",322,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1669,322.379]
[2198,{"$raw":"00000000"},21106,"GC.3.1834",null,3,"T",506,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1670,505.704]
[2199,{"$raw":"00000000"},21106,"GC.3.1835",null,3,"T",104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1671,103.768]
[2200,{"$raw":"00000000"},21106,"GC.3.1836",null,3,"T",445,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1672,445.497]
[2201,{"$raw":"00000000"},21106,"GC.3.1837",null,3,"T",582,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1673,581.528]
[2202,{"$raw":"00000000"},21106,"GC.3.1838",null,3,"T",167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1674,167.124]
[2203,{"$raw":"00000000"},21106,"GC.3.1839",null,3,"T",411,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1675,411.079]
[2204,{"$raw":"00000000"},21106,"GC.3.1840",null,3,"T",276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1676,275.818]
[2205,{"$raw":"00000000"},21106,"GC.3.1841",null,3,"T",594,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1677,594.485]
[2206,{"$raw":"00000000"},21106,"GC.3.1842",null,3,"T",812,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1678,811.809]
[2207,{"$raw":"00000000"},21106,"GC.3.1843",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1679,6.364]
[2208,{"$raw":"00000000"},21106,"GC.3.1844",null,3,"T",310,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1680,309.707]
[2209,{"$raw":"00000000"},21106,"GC.3.1845",null,3,"T",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1681,248.054]
[2212,{"$raw":"00000000"},21106,"GC.3.1846",null,3,"T",563,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1682,562.662]
[2213,{"$raw":"00000000"},21106,"GC.3.1847",null,3,"T",476,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1683,476.231]
[2214,{"$raw":"00000000"},21106,"GC.3.1848",null,3,"T",1119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1684,1119.052]
[2215,{"$raw":"00000000"},21106,"GC.3.1849",null,3,"T",142,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1685,142.089]
[2216,{"$raw":"00000000"},21106,"GC.3.1850",null,3,"T",699,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1686,698.679]
[2219,{"$raw":"00000000"},21106,"GC.3.1851",null,3,"T",909,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1687,908.566]
[2220,{"$raw":"00000000"},21106,"GC.3.1852",null,3,"T",1323,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1688,1322.900]
[2221,{"$raw":"00000000"},21106,"GC.3.1853",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1689,3.543]
[2222,{"$raw":"00000000"},21106,"GC.3.1854",null,3,"T",215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1690,215.049]
[2223,{"$raw":"00000000"},21106,"GC.3.1855",null,3,"T",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1691,369.698]
[2224,{"$raw":"00000000"},21106,"GC.3.1856",null,3,"T",765,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1692,765.341]
[2225,{"$raw":"00000000"},21106,"GC.3.1857",null,3,"T",420,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1693,420.110]
[2226,{"$raw":"00000000"},21106,"GC.3.1858",null,3,"T",192,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1694,192.259]
[2227,{"$raw":"00000000"},21106,"GC.3.1859",null,3,"T",367,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1695,366.989]
[2228,{"$raw":"00000000"},21106,"GC.3.1860",null,3,"T",410,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1696,410.267]
[2229,{"$raw":"00000000"},21106,"GC.3.1861",null,3,"T",255,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1697,254.561]
[2230,{"$raw":"00000000"},21106,"GC.3.1862",null,3,"T",419,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1698,418.671]
[2231,{"$raw":"00000000"},21106,"GC.3.1863",null,3,"T",50,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1699,49.502]
[2232,{"$raw":"00000000"},21106,"GC.3.1864",null,3,"T",713,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1700,713.009]
[2233,{"$raw":"00000000"},21106,"GC.3.1865",null,3,"T",817,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1701,816.500]
[2234,{"$raw":"00000000"},21106,"GC.3.1866",null,3,"T",465,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1702,464.731]
[2235,{"$raw":"00000000"},21106,"GC.3.1867",null,3,"T",1196,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1703,1196.320]
[2236,{"$raw":"00000000"},21106,"GC.3.1868",null,3,"T",500,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1704,500.144]
[2237,{"$raw":"00000000"},21106,"GC.3.1869",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1705,3.930]
[2238,{"$raw":"00000000"},21106,"GC.3.1870",null,3,"T",431,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1706,431.496]
[2239,{"$raw":"00000000"},21106,"GC.3.1871",null,3,"T",245,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1707,244.571]
[2240,{"$raw":"00000000"},21106,"GC.3.1872",null,3,"T",1166,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1708,1165.614]
[2241,{"$raw":"00000000"},21106,"GC.3.1873",null,3,"T",1461,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1709,1460.516]
[2242,{"$raw":"00000000"},21106,"GC.3.1874",null,3,"T",277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1710,276.805]
[2243,{"$raw":"00000000"},21106,"GC.3.1875",null,3,"T",271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1711,270.727]
[2244,{"$raw":"00000000"},21106,"GC.3.1876",null,3,"T",91,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1712,91.201]
[2246,{"$raw":"00000000"},21106,"GC.3.1877",null,3,"T",680,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1713,679.942]
[2247,{"$raw":"00000000"},21106,"GC.3.1878",null,3,"T",976,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1714,976.212]
[2248,{"$raw":"00000000"},21106,"GC.3.1879",null,3,"T",1142,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1715,1142.396]
[2249,{"$raw":"00000000"},21106,"GC.3.1880",null,3,"T",674,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1716,673.741]
[2250,{"$raw":"00000000"},21106,"GC.3.1881",null,3,"T",783,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1717,783.299]
[2253,{"$raw":"00000000"},21106,"GC.3.1882",null,3,"T",962,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1718,961.654]
[2254,{"$raw":"00000000"},21106,"GC.3.1883",null,3,"T",1012,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1719,1011.608]
[2255,{"$raw":"00000000"},21106,"GC.3.1884",null,3,null,33,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",1720,33.168]
[2256,{"$raw":"00000000"},21106,"GC.3.1885",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1721,98.468]
[2257,{"$raw":"00000000"},21106,"GC.3.1886",null,3,"T",683,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1722,682.968]
[2258,{"$raw":"00000000"},21106,"GC.3.1887",null,3,"T",12,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1723,12.195]
[2259,{"$raw":"00000000"},21106,"GC.3.1888",null,3,"T",585,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1724,585.344]
[2260,{"$raw":"00000000"},21106,"GC.3.1889",null,3,"T",340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1725,339.679]
[2261,{"$raw":"00000000"},21106,"GC.3.1890",null,3,"T",381,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1726,381.119]
[2262,{"$raw":"00000000"},21106,"GC.3.1891",null,3,"T",342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1727,342.289]
[2263,{"$raw":"00000000"},21106,"GC.3.1892",null,3,"T",227,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1728,226.699]
[2264,{"$raw":"00000000"},21106,"GC.3.1893",null,3,"T",535,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1729,534.693]
[2265,{"$raw":"00000000"},21106,"GC.3.1894",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1730,62.061]
[2266,{"$raw":"00000000"},21106,"GC.3.1895",null,3,"T",730,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1731,730.028]
[2268,{"$raw":"00000000"},21106,"GC.3.1896",null,3,"T",720,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1732,720.161]
[2270,{"$raw":"00000000"},21106,"GC.3.1897",null,3,"T",297,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1733,296.806]
[2271,{"$raw":"00000000"},21106,"GC.3.1898",null,3,"T",409,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1734,408.967]
[2272,{"$raw":"00000000"},21106,"GC.3.1899",null,3,"T",254,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1735,253.998]
[2273,{"$raw":"00000000"},21106,"GC.3.1900",null,3,"T",115,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1736,115.212]
[2274,{"$raw":"00000000"},21106,"GC.3.1901",null,3,"T",142,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1737,141.883]
[2275,{"$raw":"00000000"},21106,"GC.3.1902",null,3,"T",340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1738,339.781]
[2276,{"$raw":"00000000"},21106,"GC.3.1903",null,3,"T",407,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1739,406.912]
[2278,{"$raw":"00000000"},21106,"GC.3.1904",null,3,"T",88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1740,88.436]
[2279,{"$raw":"00000000"},21106,"GC.3.1905",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1741,1.026]
[2281,{"$raw":"00000000"},21106,"GC.3.1906",null,3,"T",470,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1742,470.471]
[2282,{"$raw":"00000000"},21106,"GC.3.1907",null,3,"T",836,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1743,836.252]
[2284,{"$raw":"00000000"},21106,"GC.3.1908",null,3,"T",307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1744,307.350]
[2285,{"$raw":"00000000"},21106,"GC.3.1909",null,3,"T",427,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1745,426.901]
[2289,{"$raw":"00000000"},21106,"GC.3.1910",null,3,"T",143,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1746,143.278]
[2290,{"$raw":"00000000"},21106,"GC.3.1911",null,3,"T",307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1747,307.016]
[2291,{"$raw":"00000000"},21106,"GC.3.1912",null,3,"T",1033,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1748,1032.810]
[2292,{"$raw":"00000000"},21106,"GC.3.1913",null,3,"T",1462,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1749,1461.718]
[2293,{"$raw":"00000000"},21106,"GC.3.1914",null,3,"T",568,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1750,567.772]
[2294,{"$raw":"00000000"},21106,"GC.3.1915",null,3,"T",380,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1751,380.201]
[2295,{"$raw":"00000000"},21106,"GC.3.1916",null,3,"T",293,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1752,293.109]
[2296,{"$raw":"00000000"},21106,"GC.3.1917",null,3,"T",91,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1753,90.908]
[2297,{"$raw":"00000000"},21106,"GC.3.1918",null,3,"T",221,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1754,220.897]
[2298,{"$raw":"00000000"},21106,"GC.3.1919",null,3,"T",118,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1755,118.081]
[2301,{"$raw":"00000000"},21106,"GC.3.1920",null,3,"T",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1756,82.262]
[2302,{"$raw":"00000000"},21106,"GC.3.1921",null,3,"T",424,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1757,423.503]
[2303,{"$raw":"00000000"},21106,"GC.3.1922",null,3,"T",573,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1758,573.336]
[2305,{"$raw":"00000000"},21106,"GC.3.1924",null,3,"T",455,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1759,454.993]
[2306,{"$raw":"00000000"},21106,"GC.3.1925",null,3,"T",720,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1760,720.266]
[2308,{"$raw":"00000000"},21106,"GC.3.1926",null,3,"T",474,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1761,474.020]
[2311,{"$raw":"00000000"},21106,"GC.3.1927",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1762,39.047]
[2312,{"$raw":"00000000"},21106,"GC.3.1928",null,3,"T",430,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1763,430.141]
[2313,{"$raw":"00000000"},21106,"GC.3.1929",null,3,"T",394,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1764,393.580]
[2314,{"$raw":"00000000"},21106,"GC.3.1930",null,3,"T",391,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1765,390.670]
[2315,{"$raw":"00000000"},21106,"GC.3.1931",null,3,"T",115,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1766,114.641]
[2317,{"$raw":"00000000"},21106,"GC.3.1932",null,3,null,194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",1767,194.367]
[2320,{"$raw":"00000000"},21106,"GC.3.1933",null,3,"T",433,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1768,432.851]
[2321,{"$raw":"00000000"},21106,"GC.3.1934",null,3,"T",550,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1769,549.988]
[2323,{"$raw":"00000000"},21106,"GC.3.1935",null,3,"T",268,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1770,268.130]
[2324,{"$raw":"00000000"},21106,"GC.3.1936",null,3,null,310,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",1771,310.438]
[2326,{"$raw":"00000000"},21106,"GC.3.1937",null,3,null,420,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",1772,420.174]
[2327,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",71,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",1773,70.588]
[2328,{"$raw":"00000000"},21106,"GC.3.1939",null,3,"T",730,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1774,729.829]
[2329,{"$raw":"00000000"},21106,"GC.3.1940",null,3,"T",744,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1775,744.275]
[2330,{"$raw":"00000000"},21106,"GC.3.1941",null,3,"T",818,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1776,818.166]
[2331,{"$raw":"00000000"},21106,"GC.3.1942",null,3,"T",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1777,257.076]
[2332,{"$raw":"00000000"},21106,"GC.3.1943",null,3,"T",901,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1778,901.331]
[2333,{"$raw":"00000000"},21106,"GC.3.1944",null,3,"T",1101,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1779,1100.679]
[2334,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",25,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",1780,25.303]
[2335,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",1781,168.758]
[2336,{"$raw":"00000000"},21106,"GC.3.1947",null,3,"T",389,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1782,389.363]
[2337,{"$raw":"00000000"},21106,"GC.3.1948",null,3,"T",212,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1783,211.614]
[2338,{"$raw":"00000000"},21106,"GC.3.1949",null,3,"T",666,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1784,665.952]
[2339,{"$raw":"00000000"},21106,"GC.3.1950",null,3,"T",216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1785,215.793]
[2341,{"$raw":"00000000"},21106,"GC.3.1952",null,3,"T",673,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1786,673.354]
[2342,{"$raw":"00000000"},21106,"GC.3.1953",null,3,"T",262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1787,262.102]
[2343,{"$raw":"00000000"},21106,"GC.3.1954",null,3,"T",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1788,94.542]
[2344,{"$raw":"00000000"},21106,"GC.3.1955",null,3,"T",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1789,247.612]
[2345,{"$raw":"00000000"},21106,"GC.3.1956",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1790,17.405]
[2346,{"$raw":"00000000"},21106,"GC.3.1957",null,3,"T",545,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1791,544.733]
[2347,{"$raw":"00000000"},21106,"GC.3.1958",null,3,"T",1419,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1792,1419.193]
[2348,{"$raw":"00000000"},21106,"GC.3.1959",null,3,"T",401,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1793,400.596]
[2349,{"$raw":"00000000"},21106,"GC.3.1960",null,3,"T",56,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1794,56.122]
[2350,{"$raw":"00000000"},21106,"GC.3.1961",null,3,"T",879,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1795,878.594]
[2351,{"$raw":"00000000"},21106,"GC.3.1962",null,3,"T",1018,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1796,1017.589]
[2352,{"$raw":"00000000"},21106,"GC.3.1963",null,3,"T",379,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1797,378.669]
[2353,{"$raw":"00000000"},21106,"GC.3.1964",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1798,0.680]
[2354,{"$raw":"00000000"},21106,"GC.3.1965",null,3,"T",4094,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1799,4094.497]
[2355,{"$raw":"00000000"},21106,"GC.3.1966",null,3,"T",138,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1800,137.965]
[2356,{"$raw":"00000000"},21106,"GC.3.1967",null,3,"T",350,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1801,349.810]
[2357,{"$raw":"00000000"},21106,"GC.3.1968",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1802,1.547]
[2358,{"$raw":"00000000"},21106,"GC.3.1969",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1803,0.564]
[2359,{"$raw":"00000000"},21106,"GC.3.1970",null,3,"T",316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1804,315.948]
[2360,{"$raw":"00000000"},21106,"GC.3.1971",null,3,"T",167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1805,166.989]
[2361,{"$raw":"00000000"},21106,"GC.3.1972",null,3,"T",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1806,257.365]
[2362,{"$raw":"00000000"},21106,"GC.3.1973",null,3,"T",271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1807,271.204]
[2363,{"$raw":"00000000"},21106,"GC.3.1974",null,3,"T",359,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1808,358.551]
[2364,{"$raw":"00000000"},21106,"GC.3.1975",null,3,"T",432,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1809,432.171]
[2365,{"$raw":"00000000"},21106,"GC.3.1976",null,3,"T",265,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1810,264.842]
[2366,{"$raw":"00000000"},21106,"GC.3.1977",null,3,"T",229,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1811,229.486]
[2367,{"$raw":"00000000"},21106,"GC.3.1978",null,3,"T",86,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1812,86.106]
[2368,{"$raw":"00000000"},21106,"GC.3.1979",null,3,"T",327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1813,327.093]
[2369,{"$raw":"00000000"},21106,"GC.3.1980",null,3,"T",333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1814,332.612]
[2370,{"$raw":"00000000"},21106,"GC.3.1981",null,3,"T",394,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1815,393.997]
[2371,{"$raw":"00000000"},21106,"GC.3.1982",null,3,"T",89,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1816,89.057]
[2372,{"$raw":"00000000"},21106,"GC.3.1983",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1817,0.543]
[2373,{"$raw":"00000000"},21106,"GC.3.1984",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1818,84.953]
[2374,{"$raw":"00000000"},21106,"GC.3.1985",null,3,"T",108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1819,108.039]
[2375,{"$raw":"00000000"},21106,"GC.3.1986",null,3,"T",564,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1820,563.885]
[2376,{"$raw":"00000000"},21106,"GC.3.1987",null,3,"T",74,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1821,74.434]
[2377,{"$raw":"00000000"},21106,"GC.3.1988",null,3,"T",396,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1822,395.635]
[2378,{"$raw":"00000000"},21106,"GC.3.1989",null,3,"T",327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1823,326.693]
[2379,{"$raw":"00000000"},21106,"GC.3.1990",null,3,"T",457,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1824,457.109]
[2380,{"$raw":"00000000"},21106,"GC.3.1991",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1825,0.291]
[2381,{"$raw":"00000000"},21106,"GC.3.1992",null,3,"T",320,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1826,320.069]
[2382,{"$raw":"00000000"},21106,"GC.3.1993",null,3,"T",383,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1827,383.148]
[2383,{"$raw":"00000000"},21106,"GC.3.1994",null,3,"T",186,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1828,186.163]
[2384,{"$raw":"00000000"},21106,"GC.3.1995",null,3,"T",143,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1829,143.468]
[2385,{"$raw":"00000000"},21106,"GC.3.1996",null,3,"T",188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1830,188.439]
[2386,{"$raw":"00000000"},21106,"GC.3.1997",null,3,"T",253,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1831,252.828]
[2387,{"$raw":"00000000"},21106,"GC.3.1998",null,3,"T",228,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1832,228.459]
[2388,{"$raw":"00000000"},21106,"GC.3.1999",null,3,"T",190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1833,190.407]
[2389,{"$raw":"00000000"},21106,"GC.3.2000",null,3,"T",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1834,247.851]
[2391,{"$raw":"00000000"},21106,"GC.3.2001",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1835,92.082]
[2392,{"$raw":"00000000"},21106,"GC.3.2002",null,3,"T",1073,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1836,1072.964]
[2393,{"$raw":"00000000"},21106,"GC.3.2003",null,3,"T",1393,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1837,1393.236]
[2394,{"$raw":"00000000"},21106,"GC.3.2004",null,3,"T",580,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1838,579.973]
[2395,{"$raw":"00000000"},21106,"GC.3.2005",null,3,"T",348,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1839,348.183]
[2396,{"$raw":"00000000"},21106,"GC.3.2006",null,3,"T",349,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1840,349.041]
[2397,{"$raw":"00000000"},21106,"GC.3.2007",null,3,"T",268,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1841,268.116]
[2398,{"$raw":"00000000"},21106,"GC.3.2008",null,3,"T",310,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1842,309.952]
[2400,{"$raw":"00000000"},21106,"GC.3.2009",null,3,"T",179,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1843,179.006]
[2401,{"$raw":"00000000"},21106,"GC.3.2010",null,3,"T",402,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1844,401.999]
[2404,{"$raw":"00000000"},21106,"GC.3.2011",null,3,"T",387,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1845,386.743]
[2405,{"$raw":"00000000"},21106,"GC.3.2012",null,3,"T",1127,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1846,1127.484]
[2406,{"$raw":"00000000"},21106,"GC.3.2013",null,3,"T",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1847,219.285]
[2408,{"$raw":"00000000"},21106,"GC.3.2014",null,3,"T",652,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1848,652.449]
[2409,{"$raw":"00000000"},21106,"GC.3.2015",null,3,"T",902,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1849,902.028]
[2410,{"$raw":"00000000"},21106,"GC.3.2016",null,3,"T",105,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1850,104.552]
[2411,{"$raw":"00000000"},21106,"GC.3.2017",null,3,"T",430,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1851,430.443]
[2412,{"$raw":"00000000"},21106,"GC.3.2018",null,3,"T",126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1852,126.218]
[2413,{"$raw":"00000000"},21106,"GC.3.2019",null,3,"T",517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1853,516.714]
[2414,{"$raw":"00000000"},21106,"GC.3.2020",null,3,"T",83,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1854,83.085]
[2415,{"$raw":"00000000"},21106,"GC.3.2021",null,3,"T",125,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1855,125.389]
[2416,{"$raw":"00000000"},21106,"GC.3.2022",null,3,"T",110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1856,110.142]
[2417,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",384,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",1857,383.910]
[2418,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",886,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",1858,885.781]
[2419,{"$raw":"00000000"},21102,"GC.3.2025",null,3,"T",306,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1859,306.304]
[2420,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",1860,1.021]
[2421,{"$raw":"00000000"},21102,"GC.3.2027",null,3,"T",256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1861,256.057]
[2423,{"$raw":"00000000"},21106,"GC.3.2029",null,3,"T",213,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1862,212.736]
[2424,{"$raw":"00000000"},21106,"GC.3.2030",null,3,"T",785,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1863,785.306]
[2425,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",50,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",1864,49.730]
[2426,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",913,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",1865,913.256]
[2427,{"$raw":"00000000"},21106,"GC.3.2033",null,3,"T",527,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1866,527.319]
[2428,{"$raw":"00000000"},21106,"GC.3.2034",null,3,"T",428,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1867,428.129]
[2429,{"$raw":"00000000"},21106,"GC.3.2035",null,3,"T",1047,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1868,1046.541]
[2430,{"$raw":"00000000"},21106,"GC.3.2036",null,3,"T",488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1869,488.357]
[2431,{"$raw":"00000000"},21106,"GC.3.2037",null,3,"T",495,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1870,494.691]
[2432,{"$raw":"00000000"},21106,"GC.3.2038",null,3,"T",624,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1871,624.461]
[2433,{"$raw":"00000000"},21106,"GC.3.2039",null,3,"T",46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1872,45.566]
[2434,{"$raw":"00000000"},21106,"GC.3.2040",null,3,"T",76,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1873,76.080]
[2435,{"$raw":"00000000"},21106,"GC.3.2041",null,3,"T",303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1874,303.152]
[2436,{"$raw":"00000000"},21106,"GC.3.2042",null,3,"T",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1875,317.219]
[2438,{"$raw":"00000000"},21106,"GC.3.2043",null,3,"T",70,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1876,70.122]
[2439,{"$raw":"00000000"},21106,"GC.3.2044",null,3,"T",316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1877,315.643]
[2440,{"$raw":"00000000"},21106,"GC.3.2045",null,3,"T",303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1878,302.610]
[2441,{"$raw":"00000000"},21106,"GC.3.2046",null,3,"T",798,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1879,798.233]
[2442,{"$raw":"00000000"},21106,"GC.3.2047",null,3,"T",26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1880,26.252]
[2443,{"$raw":"00000000"},21106,"GC.3.2048",null,3,"T",386,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1881,385.556]
[2444,{"$raw":"00000000"},21106,"GC.3.2049",null,3,"T",922,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1882,922.386]
[2445,{"$raw":"00000000"},21106,"GC.3.2050",null,3,"T",705,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1883,704.862]
[2446,{"$raw":"00000000"},21106,"GC.3.2051",null,3,"T",515,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1884,514.787]
[2447,{"$raw":"00000000"},21106,"GC.3.2052",null,3,"T",36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1885,35.506]
[2448,{"$raw":"00000000"},21106,"GC.3.2053",null,3,"T",468,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1886,467.509]
[2449,{"$raw":"00000000"},21106,"GC.3.2054",null,3,"T",426,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1887,425.849]
[2450,{"$raw":"00000000"},21106,"GC.3.2055",null,3,"T",412,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1888,412.339]
[2451,{"$raw":"00000000"},21102,"GC.3.2056",null,3,"T",1028,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1889,1027.519]
[2452,{"$raw":"00000000"},21102,"GC.3.2057",null,3,"T",506,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1890,506.494]
[2453,{"$raw":"00000000"},21102,"GC.3.2058",null,3,"T",533,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1891,533.032]
[2454,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",931,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",1892,931.000]
[2456,{"$raw":"00000000"},21106,"GC.3.2061",null,3,"T",963,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1893,963.335]
[2457,{"$raw":"00000000"},21106,"GC.3.2062",null,3,"T",426,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1894,425.594]
[2458,{"$raw":"00000000"},21106,"GC.3.2063",null,3,"T",897,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1895,896.831]
[2459,{"$raw":"00000000"},21106,"GC.3.2064",null,3,"T",272,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1896,271.882]
[2461,{"$raw":"00000000"},21106,"GC.3.2066",null,3,"T",1342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1897,1341.581]
[2462,{"$raw":"00000000"},21102,"GC.3.2067",null,3,"T",511,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",1898,510.714]
[2464,{"$raw":"00000000"},21106,"GC.3.2069",null,3,"T",1473,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1899,1472.688]
[2466,{"$raw":"00000000"},21106,"GC.3.2071",null,3,"T",680,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1900,680.307]
[2467,{"$raw":"00000000"},21106,"GC.3.2072",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1901,27.991]
[2468,{"$raw":"00000000"},21106,"GC.3.2073",null,3,"T",430,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1902,429.762]
[2469,{"$raw":"00000000"},21106,"GC.3.2074",null,3,"T",89,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1903,88.540]
[2470,{"$raw":"00000000"},21106,"GC.3.2075",null,3,"T",177,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1904,176.960]
[2471,{"$raw":"00000000"},21106,"GC.3.2076",null,3,"T",238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1905,237.586]
[2472,{"$raw":"00000000"},21106,"GC.3.2077",null,3,"T",444,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1906,443.902]
[2473,{"$raw":"00000000"},21106,"GC.3.2078",null,3,"T",212,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1907,211.786]
[2474,{"$raw":"00000000"},21106,"GC.3.2079",null,3,"T",469,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1908,469.167]
[2476,{"$raw":"00000000"},21106,"GC.3.2080",null,3,"T",80,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1909,79.761]
[2477,{"$raw":"00000000"},21106,"GC.3.2081",null,3,"T",205,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1910,204.814]
[2478,{"$raw":"00000000"},21106,"GC.3.2082",null,3,"T",477,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1911,477.226]
[2479,{"$raw":"00000000"},21106,"GC.3.2083",null,3,"T",658,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1912,657.740]
[2480,{"$raw":"00000000"},21106,"GC.3.2084",null,3,"T",477,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1913,476.548]
[2481,{"$raw":"00000000"},21106,"GC.3.2085",null,3,"T",223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1914,222.682]
[2482,{"$raw":"00000000"},21106,"GC.3.2086",null,3,"T",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1915,317.278]
[2483,{"$raw":"00000000"},21106,"GC.3.2087",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1916,249.016]
[2484,{"$raw":"00000000"},21106,"GC.3.2088",null,3,"T",297,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1917,296.535]
[2485,{"$raw":"00000000"},21106,"GC.3.2089",null,3,"T",326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1918,325.836]
[2486,{"$raw":"00000000"},21106,"GC.3.2090",null,3,"T",494,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1919,494.182]
[2487,{"$raw":"00000000"},21106,"GC.3.2091",null,3,"T",206,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1920,206.032]
[2488,{"$raw":"00000000"},21106,"GC.3.2092",null,3,"T",393,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1921,392.611]
[2489,{"$raw":"00000000"},21106,"GC.3.2093",null,3,"T",199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1922,198.796]
[2490,{"$raw":"00000000"},21106,"GC.3.2094",null,3,"T",724,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1923,723.929]
[2491,{"$raw":"00000000"},21106,"GC.3.2095",null,3,"T",392,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1924,391.860]
[2492,{"$raw":"00000000"},21120,"GC.3.2096",null,3,"T",220,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1925,219.686]
[2493,{"$raw":"00000000"},21120,"GC.3.2097",null,3,"T",177,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1926,177.414]
[2494,{"$raw":"00000000"},21120,"GC.3.2098",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1927,40.707]
[2495,{"$raw":"00000000"},21120,"GC.3.2099",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1928,78.822]
[2497,{"$raw":"00000000"},21120,"GC.3.2101",null,3,"T",458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1929,457.520]
[2498,{"$raw":"00000000"},21120,"GC.3.2102",null,3,"T",879,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1930,879.108]
[2499,{"$raw":"00000000"},21120,"GC.3.2103",null,3,"T",284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1931,283.991]
[2500,{"$raw":"00000000"},21120,"GC.3.2104",null,3,"T",201,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1932,201.017]
[2501,{"$raw":"00000000"},21120,"GC.3.2105",null,3,"T",212,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1933,212.357]
[2502,{"$raw":"00000000"},21120,"GC.3.2106",null,3,"T",132,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1934,131.758]
[2504,{"$raw":"00000000"},21120,"GC.3.2107",null,3,"T",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1935,316.952]
[2505,{"$raw":"00000000"},21120,"GC.3.2108",null,3,"T",520,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1936,519.934]
[2506,{"$raw":"00000000"},21120,"GC.3.2109",null,3,"T",83,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1937,83.441]
[2510,{"$raw":"00000000"},21120,"GC.3.2110",null,3,"T",173,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1938,173.098]
[2511,{"$raw":"00000000"},21120,"GC.3.2111",null,3,"T",361,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1939,361.134]
[2512,{"$raw":"00000000"},21120,"GC.3.2112",null,3,"T",347,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1940,347.120]
[2513,{"$raw":"00000000"},21120,"GC.3.2113",null,3,"T",145,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1941,144.765]
[2514,{"$raw":"00000000"},21120,"GC.3.2114",null,3,"T",773,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1942,773.040]
[2515,{"$raw":"00000000"},21120,"GC.3.2115",null,3,"T",152,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1943,151.575]
[2516,{"$raw":"00000000"},21120,"GC.3.2116",null,3,"T",636,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1944,635.901]
[2517,{"$raw":"00000000"},21120,"GC.3.2117",null,3,"T",303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1945,303.342]
[2518,{"$raw":"00000000"},21120,"GC.3.2118",null,3,"T",160,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1946,160.416]
[2519,{"$raw":"00000000"},21120,"GC.3.2119",null,3,"T",125,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1947,124.597]
[2520,{"$raw":"00000000"},21120,"GC.3.2120",null,3,"T",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1948,333.759]
[2521,{"$raw":"00000000"},21120,"GC.3.2121",null,3,"T",137,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1949,137.108]
[2522,{"$raw":"00000000"},21120,"GC.3.2122",null,3,"T",857,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1950,857.477]
[2523,{"$raw":"00000000"},21120,"GC.3.2123",null,3,"T",1199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1951,1198.574]
[2524,{"$raw":"00000000"},21120,"GC.3.2124",null,3,"T",186,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1952,185.853]
[2525,{"$raw":"00000000"},21120,"GC.3.2125",null,3,"T",581,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1953,581.415]
[2527,{"$raw":"00000000"},21120,"GC.3.2127",null,3,"T",1159,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1954,1159.146]
[2528,{"$raw":"00000000"},21120,"GC.3.2128",null,3,"T",133,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1955,133.498]
[2529,{"$raw":"00000000"},21120,"GC.3.2129",null,3,"T",904,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1956,904.178]
[2531,{"$raw":"00000000"},21120,"GC.3.2130",null,3,"T",187,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1957,187.018]
[2532,{"$raw":"00000000"},21120,"GC.3.2131",null,3,"T",658,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1958,658.127]
[2533,{"$raw":"00000000"},21120,"GC.3.2132",null,3,"T",369,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1959,369.340]
[2534,{"$raw":"00000000"},21120,"GC.3.2133",null,3,"T",331,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1960,330.737]
[2535,{"$raw":"00000000"},21120,"GC.3.2134",null,3,"T",141,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",1961,140.899]
[2536,{"$raw":"00000000"},21106,"GC.3.2135",null,3,"T",713,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1962,712.752]
[2537,{"$raw":"00000000"},21106,"GC.3.2136",null,3,"T",1216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1963,1215.714]
[2538,{"$raw":"00000000"},21106,"GC.3.2137",null,3,"T",201,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1964,201.090]
[2539,{"$raw":"00000000"},21106,"GC.3.2138",null,3,"T",685,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1965,685.324]
[2540,{"$raw":"00000000"},21106,"GC.3.2139",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1966,65.879]
[2541,{"$raw":"00000000"},21106,"GC.3.2140",null,3,"T",692,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1967,692.313]
[2542,{"$raw":"00000000"},21106,"GC.3.2141",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1968,29.462]
[2543,{"$raw":"00000000"},21106,"GC.3.2142",null,3,"T",193,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1969,193.291]
[2544,{"$raw":"00000000"},21106,"GC.3.2143",null,3,"T",554,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1970,553.986]
[2545,{"$raw":"00000000"},21106,"GC.3.2144",null,3,"T",366,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1971,365.728]
[2546,{"$raw":"00000000"},21106,"GC.3.2145",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1972,98.478]
[2547,{"$raw":"00000000"},21106,"GC.3.2146",null,3,"T",242,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1973,241.980]
[2548,{"$raw":"00000000"},21106,"GC.3.2147",null,3,"T",333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1974,333.200]
[2550,{"$raw":"00000000"},21106,"GC.3.2149",null,3,"T",291,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1975,290.934]
[2551,{"$raw":"00000000"},21106,"GC.3.2150",null,3,"T",505,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1976,504.638]
[2552,{"$raw":"00000000"},21106,"GC.3.2151",null,3,"T",1300,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1977,1299.575]
[2553,{"$raw":"00000000"},21106,"GC.3.2152",null,3,"T",576,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1978,575.850]
[2554,{"$raw":"00000000"},21106,"GC.3.2153",null,3,"T",106,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1979,105.655]
[2555,{"$raw":"00000000"},21106,"GC.3.2154",null,3,"T",584,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1980,583.928]
[2556,{"$raw":"00000000"},21106,"GC.3.2155",null,3,"T",74,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1981,73.640]
[2558,{"$raw":"00000000"},21106,"GC.3.2157",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1982,3.756]
[2559,{"$raw":"00000000"},21106,"GC.3.2158",null,3,"T",530,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1983,529.515]
[2561,{"$raw":"00000000"},21106,"GC.3.2159",null,3,"T",188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1984,188.054]
[2563,{"$raw":"00000000"},21106,"GC.3.2160",null,3,"T",703,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1985,703.185]
[2564,{"$raw":"00000000"},21106,"GC.3.2161",null,3,"T",714,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1986,713.680]
[2565,{"$raw":"00000000"},21106,"GC.3.2162",null,3,"T",415,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1987,414.888]
[2566,{"$raw":"00000000"},21106,"GC.3.2163",null,3,"T",1009,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1988,1008.720]
[2567,{"$raw":"00000000"},21106,"GC.3.2164",null,3,"T",224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1989,223.764]
[2568,{"$raw":"00000000"},21106,"GC.3.2165",null,3,"T",97,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1990,96.801]
[2569,{"$raw":"00000000"},21106,"GC.3.2166",null,3,"T",411,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1991,411.306]
[2570,{"$raw":"00000000"},21106,"GC.3.2167",null,3,"T",1250,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1992,1250.238]
[2571,{"$raw":"00000000"},21106,"GC.3.2168",null,3,"T",475,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1993,474.780]
[2572,{"$raw":"00000000"},21106,"GC.3.2169",null,3,"T",139,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1994,138.787]
[2573,{"$raw":"00000000"},21106,"GC.3.2170",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1995,7.903]
[2577,{"$raw":"00000000"},21106,"GC.3.2171",null,3,"T",128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1996,127.715]
[2578,{"$raw":"00000000"},21106,"GC.3.2172",null,3,"T",162,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1997,162.400]
[2579,{"$raw":"00000000"},21106,"GC.3.2173",null,3,"T",159,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1998,159.186]
[2580,{"$raw":"00000000"},21106,"GC.3.2174",null,3,"T",196,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",1999,196.015]
[2581,{"$raw":"00000000"},21106,"GC.3.2175",null,3,"T",228,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2000,227.885]
[2582,{"$raw":"00000000"},21106,"GC.3.2176",null,3,"T",414,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2001,414.108]
[2583,{"$raw":"00000000"},21106,"GC.3.2177",null,3,"T",200,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2002,199.902]
[2584,{"$raw":"00000000"},21106,"GC.3.2178",null,3,"T",405,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2003,404.743]
[2585,{"$raw":"00000000"},21106,"GC.3.2179",null,3,"T",361,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2004,360.814]
[2586,{"$raw":"00000000"},21106,"GC.3.2180",null,3,"T",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2005,334.027]
[2587,{"$raw":"00000000"},21106,"GC.3.2181",null,3,"T",240,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2006,239.509]
[2588,{"$raw":"00000000"},21106,"GC.3.2182",null,3,"T",286,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2007,286.342]
[2589,{"$raw":"00000000"},21106,"GC.3.2183",null,3,"T",328,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2008,327.794]
[2590,{"$raw":"00000000"},21106,"GC.3.2184",null,3,"T",586,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2009,585.805]
[2591,{"$raw":"00000000"},21106,"GC.3.2185",null,3,"T",630,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2010,630.403]
[2592,{"$raw":"00000000"},21106,"GC.3.2186",null,3,"T",282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2011,282.342]
[2593,{"$raw":"00000000"},21106,"GC.3.2187",null,3,"T",365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2012,365.214]
[2594,{"$raw":"00000000"},21106,"GC.3.2188",null,3,"T",155,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2013,154.734]
[2595,{"$raw":"00000000"},21106,"GC.3.2189",null,3,"T",367,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2014,367.189]
[2596,{"$raw":"00000000"},21106,"GC.3.2190",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2015,1.027]
[2597,{"$raw":"00000000"},21106,"GC.3.2191",null,3,"T",441,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2016,440.930]
[2598,{"$raw":"00000000"},21106,"GC.3.2192",null,3,"T",342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2017,342.082]
[2599,{"$raw":"00000000"},21106,"GC.3.2193",null,3,"T",47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2018,46.800]
[2600,{"$raw":"00000000"},21106,"GC.3.2194",null,3,"T",649,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2019,649.392]
[2601,{"$raw":"00000000"},21106,"GC.3.2195",null,3,"T",68,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2020,67.555]
[2602,{"$raw":"00000000"},21106,"GC.3.2196",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2021,53.144]
[2603,{"$raw":"00000000"},21118,"GC.3.2197",null,3,"T",112,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2022,111.884]
[2604,{"$raw":"00000000"},21118,"GC.3.2198",null,3,"T",352,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2023,352.220]
[2605,{"$raw":"00000000"},21118,"GC.3.2199",null,3,"T",52,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2024,52.294]
[2606,{"$raw":"00000000"},21118,"GC.3.2200",null,3,"T",130,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2025,130.464]
[2607,{"$raw":"00000000"},21118,"GC.3.2201",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2026,0.588]
[2608,{"$raw":"00000000"},21118,"GC.3.2202",null,3,"T",612,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2027,612.175]
[2609,{"$raw":"00000000"},21118,"GC.3.2203",null,3,"T",132,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2028,132.449]
[2610,{"$raw":"00000000"},21118,"GC.3.2204",null,3,"T",234,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2029,233.757]
[2611,{"$raw":"00000000"},21118,"GC.3.2205",null,3,"T",76,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2030,76.264]
[2612,{"$raw":"00000000"},21118,"GC.3.2206",null,3,"T",1330,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2031,1330.380]
[2613,{"$raw":"00000000"},21118,"GC.3.2207",null,3,"T",72,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2032,71.593]
[2614,{"$raw":"00000000"},21118,"GC.3.2208",null,3,"T",781,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2033,781.064]
[2615,{"$raw":"00000000"},21118,"GC.3.2209",null,3,"T",117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2034,116.921]
[2616,{"$raw":"00000000"},21118,"GC.3.2210",null,3,"T",741,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2035,740.646]
[2617,{"$raw":"00000000"},21118,"GC.3.2211",null,3,"T",942,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2036,941.929]
[2618,{"$raw":"00000000"},21118,"GC.3.2212",null,3,"T",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2037,81.553]
[2619,{"$raw":"00000000"},21118,"GC.3.2213",null,3,"T",241,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2038,241.205]
[2620,{"$raw":"00000000"},21102,"GC.3.2214",null,3,"T",653,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2039,653.359]
[2622,{"$raw":"00000000"},21102,"GC.3.2216",null,3,"T",825,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2040,825.280]
[2623,{"$raw":"00000000"},21102,"GC.3.2217",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2041,24.299]
[2624,{"$raw":"00000000"},21102,"GC.3.2218",null,3,"T",826,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2042,825.607]
[2625,{"$raw":"00000000"},21102,"GC.3.2219",null,3,"T",836,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2043,835.507]
[2626,{"$raw":"00000000"},21102,"GC.3.2220",null,3,"T",1398,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2044,1398.358]
[2627,{"$raw":"00000000"},21102,"GC.3.2221",null,3,"T",412,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2045,412.014]
[2628,{"$raw":"00000000"},21102,"GC.3.2222",null,3,"T",443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2046,442.901]
[2629,{"$raw":"00000000"},21102,"GC.3.2223",null,3,"T",657,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2047,656.905]
[2630,{"$raw":"00000000"},21102,"GC.3.2224",null,3,"T",494,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2048,494.068]
[2631,{"$raw":"00000000"},21102,"GC.3.2225",null,3,"T",450,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2049,449.856]
[2632,{"$raw":"00000000"},21102,"GC.3.2226",null,3,"T",364,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2050,364.103]
[2633,{"$raw":"00000000"},21102,"GC.3.2227",null,3,"T",717,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2051,716.742]
[2634,{"$raw":"00000000"},21102,"GC.3.2228",null,3,"T",1140,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2052,1139.925]
[2635,{"$raw":"00000000"},21102,"GC.3.2229",null,3,"T",839,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2053,839.107]
[2636,{"$raw":"00000000"},21102,"GC.3.2230",null,3,"T",608,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2054,608.377]
[2637,{"$raw":"00000000"},21118,"GC.3.2231",null,3,"T",2161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2055,2161.268]
[2638,{"$raw":"00000000"},21118,"GC.3.2232",null,3,"T",586,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2056,585.588]
[2640,{"$raw":"00000000"},21102,"GC.3.2234",null,3,"T",847,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2057,847.481]
[2641,{"$raw":"00000000"},21102,"GC.3.2235",null,3,"T",290,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2058,289.755]
[2642,{"$raw":"00000000"},21102,"GC.3.2236",null,3,"T",581,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2059,581.406]
[2643,{"$raw":"00000000"},21102,"GC.3.2237",null,3,"T",316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2060,315.814]
[2644,{"$raw":"00000000"},21102,"GC.3.2238",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2061,78.690]
[2645,{"$raw":"00000000"},21102,"GC.3.2239",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2062,189.374]
[2646,{"$raw":"00000000"},21102,"GC.3.2240",null,3,"T",119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2063,119.373]
[2647,{"$raw":"00000000"},21102,"GC.3.2241",null,3,"T",672,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2064,671.731]
[2648,{"$raw":"00000000"},21102,"GC.3.2242",null,3,"T",1768,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2065,1767.965]
[2649,{"$raw":"00000000"},21102,"GC.3.2243",null,3,"T",1228,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2066,1227.874]
[2650,{"$raw":"00000000"},21102,"GC.3.2244",null,3,"T",377,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2067,376.915]
[2652,{"$raw":"00000000"},21118,"GC.3.2245",null,3,"T",978,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2068,977.657]
[2653,{"$raw":"00000000"},21118,"GC.3.2246",null,3,"T",1186,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2069,1185.612]
[2654,{"$raw":"00000000"},21102,"GC.3.2247",null,3,"T",486,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2070,486.222]
[2655,{"$raw":"00000000"},21102,"GC.3.2248",null,3,"T",139,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2071,139.487]
[2656,{"$raw":"00000000"},21102,"GC.3.2249",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2072,4.913]
[2657,{"$raw":"00000000"},21102,"GC.3.2250",null,3,"T",239,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2073,238.598]
[2658,{"$raw":"00000000"},21102,"GC.3.2251",null,3,"T",409,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2074,408.894]
[2659,{"$raw":"00000000"},21102,"GC.3.2252",null,3,"T",345,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2075,344.994]
[2660,{"$raw":"00000000"},21102,"GC.3.2253",null,3,"T",313,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2076,313.170]
[2661,{"$raw":"00000000"},21102,"GC.3.2254",null,3,"T",536,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2077,535.646]
[2662,{"$raw":"00000000"},21102,"GC.3.2255",null,3,"T",624,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2078,624.368]
[2663,{"$raw":"00000000"},21102,"GC.3.2256",null,3,"T",438,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2079,438.251]
[2664,{"$raw":"00000000"},21102,"GC.3.2257",null,3,"T",694,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2080,693.976]
[2666,{"$raw":"00000000"},21102,"GC.3.2258",null,3,"T",33,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2081,33.054]
[2668,{"$raw":"00000000"},21102,"GC.3.2260",null,3,"T",322,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2082,321.609]
[2669,{"$raw":"00000000"},21102,"GC.3.2261",null,3,"T",273,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2083,273.152]
[2670,{"$raw":"00000000"},21102,"GC.3.2262",null,3,"T",315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2084,315.135]
[2671,{"$raw":"00000000"},21102,"GC.3.2263",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2085,296.342]
[2673,{"$raw":"00000000"},21102,"GC.3.2264",null,3,"T",2710,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2086,2710.492]
[2675,{"$raw":"00000000"},21102,"GC.3.2265",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2087,0.584]
[2676,{"$raw":"00000000"},21102,"GC.3.2266",null,3,"T",207,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2088,206.503]
[2677,{"$raw":"00000000"},21102,"GC.3.2267",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2089,0.327]
[2678,{"$raw":"00000000"},21102,"GC.3.2268",null,3,"T",344,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2090,343.863]
[2679,{"$raw":"00000000"},21102,"GC.3.2269",null,3,"T",490,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2091,489.541]
[2680,{"$raw":"00000000"},21102,"GC.3.2270",null,3,"T",171,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2092,170.524]
[2681,{"$raw":"00000000"},21102,"GC.3.2271",null,3,"T",295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2093,294.709]
[2682,{"$raw":"00000000"},21102,"GC.3.2272",null,3,"T",355,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2094,354.958]
[2683,{"$raw":"00000000"},21102,"GC.3.2273",null,3,"T",232,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2095,231.559]
[2685,{"$raw":"00000000"},21102,"GC.3.2275",null,3,"T",843,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2096,843.301]
[2686,{"$raw":"00000000"},21102,"GC.3.2276",null,3,"T",506,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2097,506.276]
[2687,{"$raw":"00000000"},21102,"GC.3.2277",null,3,"T",470,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2098,469.935]
[2688,{"$raw":"00000000"},21102,"GC.3.2278",null,3,"T",567,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2099,566.653]
[2689,{"$raw":"00000000"},21102,"GC.3.2279",null,3,"T",287,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2100,286.676]
[2690,{"$raw":"00000000"},21102,"GC.3.2280",null,3,"T",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2101,369.943]
[2691,{"$raw":"00000000"},21102,"GC.3.2281",null,3,"T",723,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2102,722.833]
[2692,{"$raw":"00000000"},21102,"GC.3.2282",null,3,"T",612,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2103,612.105]
[2693,{"$raw":"00000000"},21102,"GC.3.2283",null,3,"T",578,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2104,578.325]
[2694,{"$raw":"00000000"},21102,"GC.3.2284",null,3,"T",218,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2105,217.633]
[2695,{"$raw":"00000000"},21102,"GC.3.2285",null,3,"T",1045,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2106,1044.938]
[2696,{"$raw":"00000000"},21102,"GC.3.2286",null,3,"T",117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2107,116.899]
[2697,{"$raw":"00000000"},21102,"GC.3.2287",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2108,28.619]
[2698,{"$raw":"00000000"},21102,"GC.3.2288",null,3,"T",365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2109,364.633]
[2699,{"$raw":"00000000"},21102,"GC.3.2289",null,3,"T",524,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2110,523.871]
[2700,{"$raw":"00000000"},21102,"GC.3.2290",null,3,"T",778,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2111,778.405]
[2701,{"$raw":"00000000"},21102,"GC.3.2291",null,3,"T",90,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2112,90.465]
[2702,{"$raw":"00000000"},21102,"GC.3.2292",null,3,"T",795,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2113,795.276]
[2703,{"$raw":"00000000"},21102,"GC.3.2293",null,3,"T",211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2114,211.116]
[2704,{"$raw":"00000000"},21102,"GC.3.2294",null,3,"T",566,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2115,566.395]
[2705,{"$raw":"00000000"},21102,"GC.3.2295",null,3,"T",390,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2116,390.217]
[2706,{"$raw":"00000000"},21102,"GC.3.2296",null,3,"T",165,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2117,165.024]
[2707,{"$raw":"00000000"},21102,"GC.3.2297",null,3,"T",311,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2118,311.228]
[2708,{"$raw":"00000000"},21102,"GC.3.2298",null,3,"T",227,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2119,227.012]
[2709,{"$raw":"00000000"},21102,"GC.3.2299",null,3,"T",630,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2120,629.815]
[2710,{"$raw":"00000000"},21102,"GC.3.2300",null,3,"T",148,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2121,147.608]
[2711,{"$raw":"00000000"},21102,"GC.3.2301",null,3,"T",131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2122,130.891]
[2712,{"$raw":"00000000"},21102,"GC.3.2302",null,3,"T",373,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2123,373.041]
[2713,{"$raw":"00000000"},21102,"GC.3.2303",null,3,"T",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2124,21.009]
[2714,{"$raw":"00000000"},21102,"GC.3.2304",null,3,"T",365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2125,365.178]
[2715,{"$raw":"00000000"},21102,"GC.3.2305",null,3,"T",209,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2126,209.071]
[2716,{"$raw":"00000000"},21102,"GC.3.2306",null,3,"T",277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2127,277.268]
[2717,{"$raw":"00000000"},21102,"GC.3.2307",null,3,"T",276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2128,275.935]
[2718,{"$raw":"00000000"},21102,"GC.3.2308",null,3,"T",234,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2129,234.023]
[2719,{"$raw":"00000000"},21102,"GC.3.2309",null,3,"T",421,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2130,420.711]
[2720,{"$raw":"00000000"},21102,"GC.3.2310",null,3,"T",254,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2131,253.808]
[2722,{"$raw":"00000000"},21118,"GC.3.2311",null,3,"T",323,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2132,323.412]
[2723,{"$raw":"00000000"},21118,"GC.3.2312",null,3,"T",1483,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2133,1483.023]
[2724,{"$raw":"00000000"},21118,"GC.3.2313",null,3,"T",1326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2134,1325.816]
[2725,{"$raw":"00000000"},21118,"GC.3.2314",null,3,"T",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2135,247.662]
[2728,{"$raw":"00000000"},21118,"GC.3.2315",null,3,"T",720,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2136,720.165]
[2729,{"$raw":"00000000"},21118,"GC.3.2316",null,3,"T",879,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2137,879.175]
[2730,{"$raw":"00000000"},21118,"GC.3.2317",null,3,"T",100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2138,100.283]
[2731,{"$raw":"00000000"},21118,"GC.3.2318",null,3,"T",1060,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2139,1059.610]
[2732,{"$raw":"00000000"},21118,"GC.3.2319",null,3,"T",182,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2140,182.409]
[2733,{"$raw":"00000000"},21118,"GC.3.2320",null,3,"T",284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2141,284.437]
[2734,{"$raw":"00000000"},21118,"GC.3.2321",null,3,"T",59,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2142,59.395]
[2735,{"$raw":"00000000"},21118,"GC.3.2322",null,3,"T",204,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2143,204.246]
[2736,{"$raw":"00000000"},21118,"GC.3.2323",null,3,"T",607,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2144,606.676]
[2737,{"$raw":"00000000"},21118,"GC.3.2324",null,3,"T",675,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2145,675.279]
[2738,{"$raw":"00000000"},21118,"GC.3.2325",null,3,"T",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2146,333.718]
[2739,{"$raw":"00000000"},21118,"GC.3.2326",null,3,"T",703,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2147,702.636]
[2740,{"$raw":"00000000"},21118,"GC.3.2327",null,3,"T",651,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2148,651.357]
[2741,{"$raw":"00000000"},21118,"GC.3.2328",null,3,"T",1693,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2149,1692.726]
[2742,{"$raw":"00000000"},21118,"GC.3.2329",null,3,"T",968,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2150,967.838]
[2743,{"$raw":"00000000"},21118,"GC.3.2330",null,3,"T",127,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2151,127.379]
[2747,{"$raw":"00000000"},21118,"GC.3.2332",null,3,"T",390,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2152,390.388]
[2748,{"$raw":"00000000"},21118,"GC.3.2333",null,3,"T",265,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2153,264.666]
[2749,{"$raw":"00000000"},21118,"GC.3.2334",null,3,"T",1053,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2154,1052.854]
[2750,{"$raw":"00000000"},21118,"GC.3.2335",null,3,"T",1767,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2155,1767.151]
[2751,{"$raw":"00000000"},21118,"GC.3.2336",null,3,"T",242,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2156,242.179]
[2752,{"$raw":"00000000"},21118,"GC.3.2337",null,3,"T",271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2157,271.202]
[2753,{"$raw":"00000000"},21118,"GC.3.2338",null,3,"T",262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2158,261.865]
[2755,{"$raw":"00000000"},21118,"GC.3.2339",null,3,"T",433,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2159,433.373]
[2758,{"$raw":"00000000"},21118,"GC.3.2340",null,3,"T",726,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2160,726.469]
[2759,{"$raw":"00000000"},21118,"GC.3.2341",null,3,"T",796,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2161,795.839]
[2760,{"$raw":"00000000"},21118,"GC.3.2342",null,3,"T",547,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2162,547.351]
[2761,{"$raw":"00000000"},21118,"GC.3.2343",null,3,"T",625,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2163,624.682]
[2762,{"$raw":"00000000"},21118,"GC.3.2344",null,3,"T",2368,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2164,2368.369]
[2763,{"$raw":"00000000"},21118,"GC.3.2345",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2165,0.116]
[2764,{"$raw":"00000000"},21118,"GC.3.2346",null,3,"T",1062,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2166,1061.540]
[2766,{"$raw":"00000000"},21118,"GC.3.2347",null,3,"T",709,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2167,709.432]
[2767,{"$raw":"00000000"},21118,"GC.3.2348",null,3,"T",274,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2168,274.127]
[2768,{"$raw":"00000000"},21118,"GC.3.2349",null,3,"T",1388,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2169,1388.355]
[2769,{"$raw":"00000000"},21118,"GC.3.2350",null,3,"T",238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2170,237.881]
[2770,{"$raw":"00000000"},21118,"GC.3.2351",null,3,"T",785,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2171,784.735]
[2771,{"$raw":"00000000"},21118,"GC.3.2352",null,3,"T",372,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2172,372.297]
[2772,{"$raw":"00000000"},21118,"GC.3.2353",null,3,"T",516,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2173,515.831]
[2774,{"$raw":"00000000"},21118,"GC.3.2355",null,3,"T",331,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2174,331.397]
[2775,{"$raw":"00000000"},21118,"GC.3.2356",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2175,189.019]
[2777,{"$raw":"00000000"},21118,"GC.3.2357",null,3,"T",284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2176,284.403]
[2778,{"$raw":"00000000"},21118,"GC.3.2358",null,3,"T",217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2177,217.186]
[2779,{"$raw":"00000000"},21118,"GC.3.2359",null,3,"T",900,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2178,899.635]
[2780,{"$raw":"00000000"},21122,"GC.3.2360",null,3,"T",1642,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2179,1641.857]
[2781,{"$raw":"00000000"},21122,"GC.3.2361",null,3,"T",401,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2180,401.470]
[2782,{"$raw":"00000000"},21122,"GC.3.2362",null,3,"T",1440,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2181,1439.925]
[2784,{"$raw":"00000000"},21122,"GC.3.2363",null,3,"T",322,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2182,321.900]
[2785,{"$raw":"00000000"},21122,"GC.3.2364",null,3,"T",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2183,22.855]
[2786,{"$raw":"00000000"},21122,"GC.3.2365",null,3,"T",797,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2184,797.172]
[2787,{"$raw":"00000000"},21122,"GC.3.2366",null,3,"T",540,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2185,540.476]
[2788,{"$raw":"00000000"},21122,"GC.3.2367",null,3,"T",602,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2186,601.504]
[2789,{"$raw":"00000000"},21122,"GC.3.2368",null,3,"T",337,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2187,336.988]
[2790,{"$raw":"00000000"},21122,"GC.3.2369",null,3,"T",222,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2188,222.039]
[2791,{"$raw":"00000000"},21122,"GC.3.2370",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2189,1.323]
[2792,{"$raw":"00000000"},21122,"GC.3.2371",null,3,"T",316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2190,315.981]
[2793,{"$raw":"00000000"},21122,"GC.3.2372",null,3,"T",290,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2191,290.464]
[2794,{"$raw":"00000000"},21122,"GC.3.2373",null,3,"T",368,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2192,367.531]
[2796,{"$raw":"00000000"},21122,"GC.3.2374",null,3,"T",176,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2193,176.129]
[2798,{"$raw":"00000000"},21122,"GC.3.2375",null,3,"T",145,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2194,144.644]
[2799,{"$raw":"00000000"},21122,"GC.3.2376",null,3,"T",314,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2195,314.084]
[2800,{"$raw":"00000000"},21122,"GC.3.2377",null,3,"T",272,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2196,272.263]
[2801,{"$raw":"00000000"},21122,"GC.3.2378",null,3,"T",203,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2197,202.970]
[2802,{"$raw":"00000000"},21122,"GC.3.2379",null,3,"T",65,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2198,64.547]
[2803,{"$raw":"00000000"},21122,"GC.3.2380",null,3,"T",428,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2199,427.735]
[2804,{"$raw":"00000000"},21122,"GC.3.2381",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2200,188.761]
[2805,{"$raw":"00000000"},21122,"GC.3.2382",null,3,"T",587,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2201,586.523]
[2806,{"$raw":"00000000"},21122,"GC.3.2383",null,3,"T",31,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2202,30.727]
[2807,{"$raw":"00000000"},21122,"GC.3.2384",null,3,"T",146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2203,145.989]
[2808,{"$raw":"00000000"},21122,"GC.3.2385",null,3,"T",220,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2204,220.201]
[2809,{"$raw":"00000000"},21122,"GC.3.2386",null,3,"T",194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2205,193.568]
[2810,{"$raw":"00000000"},21122,"GC.3.2387",null,3,"T",278,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2206,277.978]
[2811,{"$raw":"00000000"},21122,"GC.3.2388",null,3,"T",122,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2207,122.348]
[2812,{"$raw":"00000000"},21122,"GC.3.2389",null,3,"T",285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2208,285.053]
[2813,{"$raw":"00000000"},21122,"GC.3.2390",null,3,"T",270,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2209,270.054]
[2814,{"$raw":"00000000"},21122,"GC.3.2391",null,3,"T",247,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2210,247.496]
[2818,{"$raw":"00000000"},21122,"GC.3.2393",null,3,null,156,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",2211,155.815]
[2819,{"$raw":"00000000"},21122,"GC.3.2394",null,3,"T",489,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2212,489.136]
[2820,{"$raw":"00000000"},21122,"GC.3.2395",null,3,"T",466,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2213,465.580]
[2821,{"$raw":"00000000"},21122,"GC.3.2396",null,3,null,94,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",2214,94.086]
[2822,{"$raw":"00000000"},21122,"GC.3.2397",null,3,"T",295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2215,294.590]
[2823,{"$raw":"00000000"},21122,"GC.3.2398",null,3,null,95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",2216,94.861]
[2826,{"$raw":"00000000"},21122,"GC.3.2399",null,3,null,81,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",2217,80.645]
[2827,{"$raw":"00000000"},21122,"GC.3.2400",null,3,"T",2062,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2218,2061.762]
[2828,{"$raw":"00000000"},21122,"GC.3.2401",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2219,248.812]
[2829,{"$raw":"00000000"},21122,"GC.3.2402",null,3,"T",446,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2220,446.342]
[2830,{"$raw":"00000000"},21122,"GC.3.2403",null,3,"T",89,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2221,88.873]
[2831,{"$raw":"00000000"},21122,"GC.3.2404",null,3,"T",485,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2222,484.597]
[2832,{"$raw":"00000000"},21122,"GC.3.2405",null,3,"T",518,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2223,517.705]
[2835,{"$raw":"00000000"},21122,"GC.3.2406",null,3,"T",357,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2224,357.410]
[2838,{"$raw":"00000000"},21122,"GC.3.2407",null,3,"T",309,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2225,309.490]
[2839,{"$raw":"00000000"},21122,"GC.3.2408",null,3,"T",818,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2226,817.574]
[2841,{"$raw":"00000000"},21122,"GC.3.2409",null,3,"T",355,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2227,354.869]
[2845,{"$raw":"00000000"},21122,"GC.3.2410",null,3,"T",261,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2228,261.084]
[2848,{"$raw":"00000000"},21122,"GC.3.2411",null,3,"T",454,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2229,453.928]
[2849,{"$raw":"00000000"},21122,"GC.3.2412",null,3,"T",269,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2230,268.699]
[2851,{"$raw":"00000000"},0,"GC.3.2414",null,3,"T",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",2231,81.824]
[2853,{"$raw":"00000000"},21122,"GC.3.2416",null,3,"T",570,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2232,570.414]
[2854,{"$raw":"00000000"},21122,"GC.3.2417",null,3,"T",977,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2233,976.619]
[2856,{"$raw":"00000000"},0,"GC.3.2419",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",2234,0.071]
[2857,{"$raw":"00000000"},21122,"GC.3.2420",null,3,"T",198,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2235,198.174]
[2858,{"$raw":"00000000"},0,"GC.3.2421",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",2236,5.352]
[2860,{"$raw":"00000000"},21122,"GC.3.2423",null,3,"T",841,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2237,841.098]
[2861,{"$raw":"00000000"},21122,"GC.3.2424",null,3,"T",214,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2238,213.683]
[2862,{"$raw":"00000000"},21122,"GC.3.2425",null,3,"T",671,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2239,671.386]
[2863,{"$raw":"00000000"},21122,"GC.3.2426",null,3,"T",577,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2240,576.806]
[2864,{"$raw":"00000000"},21122,"GC.3.2427",null,3,"T",629,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2241,629.161]
[2865,{"$raw":"00000000"},21122,"GC.3.2428",null,3,"T",238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2242,238.060]
[2866,{"$raw":"00000000"},21122,"GC.3.2429",null,3,"T",552,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2243,551.520]
[2867,{"$raw":"00000000"},21122,"GC.3.2430",null,3,"T",364,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2244,363.506]
[2868,{"$raw":"00000000"},21122,"GC.3.2431",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2245,4.190]
[2869,{"$raw":"00000000"},21122,"GC.3.2432",null,3,"T",366,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2246,366.160]
[2870,{"$raw":"00000000"},21122,"GC.3.2433",null,3,"T",720,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2247,720.044]
[2871,{"$raw":"00000000"},21122,"GC.3.2434",null,3,"T",230,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2248,230.391]
[2873,{"$raw":"00000000"},21122,"GC.3.2435",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2249,0.674]
[2877,{"$raw":"00000000"},21122,"GC.3.2436",null,3,"T",750,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2250,750.499]
[2879,{"$raw":"00000000"},21122,"GC.3.2437",null,3,"T",941,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2251,941.211]
[2880,{"$raw":"00000000"},21122,"GC.3.2438",null,3,"T",233,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2252,233.402]
[2882,{"$raw":"00000000"},21122,"GC.3.2439",null,3,"T",758,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2253,758.334]
[2883,{"$raw":"00000000"},21122,"GC.3.2440",null,3,"T",553,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2254,552.530]
[2885,{"$raw":"00000000"},21122,"GC.3.2441",null,3,"T",668,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2255,667.769]
[2888,{"$raw":"00000000"},21122,"GC.3.2442",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2256,0.648]
[2890,{"$raw":"00000000"},21122,"GC.3.2444",null,3,"T",183,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2257,183.050]
[2891,{"$raw":"00000000"},21122,"GC.3.2445",null,3,"T",817,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2258,817.140]
[2896,{"$raw":"00000000"},21122,"GC.3.2447",null,3,"T",561,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2259,561.319]
[2899,{"$raw":"00000000"},21122,"GC.3.2448",null,3,"T",642,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2260,641.807]
[2902,{"$raw":"00000000"},21122,"GC.3.2449",null,3,"T",74,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2261,73.553]
[2903,{"$raw":"00000000"},21122,"GC.3.2450",null,3,"T",640,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2262,640.092]
[2905,{"$raw":"00000000"},21122,"GC.3.2451",null,3,"T",794,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2263,793.827]
[2907,{"$raw":"00000000"},21122,"GC.3.2452",null,3,"T",781,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2264,780.854]
[2909,{"$raw":"00000000"},21122,"GC.3.2453",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2265,2.819]
[2910,{"$raw":"00000000"},21122,"GC.3.2454",null,3,"T",401,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2266,401.378]
[2912,{"$raw":"00000000"},21122,"GC.3.2455",null,3,"T",1904,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2267,1904.493]
[2913,{"$raw":"00000000"},21122,"GC.3.2456",null,3,"T",225,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2268,224.500]
[2914,{"$raw":"00000000"},21122,"GC.3.2457",null,3,"T",227,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2269,227.297]
[2915,{"$raw":"00000000"},21122,"GC.3.2458",null,3,"T",474,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2270,474.405]
[2916,{"$raw":"00000000"},21122,"GC.3.2459",null,3,"T",407,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2271,406.907]
[2920,{"$raw":"00000000"},21122,"GC.3.2460",null,3,"T",165,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2272,164.535]
[2922,{"$raw":"00000000"},21122,"GC.3.2461",null,3,"T",590,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2273,590.486]
[2923,{"$raw":"00000000"},21122,"GC.3.2462",null,3,"T",139,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2274,139.398]
[2925,{"$raw":"00000000"},21122,"GC.3.2463",null,3,"T",636,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2275,636.070]
[2926,{"$raw":"00000000"},21122,"GC.3.2464",null,3,"T",445,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2276,444.631]
[2927,{"$raw":"00000000"},21122,"GC.3.2465",null,3,"T",516,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2277,515.821]
[2928,{"$raw":"00000000"},21122,"GC.3.2466",null,3,"T",293,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2278,292.628]
[2929,{"$raw":"00000000"},21122,"GC.3.2467",null,3,"T",365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2279,365.231]
[2930,{"$raw":"00000000"},21122,"GC.3.2468",null,3,"T",333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2280,332.785]
[2931,{"$raw":"00000000"},21122,"GC.3.2469",null,3,"T",670,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2281,669.615]
[2932,{"$raw":"00000000"},21122,"GC.3.2470",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2282,189.181]
[2933,{"$raw":"00000000"},21122,"GC.3.2471",null,3,"T",94,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2283,93.841]
[2934,{"$raw":"00000000"},21122,"GC.3.2472",null,3,"T",46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2284,45.623]
[2937,{"$raw":"00000000"},21122,"GC.3.2474",null,3,"T",218,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2285,218.458]
[2938,{"$raw":"00000000"},21122,"GC.3.2475",null,3,"T",1235,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2286,1235.062]
[2941,{"$raw":"00000000"},21122,"GC.3.2476",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2287,13.255]
[2943,{"$raw":"00000000"},21122,"GC.3.2477",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2288,39.773]
[2944,{"$raw":"00000000"},21122,"GC.3.2478",null,3,"T",858,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2289,857.761]
[2945,{"$raw":"00000000"},21122,"GC.3.2479",null,3,"T",850,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2290,849.832]
[2946,{"$raw":"00000000"},21122,"GC.3.2480",null,3,"T",480,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2291,480.263]
[2947,{"$raw":"00000000"},21122,"GC.3.2481",null,3,"T",338,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2292,338.317]
[2949,{"$raw":"00000000"},21122,"GC.3.2482",null,3,"T",823,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2293,822.888]
[2950,{"$raw":"00000000"},21122,"GC.3.2483",null,3,"T",353,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2294,352.750]
[2951,{"$raw":"00000000"},21122,"GC.3.2484",null,3,"T",232,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2295,231.897]
[2952,{"$raw":"00000000"},21122,"GC.3.2485",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2296,143.972]
[2953,{"$raw":"00000000"},21122,"GC.3.2486",null,3,"T",769,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2297,769.428]
[2954,{"$raw":"00000000"},21122,"GC.3.2487",null,3,"T",371,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2298,371.213]
[2955,{"$raw":"00000000"},21122,"GC.3.2488",null,3,"T",579,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2299,578.922]
[2956,{"$raw":"00000000"},21122,"GC.3.2489",null,3,"T",315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2300,314.944]
[2957,{"$raw":"00000000"},21122,"GC.3.2490",null,3,"T",374,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2301,373.725]
[2959,{"$raw":"00000000"},21122,"GC.3.2491",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2302,79.151]
[2960,{"$raw":"00000000"},21122,"GC.3.2492",null,3,"T",417,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2303,417.152]
[2961,{"$raw":"00000000"},21122,"GC.3.2493",null,3,"T",385,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2304,384.870]
[2962,{"$raw":"00000000"},21122,"GC.3.2494",null,3,"T",171,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2305,170.675]
[2963,{"$raw":"00000000"},21122,"GC.3.2495",null,3,"T",620,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2306,619.913]
[2964,{"$raw":"00000000"},21122,"GC.3.2496",null,3,"T",952,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2307,952.319]
[2965,{"$raw":"00000000"},21122,"GC.3.2497",null,3,"T",199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2308,199.079]
[2966,{"$raw":"00000000"},21122,"GC.3.2498",null,3,"T",197,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2309,197.309]
[2967,{"$raw":"00000000"},21122,"GC.3.2499",null,3,"T",490,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2310,489.514]
[2968,{"$raw":"00000000"},21122,"GC.3.2500",null,3,"T",396,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2311,396.048]
[2969,{"$raw":"00000000"},21122,"GC.3.2501",null,3,"T",223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2312,222.534]
[2971,{"$raw":"00000000"},21122,"GC.3.2502",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2313,40.973]
[2972,{"$raw":"00000000"},21122,"GC.3.2503",null,3,"T",1713,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2314,1713.322]
[2973,{"$raw":"00000000"},21122,"GC.3.2504",null,3,"T",1248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2315,1248.035]
[2975,{"$raw":"00000000"},21122,"GC.3.2505",null,3,"T",533,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2316,532.509]
[2976,{"$raw":"00000000"},21122,"GC.3.2506",null,3,"T",361,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2317,360.935]
[2977,{"$raw":"00000000"},21122,"GC.3.2507",null,3,"T",2160,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2318,2159.576]
[2978,{"$raw":"00000000"},21122,"GC.3.2508",null,3,"T",240,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2319,240.006]
[2979,{"$raw":"00000000"},21122,"GC.3.2509",null,3,"T",1024,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2320,1023.698]
[2980,{"$raw":"00000000"},21122,"GC.3.2510",null,3,"T",363,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2321,363.266]
[2981,{"$raw":"00000000"},21122,"GC.3.2511",null,3,"T",1141,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2322,1141.088]
[2982,{"$raw":"00000000"},21122,"GC.3.2512",null,3,"T",392,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2323,391.807]
[2983,{"$raw":"00000000"},21122,"GC.3.2513",null,3,"T",824,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2324,824.361]
[2984,{"$raw":"00000000"},21122,"GC.3.2514",null,3,"T",310,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2325,310.491]
[2985,{"$raw":"00000000"},21122,"GC.3.2515",null,3,"T",531,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2326,531.122]
[2986,{"$raw":"00000000"},21122,"GC.3.2516",null,3,"T",770,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2327,770.158]
[2987,{"$raw":"00000000"},21122,"GC.3.2517",null,3,"T",865,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2328,864.701]
[2988,{"$raw":"00000000"},21122,"GC.3.2518",null,3,"T",349,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2329,349.403]
[2989,{"$raw":"00000000"},21122,"GC.3.2519",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2330,3.484]
[2990,{"$raw":"00000000"},21122,"GC.3.2520",null,3,"T",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2331,20.898]
[2992,{"$raw":"00000000"},21122,"GC.3.2521",null,3,"T",466,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2332,465.644]
[2993,{"$raw":"00000000"},21122,"GC.3.2522",null,3,"T",1337,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2333,1337.093]
[2994,{"$raw":"00000000"},21122,"GC.3.2523",null,3,"T",224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2334,224.245]
[2996,{"$raw":"00000000"},21122,"GC.3.2524",null,3,"T",326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2335,326.366]
[2997,{"$raw":"00000000"},21122,"GC.3.2525",null,3,"T",408,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2336,408.106]
[2998,{"$raw":"00000000"},21122,"GC.3.2526",null,3,"T",1127,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2337,1127.232]
[2999,{"$raw":"00000000"},21122,"GC.3.2527",null,3,"T",423,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2338,422.942]
[3000,{"$raw":"00000000"},21122,"GC.3.2528",null,3,"T",575,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2339,575.108]
[3002,{"$raw":"00000000"},21122,"GC.3.2530",null,3,"T",326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2340,326.071]
[3003,{"$raw":"00000000"},21122,"GC.3.2531",null,3,"T",408,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2341,407.929]
[3004,{"$raw":"00000000"},21122,"GC.3.2532",null,3,"T",68,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2342,68.432]
[3005,{"$raw":"00000000"},21122,"GC.3.2533",null,3,"T",448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2343,447.988]
[3006,{"$raw":"00000000"},21122,"GC.3.2534",null,3,"T",422,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2344,421.685]
[3007,{"$raw":"00000000"},21122,"GC.3.2535",null,3,"T",655,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2345,654.822]
[3008,{"$raw":"00000000"},21122,"GC.3.2536",null,3,"T",451,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2346,450.511]
[3009,{"$raw":"00000000"},21122,"GC.3.2537",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2347,0.613]
[3010,{"$raw":"00000000"},21122,"GC.3.2538",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2348,296.237]
[3011,{"$raw":"00000000"},21122,"GC.3.2539",null,3,"T",1075,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2349,1074.705]
[3012,{"$raw":"00000000"},21122,"GC.3.2540",null,3,"T",935,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2350,935.268]
[3013,{"$raw":"00000000"},21122,"GC.3.2541",null,3,"T",585,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2351,584.939]
[3014,{"$raw":"00000000"},21122,"GC.3.2542",null,3,"T",1659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2352,1659.387]
[3015,{"$raw":"00000000"},21122,"GC.3.2543",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2353,19.927]
[3016,{"$raw":"00000000"},21122,"GC.3.2544",null,3,"T",830,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2354,830.342]
[3017,{"$raw":"00000000"},21122,"GC.3.2545",null,3,"T",910,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2355,910.317]
[3018,{"$raw":"00000000"},21122,"GC.3.2546",null,3,"T",861,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2356,861.344]
[3019,{"$raw":"00000000"},21122,"GC.3.2547",null,3,"T",1286,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2357,1285.502]
[3020,{"$raw":"00000000"},21122,"GC.3.2548",null,3,"T",1493,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2358,1492.724]
[3021,{"$raw":"00000000"},21122,"GC.3.2549",null,3,"T",488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2359,487.830]
[3022,{"$raw":"00000000"},21122,"GC.3.2550",null,3,"T",896,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2360,895.938]
[3023,{"$raw":"00000000"},21122,"GC.3.2551",null,3,"T",420,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2361,420.448]
[3024,{"$raw":"00000000"},21122,"GC.3.2552",null,3,"T",2708,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2362,2708.208]
[3027,{"$raw":"00000000"},21122,"GC.3.2553",null,3,"T",2332,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2363,2331.949]
[3028,{"$raw":"00000000"},21122,"GC.3.2554",null,3,"T",999,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2364,998.777]
[3029,{"$raw":"00000000"},21122,"GC.3.2555",null,3,"T",504,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2365,504.371]
[3031,{"$raw":"00000000"},21122,"GC.3.2556",null,3,"T",709,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2366,709.201]
[3033,{"$raw":"00000000"},21122,"GC.3.2558",null,3,"T",500,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2367,500.173]
[3034,{"$raw":"00000000"},21122,"GC.3.2559",null,3,"T",1285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2368,1284.975]
[3035,{"$raw":"00000000"},21118,"GC.3.2560",null,3,"T",667,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2369,666.964]
[3038,{"$raw":"00000000"},21118,"GC.3.2563",null,3,"T",110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2370,110.415]
[3039,{"$raw":"00000000"},21118,"GC.3.2564",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2371,0.843]
[3041,{"$raw":"00000000"},21118,"GC.3.2565",null,3,"T",245,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2372,244.965]
[3042,{"$raw":"00000000"},21118,"GC.3.2566",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2373,2.357]
[3043,{"$raw":"00000000"},21122,"GC.3.2567",null,3,null,208,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",2374,208.401]
[3044,{"$raw":"00000000"},21122,"GC.3.2568",null,3,null,55,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",2375,54.942]
[3045,{"$raw":"00000000"},21122,"GC.3.2569",null,3,null,313,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",2376,312.596]
[3047,{"$raw":"00000000"},21122,"GC.3.2570",null,3,null,108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",2377,108.378]
[3048,{"$raw":"00000000"},21118,"GC.3.2571",null,3,"T",25,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2378,25.158]
[3049,{"$raw":"00000000"},21118,"GC.3.2572",null,3,"T",517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2379,517.219]
[3050,{"$raw":"00000000"},21118,"GC.3.2573",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2380,2.988]
[3051,{"$raw":"00000000"},21118,"GC.3.2574",null,3,"T",1272,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2381,1271.514]
[3052,{"$raw":"00000000"},21118,"GC.3.2575",null,3,"T",935,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2382,935.125]
[3053,{"$raw":"00000000"},21118,"GC.3.2576",null,3,"T",1388,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2383,1388.120]
[3054,{"$raw":"00000000"},21118,"GC.3.2577",null,3,"T",199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2384,199.350]
[3055,{"$raw":"00000000"},21118,"GC.3.2578",null,3,"T",658,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2385,657.828]
[3056,{"$raw":"00000000"},21118,"GC.3.2579",null,3,"T",375,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2386,374.639]
[3057,{"$raw":"00000000"},21118,"GC.3.2580",null,3,"T",206,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2387,205.749]
[3058,{"$raw":"00000000"},21118,"GC.3.2581",null,3,"T",523,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2388,522.908]
[3059,{"$raw":"00000000"},21118,"GC.3.2582",null,3,"T",865,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2389,865.092]
[3060,{"$raw":"00000000"},21118,"GC.3.2583",null,3,"T",511,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2390,511.208]
[3061,{"$raw":"00000000"},21118,"GC.3.2584",null,3,"T",733,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2391,732.742]
[3062,{"$raw":"00000000"},21118,"GC.3.2585",null,3,"T",238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2392,237.627]
[3063,{"$raw":"00000000"},21118,"GC.3.2586",null,3,"T",129,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2393,128.682]
[3064,{"$raw":"00000000"},21118,"GC.3.2587",null,3,"T",147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2394,146.510]
[3065,{"$raw":"00000000"},21118,"GC.3.2588",null,3,"T",1158,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2395,1158.019]
[3066,{"$raw":"00000000"},21118,"GC.3.2589",null,3,"T",101,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2396,101.261]
[3067,{"$raw":"00000000"},21118,"GC.3.2590",null,3,"T",871,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2397,871.054]
[3068,{"$raw":"00000000"},21118,"GC.3.2591",null,3,"T",326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2398,325.655]
[3069,{"$raw":"00000000"},21118,"GC.3.2592",null,3,"T",704,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2399,704.158]
[3070,{"$raw":"00000000"},21118,"GC.3.2593",null,3,"T",303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2400,303.182]
[3071,{"$raw":"00000000"},21118,"GC.3.2594",null,3,"T",1463,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2401,1462.784]
[3073,{"$raw":"00000000"},21118,"GC.3.2595",null,3,"T",525,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2402,524.649]
[3074,{"$raw":"00000000"},21118,"GC.3.2596",null,3,"T",183,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2403,182.928]
[3075,{"$raw":"00000000"},21118,"GC.3.2597",null,3,"T",589,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2404,589.223]
[3076,{"$raw":"00000000"},21118,"GC.3.2598",null,3,"T",169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2405,169.129]
[3077,{"$raw":"00000000"},21118,"GC.3.2599",null,3,"T",911,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2406,910.610]
[3078,{"$raw":"00000000"},21118,"GC.3.2600",null,3,"T",315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2407,314.775]
[3079,{"$raw":"00000000"},21118,"GC.3.2601",null,3,"T",1382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2408,1382.347]
[3080,{"$raw":"00000000"},21118,"GC.3.2602",null,3,"T",49,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2409,48.671]
[3081,{"$raw":"00000000"},21118,"GC.3.2603",null,3,"T",625,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2410,624.667]
[3082,{"$raw":"00000000"},21118,"GC.3.2604",null,3,"T",668,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2411,667.557]
[3083,{"$raw":"00000000"},21118,"GC.3.2605",null,3,"T",850,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2412,849.758]
[3084,{"$raw":"00000000"},21118,"GC.3.2606",null,3,"T",498,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2413,498.224]
[3087,{"$raw":"00000000"},21118,"GC.3.2607",null,3,"T",896,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2414,896.164]
[3089,{"$raw":"00000000"},21118,"GC.3.2608",null,3,"T",684,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2415,684.433]
[3090,{"$raw":"00000000"},21118,"GC.3.2609",null,3,"T",916,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2416,916.470]
[3093,{"$raw":"00000000"},21118,"GC.3.2610",null,3,"T",759,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2417,758.583]
[3094,{"$raw":"00000000"},21118,"GC.3.2611",null,3,"T",1669,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2418,1669.199]
[3095,{"$raw":"00000000"},21118,"GC.3.2612",null,3,"T",121,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2419,120.865]
[3096,{"$raw":"00000000"},21118,"GC.3.2613",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2420,98.312]
[3097,{"$raw":"00000000"},21118,"GC.3.2614",null,3,"T",853,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2421,852.977]
[3099,{"$raw":"00000000"},21118,"GC.3.2615",null,3,"T",885,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2422,885.180]
[3100,{"$raw":"00000000"},21118,"GC.3.2616",null,3,"T",722,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2423,722.017]
[3101,{"$raw":"00000000"},21118,"GC.3.2617",null,3,"T",291,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2424,290.764]
[3103,{"$raw":"00000000"},21102,"GC.3.2618",null,3,"T",537,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2425,536.664]
[3104,{"$raw":"00000000"},21102,"GC.3.2619",null,3,"T",235,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2426,235.128]
[3105,{"$raw":"00000000"},21102,"GC.3.2620",null,3,"T",157,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2427,157.135]
[3106,{"$raw":"00000000"},21102,"GC.3.2621",null,3,"T",1122,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2428,1121.886]
[3107,{"$raw":"00000000"},21102,"GC.3.2622",null,3,"T",247,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2429,247.474]
[3108,{"$raw":"00000000"},21102,"GC.3.2623",null,3,"T",562,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2430,562.435]
[3109,{"$raw":"00000000"},21102,"GC.3.2624",null,3,"T",743,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2431,742.853]
[3110,{"$raw":"00000000"},21102,"GC.3.2625",null,3,"T",281,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2432,281.149]
[3111,{"$raw":"00000000"},21102,"GC.3.2626",null,3,"T",380,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2433,380.446]
[3112,{"$raw":"00000000"},21102,"GC.3.2627",null,3,"T",675,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2434,675.442]
[3113,{"$raw":"00000000"},21102,"GC.3.2628",null,3,"T",423,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2435,423.397]
[3114,{"$raw":"00000000"},21102,"GC.3.2629",null,3,"T",596,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2436,595.983]
[3115,{"$raw":"00000000"},21102,"GC.3.2630",null,3,"T",2308,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2437,2307.600]
[3117,{"$raw":"00000000"},21122,"GC.3.2631",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2438,0.755]
[3118,{"$raw":"00000000"},21122,"GC.3.2632",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2439,7.425]
[3119,{"$raw":"00000000"},21122,"GC.3.2633",null,3,"T",561,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2440,561.248]
[3120,{"$raw":"00000000"},21122,"GC.3.2634",null,3,"T",424,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2441,424.374]
[3121,{"$raw":"00000000"},21122,"GC.3.2635",null,3,"T",493,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2442,493.093]
[3122,{"$raw":"00000000"},21122,"GC.3.2636",null,3,"T",169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2443,169.358]
[3123,{"$raw":"00000000"},21122,"GC.3.2637",null,3,"T",391,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2444,391.071]
[3124,{"$raw":"00000000"},21122,"GC.3.2638",null,3,"T",458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2445,457.718]
[3127,{"$raw":"00000000"},21122,"GC.3.2639",null,3,"T",862,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2446,862.217]
[3128,{"$raw":"00000000"},21118,"GC.3.2640",null,3,"T",1365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2447,1365.390]
[3129,{"$raw":"00000000"},21118,"GC.3.2641",null,3,"T",48,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2448,48.278]
[3130,{"$raw":"00000000"},21118,"GC.3.2642",null,3,"T",367,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2449,367.407]
[3131,{"$raw":"00000000"},21118,"GC.3.2643",null,3,"T",616,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2450,616.137]
[3133,{"$raw":"00000000"},21118,"GC.3.2644",null,3,"T",1270,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2451,1270.245]
[3134,{"$raw":"00000000"},21118,"GC.3.2645",null,3,"T",1147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2452,1146.991]
[3135,{"$raw":"00000000"},21118,"GC.3.2646",null,3,"T",811,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2453,811.139]
[3136,{"$raw":"00000000"},21118,"GC.3.2647",null,3,"T",1526,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2454,1525.775]
[3137,{"$raw":"00000000"},21118,"GC.3.2648",null,3,"T",157,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2455,156.783]
[3138,{"$raw":"00000000"},21118,"GC.3.2649",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2456,1.937]
[3139,{"$raw":"00000000"},21118,"GC.3.2650",null,3,"T",504,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2457,504.113]
[3140,{"$raw":"00000000"},21118,"GC.3.2651",null,3,"T",1463,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2458,1462.572]
[3141,{"$raw":"00000000"},21118,"GC.3.2652",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2459,11.389]
[3142,{"$raw":"00000000"},21118,"GC.3.2653",null,3,"T",477,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2460,477.385]
[3143,{"$raw":"00000000"},21118,"GC.3.2654",null,3,"T",44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2461,43.569]
[3144,{"$raw":"00000000"},21118,"GC.3.2655",null,3,"T",122,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2462,121.524]
[3145,{"$raw":"00000000"},21118,"GC.3.2656",null,3,"T",577,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2463,576.809]
[3146,{"$raw":"00000000"},21118,"GC.3.2657",null,3,"T",578,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2464,577.830]
[3147,{"$raw":"00000000"},21118,"GC.3.2658",null,3,"T",546,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2465,546.249]
[3148,{"$raw":"00000000"},21118,"GC.3.2659",null,3,"T",753,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2466,753.124]
[3150,{"$raw":"00000000"},21118,"GC.3.2661",null,3,"T",1493,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2467,1492.593]
[3151,{"$raw":"00000000"},21118,"GC.3.2662",null,3,"T",687,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2468,686.810]
[3154,{"$raw":"00000000"},21122,"GC.3.2665",null,3,"T",1138,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2469,1137.761]
[3155,{"$raw":"00000000"},21118,"GC.3.2666",null,3,"T",123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2470,122.550]
[3156,{"$raw":"00000000"},21118,"GC.3.2667",null,3,"T",35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2471,34.733]
[3157,{"$raw":"00000000"},21118,"GC.3.2668",null,3,"T",1117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2472,1116.672]
[3158,{"$raw":"00000000"},21118,"GC.3.2669",null,3,"T",187,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2473,187.304]
[3159,{"$raw":"00000000"},21118,"GC.3.2670",null,3,"T",342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2474,342.426]
[3160,{"$raw":"00000000"},21118,"GC.3.2671",null,3,"T",110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2475,109.502]
[3161,{"$raw":"00000000"},21118,"GC.3.2672",null,3,"T",761,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2476,761.197]
[3162,{"$raw":"00000000"},21118,"GC.3.2673",null,3,"T",318,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2477,318.174]
[3163,{"$raw":"00000000"},21118,"GC.3.2674",null,3,"T",1521,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2478,1520.861]
[3164,{"$raw":"00000000"},21118,"GC.3.2675",null,3,"T",434,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2479,434.039]
[3165,{"$raw":"00000000"},21118,"GC.3.2676",null,3,"T",236,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2480,235.851]
[3166,{"$raw":"00000000"},21118,"GC.3.2677",null,3,"T",869,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2481,869.254]
[3167,{"$raw":"00000000"},21118,"GC.3.2678",null,3,"T",224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2482,224.065]
[3168,{"$raw":"00000000"},21118,"GC.3.2679",null,3,"T",584,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2483,584.308]
[3169,{"$raw":"00000000"},21102,"GC.3.2680",null,3,"T",844,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2484,843.700]
[3170,{"$raw":"00000000"},21102,"GC.3.2681",null,3,"T",207,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2485,207.485]
[3171,{"$raw":"00000000"},21102,"GC.3.2682",null,3,"T",1161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2486,1161.461]
[3172,{"$raw":"00000000"},21102,"GC.3.2683",null,3,"T",273,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2487,273.017]
[3175,{"$raw":"00000000"},21102,"GC.3.2686",null,3,"T",742,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2488,742.076]
[3176,{"$raw":"00000000"},21102,"GC.3.2687",null,3,"T",1759,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2489,1758.899]
[3177,{"$raw":"00000000"},21102,"GC.3.2688",null,3,"T",508,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2490,508.140]
[3178,{"$raw":"00000000"},21102,"GC.3.2689",null,3,"T",224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2491,224.459]
[3179,{"$raw":"00000000"},21102,"GC.3.2690",null,3,"T",613,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2492,613.279]
[3180,{"$raw":"00000000"},21102,"GC.3.2691",null,3,"T",1334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2493,1334.109]
[3181,{"$raw":"00000000"},21102,"GC.3.2692",null,3,"T",747,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2494,746.763]
[3182,{"$raw":"00000000"},21102,"GC.3.2693",null,3,"T",335,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2495,334.979]
[3183,{"$raw":"00000000"},21102,"GC.3.2694",null,3,"T",278,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2496,278.050]
[3184,{"$raw":"00000000"},21102,"GC.3.2695",null,3,"T",211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2497,211.169]
[3185,{"$raw":"00000000"},21102,"GC.3.2696",null,3,"T",284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2498,284.444]
[3186,{"$raw":"00000000"},21102,"GC.3.2697",null,3,"T",328,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2499,328.151]
[3187,{"$raw":"00000000"},21102,"GC.3.2698",null,3,"T",765,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2500,764.602]
[3188,{"$raw":"00000000"},21102,"GC.3.2699",null,3,"T",680,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2501,680.270]
[3189,{"$raw":"00000000"},21102,"GC.3.2700",null,3,"T",844,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2502,843.629]
[3190,{"$raw":"00000000"},21102,"GC.3.2701",null,3,"T",436,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2503,435.710]
[3191,{"$raw":"00000000"},21102,"GC.3.2702",null,3,"T",374,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2504,373.883]
[3192,{"$raw":"00000000"},21102,"GC.3.2703",null,3,"T",716,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2505,715.971]
[3193,{"$raw":"00000000"},21102,"GC.3.2704",null,3,"T",1096,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2506,1095.887]
[3194,{"$raw":"00000000"},21102,"GC.3.2705",null,3,"T",886,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2507,885.977]
[3195,{"$raw":"00000000"},21102,"GC.3.2706",null,3,"T",945,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2508,944.547]
[3196,{"$raw":"00000000"},21102,"GC.3.2707",null,3,"T",2020,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2509,2019.541]
[3197,{"$raw":"00000000"},21102,"GC.3.2708",null,3,"T",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2510,19.346]
[3198,{"$raw":"00000000"},21102,"GC.3.2709",null,3,"T",1150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2511,1149.881]
[3199,{"$raw":"00000000"},21102,"GC.3.2710",null,3,"T",378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2512,377.583]
[3200,{"$raw":"00000000"},21102,"GC.3.2711",null,3,"T",424,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2513,423.675]
[3201,{"$raw":"00000000"},21102,"GC.3.2712",null,3,"T",1103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2514,1103.060]
[3202,{"$raw":"00000000"},21102,"GC.3.2713",null,3,"T",171,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2515,170.662]
[3203,{"$raw":"00000000"},21102,"GC.3.2714",null,3,"T",375,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2516,375.322]
[3204,{"$raw":"00000000"},21102,"GC.3.2715",null,3,"T",700,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2517,699.579]
[3205,{"$raw":"00000000"},21102,"GC.3.2716",null,3,"T",1957,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2518,1956.511]
[3206,{"$raw":"00000000"},21102,"GC.3.2717",null,3,"T",1100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2519,1099.782]
[3207,{"$raw":"00000000"},21102,"GC.3.2718",null,3,"T",285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2520,285.485]
[3210,{"$raw":"00000000"},21118,"GC.3.2719",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2521,10.136]
[3211,{"$raw":"00000000"},21118,"GC.3.2720",null,3,"T",446,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2522,446.482]
[3212,{"$raw":"00000000"},21118,"GC.3.2721",null,3,"T",813,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2523,812.702]
[3213,{"$raw":"00000000"},21118,"GC.3.2722",null,3,"T",663,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2524,662.774]
[3214,{"$raw":"00000000"},21118,"GC.3.2723",null,3,"T",448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2525,448.278]
[3215,{"$raw":"00000000"},21122,"GC.3.2724",null,3,"T",1163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2526,1162.792]
[3216,{"$raw":"00000000"},21122,"GC.3.2725",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2527,6.487]
[3217,{"$raw":"00000000"},21122,"GC.3.2726",null,3,"T",590,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2528,590.107]
[3220,{"$raw":"00000000"},21122,"GC.3.2728",null,3,"T",761,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2529,761.268]
[3221,{"$raw":"00000000"},21122,"GC.3.2729",null,3,"T",387,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2530,387.242]
[3222,{"$raw":"00000000"},21122,"GC.3.2730",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2531,10.438]
[3223,{"$raw":"00000000"},21122,"GC.3.2731",null,3,null,875,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",2532,875.268]
[3224,{"$raw":"00000000"},21122,"GC.3.2732",null,3,"T",911,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2533,910.728]
[3225,{"$raw":"00000000"},21122,"GC.3.2733",null,3,"T",458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2534,457.696]
[3227,{"$raw":"00000000"},21122,"GC.3.2734",null,3,"T",137,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2535,136.601]
[3229,{"$raw":"00000000"},21122,"GC.3.2735",null,3,"T",56,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2536,55.956]
[3230,{"$raw":"00000000"},21122,"GC.3.2736",null,3,"T",512,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2537,511.659]
[3231,{"$raw":"00000000"},21122,"GC.3.2737",null,3,"T",1067,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2538,1066.700]
[3232,{"$raw":"00000000"},21122,"GC.3.2738",null,3,"T",269,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2539,268.940]
[3234,{"$raw":"00000000"},21122,"GC.3.2739",null,3,"T",1140,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2540,1139.913]
[3235,{"$raw":"00000000"},21122,"GC.3.2740",null,3,"T",1626,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2541,1625.972]
[3236,{"$raw":"00000000"},21122,"GC.3.2741",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2542,8.308]
[3237,{"$raw":"00000000"},21122,"GC.3.2742",null,3,"T",1051,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2543,1050.691]
[3238,{"$raw":"00000000"},21122,"GC.3.2743",null,3,"T",302,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2544,302.460]
[3239,{"$raw":"00000000"},21122,"GC.3.2744",null,3,"T",858,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2545,858.434]
[3240,{"$raw":"00000000"},21122,"GC.3.2745",null,3,"T",492,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2546,491.771]
[3243,{"$raw":"00000000"},21122,"GC.3.2746",null,3,"T",516,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2547,516.158]
[3244,{"$raw":"00000000"},21122,"GC.3.2747",null,3,"T",281,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2548,281.132]
[3245,{"$raw":"00000000"},21122,"GC.3.2748",null,3,"T",380,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2549,379.741]
[3246,{"$raw":"00000000"},21122,"GC.3.2749",null,3,"T",718,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2550,718.347]
[3247,{"$raw":"00000000"},21122,"GC.3.2750",null,3,"T",454,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2551,454.468]
[3248,{"$raw":"00000000"},21122,"GC.3.2751",null,3,"T",585,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2552,584.751]
[3249,{"$raw":"00000000"},21122,"GC.3.2752",null,3,"T",116,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2553,115.821]
[3250,{"$raw":"00000000"},21122,"GC.3.2753",null,3,"T",620,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2554,620.096]
[3251,{"$raw":"00000000"},21122,"GC.3.2754",null,3,"T",337,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2555,337.114]
[3252,{"$raw":"00000000"},21122,"GC.3.2755",null,3,"T",481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2556,481.183]
[3253,{"$raw":"00000000"},21122,"GC.3.2756",null,3,"T",81,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2557,81.410]
[3255,{"$raw":"00000000"},21118,"GC.3.2758",null,3,"T",1043,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2558,1043.363]
[3256,{"$raw":"00000000"},21122,"GC.3.2759",null,3,"T",779,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2559,778.881]
[3257,{"$raw":"00000000"},21122,"GC.3.2760",null,3,"T",444,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2560,444.239]
[3258,{"$raw":"00000000"},21118,"GC.3.2761",null,3,"T",150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2561,150.370]
[3259,{"$raw":"00000000"},21118,"GC.3.2762",null,3,"T",218,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2562,217.623]
[3260,{"$raw":"00000000"},21118,"GC.3.2763",null,3,"T",294,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2563,293.774]
[3261,{"$raw":"00000000"},21118,"GC.3.2764",null,3,"T",684,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2564,684.388]
[3262,{"$raw":"00000000"},21118,"GC.3.2765",null,3,"T",81,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2565,80.612]
[3263,{"$raw":"00000000"},21118,"GC.3.2766",null,3,"T",897,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2566,896.501]
[3264,{"$raw":"00000000"},21118,"GC.3.2767",null,3,"T",477,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2567,476.628]
[3265,{"$raw":"00000000"},21118,"GC.3.2768",null,3,"T",982,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2568,982.320]
[3266,{"$raw":"00000000"},21118,"GC.3.2769",null,3,"T",175,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2569,174.788]
[3267,{"$raw":"00000000"},21118,"GC.3.2770",null,3,"T",455,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2570,454.644]
[3268,{"$raw":"00000000"},21118,"GC.3.2771",null,3,"T",89,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2571,88.985]
[3269,{"$raw":"00000000"},21118,"GC.3.2772",null,3,"T",755,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2572,754.521]
[3270,{"$raw":"00000000"},21118,"GC.3.2773",null,3,"T",1428,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2573,1428.389]
[3272,{"$raw":"00000000"},21118,"GC.3.2775",null,3,"T",214,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2574,213.807]
[3273,{"$raw":"00000000"},21118,"GC.3.2776",null,3,"T",1784,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2575,1783.989]
[3275,{"$raw":"00000000"},21122,"GC.3.2778",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2576,1.373]
[3276,{"$raw":"00000000"},21122,"GC.3.2779",null,3,"T",531,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2577,531.330]
[3277,{"$raw":"00000000"},21122,"GC.3.2780",null,3,"T",853,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2578,852.572]
[3278,{"$raw":"00000000"},21122,"GC.3.2781",null,3,"T",1204,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",2579,1203.975]
[3279,{"$raw":"00000000"},21118,"GC.3.2782",null,3,"T",1223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2580,1222.828]
[3280,{"$raw":"00000000"},21118,"GC.3.2783",null,3,"T",2093,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2581,2092.565]
[3281,{"$raw":"00000000"},21118,"GC.3.2784",null,3,"T",883,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2582,882.575]
[3282,{"$raw":"00000000"},21118,"GC.3.2785",null,3,"T",1383,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2583,1382.646]
[3283,{"$raw":"00000000"},21118,"GC.3.2786",null,3,"T",737,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2584,736.757]
[3284,{"$raw":"00000000"},21118,"GC.3.2787",null,3,"T",327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2585,327.408]
[3285,{"$raw":"00000000"},21118,"GC.3.2788",null,3,"T",417,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2586,416.603]
[3286,{"$raw":"00000000"},21118,"GC.3.2789",null,3,"T",444,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2587,443.570]
[3287,{"$raw":"00000000"},21118,"GC.3.2790",null,3,"T",661,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2588,660.522]
[3288,{"$raw":"00000000"},21118,"GC.3.2791",null,3,"T",974,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2589,973.833]
[3289,{"$raw":"00000000"},21118,"GC.3.2792",null,3,"T",478,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2590,477.811]
[3290,{"$raw":"00000000"},21118,"GC.3.2793",null,3,"T",48,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2591,48.122]
[3291,{"$raw":"00000000"},21118,"GC.3.2794",null,3,"T",197,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2592,197.203]
[3292,{"$raw":"00000000"},21118,"GC.3.2795",null,3,"T",1342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2593,1341.871]
[3293,{"$raw":"00000000"},21118,"GC.3.2796",null,3,"T",504,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2594,503.856]
[3294,{"$raw":"00000000"},21118,"GC.3.2797",null,3,"T",226,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2595,226.170]
[3295,{"$raw":"00000000"},21118,"GC.3.2798",null,3,"T",259,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2596,258.993]
[3297,{"$raw":"00000000"},21118,"GC.3.2799",null,3,"T",256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2597,255.964]
[3300,{"$raw":"00000000"},21118,"GC.3.2802",null,3,"T",246,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2598,245.663]
[3301,{"$raw":"00000000"},21102,"GC.3.2803",null,3,"T",810,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2599,810.008]
[3303,{"$raw":"00000000"},21102,"GC.3.2805",null,3,"T",1151,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2600,1151.291]
[3304,{"$raw":"00000000"},21102,"GC.3.2806",null,3,"T",56,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2601,55.759]
[3305,{"$raw":"00000000"},21118,"GC.3.2807",null,3,"T",1332,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2602,1331.577]
[3306,{"$raw":"00000000"},21118,"GC.3.2808",null,3,"T",817,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2603,817.005]
[3307,{"$raw":"00000000"},21118,"GC.3.2809",null,3,"T",955,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2604,954.507]
[3308,{"$raw":"00000000"},21118,"GC.3.2810",null,3,"T",175,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2605,174.512]
[3309,{"$raw":"00000000"},21118,"GC.3.2811",null,3,"T",84,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2606,84.377]
[3310,{"$raw":"00000000"},21118,"GC.3.2812",null,3,"T",758,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2607,757.536]
[3312,{"$raw":"00000000"},21118,"GC.3.2813",null,3,"T",415,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2608,415.409]
[3314,{"$raw":"00000000"},21118,"GC.3.2814",null,3,null,426,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","OV",2609,426.090]
[3315,{"$raw":"00000000"},21118,"GC.3.2815",null,3,"T",818,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2610,817.861]
[3316,{"$raw":"00000000"},21118,"GC.3.2816",null,3,"T",809,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2611,809.067]
[3317,{"$raw":"00000000"},21118,"GC.3.2817",null,3,"T",382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2612,382.333]
[3318,{"$raw":"00000000"},21118,"GC.3.2818",null,3,"T",481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2613,481.133]
[3319,{"$raw":"00000000"},21118,"GC.3.2819",null,3,"T",550,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2614,550.448]
[3320,{"$raw":"00000000"},21118,"GC.3.2820",null,3,"T",589,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2615,589.356]
[3321,{"$raw":"00000000"},21118,"GC.3.2821",null,3,"T",1343,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2616,1343.160]
[3322,{"$raw":"00000000"},21118,"GC.3.2822",null,3,"T",685,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2617,685.291]
[3323,{"$raw":"00000000"},21118,"GC.3.2823",null,3,"T",347,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2618,346.759]
[3324,{"$raw":"00000000"},21118,"GC.3.2824",null,3,"T",591,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2619,590.564]
[3326,{"$raw":"00000000"},21118,"GC.3.2826",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2620,14.790]
[3327,{"$raw":"00000000"},21118,"GC.3.2827",null,3,"T",680,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2621,679.983]
[3328,{"$raw":"00000000"},21118,"GC.3.2828",null,3,"T",702,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2622,702.259]
[3330,{"$raw":"00000000"},21118,"GC.3.2830",null,3,"T",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2623,247.942]
[3332,{"$raw":"00000000"},21118,"GC.3.2832",null,3,"T",170,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2624,170.473]
[3333,{"$raw":"00000000"},21118,"GC.3.2833",null,3,"T",712,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2625,712.450]
[3334,{"$raw":"00000000"},21118,"GC.3.2834",null,3,"T",290,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2626,290.170]
[3335,{"$raw":"00000000"},21118,"GC.3.2835",null,3,"T",316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2627,316.387]
[3336,{"$raw":"00000000"},21102,"GC.3.2836",null,3,"T",859,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2628,858.883]
[3337,{"$raw":"00000000"},21102,"GC.3.2837",null,3,"T",416,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2629,416.090]
[3338,{"$raw":"00000000"},21102,"GC.3.2838",null,3,"T",194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2630,194.174]
[3339,{"$raw":"00000000"},21102,"GC.3.2839",null,3,"T",1260,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2631,1259.533]
[3340,{"$raw":"00000000"},21102,"GC.3.2840",null,3,"T",342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2632,341.762]
[3341,{"$raw":"00000000"},21102,"GC.3.2841",null,3,"T",323,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2633,322.608]
[3343,{"$raw":"00000000"},21102,"GC.3.2843",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2634,0.427]
[3345,{"$raw":"00000000"},21102,"GC.3.2845",null,3,"T",275,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2635,274.920]
[3347,{"$raw":"00000000"},21118,"GC.3.2847",null,3,"T",46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2636,46.024]
[3348,{"$raw":"00000000"},21102,"GC.3.2848",null,3,"T",934,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2637,933.521]
[3349,{"$raw":"00000000"},21102,"GC.3.2849",null,3,"T",1031,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2638,1030.641]
[3350,{"$raw":"00000000"},21102,"GC.3.2850",null,3,"T",382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2639,382.072]
[3351,{"$raw":"00000000"},21102,"GC.3.2851",null,3,"T",1048,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2640,1048.448]
[3352,{"$raw":"00000000"},21102,"GC.3.2852",null,3,"T",221,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2641,221.409]
[3353,{"$raw":"00000000"},21102,"GC.3.2853",null,3,"T",282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2642,281.937]
[3354,{"$raw":"00000000"},21102,"GC.3.2854",null,3,"T",467,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2643,466.873]
[3355,{"$raw":"00000000"},21102,"GC.3.2855",null,3,"T",1862,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2644,1861.766]
[3356,{"$raw":"00000000"},21102,"GC.3.2856",null,3,"T",324,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2645,323.515]
[3357,{"$raw":"00000000"},21102,"GC.3.2857",null,3,"T",1221,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2646,1220.689]
[3358,{"$raw":"00000000"},21102,"GC.3.2858",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2647,40.438]
[3359,{"$raw":"00000000"},21102,"GC.3.2859",null,3,"T",327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2648,326.984]
[3360,{"$raw":"00000000"},0,"GC.3.2860",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",2649,5.027]
[3361,{"$raw":"00000000"},0,"GC.3.2861",null,3,"T",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",2650,18.654]
[3362,{"$raw":"00000000"},0,"GC.3.2862",null,3,"T",48,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",2651,48.345]
[3364,{"$raw":"00000000"},21102,"GC.3.2864",null,3,null,836,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","OV",2652,835.785]
[3365,{"$raw":"00000000"},21102,"GC.3.2865",null,3,"T",323,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2653,322.661]
[3366,{"$raw":"00000000"},21102,"GC.3.2866",null,3,"T",300,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2654,300.453]
[3369,{"$raw":"00000000"},21102,"GC.3.2868",null,3,"T",789,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2655,788.604]
[3370,{"$raw":"00000000"},21102,"GC.3.2869",null,3,"T",230,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2656,230.324]
[3371,{"$raw":"00000000"},21102,"GC.3.2870",null,3,"T",417,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2657,417.258]
[3372,{"$raw":"00000000"},21102,"GC.3.2871",null,3,"T",427,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2658,426.535]
[3373,{"$raw":"00000000"},21102,"GC.3.2872",null,3,"T",67,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2659,67.119]
[3374,{"$raw":"00000000"},21102,"GC.3.2873",null,3,"T",691,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2660,691.023]
[3375,{"$raw":"00000000"},21102,"GC.3.2874",null,3,"T",1355,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2661,1355.336]
[3376,{"$raw":"00000000"},21102,"GC.3.2875",null,3,"T",560,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2662,560.228]
[3377,{"$raw":"00000000"},21102,"GC.3.2876",null,3,"T",322,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2663,322.212]
[3378,{"$raw":"00000000"},21102,"GC.3.2877",null,3,"T",516,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2664,516.149]
[3379,{"$raw":"00000000"},21102,"GC.3.2878",null,3,"T",236,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2665,236.382]
[3380,{"$raw":"00000000"},21102,"GC.3.2879",null,3,"T",675,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2666,674.991]
[3381,{"$raw":"00000000"},21102,"GC.3.2880",null,3,"T",244,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2667,244.169]
[3382,{"$raw":"00000000"},21102,"GC.3.2881",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2668,296.126]
[3383,{"$raw":"00000000"},21102,"GC.3.2882",null,3,"T",831,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2669,831.212]
[3384,{"$raw":"00000000"},21102,"GC.3.2883",null,3,"T",821,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2670,821.251]
[3385,{"$raw":"00000000"},21102,"GC.3.2884",null,3,"T",113,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2671,113.276]
[3387,{"$raw":"00000000"},21102,"GC.3.2885",null,3,"T",618,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2672,617.613]
[3388,{"$raw":"00000000"},21102,"GC.3.2886",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2673,53.009]
[3389,{"$raw":"00000000"},21102,"GC.3.2887",null,3,"T",1105,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2674,1105.212]
[3390,{"$raw":"00000000"},21102,"GC.3.2888",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2675,20.431]
[3391,{"$raw":"00000000"},21102,"GC.3.2889",null,3,"T",662,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2676,661.847]
[3392,{"$raw":"00000000"},21102,"GC.3.2890",null,3,"T",1154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2677,1154.489]
[3393,{"$raw":"00000000"},21102,"GC.3.2891",null,3,"T",934,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2678,933.926]
[3394,{"$raw":"00000000"},21102,"GC.3.2892",null,3,"T",562,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2679,561.592]
[3395,{"$raw":"00000000"},21102,"GC.3.2893",null,3,"T",466,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2680,466.482]
[3396,{"$raw":"00000000"},21102,"GC.3.2894",null,3,"T",81,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2681,80.682]
[3397,{"$raw":"00000000"},21102,"GC.3.2895",null,3,"T",51,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2682,50.772]
[3398,{"$raw":"00000000"},21102,"GC.3.2896",null,3,"T",221,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2683,221.091]
[3399,{"$raw":"00000000"},21102,"GC.3.2897",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2684,16.469]
[3401,{"$raw":"00000000"},21102,"GC.3.2898",null,3,"T",224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2685,223.696]
[3402,{"$raw":"00000000"},21102,"GC.3.2899",null,3,"T",80,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2686,80.237]
[3403,{"$raw":"00000000"},21102,"GC.3.2900",null,3,"T",489,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2687,488.918]
[3404,{"$raw":"00000000"},21102,"GC.3.2901",null,3,"T",884,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2688,883.579]
[3405,{"$raw":"00000000"},21102,"GC.3.2902",null,3,"T",179,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2689,178.542]
[3406,{"$raw":"00000000"},21102,"GC.3.2903",null,3,"T",835,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2690,834.583]
[3407,{"$raw":"00000000"},21102,"GC.3.2904",null,3,"T",128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2691,128.196]
[3409,{"$raw":"00000000"},21102,"GC.3.2905",null,3,"T",120,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2692,119.821]
[3410,{"$raw":"00000000"},21102,"GC.3.2906",null,3,"T",538,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2693,538.326]
[3411,{"$raw":"00000000"},21102,"GC.3.2907",null,3,"T",1047,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2694,1047.159]
[3412,{"$raw":"00000000"},21102,"GC.3.2908",null,3,"T",208,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2695,208.152]
[3413,{"$raw":"00000000"},21102,"GC.3.2909",null,3,"T",652,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2696,652.106]
[3414,{"$raw":"00000000"},21102,"GC.3.2910",null,3,"T",782,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2697,782.438]
[3415,{"$raw":"00000000"},21102,"GC.3.2911",null,3,"T",123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2698,122.508]
[3416,{"$raw":"00000000"},21102,"GC.3.2912",null,3,"T",70,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2699,69.849]
[3417,{"$raw":"00000000"},21102,"GC.3.2913",null,3,"T",668,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2700,667.583]
[3418,{"$raw":"00000000"},21102,"GC.3.2914",null,3,"T",342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2701,342.297]
[3419,{"$raw":"00000000"},21102,"GC.3.2915",null,3,"T",938,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2702,938.170]
[3421,{"$raw":"00000000"},21102,"GC.3.2916",null,3,"T",126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2703,126.035]
[3423,{"$raw":"00000000"},21102,"GC.3.2917",null,3,"T",435,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2704,435.235]
[3424,{"$raw":"00000000"},21102,"GC.3.2918",null,3,"T",132,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2705,132.377]
[3426,{"$raw":"00000000"},21102,"GC.3.2919",null,3,"T",208,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2706,207.957]
[3427,{"$raw":"00000000"},21102,"GC.3.2920",null,3,"T",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2707,248.067]
[3428,{"$raw":"00000000"},21102,"GC.3.2921",null,3,"T",190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2708,190.318]
[3429,{"$raw":"00000000"},21102,"GC.3.2922",null,3,"T",410,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2709,409.560]
[3430,{"$raw":"00000000"},21102,"GC.3.2923",null,3,"T",18,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2710,17.659]
[3431,{"$raw":"00000000"},21102,"GC.3.2924",null,3,"T",346,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2711,345.725]
[3432,{"$raw":"00000000"},21102,"GC.3.2925",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2712,38.593]
[3433,{"$raw":"00000000"},21102,"GC.3.2926",null,3,"T",325,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2713,324.956]
[3435,{"$raw":"00000000"},21102,"GC.3.2927",null,3,"T",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2714,370.007]
[3436,{"$raw":"00000000"},21102,"GC.3.2928",null,3,"T",410,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2715,409.672]
[3438,{"$raw":"00000000"},21102,"GC.3.2929",null,3,"T",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2716,333.960]
[3439,{"$raw":"00000000"},21102,"GC.3.2930",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2717,2.559]
[3440,{"$raw":"00000000"},21102,"GC.3.2931",null,3,"T",590,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2718,590.383]
[3441,{"$raw":"00000000"},21102,"GC.3.2932",null,3,"T",532,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2719,532.485]
[3442,{"$raw":"00000000"},21102,"GC.3.2933",null,3,"T",876,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2720,875.749]
[3443,{"$raw":"00000000"},21102,"GC.3.2934",null,3,"T",138,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2721,137.813]
[3444,{"$raw":"00000000"},21102,"GC.3.2935",null,3,"T",608,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2722,608.269]
[3446,{"$raw":"00000000"},21102,"GC.3.2936",null,3,"T",643,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2723,643.218]
[3447,{"$raw":"00000000"},21102,"GC.3.2937",null,3,"T",2960,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2724,2959.656]
[3449,{"$raw":"00000000"},21106,"GC.3.2938",null,3,"T",165,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2725,165.142]
[3452,{"$raw":"00000000"},21106,"GC.3.2941",null,3,"T",315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2726,315.047]
[3453,{"$raw":"00000000"},21106,"GC.3.2942",null,3,"T",863,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2727,862.753]
[3454,{"$raw":"00000000"},21106,"GC.3.2943",null,3,"T",319,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2728,319.316]
[3455,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",299,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",2729,299.035]
[3456,{"$raw":"00000000"},21120,"GC.3.2945",null,3,"T",1225,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2730,1225.290]
[3457,{"$raw":"00000000"},21120,"GC.3.2946",null,3,"T",472,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2731,472.357]
[3458,{"$raw":"00000000"},21120,"GC.3.2947",null,3,"T",1672,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2732,1672.045]
[3459,{"$raw":"00000000"},21120,"GC.3.2948",null,3,"T",510,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2733,510.053]
[3460,{"$raw":"00000000"},21106,"GC.3.2949",null,3,"T",456,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2734,456.477]
[3461,{"$raw":"00000000"},21106,"GC.3.2950",null,3,"T",610,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2735,609.719]
[3462,{"$raw":"00000000"},21106,"GC.3.2951",null,3,"T",113,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2736,113.193]
[3463,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",2737,1.820]
[3464,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",2738,338.610]
[3465,{"$raw":"00000000"},21106,"GC.3.2954",null,3,"T",1354,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2739,1353.960]
[3466,{"$raw":"00000000"},21106,"GC.3.2955",null,3,"T",229,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2740,229.281]
[3467,{"$raw":"00000000"},21106,"GC.3.2956",null,3,"T",277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2741,277.120]
[3468,{"$raw":"00000000"},21106,"GC.3.2957",null,3,"T",1246,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2742,1245.736]
[3469,{"$raw":"00000000"},21106,"GC.3.2958",null,3,"T",428,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2743,427.677]
[3470,{"$raw":"00000000"},21106,"GC.3.2959",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2744,92.366]
[3471,{"$raw":"00000000"},21106,"GC.3.2960",null,3,"T",1377,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2745,1377.144]
[3472,{"$raw":"00000000"},21106,"GC.3.2961",null,3,"T",1370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2746,1370.029]
[3473,{"$raw":"00000000"},21106,"GC.3.2962",null,3,"T",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2747,316.685]
[3474,{"$raw":"00000000"},21106,"GC.3.2963",null,3,"T",146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2748,145.734]
[3475,{"$raw":"00000000"},21106,"GC.3.2964",null,3,"T",572,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2749,571.528]
[3476,{"$raw":"00000000"},21106,"GC.3.2965",null,3,"T",788,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2750,787.981]
[3477,{"$raw":"00000000"},21106,"GC.3.2966",null,3,"T",629,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2751,629.327]
[3478,{"$raw":"00000000"},21106,"GC.3.2967",null,3,"T",284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2752,284.082]
[3479,{"$raw":"00000000"},21106,"GC.3.2968",null,3,"T",374,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2753,374.201]
[3480,{"$raw":"00000000"},21106,"GC.3.2969",null,3,"T",232,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2754,232.123]
[3481,{"$raw":"00000000"},21106,"GC.3.2970",null,3,"T",236,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2755,236.303]
[3482,{"$raw":"00000000"},21106,"GC.3.2971",null,3,"T",191,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2756,191.403]
[3483,{"$raw":"00000000"},21106,"GC.3.2972",null,3,"T",185,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2757,184.949]
[3484,{"$raw":"00000000"},21106,"GC.3.2973",null,3,"T",133,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2758,132.627]
[3485,{"$raw":"00000000"},21106,"GC.3.2974",null,3,"T",357,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2759,357.383]
[3486,{"$raw":"00000000"},21106,"GC.3.2975",null,3,"T",253,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2760,252.940]
[3487,{"$raw":"00000000"},21106,"GC.3.2976",null,3,"T",551,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2761,551.301]
[3488,{"$raw":"00000000"},21106,"GC.3.2977",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2762,92.066]
[3489,{"$raw":"00000000"},21106,"GC.3.2978",null,3,"T",611,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2763,610.970]
[3490,{"$raw":"00000000"},21106,"GC.3.2979",null,3,"T",149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2764,149.261]
[3491,{"$raw":"00000000"},21106,"GC.3.2980",null,3,"T",168,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2765,168.398]
[3492,{"$raw":"00000000"},21106,"GC.3.2981",null,3,"T",352,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2766,352.337]
[3494,{"$raw":"00000000"},21106,"GC.3.2982",null,3,"T",131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2767,131.496]
[3495,{"$raw":"00000000"},21106,"GC.3.2983",null,3,"T",530,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2768,530.264]
[3496,{"$raw":"00000000"},21106,"GC.3.2984",null,3,"T",914,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2769,913.721]
[3497,{"$raw":"00000000"},21106,"GC.3.2985",null,3,"T",711,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2770,710.888]
[3498,{"$raw":"00000000"},21106,"GC.3.2986",null,3,"T",1005,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2771,1005.393]
[3499,{"$raw":"00000000"},21106,"GC.3.2987",null,3,"T",518,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2772,518.435]
[3500,{"$raw":"00000000"},21106,"GC.3.2988",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2773,98.161]
[3501,{"$raw":"00000000"},21106,"GC.3.2989",null,3,"T",1486,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2774,1485.707]
[3502,{"$raw":"00000000"},21106,"GC.3.2990",null,3,"T",369,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2775,369.476]
[3504,{"$raw":"00000000"},21106,"GC.3.2991",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2776,23.917]
[3505,{"$raw":"00000000"},21106,"GC.3.2992",null,3,"T",338,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2777,337.844]
[3506,{"$raw":"00000000"},21106,"GC.3.2993",null,3,"T",537,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2778,536.968]
[3507,{"$raw":"00000000"},21106,"GC.3.2994",null,3,"T",657,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2779,656.753]
[3508,{"$raw":"00000000"},21106,"GC.3.2995",null,3,"T",345,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2780,345.191]
[3509,{"$raw":"00000000"},21106,"GC.3.2996",null,3,"T",563,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2781,562.784]
[3511,{"$raw":"00000000"},21106,"GC.3.2997",null,3,"T",994,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2782,993.910]
[3512,{"$raw":"00000000"},21106,"GC.3.2998",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2783,248.796]
[3513,{"$raw":"00000000"},21106,"GC.3.2999",null,3,"T",1431,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2784,1431.395]
[3514,{"$raw":"00000000"},21106,"GC.3.3000",null,3,"T",625,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2785,625.312]
[3515,{"$raw":"00000000"},21106,"GC.3.3001",null,3,"T",579,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2786,579.048]
[3516,{"$raw":"00000000"},21106,"GC.3.3002",null,3,"T",862,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2787,861.826]
[3517,{"$raw":"00000000"},21106,"GC.3.3003",null,3,"T",884,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2788,883.673]
[3518,{"$raw":"00000000"},21102,"GC.3.3004",null,3,"T",643,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2789,642.821]
[3519,{"$raw":"00000000"},21102,"GC.3.3005",null,3,"T",549,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2790,548.786]
[3520,{"$raw":"00000000"},21102,"GC.3.3006",null,3,"T",340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2791,340.123]
[3521,{"$raw":"00000000"},21102,"GC.3.3007",null,3,"T",1044,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2792,1044.046]
[3522,{"$raw":"00000000"},21102,"GC.3.3008",null,3,"T",134,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2793,134.469]
[3525,{"$raw":"00000000"},21102,"GC.3.3010",null,3,"T",332,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2794,332.345]
[3528,{"$raw":"00000000"},21102,"GC.3.3011",null,3,"T",931,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2795,930.627]
[3530,{"$raw":"00000000"},21102,"GC.3.3012",null,3,"T",285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2796,284.874]
[3531,{"$raw":"00000000"},21102,"GC.3.3013",null,3,"T",1065,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2797,1065.243]
[3533,{"$raw":"00000000"},21102,"GC.3.3014",null,3,"T",195,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2798,195.077]
[3534,{"$raw":"00000000"},21102,"GC.3.3015",null,3,"T",367,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2799,366.611]
[3535,{"$raw":"00000000"},21102,"GC.3.3016",null,3,"T",1054,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2800,1054.079]
[3536,{"$raw":"00000000"},21102,"GC.3.3017",null,3,"T",514,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2801,513.954]
[3537,{"$raw":"00000000"},21102,"GC.3.3018",null,3,"T",289,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2802,288.799]
[3538,{"$raw":"00000000"},21102,"GC.3.3019",null,3,"T",122,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2803,121.658]
[3539,{"$raw":"00000000"},21102,"GC.3.3020",null,3,"T",566,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2804,565.846]
[3540,{"$raw":"00000000"},21102,"GC.3.3021",null,3,"T",54,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2805,54.278]
[3541,{"$raw":"00000000"},21102,"GC.3.3022",null,3,"T",181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2806,180.628]
[3542,{"$raw":"00000000"},21102,"GC.3.3023",null,3,"T",184,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2807,183.726]
[3543,{"$raw":"00000000"},21102,"GC.3.3024",null,3,"T",549,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2808,549.132]
[3544,{"$raw":"00000000"},21102,"GC.3.3025",null,3,"T",1152,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2809,1151.569]
[3545,{"$raw":"00000000"},21102,"GC.3.3026",null,3,"T",1270,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2810,1270.247]
[3546,{"$raw":"00000000"},21102,"GC.3.3027",null,3,"T",336,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2811,336.034]
[3547,{"$raw":"00000000"},21102,"GC.3.3028",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2812,78.831]
[3548,{"$raw":"00000000"},21102,"GC.3.3029",null,3,"T",158,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2813,157.521]
[3549,{"$raw":"00000000"},21102,"GC.3.3030",null,3,"T",1330,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2814,1330.061]
[3550,{"$raw":"00000000"},21102,"GC.3.3031",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2815,65.762]
[3551,{"$raw":"00000000"},21102,"GC.3.3032",null,3,"T",1184,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2816,1184.294]
[3552,{"$raw":"00000000"},21102,"GC.3.3033",null,3,"T",650,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2817,650.401]
[3553,{"$raw":"00000000"},21102,"GC.3.3034",null,3,"T",960,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2818,960.276]
[3555,{"$raw":"00000000"},21102,"GC.3.3035",null,3,"T",145,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2819,145.276]
[3556,{"$raw":"00000000"},21102,"GC.3.3036",null,3,"T",434,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2820,434.463]
[3557,{"$raw":"00000000"},21102,"GC.3.3037",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2821,97.994]
[3559,{"$raw":"00000000"},21102,"GC.3.3038",null,3,"T",583,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2822,582.891]
[3561,{"$raw":"00000000"},21102,"GC.3.3039",null,3,"T",328,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2823,328.138]
[3563,{"$raw":"00000000"},21102,"GC.3.3040",null,3,"T",1136,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2824,1136.388]
[3564,{"$raw":"00000000"},21102,"GC.3.3041",null,3,"T",830,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2825,830.309]
[3565,{"$raw":"00000000"},21102,"GC.3.3042",null,3,"T",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2826,317.463]
[3567,{"$raw":"00000000"},21102,"GC.3.3043",null,3,"T",118,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2827,117.842]
[3569,{"$raw":"00000000"},21102,"GC.3.3044",null,3,"T",513,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2828,513.358]
[3571,{"$raw":"00000000"},21102,"GC.3.3045",null,3,"T",102,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2829,101.980]
[3572,{"$raw":"00000000"},21102,"GC.3.3046",null,3,"T",1001,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2830,1000.713]
[3574,{"$raw":"00000000"},21102,"GC.3.3047",null,3,"T",503,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2831,502.712]
[3575,{"$raw":"00000000"},21102,"GC.3.3048",null,3,"T",973,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2832,973.346]
[3578,{"$raw":"00000000"},21102,"GC.3.3049",null,3,"T",361,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2833,361.297]
[3580,{"$raw":"00000000"},21102,"GC.3.3050",null,3,"T",448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2834,448.275]
[3581,{"$raw":"00000000"},21102,"GC.3.3051",null,3,"T",181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2835,180.747]
[3582,{"$raw":"00000000"},21102,"GC.3.3052",null,3,"T",324,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2836,324.467]
[3583,{"$raw":"00000000"},21102,"GC.3.3053",null,3,"T",597,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2837,596.524]
[3584,{"$raw":"00000000"},21102,"GC.3.3054",null,3,"T",327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2838,326.851]
[3585,{"$raw":"00000000"},21102,"GC.3.3055",null,3,"T",259,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2839,258.503]
[3586,{"$raw":"00000000"},21102,"GC.3.3056",null,3,"T",322,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2840,322.230]
[3587,{"$raw":"00000000"},21102,"GC.3.3057",null,3,"T",420,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2841,420.310]
[3588,{"$raw":"00000000"},21102,"GC.3.3058",null,3,"T",416,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2842,415.509]
[3589,{"$raw":"00000000"},21102,"GC.3.3059",null,3,"T",426,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2843,426.287]
[3591,{"$raw":"00000000"},21102,"GC.3.3060",null,3,"T",1688,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2844,1688.198]
[3592,{"$raw":"00000000"},21102,"GC.3.3061",null,3,"T",365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2845,364.571]
[3593,{"$raw":"00000000"},21102,"GC.3.3062",null,3,"T",838,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2846,838.302]
[3594,{"$raw":"00000000"},21102,"GC.3.3063",null,3,"T",759,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2847,758.749]
[3595,{"$raw":"00000000"},21102,"GC.3.3064",null,3,"T",419,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2848,419.214]
[3598,{"$raw":"00000000"},21102,"GC.3.3065",null,3,"T",786,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2849,785.935]
[3599,{"$raw":"00000000"},21102,"GC.3.3066",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2850,12.798]
[3600,{"$raw":"00000000"},21102,"GC.3.3067",null,3,"T",31,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2851,31.034]
[3601,{"$raw":"00000000"},21102,"GC.3.3068",null,3,"T",389,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2852,388.586]
[3602,{"$raw":"00000000"},21102,"GC.3.3069",null,3,"T",1100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2853,1100.164]
[3603,{"$raw":"00000000"},21102,"GC.3.3070",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2854,20.458]
[3604,{"$raw":"00000000"},21102,"GC.3.3071",null,3,"T",564,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2855,563.647]
[3605,{"$raw":"00000000"},21102,"GC.3.3072",null,3,"T",721,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2856,721.237]
[3607,{"$raw":"00000000"},21102,"GC.3.3073",null,3,"T",764,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2857,763.774]
[3608,{"$raw":"00000000"},21102,"GC.3.3074",null,3,"T",162,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2858,161.674]
[3609,{"$raw":"00000000"},21102,"GC.3.3075",null,3,"T",624,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2859,624.114]
[3610,{"$raw":"00000000"},21102,"GC.3.3076",null,3,"T",2307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2860,2307.093]
[3611,{"$raw":"00000000"},21102,"GC.3.3077",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2861,65.515]
[3612,{"$raw":"00000000"},21102,"GC.3.3078",null,3,"T",50,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2862,50.245]
[3613,{"$raw":"00000000"},21102,"GC.3.3079",null,3,"T",1365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2863,1364.950]
[3614,{"$raw":"00000000"},21102,"GC.3.3080",null,3,"T",440,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2864,439.599]
[3615,{"$raw":"00000000"},21102,"GC.3.3081",null,3,"T",264,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2865,263.682]
[3616,{"$raw":"00000000"},21102,"GC.3.3082",null,3,"T",1677,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2866,1677.250]
[3617,{"$raw":"00000000"},21102,"GC.3.3083",null,3,"T",270,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2867,270.094]
[3618,{"$raw":"00000000"},21102,"GC.3.3084",null,3,"T",971,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2868,971.039]
[3619,{"$raw":"00000000"},21102,"GC.3.3085",null,3,"T",154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2869,154.332]
[3620,{"$raw":"00000000"},21102,"GC.3.3086",null,3,"T",761,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2870,760.712]
[3621,{"$raw":"00000000"},21102,"GC.3.3087",null,3,"T",282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2871,282.073]
[3623,{"$raw":"00000000"},21102,"GC.3.3088",null,3,"T",1163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2872,1163.135]
[3624,{"$raw":"00000000"},21102,"GC.3.3089",null,3,"T",331,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2873,330.661]
[3625,{"$raw":"00000000"},21102,"GC.3.3090",null,3,"T",193,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2874,192.546]
[3626,{"$raw":"00000000"},21102,"GC.3.3091",null,3,"T",546,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2875,545.920]
[3627,{"$raw":"00000000"},21102,"GC.3.3092",null,3,"T",215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2876,214.557]
[3628,{"$raw":"00000000"},21102,"GC.3.3093",null,3,"T",1693,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2877,1693.008]
[3629,{"$raw":"00000000"},21102,"GC.3.3094",null,3,"T",1067,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2878,1066.953]
[3630,{"$raw":"00000000"},21102,"GC.3.3095",null,3,"T",330,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2879,330.133]
[3631,{"$raw":"00000000"},21102,"GC.3.3096",null,3,"T",600,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2880,600.486]
[3632,{"$raw":"00000000"},21102,"GC.3.3097",null,3,"T",90,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2881,89.894]
[3633,{"$raw":"00000000"},21102,"GC.3.3098",null,3,"T",1834,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2882,1834.117]
[3634,{"$raw":"00000000"},21102,"GC.3.3099",null,3,"T",119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2883,119.304]
[3635,{"$raw":"00000000"},21102,"GC.3.3100",null,3,"T",1285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2884,1284.889]
[3636,{"$raw":"00000000"},21102,"GC.3.3101",null,3,"T",474,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2885,473.525]
[3637,{"$raw":"00000000"},21102,"GC.3.3102",null,3,"T",107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2886,106.836]
[3638,{"$raw":"00000000"},21102,"GC.3.3103",null,3,"T",917,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2887,916.629]
[3639,{"$raw":"00000000"},21102,"GC.3.3104",null,3,"T",201,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2888,200.657]
[3640,{"$raw":"00000000"},21102,"GC.3.3105",null,3,"T",313,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2889,313.314]
[3641,{"$raw":"00000000"},21102,"GC.3.3106",null,3,"T",214,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2890,213.868]
[3642,{"$raw":"00000000"},21102,"GC.3.3107",null,3,"T",916,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2891,916.138]
[3643,{"$raw":"00000000"},21102,"GC.3.3108",null,3,"T",767,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2892,766.730]
[3644,{"$raw":"00000000"},21102,"GC.3.3109",null,3,"T",268,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2893,267.529]
[3645,{"$raw":"00000000"},21102,"GC.3.3110",null,3,"T",496,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2894,496.416]
[3646,{"$raw":"00000000"},21120,"GC.3.3111",null,3,"T",310,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2895,309.844]
[3647,{"$raw":"00000000"},21120,"GC.3.3112",null,3,"T",277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2896,277.321]
[3648,{"$raw":"00000000"},21120,"GC.3.3113",null,3,"T",202,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2897,202.099]
[3649,{"$raw":"00000000"},21120,"GC.3.3114",null,3,"T",622,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2898,621.915]
[3650,{"$raw":"00000000"},21106,"GC.3.3115",null,3,"T",415,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2899,415.256]
[3651,{"$raw":"00000000"},21106,"GC.3.3116",null,3,"T",314,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",2900,314.349]
[3652,{"$raw":"00000000"},21120,"GC.3.3117",null,3,"T",1359,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2901,1358.907]
[3653,{"$raw":"00000000"},21120,"GC.3.3118",null,3,"T",1665,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2902,1665.048]
[3654,{"$raw":"00000000"},21120,"GC.3.3119",null,3,"T",2267,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2903,2267.276]
[3655,{"$raw":"00000000"},21120,"GC.3.3120",null,3,"T",379,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2904,379.243]
[3660,{"$raw":"00000000"},21118,"GC.3.3123",null,3,"T",595,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2905,594.593]
[3661,{"$raw":"00000000"},21118,"GC.3.3124",null,3,"T",1184,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2906,1184.403]
[3662,{"$raw":"00000000"},21118,"GC.3.3125",null,3,"T",1093,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",2907,1092.619]
[3664,{"$raw":"00000000"},21118,"GC.3.3126",null,3,null,624,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","OV",2908,624.110]
[3668,{"$raw":"00000000"},21107,"GC.3.3129",null,3,"T",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2909,22.569]
[3670,{"$raw":"00000000"},21107,"GC.3.3130",null,3,"T",493,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2910,492.797]
[3671,{"$raw":"00000000"},21107,"GC.3.3131",null,3,"T",599,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2911,599.436]
[3672,{"$raw":"00000000"},21102,"GC.3.3132",null,3,"T",2788,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2912,2788.429]
[3673,{"$raw":"00000000"},21102,"GC.3.3133",null,3,"T",262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2913,262.003]
[3674,{"$raw":"00000000"},21102,"GC.3.3134",null,3,"T",211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2914,210.564]
[3676,{"$raw":"00000000"},21102,"GC.3.3136",null,3,"T",314,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2915,313.932]
[3678,{"$raw":"00000000"},21102,"GC.3.3137",null,3,"T",288,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2916,288.343]
[3679,{"$raw":"00000000"},21102,"GC.3.3138",null,3,"T",401,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2917,401.109]
[3681,{"$raw":"00000000"},21102,"GC.3.3139",null,3,"T",292,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2918,292.169]
[3682,{"$raw":"00000000"},21102,"GC.3.3140",null,3,"T",811,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2919,811.136]
[3683,{"$raw":"00000000"},21102,"GC.3.3141",null,3,"T",556,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2920,556.181]
[3684,{"$raw":"00000000"},21102,"GC.3.3142",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2921,0.325]
[3687,{"$raw":"00000000"},21102,"GC.3.3143",null,3,"T",3573,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2922,3573.433]
[3688,{"$raw":"00000000"},21102,"GC.3.3144",null,3,"T",1373,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2923,1373.497]
[3689,{"$raw":"00000000"},21102,"GC.3.3145",null,3,"T",470,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2924,470.081]
[3691,{"$raw":"00000000"},21102,"GC.3.3146",null,3,"T",690,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2925,689.829]
[3692,{"$raw":"00000000"},21102,"GC.3.3147",null,3,"T",434,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2926,434.496]
[3695,{"$raw":"00000000"},21120,"GC.3.3148",null,3,"T",375,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2927,374.587]
[3696,{"$raw":"00000000"},21120,"GC.3.3149",null,3,"T",364,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2928,364.001]
[3699,{"$raw":"00000000"},21102,"GC.3.3151",null,3,"T",2083,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2929,2082.933]
[3700,{"$raw":"00000000"},21102,"GC.3.3152",null,3,"T",505,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",2930,504.768]
[3701,{"$raw":"00000000"},21120,"GC.3.3153",null,3,"T",1781,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2931,1781.451]
[3702,{"$raw":"00000000"},21120,"GC.3.3154",null,3,"T",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2932,369.572]
[3703,{"$raw":"00000000"},21120,"GC.3.3155",null,3,"T",1134,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",2933,1133.985]
[3708,{"$raw":"00000000"},21107,"GC.3.3156",null,3,"T",887,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2934,886.896]
[3709,{"$raw":"00000000"},21107,"GC.3.3157",null,3,"T",155,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2935,154.503]
[3710,{"$raw":"00000000"},21107,"GC.3.3158",null,3,"T",359,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2936,358.819]
[3711,{"$raw":"00000000"},21107,"GC.3.3159",null,3,"T",359,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2937,358.921]
[3712,{"$raw":"00000000"},21107,"GC.3.3160",null,3,"T",326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2938,325.607]
[3715,{"$raw":"00000000"},21107,"GC.3.3163",null,3,"T",1429,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2939,1428.857]
[3716,{"$raw":"00000000"},21107,"GC.3.3164",null,3,"T",209,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2940,209.078]
[3720,{"$raw":"00000000"},21107,"GC.3.3168",null,3,"T",449,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2941,449.112]
[3721,{"$raw":"00000000"},21107,"GC.3.3169",null,3,"T",925,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2942,924.847]
[3722,{"$raw":"00000000"},21107,"GC.3.3170",null,3,"T",862,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2943,862.446]
[3723,{"$raw":"00000000"},21107,"GC.3.3171",null,3,"T",97,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2944,96.843]
[3724,{"$raw":"00000000"},21107,"GC.3.3172",null,3,"T",1916,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2945,1915.644]
[3725,{"$raw":"00000000"},21107,"GC.3.3173",null,3,"T",789,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2946,788.984]
[3726,{"$raw":"00000000"},21107,"GC.3.3174",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2947,17.219]
[3729,{"$raw":"00000000"},21107,"GC.3.3175",null,3,"T",657,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2948,656.907]
[3730,{"$raw":"00000000"},21107,"GC.3.3176",null,3,"T",1331,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2949,1331.070]
[3732,{"$raw":"00000000"},21107,"GC.3.3177",null,3,"T",478,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2950,478.209]
[3733,{"$raw":"00000000"},21107,"GC.3.3178",null,3,"T",1847,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2951,1847.178]
[3734,{"$raw":"00000000"},21107,"GC.3.3179",null,3,"T",976,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2952,976.044]
[3736,{"$raw":"00000000"},21107,"GC.3.3180",null,3,"T",615,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2953,614.704]
[3737,{"$raw":"00000000"},21107,"GC.3.3181",null,3,"T",742,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2954,741.669]
[3738,{"$raw":"00000000"},21107,"GC.3.3182",null,3,"T",1089,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2955,1088.949]
[3739,{"$raw":"00000000"},21107,"GC.3.3183",null,3,"T",1421,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2956,1421.011]
[3740,{"$raw":"00000000"},21107,"GC.3.3184",null,3,"T",703,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2957,703.037]
[3741,{"$raw":"00000000"},21107,"GC.3.3185",null,3,"T",1360,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2958,1359.661]
[3742,{"$raw":"00000000"},21107,"GC.3.3186",null,3,"T",462,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2959,462.114]
[3743,{"$raw":"00000000"},21107,"GC.3.3187",null,3,"T",1226,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2960,1225.634]
[3744,{"$raw":"00000000"},21107,"GC.3.3188",null,3,"T",610,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2961,609.901]
[3745,{"$raw":"00000000"},21107,"GC.3.3189",null,3,"T",349,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2962,348.916]
[3746,{"$raw":"00000000"},21107,"GC.3.3190",null,3,"T",233,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2963,233.320]
[3748,{"$raw":"00000000"},21107,"GC.3.3192",null,3,"T",201,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2964,201.442]
[3749,{"$raw":"00000000"},21107,"GC.3.3193",null,3,"T",720,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2965,719.938]
[3750,{"$raw":"00000000"},21107,"GC.3.3194",null,3,"T",2323,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2966,2322.724]
[3751,{"$raw":"00000000"},21107,"GC.3.3195",null,3,"T",818,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",2967,817.794]
[3752,{"$raw":"00000000"},21119,"GC.3.3196",null,3,"T",4058,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2968,4057.737]
[3754,{"$raw":"00000000"},21119,"GC.3.3197",null,3,"T",1121,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2969,1121.192]
[3755,{"$raw":"00000000"},21119,"GC.3.3198",null,3,"T",916,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2970,916.203]
[3757,{"$raw":"00000000"},21119,"GC.3.3199",null,3,"T",2099,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2971,2098.930]
[3758,{"$raw":"00000000"},21119,"GC.3.3200",null,3,"T",727,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2972,726.782]
[3759,{"$raw":"00000000"},21119,"GC.3.3201",null,3,"T",632,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2973,632.457]
[3762,{"$raw":"00000000"},21119,"GC.3.3202",null,3,"T",684,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2974,683.655]
[3763,{"$raw":"00000000"},21119,"GC.3.3203",null,3,"T",1706,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2975,1705.854]
[3764,{"$raw":"00000000"},21119,"GC.3.3204",null,3,"T",341,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2976,341.152]
[3765,{"$raw":"00000000"},21119,"GC.3.3205",null,3,"T",885,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2977,885.305]
[3766,{"$raw":"00000000"},21119,"GC.3.3206",null,3,"T",1409,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2978,1409.156]
[3767,{"$raw":"00000000"},21119,"GC.3.3207",null,3,"T",2149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2979,2148.626]
[3768,{"$raw":"00000000"},21119,"GC.3.3208",null,3,"T",1469,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2980,1469.298]
[3769,{"$raw":"00000000"},21119,"GC.3.3209",null,3,"T",821,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2981,820.830]
[3770,{"$raw":"00000000"},21119,"GC.3.3210",null,3,"T",1410,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2982,1410.473]
[3771,{"$raw":"00000000"},21119,"GC.3.3211",null,3,"T",1137,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2983,1137.088]
[3772,{"$raw":"00000000"},21119,"GC.3.3212",null,3,"T",834,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2984,833.748]
[3773,{"$raw":"00000000"},21119,"GC.3.3213",null,3,"T",1645,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2985,1645.398]
[3774,{"$raw":"00000000"},21119,"GC.3.3214",null,3,"T",59,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2986,59.254]
[3775,{"$raw":"00000000"},21119,"GC.3.3215",null,3,"T",469,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2987,468.675]
[3776,{"$raw":"00000000"},21119,"GC.3.3216",null,3,"T",1659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2988,1658.902]
[3777,{"$raw":"00000000"},21119,"GC.3.3217",null,3,"T",2238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2989,2237.714]
[3780,{"$raw":"00000000"},21119,"GC.3.3219",null,3,"T",625,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2990,625.370]
[3787,{"$raw":"00000000"},21103,"GC.3.3222",null,3,"T",576,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",2991,575.836]
[3788,{"$raw":"00000000"},21119,"GC.3.3223",null,3,"T",1224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2992,1224.206]
[3791,{"$raw":"00000000"},21119,"GC.3.3226",null,3,"T",915,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2993,914.980]
[3793,{"$raw":"00000000"},21119,"GC.3.3228",null,3,"T",823,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2994,822.876]
[3794,{"$raw":"00000000"},21103,"GC.3.3229",null,3,"T",282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",2995,281.713]
[3795,{"$raw":"00000000"},21103,"GC.3.3230",null,3,"T",312,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",2996,312.045]
[3796,{"$raw":"00000000"},21103,"GC.3.3231",null,3,"T",513,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",2997,513.174]
[3797,{"$raw":"00000000"},21103,"GC.3.3232",null,3,"T",733,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",2998,732.807]
[3798,{"$raw":"00000000"},21119,"GC.3.3233",null,3,"T",1361,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",2999,1361.424]
[3799,{"$raw":"00000000"},21119,"GC.3.3234",null,3,"T",50,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3000,50.323]
[3800,{"$raw":"00000000"},21119,"GC.3.3235",null,3,"T",627,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3001,626.961]
[3801,{"$raw":"00000000"},21119,"GC.3.3236",null,3,"T",261,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3002,261.173]
[3802,{"$raw":"00000000"},21119,"GC.3.3237",null,3,"T",372,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3003,371.629]
[3803,{"$raw":"00000000"},21119,"GC.3.3238",null,3,"T",1309,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3004,1309.158]
[3804,{"$raw":"00000000"},21119,"GC.3.3239",null,3,"T",497,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3005,497.046]
[3805,{"$raw":"00000000"},21119,"GC.3.3240",null,3,"T",540,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3006,539.976]
[3806,{"$raw":"00000000"},21119,"GC.3.3241",null,3,"T",1276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3007,1275.666]
[3807,{"$raw":"00000000"},21119,"GC.3.3242",null,3,"T",604,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3008,603.921]
[3808,{"$raw":"00000000"},21119,"GC.3.3243",null,3,"T",1084,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3009,1083.879]
[3809,{"$raw":"00000000"},21119,"GC.3.3244",null,3,"T",727,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3010,726.644]
[3810,{"$raw":"00000000"},21119,"GC.3.3245",null,3,"T",879,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3011,879.180]
[3811,{"$raw":"00000000"},21119,"GC.3.3246",null,3,"T",3019,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3012,3019.017]
[3812,{"$raw":"00000000"},21119,"GC.3.3247",null,3,"T",2027,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3013,2027.008]
[3815,{"$raw":"00000000"},21119,"GC.3.3249",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3014,1.916]
[3816,{"$raw":"00000000"},21119,"GC.3.3250",null,3,"T",972,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3015,971.519]
[3817,{"$raw":"00000000"},21119,"GC.3.3251",null,3,"T",481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3016,480.721]
[3818,{"$raw":"00000000"},21119,"GC.3.3252",null,3,"T",529,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3017,529.472]
[3819,{"$raw":"00000000"},21119,"GC.3.3253",null,3,"T",42,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3018,42.425]
[3820,{"$raw":"00000000"},21119,"GC.3.3254",null,3,"T",129,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3019,129.497]
[3821,{"$raw":"00000000"},21119,"GC.3.3255",null,3,"T",1000,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3020,999.661]
[3822,{"$raw":"00000000"},21119,"GC.3.3256",null,3,"T",805,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3021,804.988]
[3823,{"$raw":"00000000"},21119,"GC.3.3257",null,3,"T",299,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3022,299.191]
[3824,{"$raw":"00000000"},21119,"GC.3.3258",null,3,"T",1717,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3023,1716.571]
[3825,{"$raw":"00000000"},21119,"GC.3.3259",null,3,"T",410,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3024,409.738]
[3826,{"$raw":"00000000"},21119,"GC.3.3260",null,3,"T",2207,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3025,2206.531]
[3827,{"$raw":"00000000"},21119,"GC.3.3261",null,3,"T",163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3026,163.323]
[3828,{"$raw":"00000000"},21119,"GC.3.3262",null,3,"T",866,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3027,865.558]
[3829,{"$raw":"00000000"},21119,"GC.3.3263",null,3,"T",1033,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3028,1033.234]
[3830,{"$raw":"00000000"},21119,"GC.3.3264",null,3,"T",2262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3029,2262.486]
[3831,{"$raw":"00000000"},21119,"GC.3.3265",null,3,"T",216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3030,215.735]
[3832,{"$raw":"00000000"},21119,"GC.3.3266",null,3,"T",659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3031,658.915]
[3833,{"$raw":"00000000"},21119,"GC.3.3267",null,3,"T",428,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3032,428.048]
[3834,{"$raw":"00000000"},21119,"GC.3.3268",null,3,"T",485,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3033,485.399]
[3835,{"$raw":"00000000"},21119,"GC.3.3269",null,3,"T",1056,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3034,1056.032]
[3836,{"$raw":"00000000"},21119,"GC.3.3270",null,3,"T",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3035,333.646]
[3837,{"$raw":"00000000"},21119,"GC.3.3271",null,3,"T",1538,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3036,1537.975]
[3838,{"$raw":"00000000"},21119,"GC.3.3272",null,3,"T",358,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3037,358.379]
[3839,{"$raw":"00000000"},21119,"GC.3.3273",null,3,"T",632,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3038,631.962]
[3840,{"$raw":"00000000"},21119,"GC.3.3274",null,3,"T",813,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3039,812.636]
[3841,{"$raw":"00000000"},21119,"GC.3.3275",null,3,"T",2059,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3040,2058.503]
[3842,{"$raw":"00000000"},21119,"GC.3.3276",null,3,"T",655,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3041,655.055]
[3843,{"$raw":"00000000"},21119,"GC.3.3277",null,3,"T",556,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3042,556.408]
[3844,{"$raw":"00000000"},21119,"GC.3.3278",null,3,"T",1373,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3043,1373.239]
[3845,{"$raw":"00000000"},21119,"GC.3.3279",null,3,"T",2917,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3044,2916.989]
[3846,{"$raw":"00000000"},21119,"GC.3.3280",null,3,"T",596,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3045,595.591]
[3847,{"$raw":"00000000"},21119,"GC.3.3281",null,3,null,318,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","OV",3046,317.969]
[3848,{"$raw":"00000000"},21119,"GC.3.3282",null,3,null,138,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","OV",3047,137.701]
[3849,{"$raw":"00000000"},21119,"GC.3.3283",null,3,null,466,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","OV",3048,465.625]
[3850,{"$raw":"00000000"},21119,"GC.3.3284",null,3,null,50,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","OV",3049,49.510]
[3851,{"$raw":"00000000"},21107,"GC.3.3285",null,3,"T",325,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3050,324.748]
[3852,{"$raw":"00000000"},21107,"GC.3.3286",null,3,"T",988,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3051,987.809]
[3853,{"$raw":"00000000"},21107,"GC.3.3287",null,3,"T",347,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3052,346.736]
[3854,{"$raw":"00000000"},21107,"GC.3.3288",null,3,"T",903,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3053,902.975]
[3855,{"$raw":"00000000"},21107,"GC.3.3289",null,3,"T",204,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3054,204.089]
[3856,{"$raw":"00000000"},21107,"GC.3.3290",null,3,"T",2185,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3055,2185.156]
[3858,{"$raw":"00000000"},21107,"GC.3.3291",null,3,"T",81,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3056,81.027]
[3859,{"$raw":"00000000"},21107,"GC.3.3292",null,3,"T",1429,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3057,1428.647]
[3860,{"$raw":"00000000"},21107,"GC.3.3293",null,3,"T",136,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3058,135.531]
[3861,{"$raw":"00000000"},21107,"GC.3.3294",null,3,"T",2505,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3059,2505.056]
[3862,{"$raw":"00000000"},21107,"GC.3.3295",null,3,"T",2249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3060,2249.016]
[3863,{"$raw":"00000000"},21119,"GC.3.3296",null,3,"T",2295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3061,2294.848]
[3864,{"$raw":"00000000"},21119,"GC.3.3297",null,3,"T",923,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3062,923.098]
[3866,{"$raw":"00000000"},21119,"GC.3.3299",null,3,"T",972,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3063,972.291]
[3868,{"$raw":"00000000"},21107,"GC.3.3300",null,3,"T",121,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3064,121.084]
[3869,{"$raw":"00000000"},21107,"GC.3.3301",null,3,"T",1129,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3065,1129.365]
[3870,{"$raw":"00000000"},21107,"GC.3.3302",null,3,"T",1812,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3066,1812.324]
[3871,{"$raw":"00000000"},21107,"GC.3.3303",null,3,"T",263,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3067,263.090]
[3872,{"$raw":"00000000"},21107,"GC.3.3304",null,3,"T",1883,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3068,1883.222]
[3873,{"$raw":"00000000"},21107,"GC.3.3305",null,3,"T",3365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3069,3365.177]
[3874,{"$raw":"00000000"},21107,"GC.3.3306",null,3,"T",316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3070,316.192]
[3875,{"$raw":"00000000"},21107,"GC.3.3307",null,3,"T",2806,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3071,2805.514]
[3876,{"$raw":"00000000"},21107,"GC.3.3308",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3072,189.213]
[3877,{"$raw":"00000000"},21107,"GC.3.3309",null,3,"T",2452,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3073,2452.044]
[3878,{"$raw":"00000000"},21107,"GC.3.3310",null,3,"T",200,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3074,200.392]
[3880,{"$raw":"00000000"},21107,"GC.3.3311",null,3,"T",767,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3075,766.857]
[3881,{"$raw":"00000000"},21107,"GC.3.3312",null,3,"T",247,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3076,246.836]
[3882,{"$raw":"00000000"},21115,"GC.3.3313",null,3,"T",702,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3077,702.345]
[3883,{"$raw":"00000000"},21115,"GC.3.3314",null,3,"T",1437,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3078,1436.738]
[3884,{"$raw":"00000000"},21115,"GC.3.3315",null,3,"T",1243,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3079,1242.816]
[3885,{"$raw":"00000000"},21115,"GC.3.3316",null,3,"T",211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3080,211.275]
[3886,{"$raw":"00000000"},21115,"GC.3.3317",null,3,"T",842,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3081,841.504]
[3887,{"$raw":"00000000"},21115,"GC.3.3318",null,3,"T",887,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3082,887.350]
[3888,{"$raw":"00000000"},21115,"GC.3.3319",null,3,"T",352,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3083,351.783]
[3889,{"$raw":"00000000"},21115,"GC.3.3320",null,3,"T",1812,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3084,1812.406]
[3890,{"$raw":"00000000"},21115,"GC.3.3321",null,3,"T",437,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3085,437.234]
[3891,{"$raw":"00000000"},21115,"GC.3.3322",null,3,"T",494,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3086,493.910]
[3892,{"$raw":"00000000"},21115,"GC.3.3323",null,3,"T",274,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3087,274.325]
[3893,{"$raw":"00000000"},21115,"GC.3.3324",null,3,"T",458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3088,458.440]
[3894,{"$raw":"00000000"},21115,"GC.3.3325",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3089,0.872]
[3896,{"$raw":"00000000"},21119,"GC.3.3327",null,3,"T",77,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3090,76.966]
[3902,{"$raw":"00000000"},21116,"GC.3.3329",null,3,"T",1488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3091,1488.206]
[3903,{"$raw":"00000000"},21116,"GC.3.3330",null,3,"T",389,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3092,388.991]
[3906,{"$raw":"00000000"},21120,"GC.3.3331",null,3,"T",2527,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3093,2526.969]
[3907,{"$raw":"00000000"},21120,"GC.3.3332",null,3,null,715,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","OV",3094,715.405]
[3909,{"$raw":"00000000"},21121,"GC.3.3333",null,3,"T",1568,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3095,1567.808]
[3912,{"$raw":"00000000"},21121,"GC.3.3334",null,3,"T",2016,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3096,2015.596]
[3913,{"$raw":"00000000"},21121,"GC.3.3335",null,3,"T",116,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3097,116.005]
[3914,{"$raw":"00000000"},21121,"GC.3.3336",null,3,"T",1789,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3098,1788.686]
[3916,{"$raw":"00000000"},21121,"GC.3.3337",null,3,"T",959,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3099,958.906]
[3918,{"$raw":"00000000"},21121,"GC.3.3338",null,3,"T",633,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3100,633.189]
[3919,{"$raw":"00000000"},21121,"GC.3.3339",null,3,"T",309,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3101,308.726]
[3921,{"$raw":"00000000"},21116,"GC.3.3340",null,3,"T",556,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3102,556.114]
[3922,{"$raw":"00000000"},21116,"GC.3.3341",null,3,"T",48,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3103,47.677]
[3923,{"$raw":"00000000"},21116,"GC.3.3342",null,3,"T",602,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3104,602.192]
[3924,{"$raw":"00000000"},21116,"GC.3.3343",null,3,"T",1044,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3105,1043.973]
[3925,{"$raw":"00000000"},21116,"GC.3.3344",null,3,"T",275,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3106,275.317]
[3928,{"$raw":"00000000"},21121,"GC.3.3345",null,3,"T",2104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3107,2103.518]
[3929,{"$raw":"00000000"},21121,"GC.3.3346",null,3,null,808,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",3108,808.226]
[3930,{"$raw":"00000000"},21121,"GC.3.3347",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3109,12.746]
[3931,{"$raw":"00000000"},21121,"GC.3.3348",null,3,"T",1022,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3110,1022.060]
[3932,{"$raw":"00000000"},21121,"GC.3.3349",null,3,"T",439,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3111,438.772]
[3934,{"$raw":"00000000"},21121,"GC.3.3350",null,3,"T",816,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3112,816.350]
[3935,{"$raw":"00000000"},21121,"GC.3.3351",null,3,"T",387,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3113,387.121]
[3936,{"$raw":"00000000"},21121,"GC.3.3352",null,3,null,346,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",3114,345.629]
[3937,{"$raw":"00000000"},21121,"GC.3.3353",null,3,"T",720,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3115,719.801]
[3938,{"$raw":"00000000"},21121,"GC.3.3354",null,3,"T",1482,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3116,1481.912]
[3939,{"$raw":"00000000"},21121,"GC.3.3355",null,3,"T",419,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3117,418.613]
[3940,{"$raw":"00000000"},21121,"GC.3.3356",null,3,"T",1059,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3118,1059.311]
[3941,{"$raw":"00000000"},21121,"GC.3.3357",null,3,null,718,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",3119,717.677]
[3943,{"$raw":"00000000"},21121,"GC.3.3358",null,3,"T",518,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3120,518.148]
[3944,{"$raw":"00000000"},21121,"GC.3.3359",null,3,"T",937,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3121,936.712]
[3947,{"$raw":"00000000"},21121,"GC.3.3360",null,3,"T",815,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3122,814.969]
[3948,{"$raw":"00000000"},21121,"GC.3.3361",null,3,"T",2878,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3123,2878.115]
[3949,{"$raw":"00000000"},21121,"GC.3.3362",null,3,"T",748,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3124,747.760]
[3950,{"$raw":"00000000"},21121,"GC.3.3363",null,3,"T",567,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3125,567.264]
[3951,{"$raw":"00000000"},21116,"GC.3.3364",null,3,"T",953,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3126,953.352]
[3956,{"$raw":"00000000"},21116,"GC.3.3365",null,3,"T",756,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3127,755.684]
[3957,{"$raw":"00000000"},21116,"GC.3.3366",null,3,"T",1066,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3128,1066.389]
[3958,{"$raw":"00000000"},21116,"GC.3.3367",null,3,"T",898,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3129,898.173]
[3959,{"$raw":"00000000"},21116,"GC.3.3368",null,3,"T",850,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3130,850.194]
[3961,{"$raw":"00000000"},21116,"GC.3.3369",null,3,"T",563,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3131,563.350]
[3966,{"$raw":"00000000"},21120,"GC.3.3370",null,3,"T",1039,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3132,1039.393]
[3969,{"$raw":"00000000"},21103,"GC.3.3371",null,3,"T",1976,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3133,1976.207]
[3970,{"$raw":"00000000"},21119,"GC.3.3372",null,3,"T",2025,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3134,2025.386]
[3971,{"$raw":"00000000"},21119,"GC.3.3373",null,3,"T",694,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3135,693.715]
[3972,{"$raw":"00000000"},21119,"GC.3.3374",null,3,"T",1974,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3136,1974.422]
[3973,{"$raw":"00000000"},21119,"GC.3.3375",null,3,"T",135,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3137,134.892]
[3974,{"$raw":"00000000"},21119,"GC.3.3376",null,3,"T",2929,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3138,2929.275]
[3975,{"$raw":"00000000"},21119,"GC.3.3377",null,3,"T",1052,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3139,1052.462]
[3977,{"$raw":"00000000"},21119,"GC.3.3378",null,3,"T",1331,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3140,1330.797]
[3978,{"$raw":"00000000"},21119,"GC.3.3379",null,3,"T",165,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3141,165.226]
[3979,{"$raw":"00000000"},21119,"GC.3.3380",null,3,"T",2760,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3142,2760.464]
[3980,{"$raw":"00000000"},21119,"GC.3.3381",null,3,"T",3632,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3143,3632.370]
[3984,{"$raw":"00000000"},21115,"GC.3.3382",null,3,"T",1068,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3144,1068.167]
[3985,{"$raw":"00000000"},21103,"GC.3.3383",null,3,"T",998,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3145,998.025]
[3987,{"$raw":"00000000"},21121,"GC.3.3384",null,3,"T",1983,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3146,1982.683]
[3988,{"$raw":"00000000"},21121,"GC.3.3385",null,3,"T",709,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3147,709.060]
[3989,{"$raw":"00000000"},21121,"GC.3.3386",null,3,"T",2929,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3148,2928.790]
[3990,{"$raw":"00000000"},21121,"GC.3.3387",null,3,"T",1455,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3149,1455.066]
[3992,{"$raw":"00000000"},21121,"GC.3.3389",null,3,"T",200,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3150,200.441]
[3996,{"$raw":"00000000"},0,"GC.3.3390",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3151,6.358]
[3997,{"$raw":"00000000"},21121,"GC.3.3391",null,3,"T",149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3152,149.244]
[3998,{"$raw":"00000000"},0,"GC.3.3392",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3153,13.346]
[3999,{"$raw":"00000000"},21103,"GC.3.3393",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3154,6.801]
[4001,{"$raw":"00000000"},0,"GC.3.3395",null,3,"T",107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3155,107.207]
[4003,{"$raw":"00000000"},0,"GC.3.3397",null,3,"T",37,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3156,36.719]
[4005,{"$raw":"00000000"},21106,"GC.3.3399",null,3,"T",515,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3157,515.166]
[4006,{"$raw":"00000000"},21106,"GC.3.3400",null,3,"T",1589,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3158,1588.546]
[4007,{"$raw":"00000000"},21106,"GC.3.3401",null,3,"T",2103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3159,2103.115]
[4008,{"$raw":"00000000"},21106,"GC.3.3402",null,3,"T",924,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3160,923.840]
[4009,{"$raw":"00000000"},21106,"GC.3.3403",null,3,"T",1933,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3161,1933.231]
[4010,{"$raw":"00000000"},21106,"GC.3.3404",null,3,"T",1262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3162,1261.810]
[4011,{"$raw":"00000000"},21106,"GC.3.3405",null,3,"T",432,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3163,432.135]
[4012,{"$raw":"00000000"},21106,"GC.3.3406",null,3,"T",756,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3164,756.178]
[4013,{"$raw":"00000000"},21106,"GC.3.3407",null,3,"T",634,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3165,633.639]
[4014,{"$raw":"00000000"},21106,"GC.3.3408",null,3,"T",564,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3166,563.852]
[4015,{"$raw":"00000000"},21106,"GC.3.3409",null,3,"T",633,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3167,633.403]
[4017,{"$raw":"00000000"},21106,"GC.3.3410",null,3,"T",262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3168,261.758]
[4018,{"$raw":"00000000"},21117,"GC.3.3411",null,3,"T",912,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3169,912.067]
[4020,{"$raw":"00000000"},21117,"GC.3.3412",null,3,"T",1729,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3170,1729.314]
[4022,{"$raw":"00000000"},21117,"GC.3.3413",null,3,"T",418,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3171,418.389]
[4024,{"$raw":"00000000"},21117,"GC.3.3414",null,3,"T",1169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3172,1169.198]
[4025,{"$raw":"00000000"},21117,"GC.3.3415",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3173,188.917]
[4026,{"$raw":"00000000"},21117,"GC.3.3416",null,3,"T",590,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3174,590.015]
[4028,{"$raw":"00000000"},21106,"GC.3.3417",null,3,"T",1420,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3175,1419.954]
[4029,{"$raw":"00000000"},21106,"GC.3.3418",null,3,"T",1445,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3176,1444.678]
[4030,{"$raw":"00000000"},21106,"GC.3.3419",null,3,"T",1421,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3177,1421.252]
[4031,{"$raw":"00000000"},21106,"GC.3.3420",null,3,"T",1343,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3178,1343.016]
[4032,{"$raw":"00000000"},21117,"GC.3.3421",null,3,"T",1519,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3179,1519.232]
[4036,{"$raw":"00000000"},21119,"GC.3.3422",null,3,"T",1381,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3180,1381.386]
[4038,{"$raw":"00000000"},21119,"GC.3.3423",null,3,"T",508,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3181,508.252]
[4042,{"$raw":"00000000"},21103,"GC.3.3425",null,3,"T",2688,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3182,2687.985]
[4043,{"$raw":"00000000"},21107,"GC.3.3426",null,3,"T",978,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3183,977.637]
[4044,{"$raw":"00000000"},21107,"GC.3.3427",null,3,"T",889,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3184,889.392]
[4045,{"$raw":"00000000"},21107,"GC.3.3428",null,3,"T",1282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3185,1282.330]
[4046,{"$raw":"00000000"},21121,"GC.3.3429",null,3,"T",3087,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3186,3086.547]
[4049,{"$raw":"00000000"},21103,"GC.3.3430",null,3,"T",2350,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3187,2349.990]
[4051,{"$raw":"00000000"},21102,"GC.3.3431",null,3,"T",1049,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3188,1048.746]
[4052,{"$raw":"00000000"},21119,"GC.3.3432",null,3,"T",2374,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3189,2374.461]
[4054,{"$raw":"00000000"},21119,"GC.3.3433",null,3,"T",1146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3190,1145.733]
[4056,{"$raw":"00000000"},21121,"GC.3.3434",null,3,"T",1467,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3191,1466.961]
[4057,{"$raw":"00000000"},21121,"GC.3.3435",null,3,"T",307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3192,306.518]
[4058,{"$raw":"00000000"},21121,"GC.3.3436",null,3,"T",2219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3193,2218.868]
[4059,{"$raw":"00000000"},21121,"GC.3.3437",null,3,"T",294,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3194,293.537]
[4061,{"$raw":"00000000"},21121,"GC.3.3438",null,3,"T",303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3195,302.685]
[4062,{"$raw":"00000000"},21121,"GC.3.3439",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3196,249.283]
[4065,{"$raw":"00000000"},21103,"GC.3.3440",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3197,339.034]
[4066,{"$raw":"00000000"},21121,"GC.3.3441",null,3,"T",983,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3198,983.269]
[4068,{"$raw":"00000000"},21121,"GC.3.3442",null,3,"T",1682,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3199,1681.624]
[4069,{"$raw":"00000000"},21121,"GC.3.3443",null,3,"T",2471,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3200,2471.123]
[4070,{"$raw":"00000000"},21121,"GC.3.3444",null,3,"T",253,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3201,253.046]
[4071,{"$raw":"00000000"},21121,"GC.3.3445",null,3,"T",427,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3202,426.663]
[4074,{"$raw":"00000000"},21120,"GC.3.3446",null,3,"T",2841,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3203,2840.545]
[4077,{"$raw":"00000000"},21120,"GC.3.3448",null,3,"T",185,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3204,185.166]
[4078,{"$raw":"00000000"},21120,"GC.3.3449",null,3,"T",2477,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3205,2477.281]
[4082,{"$raw":"00000000"},21115,"GC.3.3451",null,3,"T",734,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3206,733.901]
[4083,{"$raw":"00000000"},21115,"GC.3.3452",null,3,"T",1563,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3207,1562.679]
[4085,{"$raw":"00000000"},21107,"GC.3.3453",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3208,12.510]
[4086,{"$raw":"00000000"},21107,"GC.3.3454",null,3,"T",2409,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3209,2408.748]
[4087,{"$raw":"00000000"},21107,"GC.3.3455",null,3,"T",1082,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3210,1082.153]
[4089,{"$raw":"00000000"},21119,"GC.3.3456",null,3,"T",905,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3211,905.221]
[4095,{"$raw":"00000000"},21121,"GC.3.3457",null,3,"T",408,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3212,408.072]
[4096,{"$raw":"00000000"},21119,"GC.3.3458",null,3,"T",1448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3213,1448.246]
[4098,{"$raw":"00000000"},21117,"GC.3.3459",null,3,"T",1008,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3214,1007.714]
[4099,{"$raw":"00000000"},21102,"GC.3.3460",null,3,"T",1451,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3215,1450.964]
[4103,{"$raw":"00000000"},0,"GC.3.3462",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3216,16.185]
[4106,{"$raw":"00000000"},0,"GC.3.3465",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3217,10.860]
[4108,{"$raw":"00000000"},21122,"GC.3.3467",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3218,28.064]
[4109,{"$raw":"00000000"},21122,"GC.3.3468",null,3,"T",209,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3219,208.538]
[4110,{"$raw":"00000000"},21122,"GC.3.3469",null,3,"T",95,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3220,95.415]
[4113,{"$raw":"00000000"},21107,"GC.3.3471",null,3,"T",14,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3221,13.915]
[4114,{"$raw":"00000000"},21107,"GC.3.3472",null,3,"T",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3222,21.255]
[4116,{"$raw":"00000000"},0,"GC.3.3474",null,3,"T",44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3223,43.623]
[4120,{"$raw":"00000000"},21111,"GC.3.3477",null,3,"T",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3224,304.109]
[4121,{"$raw":"00000000"},21111,"GC.3.3478",null,3,"T",622,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3225,622.455]
[4123,{"$raw":"00000000"},21111,"GC.3.3480",null,3,"T",702,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3226,702.477]
[4127,{"$raw":"00000000"},21106,"GC.3.3483",null,3,"T",109,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3227,109.327]
[4128,{"$raw":"00000000"},21106,"GC.3.3484",null,3,"T",140,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3228,140.025]
[4129,{"$raw":"00000000"},21106,"GC.3.3485",null,3,"T",94,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3229,94.460]
[4130,{"$raw":"00000000"},21118,"GC.3.3486",null,3,"T",311,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3230,310.694]
[4131,{"$raw":"00000000"},21118,"GC.3.3487",null,3,"T",303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3231,302.791]
[4132,{"$raw":"00000000"},21102,"GC.3.3488",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3232,52.965]
[4133,{"$raw":"00000000"},21102,"GC.3.3489",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3233,79.082]
[4134,{"$raw":"00000000"},21102,"GC.3.3490",null,3,"T",94,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3234,93.509]
[4135,{"$raw":"00000000"},21102,"GC.3.3491",null,3,"T",315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3235,314.589]
[4136,{"$raw":"00000000"},21102,"GC.3.3492",null,3,"T",188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3236,188.160]
[4137,{"$raw":"00000000"},21102,"GC.3.3493",null,3,"T",635,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3237,635.434]
[4138,{"$raw":"00000000"},21121,"GC.3.3494",null,3,"T",917,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3238,916.737]
[4139,{"$raw":"00000000"},21119,"GC.3.3495",null,3,"T",172,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3239,171.991]
[4140,{"$raw":"00000000"},21119,"GC.3.3496",null,3,"T",744,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3240,743.688]
[4141,{"$raw":"00000000"},21119,"GC.3.3497",null,3,"T",437,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3241,437.368]
[4144,{"$raw":"00000000"},21117,"GC.3.3498",null,3,null,261,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","OV",3242,261.417]
[4150,{"$raw":"00000000"},21122,"GC.3.3499",null,3,null,92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",3243,91.712]
[4152,{"$raw":"00000000"},21111,"GC.3.3500",null,3,"T",141,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3244,141.290]
[4153,{"$raw":"00000000"},21111,"GC.3.3501",null,3,"T",322,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3245,322.014]
[4154,{"$raw":"00000000"},21111,"GC.3.3502",null,3,"T",147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3246,146.760]
[4155,{"$raw":"00000000"},21111,"GC.3.3503",null,3,"T",477,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3247,477.025]
[4156,{"$raw":"00000000"},21111,"GC.3.3504",null,3,"T",659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3248,658.822]
[4157,{"$raw":"00000000"},21111,"GC.3.3505",null,3,"T",607,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3249,606.785]
[4158,{"$raw":"00000000"},21111,"GC.3.3506",null,3,"T",229,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3250,228.584]
[4159,{"$raw":"00000000"},21111,"GC.3.3507",null,3,"T",176,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3251,176.128]
[4160,{"$raw":"00000000"},21111,"GC.3.3508",null,3,"T",1769,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3252,1769.298]
[4162,{"$raw":"00000000"},21111,"GC.3.3509",null,3,"T",795,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3253,795.141]
[4164,{"$raw":"00000000"},21111,"GC.3.3510",null,3,"T",396,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3254,395.521]
[4166,{"$raw":"00000000"},21111,"GC.3.3511",null,3,"T",119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3255,118.728]
[4167,{"$raw":"00000000"},21111,"GC.3.3512",null,3,"T",1256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3256,1256.413]
[4168,{"$raw":"00000000"},21111,"GC.3.3513",null,3,"T",395,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3257,394.883]
[4169,{"$raw":"00000000"},21111,"GC.3.3514",null,3,"T",109,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3258,108.693]
[4172,{"$raw":"00000000"},21111,"GC.3.3515",null,3,"T",388,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3259,387.802]
[4173,{"$raw":"00000000"},21111,"GC.3.3516",null,3,"T",190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3260,189.566]
[4174,{"$raw":"00000000"},21111,"GC.3.3517",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3261,1.654]
[4175,{"$raw":"00000000"},21111,"GC.3.3518",null,3,"T",198,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3262,198.132]
[4176,{"$raw":"00000000"},21111,"GC.3.3519",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3263,1.664]
[4177,{"$raw":"00000000"},21111,"GC.3.3520",null,3,"T",301,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3264,301.293]
[4178,{"$raw":"00000000"},21111,"GC.3.3521",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3265,2.306]
[4179,{"$raw":"00000000"},21111,"GC.3.3522",null,3,"T",225,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3266,225.358]
[4180,{"$raw":"00000000"},21111,"GC.3.3523",null,3,"T",446,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3267,446.469]
[4181,{"$raw":"00000000"},21111,"GC.3.3524",null,3,"T",369,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3268,369.072]
[4182,{"$raw":"00000000"},21111,"GC.3.3525",null,3,"T",1261,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3269,1261.047]
[4183,{"$raw":"00000000"},21111,"GC.3.3526",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3270,2.544]
[4184,{"$raw":"00000000"},21111,"GC.3.3527",null,3,"T",724,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3271,724.106]
[4185,{"$raw":"00000000"},21111,"GC.3.3528",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3272,0.057]
[4186,{"$raw":"00000000"},21111,"GC.3.3529",null,3,"T",453,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3273,452.644]
[4187,{"$raw":"00000000"},21111,"GC.3.3530",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3274,0.057]
[4188,{"$raw":"00000000"},21111,"GC.3.3531",null,3,"T",245,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3275,244.837]
[4189,{"$raw":"00000000"},21111,"GC.3.3532",null,3,"T",58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3276,58.026]
[4190,{"$raw":"00000000"},21111,"GC.3.3533",null,3,"T",690,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3277,689.804]
[4191,{"$raw":"00000000"},21111,"GC.3.3534",null,3,"T",275,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3278,274.844]
[4192,{"$raw":"00000000"},21111,"GC.3.3535",null,3,"T",712,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3279,711.619]
[4194,{"$raw":"00000000"},21111,"GC.3.3536",null,3,"T",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3280,81.579]
[4195,{"$raw":"00000000"},21111,"GC.3.3537",null,3,"T",347,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3281,346.798]
[4196,{"$raw":"00000000"},21111,"GC.3.3538",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3282,23.801]
[4197,{"$raw":"00000000"},21111,"GC.3.3539",null,3,"T",546,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3283,546.378]
[4198,{"$raw":"00000000"},21111,"GC.3.3540",null,3,"T",78,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3284,77.879]
[4199,{"$raw":"00000000"},21111,"GC.3.3541",null,3,"T",612,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3285,611.666]
[4200,{"$raw":"00000000"},21111,"GC.3.3542",null,3,"T",73,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3286,72.965]
[4201,{"$raw":"00000000"},21111,"GC.3.3543",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3287,28.370]
[4202,{"$raw":"00000000"},21111,"GC.3.3544",null,3,"T",166,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3288,165.956]
[4204,{"$raw":"00000000"},21111,"GC.3.3545",null,3,"T",703,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3289,703.398]
[4205,{"$raw":"00000000"},21111,"GC.3.3546",null,3,"T",183,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3290,182.829]
[4207,{"$raw":"00000000"},21111,"GC.3.3547",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3291,1.056]
[4209,{"$raw":"00000000"},21111,"GC.3.3548",null,3,"T",338,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3292,338.379]
[4210,{"$raw":"00000000"},21111,"GC.3.3549",null,3,"T",602,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3293,602.096]
[4212,{"$raw":"00000000"},21111,"GC.3.3550",null,3,"T",148,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3294,148.247]
[4213,{"$raw":"00000000"},21111,"GC.3.3551",null,3,"T",54,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3295,53.663]
[4214,{"$raw":"00000000"},21111,"GC.3.3552",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3296,85.367]
[4215,{"$raw":"00000000"},21111,"GC.3.3553",null,3,"T",1440,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3297,1439.560]
[4216,{"$raw":"00000000"},21111,"GC.3.3554",null,3,"T",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3298,59.704]
[4217,{"$raw":"00000000"},21111,"GC.3.3555",null,3,"T",224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3299,223.659]
[4218,{"$raw":"00000000"},21111,"GC.3.3556",null,3,"T",750,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3300,750.328]
[4219,{"$raw":"00000000"},21111,"GC.3.3557",null,3,"T",566,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3301,566.447]
[4220,{"$raw":"00000000"},21111,"GC.3.3558",null,3,"T",314,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3302,313.980]
[4221,{"$raw":"00000000"},21111,"GC.3.3559",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3303,15.114]
[4222,{"$raw":"00000000"},21111,"GC.3.3560",null,3,"T",681,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3304,681.361]
[4223,{"$raw":"00000000"},21111,"GC.3.3561",null,3,"T",794,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3305,793.878]
[4224,{"$raw":"00000000"},21111,"GC.3.3562",null,3,"T",509,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3306,508.555]
[4226,{"$raw":"00000000"},21111,"GC.3.3563",null,3,"T",608,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3307,607.747]
[4227,{"$raw":"00000000"},21111,"GC.3.3564",null,3,"T",181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3308,181.484]
[4228,{"$raw":"00000000"},21111,"GC.3.3565",null,3,"T",159,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3309,158.989]
[4229,{"$raw":"00000000"},21111,"GC.3.3566",null,3,"T",1308,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3310,1307.800]
[4230,{"$raw":"00000000"},21111,"GC.3.3567",null,3,"T",495,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3311,495.308]
[4232,{"$raw":"00000000"},21111,"GC.3.3569",null,3,"T",459,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3312,458.885]
[4233,{"$raw":"00000000"},21111,"GC.3.3570",null,3,"T",125,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3313,125.478]
[4234,{"$raw":"00000000"},21111,"GC.3.3571",null,3,"T",606,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3314,606.107]
[4235,{"$raw":"00000000"},21111,"GC.3.3572",null,3,"T",43,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3315,43.195]
[4236,{"$raw":"00000000"},21111,"GC.3.3573",null,3,"T",1203,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3316,1203.121]
[4238,{"$raw":"00000000"},21111,"GC.3.3575",null,3,"T",355,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3317,355.288]
[4239,{"$raw":"00000000"},21111,"GC.3.3576",null,3,"T",384,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3318,383.685]
[4240,{"$raw":"00000000"},21111,"GC.3.3577",null,3,"T",408,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3319,408.040]
[4243,{"$raw":"00000000"},0,"GC.3.3578",null,3,"T",72,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3320,71.606]
[4246,{"$raw":"00000000"},0,"GC.3.3581",null,3,"T",104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3321,104.413]
[4247,{"$raw":"00000000"},0,"GC.3.3582",null,3,"T",35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3322,34.665]
[4249,{"$raw":"00000000"},21111,"GC.3.3584",null,3,"T",360,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3323,359.716]
[4250,{"$raw":"00000000"},21111,"GC.3.3585",null,3,"T",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3324,218.922]
[4251,{"$raw":"00000000"},0,"GC.3.3586",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3325,34.120]
[4252,{"$raw":"00000000"},0,"GC.3.3587",null,3,"T",61,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3326,60.642]
[4253,{"$raw":"00000000"},21111,"GC.3.3588",null,3,"T",226,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3327,225.833]
[4254,{"$raw":"00000000"},21111,"GC.3.3589",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3328,28.584]
[4255,{"$raw":"00000000"},21111,"GC.3.3590",null,3,"T",331,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3329,331.495]
[4256,{"$raw":"00000000"},21111,"GC.3.3591",null,3,"T",1150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3330,1149.621]
[4257,{"$raw":"00000000"},21111,"GC.3.3592",null,3,"T",643,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3331,643.378]
[4258,{"$raw":"00000000"},21111,"GC.3.3593",null,3,"T",80,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3332,80.370]
[4259,{"$raw":"00000000"},21111,"GC.3.3594",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3333,91.524]
[4260,{"$raw":"00000000"},21111,"GC.3.3595",null,3,"T",464,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3334,464.198]
[4261,{"$raw":"00000000"},21111,"GC.3.3596",null,3,"T",487,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3335,487.089]
[4262,{"$raw":"00000000"},21111,"GC.3.3597",null,3,"T",311,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3336,310.679]
[4263,{"$raw":"00000000"},21111,"GC.3.3598",null,3,"T",512,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3337,512.407]
[4264,{"$raw":"00000000"},21111,"GC.3.3599",null,3,"T",240,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3338,240.448]
[4265,{"$raw":"00000000"},21106,"GC.3.3600",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3339,1.417]
[4266,{"$raw":"00000000"},21106,"GC.3.3601",null,3,"T",676,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3340,676.034]
[4267,{"$raw":"00000000"},21111,"GC.3.3602",null,3,"T",152,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3341,152.396]
[4268,{"$raw":"00000000"},0,"GC.3.3603",null,3,"T",26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3342,25.846]
[4269,{"$raw":"00000000"},0,"GC.3.3604",null,3,"T",51,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3343,51.258]
[4272,{"$raw":"00000000"},21111,"GC.3.3607",null,3,"T",535,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3344,534.917]
[4273,{"$raw":"00000000"},21111,"GC.3.3608",null,3,"T",579,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3345,578.592]
[4274,{"$raw":"00000000"},21111,"GC.3.3609",null,3,"T",356,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3346,356.093]
[4275,{"$raw":"00000000"},21106,"GC.3.3610",null,3,"T",311,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3347,310.885]
[4276,{"$raw":"00000000"},21106,"GC.3.3611",null,3,"T",360,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3348,360.138]
[4277,{"$raw":"00000000"},21106,"GC.3.3612",null,3,"T",42,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3349,41.987]
[4278,{"$raw":"00000000"},21111,"GC.3.3613",null,3,"T",269,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3350,268.827]
[4279,{"$raw":"00000000"},21111,"GC.3.3614",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3351,39.504]
[4280,{"$raw":"00000000"},21111,"GC.3.3615",null,3,"T",47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3352,47.045]
[4282,{"$raw":"00000000"},21111,"GC.3.3617",null,3,"T",768,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3353,767.865]
[4283,{"$raw":"00000000"},21111,"GC.3.3618",null,3,"T",592,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3354,592.127]
[4284,{"$raw":"00000000"},21106,"GC.3.3619",null,3,"T",333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3355,332.558]
[4286,{"$raw":"00000000"},21106,"GC.3.3621",null,3,"T",136,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3356,136.064]
[4287,{"$raw":"00000000"},21111,"GC.3.3622",null,3,"T",221,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3357,220.940]
[4288,{"$raw":"00000000"},21111,"GC.3.3623",null,3,"T",65,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3358,64.659]
[4289,{"$raw":"00000000"},21111,"GC.3.3624",null,3,"T",295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3359,295.156]
[4290,{"$raw":"00000000"},21111,"GC.3.3625",null,3,"T",475,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3360,474.697]
[4291,{"$raw":"00000000"},21111,"GC.3.3626",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3361,98.352]
[4292,{"$raw":"00000000"},21111,"GC.3.3627",null,3,"T",213,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3362,212.837]
[4293,{"$raw":"00000000"},21111,"GC.3.3628",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3363,9.649]
[4294,{"$raw":"00000000"},21111,"GC.3.3629",null,3,"T",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3364,304.011]
[4295,{"$raw":"00000000"},21106,"GC.3.3630",null,3,"T",49,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3365,48.699]
[4296,{"$raw":"00000000"},21106,"GC.3.3631",null,3,"T",377,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3366,377.024]
[4297,{"$raw":"00000000"},21106,"GC.3.3632",null,3,"T",650,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3367,650.167]
[4299,{"$raw":"00000000"},21106,"GC.3.3634",null,3,"T",309,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3368,308.585]
[4300,{"$raw":"00000000"},21106,"GC.3.3635",null,3,"T",137,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3369,137.323]
[4301,{"$raw":"00000000"},21106,"GC.3.3636",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3370,296.344]
[4302,{"$raw":"00000000"},21106,"GC.3.3637",null,3,"T",484,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3371,484.271]
[4303,{"$raw":"00000000"},21106,"GC.3.3638",null,3,"T",864,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3372,864.433]
[4304,{"$raw":"00000000"},21106,"GC.3.3639",null,3,"T",362,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3373,361.617]
[4305,{"$raw":"00000000"},21106,"GC.3.3640",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3374,6.186]
[4306,{"$raw":"00000000"},21106,"GC.3.3641",null,3,"T",1100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3375,1100.250]
[4307,{"$raw":"00000000"},21106,"GC.3.3642",null,3,"T",633,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3376,633.378]
[4308,{"$raw":"00000000"},21106,"GC.3.3643",null,3,"T",37,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3377,37.486]
[4309,{"$raw":"00000000"},21106,"GC.3.3644",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3378,8.838]
[4310,{"$raw":"00000000"},21106,"GC.3.3645",null,3,"T",731,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3379,730.927]
[4311,{"$raw":"00000000"},21106,"GC.3.3646",null,3,"T",197,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3380,197.153]
[4312,{"$raw":"00000000"},21106,"GC.3.3647",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3381,62.396]
[4313,{"$raw":"00000000"},21111,"GC.3.3648",null,3,"T",86,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3382,86.335]
[4315,{"$raw":"00000000"},21111,"GC.3.3649",null,3,"T",234,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3383,234.304]
[4316,{"$raw":"00000000"},21111,"GC.3.3650",null,3,"T",289,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3384,289.499]
[4317,{"$raw":"00000000"},21111,"GC.3.3651",null,3,"T",345,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3385,344.734]
[4318,{"$raw":"00000000"},21111,"GC.3.3652",null,3,"T",148,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3386,148.359]
[4319,{"$raw":"00000000"},21111,"GC.3.3653",null,3,null,145,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",3387,144.697]
[4320,{"$raw":"00000000"},21111,"GC.3.3654",null,3,null,689,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",3388,688.767]
[4321,{"$raw":"00000000"},21111,"GC.3.3655",null,3,null,144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",3389,143.963]
[4322,{"$raw":"00000000"},21111,"GC.3.3656",null,3,null,57,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",3390,57.079]
[4323,{"$raw":"00000000"},21111,"GC.3.3657",null,3,null,219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",3391,219.405]
[4325,{"$raw":"00000000"},21111,"GC.3.3658",null,3,"T",836,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3392,835.967]
[4326,{"$raw":"00000000"},21111,"GC.3.3659",null,3,"T",327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3393,327.454]
[4328,{"$raw":"00000000"},21106,"GC.3.3660",null,3,"T",255,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3394,255.014]
[4329,{"$raw":"00000000"},21106,"GC.3.3661",null,3,"T",1205,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3395,1205.430]
[4330,{"$raw":"00000000"},21117,"GC.3.3662",null,3,"T",766,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3396,766.315]
[4332,{"$raw":"00000000"},21117,"GC.3.3663",null,3,"T",1075,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3397,1074.759]
[4333,{"$raw":"00000000"},21117,"GC.3.3664",null,3,"T",473,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3398,473.009]
[4334,{"$raw":"00000000"},21117,"GC.3.3665",null,3,"T",194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3399,193.882]
[4335,{"$raw":"00000000"},21117,"GC.3.3666",null,3,"T",399,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3400,398.611]
[4338,{"$raw":"00000000"},21106,"GC.3.3667",null,3,"T",439,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3401,439.042]
[4341,{"$raw":"00000000"},21106,"GC.3.3668",null,3,"T",157,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3402,157.212]
[4342,{"$raw":"00000000"},21106,"GC.3.3669",null,3,"T",556,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3403,555.633]
[4343,{"$raw":"00000000"},21106,"GC.3.3670",null,3,"T",148,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3404,148.186]
[4347,{"$raw":"00000000"},21106,"GC.3.3674",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3405,78.936]
[4349,{"$raw":"00000000"},21106,"GC.3.3675",null,3,"T",474,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3406,473.919]
[4350,{"$raw":"00000000"},21106,"GC.3.3676",null,3,"T",1401,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3407,1400.740]
[4351,{"$raw":"00000000"},21106,"GC.3.3677",null,3,"T",727,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3408,727.317]
[4353,{"$raw":"00000000"},21106,"GC.3.3678",null,3,"T",280,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3409,279.655]
[4354,{"$raw":"00000000"},21106,"GC.3.3679",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3410,23.566]
[4356,{"$raw":"00000000"},21106,"GC.3.3680",null,3,"T",1490,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3411,1489.924]
[4357,{"$raw":"00000000"},21106,"GC.3.3681",null,3,"T",14,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3412,13.535]
[4360,{"$raw":"00000000"},21117,"GC.3.3683",null,3,"T",904,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3413,903.515]
[4361,{"$raw":"00000000"},21117,"GC.3.3684",null,3,"T",660,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3414,660.340]
[4362,{"$raw":"00000000"},21117,"GC.3.3685",null,3,"T",399,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3415,399.018]
[4363,{"$raw":"00000000"},21117,"GC.3.3686",null,3,"T",1157,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3416,1156.716]
[4365,{"$raw":"00000000"},21117,"GC.3.3687",null,3,"T",379,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3417,379.327]
[4367,{"$raw":"00000000"},21117,"GC.3.3688",null,3,"T",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3418,218.609]
[4371,{"$raw":"00000000"},21117,"GC.3.3689",null,3,"T",2326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3419,2326.106]
[4373,{"$raw":"00000000"},21106,"GC.3.3690",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3420,15.608]
[4374,{"$raw":"00000000"},21106,"GC.3.3691",null,3,"T",728,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3421,728.406]
[4375,{"$raw":"00000000"},21106,"GC.3.3692",null,3,"T",418,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3422,418.017]
[4377,{"$raw":"00000000"},21106,"GC.3.3693",null,3,"T",588,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3423,587.790]
[4378,{"$raw":"00000000"},21106,"GC.3.3694",null,3,"T",58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3424,57.876]
[4379,{"$raw":"00000000"},21106,"GC.3.3695",null,3,"T",145,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3425,145.110]
[4380,{"$raw":"00000000"},21106,"GC.3.3696",null,3,"T",623,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3426,623.000]
[4381,{"$raw":"00000000"},21106,"GC.3.3697",null,3,"T",73,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3427,73.010]
[4382,{"$raw":"00000000"},21106,"GC.3.3698",null,3,"T",211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3428,211.045]
[4383,{"$raw":"00000000"},21106,"GC.3.3699",null,3,"T",659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3429,659.115]
[4384,{"$raw":"00000000"},21106,"GC.3.3700",null,3,"T",217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3430,216.933]
[4385,{"$raw":"00000000"},21106,"GC.3.3701",null,3,"T",225,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3431,225.391]
[4386,{"$raw":"00000000"},21106,"GC.3.3702",null,3,"T",251,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3432,251.172]
[4387,{"$raw":"00000000"},21106,"GC.3.3703",null,3,"T",398,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3433,398.385]
[4388,{"$raw":"00000000"},21106,"GC.3.3704",null,3,"T",218,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3434,218.194]
[4389,{"$raw":"00000000"},21106,"GC.3.3705",null,3,"T",590,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3435,590.320]
[4390,{"$raw":"00000000"},21106,"GC.3.3706",null,3,"T",412,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3436,412.483]
[4391,{"$raw":"00000000"},21106,"GC.3.3707",null,3,"T",86,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3437,86.271]
[4392,{"$raw":"00000000"},21106,"GC.3.3708",null,3,"T",405,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3438,405.087]
[4393,{"$raw":"00000000"},21106,"GC.3.3709",null,3,"T",216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3439,215.596]
[4394,{"$raw":"00000000"},21106,"GC.3.3710",null,3,"T",522,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3440,522.173]
[4395,{"$raw":"00000000"},21106,"GC.3.3711",null,3,"T",482,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3441,481.894]
[4396,{"$raw":"00000000"},21106,"GC.3.3712",null,3,"T",194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3442,194.229]
[4397,{"$raw":"00000000"},21106,"GC.3.3713",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3443,14.798]
[4398,{"$raw":"00000000"},21106,"GC.3.3714",null,3,"T",851,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3444,850.624]
[4399,{"$raw":"00000000"},21106,"GC.3.3715",null,3,"T",904,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3445,903.594]
[4400,{"$raw":"00000000"},21106,"GC.3.3716",null,3,"T",681,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3446,681.488]
[4401,{"$raw":"00000000"},21106,"GC.3.3717",null,3,"T",406,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3447,406.397]
[4404,{"$raw":"00000000"},21106,"GC.3.3718",null,3,"T",275,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3448,274.591]
[4407,{"$raw":"00000000"},21106,"GC.3.3719",null,3,"T",418,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3449,418.397]
[4409,{"$raw":"00000000"},21106,"GC.3.3720",null,3,"T",201,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3450,200.854]
[4410,{"$raw":"00000000"},21106,"GC.3.3721",null,3,"T",682,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3451,681.561]
[4416,{"$raw":"00000000"},21106,"GC.3.3722",null,3,"T",272,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3452,272.211]
[4417,{"$raw":"00000000"},21106,"GC.3.3723",null,3,"T",348,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3453,347.526]
[4418,{"$raw":"00000000"},21106,"GC.3.3724",null,3,"T",668,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3454,667.750]
[4419,{"$raw":"00000000"},21106,"GC.3.3725",null,3,"T",87,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3455,87.070]
[4420,{"$raw":"00000000"},21106,"GC.3.3726",null,3,"T",206,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3456,205.694]
[4421,{"$raw":"00000000"},21106,"GC.3.3727",null,3,"T",639,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3457,639.410]
[4424,{"$raw":"00000000"},21106,"GC.3.3729",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3458,34.247]
[4427,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",3459,23.207]
[4428,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",3460,87.966]
[4429,{"$raw":"00000000"},21106,"GC.3.3732",null,3,null,560,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",3461,559.784]
[4430,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",460,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",3462,460.154]
[4431,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",3463,7.634]
[4432,{"$raw":"00000000"},21106,"GC.3.3735",null,3,"T",764,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3464,763.970]
[4433,{"$raw":"00000000"},21106,"GC.3.3736",null,3,"T",952,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3465,951.602]
[4434,{"$raw":"00000000"},21106,"GC.3.3737",null,3,"T",580,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3466,580.116]
[4435,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",178,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",3467,177.952]
[4436,{"$raw":"00000000"},21106,"GC.3.3739",null,3,"T",58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3468,57.928]
[4437,{"$raw":"00000000"},21106,"GC.3.3740",null,3,"T",355,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3469,355.499]
[4438,{"$raw":"00000000"},21106,"GC.3.3741",null,3,"T",614,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3470,614.079]
[4440,{"$raw":"00000000"},21106,"GC.3.3743",null,3,"T",118,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3471,118.441]
[4441,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",508,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",3472,507.644]
[4442,{"$raw":"00000000"},21106,"GC.3.3745",null,3,"T",1316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3473,1316.175]
[4443,{"$raw":"00000000"},21102,"GC.3.3746",null,3,"T",836,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3474,836.255]
[4444,{"$raw":"00000000"},21102,"GC.3.3747",null,3,"T",1474,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3475,1473.605]
[4445,{"$raw":"00000000"},21106,"GC.3.3748",null,3,"T",251,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3476,251.458]
[4446,{"$raw":"00000000"},21106,"GC.3.3749",null,3,"T",322,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3477,322.224]
[4448,{"$raw":"00000000"},21106,"GC.3.3750",null,3,"T",188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3478,187.577]
[4449,{"$raw":"00000000"},21106,"GC.3.3751",null,3,"T",107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3479,106.587]
[4450,{"$raw":"00000000"},21106,"GC.3.3752",null,3,"T",341,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3480,340.536]
[4451,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",426,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",3481,425.991]
[4452,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",820,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",3482,819.711]
[4453,{"$raw":"00000000"},21106,"GC.3.3755",null,3,"T",409,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3483,408.713]
[4454,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",616,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",3484,616.300]
[4455,{"$raw":"00000000"},21106,"GC.3.3757",null,3,"T",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3485,81.601]
[4456,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",442,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",3486,441.680]
[4457,{"$raw":"00000000"},21106,"GC.3.3759",null,3,"T",396,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3487,396.456]
[4458,{"$raw":"00000000"},21106,"GC.3.3760",null,3,"T",569,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3488,569.089]
[4459,{"$raw":"00000000"},21106,"GC.3.3761",null,3,"T",906,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3489,905.507]
[4460,{"$raw":"00000000"},21106,"GC.3.3762",null,3,"T",1844,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3490,1844.225]
[4461,{"$raw":"00000000"},21106,"GC.3.3763",null,3,"T",502,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3491,502.350]
[4463,{"$raw":"00000000"},21106,"GC.3.3764",null,3,"T",12,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3492,12.398]
[4464,{"$raw":"00000000"},21106,"GC.3.3765",null,3,"T",162,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3493,162.171]
[4466,{"$raw":"00000000"},21106,"GC.3.3766",null,3,"T",138,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3494,138.159]
[4467,{"$raw":"00000000"},21106,"GC.3.3767",null,3,"T",981,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3495,980.602]
[4468,{"$raw":"00000000"},21106,"GC.3.3768",null,3,"T",274,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3496,274.475]
[4469,{"$raw":"00000000"},21106,"GC.3.3769",null,3,"T",365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3497,365.354]
[4470,{"$raw":"00000000"},21106,"GC.3.3770",null,3,"T",178,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3498,178.082]
[4472,{"$raw":"00000000"},21106,"GC.3.3772",null,3,"T",660,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3499,660.121]
[4473,{"$raw":"00000000"},21106,"GC.3.3773",null,3,"T",715,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3500,714.515]
[4476,{"$raw":"00000000"},21106,"GC.3.3776",null,3,"T",412,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3501,412.473]
[4477,{"$raw":"00000000"},21106,"GC.3.3777",null,3,"T",1004,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3502,1003.739]
[4478,{"$raw":"00000000"},21106,"GC.3.3778",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3503,295.718]
[4479,{"$raw":"00000000"},21106,"GC.3.3779",null,3,"T",223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3504,223.355]
[4480,{"$raw":"00000000"},21106,"GC.3.3780",null,3,"T",205,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3505,204.758]
[4481,{"$raw":"00000000"},21106,"GC.3.3781",null,3,"T",239,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3506,238.878]
[4482,{"$raw":"00000000"},21106,"GC.3.3782",null,3,"T",1243,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3507,1243.236]
[4484,{"$raw":"00000000"},21106,"GC.3.3783",null,3,"T",833,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3508,832.768]
[4485,{"$raw":"00000000"},21106,"GC.3.3784",null,3,"T",245,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3509,245.083]
[4486,{"$raw":"00000000"},21106,"GC.3.3785",null,3,"T",2189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3510,2189.442]
[4487,{"$raw":"00000000"},21106,"GC.3.3786",null,3,"T",400,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3511,399.829]
[4488,{"$raw":"00000000"},21106,"GC.3.3787",null,3,"T",1169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3512,1168.970]
[4489,{"$raw":"00000000"},21106,"GC.3.3788",null,3,"T",106,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3513,106.447]
[4490,{"$raw":"00000000"},21106,"GC.3.3789",null,3,"T",167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3514,166.824]
[4491,{"$raw":"00000000"},21120,"GC.3.3790",null,3,"T",602,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3515,602.454]
[4492,{"$raw":"00000000"},21120,"GC.3.3791",null,3,"T",1207,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3516,1206.642]
[4493,{"$raw":"00000000"},21120,"GC.3.3792",null,3,"T",150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3517,150.439]
[4494,{"$raw":"00000000"},21120,"GC.3.3793",null,3,"T",340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3518,340.437]
[4495,{"$raw":"00000000"},21120,"GC.3.3794",null,3,"T",1281,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3519,1280.739]
[4497,{"$raw":"00000000"},21120,"GC.3.3796",null,3,"T",528,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3520,528.047]
[4498,{"$raw":"00000000"},21120,"GC.3.3797",null,3,"T",147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3521,146.813]
[4499,{"$raw":"00000000"},21120,"GC.3.3798",null,3,"T",305,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3522,304.924]
[4500,{"$raw":"00000000"},21120,"GC.3.3799",null,3,"T",499,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3523,498.691]
[4501,{"$raw":"00000000"},21120,"GC.3.3800",null,3,"T",63,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3524,62.791]
[4502,{"$raw":"00000000"},21120,"GC.3.3801",null,3,"T",276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3525,276.375]
[4503,{"$raw":"00000000"},21120,"GC.3.3802",null,3,"T",1542,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3526,1541.963]
[4504,{"$raw":"00000000"},21120,"GC.3.3803",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3527,91.638]
[4505,{"$raw":"00000000"},21120,"GC.3.3804",null,3,"T",267,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3528,267.105]
[4506,{"$raw":"00000000"},21120,"GC.3.3805",null,3,"T",336,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3529,335.710]
[4507,{"$raw":"00000000"},21120,"GC.3.3806",null,3,"T",662,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3530,661.802]
[4508,{"$raw":"00000000"},21120,"GC.3.3807",null,3,"T",1027,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3531,1027.369]
[4509,{"$raw":"00000000"},21106,"GC.3.3808",null,3,"T",609,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3532,608.739]
[4510,{"$raw":"00000000"},21106,"GC.3.3809",null,3,"T",695,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3533,694.847]
[4511,{"$raw":"00000000"},21106,"GC.3.3810",null,3,"T",492,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3534,492.323]
[4512,{"$raw":"00000000"},21106,"GC.3.3811",null,3,"T",452,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3535,451.731]
[4513,{"$raw":"00000000"},21106,"GC.3.3812",null,3,"T",642,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3536,641.817]
[4514,{"$raw":"00000000"},21106,"GC.3.3813",null,3,"T",795,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3537,795.295]
[4515,{"$raw":"00000000"},21106,"GC.3.3814",null,3,"T",356,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3538,355.836]
[4516,{"$raw":"00000000"},21106,"GC.3.3815",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3539,144.456]
[4518,{"$raw":"00000000"},21106,"GC.3.3816",null,3,"T",1191,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3540,1190.716]
[4519,{"$raw":"00000000"},21106,"GC.3.3817",null,3,"T",235,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3541,234.798]
[4520,{"$raw":"00000000"},21106,"GC.3.3818",null,3,"T",384,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3542,383.664]
[4521,{"$raw":"00000000"},21106,"GC.3.3819",null,3,"T",148,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3543,148.110]
[4522,{"$raw":"00000000"},21106,"GC.3.3820",null,3,"T",244,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3544,244.391]
[4523,{"$raw":"00000000"},21106,"GC.3.3821",null,3,"T",448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3545,448.298]
[4524,{"$raw":"00000000"},21118,"GC.3.3822",null,3,"T",250,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3546,249.969]
[4525,{"$raw":"00000000"},21118,"GC.3.3823",null,3,"T",216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3547,216.371]
[4527,{"$raw":"00000000"},21118,"GC.3.3824",null,3,"T",982,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3548,981.741]
[4530,{"$raw":"00000000"},21102,"GC.3.3826",null,3,"T",1843,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3549,1843.371]
[4532,{"$raw":"00000000"},21102,"GC.3.3828",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3550,24.177]
[4533,{"$raw":"00000000"},21102,"GC.3.3829",null,3,"T",945,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3551,945.451]
[4534,{"$raw":"00000000"},21102,"GC.3.3830",null,3,"T",224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3552,224.174]
[4535,{"$raw":"00000000"},21102,"GC.3.3831",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3553,4.132]
[4536,{"$raw":"00000000"},21102,"GC.3.3832",null,3,"T",260,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3554,260.079]
[4538,{"$raw":"00000000"},21102,"GC.3.3833",null,3,"T",1220,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3555,1220.410]
[4539,{"$raw":"00000000"},21102,"GC.3.3834",null,3,"T",309,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3556,308.746]
[4540,{"$raw":"00000000"},21102,"GC.3.3835",null,3,"T",1895,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3557,1895.075]
[4541,{"$raw":"00000000"},21102,"GC.3.3836",null,3,"T",163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3558,162.876]
[4542,{"$raw":"00000000"},21102,"GC.3.3837",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3559,189.245]
[4543,{"$raw":"00000000"},21102,"GC.3.3838",null,3,"T",630,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3560,629.734]
[4544,{"$raw":"00000000"},21102,"GC.3.3839",null,3,"T",420,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3561,419.706]
[4545,{"$raw":"00000000"},21102,"GC.3.3840",null,3,"T",785,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3562,785.322]
[4546,{"$raw":"00000000"},21102,"GC.3.3841",null,3,"T",620,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3563,620.143]
[4547,{"$raw":"00000000"},21102,"GC.3.3842",null,3,"T",610,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3564,609.899]
[4548,{"$raw":"00000000"},21102,"GC.3.3843",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3565,62.053]
[4549,{"$raw":"00000000"},21102,"GC.3.3844",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3566,3.946]
[4551,{"$raw":"00000000"},21102,"GC.3.3845",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3567,4.753]
[4554,{"$raw":"00000000"},21102,"GC.3.3846",null,3,"T",772,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3568,772.099]
[4556,{"$raw":"00000000"},21102,"GC.3.3847",null,3,"T",1009,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3569,1008.639]
[4559,{"$raw":"00000000"},21120,"GC.3.3849",null,3,"T",360,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3570,359.698]
[4560,{"$raw":"00000000"},21102,"GC.3.3850",null,3,"T",939,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3571,938.728]
[4561,{"$raw":"00000000"},21102,"GC.3.3851",null,3,"T",43,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3572,43.250]
[4562,{"$raw":"00000000"},21102,"GC.3.3852",null,3,"T",1205,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3573,1205.448]
[4563,{"$raw":"00000000"},21102,"GC.3.3853",null,3,"T",524,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3574,524.410]
[4564,{"$raw":"00000000"},21102,"GC.3.3854",null,3,"T",2281,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3575,2281.111]
[4565,{"$raw":"00000000"},21102,"GC.3.3855",null,3,"T",419,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3576,419.351]
[4566,{"$raw":"00000000"},21102,"GC.3.3856",null,3,"T",233,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3577,233.090]
[4567,{"$raw":"00000000"},21102,"GC.3.3857",null,3,"T",930,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3578,929.540]
[4568,{"$raw":"00000000"},21102,"GC.3.3858",null,3,"T",209,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3579,208.945]
[4569,{"$raw":"00000000"},21102,"GC.3.3859",null,3,"T",226,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3580,225.582]
[4570,{"$raw":"00000000"},21102,"GC.3.3860",null,3,"T",1018,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3581,1017.819]
[4573,{"$raw":"00000000"},21118,"GC.3.3861",null,3,"T",247,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3582,246.920]
[4574,{"$raw":"00000000"},21118,"GC.3.3862",null,3,"T",340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3583,340.375]
[4576,{"$raw":"00000000"},21118,"GC.3.3863",null,3,"T",254,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3584,254.318]
[4577,{"$raw":"00000000"},21118,"GC.3.3864",null,3,"T",354,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3585,354.401]
[4578,{"$raw":"00000000"},21118,"GC.3.3865",null,3,"T",1333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3586,1333.096]
[4579,{"$raw":"00000000"},21118,"GC.3.3866",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3587,33.876]
[4580,{"$raw":"00000000"},21118,"GC.3.3867",null,3,"T",1835,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3588,1835.302]
[4581,{"$raw":"00000000"},21118,"GC.3.3868",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3589,4.113]
[4582,{"$raw":"00000000"},21118,"GC.3.3869",null,3,"T",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3590,369.898]
[4584,{"$raw":"00000000"},21118,"GC.3.3870",null,3,"T",480,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3591,479.871]
[4586,{"$raw":"00000000"},21122,"GC.3.3872",null,3,"T",898,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3592,897.715]
[4587,{"$raw":"00000000"},21122,"GC.3.3873",null,3,"T",378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3593,377.514]
[4588,{"$raw":"00000000"},21122,"GC.3.3874",null,3,"T",620,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3594,620.350]
[4589,{"$raw":"00000000"},21122,"GC.3.3875",null,3,"T",497,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3595,496.837]
[4590,{"$raw":"00000000"},21122,"GC.3.3876",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3596,296.164]
[4591,{"$raw":"00000000"},21122,"GC.3.3877",null,3,"T",285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3597,285.385]
[4592,{"$raw":"00000000"},21122,"GC.3.3878",null,3,"T",187,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3598,187.143]
[4593,{"$raw":"00000000"},21122,"GC.3.3879",null,3,"T",585,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3599,585.289]
[4594,{"$raw":"00000000"},21122,"GC.3.3880",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3600,39.690]
[4595,{"$raw":"00000000"},21122,"GC.3.3881",null,3,"T",287,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3601,286.614]
[4596,{"$raw":"00000000"},21122,"GC.3.3882",null,3,"T",116,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3602,116.248]
[4597,{"$raw":"00000000"},21122,"GC.3.3883",null,3,"T",1047,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3603,1047.426]
[4598,{"$raw":"00000000"},21122,"GC.3.3884",null,3,"T",31,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3604,30.825]
[4600,{"$raw":"00000000"},21122,"GC.3.3886",null,3,"T",25,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3605,24.865]
[4601,{"$raw":"00000000"},21122,"GC.3.3887",null,3,"T",306,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3606,306.162]
[4602,{"$raw":"00000000"},21122,"GC.3.3888",null,3,"T",1423,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3607,1423.314]
[4603,{"$raw":"00000000"},21122,"GC.3.3889",null,3,"T",697,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3608,696.560]
[4605,{"$raw":"00000000"},21122,"GC.3.3890",null,3,"T",350,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3609,350.446]
[4606,{"$raw":"00000000"},21122,"GC.3.3891",null,3,"T",458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3610,457.854]
[4607,{"$raw":"00000000"},21122,"GC.3.3892",null,3,"T",286,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3611,286.218]
[4608,{"$raw":"00000000"},21122,"GC.3.3893",null,3,"T",1403,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3612,1403.263]
[4610,{"$raw":"00000000"},21122,"GC.3.3894",null,3,"T",137,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3613,137.259]
[4611,{"$raw":"00000000"},21122,"GC.3.3895",null,3,"T",69,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3614,69.380]
[4612,{"$raw":"00000000"},21122,"GC.3.3896",null,3,"T",496,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3615,495.614]
[4613,{"$raw":"00000000"},21122,"GC.3.3897",null,3,"T",663,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3616,662.938]
[4614,{"$raw":"00000000"},21122,"GC.3.3898",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3617,27.795]
[4615,{"$raw":"00000000"},21122,"GC.3.3899",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3618,339.136]
[4616,{"$raw":"00000000"},21122,"GC.3.3900",null,3,"T",26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3619,26.067]
[4617,{"$raw":"00000000"},21122,"GC.3.3901",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3620,143.713]
[4619,{"$raw":"00000000"},21122,"GC.3.3902",null,3,null,4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",3621,3.873]
[4620,{"$raw":"00000000"},21122,"GC.3.3903",null,3,null,529,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",3622,528.668]
[4621,{"$raw":"00000000"},21122,"GC.3.3904",null,3,"T",649,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3623,648.875]
[4622,{"$raw":"00000000"},21122,"GC.3.3905",null,3,null,396,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",3624,395.859]
[4623,{"$raw":"00000000"},21122,"GC.3.3906",null,3,"T",269,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3625,269.197]
[4624,{"$raw":"00000000"},21122,"GC.3.3907",null,3,"T",276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3626,276.120]
[4625,{"$raw":"00000000"},21122,"GC.3.3908",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3627,0.561]
[4626,{"$raw":"00000000"},21122,"GC.3.3909",null,3,"T",646,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3628,645.682]
[4627,{"$raw":"00000000"},21122,"GC.3.3910",null,3,"T",478,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3629,478.267]
[4631,{"$raw":"00000000"},21122,"GC.3.3913",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3630,0.280]
[4632,{"$raw":"00000000"},0,"GC.3.3914",null,3,"T",44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3631,44.199]
[4634,{"$raw":"00000000"},21122,"GC.3.3916",null,3,"T",660,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3632,659.993]
[4635,{"$raw":"00000000"},21122,"GC.3.3917",null,3,"T",1271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3633,1270.644]
[4636,{"$raw":"00000000"},21122,"GC.3.3918",null,3,"T",300,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3634,299.582]
[4639,{"$raw":"00000000"},21122,"GC.3.3920",null,3,"T",376,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3635,375.772]
[4643,{"$raw":"00000000"},21122,"GC.3.3923",null,3,"T",795,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3636,795.494]
[4644,{"$raw":"00000000"},21122,"GC.3.3924",null,3,"T",436,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3637,436.495]
[4645,{"$raw":"00000000"},21122,"GC.3.3925",null,3,"T",860,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3638,859.919]
[4646,{"$raw":"00000000"},21122,"GC.3.3926",null,3,"T",340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3639,340.433]
[4649,{"$raw":"00000000"},21122,"GC.3.3927",null,3,"T",378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3640,378.204]
[4650,{"$raw":"00000000"},21122,"GC.3.3928",null,3,"T",843,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3641,842.506]
[4651,{"$raw":"00000000"},21122,"GC.3.3929",null,3,"T",419,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3642,419.200]
[4652,{"$raw":"00000000"},21122,"GC.3.3930",null,3,"T",119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3643,118.958]
[4654,{"$raw":"00000000"},21122,"GC.3.3931",null,3,"T",933,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3644,933.229]
[4657,{"$raw":"00000000"},21122,"GC.3.3932",null,3,"T",595,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3645,595.152]
[4658,{"$raw":"00000000"},21122,"GC.3.3933",null,3,"T",751,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3646,751.460]
[4660,{"$raw":"00000000"},21122,"GC.3.3934",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3647,10.760]
[4662,{"$raw":"00000000"},21122,"GC.3.3935",null,3,"T",216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3648,216.151]
[4663,{"$raw":"00000000"},21122,"GC.3.3936",null,3,"T",241,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3649,240.537]
[4664,{"$raw":"00000000"},21122,"GC.3.3937",null,3,"T",722,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3650,722.126]
[4665,{"$raw":"00000000"},21122,"GC.3.3938",null,3,"T",862,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3651,862.140]
[4666,{"$raw":"00000000"},21122,"GC.3.3939",null,3,"T",236,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3652,235.819]
[4667,{"$raw":"00000000"},21122,"GC.3.3940",null,3,"T",52,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3653,51.598]
[4668,{"$raw":"00000000"},21122,"GC.3.3941",null,3,"T",200,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3654,199.895]
[4669,{"$raw":"00000000"},21122,"GC.3.3942",null,3,"T",128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3655,128.204]
[4670,{"$raw":"00000000"},21122,"GC.3.3943",null,3,"T",203,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3656,202.788]
[4671,{"$raw":"00000000"},21122,"GC.3.3944",null,3,"T",63,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3657,63.164]
[4672,{"$raw":"00000000"},21122,"GC.3.3945",null,3,"T",295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3658,295.149]
[4673,{"$raw":"00000000"},21122,"GC.3.3946",null,3,"T",239,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3659,239.454]
[4674,{"$raw":"00000000"},21122,"GC.3.3947",null,3,"T",387,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3660,386.904]
[4675,{"$raw":"00000000"},21122,"GC.3.3948",null,3,"T",895,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3661,895.217]
[4676,{"$raw":"00000000"},21122,"GC.3.3949",null,3,"T",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3662,248.104]
[4679,{"$raw":"00000000"},21122,"GC.3.3950",null,3,"T",297,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3663,297.208]
[4680,{"$raw":"00000000"},21122,"GC.3.3951",null,3,"T",1262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3664,1262.459]
[4681,{"$raw":"00000000"},21122,"GC.3.3952",null,3,"T",86,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3665,85.714]
[4684,{"$raw":"00000000"},21122,"GC.3.3954",null,3,"T",218,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3666,218.054]
[4685,{"$raw":"00000000"},21122,"GC.3.3955",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3667,62.262]
[4686,{"$raw":"00000000"},21122,"GC.3.3956",null,3,"T",410,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3668,409.523]
[4687,{"$raw":"00000000"},21122,"GC.3.3957",null,3,"T",920,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3669,919.615]
[4688,{"$raw":"00000000"},21122,"GC.3.3958",null,3,"T",399,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3670,399.413]
[4690,{"$raw":"00000000"},21122,"GC.3.3959",null,3,null,103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",3671,103.046]
[4691,{"$raw":"00000000"},21122,"GC.3.3960",null,3,"T",1391,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3672,1391.419]
[4692,{"$raw":"00000000"},21122,"GC.3.3961",null,3,"T",434,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3673,434.009]
[4693,{"$raw":"00000000"},21122,"GC.3.3962",null,3,"T",1387,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3674,1386.773]
[4694,{"$raw":"00000000"},21122,"GC.3.3963",null,3,"T",632,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3675,631.827]
[4695,{"$raw":"00000000"},21122,"GC.3.3964",null,3,null,116,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",3676,116.209]
[4699,{"$raw":"00000000"},21122,"GC.3.3968",null,3,"T",515,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3677,514.774]
[4702,{"$raw":"00000000"},21118,"GC.3.3970",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3678,0.257]
[4703,{"$raw":"00000000"},21118,"GC.3.3971",null,3,"T",1009,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3679,1009.350]
[4704,{"$raw":"00000000"},21118,"GC.3.3972",null,3,"T",1278,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3680,1278.445]
[4705,{"$raw":"00000000"},21118,"GC.3.3973",null,3,"T",540,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3681,540.207]
[4709,{"$raw":"00000000"},21118,"GC.3.3976",null,3,"T",417,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3682,417.162]
[4710,{"$raw":"00000000"},21118,"GC.3.3977",null,3,"T",511,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3683,510.779]
[4711,{"$raw":"00000000"},21118,"GC.3.3978",null,3,"T",548,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3684,548.147]
[4712,{"$raw":"00000000"},21118,"GC.3.3979",null,3,"T",134,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3685,134.166]
[4714,{"$raw":"00000000"},21118,"GC.3.3980",null,3,"T",1432,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3686,1432.452]
[4716,{"$raw":"00000000"},21118,"GC.3.3981",null,3,"T",635,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3687,635.156]
[4717,{"$raw":"00000000"},21118,"GC.3.3982",null,3,"T",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3688,95.386]
[4718,{"$raw":"00000000"},21118,"GC.3.3983",null,3,"T",715,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3689,715.454]
[4719,{"$raw":"00000000"},21118,"GC.3.3984",null,3,"T",613,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3690,613.304]
[4720,{"$raw":"00000000"},21118,"GC.3.3985",null,3,"T",141,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3691,140.934]
[4721,{"$raw":"00000000"},21102,"GC.3.3986",null,3,"T",512,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3692,512.238]
[4722,{"$raw":"00000000"},21102,"GC.3.3987",null,3,"T",73,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3693,73.326]
[4723,{"$raw":"00000000"},21102,"GC.3.3988",null,3,"T",997,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3694,997.481]
[4724,{"$raw":"00000000"},21102,"GC.3.3989",null,3,"T",838,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3695,837.651]
[4725,{"$raw":"00000000"},21122,"GC.3.3990",null,3,"T",217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3696,216.695]
[4726,{"$raw":"00000000"},21122,"GC.3.3991",null,3,"T",398,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3697,397.635]
[4729,{"$raw":"00000000"},21122,"GC.3.3993",null,3,"T",538,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3698,537.932]
[4731,{"$raw":"00000000"},21122,"GC.3.3995",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3699,9.792]
[4732,{"$raw":"00000000"},21122,"GC.3.3996",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3700,20.193]
[4734,{"$raw":"00000000"},21122,"GC.3.3997",null,3,"T",830,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3701,830.278]
[4736,{"$raw":"00000000"},21118,"GC.3.3998",null,3,"T",771,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3702,770.781]
[4737,{"$raw":"00000000"},21122,"GC.3.3999",null,3,"T",845,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3703,845.124]
[4738,{"$raw":"00000000"},21118,"GC.3.4000",null,3,"T",494,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3704,493.718]
[4739,{"$raw":"00000000"},21118,"GC.3.4001",null,3,"T",186,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3705,186.107]
[4740,{"$raw":"00000000"},21118,"GC.3.4002",null,3,"T",319,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3706,318.901]
[4741,{"$raw":"00000000"},21118,"GC.3.4003",null,3,"T",733,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3707,733.193]
[4742,{"$raw":"00000000"},21118,"GC.3.4004",null,3,"T",403,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3708,403.073]
[4743,{"$raw":"00000000"},21118,"GC.3.4005",null,3,"T",345,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3709,345.269]
[4745,{"$raw":"00000000"},21102,"GC.3.4007",null,3,"T",191,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3710,190.828]
[4746,{"$raw":"00000000"},21102,"GC.3.4008",null,3,"T",452,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3711,451.701]
[4747,{"$raw":"00000000"},21102,"GC.3.4009",null,3,"T",496,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3712,496.299]
[4748,{"$raw":"00000000"},21102,"GC.3.4010",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3713,40.054]
[4749,{"$raw":"00000000"},21102,"GC.3.4011",null,3,"T",284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3714,283.846]
[4750,{"$raw":"00000000"},21102,"GC.3.4012",null,3,"T",274,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3715,274.331]
[4751,{"$raw":"00000000"},21102,"GC.3.4013",null,3,"T",1005,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3716,1004.762]
[4752,{"$raw":"00000000"},21102,"GC.3.4014",null,3,"T",190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3717,190.044]
[4753,{"$raw":"00000000"},21102,"GC.3.4015",null,3,"T",124,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3718,123.943]
[4754,{"$raw":"00000000"},21102,"GC.3.4016",null,3,"T",439,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3719,439.244]
[4755,{"$raw":"00000000"},21102,"GC.3.4017",null,3,"T",269,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3720,268.734]
[4756,{"$raw":"00000000"},21102,"GC.3.4018",null,3,"T",1032,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3721,1032.239]
[4757,{"$raw":"00000000"},21102,"GC.3.4019",null,3,"T",393,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3722,393.299]
[4758,{"$raw":"00000000"},21102,"GC.3.4020",null,3,"T",641,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3723,640.612]
[4759,{"$raw":"00000000"},21102,"GC.3.4021",null,3,"T",548,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3724,548.047]
[4761,{"$raw":"00000000"},21102,"GC.3.4022",null,3,"T",826,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3725,826.063]
[4763,{"$raw":"00000000"},21102,"GC.3.4023",null,3,"T",543,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3726,542.516]
[4765,{"$raw":"00000000"},21118,"GC.3.4024",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3727,144.208]
[4767,{"$raw":"00000000"},21118,"GC.3.4026",null,3,"T",1419,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3728,1419.219]
[4768,{"$raw":"00000000"},21122,"GC.3.4027",null,3,"T",551,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3729,550.504]
[4769,{"$raw":"00000000"},21122,"GC.3.4028",null,3,"T",1091,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",3730,1090.795]
[4770,{"$raw":"00000000"},21118,"GC.3.4029",null,3,"T",710,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3731,709.978]
[4772,{"$raw":"00000000"},21118,"GC.3.4031",null,3,"T",1396,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3732,1396.176]
[4773,{"$raw":"00000000"},21118,"GC.3.4032",null,3,"T",61,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3733,60.713]
[4775,{"$raw":"00000000"},21118,"GC.3.4033",null,3,"T",864,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3734,864.449]
[4776,{"$raw":"00000000"},21118,"GC.3.4034",null,3,"T",1032,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3735,1032.147]
[4777,{"$raw":"00000000"},21118,"GC.3.4035",null,3,"T",626,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3736,626.444]
[4778,{"$raw":"00000000"},21118,"GC.3.4036",null,3,"T",418,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3737,418.387]
[4779,{"$raw":"00000000"},21102,"GC.3.4037",null,3,"T",960,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3738,960.129]
[4780,{"$raw":"00000000"},21102,"GC.3.4038",null,3,"T",184,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3739,183.873]
[4781,{"$raw":"00000000"},21118,"GC.3.4039",null,3,"T",225,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3740,225.429]
[4782,{"$raw":"00000000"},21118,"GC.3.4040",null,3,"T",686,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3741,686.324]
[4783,{"$raw":"00000000"},21118,"GC.3.4041",null,3,"T",393,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3742,393.304]
[4784,{"$raw":"00000000"},21118,"GC.3.4042",null,3,"T",1035,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3743,1035.117]
[4785,{"$raw":"00000000"},21118,"GC.3.4043",null,3,"T",458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3744,458.471]
[4786,{"$raw":"00000000"},21118,"GC.3.4044",null,3,"T",1373,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3745,1373.390]
[4787,{"$raw":"00000000"},21118,"GC.3.4045",null,3,"T",895,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3746,894.717]
[4788,{"$raw":"00000000"},21118,"GC.3.4046",null,3,"T",281,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3747,281.489]
[4790,{"$raw":"00000000"},21118,"GC.3.4047",null,3,"T",593,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3748,592.615]
[4791,{"$raw":"00000000"},21118,"GC.3.4048",null,3,"T",125,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3749,124.532]
[4792,{"$raw":"00000000"},21118,"GC.3.4049",null,3,"T",1057,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3750,1056.837]
[4793,{"$raw":"00000000"},21118,"GC.3.4050",null,3,"T",255,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3751,254.619]
[4794,{"$raw":"00000000"},21118,"GC.3.4051",null,3,"T",2040,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3752,2040.120]
[4795,{"$raw":"00000000"},21118,"GC.3.4052",null,3,"T",1006,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3753,1006.320]
[4796,{"$raw":"00000000"},21118,"GC.3.4053",null,3,"T",526,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3754,525.501]
[4797,{"$raw":"00000000"},21102,"GC.3.4054",null,3,"T",490,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3755,489.686]
[4801,{"$raw":"00000000"},21102,"GC.3.4056",null,3,"T",433,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3756,433.363]
[4802,{"$raw":"00000000"},21102,"GC.3.4057",null,3,"T",367,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3757,367.148]
[4803,{"$raw":"00000000"},21102,"GC.3.4058",null,3,"T",397,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3758,397.363]
[4804,{"$raw":"00000000"},21102,"GC.3.4059",null,3,"T",230,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3759,230.081]
[4805,{"$raw":"00000000"},21102,"GC.3.4060",null,3,"T",551,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3760,550.537]
[4806,{"$raw":"00000000"},21102,"GC.3.4061",null,3,"T",986,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3761,985.602]
[4807,{"$raw":"00000000"},21102,"GC.3.4062",null,3,"T",1383,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3762,1383.333]
[4809,{"$raw":"00000000"},21102,"GC.3.4063",null,3,"T",58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3763,58.432]
[4810,{"$raw":"00000000"},21102,"GC.3.4064",null,3,"T",888,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3764,888.262]
[4811,{"$raw":"00000000"},21102,"GC.3.4065",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3765,143.512]
[4812,{"$raw":"00000000"},21102,"GC.3.4066",null,3,"T",449,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3766,449.426]
[4813,{"$raw":"00000000"},21102,"GC.3.4067",null,3,"T",280,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3767,279.995]
[4814,{"$raw":"00000000"},21102,"GC.3.4068",null,3,"T",341,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3768,341.152]
[4815,{"$raw":"00000000"},21102,"GC.3.4069",null,3,"T",848,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3769,847.699]
[4817,{"$raw":"00000000"},21102,"GC.3.4070",null,3,"T",491,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3770,490.524]
[4818,{"$raw":"00000000"},21102,"GC.3.4071",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3771,14.539]
[4822,{"$raw":"00000000"},21106,"GC.3.4072",null,3,"T",382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3772,381.768]
[4823,{"$raw":"00000000"},21102,"GC.3.4073",null,3,"T",508,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3773,508.489]
[4824,{"$raw":"00000000"},21102,"GC.3.4074",null,3,"T",374,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3774,373.529]
[4825,{"$raw":"00000000"},21102,"GC.3.4075",null,3,"T",325,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3775,325.376]
[4829,{"$raw":"00000000"},21102,"GC.3.4076",null,3,"T",287,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3776,287.004]
[4831,{"$raw":"00000000"},21102,"GC.3.4077",null,3,"T",181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3777,181.348]
[4832,{"$raw":"00000000"},21102,"GC.3.4078",null,3,"T",81,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3778,80.727]
[4834,{"$raw":"00000000"},21102,"GC.3.4079",null,3,"T",187,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3779,186.849]
[4835,{"$raw":"00000000"},21102,"GC.3.4080",null,3,"T",374,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3780,373.609]
[4836,{"$raw":"00000000"},21102,"GC.3.4081",null,3,"T",204,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3781,203.840]
[4837,{"$raw":"00000000"},21102,"GC.3.4082",null,3,"T",371,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3782,370.958]
[4838,{"$raw":"00000000"},21102,"GC.3.4083",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3783,144.320]
[4841,{"$raw":"00000000"},21102,"GC.3.4084",null,3,"T",26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3784,25.544]
[4842,{"$raw":"00000000"},21102,"GC.3.4085",null,3,"T",405,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3785,405.304]
[4843,{"$raw":"00000000"},21102,"GC.3.4086",null,3,"T",543,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3786,543.135]
[4845,{"$raw":"00000000"},21102,"GC.3.4087",null,3,"T",409,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3787,409.424]
[4846,{"$raw":"00000000"},21102,"GC.3.4088",null,3,"T",230,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3788,229.879]
[4847,{"$raw":"00000000"},21102,"GC.3.4089",null,3,"T",690,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3789,689.971]
[4848,{"$raw":"00000000"},21102,"GC.3.4090",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3790,5.554]
[4849,{"$raw":"00000000"},21102,"GC.3.4091",null,3,"T",1053,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3791,1053.149]
[4852,{"$raw":"00000000"},21107,"GC.3.4094",null,3,"T",161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3792,161.316]
[4853,{"$raw":"00000000"},21107,"GC.3.4095",null,3,"T",359,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3793,359.468]
[4854,{"$raw":"00000000"},21107,"GC.3.4096",null,3,"T",654,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3794,653.774]
[4855,{"$raw":"00000000"},21107,"GC.3.4097",null,3,"T",117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3795,116.634]
[4857,{"$raw":"00000000"},21107,"GC.3.4098",null,3,"T",1173,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3796,1172.537]
[4858,{"$raw":"00000000"},21107,"GC.3.4099",null,3,"T",783,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3797,783.017]
[4859,{"$raw":"00000000"},21107,"GC.3.4100",null,3,"T",627,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3798,627.442]
[4860,{"$raw":"00000000"},21107,"GC.3.4101",null,3,"T",631,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3799,630.965]
[4861,{"$raw":"00000000"},21107,"GC.3.4102",null,3,"T",996,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3800,995.986]
[4863,{"$raw":"00000000"},21107,"GC.3.4103",null,3,"T",1573,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3801,1572.811]
[4865,{"$raw":"00000000"},21107,"GC.3.4105",null,3,"T",135,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3802,134.538]
[4867,{"$raw":"00000000"},21102,"GC.3.4106",null,3,"T",1344,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3803,1343.627]
[4868,{"$raw":"00000000"},21102,"GC.3.4107",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3804,249.483]
[4869,{"$raw":"00000000"},21102,"GC.3.4108",null,3,"T",389,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3805,388.815]
[4870,{"$raw":"00000000"},21102,"GC.3.4109",null,3,"T",46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3806,46.435]
[4871,{"$raw":"00000000"},21102,"GC.3.4110",null,3,"T",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3807,333.635]
[4874,{"$raw":"00000000"},21102,"GC.3.4111",null,3,"T",629,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3808,628.941]
[4876,{"$raw":"00000000"},21107,"GC.3.4112",null,3,"T",1145,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3809,1145.258]
[4880,{"$raw":"00000000"},21107,"GC.3.4116",null,3,"T",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3810,22.780]
[4881,{"$raw":"00000000"},21107,"GC.3.4117",null,3,"T",485,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3811,484.528]
[4882,{"$raw":"00000000"},21107,"GC.3.4118",null,3,"T",1551,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3812,1551.266]
[4883,{"$raw":"00000000"},21107,"GC.3.4119",null,3,"T",353,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3813,352.873]
[4884,{"$raw":"00000000"},21107,"GC.3.4120",null,3,"T",94,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3814,94.062]
[4886,{"$raw":"00000000"},21107,"GC.3.4121",null,3,"T",1208,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3815,1208.416]
[4888,{"$raw":"00000000"},21107,"GC.3.4122",null,3,"T",903,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3816,902.622]
[4889,{"$raw":"00000000"},21107,"GC.3.4123",null,3,"T",1222,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3817,1222.137]
[4890,{"$raw":"00000000"},21107,"GC.3.4124",null,3,"T",821,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3818,821.457]
[4891,{"$raw":"00000000"},21107,"GC.3.4125",null,3,"T",535,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3819,534.609]
[4892,{"$raw":"00000000"},21107,"GC.3.4126",null,3,"T",1072,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3820,1071.591]
[4893,{"$raw":"00000000"},21107,"GC.3.4127",null,3,"T",682,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3821,682.242]
[4894,{"$raw":"00000000"},21107,"GC.3.4128",null,3,"T",83,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3822,83.012]
[4895,{"$raw":"00000000"},21107,"GC.3.4129",null,3,"T",373,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3823,372.629]
[4896,{"$raw":"00000000"},21107,"GC.3.4130",null,3,"T",597,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3824,597.482]
[4897,{"$raw":"00000000"},21107,"GC.3.4131",null,3,"T",390,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3825,389.797]
[4899,{"$raw":"00000000"},21107,"GC.3.4132",null,3,"T",36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3826,36.265]
[4905,{"$raw":"00000000"},21107,"GC.3.4136",null,3,"T",429,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3827,428.746]
[4906,{"$raw":"00000000"},21107,"GC.3.4137",null,3,"T",321,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3828,320.889]
[4908,{"$raw":"00000000"},21107,"GC.3.4138",null,3,"T",904,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3829,904.198]
[4910,{"$raw":"00000000"},21107,"GC.3.4139",null,3,"T",816,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3830,815.797]
[4911,{"$raw":"00000000"},21107,"GC.3.4140",null,3,"T",242,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3831,241.613]
[4912,{"$raw":"00000000"},21107,"GC.3.4141",null,3,"T",1108,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3832,1108.315]
[4913,{"$raw":"00000000"},21107,"GC.3.4142",null,3,"T",407,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3833,407.278]
[4915,{"$raw":"00000000"},21115,"GC.3.4143",null,3,"T",154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3834,154.002]
[4917,{"$raw":"00000000"},21107,"GC.3.4145",null,3,"T",551,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3835,550.514]
[4918,{"$raw":"00000000"},21119,"GC.3.4146",null,3,"T",1260,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3836,1259.868]
[4919,{"$raw":"00000000"},21119,"GC.3.4147",null,3,"T",1510,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3837,1509.702]
[4920,{"$raw":"00000000"},21119,"GC.3.4148",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3838,61.636]
[4921,{"$raw":"00000000"},21119,"GC.3.4149",null,3,"T",518,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3839,518.205]
[4922,{"$raw":"00000000"},21119,"GC.3.4150",null,3,"T",2181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3840,2180.962]
[4923,{"$raw":"00000000"},21119,"GC.3.4151",null,3,"T",968,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3841,968.101]
[4924,{"$raw":"00000000"},21119,"GC.3.4152",null,3,"T",666,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3842,666.098]
[4925,{"$raw":"00000000"},21119,"GC.3.4153",null,3,"T",1930,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3843,1930.469]
[4926,{"$raw":"00000000"},21119,"GC.3.4154",null,3,"T",695,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3844,695.073]
[4928,{"$raw":"00000000"},21119,"GC.3.4156",null,3,"T",916,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3845,915.813]
[4929,{"$raw":"00000000"},21119,"GC.3.4157",null,3,"T",1842,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3846,1841.915]
[4932,{"$raw":"00000000"},0,"GC.3.4160",null,3,"T",33,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3847,33.408]
[4933,{"$raw":"00000000"},21103,"GC.3.4161",null,3,"T",351,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3848,351.342]
[4934,{"$raw":"00000000"},21103,"GC.3.4162",null,3,"T",81,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3849,80.731]
[4935,{"$raw":"00000000"},21103,"GC.3.4163",null,3,"T",422,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3850,421.675]
[4940,{"$raw":"00000000"},21103,"GC.3.4166",null,3,"T",309,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3851,308.623]
[4942,{"$raw":"00000000"},21119,"GC.3.4168",null,3,"T",918,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3852,918.003]
[4943,{"$raw":"00000000"},21119,"GC.3.4169",null,3,"T",406,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3853,406.045]
[4944,{"$raw":"00000000"},21119,"GC.3.4170",null,3,"T",149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3854,149.013]
[4945,{"$raw":"00000000"},21119,"GC.3.4171",null,3,"T",632,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3855,632.309]
[4946,{"$raw":"00000000"},21119,"GC.3.4172",null,3,"T",623,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3856,623.050]
[4947,{"$raw":"00000000"},21119,"GC.3.4173",null,3,"T",1572,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3857,1571.913]
[4948,{"$raw":"00000000"},21119,"GC.3.4174",null,3,"T",900,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3858,899.889]
[4949,{"$raw":"00000000"},21119,"GC.3.4175",null,3,"T",593,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3859,593.423]
[4950,{"$raw":"00000000"},21119,"GC.3.4176",null,3,"T",823,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3860,823.208]
[4951,{"$raw":"00000000"},21119,"GC.3.4177",null,3,"T",595,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3861,595.405]
[4953,{"$raw":"00000000"},21107,"GC.3.4179",null,3,"T",287,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3862,287.095]
[4954,{"$raw":"00000000"},21107,"GC.3.4180",null,3,"T",500,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3863,500.478]
[4956,{"$raw":"00000000"},21107,"GC.3.4181",null,3,"T",724,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3864,724.258]
[4957,{"$raw":"00000000"},21107,"GC.3.4182",null,3,"T",897,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",3865,896.974]
[4959,{"$raw":"00000000"},21120,"GC.3.4183",null,3,"T",2343,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3866,2343.346]
[4961,{"$raw":"00000000"},21120,"GC.3.4184",null,3,"T",1971,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3867,1970.798]
[4962,{"$raw":"00000000"},21121,"GC.3.4185",null,3,"T",1400,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3868,1400.048]
[4963,{"$raw":"00000000"},21116,"GC.3.4186",null,3,"T",667,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3869,666.812]
[4966,{"$raw":"00000000"},21121,"GC.3.4187",null,3,"T",1011,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3870,1011.458]
[4967,{"$raw":"00000000"},21121,"GC.3.4188",null,3,null,631,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",3871,631.377]
[4968,{"$raw":"00000000"},21121,"GC.3.4189",null,3,null,667,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",3872,667.345]
[4969,{"$raw":"00000000"},21121,"GC.3.4190",null,3,null,270,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",3873,269.659]
[4970,{"$raw":"00000000"},21121,"GC.3.4191",null,3,"T",587,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3874,586.789]
[4971,{"$raw":"00000000"},21121,"GC.3.4192",null,3,"T",1505,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3875,1505.197]
[4973,{"$raw":"00000000"},21121,"GC.3.4193",null,3,"T",1630,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3876,1630.361]
[4974,{"$raw":"00000000"},21121,"GC.3.4194",null,3,"T",307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3877,306.897]
[4975,{"$raw":"00000000"},21121,"GC.3.4195",null,3,null,53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",3878,52.553]
[4979,{"$raw":"00000000"},21119,"GC.3.4197",null,3,"T",1887,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3879,1887.221]
[4980,{"$raw":"00000000"},21119,"GC.3.4198",null,3,"T",2956,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3880,2955.721]
[4981,{"$raw":"00000000"},21103,"GC.3.4199",null,3,"T",866,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3881,865.703]
[4982,{"$raw":"00000000"},21103,"GC.3.4200",null,3,"T",2754,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3882,2753.753]
[4988,{"$raw":"00000000"},0,"GC.3.4206",null,3,"T",111,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",3883,111.067]
[4991,{"$raw":"00000000"},21121,"GC.3.4209",null,3,"T",549,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3884,549.328]
[4993,{"$raw":"00000000"},21121,"GC.3.4211",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3885,52.556]
[4996,{"$raw":"00000000"},21106,"GC.3.4214",null,3,"T",1655,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3886,1654.796]
[4999,{"$raw":"00000000"},21119,"GC.3.4215",null,3,"T",448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3887,448.170]
[5000,{"$raw":"00000000"},21119,"GC.3.4216",null,3,"T",2824,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",3888,2823.927]
[5005,{"$raw":"00000000"},21103,"GC.3.4217",null,3,"T",964,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3889,963.886]
[5006,{"$raw":"00000000"},21103,"GC.3.4218",null,3,"T",792,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3890,791.817]
[5007,{"$raw":"00000000"},21103,"GC.3.4219",null,3,"T",467,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3891,467.272]
[5008,{"$raw":"00000000"},21103,"GC.3.4220",null,3,"T",1135,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3892,1134.864]
[5009,{"$raw":"00000000"},21103,"GC.3.4221",null,3,"T",1436,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3893,1436.205]
[5010,{"$raw":"00000000"},21103,"GC.3.4222",null,3,"T",683,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3894,683.471]
[5011,{"$raw":"00000000"},21103,"GC.3.4223",null,3,"T",841,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3895,841.313]
[5012,{"$raw":"00000000"},21103,"GC.3.4224",null,3,"T",232,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3896,231.505]
[5013,{"$raw":"00000000"},21103,"GC.3.4225",null,3,"T",1687,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3897,1687.446]
[5014,{"$raw":"00000000"},21103,"GC.3.4226",null,3,"T",778,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",3898,778.143]
[5016,{"$raw":"00000000"},21106,"GC.3.4227",null,3,"T",477,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3899,476.676]
[5018,{"$raw":"00000000"},21106,"GC.3.4228",null,3,"T",1395,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3900,1395.414]
[5019,{"$raw":"00000000"},21120,"GC.3.4229",null,3,"T",1672,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3901,1671.507]
[5020,{"$raw":"00000000"},21120,"GC.3.4230",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3902,0.448]
[5021,{"$raw":"00000000"},21120,"GC.3.4231",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3903,0.448]
[5023,{"$raw":"00000000"},21116,"GC.3.4233",null,3,"T",1589,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3904,1589.223]
[5024,{"$raw":"00000000"},21116,"GC.3.4234",null,3,null,1559,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","OV",3905,1559.410]
[5025,{"$raw":"00000000"},21116,"GC.3.4235",null,3,null,311,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","OV",3906,311.466]
[5026,{"$raw":"00000000"},21116,"GC.3.4236",null,3,"T",917,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",3907,917.238]
[5028,{"$raw":"00000000"},21120,"GC.3.4238",null,3,"T",1296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3908,1296.375]
[5030,{"$raw":"00000000"},21120,"GC.3.4240",null,3,"T",3463,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",3909,3462.642]
[5031,{"$raw":"00000000"},21115,"GC.3.4241",null,3,"T",1974,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3910,1974.364]
[5033,{"$raw":"00000000"},21115,"GC.3.4242",null,3,"T",1482,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3911,1481.724]
[5034,{"$raw":"00000000"},21115,"GC.3.4243",null,3,"T",499,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3912,498.503]
[5036,{"$raw":"00000000"},21115,"GC.3.4244",null,3,"T",550,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",3913,550.359]
[5037,{"$raw":"00000000"},21121,"GC.3.4245",null,3,"T",935,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3914,935.178]
[5038,{"$raw":"00000000"},21121,"GC.3.4246",null,3,"T",932,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3915,932.212]
[5039,{"$raw":"00000000"},21121,"GC.3.4247",null,3,"T",1413,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3916,1413.454]
[5040,{"$raw":"00000000"},21121,"GC.3.4248",null,3,"T",563,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3917,563.039]
[5041,{"$raw":"00000000"},21121,"GC.3.4249",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3918,8.236]
[5043,{"$raw":"00000000"},21121,"GC.3.4250",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3919,8.236]
[5044,{"$raw":"00000000"},21121,"GC.3.4251",null,3,"T",227,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3920,226.922]
[5046,{"$raw":"00000000"},21121,"GC.3.4252",null,3,"T",538,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3921,537.646]
[5047,{"$raw":"00000000"},21121,"GC.3.4253",null,3,"T",152,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3922,152.057]
[5048,{"$raw":"00000000"},21121,"GC.3.4254",null,3,"T",1308,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3923,1308.270]
[5049,{"$raw":"00000000"},21121,"GC.3.4255",null,3,"T",461,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",3924,461.150]
[5051,{"$raw":"00000000"},21117,"GC.3.4257",null,3,"T",488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3925,487.601]
[5052,{"$raw":"00000000"},21117,"GC.3.4258",null,3,"T",360,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3926,360.276]
[5053,{"$raw":"00000000"},21117,"GC.3.4259",null,3,"T",584,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3927,583.715]
[5054,{"$raw":"00000000"},21106,"GC.3.4260",null,3,"T",327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3928,327.260]
[5055,{"$raw":"00000000"},21106,"GC.3.4261",null,3,"T",1314,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3929,1313.542]
[5056,{"$raw":"00000000"},21106,"GC.3.4262",null,3,"T",1097,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3930,1096.988]
[5057,{"$raw":"00000000"},21106,"GC.3.4263",null,3,"T",887,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3931,886.744]
[5058,{"$raw":"00000000"},21111,"GC.3.4264",null,3,"T",948,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3932,948.380]
[5059,{"$raw":"00000000"},21111,"GC.3.4265",null,3,"T",846,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3933,846.394]
[5060,{"$raw":"00000000"},21111,"GC.3.4266",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3934,11.220]
[5061,{"$raw":"00000000"},21111,"GC.3.4267",null,3,"T",1333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3935,1333.240]
[5062,{"$raw":"00000000"},21111,"GC.3.4268",null,3,"T",131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3936,131.044]
[5064,{"$raw":"00000000"},21111,"GC.3.4269",null,3,"T",839,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3937,838.907]
[5065,{"$raw":"00000000"},21111,"GC.3.4270",null,3,"T",315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3938,315.220]
[5066,{"$raw":"00000000"},21111,"GC.3.4271",null,3,"T",621,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3939,621.173]
[5067,{"$raw":"00000000"},21111,"GC.3.4272",null,3,"T",107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3940,106.735]
[5068,{"$raw":"00000000"},21111,"GC.3.4273",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3941,248.760]
[5069,{"$raw":"00000000"},21111,"GC.3.4274",null,3,"T",974,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3942,974.333]
[5071,{"$raw":"00000000"},21111,"GC.3.4275",null,3,"T",644,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3943,643.749]
[5073,{"$raw":"00000000"},21111,"GC.3.4276",null,3,"T",261,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3944,261.058]
[5074,{"$raw":"00000000"},21111,"GC.3.4277",null,3,"T",1031,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3945,1031.392]
[5075,{"$raw":"00000000"},21111,"GC.3.4278",null,3,"T",352,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3946,351.934]
[5076,{"$raw":"00000000"},21111,"GC.3.4279",null,3,"T",372,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3947,371.924]
[5077,{"$raw":"00000000"},21111,"GC.3.4280",null,3,"T",893,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",3948,892.904]
[5080,{"$raw":"00000000"},21117,"GC.3.4281",null,3,"T",1755,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3949,1755.244]
[5081,{"$raw":"00000000"},21117,"GC.3.4282",null,3,"T",457,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3950,456.784]
[5082,{"$raw":"00000000"},21117,"GC.3.4283",null,3,"T",311,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3951,311.126]
[5084,{"$raw":"00000000"},21117,"GC.3.4284",null,3,"T",547,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3952,546.800]
[5086,{"$raw":"00000000"},21117,"GC.3.4285",null,3,"T",481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3953,480.591]
[5087,{"$raw":"00000000"},21117,"GC.3.4286",null,3,"T",893,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",3954,892.512]
[5089,{"$raw":"00000000"},21106,"GC.3.4287",null,3,"T",306,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3955,305.695]
[5090,{"$raw":"00000000"},21106,"GC.3.4288",null,3,"T",199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3956,199.216]
[5091,{"$raw":"00000000"},21106,"GC.3.4289",null,3,"T",1077,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3957,1076.719]
[5092,{"$raw":"00000000"},21106,"GC.3.4290",null,3,"T",589,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3958,588.887]
[5093,{"$raw":"00000000"},21106,"GC.3.4291",null,3,"T",861,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3959,861.084]
[5094,{"$raw":"00000000"},21106,"GC.3.4292",null,3,"T",966,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3960,966.102]
[5095,{"$raw":"00000000"},21106,"GC.3.4293",null,3,"T",529,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3961,528.596]
[5096,{"$raw":"00000000"},21106,"GC.3.4294",null,3,"T",160,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3962,160.159]
[5097,{"$raw":"00000000"},21106,"GC.3.4295",null,3,"T",364,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3963,363.892]
[5098,{"$raw":"00000000"},21106,"GC.3.4296",null,3,"T",121,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3964,120.513]
[5099,{"$raw":"00000000"},21106,"GC.3.4297",null,3,"T",503,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3965,502.634]
[5100,{"$raw":"00000000"},21106,"GC.3.4298",null,3,"T",639,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3966,639.341]
[5101,{"$raw":"00000000"},21106,"GC.3.4299",null,3,"T",791,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3967,791.198]
[5102,{"$raw":"00000000"},21106,"GC.3.4300",null,3,"T",515,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3968,515.001]
[5103,{"$raw":"00000000"},21106,"GC.3.4301",null,3,"T",292,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3969,292.068]
[5104,{"$raw":"00000000"},21106,"GC.3.4302",null,3,"T",593,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3970,593.042]
[5105,{"$raw":"00000000"},21106,"GC.3.4303",null,3,"T",527,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3971,526.597]
[5106,{"$raw":"00000000"},21106,"GC.3.4304",null,3,"T",769,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3972,769.329]
[5107,{"$raw":"00000000"},21106,"GC.3.4305",null,3,"T",787,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3973,787.112]
[5108,{"$raw":"00000000"},21106,"GC.3.4306",null,3,"T",442,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3974,442.371]
[5109,{"$raw":"00000000"},21106,"GC.3.4307",null,3,"T",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3975,304.048]
[5110,{"$raw":"00000000"},21106,"GC.3.4308",null,3,"T",550,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3976,550.286]
[5111,{"$raw":"00000000"},21102,"GC.3.4309",null,3,"T",1029,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3977,1028.733]
[5112,{"$raw":"00000000"},21102,"GC.3.4310",null,3,"T",172,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3978,172.138]
[5113,{"$raw":"00000000"},21102,"GC.3.4311",null,3,"T",943,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3979,942.981]
[5114,{"$raw":"00000000"},21102,"GC.3.4312",null,3,"T",1041,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",3980,1040.660]
[5118,{"$raw":"00000000"},21106,"GC.3.4316",null,3,"T",642,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",3981,642.436]
[5119,{"$raw":"00000000"},21118,"GC.3.4317",null,3,"T",963,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3982,962.821]
[5120,{"$raw":"00000000"},21118,"GC.3.4318",null,3,"T",1021,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3983,1020.588]
[5121,{"$raw":"00000000"},21118,"GC.3.4319",null,3,"T",974,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3984,973.917]
[5122,{"$raw":"00000000"},21118,"GC.3.4320",null,3,"T",848,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3985,848.381]
[5123,{"$raw":"00000000"},21118,"GC.3.4321",null,3,"T",734,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3986,733.535]
[5124,{"$raw":"00000000"},21118,"GC.3.4322",null,3,"T",463,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3987,463.207]
[5125,{"$raw":"00000000"},21118,"GC.3.4323",null,3,"T",2005,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3988,2005.258]
[5126,{"$raw":"00000000"},21118,"GC.3.4324",null,3,"T",188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3989,187.713]
[5127,{"$raw":"00000000"},21118,"GC.3.4325",null,3,"T",595,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3990,595.190]
[5129,{"$raw":"00000000"},21118,"GC.3.4326",null,3,"T",923,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3991,923.473]
[5130,{"$raw":"00000000"},21118,"GC.3.4327",null,3,"T",563,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3992,562.543]
[5131,{"$raw":"00000000"},21118,"GC.3.4328",null,3,"T",1256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3993,1256.333]
[5132,{"$raw":"00000000"},21118,"GC.3.4329",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3994,52.634]
[5133,{"$raw":"00000000"},21118,"GC.3.4330",null,3,"T",1018,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3995,1017.701]
[5134,{"$raw":"00000000"},21118,"GC.3.4331",null,3,"T",363,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3996,363.186]
[5135,{"$raw":"00000000"},21118,"GC.3.4332",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3997,8.118]
[5136,{"$raw":"00000000"},21118,"GC.3.4333",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3998,8.118]
[5137,{"$raw":"00000000"},21118,"GC.3.4334",null,3,"T",455,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",3999,455.381]
[5138,{"$raw":"00000000"},21122,"GC.3.4335",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4000,16.872]
[5139,{"$raw":"00000000"},21122,"GC.3.4336",null,3,"T",352,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4001,352.474]
[5140,{"$raw":"00000000"},21122,"GC.3.4337",null,3,"T",1314,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4002,1313.601]
[5141,{"$raw":"00000000"},21118,"GC.3.4338",null,3,"T",781,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4003,780.853]
[5142,{"$raw":"00000000"},21118,"GC.3.4339",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4004,6.785]
[5143,{"$raw":"00000000"},21118,"GC.3.4340",null,3,"T",934,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4005,933.703]
[5145,{"$raw":"00000000"},21118,"GC.3.4341",null,3,"T",172,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4006,171.987]
[5146,{"$raw":"00000000"},21118,"GC.3.4342",null,3,"T",270,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4007,270.445]
[5147,{"$raw":"00000000"},21106,"GC.3.4343",null,3,"T",927,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4008,926.796]
[5148,{"$raw":"00000000"},21106,"GC.3.4344",null,3,"T",305,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4009,304.632]
[5149,{"$raw":"00000000"},21106,"GC.3.4345",null,3,"T",490,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4010,489.735]
[5150,{"$raw":"00000000"},21106,"GC.3.4346",null,3,"T",421,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4011,420.727]
[5151,{"$raw":"00000000"},21106,"GC.3.4347",null,3,"T",328,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4012,328.244]
[5152,{"$raw":"00000000"},21106,"GC.3.4348",null,3,"T",747,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4013,746.971]
[5153,{"$raw":"00000000"},21106,"GC.3.4349",null,3,"T",295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4014,295.286]
[5154,{"$raw":"00000000"},21106,"GC.3.4350",null,3,"T",403,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4015,403.038]
[5155,{"$raw":"00000000"},21106,"GC.3.4351",null,3,"T",160,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4016,159.810]
[5156,{"$raw":"00000000"},21120,"GC.3.4352",null,3,"T",1126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4017,1126.330]
[5157,{"$raw":"00000000"},21120,"GC.3.4353",null,3,"T",784,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4018,783.747]
[5158,{"$raw":"00000000"},21120,"GC.3.4354",null,3,"T",362,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4019,361.800]
[5159,{"$raw":"00000000"},21102,"GC.3.4355",null,3,"T",342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4020,342.300]
[5160,{"$raw":"00000000"},21102,"GC.3.4356",null,3,"T",108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4021,108.102]
[5161,{"$raw":"00000000"},21102,"GC.3.4357",null,3,"T",31,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4022,31.482]
[5162,{"$raw":"00000000"},21102,"GC.3.4358",null,3,"T",1176,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4023,1175.973]
[5163,{"$raw":"00000000"},21102,"GC.3.4359",null,3,"T",580,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4024,580.232]
[5165,{"$raw":"00000000"},21120,"GC.3.4361",null,3,"T",441,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4025,440.989]
[5166,{"$raw":"00000000"},21120,"GC.3.4362",null,3,"T",1092,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4026,1092.356]
[5167,{"$raw":"00000000"},21120,"GC.3.4363",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4027,11.471]
[5168,{"$raw":"00000000"},21120,"GC.3.4364",null,3,"T",763,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4028,763.005]
[5169,{"$raw":"00000000"},21120,"GC.3.4365",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4029,11.471]
[5170,{"$raw":"00000000"},21120,"GC.3.4366",null,3,"T",4041,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4030,4041.084]
[5171,{"$raw":"00000000"},21107,"GC.3.4367",null,3,"T",676,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4031,676.017]
[5172,{"$raw":"00000000"},21107,"GC.3.4368",null,3,"T",1742,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4032,1742.069]
[5173,{"$raw":"00000000"},21107,"GC.3.4369",null,3,"T",855,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4033,855.013]
[5174,{"$raw":"00000000"},21107,"GC.3.4370",null,3,"T",1320,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4034,1320.124]
[5175,{"$raw":"00000000"},21107,"GC.3.4371",null,3,"T",720,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4035,719.812]
[5176,{"$raw":"00000000"},21119,"GC.3.4372",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4036,8.224]
[5177,{"$raw":"00000000"},21119,"GC.3.4373",null,3,"T",950,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4037,950.394]
[5178,{"$raw":"00000000"},21119,"GC.3.4374",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4038,8.224]
[5179,{"$raw":"00000000"},21119,"GC.3.4375",null,3,"T",368,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4039,367.599]
[5180,{"$raw":"00000000"},21107,"GC.3.4376",null,3,"T",2152,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4040,2151.662]
[5181,{"$raw":"00000000"},21107,"GC.3.4377",null,3,"T",949,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4041,948.705]
[5183,{"$raw":"00000000"},21102,"GC.3.4379",null,3,"T",1571,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4042,1571.244]
[5184,{"$raw":"00000000"},21102,"GC.3.4380",null,3,"T",467,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4043,467.271]
[5186,{"$raw":"00000000"},21102,"GC.3.4382",null,3,"T",99,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4044,99.379]
[5187,{"$raw":"00000000"},21102,"GC.3.4383",null,3,"T",3305,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4045,3305.479]
[5188,{"$raw":"00000000"},21106,"GC.3.4384",null,3,"T",451,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4046,451.155]
[5189,{"$raw":"00000000"},21106,"GC.3.4385",null,3,"T",747,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4047,747.408]
[5190,{"$raw":"00000000"},21106,"GC.3.4386",null,3,"T",841,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4048,840.584]
[5191,{"$raw":"00000000"},21122,"GC.3.4387",null,3,"T",93,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4049,92.530]
[5193,{"$raw":"00000000"},21122,"GC.3.4388",null,3,"T",290,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4050,290.393]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4052,5.364]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4053,5.223]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",86,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4054,85.903]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",84,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4055,84.272]
[25,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,118,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4056,118.154]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4057,19.437]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",4059,6.126]
[1022,{"$raw":"00000000"},21121,"GC.3.4389",null,3,null,171,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",4060,170.528]
[528,{"$raw":"00000000"},21121,"GC.3.4391",null,3,"T",1280,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4061,1279.887]
[4816,{"$raw":"00000000"},21102,"GC.3.4392",null,3,"T",1384,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4062,1384.122]
[920,{"$raw":"00000000"},21121,"GC.3.4393",null,3,"T",463,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4063,463.132]
[848,{"$raw":"00000000"},21107,"GC.3.4394",null,3,"T",1019,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4064,1018.861]
[4960,{"$raw":"00000000"},21120,"GC.3.4395",null,3,null,682,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","OV",4065,681.522]
[2129,{"$raw":"00000000"},21117,"GC.3.4396",null,3,null,1805,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","OV",4066,1804.808]
[2287,{"$raw":"00000000"},21106,"GC.3.4397",null,3,"T",805,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4067,805.454]
[508,{"$raw":"00000000"},21121,"GC.3.4398",null,3,"T",1305,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4068,1304.926]
[497,{"$raw":"00000000"},21103,"GC.3.4399",null,3,"T",2121,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4069,2121.093]
[3226,{"$raw":"00000000"},21122,"GC.3.4401",null,3,null,669,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",4070,668.699]
[4352,{"$raw":"00000000"},21106,"GC.3.4403",null,3,"T",539,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4071,539.376]
[4063,{"$raw":"00000000"},21103,"GC.3.4404",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4072,23.934]
[314,{"$raw":"00000000"},21121,"GC.3.4405",null,3,"T",1928,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4073,1927.677]
[1999,{"$raw":"00000000"},21111,"GC.3.4406",null,3,"T",896,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4074,896.124]
[222,{"$raw":"00000000"},21121,"GC.3.4407",null,3,"T",360,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4075,359.718]
[4147,{"$raw":"00000000"},21117,"GC.3.4408",null,3,"T",51,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4076,51.093]
[4414,{"$raw":"00000000"},21106,"GC.3.4409",null,3,"T",318,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4077,317.812]
[65,{"$raw":"00000000"},21121,"GC.3.4410",null,3,"T",709,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4078,708.506]
[4143,{"$raw":"00000000"},21117,"GC.3.4411",null,3,null,167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","OV",4079,167.394]
[4023,{"$raw":"00000000"},21117,"GC.3.4412",null,3,"T",980,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4080,980.077]
[2721,{"$raw":"00000000"},21118,"GC.3.4413",null,3,"T",683,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4081,683.001]
[1186,{"$raw":"00000000"},21115,"GC.3.4414",null,3,"T",1154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4082,1154.095]
[14,{"$raw":"00000000"},21115,"CM 1127","OPER",2,null,411,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","CM",4083,411.291]
[4423,{"$raw":"00000000"},21106,"GC.3.4415",null,3,"T",1007,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4084,1007.024]
[919,{"$raw":"00000000"},21121,"GC.3.4416",null,3,"T",1313,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4085,1313.317]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",785,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4086,785.207]
[4072,{"$raw":"00000000"},21121,"GC.3.4417",null,3,"T",1942,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4087,1941.629]
[3967,{"$raw":"00000000"},21120,"GC.3.4418",null,3,"T",1193,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4088,1192.731]
[871,{"$raw":"00000000"},21115,"GC.3.4419",null,3,"T",3293,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4089,3292.955]
[4642,{"$raw":"00000000"},21122,"GC.3.4420",null,3,"T",915,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4090,914.521]
[4827,{"$raw":"00000000"},21102,"GC.3.4421",null,3,"T",452,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4091,452.210]
[26,{"$raw":"00000000"},21121,"EM 502-1","OPER",2,"A",56,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4092,56.335]
[533,{"$raw":"00000000"},21106,"GC.3.4422",null,3,"T",14,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4093,14.205]
[270,{"$raw":"00000000"},21121,"GC.3.4423",null,3,"T",4551,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4094,4551.112]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",2554,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4095,2554.312]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",965,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4096,964.605]
[2897,{"$raw":"00000000"},21122,"GC.3.4424",null,3,"T",413,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4097,413.163]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",420,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",4098,419.704]
[1185,{"$raw":"00000000"},21115,"GC.3.4425",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4099,7.343]
[1185,{"$raw":"00000000"},21115,"GC.3.4426",null,3,"T",879,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4100,878.536]
[2211,{"$raw":"00000000"},21106,"GC.3.4427",null,3,"T",117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4101,117.147]
[4090,{"$raw":"00000000"},21119,"GC.3.4428",null,3,"T",2390,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4102,2390.457]
[4364,{"$raw":"00000000"},21117,"GC.3.4429",null,3,"T",671,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4103,671.429]
[2765,{"$raw":"00000000"},21118,"GC.3.4430",null,3,"T",1619,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4104,1619.367]
[309,{"$raw":"00000000"},21121,"GC.3.4431",null,3,"T",1631,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4105,1630.509]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",452,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4106,452.325]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",790,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4107,790.119]
[4193,{"$raw":"00000000"},21111,"GC.3.4432",null,3,"T",120,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4108,120.397]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",1033,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",4109,1033.320]
[2174,{"$raw":"00000000"},21117,"GC.3.4434",null,3,"T",683,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4110,683.108]
[2797,{"$raw":"00000000"},21122,"GC.3.4435",null,3,"T",308,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4111,308.413]
[4060,{"$raw":"00000000"},21121,"GC.3.4436",null,3,"T",3561,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4112,3561.449]
[902,{"$raw":"00000000"},21117,"GC.3.4437",null,3,"T",1465,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4113,1464.653]
[785,{"$raw":"00000000"},21103,"GC.3.4438",null,3,"T",959,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4114,958.722]
[5194,{"$raw":"00000000"},21116,"GC.3.4439",null,3,"T",951,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4115,951.411]
[2402,{"$raw":"00000000"},21106,"GC.3.4440",null,3,"T",381,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4116,380.955]
[3209,{"$raw":"00000000"},21118,"GC.3.4441",null,3,"T",377,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4117,376.971]
[204,{"$raw":"00000000"},21121,"GC.3.4442",null,3,"T",64,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4118,64.233]
[4048,{"$raw":"00000000"},21121,"GC.3.4443",null,3,"T",532,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4119,532.094]
[1737,{"$raw":"00000000"},21111,"GC.3.4444",null,3,"T",503,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4120,502.737]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",575,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4121,574.723]
[5192,{"$raw":"00000000"},21122,"GC.3.4445",null,3,"T",253,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4122,253.090]
[764,{"$raw":"00000000"},21115,"GC.3.4446",null,3,"T",743,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4123,742.532]
[4405,{"$raw":"00000000"},21106,"GC.3.4447",null,3,"T",397,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4124,396.750]
[1199,{"$raw":"00000000"},21122,"GC.3.4448",null,3,"T",752,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4125,751.640]
[671,{"$raw":"00000000"},21121,"GC.3.4449",null,3,"T",448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4126,448.423]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",862,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4127,862.309]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4128,377.662]
[22,{"$raw":"00000000"},21118,"EM 123-1","OPER",2,"A",912,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Colos","ODEMIRA","Grândola-Cercal","EM",4129,911.609]
[3814,{"$raw":"00000000"},21103,"GC.3.4451",null,3,"T",1144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4130,1143.963]
[4798,{"$raw":"00000000"},21102,"GC.3.4452",null,3,"T",524,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4131,524.377]
[2995,{"$raw":"00000000"},21122,"GC.3.4454",null,3,"T",217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4132,217.399]
[483,{"$raw":"00000000"},21103,"GC.3.4455",null,3,"T",3182,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4133,3181.602]
[4735,{"$raw":"00000000"},21122,"GC.3.4456",null,3,"T",442,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4134,442.258]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4135,257.308]
[4656,{"$raw":"00000000"},21122,"GC.3.4457",null,3,"T",619,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4136,619.186]
[1008,{"$raw":"00000000"},21117,"GC.3.4458",null,3,"T",1606,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4137,1605.736]
[953,{"$raw":"00000000"},21121,"GC.3.4459",null,3,"T",2442,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4138,2442.064]
[4872,{"$raw":"00000000"},21102,"GC.3.4460",null,3,"T",510,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4139,509.815]
[876,{"$raw":"00000000"},21121,"GC.3.4461",null,3,"T",1117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4140,1116.899]
[4977,{"$raw":"00000000"},21115,"GC.3.4462",null,3,"T",2659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4141,2659.110]
[1044,{"$raw":"00000000"},21121,"GC.3.4463",null,3,"T",1676,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4142,1676.253]
[1051,{"$raw":"00000000"},21121,"GC.3.4464",null,3,"T",793,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4143,793.434]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",474,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4144,473.709]
[4972,{"$raw":"00000000"},21121,"GC.3.4465",null,3,"T",430,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4145,429.629]
[2124,{"$raw":"00000000"},21117,"GC.3.4466",null,3,null,184,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","OV",4146,183.621]
[9,{"$raw":"00000000"},21117,"CM 1123","OPER",2,null,159,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4147,159.000]
[3965,{"$raw":"00000000"},21120,"GC.3.4467",null,3,"T",1383,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4148,1382.513]
[495,{"$raw":"00000000"},21103,"GC.3.4468",null,3,null,769,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","OV",4149,768.507]
[4873,{"$raw":"00000000"},21102,"GC.3.4469",null,3,"T",930,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4150,929.606]
[1465,{"$raw":"00000000"},21107,"GC.3.4470",null,3,null,540,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","OV",4151,539.540]
[950,{"$raw":"00000000"},21121,"GC.3.4471",null,3,"T",512,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4152,512.120]
[3046,{"$raw":"00000000"},21122,"GC.3.4472",null,3,null,15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",4153,14.874]
[938,{"$raw":"00000000"},21121,"GC.3.4473",null,3,"T",594,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4154,593.619]
[4678,{"$raw":"00000000"},21122,"GC.3.4474",null,3,"T",656,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4155,656.131]
[1147,{"$raw":"00000000"},21107,"GC.3.4475",null,3,"T",780,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4156,779.966]
[4700,{"$raw":"00000000"},21122,"GC.3.4476",null,3,null,71,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",4157,70.903]
[2674,{"$raw":"00000000"},21102,"GC.3.4477",null,3,"T",517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4158,516.581]
[454,{"$raw":"00000000"},21103,"GC.3.4478",null,3,"T",875,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4159,874.619]
[4828,{"$raw":"00000000"},21102,"GC.3.4479",null,3,null,161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","OV",4160,161.446]
[1027,{"$raw":"00000000"},21121,"GC.3.4480",null,3,"T",2153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4161,2152.575]
[2000,{"$raw":"00000000"},21111,"GC.3.4481",null,3,null,280,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",4162,280.007]
[4887,{"$raw":"00000000"},21107,"GC.3.4482",null,3,"T",1522,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4163,1522.323]
[3905,{"$raw":"00000000"},21117,"GC.3.4483",null,3,"T",2114,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4164,2114.085]
[4412,{"$raw":"00000000"},21106,"GC.3.4484",null,3,"T",579,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4165,579.460]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4166,215.697]
[11,{"$raw":"00000000"},21117,"CM 1125","OPER",2,null,585,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4167,584.653]
[4958,{"$raw":"00000000"},21117,"GC.3.4485",null,3,"T",688,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4168,688.014]
[2178,{"$raw":"00000000"},21117,"GC.3.4486",null,3,"T",927,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4169,927.205]
[727,{"$raw":"00000000"},21115,"GC.3.4487",null,3,"T",1163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4170,1163.448]
[36,{"$raw":"00000000"},21115,"ER 266","OPER",1,"A",1605,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4171,1605.206]
[286,{"$raw":"00000000"},21121,"GC.3.4488",null,3,"T",807,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4172,806.861]
[1245,{"$raw":"00000000"},21122,"GC.3.4489",null,3,"T",903,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4173,903.034]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4174,78.689]
[2134,{"$raw":"00000000"},21117,"GC.3.4490",null,3,"T",517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4175,516.840]
[9,{"$raw":"00000000"},21117,"CM 1123","OPER",2,null,391,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4176,390.837]
[9,{"$raw":"00000000"},21117,"CM 1123","OPER",2,null,631,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4177,630.874]
[1312,{"$raw":"00000000"},21107,"GC.3.4492",null,3,"T",422,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4178,422.354]
[3116,{"$raw":"00000000"},21122,"GC.3.4493",null,3,"T",850,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4179,850.278]
[4368,{"$raw":"00000000"},21117,"GC.3.4494",null,3,"T",663,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4180,663.331]
[282,{"$raw":"00000000"},21121,"GC.3.4495",null,3,null,506,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",4181,505.932]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",59,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4182,58.789]
[209,{"$raw":"00000000"},21121,"GC.3.4496",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4183,27.818]
[4370,{"$raw":"00000000"},21117,"GC.3.4497",null,3,"T",151,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4184,150.677]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",877,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4185,876.653]
[1177,{"$raw":"00000000"},21115,"GC.3.4498",null,3,"T",2823,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4186,2822.912]
[1547,{"$raw":"00000000"},21111,"GC.3.4499",null,3,"T",112,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4187,111.695]
[4355,{"$raw":"00000000"},21106,"GC.3.4500",null,3,"T",1383,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4188,1383.094]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",907,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4189,907.125]
[1172,{"$raw":"00000000"},21115,"GC.3.4501",null,3,"T",1654,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4190,1654.015]
[3448,{"$raw":"00000000"},21106,"GC.3.4502",null,3,"T",2332,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4191,2331.987]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",746,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",4192,746.318]
[4517,{"$raw":"00000000"},21106,"GC.3.4503",null,3,"T",225,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4193,224.964]
[2837,{"$raw":"00000000"},21122,"GC.3.4504",null,3,"T",86,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4194,86.402]
[1701,{"$raw":"00000000"},21111,"GC.3.4505",null,3,"T",1277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4195,1277.258]
[4403,{"$raw":"00000000"},21106,"GC.3.4506",null,3,"T",624,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4196,623.862]
[2576,{"$raw":"00000000"},21106,"GC.3.4507",null,3,"T",695,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4197,694.969]
[889,{"$raw":"00000000"},21121,"GC.3.4508",null,3,"T",1100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4198,1099.624]
[724,{"$raw":"00000000"},21103,"GC.3.4509",null,3,"T",114,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4199,114.154]
[3596,{"$raw":"00000000"},21102,"GC.3.4510",null,3,"T",915,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4200,915.207]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",714,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4201,714.040]
[4820,{"$raw":"00000000"},21102,"GC.3.4513",null,3,"T",197,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4202,197.298]
[1057,{"$raw":"00000000"},21121,"GC.3.4514",null,3,"T",2401,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4203,2400.897]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",498,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4204,497.953]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",260,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4205,260.198]
[4575,{"$raw":"00000000"},21118,"GC.3.4515",null,3,"T",74,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4206,74.138]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",969,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4207,969.054]
[3562,{"$raw":"00000000"},21102,"GC.3.4516",null,3,"T",498,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4208,497.859]
[2252,{"$raw":"00000000"},21106,"GC.3.4517",null,3,"T",305,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4209,305.302]
[3098,{"$raw":"00000000"},21118,"GC.3.4518",null,3,"T",1130,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4210,1130.452]
[4840,{"$raw":"00000000"},21102,"GC.3.4519",null,3,"T",320,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4211,319.929]
[2310,{"$raw":"00000000"},21106,"GC.3.4520",null,3,"T",1149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4212,1148.825]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",527,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4213,527.490]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4214,5.674]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,78,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4215,78.424]
[4997,{"$raw":"00000000"},21107,"GC.3.4521",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4216,6.602]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4217,9.559]
[2131,{"$raw":"00000000"},21117,"GC.3.4522",null,3,"T",1681,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4218,1681.190]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,55,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4219,54.952]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4220,153.377]
[4048,{"$raw":"00000000"},21121,"GC.3.4523",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4221,28.532]
[5001,{"$raw":"00000000"},21103,"GC.3.4524",null,3,"T",1415,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4222,1415.228]
[3091,{"$raw":"00000000"},21118,"GC.3.4525",null,3,"T",1608,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4223,1608.148]
[787,{"$raw":"00000000"},21102,"GC.3.4526",null,3,"T",955,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4224,954.551]
[4839,{"$raw":"00000000"},21102,"GC.3.4527",null,3,"T",453,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4225,453.084]
[3132,{"$raw":"00000000"},21118,"GC.3.4528",null,3,"T",400,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4226,399.900]
[3946,{"$raw":"00000000"},21121,"GC.3.4529",null,3,"T",1323,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4227,1323.484]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",71,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4228,71.162]
[3933,{"$raw":"00000000"},21121,"GC.3.4530",null,3,"T",958,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4229,958.406]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",1144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4230,1143.802]
[3706,{"$raw":"00000000"},21120,"GC.3.4531",null,3,"T",332,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4231,331.801]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",1561,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",4232,1560.925]
[3566,{"$raw":"00000000"},21102,"GC.3.4532",null,3,"T",2111,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4233,2110.712]
[2280,{"$raw":"00000000"},21106,"GC.3.4533",null,3,"T",517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4234,517.009]
[4340,{"$raw":"00000000"},21106,"GC.3.4534",null,3,"T",461,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4235,461.329]
[208,{"$raw":"00000000"},21121,"GC.3.4535",null,3,"T",930,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4236,929.695]
[21,{"$raw":"00000000"},21121,"EM 120-2","OPER",2,"A",950,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4237,950.013]
[2176,{"$raw":"00000000"},21117,"GC.3.4536",null,3,"T",1635,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4238,1635.182]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",596,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4239,596.122]
[972,{"$raw":"00000000"},21121,"GC.3.4537",null,3,"T",734,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4240,734.059]
[1480,{"$raw":"00000000"},21106,"GC.3.4540",null,3,null,382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",4241,381.502]
[3786,{"$raw":"00000000"},21103,"GC.3.4541",null,3,"T",246,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4242,246.434]
[2900,{"$raw":"00000000"},21122,"GC.3.4542",null,3,"T",962,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4243,961.924]
[1308,{"$raw":"00000000"},21107,"GC.3.4543",null,3,"T",515,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4244,514.729]
[17,{"$raw":"00000000"},21107,"CM 1162","OPER",2,null,1097,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","CM",4245,1097.373]
[17,{"$raw":"00000000"},21107,"CM 1162","OPER",2,null,767,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","CM",4246,767.381]
[1187,{"$raw":"00000000"},21115,"GC.3.4544",null,3,"T",1955,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4247,1954.674]
[14,{"$raw":"00000000"},21115,"CM 1127","OPER",2,null,80,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","CM",4248,79.597]
[14,{"$raw":"00000000"},21115,"CM 1127","OPER",2,null,1302,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","CM",4249,1302.206]
[2919,{"$raw":"00000000"},21122,"GC.3.4545",null,3,"T",302,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4250,302.437]
[4955,{"$raw":"00000000"},21107,"GC.3.4546",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4251,12.552]
[5079,{"$raw":"00000000"},21111,"GC.3.4547",null,3,"T",124,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4252,124.422]
[1614,{"$raw":"00000000"},21111,"GC.3.4548",null,3,"T",319,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4253,318.808]
[3296,{"$raw":"00000000"},21118,"GC.3.4549",null,3,"T",1237,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4254,1236.762]
[2974,{"$raw":"00000000"},21122,"GC.3.4550",null,3,"T",913,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4255,912.804]
[1704,{"$raw":"00000000"},21111,"GC.3.4551",null,3,"T",145,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4256,144.679]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",822,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4257,821.930]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",4258,40.471]
[4844,{"$raw":"00000000"},21102,"GC.3.4553",null,3,"T",182,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4259,181.645]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4260,146.514]
[2574,{"$raw":"00000000"},21106,"GC.3.4554",null,3,"T",3062,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4261,3062.288]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,112,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4262,112.423]
[3311,{"$raw":"00000000"},21118,"GC.3.4555",null,3,"T",1420,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4263,1419.625]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",251,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4264,250.596]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",1364,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4265,1364.034]
[283,{"$raw":"00000000"},21121,"GC.3.4556",null,3,null,527,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",4266,527.277]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",667,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4267,667.072]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",280,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4268,279.753]
[4998,{"$raw":"00000000"},21119,"GC.3.4557",null,3,"T",1821,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4269,1820.978]
[17,{"$raw":"00000000"},21119,"CM 1162","OPER",2,null,962,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","CM",4270,961.700]
[4145,{"$raw":"00000000"},21117,"GC.3.4558",null,3,"T",56,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4271,56.023]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",32,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4272,31.652]
[2895,{"$raw":"00000000"},21122,"GC.3.4559",null,3,"T",195,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4273,194.860]
[816,{"$raw":"00000000"},21107,"GC.3.4560",null,3,"T",1999,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4274,1998.948]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",888,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4275,887.956]
[4629,{"$raw":"00000000"},21122,"GC.3.4561",null,3,"T",187,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4276,187.076]
[9,{"$raw":"00000000"},21117,"CM 1123","OPER",2,null,719,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4277,718.834]
[2940,{"$raw":"00000000"},21122,"GC.3.4562",null,3,"T",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4278,303.639]
[2137,{"$raw":"00000000"},21117,"GC.3.4563",null,3,"T",1383,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4279,1383.022]
[1457,{"$raw":"00000000"},21116,"GC.3.4565",null,3,"T",1482,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4280,1481.909]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,1082,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4281,1082.075]
[4146,{"$raw":"00000000"},21117,"GC.3.4566",null,3,"T",73,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4282,72.651]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4283,40.241]
[1182,{"$raw":"00000000"},21115,"GC.3.4567",null,3,"T",597,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4284,596.896]
[14,{"$raw":"00000000"},21115,"CM 1127","OPER",2,null,235,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","CM",4285,235.339]
[2286,{"$raw":"00000000"},21106,"GC.3.4568",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4286,28.246]
[2288,{"$raw":"00000000"},21106,"GC.3.4569",null,3,"T",208,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4287,207.919]
[875,{"$raw":"00000000"},21121,"GC.3.4570",null,3,"T",806,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4288,806.478]
[7,{"$raw":"00000000"},21121,"CM 1122","OPER",2,null,678,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4289,677.642]
[568,{"$raw":"00000000"},21120,"GC.3.4572",null,3,"T",785,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4290,785.146]
[3386,{"$raw":"00000000"},21102,"GC.3.4573",null,3,"T",161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4291,161.049]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",1145,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",4292,1144.735]
[917,{"$raw":"00000000"},21121,"GC.3.4574",null,3,"T",1404,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4293,1404.051]
[1442,{"$raw":"00000000"},21122,"GC.3.4575",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4294,143.539]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",582,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4295,581.613]
[1311,{"$raw":"00000000"},21107,"GC.3.4576",null,3,"T",1096,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4296,1096.386]
[2936,{"$raw":"00000000"},21122,"GC.3.4577",null,3,"T",230,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4297,230.491]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",688,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4298,687.529]
[201,{"$raw":"00000000"},21121,"GC.3.4578",null,3,"T",955,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4299,954.796]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",1315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4300,1315.064]
[3606,{"$raw":"00000000"},21102,"GC.3.4579",null,3,"T",1054,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4301,1054.290]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,519,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4302,518.752]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,265,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4303,264.921]
[4909,{"$raw":"00000000"},21107,"GC.3.4580",null,3,"T",1259,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4304,1259.474]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",1266,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4305,1266.084]
[1247,{"$raw":"00000000"},21118,"GC.3.4581",null,3,"T",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4306,95.193]
[1247,{"$raw":"00000000"},21118,"GC.3.4582",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4307,14.822]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",686,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4308,686.112]
[331,{"$raw":"00000000"},21121,"GC.3.4583",null,3,"T",386,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4309,386.296]
[4208,{"$raw":"00000000"},21111,"GC.3.4584",null,3,"T",139,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4310,139.295]
[4331,{"$raw":"00000000"},21117,"GC.3.4585",null,3,"T",969,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4311,968.728]
[4866,{"$raw":"00000000"},21102,"GC.3.4586",null,3,"T",1512,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4312,1512.488]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4313,29.046]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4314,62.062]
[2076,{"$raw":"00000000"},21117,"GC.3.4587",null,3,"T",1281,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4315,1280.739]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",438,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4316,437.649]
[3680,{"$raw":"00000000"},21102,"GC.3.4588",null,3,"T",279,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4317,278.600]
[3728,{"$raw":"00000000"},21107,"GC.3.4589",null,3,"T",816,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4318,815.846]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4319,276.078]
[1170,{"$raw":"00000000"},21115,"GC.3.4590",null,3,"T",1965,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4320,1964.658]
[36,{"$raw":"00000000"},21115,"ER 266","OPER",1,"A",995,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4321,995.149]
[36,{"$raw":"00000000"},21115,"ER 266","OPER",1,"A",487,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4322,487.423]
[4526,{"$raw":"00000000"},21118,"GC.3.4591",null,3,"T",569,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4323,568.613]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4324,10.399]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",132,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",4325,131.555]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",4326,19.453]
[4369,{"$raw":"00000000"},21117,"GC.3.4592",null,3,"T",212,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4327,212.320]
[5083,{"$raw":"00000000"},21117,"GC.3.4593",null,3,"T",282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4328,282.012]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,33,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4329,32.649]
[1476,{"$raw":"00000000"},21118,"GC.3.4594",null,3,"T",585,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4330,584.692]
[6,{"$raw":"00000000"},21118,"CM 1102","OPER",2,null,555,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Colos","ODEMIRA","Grândola-Cercal","CM",4331,555.215]
[999,{"$raw":"00000000"},21121,"GC.3.4595",null,3,"T",1868,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4332,1867.780]
[2958,{"$raw":"00000000"},21122,"GC.3.4597",null,3,"T",954,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4333,953.606]
[2756,{"$raw":"00000000"},21118,"GC.3.4598",null,3,"T",185,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4334,185.195]
[4826,{"$raw":"00000000"},21102,"GC.3.4599",null,3,"T",898,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4335,897.667]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",593,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",4336,592.613]
[899,{"$raw":"00000000"},21121,"GC.3.4600",null,3,"T",2195,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4337,2194.743]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,33,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4338,32.855]
[3669,{"$raw":"00000000"},21107,"GC.3.4601",null,3,"T",1543,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4339,1543.408]
[3879,{"$raw":"00000000"},21107,"GC.3.4602",null,3,"T",2213,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4340,2213.358]
[17,{"$raw":"00000000"},21107,"CM 1162","OPER",2,null,27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","CM",4341,27.167]
[3735,{"$raw":"00000000"},21107,"GC.3.4603",null,3,"T",1025,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4342,1024.797]
[3025,{"$raw":"00000000"},21122,"GC.3.4604",null,3,"T",501,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4343,501.105]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",732,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4344,731.588]
[12,{"$raw":"00000000"},21117,"CM 1125-1","OPER",2,null,67,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4345,67.412]
[4100,{"$raw":"00000000"},21117,"GC.3.4605",null,3,"T",1506,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4346,1505.887]
[4376,{"$raw":"00000000"},21106,"GC.3.4606",null,3,"T",83,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4347,83.257]
[4073,{"$raw":"00000000"},21121,"GC.3.4607",null,3,"T",1395,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4348,1394.803]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",81,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4349,81.376]
[3857,{"$raw":"00000000"},21107,"GC.3.4608",null,3,"T",926,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4350,925.974]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",1437,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4351,1436.535]
[2881,{"$raw":"00000000"},21122,"GC.3.4609",null,3,"T",798,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4352,798.196]
[3917,{"$raw":"00000000"},21121,"GC.3.4610",null,3,"T",132,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4353,131.931]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",574,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4354,574.229]
[4170,{"$raw":"00000000"},21111,"GC.3.4611",null,3,"T",709,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4355,709.188]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4356,198.890]
[4833,{"$raw":"00000000"},21102,"GC.3.4612",null,3,"T",357,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4357,356.505]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",235,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",4358,234.704]
[615,{"$raw":"00000000"},21115,"GC.3.4613",null,3,"T",1377,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4359,1376.851]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",2276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4360,2275.849]
[620,{"$raw":"00000000"},21120,"GC.3.4614",null,3,null,1603,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","OV",4361,1603.189]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",453,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",4362,452.874]
[1470,{"$raw":"00000000"},21102,"GC.3.4615",null,3,null,93,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","OV",4363,92.574]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",483,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",4364,482.535]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",4365,149.170]
[293,{"$raw":"00000000"},21121,"GC.3.4616",null,3,"T",295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4366,295.086]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,1166,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4367,1165.517]
[3995,{"$raw":"00000000"},21121,"GC.3.4618",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4368,28.358]
[2307,{"$raw":"00000000"},21106,"GC.3.4619",null,3,"T",663,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4369,663.349]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",48,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4370,48.353]
[5085,{"$raw":"00000000"},21117,"GC.3.4620",null,3,"T",978,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4371,977.969]
[168,{"$raw":"00000000"},21121,"GC.3.4621",null,3,"T",616,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4372,615.902]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",1941,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4373,1941.086]
[2911,{"$raw":"00000000"},21122,"GC.3.4622",null,3,"T",1956,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4374,1955.607]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,425,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4375,425.272]
[888,{"$raw":"00000000"},21121,"GC.3.4623",null,3,"T",1115,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4376,1115.391]
[3927,{"$raw":"00000000"},21121,"GC.3.4624",null,3,"T",1194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4377,1194.188]
[860,{"$raw":"00000000"},21119,"GC.3.4625",null,3,"T",2990,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4378,2989.738]
[17,{"$raw":"00000000"},21119,"CM 1162","OPER",2,null,1195,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","CM",4379,1194.869]
[1563,{"$raw":"00000000"},21111,"GC.3.4626",null,3,"T",595,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4380,594.791]
[4914,{"$raw":"00000000"},21107,"GC.3.4627",null,3,"T",1250,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4381,1250.066]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4382,223.042]
[26,{"$raw":"00000000"},21121,"EM 502-1","OPER",2,"A",55,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4383,54.938]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4384,62.290]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",673,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4385,673.045]
[3761,{"$raw":"00000000"},21119,"GC.3.4628",null,3,"T",1307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4386,1307.250]
[64,{"$raw":"00000000"},21121,"GC.3.4629",null,3,"T",623,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4387,622.586]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",814,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4388,813.726]
[5004,{"$raw":"00000000"},21116,"GC.3.4631",null,3,"T",405,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4389,405.253]
[1780,{"$raw":"00000000"},21111,"GC.3.4632",null,3,"T",732,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4390,731.704]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",1020,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4391,1020.199]
[3955,{"$raw":"00000000"},21116,"GC.3.4633",null,3,null,348,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","OV",4392,348.471]
[4903,{"$raw":"00000000"},21107,"GC.3.4634",null,3,"T",564,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4393,563.993]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4394,23.582]
[1482,{"$raw":"00000000"},21111,"GC.3.4635",null,3,null,266,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",4395,265.895]
[805,{"$raw":"00000000"},21115,"GC.3.4636",null,3,"T",1315,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4396,1314.552]
[1168,{"$raw":"00000000"},21115,"GC.3.4637",null,3,"T",2079,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4397,2078.749]
[36,{"$raw":"00000000"},21115,"ER 266","OPER",1,"A",500,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4398,499.525]
[36,{"$raw":"00000000"},21115,"ER 266","OPER",1,"A",100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4399,99.691]
[430,{"$raw":"00000000"},21121,"GC.3.4638",null,3,"T",1086,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4400,1086.355]
[321,{"$raw":"00000000"},21121,"GC.3.4639",null,3,"T",197,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4401,196.534]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",749,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4402,749.080]
[4406,{"$raw":"00000000"},21106,"GC.3.4640",null,3,"T",177,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4403,177.248]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",709,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4404,709.262]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4405,8.501]
[291,{"$raw":"00000000"},21121,"GC.3.4641",null,3,"T",2198,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4406,2197.878]
[2167,{"$raw":"00000000"},21117,"GC.3.4642",null,3,"T",531,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4407,531.438]
[2167,{"$raw":"00000000"},21117,"GC.3.4643",null,3,"T",705,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4408,704.905]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,91,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4409,90.636]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,2027,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4410,2026.777]
[2795,{"$raw":"00000000"},21122,"GC.3.4645",null,3,"T",303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4411,302.564]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,641,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4412,640.664]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,494,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4413,493.867]
[777,{"$raw":"00000000"},21121,"GC.3.4646",null,3,"T",1496,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4414,1496.296]
[1594,{"$raw":"00000000"},21111,"GC.3.4647",null,3,"T",224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4415,224.423]
[3968,{"$raw":"00000000"},21103,"GC.3.4648",null,3,"T",2858,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4416,2858.329]
[4789,{"$raw":"00000000"},21118,"GC.3.4649",null,3,"T",845,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4417,844.596]
[1438,{"$raw":"00000000"},21122,"GC.3.4650",null,3,"T",104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4418,104.190]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",96,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4419,96.431]
[2906,{"$raw":"00000000"},21122,"GC.3.4651",null,3,"T",601,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4420,601.262]
[1629,{"$raw":"00000000"},21111,"GC.3.4652",null,3,"T",722,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4421,721.685]
[4550,{"$raw":"00000000"},21102,"GC.3.4653",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4422,4.937]
[729,{"$raw":"00000000"},21103,"GC.3.4654",null,3,"T",920,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4423,919.925]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",1845,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",4424,1844.563]
[1501,{"$raw":"00000000"},21111,"GC.3.4655",null,3,"T",162,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4425,162.199]
[491,{"$raw":"00000000"},21103,"GC.3.4656",null,3,"T",661,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4426,660.776]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,938,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4427,938.331]
[2060,{"$raw":"00000000"},21117,"GC.3.4657",null,3,"T",1520,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4428,1520.211]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4429,237.911]
[526,{"$raw":"00000000"},21121,"GC.3.4658",null,3,"T",1611,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4430,1611.294]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4431,161.424]
[565,{"$raw":"00000000"},21120,"GC.3.4659",null,3,"T",893,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4432,893.128]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",4433,17.386]
[3915,{"$raw":"00000000"},21121,"GC.3.4660",null,3,"T",1605,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4434,1605.002]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4435,255.897]
[4336,{"$raw":"00000000"},21117,"GC.3.4661",null,3,"T",626,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4436,626.401]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",535,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4437,534.999]
[27,{"$raw":"00000000"},21121,"EM 502-2","OPER",2,"A",131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4438,131.269]
[4830,{"$raw":"00000000"},21102,"GC.3.4662",null,3,"T",402,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4439,402.454]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4440,35.635]
[3560,{"$raw":"00000000"},21102,"GC.3.4663",null,3,"T",689,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4441,688.695]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",4442,210.602]
[3368,{"$raw":"00000000"},21102,"GC.3.4664",null,3,"T",646,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4443,645.950]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",542,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",4444,542.132]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,1143,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4445,1142.655]
[6,{"$raw":"00000000"},21118,"CM 1102","OPER",2,null,117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Colos","ODEMIRA","Grândola-Cercal","CM",4446,116.628]
[4898,{"$raw":"00000000"},21107,"GC.3.4666",null,3,"T",483,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4447,482.594]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",1510,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4448,1509.777]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",344,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4449,344.345]
[4050,{"$raw":"00000000"},21102,"GC.3.4667",null,3,"T",181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4450,180.948]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4451,382.368]
[3228,{"$raw":"00000000"},21122,"GC.3.4668",null,3,"T",1119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4452,1118.510]
[2562,{"$raw":"00000000"},21106,"GC.3.4669",null,3,"T",232,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4453,232.028]
[1250,{"$raw":"00000000"},21107,"GC.3.4670",null,3,"T",1294,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4454,1294.304]
[1250,{"$raw":"00000000"},21107,"GC.3.4671",null,3,"T",2786,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4455,2785.535]
[4762,{"$raw":"00000000"},21102,"GC.3.4672",null,3,"T",852,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4456,852.376]
[2876,{"$raw":"00000000"},21122,"GC.3.4673",null,3,"T",198,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4457,198.291]
[918,{"$raw":"00000000"},21121,"GC.3.4674",null,3,"T",635,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4458,634.977]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",419,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4459,418.850]
[4528,{"$raw":"00000000"},21118,"GC.3.4676",null,3,"T",512,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4460,512.047]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",882,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4461,881.890]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4462,333.045]
[608,{"$raw":"00000000"},21120,"GC.3.4677",null,3,"T",1151,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4463,1150.527]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",338,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",4464,337.604]
[155,{"$raw":"00000000"},21121,"GC.3.4678",null,3,"T",1609,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4465,1609.494]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",2108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4466,2107.911]
[3981,{"$raw":"00000000"},21119,"GC.3.4679",null,3,null,409,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","OV",4467,408.789]
[1469,{"$raw":"00000000"},21120,"GC.3.4680",null,3,null,1150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","OV",4468,1149.548]
[3026,{"$raw":"00000000"},21122,"GC.3.4681",null,3,"T",240,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4469,240.266]
[3233,{"$raw":"00000000"},21122,"GC.3.4682",null,3,"T",537,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4470,536.761]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",608,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4471,607.732]
[21,{"$raw":"00000000"},21121,"EM 120-2","OPER",2,"A",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4472,39.179]
[2991,{"$raw":"00000000"},21122,"GC.3.4683",null,3,"T",867,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4473,866.945]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4474,487.906]
[1097,{"$raw":"00000000"},21119,"GC.3.4684",null,3,"T",215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4475,214.655]
[2245,{"$raw":"00000000"},21106,"GC.3.4685",null,3,"T",898,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4476,898.339]
[453,{"$raw":"00000000"},21103,"GC.3.4686",null,3,"T",190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4477,190.187]
[3962,{"$raw":"00000000"},21116,"GC.3.4687",null,3,"T",197,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4478,197.181]
[3558,{"$raw":"00000000"},21102,"GC.3.4689",null,3,"T",247,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4479,246.987]
[4713,{"$raw":"00000000"},21118,"GC.3.4690",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4480,6.728]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4481,46.204]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4482,14.728]
[2776,{"$raw":"00000000"},21118,"GC.3.4691",null,3,"T",742,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4483,741.657]
[2095,{"$raw":"00000000"},21106,"GC.3.4692",null,3,"T",1927,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4484,1926.685]
[3782,{"$raw":"00000000"},21119,"GC.3.4693",null,3,"T",169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4485,169.423]
[4733,{"$raw":"00000000"},21122,"GC.3.4694",null,3,"T",1709,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4486,1709.036]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4487,307.012]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",151,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4488,151.307]
[4171,{"$raw":"00000000"},21111,"GC.3.4695",null,3,"T",258,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4489,258.408]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4490,27.826]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4491,19.590]
[3779,{"$raw":"00000000"},21103,"GC.3.4696",null,3,"T",1830,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4492,1830.221]
[1021,{"$raw":"00000000"},21121,"GC.3.4697",null,3,"T",308,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4493,308.074]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,1442,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4494,1442.370]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4495,57.561]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4496,148.544]
[2884,{"$raw":"00000000"},21122,"GC.3.4699",null,3,"T",1430,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4497,1429.876]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,575,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4498,575.050]
[1458,{"$raw":"00000000"},21119,"GC.3.4700",null,3,"T",54,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4499,53.662]
[23,{"$raw":"00000000"},21119,"EM 393","OPER",2,"A",362,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","EM",4500,361.506]
[1912,{"$raw":"00000000"},21111,"GC.3.4701",null,3,"T",1022,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4501,1022.326]
[3573,{"$raw":"00000000"},21102,"GC.3.4702",null,3,"T",592,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4502,591.722]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",218,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",4503,217.810]
[3694,{"$raw":"00000000"},21120,"GC.3.4703",null,3,"T",1369,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4504,1369.114]
[1139,{"$raw":"00000000"},21107,"GC.3.4704",null,3,"T",455,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4505,455.111]
[931,{"$raw":"00000000"},21116,"GC.3.4705",null,3,"T",1060,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4506,1060.043]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","EM",4507,47.095]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",1071,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","EM",4508,1071.450]
[1146,{"$raw":"00000000"},21107,"GC.3.4706",null,3,"T",1622,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4509,1622.469]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",950,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4510,950.227]
[4112,{"$raw":"00000000"},21118,"GC.3.4707",null,3,"T",193,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4511,193.023]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",539,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4512,538.786]
[458,{"$raw":"00000000"},21103,"GC.3.4708",null,3,"T",81,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4513,81.423]
[2322,{"$raw":"00000000"},21106,"GC.3.4709",null,3,"T",553,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4514,553.005]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",639,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4515,639.043]
[843,{"$raw":"00000000"},21107,"GC.3.4710",null,3,"T",285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4516,284.889]
[523,{"$raw":"00000000"},21121,"GC.3.4711",null,3,"T",1152,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4517,1151.614]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,1060,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4518,1059.932]
[1574,{"$raw":"00000000"},21111,"GC.3.4712",null,3,null,372,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",4519,372.082]
[16,{"$raw":"00000000"},21121,"CM 1159","OPER",2,null,167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4520,166.671]
[4093,{"$raw":"00000000"},21121,"GC.3.4713",null,3,"T",762,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4521,761.618]
[1549,{"$raw":"00000000"},21111,"GC.3.4714",null,3,"T",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4522,218.875]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,236,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4523,235.977]
[5003,{"$raw":"00000000"},21117,"GC.3.4715",null,3,"T",1747,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4524,1747.164]
[1184,{"$raw":"00000000"},21115,"GC.3.4716",null,3,"T",27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4525,26.917]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4526,370.444]
[4142,{"$raw":"00000000"},21121,"GC.3.4717",null,3,"T",37,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4527,36.926]
[4142,{"$raw":"00000000"},21121,"GC.3.4718",null,3,"T",45,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4528,45.467]
[2300,{"$raw":"00000000"},21106,"GC.3.4719",null,3,"T",227,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4529,227.166]
[3313,{"$raw":"00000000"},21118,"GC.3.4720",null,3,null,658,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","OV",4530,657.729]
[582,{"$raw":"00000000"},21120,"GC.3.4721",null,3,"T",5545,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4531,5544.617]
[866,{"$raw":"00000000"},21107,"GC.3.4722",null,3,"T",1367,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4532,1367.067]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",516,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4533,516.173]
[4203,{"$raw":"00000000"},21111,"GC.3.4723",null,3,"T",503,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4534,502.675]
[3690,{"$raw":"00000000"},21102,"GC.3.4724",null,3,"T",1491,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4535,1491.239]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,769,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4536,768.852]
[1571,{"$raw":"00000000"},21111,"GC.3.4725",null,3,"T",462,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4537,462.148]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,111,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4538,111.276]
[291,{"$raw":"00000000"},21121,"GC.3.4726",null,3,"T",932,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4539,932.180]
[4483,{"$raw":"00000000"},21106,"GC.3.4727",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4540,91.586]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",91,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4541,91.377]
[56,{"$raw":"00000000"},21121,"GC.3.4728",null,3,"T",2436,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4542,2436.391]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",610,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4543,609.807]
[62,{"$raw":"00000000"},21121,"GC.3.4729",null,3,"T",1269,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4544,1269.467]
[21,{"$raw":"00000000"},21121,"EM 120-2","OPER",2,"A",455,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4545,455.430]
[21,{"$raw":"00000000"},21121,"EM 120-2","OPER",2,"A",572,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4546,571.794]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4547,488.106]
[134,{"$raw":"00000000"},21119,"GC.3.4731",null,3,"T",2805,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4548,2805.057]
[17,{"$raw":"00000000"},21119,"CM 1162","OPER",2,null,263,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","CM",4549,262.774]
[144,{"$raw":"00000000"},21121,"GC.3.4732",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4550,10.639]
[144,{"$raw":"00000000"},21121,"GC.3.4733",null,3,"T",1076,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4551,1075.979]
[27,{"$raw":"00000000"},21121,"EM 502-2","OPER",2,"A",1403,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4552,1403.499]
[157,{"$raw":"00000000"},21121,"GC.3.4734",null,3,"T",71,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4553,71.221]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",563,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4554,563.347]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",611,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4555,610.672]
[206,{"$raw":"00000000"},21121,"GC.3.4735",null,3,"T",1066,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4556,1065.794]
[206,{"$raw":"00000000"},21121,"GC.3.4736",null,3,"T",1697,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4557,1697.341]
[21,{"$raw":"00000000"},21121,"EM 120-2","OPER",2,"A",365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4558,365.239]
[210,{"$raw":"00000000"},21121,"GC.3.4737",null,3,"T",375,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4559,375.109]
[21,{"$raw":"00000000"},21121,"EM 120-2","OPER",2,"A",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4560,94.947]
[21,{"$raw":"00000000"},21121,"EM 120-2","OPER",2,"A",475,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4561,474.518]
[211,{"$raw":"00000000"},21121,"GC.3.4738",null,3,"T",553,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4562,552.886]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",297,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4563,296.691]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",979,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4564,979.257]
[221,{"$raw":"00000000"},21121,"GC.3.4739",null,3,"T",102,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4565,102.365]
[221,{"$raw":"00000000"},21121,"GC.3.4740",null,3,"T",924,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4566,924.357]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",840,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4567,840.149]
[327,{"$raw":"00000000"},21121,"GC.3.4741",null,3,"T",271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4568,270.706]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,1255,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4569,1255.469]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,264,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4570,263.592]
[335,{"$raw":"00000000"},21121,"GC.3.4742",null,3,"T",802,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4571,802.404]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4572,327.386]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",878,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4573,878.184]
[341,{"$raw":"00000000"},21121,"GC.3.4743",null,3,"T",1220,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4574,1220.023]
[341,{"$raw":"00000000"},21121,"GC.3.4744",null,3,"T",2107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4575,2106.732]
[344,{"$raw":"00000000"},21121,"GC.3.4745",null,3,"T",1247,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4576,1247.246]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4577,40.606]
[345,{"$raw":"00000000"},21121,"GC.3.4746",null,3,"T",1043,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4578,1042.722]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,1606,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4579,1606.274]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4580,146.907]
[353,{"$raw":"00000000"},21121,"GC.3.4747",null,3,"T",180,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4581,179.602]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",843,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4582,842.631]
[356,{"$raw":"00000000"},21121,"GC.3.4748",null,3,"T",1899,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4583,1899.297]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",557,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4584,556.789]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4585,277.472]
[359,{"$raw":"00000000"},21121,"GC.3.4749",null,3,"T",1600,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4586,1600.028]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",431,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4587,430.679]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4588,167.180]
[413,{"$raw":"00000000"},21103,"GC.3.4750",null,3,"T",1040,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4589,1039.577]
[413,{"$raw":"00000000"},21103,"GC.3.4751",null,3,"T",1222,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4590,1221.958]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,1928,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4591,1928.423]
[416,{"$raw":"00000000"},21103,"GC.3.4752",null,3,"T",2239,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4592,2238.585]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",1284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",4593,1284.150]
[426,{"$raw":"00000000"},21103,"GC.3.4753",null,3,"T",1482,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4594,1482.438]
[426,{"$raw":"00000000"},21103,"GC.3.4754",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4595,1.451]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",4596,1.451]
[426,{"$raw":"00000000"},21103,"GC.3.4755",null,3,"T",2097,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4597,2097.400]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",2076,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",4598,2075.915]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",301,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",4599,301.408]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",552,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",4600,551.609]
[436,{"$raw":"00000000"},21121,"GC.3.4758",null,3,"T",1137,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4601,1136.719]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,1296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4602,1295.667]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,384,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4603,383.708]
[460,{"$raw":"00000000"},21103,"GC.3.4759",null,3,"T",817,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4604,817.071]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,667,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4605,666.659]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,863,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4606,862.566]
[464,{"$raw":"00000000"},21103,"GC.3.4760",null,3,"T",1642,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4607,1641.820]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,864,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4608,863.744]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,301,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4609,301.342]
[488,{"$raw":"00000000"},21103,"GC.3.4761",null,3,"T",793,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4610,793.158]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,210,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4611,210.428]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,1122,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4612,1121.679]
[489,{"$raw":"00000000"},21103,"GC.3.4762",null,3,"T",1463,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4613,1462.673]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4614,307.485]
[490,{"$raw":"00000000"},21103,"GC.3.4763",null,3,"T",557,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4615,557.452]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4616,339.857]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,68,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4617,68.470]
[20,{"$raw":"00000000"},21103,"CM 1188","OPER",2,null,525,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4618,525.332]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",976,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",4619,975.709]
[493,{"$raw":"00000000"},21103,"GC.3.4764",null,3,null,358,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","OV",4620,358.132]
[493,{"$raw":"00000000"},21103,"GC.3.4765",null,3,null,853,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","OV",4621,852.600]
[506,{"$raw":"00000000"},21121,"GC.3.4766",null,3,"T",873,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4622,873.109]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,813,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4623,812.982]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4624,87.586]
[509,{"$raw":"00000000"},21121,"GC.3.4767",null,3,"T",2037,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4625,2036.606]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",1104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4626,1104.468]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",268,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4627,267.751]
[511,{"$raw":"00000000"},21121,"GC.3.4768",null,3,"T",741,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4628,741.305]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",1788,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4629,1787.830]
[520,{"$raw":"00000000"},21121,"GC.3.4769",null,3,"T",1826,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4630,1826.090]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",1443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4631,1442.633]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",484,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4632,484.206]
[525,{"$raw":"00000000"},21121,"GC.3.4770",null,3,"T",1532,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4633,1532.212]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4634,189.361]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",864,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4635,864.438]
[538,{"$raw":"00000000"},21106,"GC.3.4771",null,3,"T",973,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4636,973.438]
[539,{"$raw":"00000000"},21106,"GC.3.4772",null,3,"T",1115,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4637,1115.189]
[5015,{"$raw":"00000000"},21106,"GC.3.4773",null,3,"T",390,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4638,389.564]
[567,{"$raw":"00000000"},21120,"GC.3.4774",null,3,"T",772,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4639,772.133]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",824,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",4640,823.586]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",532,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",4641,532.357]
[574,{"$raw":"00000000"},21106,"GC.3.4775",null,3,"T",185,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4642,184.889]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",1071,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4643,1070.763]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",1779,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4644,1778.788]
[576,{"$raw":"00000000"},21106,"GC.3.4776",null,3,"T",3643,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4645,3642.991]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",2216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4646,2215.690]
[583,{"$raw":"00000000"},21120,"GC.3.4777",null,3,"T",1247,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4647,1247.348]
[584,{"$raw":"00000000"},21120,"GC.3.4778",null,3,"T",1438,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4648,1438.322]
[584,{"$raw":"00000000"},21120,"GC.3.4779",null,3,"T",982,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4649,982.070]
[34,{"$raw":"00000000"},21120,"EN 263","OPER",1,"A",261,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","EN",4650,261.149]
[586,{"$raw":"00000000"},21120,"GC.3.4780",null,3,"T",828,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4651,827.962]
[34,{"$raw":"00000000"},21120,"EN 263","OPER",1,"A",422,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","EN",4652,421.821]
[590,{"$raw":"00000000"},21120,"GC.3.4781",null,3,"T",441,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4653,440.568]
[593,{"$raw":"00000000"},21120,"GC.3.4782",null,3,"T",1751,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4654,1751.020]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",683,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",4655,683.037]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",516,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4656,515.631]
[616,{"$raw":"00000000"},21115,"GC.3.4784",null,3,"T",1380,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4657,1380.220]
[618,{"$raw":"00000000"},21115,"GC.3.4785",null,3,"T",1866,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4658,1865.857]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",511,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4659,511.134]
[624,{"$raw":"00000000"},21120,"GC.3.4786",null,3,"T",599,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4660,598.882]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",4661,81.911]
[634,{"$raw":"00000000"},21116,"GC.3.4787",null,3,"T",54,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4662,54.078]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","EM",4663,333.338]
[637,{"$raw":"00000000"},21116,"GC.3.4788",null,3,"T",1524,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4664,1523.995]
[675,{"$raw":"00000000"},21121,"GC.3.4789",null,3,"T",492,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4665,492.132]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,960,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4666,960.150]
[765,{"$raw":"00000000"},21115,"GC.3.4790",null,3,"T",1769,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4667,1769.265]
[769,{"$raw":"00000000"},21115,"GC.3.4791",null,3,"T",1214,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4668,1214.427]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",977,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4669,976.696]
[771,{"$raw":"00000000"},21115,"GC.3.4792",null,3,"T",1087,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",4670,1086.685]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",389,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4671,389.179]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",1051,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",4672,1051.468]
[783,{"$raw":"00000000"},21103,"GC.3.4793",null,3,"T",3117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4673,3117.191]
[20,{"$raw":"00000000"},21103,"CM 1188","OPER",2,null,276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4674,276.080]
[20,{"$raw":"00000000"},21103,"CM 1188","OPER",2,null,22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",4675,21.860]
[786,{"$raw":"00000000"},21103,"GC.3.4794",null,3,"T",444,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4676,444.132]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",218,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",4677,218.058]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",4442,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",4678,4441.724]
[802,{"$raw":"00000000"},21107,"GC.3.4795",null,3,"T",1221,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4679,1220.726]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",2036,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4680,2035.608]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4681,4.342]
[808,{"$raw":"00000000"},21107,"GC.3.4796",null,3,"T",812,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4682,812.128]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4683,442.968]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",1635,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4684,1634.875]
[864,{"$raw":"00000000"},21107,"GC.3.4797",null,3,"T",1504,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4685,1504.331]
[864,{"$raw":"00000000"},21107,"GC.3.4798",null,3,"T",35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4686,35.350]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",664,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4687,664.284]
[880,{"$raw":"00000000"},21117,"GC.3.4799",null,3,"T",1443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4688,1443.482]
[881,{"$raw":"00000000"},21117,"GC.3.4800",null,3,"T",634,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4689,633.641]
[4366,{"$raw":"00000000"},21117,"GC.3.4801",null,3,"T",381,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4690,380.959]
[8,{"$raw":"00000000"},21117,"CM 1122-1","OPER",2,null,2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4691,1.942]
[8,{"$raw":"00000000"},21117,"CM 1122-1","OPER",2,null,564,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4692,563.724]
[7,{"$raw":"00000000"},21121,"CM 1122","OPER",2,null,703,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4693,703.243]
[7,{"$raw":"00000000"},21121,"CM 1122","OPER",2,null,50,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4694,50.294]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,849,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4695,849.101]
[882,{"$raw":"00000000"},21121,"GC.3.4802",null,3,"T",1811,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4696,1810.721]
[882,{"$raw":"00000000"},21121,"GC.3.4803",null,3,"T",136,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4697,135.536]
[885,{"$raw":"00000000"},21121,"GC.3.4804",null,3,"T",1780,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4698,1780.018]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,821,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4699,821.136]
[890,{"$raw":"00000000"},21121,"GC.3.4805",null,3,"T",555,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4700,555.477]
[890,{"$raw":"00000000"},21121,"GC.3.4806",null,3,"T",731,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4701,730.766]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,561,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4702,561.049]
[904,{"$raw":"00000000"},21117,"GC.3.4807",null,3,"T",1533,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4703,1532.563]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,243,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4704,242.686]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4705,149.929]
[913,{"$raw":"00000000"},21121,"GC.3.4809",null,3,"T",1711,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4706,1710.802]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,514,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4707,513.643]
[922,{"$raw":"00000000"},21121,"GC.3.4810",null,3,"T",729,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4708,729.200]
[923,{"$raw":"00000000"},21121,"GC.3.4811",null,3,"T",1107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4709,1106.612]
[1023,{"$raw":"00000000"},21121,"GC.3.4812",null,3,"T",1919,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4710,1919.326]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",1356,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4711,1355.539]
[929,{"$raw":"00000000"},21121,"GC.3.4813",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4712,5.563]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",1058,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4713,1057.904]
[933,{"$raw":"00000000"},21103,"GC.3.4814",null,3,"T",70,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",4714,70.062]
[945,{"$raw":"00000000"},21121,"GC.3.4815",null,3,"T",418,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4715,417.815]
[945,{"$raw":"00000000"},21121,"GC.3.4816",null,3,"T",1619,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4716,1618.531]
[946,{"$raw":"00000000"},21121,"GC.3.4817",null,3,"T",482,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4717,481.854]
[946,{"$raw":"00000000"},21121,"GC.3.4818",null,3,"T",852,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4718,851.712]
[26,{"$raw":"00000000"},21121,"EM 502-1","OPER",2,"A",662,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4719,662.215]
[26,{"$raw":"00000000"},21121,"EM 502-1","OPER",2,"A",252,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4720,252.064]
[951,{"$raw":"00000000"},21121,"GC.3.4819",null,3,"T",1372,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4721,1371.811]
[27,{"$raw":"00000000"},21121,"EM 502-2","OPER",2,"A",588,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4722,588.316]
[27,{"$raw":"00000000"},21121,"EM 502-2","OPER",2,"A",851,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4723,851.070]
[952,{"$raw":"00000000"},21121,"GC.3.4820",null,3,"T",1006,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4724,1005.515]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",1292,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4725,1292.024]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",1129,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4726,1128.561]
[1001,{"$raw":"00000000"},21121,"GC.3.4821",null,3,"T",622,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4727,622.482]
[1002,{"$raw":"00000000"},21121,"GC.3.4822",null,3,"T",427,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4728,426.544]
[1002,{"$raw":"00000000"},21121,"GC.3.4823",null,3,"T",1062,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4729,1061.574]
[1003,{"$raw":"00000000"},21121,"GC.3.4824",null,3,"T",407,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4730,406.529]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,651,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4731,650.614]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,51,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",4732,50.719]
[1016,{"$raw":"00000000"},21121,"GC.3.4826",null,3,"T",651,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4733,651.455]
[1016,{"$raw":"00000000"},21121,"GC.3.4827",null,3,"T",905,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4734,905.356]
[1020,{"$raw":"00000000"},21117,"GC.3.4828",null,3,"T",1142,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4735,1142.171]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,235,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4736,234.598]
[1034,{"$raw":"00000000"},21116,"GC.3.4829",null,3,"T",100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4737,100.078]
[16,{"$raw":"00000000"},21116,"CM 1159","OPER",2,null,545,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","CM",4738,545.384]
[1041,{"$raw":"00000000"},21116,"GC.3.4830",null,3,"T",355,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4739,355.439]
[35,{"$raw":"00000000"},21116,"ER 120","OPER",1,"A",863,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","ER",4740,863.191]
[1042,{"$raw":"00000000"},21116,"GC.3.4831",null,3,"T",316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4741,315.684]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",236,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","EM",4742,235.762]
[35,{"$raw":"00000000"},21116,"ER 120","OPER",1,"A",379,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","ER",4743,379.463]
[1053,{"$raw":"00000000"},21121,"GC.3.4832",null,3,"T",1197,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4744,1196.857]
[26,{"$raw":"00000000"},21121,"EM 502-1","OPER",2,"A",742,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4745,742.484]
[1054,{"$raw":"00000000"},21121,"GC.3.4833",null,3,"T",1640,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4746,1639.955]
[1054,{"$raw":"00000000"},21121,"GC.3.4834",null,3,"T",813,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4747,813.228]
[26,{"$raw":"00000000"},21121,"EM 502-1","OPER",2,"A",507,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4748,506.960]
[26,{"$raw":"00000000"},21121,"EM 502-1","OPER",2,"A",241,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",4749,240.502]
[1059,{"$raw":"00000000"},21121,"GC.3.4835",null,3,"T",1926,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",4750,1926.153]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",87,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",4751,87.079]
[1063,{"$raw":"00000000"},21116,"GC.3.4836",null,3,"T",514,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",4752,514.423]
[16,{"$raw":"00000000"},21116,"CM 1159","OPER",2,null,1491,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","CM",4753,1490.698]
[1089,{"$raw":"00000000"},21119,"GC.3.4837",null,3,"T",1047,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4754,1047.053]
[23,{"$raw":"00000000"},21119,"EM 393","OPER",2,"A",1507,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","EM",4755,1507.445]
[1094,{"$raw":"00000000"},21119,"GC.3.4838",null,3,"T",686,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4756,686.062]
[1094,{"$raw":"00000000"},21119,"GC.3.4839",null,3,"T",3100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4757,3099.768]
[23,{"$raw":"00000000"},21119,"EM 393","OPER",2,"A",1357,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","EM",4758,1356.929]
[23,{"$raw":"00000000"},21119,"EM 393","OPER",2,"A",1178,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","EM",4759,1178.295]
[1128,{"$raw":"00000000"},21107,"GC.3.4840",null,3,"T",134,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4760,133.501]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",625,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4761,625.011]
[1137,{"$raw":"00000000"},21107,"GC.3.4841",null,3,"T",256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4762,255.996]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",822,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4763,822.064]
[1138,{"$raw":"00000000"},21107,"GC.3.4842",null,3,"T",341,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4764,340.915]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",274,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4765,273.696]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",454,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4766,453.826]
[24,{"$raw":"00000000"},21117,"EM 393-1","OPER",2,"A",844,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","EM",4767,844.109]
[1190,{"$raw":"00000000"},21102,"GC.3.4844",null,3,"T",866,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4768,866.236]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,1014,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4769,1013.565]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",417,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4770,417.453]
[1200,{"$raw":"00000000"},21122,"GC.3.4846",null,3,"T",157,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4771,157.097]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",552,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4772,551.869]
[1208,{"$raw":"00000000"},21107,"GC.3.4848",null,3,"T",439,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4773,439.073]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",974,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4774,974.113]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4775,304.248]
[1223,{"$raw":"00000000"},21122,"GC.3.4849",null,3,"T",1270,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4776,1269.938]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",168,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4777,167.761]
[1248,{"$raw":"00000000"},21118,"GC.3.4850",null,3,"T",1622,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4778,1621.526]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4779,26.287]
[1298,{"$raw":"00000000"},21107,"GC.3.4851",null,3,"T",298,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4780,298.468]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",1701,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4781,1701.327]
[1324,{"$raw":"00000000"},21119,"GC.3.4852",null,3,"T",2200,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4782,2199.501]
[1333,{"$raw":"00000000"},21119,"GC.3.4853",null,3,"T",623,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4783,623.401]
[1335,{"$raw":"00000000"},21119,"GC.3.4854",null,3,"T",1470,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4784,1470.296]
[1336,{"$raw":"00000000"},21119,"GC.3.4855",null,3,"T",160,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4785,160.132]
[1337,{"$raw":"00000000"},21119,"GC.3.4856",null,3,"T",567,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",4786,566.724]
[1409,{"$raw":"00000000"},21120,"GC.3.4857",null,3,"T",735,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4787,735.352]
[34,{"$raw":"00000000"},21120,"EN 263","OPER",1,"A",379,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","EN",4788,378.604]
[34,{"$raw":"00000000"},21120,"EN 263","OPER",1,"A",1545,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","EN",4789,1544.806]
[1421,{"$raw":"00000000"},21122,"GC.3.4858",null,3,"T",1003,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4790,1002.913]
[1421,{"$raw":"00000000"},21122,"GC.3.4859",null,3,"T",597,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4791,596.945]
[1430,{"$raw":"00000000"},21106,"GC.3.4860",null,3,"T",131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4792,131.072]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,1715,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4793,1714.881]
[1431,{"$raw":"00000000"},21106,"GC.3.4861",null,3,"T",107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4794,106.938]
[1431,{"$raw":"00000000"},21106,"GC.3.4862",null,3,"T",517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4795,516.833]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,229,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4796,229.419]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,168,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4797,167.934]
[1439,{"$raw":"00000000"},21122,"GC.3.4863",null,3,"T",232,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4798,232.463]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",67,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",4799,66.528]
[1466,{"$raw":"00000000"},21107,"GC.3.4864",null,3,null,487,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","OV",4800,486.618]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",281,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4801,281.438]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",4802,29.979]
[1474,{"$raw":"00000000"},21107,"GC.3.4865",null,3,"T",123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",4803,122.955]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",1289,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",4804,1289.488]
[1478,{"$raw":"00000000"},21118,"GC.3.4866",null,3,"T",457,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4805,457.107]
[1478,{"$raw":"00000000"},21118,"GC.3.4867",null,3,"T",182,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4806,181.847]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",507,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",4807,507.300]
[1481,{"$raw":"00000000"},21111,"GC.3.4868",null,3,null,131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",4808,131.228]
[39,{"$raw":"00000000"},21111,"ER 393","OPER",1,"A",207,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4809,206.703]
[1500,{"$raw":"00000000"},21111,"GC.3.4869",null,3,"T",260,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4810,260.003]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,423,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4811,422.536]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4812,248.506]
[1558,{"$raw":"00000000"},21111,"GC.3.4870",null,3,"T",680,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4813,679.516]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,498,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4814,498.112]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4815,325.749]
[1561,{"$raw":"00000000"},21111,"GC.3.4871",null,3,"T",345,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4816,345.241]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,624,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4817,624.366]
[1565,{"$raw":"00000000"},21111,"GC.3.4872",null,3,"T",789,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4818,788.771]
[1565,{"$raw":"00000000"},21111,"GC.3.4873",null,3,"T",356,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4819,356.163]
[1568,{"$raw":"00000000"},21111,"GC.3.4874",null,3,"T",511,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4820,511.265]
[1568,{"$raw":"00000000"},21111,"GC.3.4875",null,3,"T",434,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4821,433.986]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,121,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4822,120.642]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,684,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4823,683.974]
[1590,{"$raw":"00000000"},21111,"GC.3.4876",null,3,"T",191,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4824,191.018]
[1596,{"$raw":"00000000"},21111,"GC.3.4877",null,3,"T",405,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4825,404.500]
[1598,{"$raw":"00000000"},21111,"GC.3.4878",null,3,"T",350,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4826,349.593]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4827,97.698]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,622,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4828,622.296]
[1616,{"$raw":"00000000"},21111,"GC.3.4879",null,3,"T",598,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4829,598.185]
[1514,{"$raw":"00000000"},21111,"GC.3.4880",null,3,"T",190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4830,190.204]
[1636,{"$raw":"00000000"},21111,"GC.3.4881",null,3,"T",329,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4831,329.186]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,859,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4832,859.273]
[1644,{"$raw":"00000000"},21111,"GC.3.4882",null,3,"T",826,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4833,825.517]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,12,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4834,11.519]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,582,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4835,581.615]
[1666,{"$raw":"00000000"},21111,"GC.3.4883",null,3,"T",291,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4836,290.586]
[1671,{"$raw":"00000000"},21111,"GC.3.4884",null,3,"T",389,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4837,389.152]
[1695,{"$raw":"00000000"},21111,"GC.3.4885",null,3,"T",371,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4838,370.777]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4839,12.761]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",383,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4840,383.406]
[1723,{"$raw":"00000000"},21111,"GC.3.4886",null,3,"T",373,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4841,372.760]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",49,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4842,48.677]
[1734,{"$raw":"00000000"},21111,"GC.3.4887",null,3,"T",292,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4843,291.725]
[1735,{"$raw":"00000000"},21111,"GC.3.4888",null,3,"T",277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4844,276.680]
[30,{"$raw":"00000000"},21111,"EM 532","OPER",2,"A",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","EM",4845,339.469]
[1784,{"$raw":"00000000"},21111,"GC.3.4889",null,3,"T",325,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4846,324.789]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4847,248.311]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",428,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4848,427.572]
[1919,{"$raw":"00000000"},21111,"GC.3.4890",null,3,"T",1057,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4849,1056.814]
[30,{"$raw":"00000000"},21111,"EM 532","OPER",2,"A",251,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","EM",4850,251.116]
[2001,{"$raw":"00000000"},21111,"GC.3.4891",null,3,"T",1115,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4851,1114.938]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4852,214.955]
[2013,{"$raw":"00000000"},21111,"GC.3.4892",null,3,null,238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",4853,237.641]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",4854,285.237]
[2033,{"$raw":"00000000"},21111,"GC.3.4893",null,3,null,319,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",4855,319.379]
[39,{"$raw":"00000000"},21111,"ER 393","OPER",1,"A",242,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4856,242.196]
[2035,{"$raw":"00000000"},21111,"GC.3.4894",null,3,"T",89,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",4857,89.479]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",67,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4858,67.084]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",155,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",4859,154.743]
[2068,{"$raw":"00000000"},21117,"GC.3.4895",null,3,"T",600,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4860,599.520]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",685,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4861,685.322]
[2069,{"$raw":"00000000"},21117,"GC.3.4896",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4862,23.546]
[2069,{"$raw":"00000000"},21117,"GC.3.4897",null,3,"T",422,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4863,421.720]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",407,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4864,407.199]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",213,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4865,212.914]
[2122,{"$raw":"00000000"},21117,"GC.3.4898",null,3,"T",1204,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4866,1204.008]
[9,{"$raw":"00000000"},21117,"CM 1123","OPER",2,null,52,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4867,51.949]
[9,{"$raw":"00000000"},21117,"CM 1123","OPER",2,null,1161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4868,1161.361]
[2126,{"$raw":"00000000"},21117,"GC.3.4899",null,3,"T",1123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4869,1123.086]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",1063,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4870,1062.843]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",207,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4871,206.981]
[2141,{"$raw":"00000000"},21117,"GC.3.4900",null,3,"T",1680,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4872,1679.905]
[3899,{"$raw":"00000000"},21117,"GC.3.4901",null,3,"T",1069,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4873,1068.561]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,727,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4874,727.371]
[2148,{"$raw":"00000000"},21117,"GC.3.4902",null,3,"T",274,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4875,273.892]
[2149,{"$raw":"00000000"},21117,"GC.3.4903",null,3,"T",253,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4876,253.420]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,76,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4877,75.991]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,739,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4878,738.929]
[2156,{"$raw":"00000000"},21117,"GC.3.4904",null,3,"T",936,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4879,936.115]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4880,40.498]
[2172,{"$raw":"00000000"},21117,"GC.3.4905",null,3,"T",674,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4881,674.357]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",1019,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",4882,1018.697]
[2173,{"$raw":"00000000"},21117,"GC.3.4906",null,3,"T",1126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4883,1126.422]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,292,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",4884,292.458]
[2175,{"$raw":"00000000"},21117,"GC.3.4907",null,3,"T",1061,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",4885,1061.454]
[2180,{"$raw":"00000000"},21106,"GC.3.4908",null,3,"T",770,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4886,769.897]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,413,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4887,413.355]
[2185,{"$raw":"00000000"},21106,"GC.3.4909",null,3,"T",812,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4888,811.608]
[2210,{"$raw":"00000000"},21106,"GC.3.4910",null,3,"T",2819,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4889,2818.651]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",253,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",4890,252.703]
[2217,{"$raw":"00000000"},21106,"GC.3.4911",null,3,"T",626,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4891,626.228]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",4892,188.456]
[2218,{"$raw":"00000000"},21106,"GC.3.4912",null,3,"T",506,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4893,505.718]
[4027,{"$raw":"00000000"},21106,"GC.3.4913",null,3,"T",961,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4894,961.497]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",455,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",4895,455.310]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",560,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",4896,560.340]
[2267,{"$raw":"00000000"},21106,"GC.3.4914",null,3,"T",386,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4897,385.715]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4898,517.405]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,345,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4899,345.016]
[2277,{"$raw":"00000000"},21106,"GC.3.4915",null,3,"T",326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4900,325.836]
[2277,{"$raw":"00000000"},21106,"GC.3.4916",null,3,"T",338,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4901,338.372]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,611,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4902,610.745]
[2283,{"$raw":"00000000"},21106,"GC.3.4917",null,3,"T",881,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4903,881.272]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,777,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4904,777.305]
[2309,{"$raw":"00000000"},21106,"GC.3.4918",null,3,"T",928,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4905,928.495]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4906,257.141]
[2319,{"$raw":"00000000"},21106,"GC.3.4919",null,3,"T",330,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4907,329.800]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",149,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4908,149.284]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4909,218.576]
[2325,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",402,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",4910,401.958]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4911,94.788]
[2390,{"$raw":"00000000"},21106,"GC.3.4921",null,3,"T",367,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4912,366.552]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,148,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4913,148.354]
[2399,{"$raw":"00000000"},21106,"GC.3.4922",null,3,"T",522,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4914,522.242]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,130,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4915,129.733]
[2403,{"$raw":"00000000"},21106,"GC.3.4923",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4916,143.551]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4917,104.227]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,152,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4918,151.812]
[2437,{"$raw":"00000000"},21106,"GC.3.4924",null,3,"T",1004,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4919,1003.970]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",68,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4920,67.602]
[2407,{"$raw":"00000000"},21106,"GC.3.4925",null,3,"T",626,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4921,626.118]
[2475,{"$raw":"00000000"},21106,"GC.3.4926",null,3,"T",392,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4922,392.422]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",132,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4923,131.776]
[2507,{"$raw":"00000000"},21120,"GC.3.4927",null,3,"T",187,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4924,187.388]
[2530,{"$raw":"00000000"},21120,"GC.3.4928",null,3,"T",698,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4925,697.951]
[2503,{"$raw":"00000000"},21120,"GC.3.4929",null,3,"T",271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4926,271.156]
[2508,{"$raw":"00000000"},21120,"GC.3.4930",null,3,"T",137,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4927,137.444]
[2509,{"$raw":"00000000"},21120,"GC.3.4931",null,3,"T",223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",4928,223.009]
[2560,{"$raw":"00000000"},21106,"GC.3.4932",null,3,"T",866,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4929,866.372]
[2560,{"$raw":"00000000"},21106,"GC.3.4933",null,3,"T",1157,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4930,1156.857]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",737,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4931,736.839]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",861,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",4932,860.543]
[2575,{"$raw":"00000000"},21106,"GC.3.4934",null,3,"T",445,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4933,444.557]
[3503,{"$raw":"00000000"},21106,"GC.3.4935",null,3,"T",497,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",4934,496.673]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,412,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4935,412.326]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4936,0.618]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,906,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",4937,906.015]
[2651,{"$raw":"00000000"},21118,"GC.3.4936",null,3,"T",1468,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4938,1467.703]
[2651,{"$raw":"00000000"},21118,"GC.3.4937",null,3,"T",378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4939,377.530]
[6,{"$raw":"00000000"},21118,"CM 1102","OPER",2,null,65,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Colos","ODEMIRA","Grândola-Cercal","CM",4940,65.482]
[6,{"$raw":"00000000"},21118,"CM 1102","OPER",2,null,552,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Colos","ODEMIRA","Grândola-Cercal","CM",4941,551.548]
[2665,{"$raw":"00000000"},21102,"GC.3.4938",null,3,"T",751,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4942,751.465]
[13,{"$raw":"00000000"},21102,"CM 1126","OPER",2,null,96,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",4943,95.835]
[2672,{"$raw":"00000000"},21102,"GC.3.4939",null,3,"T",371,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",4944,370.862]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",879,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",4945,879.152]
[2726,{"$raw":"00000000"},21118,"GC.3.4940",null,3,"T",737,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4946,737.047]
[2726,{"$raw":"00000000"},21118,"GC.3.4941",null,3,"T",215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4947,215.198]
[33,{"$raw":"00000000"},21118,"EN 262","OPER",1,"A",184,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","EN",4948,183.936]
[2754,{"$raw":"00000000"},21118,"GC.3.4943",null,3,"T",275,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4949,274.635]
[33,{"$raw":"00000000"},21118,"EN 262","OPER",1,"A",61,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","EN",4950,60.773]
[33,{"$raw":"00000000"},21118,"EN 262","OPER",1,"A",447,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","EN",4951,446.509]
[2757,{"$raw":"00000000"},21118,"GC.3.4944",null,3,"T",845,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4952,845.436]
[2816,{"$raw":"00000000"},21118,"GC.3.4945",null,3,"T",791,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",4953,790.537]
[33,{"$raw":"00000000"},21118,"EN 262","OPER",1,"A",586,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","EN",4954,586.043]
[2783,{"$raw":"00000000"},21122,"GC.3.4946",null,3,"T",993,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4955,993.026]
[2840,{"$raw":"00000000"},21122,"GC.3.4947",null,3,"T",474,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4956,473.827]
[2825,{"$raw":"00000000"},21122,"GC.3.4948",null,3,null,100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",4957,99.649]
[2825,{"$raw":"00000000"},21122,"GC.3.4949",null,3,null,77,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",4958,77.241]
[2834,{"$raw":"00000000"},21122,"GC.3.4950",null,3,"T",1000,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4959,1000.190]
[2834,{"$raw":"00000000"},21122,"GC.3.4951",null,3,"T",956,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4960,955.776]
[2836,{"$raw":"00000000"},21122,"GC.3.4952",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4961,189.091]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,127,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4962,127.262]
[2842,{"$raw":"00000000"},21122,"GC.3.4953",null,3,"T",411,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4963,410.578]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",362,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",4964,362.354]
[2842,{"$raw":"00000000"},21122,"GC.3.4955",null,3,"T",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4965,20.881]
[2843,{"$raw":"00000000"},21122,"GC.3.4956",null,3,"T",835,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4966,835.484]
[2843,{"$raw":"00000000"},21122,"GC.3.4958",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4967,14.670]
[2847,{"$raw":"00000000"},21122,"GC.3.4959",null,3,"T",1049,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4968,1049.083]
[2872,{"$raw":"00000000"},21122,"GC.3.4960",null,3,"T",1425,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4969,1425.438]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,444,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4970,444.200]
[2874,{"$raw":"00000000"},21122,"GC.3.4961",null,3,"T",174,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4971,174.490]
[2875,{"$raw":"00000000"},21122,"GC.3.4962",null,3,"T",1528,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4972,1528.494]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,463,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4973,463.281]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,142,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4974,141.679]
[2878,{"$raw":"00000000"},21122,"GC.3.4963",null,3,"T",256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4975,255.978]
[4648,{"$raw":"00000000"},21122,"GC.3.4964",null,3,"T",668,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4976,668.418]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,278,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4977,278.144]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,451,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4978,451.245]
[2886,{"$raw":"00000000"},21122,"GC.3.4965",null,3,"T",605,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4979,605.468]
[2887,{"$raw":"00000000"},21122,"GC.3.4966",null,3,"T",337,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4980,336.603]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4981,284.874]
[2892,{"$raw":"00000000"},21122,"GC.3.4967",null,3,"T",606,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4982,606.154]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,845,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4983,844.890]
[2893,{"$raw":"00000000"},21122,"GC.3.4968",null,3,"T",1009,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4984,1009.400]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4985,79.367]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,1188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4986,1187.902]
[2898,{"$raw":"00000000"},21122,"GC.3.4969",null,3,"T",68,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4987,68.243]
[2898,{"$raw":"00000000"},21122,"GC.3.4970",null,3,"T",663,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4988,662.733]
[2901,{"$raw":"00000000"},21122,"GC.3.4971",null,3,"T",745,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4989,744.522]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",718,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",4990,717.944]
[2904,{"$raw":"00000000"},21122,"GC.3.4972",null,3,"T",137,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4991,137.007]
[2904,{"$raw":"00000000"},21122,"GC.3.4973",null,3,"T",980,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4992,980.066]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",181,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",4993,180.609]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",572,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",4994,572.476]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",4995,28.169]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",1017,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",4996,1017.041]
[2918,{"$raw":"00000000"},21122,"GC.3.4974",null,3,"T",756,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4997,755.652]
[2921,{"$raw":"00000000"},21122,"GC.3.4975",null,3,"T",1123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4998,1123.274]
[2921,{"$raw":"00000000"},21122,"GC.3.4976",null,3,"T",625,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",4999,624.715]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",358,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5000,358.136]
[2924,{"$raw":"00000000"},21122,"GC.3.4977",null,3,"T",164,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5001,164.301]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",659,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5002,659.092]
[2939,{"$raw":"00000000"},21122,"GC.3.4978",null,3,"T",261,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5003,260.949]
[4659,{"$raw":"00000000"},21122,"GC.3.4979",null,3,"T",153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5004,153.419]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",59,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5005,58.711]
[2942,{"$raw":"00000000"},21122,"GC.3.4980",null,3,"T",279,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5006,278.693]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",345,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5007,344.570]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",51,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5008,51.340]
[2948,{"$raw":"00000000"},21122,"GC.3.4981",null,3,"T",263,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5009,262.828]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",263,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5010,262.555]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5011,160.792]
[2970,{"$raw":"00000000"},21122,"GC.3.4982",null,3,"T",814,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5012,814.292]
[2970,{"$raw":"00000000"},21122,"GC.3.4983",null,3,"T",2114,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5013,2114.167]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",323,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5014,323.036]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",497,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5015,497.203]
[3030,{"$raw":"00000000"},21122,"GC.3.4984",null,3,"T",879,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5016,879.357]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5017,117.306]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",65,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5018,65.152]
[3072,{"$raw":"00000000"},21118,"GC.3.4985",null,3,"T",1564,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5019,1564.150]
[3072,{"$raw":"00000000"},21118,"GC.3.4986",null,3,"T",902,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5020,902.284]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",401,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5021,400.737]
[3085,{"$raw":"00000000"},21118,"GC.3.4987",null,3,"T",86,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5022,86.413]
[3086,{"$raw":"00000000"},21118,"GC.3.4988",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5023,78.785]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",322,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5024,322.194]
[3088,{"$raw":"00000000"},21118,"GC.3.4989",null,3,"T",27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5025,27.016]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5026,46.760]
[3102,{"$raw":"00000000"},21118,"GC.3.4990",null,3,"T",450,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5027,449.513]
[6,{"$raw":"00000000"},21118,"CM 1102","OPER",2,null,585,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Colos","ODEMIRA","Grândola-Cercal","CM",5028,584.986]
[6,{"$raw":"00000000"},21118,"CM 1102","OPER",2,null,365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Colos","ODEMIRA","Grândola-Cercal","CM",5029,364.651]
[3125,{"$raw":"00000000"},21122,"GC.3.4991",null,3,"T",2524,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5030,2524.357]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",606,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5031,606.258]
[3126,{"$raw":"00000000"},21122,"GC.3.4992",null,3,"T",586,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5032,585.805]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",528,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5033,528.433]
[3208,{"$raw":"00000000"},21118,"GC.3.4993",null,3,"T",500,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5034,500.199]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5035,87.864]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",347,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5036,347.445]
[3218,{"$raw":"00000000"},21122,"GC.3.4994",null,3,"T",559,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5037,558.596]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",1023,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5038,1022.835]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",869,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5039,868.754]
[3241,{"$raw":"00000000"},21122,"GC.3.4995",null,3,"T",433,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5040,433.305]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",503,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5041,503.148]
[3242,{"$raw":"00000000"},21122,"GC.3.4996",null,3,"T",162,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5042,162.092]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",25,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5043,25.340]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",515,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5044,515.129]
[3400,{"$raw":"00000000"},21102,"GC.3.4997",null,3,"T",913,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5045,913.342]
[3408,{"$raw":"00000000"},21102,"GC.3.4998",null,3,"T",625,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5046,624.681]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",696,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5047,696.359]
[3420,{"$raw":"00000000"},21102,"GC.3.4999",null,3,"T",1056,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5048,1056.367]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",679,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5049,679.367]
[3422,{"$raw":"00000000"},21102,"GC.3.5000",null,3,"T",909,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5050,909.180]
[3422,{"$raw":"00000000"},21102,"GC.3.5001",null,3,"T",585,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5051,585.429]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",608,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5052,607.597]
[3434,{"$raw":"00000000"},21102,"GC.3.5002",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5053,7.070]
[3434,{"$raw":"00000000"},21102,"GC.3.5003",null,3,"T",221,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5054,220.762]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",299,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5055,298.704]
[3437,{"$raw":"00000000"},21102,"GC.3.5004",null,3,"T",451,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5056,450.638]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",164,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5057,163.938]
[3445,{"$raw":"00000000"},21102,"GC.3.5005",null,3,"T",637,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5058,637.463]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5059,167.490]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",134,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5060,134.460]
[3493,{"$raw":"00000000"},21106,"GC.3.5006",null,3,"T",403,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5061,402.617]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5062,2.468]
[3510,{"$raw":"00000000"},21106,"GC.3.5007",null,3,"T",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5063,369.545]
[3510,{"$raw":"00000000"},21106,"GC.3.5008",null,3,"T",160,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5064,160.003]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",5065,16.227]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,471,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",5066,470.979]
[34,{"$raw":"00000000"},21120,"EN 263","OPER",1,"A",955,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","EN",5067,955.174]
[34,{"$raw":"00000000"},21120,"EN 263","OPER",1,"A",264,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","EN",5068,264.141]
[3527,{"$raw":"00000000"},21102,"GC.3.5010",null,3,"T",655,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5069,655.476]
[3698,{"$raw":"00000000"},21102,"GC.3.5011",null,3,"T",374,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5070,374.237]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5071,10.609]
[3529,{"$raw":"00000000"},21102,"GC.3.5012",null,3,"T",607,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5072,606.887]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5073,169.423]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",963,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5074,963.158]
[3532,{"$raw":"00000000"},21102,"GC.3.5013",null,3,"T",437,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5075,436.927]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",228,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5076,228.073]
[3554,{"$raw":"00000000"},21102,"GC.3.5014",null,3,"T",338,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5077,338.163]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",165,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5078,164.873]
[3568,{"$raw":"00000000"},21102,"GC.3.5015",null,3,"T",765,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5079,765.477]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",1690,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5080,1690.334]
[3570,{"$raw":"00000000"},21102,"GC.3.5016",null,3,"T",617,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5081,616.952]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",178,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5082,177.866]
[3576,{"$raw":"00000000"},21102,"GC.3.5017",null,3,"T",341,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5083,340.907]
[3577,{"$raw":"00000000"},21102,"GC.3.5018",null,3,"T",649,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5084,649.175]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",83,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5085,82.988]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",250,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5086,249.569]
[3590,{"$raw":"00000000"},21102,"GC.3.5019",null,3,"T",100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5087,99.867]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,280,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5088,279.637]
[3597,{"$raw":"00000000"},21102,"GC.3.5020",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5089,53.396]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,496,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5090,496.063]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,318,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5091,318.442]
[3622,{"$raw":"00000000"},21102,"GC.3.5021",null,3,"T",220,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5092,220.217]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,633,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5093,632.558]
[3663,{"$raw":"00000000"},21118,"GC.3.5022",null,3,"T",1051,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5094,1051.450]
[3665,{"$raw":"00000000"},21118,"GC.3.5023",null,3,null,47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","OV",5095,47.454]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",427,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5096,426.829]
[3686,{"$raw":"00000000"},21102,"GC.3.5024",null,3,"T",473,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5097,472.765]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,377,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5098,376.972]
[3693,{"$raw":"00000000"},21120,"GC.3.5025",null,3,"T",3967,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",5099,3966.807]
[3704,{"$raw":"00000000"},21120,"GC.3.5026",null,3,"T",1216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",5100,1216.135]
[3705,{"$raw":"00000000"},21120,"GC.3.5027",null,3,null,1087,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","OV",5101,1086.580]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",512,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5102,512.341]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",781,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5103,780.713]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",632,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5104,631.529]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",97,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5105,96.708]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",291,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5106,290.675]
[3707,{"$raw":"00000000"},21120,"GC.3.5028",null,3,"T",2217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",5107,2216.845]
[3727,{"$raw":"00000000"},21107,"GC.3.5029",null,3,"T",447,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",5108,447.101]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",5109,22.939]
[3731,{"$raw":"00000000"},21107,"GC.3.5030",null,3,"T",349,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",5110,348.742]
[3784,{"$raw":"00000000"},21119,"GC.3.5032",null,3,"T",61,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",5111,61.272]
[31,{"$raw":"00000000"},21119,"EM 541","OPER",2,"A",287,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","EM",5112,286.621]
[31,{"$raw":"00000000"},21119,"EM 541","OPER",2,"A",688,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","EM",5113,688.117]
[3785,{"$raw":"00000000"},21103,"GC.3.5033",null,3,"T",243,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",5114,242.527]
[31,{"$raw":"00000000"},21103,"EM 541","OPER",2,"A",1008,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",5115,1007.566]
[31,{"$raw":"00000000"},21103,"EM 541","OPER",2,"A",167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",5116,166.534]
[3867,{"$raw":"00000000"},21107,"GC.3.5034",null,3,"T",4061,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",5117,4061.411]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",1032,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5118,1032.434]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",360,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5119,360.422]
[3898,{"$raw":"00000000"},21117,"GC.3.5035",null,3,"T",937,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5120,936.566]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",696,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5121,695.705]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",574,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5122,573.968]
[3904,{"$raw":"00000000"},21116,"GC.3.5036",null,3,"T",293,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",5123,292.727]
[16,{"$raw":"00000000"},21116,"CM 1159","OPER",2,null,285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","CM",5124,285.394]
[3908,{"$raw":"00000000"},21120,"GC.3.5037",null,3,null,121,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","OV",5125,121.337]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",1910,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5126,1909.612]
[3910,{"$raw":"00000000"},21121,"GC.3.5038",null,3,"T",319,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5127,318.565]
[3911,{"$raw":"00000000"},21121,"GC.3.5039",null,3,"T",2378,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5128,2378.435]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,1207,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5129,1207.331]
[3926,{"$raw":"00000000"},21121,"GC.3.5040",null,3,"T",1678,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5130,1678.210]
[27,{"$raw":"00000000"},21121,"EM 502-2","OPER",2,"A",1024,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5131,1024.387]
[3942,{"$raw":"00000000"},21121,"GC.3.5041",null,3,"T",1115,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5132,1114.897]
[218,{"$raw":"00000000"},21121,"GC.3.5042",null,3,"T",489,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5133,488.971]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",427,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",5134,426.555]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",5135,1.302]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",730,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",5136,730.435]
[3945,{"$raw":"00000000"},21121,"GC.3.5043",null,3,"T",1281,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5137,1280.880]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",105,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",5138,104.808]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",570,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",5139,569.718]
[3953,{"$raw":"00000000"},21116,"GC.3.5044",null,3,null,926,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","OV",5140,926.177]
[35,{"$raw":"00000000"},21116,"ER 120","OPER",1,"A",386,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","ER",5141,385.535]
[3954,{"$raw":"00000000"},21116,"GC.3.5045",null,3,null,1033,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","OV",5142,1033.148]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","EM",5143,341.673]
[3960,{"$raw":"00000000"},21116,"GC.3.5046",null,3,"T",769,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",5144,768.826]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",1204,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","EM",5145,1203.965]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",715,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","EM",5146,714.643]
[3963,{"$raw":"00000000"},21116,"GC.3.5047",null,3,null,1065,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","OV",5147,1065.248]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","EM",5148,316.161]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",472,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","EM",5149,471.653]
[3976,{"$raw":"00000000"},21119,"GC.3.5048",null,3,"T",2570,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",5150,2570.419]
[17,{"$raw":"00000000"},21119,"CM 1162","OPER",2,null,113,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","CM",5151,113.272]
[18,{"$raw":"00000000"},21119,"CM 1162-2","OPER",2,null,526,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","CM",5152,525.745]
[3986,{"$raw":"00000000"},21103,"GC.3.5050",null,3,"T",1953,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",5153,1953.406]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",130,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",5154,130.187]
[4016,{"$raw":"00000000"},21106,"GC.3.5051",null,3,"T",195,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5155,195.413]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",598,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5156,597.509]
[4019,{"$raw":"00000000"},21117,"GC.3.5052",null,3,"T",572,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5157,572.142]
[4019,{"$raw":"00000000"},21117,"GC.3.5053",null,3,"T",460,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5158,460.209]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",1488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5159,1488.495]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5160,16.354]
[4021,{"$raw":"00000000"},21117,"GC.3.5054",null,3,"T",963,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5161,962.811]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",502,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5162,502.218]
[4033,{"$raw":"00000000"},21117,"GC.3.5055",null,3,"T",237,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5163,236.567]
[11,{"$raw":"00000000"},21117,"CM 1125","OPER",2,null,670,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5164,670.388]
[4034,{"$raw":"00000000"},21119,"GC.3.5056",null,3,"T",4044,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",5165,4044.435]
[17,{"$raw":"00000000"},21119,"CM 1162","OPER",2,null,1097,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","CM",5166,1096.514]
[4037,{"$raw":"00000000"},21119,"GC.3.5058",null,3,"T",1929,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",5167,1928.534]
[17,{"$raw":"00000000"},21119,"CM 1162","OPER",2,null,1560,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","CM",5168,1560.360]
[17,{"$raw":"00000000"},21119,"CM 1162","OPER",2,null,67,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","CM",5169,66.745]
[4041,{"$raw":"00000000"},21103,"GC.3.5060",null,3,"T",726,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",5170,725.538]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",1509,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",5171,1509.167]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",697,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",5172,696.769]
[4047,{"$raw":"00000000"},21121,"GC.3.5061",null,3,"T",960,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5173,959.789]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5174,40.135]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,312,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5175,311.985]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",714,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",5176,713.765]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",632,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",5177,631.550]
[4064,{"$raw":"00000000"},21103,"GC.3.5063",null,3,"T",1600,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",5178,1599.887]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,2553,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",5179,2552.892]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,594,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",5180,594.348]
[4079,{"$raw":"00000000"},21121,"GC.3.5064",null,3,"T",310,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5181,310.435]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",979,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5182,978.999]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",333,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5183,333.216]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",427,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5184,427.094]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",1785,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5185,1784.983]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",2109,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5186,2108.503]
[4081,{"$raw":"00000000"},21120,"GC.3.5065",null,3,"T",3117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",5187,3117.416]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",2227,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5188,2227.406]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",45,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5189,44.877]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",1006,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5190,1006.429]
[4088,{"$raw":"00000000"},21115,"GC.3.5066",null,3,"T",3279,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",5191,3278.890]
[4091,{"$raw":"00000000"},21121,"GC.3.5067",null,3,"T",1741,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5192,1741.410]
[16,{"$raw":"00000000"},21121,"CM 1159","OPER",2,null,770,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5193,769.805]
[4092,{"$raw":"00000000"},21121,"GC.3.5068",null,3,"T",1009,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5194,1009.360]
[16,{"$raw":"00000000"},21121,"CM 1159","OPER",2,null,795,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5195,794.773]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,383,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5196,383.279]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,868,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5197,868.495]
[4092,{"$raw":"00000000"},21121,"GC.3.5069",null,3,"T",1398,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5198,1398.319]
[4094,{"$raw":"00000000"},21121,"GC.3.5070",null,3,"T",1176,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5199,1176.312]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,1765,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5200,1765.096]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5201,189.786]
[4097,{"$raw":"00000000"},21107,"GC.3.5071",null,3,"T",1283,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",5202,1282.808]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5203,1.460]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5204,222.870]
[4117,{"$raw":"00000000"},21107,"GC.3.5072",null,3,"T",1944,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",5205,1943.934]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",790,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5206,789.593]
[33,{"$raw":"00000000"},21118,"EN 262","OPER",1,"A",476,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","EN",5207,476.431]
[33,{"$raw":"00000000"},21118,"EN 262","OPER",1,"A",35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","EN",5208,34.913]
[4148,{"$raw":"00000000"},21122,"GC.3.5074",null,3,null,299,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",5209,299.352]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",1299,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5210,1298.856]
[4148,{"$raw":"00000000"},21122,"GC.3.5075",null,3,null,211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",5211,211.237]
[4149,{"$raw":"00000000"},21122,"GC.3.5076",null,3,null,823,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",5212,822.592]
[4149,{"$raw":"00000000"},21122,"GC.3.5077",null,3,null,152,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",5213,151.624]
[4151,{"$raw":"00000000"},21122,"GC.3.5078",null,3,null,253,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",5216,252.671]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5217,8.201]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",90,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5218,89.506]
[4161,{"$raw":"00000000"},21111,"GC.3.5079",null,3,"T",1128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5219,1127.978]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,306,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5220,305.531]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,371,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5221,370.983]
[4163,{"$raw":"00000000"},21111,"GC.3.5080",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5222,9.963]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,387,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5223,386.672]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,234,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5224,234.264]
[4165,{"$raw":"00000000"},21111,"GC.3.5081",null,3,"T",634,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5225,633.521]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5226,222.587]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5227,47.059]
[1664,{"$raw":"00000000"},21111,"GC.3.5082",null,3,"T",255,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5228,254.853]
[4206,{"$raw":"00000000"},21111,"GC.3.5083",null,3,"T",186,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5229,186.169]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5230,188.085]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5231,276.310]
[4211,{"$raw":"00000000"},21111,"GC.3.5084",null,3,"T",532,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5232,532.329]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,114,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5233,113.792]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5234,516.760]
[4314,{"$raw":"00000000"},21111,"GC.3.5085",null,3,"T",432,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5235,431.654]
[30,{"$raw":"00000000"},21111,"EM 532","OPER",2,"A",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","EM",5236,9.148]
[30,{"$raw":"00000000"},21111,"EM 532","OPER",2,"A",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","EM",5237,257.012]
[4324,{"$raw":"00000000"},21111,"GC.3.5086",null,3,null,178,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","OV",5238,178.080]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,59,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5239,58.591]
[4,{"$raw":"00000000"},21111,"CM 1099","OPER",2,null,134,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5240,134.246]
[4327,{"$raw":"00000000"},21111,"GC.3.5087",null,3,"T",573,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5241,572.815]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",326,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5242,326.094]
[4337,{"$raw":"00000000"},21106,"GC.3.5088",null,3,"T",236,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5243,235.502]
[4339,{"$raw":"00000000"},21106,"GC.3.5089",null,3,"T",826,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5244,826.479]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",892,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5245,891.996]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",1244,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5246,1243.751]
[4348,{"$raw":"00000000"},21106,"GC.3.5090",null,3,"T",588,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5247,587.702]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",522,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5248,521.680]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",175,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5249,175.436]
[4359,{"$raw":"00000000"},21117,"GC.3.5091",null,3,"T",683,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5250,682.781]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5251,145.877]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",1029,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5252,1029.365]
[4372,{"$raw":"00000000"},21117,"GC.3.5092",null,3,"T",77,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5253,76.981]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,265,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5254,264.966]
[4402,{"$raw":"00000000"},21106,"GC.3.5093",null,3,"T",278,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5255,278.123]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",56,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5256,55.806]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",1131,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5257,1130.919]
[4408,{"$raw":"00000000"},21106,"GC.3.5094",null,3,"T",382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5258,381.867]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5259,316.623]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",286,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5260,285.577]
[4411,{"$raw":"00000000"},21106,"GC.3.5095",null,3,"T",823,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5261,823.469]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5262,218.652]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",367,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5263,366.747]
[4413,{"$raw":"00000000"},21106,"GC.3.5096",null,3,"T",230,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5264,229.662]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",162,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5265,161.649]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5266,276.997]
[4415,{"$raw":"00000000"},21106,"GC.3.5097",null,3,"T",527,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5267,526.711]
[4415,{"$raw":"00000000"},21106,"GC.3.5098",null,3,"T",303,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5268,302.765]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",137,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5269,136.649]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",438,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5270,438.045]
[2251,{"$raw":"00000000"},21106,"GC.3.5099",null,3,"T",1165,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5271,1165.275]
[4425,{"$raw":"00000000"},21106,"GC.3.5100",null,3,null,39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",5272,39.165]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",268,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5273,268.081]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5274,162.536]
[4426,{"$raw":"00000000"},21106,"GC.3.5101",null,3,null,692,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",5275,692.084]
[4447,{"$raw":"00000000"},21106,"GC.3.5102",null,3,"T",321,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5276,320.971]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5277,100.471]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",302,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5278,302.330]
[4462,{"$raw":"00000000"},21106,"GC.3.5103",null,3,null,324,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",5279,323.872]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",358,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5280,358.394]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5281,223.522]
[4465,{"$raw":"00000000"},21106,"GC.3.5104",null,3,"T",578,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5282,578.495]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",145,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5283,145.148]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",501,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5284,501.076]
[4552,{"$raw":"00000000"},21102,"GC.3.5105",null,3,"T",1008,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5285,1007.576]
[4553,{"$raw":"00000000"},21102,"GC.3.5106",null,3,"T",297,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5286,297.383]
[13,{"$raw":"00000000"},21102,"CM 1126","OPER",2,null,729,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5287,729.393]
[13,{"$raw":"00000000"},21102,"CM 1126","OPER",2,null,1061,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5288,1061.379]
[4555,{"$raw":"00000000"},21102,"GC.3.5107",null,3,"T",386,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5289,385.941]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",363,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5290,363.072]
[4557,{"$raw":"00000000"},21102,"GC.3.5108",null,3,"T",809,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5291,809.300]
[13,{"$raw":"00000000"},21102,"CM 1126","OPER",2,null,1156,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5292,1155.903]
[4571,{"$raw":"00000000"},21102,"GC.3.5109",null,3,"T",350,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5293,349.818]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",316,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5294,315.585]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",1093,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5295,1092.590]
[4572,{"$raw":"00000000"},21118,"GC.3.5110",null,3,"T",243,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5296,242.981]
[33,{"$raw":"00000000"},21118,"EN 262","OPER",1,"A",747,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","EN",5297,746.995]
[33,{"$raw":"00000000"},21118,"EN 262","OPER",1,"A",593,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","EN",5298,592.878]
[4583,{"$raw":"00000000"},21118,"GC.3.5111",null,3,"T",545,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5299,545.338]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",1190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5300,1189.887]
[4604,{"$raw":"00000000"},21122,"GC.3.5112",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5301,84.793]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5302,118.709]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,101,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5303,100.516]
[4609,{"$raw":"00000000"},21122,"GC.3.5113",null,3,"T",695,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5304,695.153]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5305,110.149]
[4618,{"$raw":"00000000"},21122,"GC.3.5114",null,3,"T",270,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5306,269.875]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,414,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5307,413.830]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,45,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5308,44.916]
[4638,{"$raw":"00000000"},21122,"GC.3.5115",null,3,"T",901,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5309,900.874]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,231,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5310,230.627]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,390,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5311,389.963]
[4647,{"$raw":"00000000"},21122,"GC.3.5116",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5312,62.433]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5313,516.765]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",624,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5314,624.217]
[4653,{"$raw":"00000000"},21122,"GC.3.5117",null,3,"T",61,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5315,61.437]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,50,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5316,49.970]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,348,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5317,347.592]
[1422,{"$raw":"00000000"},21122,"GC.3.5118",null,3,"T",275,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5318,274.925]
[4655,{"$raw":"00000000"},21122,"GC.3.5119",null,3,"T",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5319,316.697]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",386,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5320,385.757]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5321,295.618]
[4661,{"$raw":"00000000"},21122,"GC.3.5120",null,3,"T",806,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5322,805.655]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",467,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5323,466.744]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",116,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5324,115.675]
[2917,{"$raw":"00000000"},21122,"GC.3.5121",null,3,"T",628,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5325,627.628]
[4677,{"$raw":"00000000"},21122,"GC.3.5122",null,3,"T",212,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5326,211.896]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",749,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5327,748.835]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",456,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5328,456.087]
[4682,{"$raw":"00000000"},21122,"GC.3.5123",null,3,"T",1635,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5329,1635.471]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",583,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5330,583.073]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",589,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5331,588.680]
[4689,{"$raw":"00000000"},21122,"GC.3.5124",null,3,"T",370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5332,369.798]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",1498,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5333,1497.677]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",554,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5334,554.003]
[4706,{"$raw":"00000000"},21122,"GC.3.5125",null,3,"T",132,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5335,131.979]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5336,22.196]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5337,152.651]
[4715,{"$raw":"00000000"},21118,"GC.3.5126",null,3,"T",301,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5338,300.521]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",390,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5339,389.560]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",407,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5340,407.288]
[4727,{"$raw":"00000000"},21122,"GC.3.5127",null,3,"T",173,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5341,173.472]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",506,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5342,506.091]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",529,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5343,529.074]
[4760,{"$raw":"00000000"},21102,"GC.3.5128",null,3,"T",1488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5344,1487.835]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",204,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5345,203.538]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5346,46.367]
[4764,{"$raw":"00000000"},21118,"GC.3.5129",null,3,"T",77,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5347,77.015]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",290,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5348,290.027]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5349,108.215]
[4774,{"$raw":"00000000"},21118,"GC.3.5130",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5350,30.189]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",291,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5351,291.179]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",525,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5352,524.585]
[4800,{"$raw":"00000000"},21102,"GC.3.5131",null,3,"T",289,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5353,288.551]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5354,447.624]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",1200,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5355,1199.569]
[4808,{"$raw":"00000000"},21102,"GC.3.5132",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5356,10.742]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",385,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5357,385.185]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",159,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5358,158.549]
[4819,{"$raw":"00000000"},21102,"GC.3.5133",null,3,"T",404,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5359,404.463]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",350,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5360,349.941]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",411,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","EM",5361,410.756]
[4821,{"$raw":"00000000"},21102,"GC.3.5134",null,3,"T",221,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5362,221.148]
[13,{"$raw":"00000000"},21102,"CM 1126","OPER",2,null,1427,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5363,1427.468]
[13,{"$raw":"00000000"},21102,"CM 1126","OPER",2,null,391,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5364,391.463]
[4856,{"$raw":"00000000"},21107,"GC.3.5135",null,3,"T",871,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",5365,871.301]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",405,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5366,404.575]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",456,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5367,455.576]
[4875,{"$raw":"00000000"},21107,"GC.3.5136",null,3,"T",2154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",5368,2153.827]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",469,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5369,469.404]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",939,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5370,939.299]
[4885,{"$raw":"00000000"},21107,"GC.3.5137",null,3,"T",893,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",5371,892.921]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",1675,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5372,1675.038]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",587,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5373,586.931]
[4904,{"$raw":"00000000"},21107,"GC.3.5138",null,3,"T",1243,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",5374,1242.815]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",186,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5375,185.896]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",876,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5376,875.754]
[4907,{"$raw":"00000000"},21107,"GC.3.5139",null,3,"T",302,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","RVF",5377,301.554]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",718,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",5378,718.499]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",397,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",5379,397.390]
[4938,{"$raw":"00000000"},21103,"GC.3.5140",null,3,"T",1190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",5380,1190.406]
[31,{"$raw":"00000000"},21103,"EM 541","OPER",2,"A",886,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",5381,886.390]
[31,{"$raw":"00000000"},21103,"EM 541","OPER",2,"A",155,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",5382,155.128]
[4939,{"$raw":"00000000"},21103,"GC.3.5141",null,3,"T",1174,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","RVF",5383,1173.716]
[31,{"$raw":"00000000"},21103,"EM 541","OPER",2,"A",611,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",5384,611.061]
[4964,{"$raw":"00000000"},21116,"GC.3.5142",null,3,"T",754,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",5385,753.914]
[35,{"$raw":"00000000"},21116,"ER 120","OPER",1,"A",1114,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","ER",5386,1114.324]
[4965,{"$raw":"00000000"},21116,"GC.3.5143",null,3,"T",860,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",5387,860.355]
[35,{"$raw":"00000000"},21116,"ER 120","OPER",1,"A",523,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","ER",5388,522.737]
[35,{"$raw":"00000000"},21116,"ER 120","OPER",1,"A",344,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","ER",5389,343.607]
[4978,{"$raw":"00000000"},21119,"GC.3.5144",null,3,"T",161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","RVF",5390,160.960]
[17,{"$raw":"00000000"},21119,"CM 1162","OPER",2,null,859,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","CM",5391,858.898]
[17,{"$raw":"00000000"},21119,"CM 1162","OPER",2,null,1469,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Santa Clara-a-Velha","ODEMIRA","Grândola-Cercal","CM",5392,1468.783]
[5002,{"$raw":"00000000"},21117,"GC.3.5145",null,3,"T",1881,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5393,1880.991]
[24,{"$raw":"00000000"},21117,"EM 393-1","OPER",2,"A",94,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","EM",5394,94.287]
[5017,{"$raw":"00000000"},21106,"GC.3.5146",null,3,"T",369,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5395,369.286]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",546,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5396,545.552]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",343,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5397,343.380]
[5032,{"$raw":"00000000"},21115,"GC.3.5147",null,3,"T",524,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",5398,524.018]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5399,7.289]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",964,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5400,964.358]
[5035,{"$raw":"00000000"},21115,"GC.3.5148",null,3,"T",1635,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",5401,1635.482]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",438,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5402,437.769]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",407,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5403,407.486]
[5042,{"$raw":"00000000"},21121,"GC.3.5149",null,3,"T",1055,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5404,1055.024]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,166,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5405,166.495]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,993,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5406,993.106]
[5045,{"$raw":"00000000"},21121,"GC.3.5150",null,3,"T",525,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5407,525.265]
[5045,{"$raw":"00000000"},21121,"GC.3.5151",null,3,"T",502,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5408,501.640]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5409,199.469]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",507,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5410,506.769]
[5063,{"$raw":"00000000"},21111,"GC.3.5152",null,3,"T",350,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5411,349.549]
[5070,{"$raw":"00000000"},21111,"GC.3.5153",null,3,"T",457,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5412,457.262]
[5070,{"$raw":"00000000"},21111,"GC.3.5154",null,3,"T",909,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5413,909.136]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",754,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5414,754.479]
[5072,{"$raw":"00000000"},21111,"GC.3.5155",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5415,15.545]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,368,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5416,367.908]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,369,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5417,368.779]
[5088,{"$raw":"00000000"},21106,"GC.3.5156",null,3,"T",1248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5418,1247.643]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",417,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5419,417.227]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",365,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5420,365.156]
[5128,{"$raw":"00000000"},21118,"GC.3.5157",null,3,"T",486,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5421,485.503]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",580,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5422,579.813]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",12,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5423,11.946]
[5144,{"$raw":"00000000"},21118,"GC.3.5158",null,3,"T",1883,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5424,1883.242]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5425,35.575]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",1250,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5426,1250.440]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,857,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5427,856.685]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",574,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5428,573.994]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",448,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5429,448.379]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,1892,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5430,1891.907]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",1606,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5431,1606.456]
[25,{"$raw":"00000000"},21121,"EM 501","OPER",2,"A",75,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5432,74.697]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",1236,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",5433,1235.656]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",483,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",5434,482.629]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",1057,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",5435,1056.867]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",353,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5436,353.477]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",89,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5437,88.826]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",229,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5438,228.521]
[940,{"$raw":"00000000"},21121,"GC.3.5159",null,3,null,478,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",5439,477.578]
[940,{"$raw":"00000000"},21121,"GC.3.5160",null,3,null,3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",5440,3.052]
[16,{"$raw":"00000000"},21121,"CM 1159","OPER",2,null,1018,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5441,1017.543]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5442,0.151]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",618,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5443,617.701]
[2316,{"$raw":"00000000"},21106,"GC.3.5161",null,3,null,392,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",5444,392.268]
[2318,{"$raw":"00000000"},21106,"GC.3.5162",null,3,null,338,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","OV",5445,338.033]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5446,0.080]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5447,0.080]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5448,0.080]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",191,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5449,190.892]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",230,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5450,230.078]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","EM",5451,154.431]
[4076,{"$raw":"00000000"},21120,"GC.3.5163",null,3,"T",3704,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",5452,3704.301]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",815,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5453,814.873]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5454,488.377]
[3920,{"$raw":"00000000"},21120,"GC.3.5164",null,3,null,1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","OV",5455,1.097]
[39,{"$raw":"00000000"},21120,"ER 393","OPER",1,"A",440,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5456,440.433]
[35,{"$raw":"00000000"},21116,"ER 120","OPER",1,"A",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","ER",5457,219.436]
[9,{"$raw":"00000000"},21117,"CM 1123","OPER",2,null,364,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5458,364.304]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5459,78.957]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",396,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5460,395.810]
[8,{"$raw":"00000000"},21117,"CM 1122-1","OPER",2,null,2156,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5461,2155.608]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,45,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5462,44.935]
[3901,{"$raw":"00000000"},21117,"GC.3.5166",null,3,null,721,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","OV",5463,720.589]
[8,{"$raw":"00000000"},21117,"CM 1122-1","OPER",2,null,544,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5464,544.013]
[2135,{"$raw":"00000000"},21117,"GC.3.5167",null,3,"T",1529,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5465,1528.981]
[9,{"$raw":"00000000"},21117,"CM 1123","OPER",2,null,106,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5466,105.669]
[9,{"$raw":"00000000"},21117,"CM 1123","OPER",2,null,284,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5467,284.484]
[8,{"$raw":"00000000"},21117,"CM 1122-1","OPER",2,null,604,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5468,603.680]
[1665,{"$raw":"00000000"},21111,"GC.3.5168",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5469,0.628]
[1665,{"$raw":"00000000"},21111,"GC.3.5169",null,3,"T",230,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5470,229.783]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,226,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5471,226.297]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5472,487.676]
[21,{"$raw":"00000000"},21121,"EM 120-2","OPER",2,"A",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5473,20.682]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",755,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",5474,754.567]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",1116,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5475,1115.923]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",683,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5476,683.290]
[3964,{"$raw":"00000000"},21120,"GC.3.5170",null,3,"T",2696,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",5477,2695.981]
[3092,{"$raw":"00000000"},21118,"GC.3.5171",null,3,"T",690,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5478,689.905]
[3092,{"$raw":"00000000"},21118,"GC.3.5172",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5479,3.652]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",447,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5480,447.119]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",1015,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5481,1015.341]
[24,{"$raw":"00000000"},21117,"EM 393-1","OPER",2,"A",964,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","EM",5482,964.097]
[18,{"$raw":"00000000"},21103,"CM 1162-2","OPER",2,null,900,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","CM",5483,900.435]
[22,{"$raw":"00000000"},21118,"EM 123-1","OPER",2,"A",959,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Colos","ODEMIRA","Grândola-Cercal","EM",5484,958.781]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",414,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5485,413.959]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",99,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5486,99.392]
[4084,{"$raw":"00000000"},21115,"GC.3.5174",null,3,"T",1347,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",5487,1347.296]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",1117,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5488,1116.524]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",1018,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5489,1018.163]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",142,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5491,141.791]
[2844,{"$raw":"00000000"},21122,"GC.3.5176",null,3,"T",586,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5492,585.791]
[2844,{"$raw":"00000000"},21122,"GC.3.5177",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5493,0.562]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,1000,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5494,1000.011]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,632,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5495,632.496]
[873,{"$raw":"00000000"},21120,"GC.3.5178",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",5496,0.821]
[873,{"$raw":"00000000"},21120,"GC.3.5179",null,3,"T",1634,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","RVF",5497,1633.800]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",1820,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5498,1819.987]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",1527,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5499,1526.770]
[26,{"$raw":"00000000"},21121,"EM 502-1","OPER",2,"A",480,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5500,480.035]
[4101,{"$raw":"00000000"},21121,"GC.3.5180",null,3,"T",2675,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5501,2675.404]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",771,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",5502,770.512]
[26,{"$raw":"00000000"},21121,"EM 502-1","OPER",2,"A",1327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5503,1327.152]
[2833,{"$raw":"00000000"},21122,"GC.3.5181",null,3,"T",59,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5504,59.094]
[2833,{"$raw":"00000000"},21122,"GC.3.5182",null,3,"T",2765,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5505,2764.874]
[2846,{"$raw":"00000000"},21122,"GC.3.5183",null,3,"T",127,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5507,127.279]
[2846,{"$raw":"00000000"},21122,"GC.3.5184",null,3,"T",561,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5508,560.580]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",228,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5512,228.072]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",223,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5515,223.171]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5516,81.664]
[2824,{"$raw":"00000000"},21122,"GC.3.5185",null,3,null,153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",5517,153.103]
[2824,{"$raw":"00000000"},21122,"GC.3.5186",null,3,null,327,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","OV",5518,326.983]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",1594,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5521,1594.307]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",5522,194.287]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",821,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","ER",5523,821.162]
[13,{"$raw":"00000000"},21102,"CM 1126","OPER",2,null,841,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5524,840.847]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5525,57.676]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",212,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5526,211.911]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5527,271.355]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",720,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Relíquias","ODEMIRA","Grândola-Cercal","EN",5528,719.738]
[3579,{"$raw":"00000000"},21102,"GC.3.5187",null,3,"T",1434,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5529,1434.012]
[11,{"$raw":"00000000"},21117,"CM 1125","OPER",2,null,380,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5530,380.479]
[2177,{"$raw":"00000000"},21117,"GC.3.5188",null,3,"T",998,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5531,998.259]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",563,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5532,562.736]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",328,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5533,327.820]
[11,{"$raw":"00000000"},21117,"CM 1125","OPER",2,null,55,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5534,54.745]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,908,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5535,907.996]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,1276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5536,1275.913]
[4225,{"$raw":"00000000"},21111,"GC.3.5189",null,3,"T",397,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5537,397.157]
[1627,{"$raw":"00000000"},21111,"GC.3.5190",null,3,"T",680,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5538,680.434]
[1726,{"$raw":"00000000"},21111,"GC.3.5191",null,3,"T",570,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5539,570.071]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",1207,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5540,1206.692]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5541,0.482]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5542,0.417]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5543,0.482]
[1722,{"$raw":"00000000"},21111,"GC.3.5192",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5544,2.265]
[1722,{"$raw":"00000000"},21111,"GC.3.5193",null,3,"T",353,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5545,352.901]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",242,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5546,241.521]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",582,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5547,581.683]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,159,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5548,158.805]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5549,167.179]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5550,23.417]
[3677,{"$raw":"00000000"},21102,"GC.3.5194",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5551,0.212]
[3677,{"$raw":"00000000"},21102,"GC.3.5195",null,3,"T",517,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5552,517.056]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5553,44.132]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,428,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5554,428.302]
[1169,{"$raw":"00000000"},21115,"GC.3.5196",null,3,"T",1014,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","RVF",5555,1013.525]
[36,{"$raw":"00000000"},21115,"ER 266","OPER",1,"A",1954,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5556,1953.614]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",644,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5557,644.254]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",577,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Luzianes-Gare","ODEMIRA","Grândola-Cercal","ER",5558,577.036]
[3900,{"$raw":"00000000"},21121,"GC.3.5197",null,3,null,228,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","OV",5559,227.730]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,750,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5560,750.014]
[7,{"$raw":"00000000"},21121,"CM 1122","OPER",2,null,289,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5561,288.761]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,57,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5562,56.658]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5563,210.821]
[1176,{"$raw":"00000000"},21117,"GC.3.5198",null,3,"T",645,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5564,645.104]
[1176,{"$raw":"00000000"},21117,"GC.3.5199",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","RVF",5565,15.440]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5566,15.440]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,386,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5567,385.787]
[2727,{"$raw":"00000000"},21118,"GC.3.5200",null,3,"T",408,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5568,407.962]
[6,{"$raw":"00000000"},21118,"CM 1102","OPER",2,null,397,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Colos","ODEMIRA","Grândola-Cercal","CM",5569,397.119]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",785,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5570,784.528]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",1443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5571,1443.247]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",5572,381.613]
[2269,{"$raw":"00000000"},21106,"GC.3.5201",null,3,"T",276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5573,275.707]
[2269,{"$raw":"00000000"},21106,"GC.3.5202",null,3,"T",311,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5574,310.748]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",1056,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5575,1056.206]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",235,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5576,234.768]
[27,{"$raw":"00000000"},21121,"EM 502-2","OPER",2,"A",330,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5577,329.573]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",1531,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",5578,1531.148]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",99,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Sabóia","ODEMIRA","Grândola-Cercal","ER",5579,99.051]
[31,{"$raw":"00000000"},21103,"EM 541","OPER",2,"A",245,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Sabóia","ODEMIRA","Grândola-Cercal","EM",5580,244.824]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,630,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5581,629.901]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",273,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5582,273.197]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5583,248.903]
[3659,{"$raw":"00000000"},21118,"GC.3.5203",null,3,"T",1805,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Colos","ODEMIRA","Grândola-Cercal","RVF",5584,1805.334]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5585,20.230]
[37,{"$raw":"00000000"},21118,"ER 389","OPER",1,"A",70,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Colos","ODEMIRA","Grândola-Cercal","ER",5586,69.679]
[2908,{"$raw":"00000000"},21122,"GC.3.5204",null,3,"T",820,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5587,819.757]
[2908,{"$raw":"00000000"},21122,"GC.3.5205",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","RVF",5588,2.995]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,932,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5589,931.917]
[3,{"$raw":"00000000"},21122,"CM 1075-1","OPER",2,null,97,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","CM",5590,96.881]
[39,{"$raw":"00000000"},21120,"ER 393","OPER",1,"A",1224,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5591,1223.783]
[39,{"$raw":"00000000"},21120,"ER 393","OPER",1,"A",1366,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5592,1366.417]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",524,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5593,523.509]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5594,304.109]
[5,{"$raw":"00000000"},21106,"CM 1100","OPER",2,null,470,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Luís","ODEMIRA","Grândola-Cercal","CM",5595,469.780]
[921,{"$raw":"00000000"},21121,"GC.3.5206",null,3,"T",1486,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5596,1486.293]
[921,{"$raw":"00000000"},21121,"GC.3.5207",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5597,0.174]
[16,{"$raw":"00000000"},21121,"CM 1159","OPER",2,null,171,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5598,170.768]
[16,{"$raw":"00000000"},21121,"CM 1159","OPER",2,null,669,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5599,669.249]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,876,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5600,876.265]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,293,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5601,293.311]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",722,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5602,722.373]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",426,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","ER",5603,426.229]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,158,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5604,158.161]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5605,88.342]
[16,{"$raw":"00000000"},21121,"CM 1159","OPER",2,null,1082,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5606,1081.634]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",51,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5607,51.220]
[16,{"$raw":"00000000"},21121,"CM 1159","OPER",2,null,267,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5608,267.050]
[17,{"$raw":"00000000"},21107,"CM 1162","OPER",2,null,1458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","CM",5609,1458.058]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",83,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5610,82.886]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",520,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Martinho das Amoreiras","ODEMIRA","Grândola-Cercal","EM",5611,519.867]
[12,{"$raw":"00000000"},21117,"CM 1125-1","OPER",2,null,1394,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5612,1393.685]
[11,{"$raw":"00000000"},21117,"CM 1125","OPER",2,null,1722,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5613,1721.625]
[11,{"$raw":"00000000"},21117,"CM 1125","OPER",2,null,684,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Longueira/Almograve","ODEMIRA","Grândola-Cercal","CM",5614,683.550]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",203,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5615,202.860]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",1126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5616,1126.326]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,1640,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5617,1640.409]
[1464,{"$raw":"00000000"},21121,"GC.3.5208",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5618,28.164]
[1464,{"$raw":"00000000"},21121,"GC.3.5209",null,3,"T",47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5619,47.432]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",1119,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",5620,1118.936]
[1464,{"$raw":"00000000"},21121,"GC.3.5210",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5621,34.124]
[1464,{"$raw":"00000000"},21121,"GC.3.5211",null,3,"T",46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","RVF",5622,46.111]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",573,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",5623,572.878]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Teotónio","ODEMIRA","Grândola-Cercal","ER",5624,40.510]
[2299,{"$raw":"00000000"},21106,"GC.3.5212",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5625,1.032]
[2299,{"$raw":"00000000"},21106,"GC.3.5213",null,3,"T",516,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"São Luís","ODEMIRA","Grândola-Cercal","RVF",5626,516.363]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",632,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5627,631.951]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Luís","ODEMIRA","Grândola-Cercal","ER",5628,442.547]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",571,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5629,570.837]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EN",5630,17.211]
[29,{"$raw":"00000000"},21122,"EM 518","OPER",2,"A",680,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vale de Santiago","ODEMIRA","Grândola-Cercal","EM",5631,680.397]
[3685,{"$raw":"00000000"},21102,"GC.3.5214",null,3,"T",735,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","RVF",5632,735.264]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,232,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5633,232.054]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Relíquias","ODEMIRA","Grândola-Cercal","CM",5634,16.750]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,665,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5635,664.654]
[34,{"$raw":"00000000"},21120,"EN 263","OPER",1,"A",3804,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","EN",5636,3804.310]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",80,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5637,80.437]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"São Salvador e Santa Maria","ODEMIRA","Grândola-Cercal","ER",5638,106.763]
[5078,{"$raw":"00000000"},21111,"GC.3.5215",null,3,"T",628,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5639,627.922]
[1618,{"$raw":"00000000"},21111,"GC.3.5216",null,3,"T",352,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5640,351.843]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",386,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5641,385.611]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5642,0.384]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5643,2.376]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5644,0.327]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5645,0.384]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",464,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5646,464.014]
[1731,{"$raw":"00000000"},21111,"GC.3.5217",null,3,"T",294,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5647,294.257]
[1,{"$raw":"00000000"},21111,"CM 1072","OPER",2,null,87,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","CM",5648,86.799]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",357,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5649,357.453]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",353,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5650,352.538]
[16,{"$raw":"00000000"},21121,"CM 1159","OPER",2,null,370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","CM",5651,369.682]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",1169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5652,1169.393]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",382,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"São Teotónio","ODEMIRA","Grândola-Cercal","EM",5653,382.386]
[1970,{"$raw":"00000000"},21111,"GC.3.5218",null,3,"T",1568,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5654,1568.394]
[1970,{"$raw":"00000000"},21111,"GC.3.5219",null,3,"T",232,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5655,232.054]
[30,{"$raw":"00000000"},21111,"EM 532","OPER",2,"A",836,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","EM",5656,835.956]
[30,{"$raw":"00000000"},21111,"EM 532","OPER",2,"A",319,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","EM",5657,318.620]
[1588,{"$raw":"00000000"},21111,"GC.3.5220",null,3,"T",215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5658,214.716]
[1588,{"$raw":"00000000"},21111,"GC.3.5221",null,3,"T",560,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","RVF",5659,560.435]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",415,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5660,414.977]
[30,{"$raw":"00000000"},21111,"EM 532","OPER",2,"A",901,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","EM",5661,901.001]
[38,{"$raw":"00000000"},21111,"ER 390","OPER",1,"A",164,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,"Vila Nova de Milfontes","ODEMIRA","Grândola-Cercal","ER",5662,164.236]
[80,{"$raw":"00000000"},21115,"GC.3.36",null,3,"T",488,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5663,488.310]
[80,{"$raw":"00000000"},21120,"GC.3.36",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5664,6.778]
[84,{"$raw":"00000000"},21103,"GC.3.40",null,3,"T",1923,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5665,1923.373]
[84,{"$raw":"00000000"},21120,"GC.3.40",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5666,0.108]
[87,{"$raw":"00000000"},21103,"GC.3.43",null,3,"T",138,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5667,138.289]
[88,{"$raw":"00000000"},21116,"GC.3.44",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5668,29.467]
[88,{"$raw":"00000000"},21120,"GC.3.44",null,3,"T",798,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5669,798.441]
[125,{"$raw":"00000000"},21103,"GC.3.81",null,3,"T",90,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5670,89.976]
[125,{"$raw":"00000000"},21121,"GC.3.81",null,3,"T",99,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5671,98.589]
[133,{"$raw":"00000000"},21119,"GC.3.88",null,3,"T",932,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5672,931.755]
[133,{"$raw":"00000000"},21107,"GC.3.88",null,3,"T",2567,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5673,2567.438]
[135,{"$raw":"00000000"},21119,"GC.3.89",null,3,"T",1256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5674,1255.608]
[135,{"$raw":"00000000"},21107,"GC.3.89",null,3,"T",1415,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5675,1415.099]
[375,{"$raw":"00000000"},0,"GC.3.297",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5676,17.176]
[390,{"$raw":"00000000"},21103,"GC.3.312",null,3,"T",215,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5677,215.184]
[390,{"$raw":"00000000"},21121,"GC.3.312",null,3,"T",1714,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5678,1714.252]
[391,{"$raw":"00000000"},21103,"GC.3.313",null,3,"T",165,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5679,164.658]
[391,{"$raw":"00000000"},21121,"GC.3.313",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5680,39.236]
[393,{"$raw":"00000000"},21121,"GC.3.315",null,3,"T",2748,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5681,2747.556]
[393,{"$raw":"00000000"},0,"GC.3.315",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5682,2.302]
[396,{"$raw":"00000000"},21121,"GC.3.317",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5683,23.606]
[396,{"$raw":"00000000"},0,"GC.3.317",null,3,"T",56,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5684,56.473]
[402,{"$raw":"00000000"},21103,"GC.3.322",null,3,"T",1219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5685,1218.651]
[402,{"$raw":"00000000"},21121,"GC.3.322",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5686,2.260]
[423,{"$raw":"00000000"},21103,"GC.3.341",null,3,"T",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5687,256.556]
[423,{"$raw":"00000000"},21121,"GC.3.341",null,3,"T",1199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5688,1198.972]
[440,{"$raw":"00000000"},21103,"GC.3.353",null,3,"T",369,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5689,368.922]
[440,{"$raw":"00000000"},0,"GC.3.353",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5690,3.625]
[441,{"$raw":"00000000"},21103,"GC.3.354",null,3,"T",535,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5691,534.903]
[441,{"$raw":"00000000"},0,"GC.3.354",null,3,"T",22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5692,21.928]
[472,{"$raw":"00000000"},21103,"GC.3.379",null,3,"T",412,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5693,412.138]
[472,{"$raw":"00000000"},0,"GC.3.379",null,3,"T",142,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5694,142.329]
[473,{"$raw":"00000000"},21103,"GC.3.380",null,3,"T",966,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5695,965.694]
[473,{"$raw":"00000000"},0,"GC.3.380",null,3,"T",8,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,null,null,"Grândola-Cercal","RVF",5696,8.498]
[475,{"$raw":"00000000"},21103,"GC.3.382",null,3,"T",311,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5697,310.518]
[478,{"$raw":"00000000"},21103,"GC.3.385",null,3,"T",203,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5698,202.910]
[529,{"$raw":"00000000"},21103,"GC.3.418",null,3,"T",2411,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5699,2410.654]
[529,{"$raw":"00000000"},21121,"GC.3.418",null,3,"T",562,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5700,562.296]
[609,{"$raw":"00000000"},21115,"GC.3.483",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5701,10.353]
[609,{"$raw":"00000000"},21120,"GC.3.483",null,3,"T",2717,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5702,2717.119]
[611,{"$raw":"00000000"},21115,"GC.3.485",null,3,"T",447,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5703,447.057]
[611,{"$raw":"00000000"},21120,"GC.3.485",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5704,10.278]
[643,{"$raw":"00000000"},21116,"GC.3.509",null,3,"T",931,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5705,930.953]
[643,{"$raw":"00000000"},21121,"GC.3.509",null,3,"T",59,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5706,59.203]
[645,{"$raw":"00000000"},21116,"GC.3.511",null,3,"T",905,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5707,904.655]
[645,{"$raw":"00000000"},21121,"GC.3.511",null,3,"T",178,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5708,177.636]
[647,{"$raw":"00000000"},21116,"GC.3.513",null,3,"T",1033,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5709,1032.821]
[647,{"$raw":"00000000"},21121,"GC.3.513",null,3,"T",391,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5710,391.050]
[651,{"$raw":"00000000"},21116,"GC.3.517",null,3,"T",1041,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5711,1040.758]
[651,{"$raw":"00000000"},21121,"GC.3.517",null,3,"T",346,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5712,346.412]
[652,{"$raw":"00000000"},21116,"GC.3.518",null,3,"T",1166,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5713,1166.270]
[652,{"$raw":"00000000"},21121,"GC.3.518",null,3,"T",27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5714,26.797]
[658,{"$raw":"00000000"},21116,"GC.3.523",null,3,"T",147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5715,146.661]
[658,{"$raw":"00000000"},21120,"GC.3.523",null,3,"T",1088,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5716,1087.624]
[660,{"$raw":"00000000"},21103,"GC.3.525",null,3,"T",1143,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5717,1142.811]
[660,{"$raw":"00000000"},21120,"GC.3.525",null,3,"T",361,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5718,360.880]
[667,{"$raw":"00000000"},21116,"GC.3.532",null,3,"T",162,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5719,162.356]
[667,{"$raw":"00000000"},21121,"GC.3.532",null,3,"T",1716,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5720,1716.242]
[677,{"$raw":"00000000"},21116,"GC.3.540",null,3,"T",340,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5721,340.396]
[677,{"$raw":"00000000"},21120,"GC.3.540",null,3,"T",925,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5722,925.043]
[690,{"$raw":"00000000"},21115,"GC.3.552",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5723,14.788]
[690,{"$raw":"00000000"},21120,"GC.3.552",null,3,"T",1328,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5724,1328.299]
[694,{"$raw":"00000000"},21103,"GC.3.556",null,3,"T",500,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5725,500.251]
[694,{"$raw":"00000000"},21120,"GC.3.556",null,3,"T",2158,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5726,2157.652]
[695,{"$raw":"00000000"},21116,"GC.3.557",null,3,"T",613,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5727,612.661]
[695,{"$raw":"00000000"},21120,"GC.3.557",null,3,"T",145,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5728,144.784]
[700,{"$raw":"00000000"},21103,"GC.3.562",null,3,"T",133,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5729,132.564]
[700,{"$raw":"00000000"},21115,"GC.3.562",null,3,"T",1927,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5730,1926.627]
[702,{"$raw":"00000000"},21103,"GC.3.564",null,3,"T",1210,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5731,1209.788]
[702,{"$raw":"00000000"},21115,"GC.3.564",null,3,"T",434,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5732,433.532]
[709,{"$raw":"00000000"},21116,"GC.3.571",null,3,"T",4139,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5733,4138.717]
[725,{"$raw":"00000000"},21103,"GC.3.586",null,3,"T",731,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5734,730.515]
[725,{"$raw":"00000000"},21115,"GC.3.586",null,3,"T",1883,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5735,1882.680]
[774,{"$raw":"00000000"},21116,"GC.3.629",null,3,"T",2217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5736,2216.934]
[774,{"$raw":"00000000"},21121,"GC.3.629",null,3,"T",806,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5737,805.907]
[780,{"$raw":"00000000"},21103,"GC.3.633",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5738,5.504]
[793,{"$raw":"00000000"},21115,"GC.3.641",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5739,0.343]
[793,{"$raw":"00000000"},21102,"GC.3.641",null,3,"T",1773,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5740,1772.727]
[796,{"$raw":"00000000"},21107,"GC.3.644",null,3,"T",360,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5741,359.862]
[796,{"$raw":"00000000"},21102,"GC.3.644",null,3,"T",260,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5742,260.242]
[798,{"$raw":"00000000"},21115,"GC.3.646",null,3,"T",349,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5743,349.453]
[799,{"$raw":"00000000"},21107,"GC.3.647",null,3,"T",1530,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5744,1529.577]
[799,{"$raw":"00000000"},21102,"GC.3.647",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5745,9.508]
[804,{"$raw":"00000000"},21115,"GC.3.651",null,3,"T",1505,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5746,1505.146]
[804,{"$raw":"00000000"},21107,"GC.3.651",null,3,"T",1123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5747,1123.463]
[822,{"$raw":"00000000"},21119,"GC.3.666",null,3,"T",476,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5748,475.777]
[822,{"$raw":"00000000"},21115,"GC.3.666",null,3,"T",1196,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5749,1196.432]
[826,{"$raw":"00000000"},21107,"GC.3.670",null,3,"T",603,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5750,602.962]
[828,{"$raw":"00000000"},21107,"GC.3.672",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5751,4.366]
[831,{"$raw":"00000000"},21119,"GC.3.675",null,3,"T",116,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5752,115.862]
[831,{"$raw":"00000000"},21107,"GC.3.675",null,3,"T",876,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5753,875.894]
[840,{"$raw":"00000000"},21119,"GC.3.684",null,3,"T",268,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5754,268.032]
[840,{"$raw":"00000000"},21107,"GC.3.684",null,3,"T",2696,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5755,2696.095]
[857,{"$raw":"00000000"},21119,"GC.3.699",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5756,7.481]
[857,{"$raw":"00000000"},21107,"GC.3.699",null,3,"T",1595,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5757,1595.226]
[877,{"$raw":"00000000"},21121,"GC.3.712",null,3,"T",520,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5758,520.188]
[877,{"$raw":"00000000"},21117,"GC.3.712",null,3,"T",880,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5759,879.830]
[878,{"$raw":"00000000"},21121,"GC.3.713",null,3,"T",458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5760,458.143]
[878,{"$raw":"00000000"},21117,"GC.3.713",null,3,"T",934,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5761,933.596]
[909,{"$raw":"00000000"},21121,"GC.3.733",null,3,"T",615,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5762,615.319]
[909,{"$raw":"00000000"},21117,"GC.3.733",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5763,8.102]
[925,{"$raw":"00000000"},21116,"GC.3.741",null,3,"T",192,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5764,191.572]
[925,{"$raw":"00000000"},21121,"GC.3.741",null,3,"T",1428,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5765,1427.789]
[1012,{"$raw":"00000000"},21121,"GC.3.810",null,3,"T",163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5766,162.819]
[1012,{"$raw":"00000000"},21117,"GC.3.810",null,3,"T",1491,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5767,1490.641]
[1013,{"$raw":"00000000"},21121,"GC.3.811",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5768,9.574]
[1013,{"$raw":"00000000"},21117,"GC.3.811",null,3,"T",140,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5769,139.764]
[1017,{"$raw":"00000000"},21117,"GC.3.814",null,3,"T",641,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5770,641.160]
[1019,{"$raw":"00000000"},21121,"GC.3.815",null,3,"T",72,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5771,71.697]
[1019,{"$raw":"00000000"},21117,"GC.3.815",null,3,"T",851,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5772,850.897]
[1024,{"$raw":"00000000"},21121,"GC.3.816",null,3,"T",686,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5773,685.769]
[1024,{"$raw":"00000000"},21117,"GC.3.816",null,3,"T",968,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5774,968.377]
[1060,{"$raw":"00000000"},21116,"GC.3.842",null,3,"T",319,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5775,318.594]
[1060,{"$raw":"00000000"},21121,"GC.3.842",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5776,1.854]
[1061,{"$raw":"00000000"},21116,"GC.3.843",null,3,"T",1160,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5777,1160.215]
[1061,{"$raw":"00000000"},21121,"GC.3.843",null,3,"T",242,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5778,242.326]
[1109,{"$raw":"00000000"},21119,"GC.3.886",null,3,"T",1195,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5779,1194.784]
[1109,{"$raw":"00000000"},0,"GC.3.886",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5780,0.076]
[1156,{"$raw":"00000000"},21107,"GC.3.927",null,3,"T",1458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5781,1457.690]
[1156,{"$raw":"00000000"},21102,"GC.3.927",null,3,"T",598,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5782,597.860]
[1157,{"$raw":"00000000"},21107,"GC.3.928",null,3,"T",2363,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5783,2363.499]
[1157,{"$raw":"00000000"},21102,"GC.3.928",null,3,"T",123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5784,122.950]
[1158,{"$raw":"00000000"},21107,"GC.3.929",null,3,"T",441,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5785,440.879]
[1158,{"$raw":"00000000"},21102,"GC.3.929",null,3,"T",472,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5786,471.550]
[1173,{"$raw":"00000000"},21121,"GC.3.940",null,3,"T",32,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5787,31.729]
[1173,{"$raw":"00000000"},21117,"GC.3.940",null,3,"T",385,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5788,385.266]
[1179,{"$raw":"00000000"},21115,"GC.3.943",null,3,"T",369,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5789,369.358]
[1179,{"$raw":"00000000"},21102,"GC.3.943",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5790,1.765]
[1181,{"$raw":"00000000"},21115,"GC.3.945",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5791,33.518]
[1192,{"$raw":"00000000"},21115,"GC.3.950",null,3,"T",313,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5792,312.601]
[1192,{"$raw":"00000000"},21107,"GC.3.950",null,3,"T",753,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5793,753.207]
[1198,{"$raw":"00000000"},21122,"GC.3.955",null,3,"T",942,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5794,941.556]
[1198,{"$raw":"00000000"},0,"GC.3.955",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5795,0.952]
[1203,{"$raw":"00000000"},21122,"GC.3.958",null,3,"T",1644,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5796,1644.423]
[1203,{"$raw":"00000000"},0,"GC.3.958",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5797,1.137]
[1206,{"$raw":"00000000"},21122,"GC.3.961",null,3,"T",741,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5798,740.827]
[1206,{"$raw":"00000000"},0,"GC.3.961",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5799,0.343]
[1214,{"$raw":"00000000"},0,"GC.3.968",null,3,"T",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5800,20.994]
[1216,{"$raw":"00000000"},21107,"GC.3.970",null,3,"T",502,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5801,502.103]
[1216,{"$raw":"00000000"},0,"GC.3.970",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5802,4.811]
[1219,{"$raw":"00000000"},21122,"GC.3.973",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5803,7.867]
[1219,{"$raw":"00000000"},0,"GC.3.973",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5804,0.071]
[1226,{"$raw":"00000000"},21122,"GC.3.979",null,3,"T",884,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5805,883.835]
[1226,{"$raw":"00000000"},0,"GC.3.979",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5806,7.393]
[1227,{"$raw":"00000000"},21122,"GC.3.980",null,3,"T",292,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5807,291.606]
[1227,{"$raw":"00000000"},0,"GC.3.980",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5808,0.058]
[1229,{"$raw":"00000000"},21122,"GC.3.981",null,3,"T",742,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5809,741.580]
[1229,{"$raw":"00000000"},0,"GC.3.981",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5810,0.301]
[1230,{"$raw":"00000000"},21122,"GC.3.982",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5811,15.120]
[1230,{"$raw":"00000000"},0,"GC.3.982",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5812,7.456]
[1236,{"$raw":"00000000"},21122,"GC.3.987",null,3,"T",116,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5813,115.935]
[1249,{"$raw":"00000000"},21107,"GC.3.997",null,3,"T",924,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5814,923.525]
[1249,{"$raw":"00000000"},0,"GC.3.997",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5815,4.964]
[1260,{"$raw":"00000000"},21107,"GC.3.1007",null,3,"T",740,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5816,739.871]
[1260,{"$raw":"00000000"},0,"GC.3.1007",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5817,3.681]
[1264,{"$raw":"00000000"},21107,"GC.3.1011",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5818,0.988]
[1264,{"$raw":"00000000"},0,"GC.3.1011",null,3,"T",36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5819,35.983]
[1268,{"$raw":"00000000"},21107,"GC.3.1014",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5820,12.534]
[1268,{"$raw":"00000000"},0,"GC.3.1014",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5821,10.680]
[1271,{"$raw":"00000000"},21107,"GC.3.1017",null,3,"T",331,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5822,330.739]
[1271,{"$raw":"00000000"},0,"GC.3.1017",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5823,0.153]
[1275,{"$raw":"00000000"},21107,"GC.3.1021",null,3,"T",1736,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5824,1736.190]
[1275,{"$raw":"00000000"},0,"GC.3.1021",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5825,3.384]
[1276,{"$raw":"00000000"},21107,"GC.3.1022",null,3,"T",103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5826,102.713]
[1277,{"$raw":"00000000"},21107,"GC.3.1023",null,3,"T",108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5827,108.018]
[1278,{"$raw":"00000000"},21107,"GC.3.1024",null,3,"T",102,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5828,101.983]
[1279,{"$raw":"00000000"},21107,"GC.3.1025",null,3,"T",97,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5829,96.713]
[1279,{"$raw":"00000000"},0,"GC.3.1025",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5830,2.652]
[1280,{"$raw":"00000000"},21107,"GC.3.1026",null,3,"T",27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5831,27.292]
[1280,{"$raw":"00000000"},0,"GC.3.1026",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5832,0.792]
[1281,{"$raw":"00000000"},21107,"GC.3.1027",null,3,"T",56,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5833,55.951]
[1281,{"$raw":"00000000"},0,"GC.3.1027",null,3,"T",26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5834,25.626]
[1282,{"$raw":"00000000"},21107,"GC.3.1028",null,3,"T",386,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5835,386.429]
[1282,{"$raw":"00000000"},0,"GC.3.1028",null,3,"T",33,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5836,32.817]
[1290,{"$raw":"00000000"},21107,"GC.3.1036",null,3,"T",48,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5837,48.454]
[1290,{"$raw":"00000000"},0,"GC.3.1036",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5838,0.192]
[1293,{"$raw":"00000000"},21107,"GC.3.1039",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5839,6.341]
[1295,{"$raw":"00000000"},21107,"GC.3.1041",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5840,85.085]
[1320,{"$raw":"00000000"},21107,"GC.3.1062",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5841,6.609]
[1320,{"$raw":"00000000"},0,"GC.3.1062",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5842,0.347]
[1327,{"$raw":"00000000"},21119,"GC.3.1068",null,3,"T",18,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5843,17.935]
[1327,{"$raw":"00000000"},0,"GC.3.1068",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5844,2.534]
[1329,{"$raw":"00000000"},21119,"GC.3.1070",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5845,4.695]
[1329,{"$raw":"00000000"},0,"GC.3.1070",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5846,0.098]
[1330,{"$raw":"00000000"},21119,"GC.3.1071",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5847,12.544]
[1330,{"$raw":"00000000"},0,"GC.3.1071",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5848,0.263]
[1331,{"$raw":"00000000"},21119,"GC.3.1072",null,3,"T",103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5849,102.916]
[1331,{"$raw":"00000000"},0,"GC.3.1072",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5850,0.093]
[1332,{"$raw":"00000000"},21119,"GC.3.1073",null,3,"T",194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5851,193.501]
[1332,{"$raw":"00000000"},0,"GC.3.1073",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5852,0.069]
[1342,{"$raw":"00000000"},21119,"GC.3.1079",null,3,"T",126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5853,126.374]
[1342,{"$raw":"00000000"},0,"GC.3.1079",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5854,0.757]
[1343,{"$raw":"00000000"},21119,"GC.3.1080",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5855,15.564]
[1343,{"$raw":"00000000"},0,"GC.3.1080",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5856,0.098]
[1350,{"$raw":"00000000"},21111,"GC.3.1087",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5857,79.114]
[1350,{"$raw":"00000000"},0,"GC.3.1087",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5858,6.545]
[1351,{"$raw":"00000000"},21111,"GC.3.1088",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5859,40.013]
[1351,{"$raw":"00000000"},0,"GC.3.1088",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5860,0.985]
[1353,{"$raw":"00000000"},21111,"GC.3.1090",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5861,15.406]
[1353,{"$raw":"00000000"},0,"GC.3.1090",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5862,20.131]
[1356,{"$raw":"00000000"},21111,"GC.3.1093",null,3,"T",1295,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5863,1295.413]
[1356,{"$raw":"00000000"},0,"GC.3.1093",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5864,5.443]
[1358,{"$raw":"00000000"},21106,"GC.3.1095",null,3,"T",363,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5865,363.332]
[1358,{"$raw":"00000000"},0,"GC.3.1095",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5866,2.989]
[1379,{"$raw":"00000000"},21118,"GC.3.1116",null,3,"T",622,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5867,621.576]
[1379,{"$raw":"00000000"},0,"GC.3.1116",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5868,0.771]
[1386,{"$raw":"00000000"},21122,"GC.3.1123",null,3,"T",240,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5869,239.618]
[1386,{"$raw":"00000000"},0,"GC.3.1123",null,3,"T",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5870,59.821]
[1401,{"$raw":"00000000"},21122,"GC.3.1138",null,3,"T",506,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5871,505.685]
[1401,{"$raw":"00000000"},0,"GC.3.1138",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5872,0.065]
[1402,{"$raw":"00000000"},21122,"GC.3.1139",null,3,"T",191,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5873,191.460]
[1402,{"$raw":"00000000"},0,"GC.3.1139",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5874,0.194]
[1419,{"$raw":"00000000"},21111,"GC.3.1155",null,3,"T",103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5875,103.387]
[1419,{"$raw":"00000000"},0,"GC.3.1155",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5876,2.589]
[1424,{"$raw":"00000000"},21122,"GC.3.1158",null,3,"T",83,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5877,83.037]
[1424,{"$raw":"00000000"},0,"GC.3.1158",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5878,0.053]
[1429,{"$raw":"00000000"},21111,"GC.3.1162",null,3,"T",403,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5879,403.030]
[1429,{"$raw":"00000000"},0,"GC.3.1162",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5880,0.087]
[1491,{"$raw":"00000000"},21111,"GC.3.1205",null,3,"T",305,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5881,304.827]
[1491,{"$raw":"00000000"},0,"GC.3.1205",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5882,0.198]
[1494,{"$raw":"00000000"},21111,"GC.3.1208",null,3,"T",151,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5883,150.789]
[1494,{"$raw":"00000000"},0,"GC.3.1208",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5884,0.346]
[1679,{"$raw":"00000000"},21111,"GC.3.1364",null,3,"T",441,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5885,441.391]
[1679,{"$raw":"00000000"},0,"GC.3.1364",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5886,9.578]
[1708,{"$raw":"00000000"},21111,"GC.3.1390",null,3,"T",42,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5887,41.641]
[1708,{"$raw":"00000000"},0,"GC.3.1390",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5888,0.358]
[1796,{"$raw":"00000000"},21111,"GC.3.1469",null,3,"T",839,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5889,839.201]
[1796,{"$raw":"00000000"},0,"GC.3.1469",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5890,14.549]
[1804,{"$raw":"00000000"},21111,"GC.3.1477",null,3,"T",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5891,333.821]
[1804,{"$raw":"00000000"},0,"GC.3.1477",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5892,5.177]
[1805,{"$raw":"00000000"},21111,"GC.3.1478",null,3,"T",458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5893,457.698]
[1805,{"$raw":"00000000"},0,"GC.3.1478",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5894,3.946]
[1835,{"$raw":"00000000"},21106,"GC.3.1508",null,3,"T",240,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5895,239.512]
[1835,{"$raw":"00000000"},21111,"GC.3.1508",null,3,"T",362,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5896,362.430]
[1838,{"$raw":"00000000"},21106,"GC.3.1511",null,3,"T",219,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5897,218.663]
[1838,{"$raw":"00000000"},21111,"GC.3.1511",null,3,"T",351,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5898,351.409]
[1840,{"$raw":"00000000"},21106,"GC.3.1513",null,3,"T",543,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5899,542.742]
[1840,{"$raw":"00000000"},21111,"GC.3.1513",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5900,3.397]
[1846,{"$raw":"00000000"},21106,"GC.3.1519",null,3,"T",487,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5901,487.176]
[1846,{"$raw":"00000000"},21111,"GC.3.1519",null,3,"T",90,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5902,89.593]
[1847,{"$raw":"00000000"},21106,"GC.3.1520",null,3,"T",267,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5903,266.659]
[1847,{"$raw":"00000000"},21111,"GC.3.1520",null,3,"T",450,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5904,450.403]
[1940,{"$raw":"00000000"},21106,"GC.3.1611",null,3,"T",26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5905,25.786]
[1961,{"$raw":"00000000"},21106,"GC.3.1632",null,3,"T",680,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5906,679.781]
[1961,{"$raw":"00000000"},21111,"GC.3.1632",null,3,"T",259,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5907,259.244]
[1962,{"$raw":"00000000"},21106,"GC.3.1633",null,3,"T",709,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5908,709.005]
[1962,{"$raw":"00000000"},21111,"GC.3.1633",null,3,"T",373,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5909,372.733]
[1965,{"$raw":"00000000"},21106,"GC.3.1636",null,3,"T",480,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5910,480.021]
[1965,{"$raw":"00000000"},21111,"GC.3.1636",null,3,"T",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5911,304.352]
[2089,{"$raw":"00000000"},21111,"GC.3.1749",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5912,16.584]
[2098,{"$raw":"00000000"},21106,"GC.3.1757",null,3,"T",69,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5913,69.375]
[2100,{"$raw":"00000000"},0,"GC.3.1759",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5914,11.099]
[2101,{"$raw":"00000000"},21106,"GC.3.1760",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5915,8.676]
[2101,{"$raw":"00000000"},0,"GC.3.1760",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5916,1.762]
[2304,{"$raw":"00000000"},21106,"GC.3.1923",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5917,2.367]
[2304,{"$raw":"00000000"},0,"GC.3.1923",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5918,2.212]
[2340,{"$raw":"00000000"},21106,"GC.3.1951",null,3,"T",168,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5919,168.077]
[2340,{"$raw":"00000000"},0,"GC.3.1951",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5920,3.517]
[2422,{"$raw":"00000000"},21102,"GC.3.2028",null,3,"T",46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5921,46.154]
[2422,{"$raw":"00000000"},21106,"GC.3.2028",null,3,"T",1862,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5922,1861.988]
[2455,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",397,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",5923,397.330]
[2455,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",5924,57.950]
[2460,{"$raw":"00000000"},21102,"GC.3.2065",null,3,"T",511,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5925,511.092]
[2460,{"$raw":"00000000"},21106,"GC.3.2065",null,3,"T",305,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5926,305.403]
[2465,{"$raw":"00000000"},21102,"GC.3.2070",null,3,"T",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5927,60.428]
[2465,{"$raw":"00000000"},21106,"GC.3.2070",null,3,"T",476,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5928,476.475]
[2496,{"$raw":"00000000"},21120,"GC.3.2100",null,3,"T",212,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5929,211.690]
[2496,{"$raw":"00000000"},21106,"GC.3.2100",null,3,"T",102,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5930,101.566]
[2557,{"$raw":"00000000"},21120,"GC.3.2156",null,3,"T",45,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5931,45.388]
[2557,{"$raw":"00000000"},21106,"GC.3.2156",null,3,"T",48,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5932,47.882]
[2621,{"$raw":"00000000"},21102,"GC.3.2215",null,3,"T",73,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5933,73.082]
[2621,{"$raw":"00000000"},21106,"GC.3.2215",null,3,"T",176,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5934,175.584]
[2639,{"$raw":"00000000"},21118,"GC.3.2233",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5935,8.622]
[2746,{"$raw":"00000000"},21122,"GC.3.2331",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5936,40.320]
[2773,{"$raw":"00000000"},21118,"GC.3.2354",null,3,"T",159,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5937,158.507]
[2773,{"$raw":"00000000"},0,"GC.3.2354",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5938,0.448]
[2817,{"$raw":"00000000"},21118,"GC.3.2392",null,3,"T",477,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5939,476.728]
[2817,{"$raw":"00000000"},21122,"GC.3.2392",null,3,"T",157,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5940,156.988]
[2850,{"$raw":"00000000"},21122,"GC.3.2413",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5941,338.707]
[2850,{"$raw":"00000000"},0,"GC.3.2413",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5942,3.226]
[2852,{"$raw":"00000000"},21122,"GC.3.2415",null,3,"T",671,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5943,671.317]
[2855,{"$raw":"00000000"},21122,"GC.3.2418",null,3,"T",558,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5944,557.616]
[2855,{"$raw":"00000000"},0,"GC.3.2418",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5945,0.808]
[2889,{"$raw":"00000000"},21122,"GC.3.2443",null,3,"T",561,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5946,561.342]
[2889,{"$raw":"00000000"},0,"GC.3.2443",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5947,3.821]
[2894,{"$raw":"00000000"},21122,"GC.3.2446",null,3,"T",1370,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5948,1369.854]
[2894,{"$raw":"00000000"},0,"GC.3.2446",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5949,0.046]
[2935,{"$raw":"00000000"},21122,"GC.3.2473",null,3,"T",985,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5950,985.470]
[2935,{"$raw":"00000000"},0,"GC.3.2473",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5951,0.323]
[3001,{"$raw":"00000000"},21122,"GC.3.2529",null,3,"T",459,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5952,458.913]
[3001,{"$raw":"00000000"},0,"GC.3.2529",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",5953,3.707]
[3032,{"$raw":"00000000"},21118,"GC.3.2557",null,3,"T",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5954,20.943]
[3032,{"$raw":"00000000"},21122,"GC.3.2557",null,3,"T",456,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5955,455.859]
[3036,{"$raw":"00000000"},21118,"GC.3.2561",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5956,16.249]
[3036,{"$raw":"00000000"},21122,"GC.3.2561",null,3,"T",693,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5957,693.411]
[3037,{"$raw":"00000000"},21118,"GC.3.2562",null,3,"T",325,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5958,325.418]
[3037,{"$raw":"00000000"},21122,"GC.3.2562",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5959,28.743]
[3149,{"$raw":"00000000"},21118,"GC.3.2660",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5960,1.719]
[3149,{"$raw":"00000000"},21122,"GC.3.2660",null,3,"T",2271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5961,2270.970]
[3152,{"$raw":"00000000"},21118,"GC.3.2663",null,3,"T",32,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5962,31.920]
[3152,{"$raw":"00000000"},21122,"GC.3.2663",null,3,"T",2158,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5963,2157.694]
[3153,{"$raw":"00000000"},21118,"GC.3.2664",null,3,"T",587,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5964,586.963]
[3153,{"$raw":"00000000"},21122,"GC.3.2664",null,3,"T",954,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5965,954.253]
[3173,{"$raw":"00000000"},21102,"GC.3.2684",null,3,"T",743,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5966,743.415]
[3173,{"$raw":"00000000"},21118,"GC.3.2684",null,3,"T",142,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5967,141.771]
[3174,{"$raw":"00000000"},21102,"GC.3.2685",null,3,"T",1667,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5968,1667.259]
[3174,{"$raw":"00000000"},21106,"GC.3.2685",null,3,"T",75,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5969,74.988]
[3219,{"$raw":"00000000"},21118,"GC.3.2727",null,3,"T",353,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5970,353.310]
[3219,{"$raw":"00000000"},21122,"GC.3.2727",null,3,"T",1361,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5971,1361.263]
[3254,{"$raw":"00000000"},21118,"GC.3.2757",null,3,"T",984,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5972,983.641]
[3254,{"$raw":"00000000"},21122,"GC.3.2757",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5973,15.758]
[3271,{"$raw":"00000000"},21118,"GC.3.2774",null,3,"T",770,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5974,769.930]
[3271,{"$raw":"00000000"},21122,"GC.3.2774",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5975,5.321]
[3274,{"$raw":"00000000"},21118,"GC.3.2777",null,3,"T",1572,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5976,1572.205]
[3274,{"$raw":"00000000"},21122,"GC.3.2777",null,3,"T",564,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5977,563.805]
[3299,{"$raw":"00000000"},21102,"GC.3.2801",null,3,"T",797,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5978,797.052]
[3299,{"$raw":"00000000"},21118,"GC.3.2801",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5979,3.585]
[3302,{"$raw":"00000000"},21102,"GC.3.2804",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5980,4.073]
[3302,{"$raw":"00000000"},21118,"GC.3.2804",null,3,"T",883,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5981,883.097]
[3325,{"$raw":"00000000"},21102,"GC.3.2825",null,3,"T",801,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5982,801.052]
[3325,{"$raw":"00000000"},21118,"GC.3.2825",null,3,"T",846,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5983,846.270]
[3329,{"$raw":"00000000"},21102,"GC.3.2829",null,3,"T",379,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5984,378.614]
[3329,{"$raw":"00000000"},21118,"GC.3.2829",null,3,"T",225,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5985,225.159]
[3331,{"$raw":"00000000"},21102,"GC.3.2831",null,3,"T",417,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5986,416.633]
[3331,{"$raw":"00000000"},21118,"GC.3.2831",null,3,"T",203,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5987,203.098]
[3344,{"$raw":"00000000"},21102,"GC.3.2844",null,3,"T",110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5988,110.375]
[3344,{"$raw":"00000000"},21118,"GC.3.2844",null,3,"T",662,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5989,662.268]
[3346,{"$raw":"00000000"},21102,"GC.3.2846",null,3,"T",762,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5990,762.333]
[3346,{"$raw":"00000000"},21118,"GC.3.2846",null,3,"T",314,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5991,314.474]
[3363,{"$raw":"00000000"},21102,"GC.3.2863",null,3,"T",1103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5992,1102.900]
[3363,{"$raw":"00000000"},21118,"GC.3.2863",null,3,"T",953,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5993,952.923]
[3367,{"$raw":"00000000"},21102,"GC.3.2867",null,3,"T",830,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5994,829.714]
[3367,{"$raw":"00000000"},21118,"GC.3.2867",null,3,"T",1059,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5995,1059.135]
[3450,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",161,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",5996,161.223]
[3451,{"$raw":"00000000"},21102,"GC.3.2940",null,3,"T",104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5997,104.045]
[3451,{"$raw":"00000000"},21106,"GC.3.2940",null,3,"T",63,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5998,62.984]
[3523,{"$raw":"00000000"},21120,"GC.3.3009",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",5999,30.151]
[3656,{"$raw":"00000000"},21120,"GC.3.3121",null,3,"T",153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6000,153.146]
[3656,{"$raw":"00000000"},21102,"GC.3.3121",null,3,"T",609,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6001,609.428]
[3666,{"$raw":"00000000"},21107,"GC.3.3127",null,3,"T",918,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6002,917.517]
[3666,{"$raw":"00000000"},0,"GC.3.3127",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6003,2.874]
[3667,{"$raw":"00000000"},21107,"GC.3.3128",null,3,"T",569,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6004,569.194]
[3667,{"$raw":"00000000"},0,"GC.3.3128",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6005,1.652]
[3675,{"$raw":"00000000"},21107,"GC.3.3135",null,3,"T",42,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6006,42.266]
[3675,{"$raw":"00000000"},21102,"GC.3.3135",null,3,"T",1139,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6007,1139.235]
[3713,{"$raw":"00000000"},21107,"GC.3.3161",null,3,"T",810,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6008,809.980]
[3713,{"$raw":"00000000"},0,"GC.3.3161",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6009,3.452]
[3714,{"$raw":"00000000"},21107,"GC.3.3162",null,3,"T",1562,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6010,1561.559]
[3714,{"$raw":"00000000"},0,"GC.3.3162",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6011,2.773]
[3717,{"$raw":"00000000"},21107,"GC.3.3165",null,3,"T",37,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6012,37.054]
[3717,{"$raw":"00000000"},0,"GC.3.3165",null,3,"T",36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6013,36.037]
[3718,{"$raw":"00000000"},21107,"GC.3.3166",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6014,3.855]
[3718,{"$raw":"00000000"},0,"GC.3.3166",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6015,1.802]
[3719,{"$raw":"00000000"},0,"GC.3.3167",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6016,3.792]
[3747,{"$raw":"00000000"},21107,"GC.3.3191",null,3,"T",1266,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6017,1265.799]
[3747,{"$raw":"00000000"},0,"GC.3.3191",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6018,0.172]
[3778,{"$raw":"00000000"},21119,"GC.3.3218",null,3,"T",917,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6019,917.205]
[3778,{"$raw":"00000000"},0,"GC.3.3218",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6020,6.851]
[3781,{"$raw":"00000000"},21103,"GC.3.3220",null,3,"T",1293,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6021,1292.649]
[3781,{"$raw":"00000000"},21119,"GC.3.3220",null,3,"T",128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6022,128.140]
[3783,{"$raw":"00000000"},21119,"GC.3.3221",null,3,"T",1950,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6023,1950.186]
[3783,{"$raw":"00000000"},0,"GC.3.3221",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6024,5.696]
[3789,{"$raw":"00000000"},21103,"GC.3.3224",null,3,"T",167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6025,166.778]
[3789,{"$raw":"00000000"},21119,"GC.3.3224",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6026,249.111]
[3792,{"$raw":"00000000"},21103,"GC.3.3227",null,3,"T",46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6027,45.796]
[3792,{"$raw":"00000000"},21119,"GC.3.3227",null,3,"T",1265,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6028,1265.144]
[3813,{"$raw":"00000000"},21103,"GC.3.3248",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6029,4.494]
[3813,{"$raw":"00000000"},21119,"GC.3.3248",null,3,"T",1906,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6030,1905.911]
[3865,{"$raw":"00000000"},21119,"GC.3.3298",null,3,"T",87,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6031,87.145]
[3865,{"$raw":"00000000"},0,"GC.3.3298",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6032,0.072]
[3895,{"$raw":"00000000"},21119,"GC.3.3326",null,3,"T",306,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6033,306.304]
[3895,{"$raw":"00000000"},21115,"GC.3.3326",null,3,"T",596,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6034,595.729]
[4000,{"$raw":"00000000"},21103,"GC.3.3394",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6035,4.332]
[4000,{"$raw":"00000000"},0,"GC.3.3394",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6036,0.230]
[4002,{"$raw":"00000000"},21103,"GC.3.3396",null,3,"T",63,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6037,63.342]
[4002,{"$raw":"00000000"},0,"GC.3.3396",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6038,16.172]
[4004,{"$raw":"00000000"},21121,"GC.3.3398",null,3,"T",216,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6039,216.388]
[4039,{"$raw":"00000000"},21115,"GC.3.3424",null,3,"T",843,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6040,843.328]
[4039,{"$raw":"00000000"},21120,"GC.3.3424",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6041,1.691]
[4075,{"$raw":"00000000"},21120,"GC.3.3447",null,3,"T",1959,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6042,1959.483]
[4075,{"$raw":"00000000"},21106,"GC.3.3447",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6043,5.809]
[4102,{"$raw":"00000000"},21122,"GC.3.3461",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6044,29.252]
[4104,{"$raw":"00000000"},21107,"GC.3.3463",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6045,24.230]
[4104,{"$raw":"00000000"},0,"GC.3.3463",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6046,0.441]
[4105,{"$raw":"00000000"},21107,"GC.3.3464",null,3,"T",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6047,60.216]
[4107,{"$raw":"00000000"},21107,"GC.3.3466",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6048,79.174]
[4111,{"$raw":"00000000"},21118,"GC.3.3470",null,3,"T",54,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6049,53.775]
[4111,{"$raw":"00000000"},21122,"GC.3.3470",null,3,"T",101,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6050,101.134]
[4118,{"$raw":"00000000"},21119,"GC.3.3475",null,3,"T",1134,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6051,1134.264]
[4118,{"$raw":"00000000"},0,"GC.3.3475",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6052,0.077]
[4119,{"$raw":"00000000"},21119,"GC.3.3476",null,3,"T",1307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6053,1307.138]
[4119,{"$raw":"00000000"},0,"GC.3.3476",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6054,1.186]
[4122,{"$raw":"00000000"},21111,"GC.3.3479",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6055,8.939]
[4122,{"$raw":"00000000"},0,"GC.3.3479",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6056,1.191]
[4125,{"$raw":"00000000"},21122,"GC.3.3482",null,3,"T",1276,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6057,1276.365]
[4125,{"$raw":"00000000"},0,"GC.3.3482",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6058,53.300]
[4231,{"$raw":"00000000"},21111,"GC.3.3568",null,3,"T",483,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6059,483.006]
[4231,{"$raw":"00000000"},0,"GC.3.3568",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6060,0.558]
[4237,{"$raw":"00000000"},21111,"GC.3.3574",null,3,"T",154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6061,153.752]
[4237,{"$raw":"00000000"},0,"GC.3.3574",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6062,0.522]
[4244,{"$raw":"00000000"},21111,"GC.3.3579",null,3,"T",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6063,59.977]
[4244,{"$raw":"00000000"},0,"GC.3.3579",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6064,66.261]
[4248,{"$raw":"00000000"},21111,"GC.3.3583",null,3,"T",268,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6065,268.321]
[4248,{"$raw":"00000000"},0,"GC.3.3583",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6066,2.598]
[4270,{"$raw":"00000000"},21111,"GC.3.3605",null,3,"T",97,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6067,96.593]
[4270,{"$raw":"00000000"},0,"GC.3.3605",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6068,0.890]
[4271,{"$raw":"00000000"},21111,"GC.3.3606",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6069,29.650]
[4271,{"$raw":"00000000"},0,"GC.3.3606",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6070,1.885]
[4281,{"$raw":"00000000"},21106,"GC.3.3616",null,3,"T",46,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6071,46.196]
[4281,{"$raw":"00000000"},21111,"GC.3.3616",null,3,"T",246,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6072,246.392]
[4285,{"$raw":"00000000"},21106,"GC.3.3620",null,3,"T",124,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6073,124.453]
[4285,{"$raw":"00000000"},21111,"GC.3.3620",null,3,"T",22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6074,22.466]
[4298,{"$raw":"00000000"},21106,"GC.3.3633",null,3,"T",59,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6075,59.439]
[4298,{"$raw":"00000000"},21111,"GC.3.3633",null,3,"T",12,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6076,12.125]
[4344,{"$raw":"00000000"},21106,"GC.3.3671",null,3,"T",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6077,20.986]
[4344,{"$raw":"00000000"},0,"GC.3.3671",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6078,65.688]
[4345,{"$raw":"00000000"},21106,"GC.3.3672",null,3,"T",49,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6079,49.155]
[4345,{"$raw":"00000000"},0,"GC.3.3672",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6080,1.909]
[4346,{"$raw":"00000000"},21106,"GC.3.3673",null,3,"T",38,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6081,38.410]
[4346,{"$raw":"00000000"},0,"GC.3.3673",null,3,"T",89,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6082,88.662]
[4358,{"$raw":"00000000"},21106,"GC.3.3682",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6083,65.842]
[4358,{"$raw":"00000000"},0,"GC.3.3682",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6084,2.135]
[4422,{"$raw":"00000000"},21106,"GC.3.3728",null,3,"T",146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6085,146.449]
[4422,{"$raw":"00000000"},0,"GC.3.3728",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6086,0.092]
[4439,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",246,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6087,245.618]
[4439,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",310,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6088,310.266]
[4471,{"$raw":"00000000"},21120,"GC.3.3771",null,3,"T",277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6089,277.115]
[4471,{"$raw":"00000000"},21106,"GC.3.3771",null,3,"T",2146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6090,2146.328]
[4474,{"$raw":"00000000"},21120,"GC.3.3774",null,3,"T",14,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6091,14.215]
[4474,{"$raw":"00000000"},21106,"GC.3.3774",null,3,"T",1559,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6092,1559.434]
[4475,{"$raw":"00000000"},21120,"GC.3.3775",null,3,"T",376,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6093,375.696]
[4475,{"$raw":"00000000"},21106,"GC.3.3775",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6094,4.379]
[4496,{"$raw":"00000000"},21120,"GC.3.3795",null,3,"T",582,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6095,581.641]
[4496,{"$raw":"00000000"},21106,"GC.3.3795",null,3,"T",160,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6096,159.710]
[4529,{"$raw":"00000000"},21118,"GC.3.3825",null,3,"T",641,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6097,641.212]
[4529,{"$raw":"00000000"},0,"GC.3.3825",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6098,0.026]
[4531,{"$raw":"00000000"},21102,"GC.3.3827",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6099,92.289]
[4531,{"$raw":"00000000"},0,"GC.3.3827",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6100,0.567]
[4558,{"$raw":"00000000"},21120,"GC.3.3848",null,3,"T",278,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6101,277.717]
[4558,{"$raw":"00000000"},21102,"GC.3.3848",null,3,"T",48,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6102,47.944]
[4585,{"$raw":"00000000"},21122,"GC.3.3871",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6103,97.621]
[4585,{"$raw":"00000000"},0,"GC.3.3871",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6104,1.167]
[4599,{"$raw":"00000000"},21122,"GC.3.3885",null,3,"T",45,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6105,44.917]
[4599,{"$raw":"00000000"},0,"GC.3.3885",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6106,1.215]
[4628,{"$raw":"00000000"},21122,"GC.3.3911",null,3,"T",372,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6107,371.630]
[4628,{"$raw":"00000000"},0,"GC.3.3911",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6108,0.994]
[4630,{"$raw":"00000000"},21122,"GC.3.3912",null,3,"T",390,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6109,389.789]
[4630,{"$raw":"00000000"},0,"GC.3.3912",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6110,0.973]
[4633,{"$raw":"00000000"},21122,"GC.3.3915",null,3,"T",106,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6111,105.774]
[4637,{"$raw":"00000000"},21122,"GC.3.3919",null,3,"T",289,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6112,289.281]
[4637,{"$raw":"00000000"},0,"GC.3.3919",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6113,97.505]
[4640,{"$raw":"00000000"},21122,"GC.3.3921",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6114,12.567]
[4640,{"$raw":"00000000"},0,"GC.3.3921",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6115,1.473]
[4641,{"$raw":"00000000"},21122,"GC.3.3922",null,3,"T",63,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6116,62.824]
[4683,{"$raw":"00000000"},21122,"GC.3.3953",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6117,39.559]
[4683,{"$raw":"00000000"},0,"GC.3.3953",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6118,0.150]
[4696,{"$raw":"00000000"},21118,"GC.3.3965",null,3,"T",560,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6119,559.868]
[4696,{"$raw":"00000000"},21122,"GC.3.3965",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6120,3.920]
[4697,{"$raw":"00000000"},21118,"GC.3.3966",null,3,"T",141,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6121,141.287]
[4697,{"$raw":"00000000"},21122,"GC.3.3966",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6122,5.945]
[4698,{"$raw":"00000000"},21118,"GC.3.3967",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6123,4.769]
[4698,{"$raw":"00000000"},21122,"GC.3.3967",null,3,"T",346,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6124,346.212]
[4701,{"$raw":"00000000"},21118,"GC.3.3969",null,3,"T",706,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6125,705.603]
[4701,{"$raw":"00000000"},21122,"GC.3.3969",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6126,7.101]
[4707,{"$raw":"00000000"},21118,"GC.3.3974",null,3,"T",824,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6127,824.466]
[4707,{"$raw":"00000000"},21122,"GC.3.3974",null,3,"T",163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6128,163.138]
[4708,{"$raw":"00000000"},21118,"GC.3.3975",null,3,"T",397,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6129,396.609]
[4708,{"$raw":"00000000"},21122,"GC.3.3975",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6130,79.433]
[4728,{"$raw":"00000000"},21122,"GC.3.3992",null,3,"T",329,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6131,328.810]
[4728,{"$raw":"00000000"},0,"GC.3.3992",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6132,5.083]
[4730,{"$raw":"00000000"},21122,"GC.3.3994",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6133,39.740]
[4730,{"$raw":"00000000"},0,"GC.3.3994",null,3,"T",22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6134,22.179]
[4744,{"$raw":"00000000"},21102,"GC.3.4006",null,3,"T",521,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6135,520.865]
[4744,{"$raw":"00000000"},21118,"GC.3.4006",null,3,"T",307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6136,307.226]
[4766,{"$raw":"00000000"},21118,"GC.3.4025",null,3,"T",293,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6137,293.100]
[4766,{"$raw":"00000000"},21122,"GC.3.4025",null,3,"T",164,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6138,163.709]
[4771,{"$raw":"00000000"},21118,"GC.3.4030",null,3,"T",1338,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6139,1337.698]
[4771,{"$raw":"00000000"},21122,"GC.3.4030",null,3,"T",279,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6140,279.096]
[4799,{"$raw":"00000000"},21118,"GC.3.4055",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6141,24.194]
[4799,{"$raw":"00000000"},0,"GC.3.4055",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6142,5.132]
[4851,{"$raw":"00000000"},21107,"GC.3.4093",null,3,"T",565,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6143,565.018]
[4851,{"$raw":"00000000"},0,"GC.3.4093",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6144,6.509]
[4864,{"$raw":"00000000"},21107,"GC.3.4104",null,3,"T",31,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6145,30.716]
[4864,{"$raw":"00000000"},21102,"GC.3.4104",null,3,"T",292,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6146,292.485]
[4878,{"$raw":"00000000"},21115,"GC.3.4114",null,3,"T",351,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6147,351.226]
[4878,{"$raw":"00000000"},21120,"GC.3.4114",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6148,24.155]
[4879,{"$raw":"00000000"},21120,"GC.3.4115",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6149,9.899]
[4879,{"$raw":"00000000"},21102,"GC.3.4115",null,3,"T",1492,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6150,1491.551]
[4900,{"$raw":"00000000"},21107,"GC.3.4133",null,3,"T",52,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6151,52.043]
[4900,{"$raw":"00000000"},0,"GC.3.4133",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6152,2.308]
[4901,{"$raw":"00000000"},21107,"GC.3.4134",null,3,"T",73,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6153,73.213]
[4902,{"$raw":"00000000"},21107,"GC.3.4135",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6154,5.501]
[4916,{"$raw":"00000000"},21119,"GC.3.4144",null,3,"T",390,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6155,390.026]
[4916,{"$raw":"00000000"},21115,"GC.3.4144",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6156,2.041]
[4927,{"$raw":"00000000"},21119,"GC.3.4155",null,3,"T",1313,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6157,1313.054]
[4927,{"$raw":"00000000"},0,"GC.3.4155",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6158,0.028]
[4930,{"$raw":"00000000"},21119,"GC.3.4158",null,3,"T",35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6159,34.744]
[4931,{"$raw":"00000000"},21119,"GC.3.4159",null,3,"T",239,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6160,239.037]
[4931,{"$raw":"00000000"},0,"GC.3.4159",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6161,5.230]
[4936,{"$raw":"00000000"},21119,"GC.3.4164",null,3,"T",150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6162,150.299]
[4936,{"$raw":"00000000"},0,"GC.3.4164",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6163,10.185]
[4937,{"$raw":"00000000"},21103,"GC.3.4165",null,3,"T",231,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6164,231.319]
[4937,{"$raw":"00000000"},21119,"GC.3.4165",null,3,"T",78,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6165,78.495]
[4937,{"$raw":"00000000"},0,"GC.3.4165",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6166,3.530]
[4941,{"$raw":"00000000"},21103,"GC.3.4167",null,3,"T",197,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6167,196.956]
[4941,{"$raw":"00000000"},21119,"GC.3.4167",null,3,"T",542,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6168,542.442]
[4952,{"$raw":"00000000"},21119,"GC.3.4178",null,3,"T",222,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6169,222.234]
[4952,{"$raw":"00000000"},0,"GC.3.4178",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6170,2.164]
[4976,{"$raw":"00000000"},21115,"GC.3.4196",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6171,4.833]
[4976,{"$raw":"00000000"},21120,"GC.3.4196",null,3,"T",165,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6172,165.027]
[4983,{"$raw":"00000000"},21103,"GC.3.4201",null,3,"T",282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6173,282.087]
[4984,{"$raw":"00000000"},21103,"GC.3.4202",null,3,"T",423,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6174,422.722]
[4985,{"$raw":"00000000"},21103,"GC.3.4203",null,3,"T",362,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6175,362.423]
[4986,{"$raw":"00000000"},21103,"GC.3.4204",null,3,"T",33,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6176,33.144]
[4990,{"$raw":"00000000"},21103,"GC.3.4208",null,3,"T",165,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6177,165.107]
[4992,{"$raw":"00000000"},21121,"GC.3.4210",null,3,"T",31,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6178,31.478]
[4992,{"$raw":"00000000"},0,"GC.3.4210",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6179,4.587]
[4994,{"$raw":"00000000"},21121,"GC.3.4212",null,3,"T",22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6180,22.244]
[4995,{"$raw":"00000000"},21121,"GC.3.4213",null,3,"T",474,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6181,473.920]
[5027,{"$raw":"00000000"},21115,"GC.3.4237",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6182,7.236]
[5027,{"$raw":"00000000"},21120,"GC.3.4237",null,3,"T",194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6183,193.910]
[5029,{"$raw":"00000000"},21115,"GC.3.4239",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6184,5.663]
[5029,{"$raw":"00000000"},21120,"GC.3.4239",null,3,"T",121,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6185,120.616]
[5050,{"$raw":"00000000"},21121,"GC.3.4256",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6186,2.839]
[5050,{"$raw":"00000000"},21117,"GC.3.4256",null,3,"T",1848,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6187,1847.689]
[5115,{"$raw":"00000000"},21102,"GC.3.4313",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6188,5.678]
[5115,{"$raw":"00000000"},21106,"GC.3.4313",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6189,9.912]
[5116,{"$raw":"00000000"},21102,"GC.3.4314",null,3,"T",1023,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6190,1022.892]
[5116,{"$raw":"00000000"},21106,"GC.3.4314",null,3,"T",64,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6191,64.249]
[5117,{"$raw":"00000000"},21102,"GC.3.4315",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6192,5.678]
[5117,{"$raw":"00000000"},21106,"GC.3.4315",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6193,9.912]
[5164,{"$raw":"00000000"},21120,"GC.3.4360",null,3,"T",516,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6194,516.146]
[5164,{"$raw":"00000000"},21102,"GC.3.4360",null,3,"T",652,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6195,651.832]
[5182,{"$raw":"00000000"},21115,"GC.3.4378",null,3,"T",785,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6196,784.629]
[5182,{"$raw":"00000000"},21107,"GC.3.4378",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6197,30.165]
[31,{"$raw":"00000000"},21119,"EM 541","OPER",2,"A",375,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6198,374.815]
[3425,{"$raw":"00000000"},21102,"GC.3.4390",null,3,"T",283,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6199,282.664]
[3425,{"$raw":"00000000"},21106,"GC.3.4390",null,3,"T",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6200,257.314]
[1018,{"$raw":"00000000"},21121,"GC.3.4400",null,3,"T",1433,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6201,1433.160]
[1018,{"$raw":"00000000"},21117,"GC.3.4400",null,3,"T",418,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6202,417.934]
[1661,{"$raw":"00000000"},21111,"GC.3.4402",null,3,"T",694,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6203,694.057]
[1661,{"$raw":"00000000"},0,"GC.3.4402",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6204,13.297]
[1075,{"$raw":"00000000"},21103,"GC.3.4433",null,3,"T",311,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6205,310.509]
[1075,{"$raw":"00000000"},21119,"GC.3.4433",null,3,"T",3093,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6206,3093.219]
[4862,{"$raw":"00000000"},21118,"GC.3.4450",null,3,"T",855,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6207,855.391]
[4862,{"$raw":"00000000"},0,"GC.3.4450",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6208,6.510]
[3756,{"$raw":"00000000"},21103,"GC.3.4453",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6209,6.959]
[3756,{"$raw":"00000000"},21119,"GC.3.4453",null,3,"T",722,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6210,721.970]
[3952,{"$raw":"00000000"},21116,"GC.3.4491",null,3,null,64,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","OV",6211,64.212]
[3952,{"$raw":"00000000"},21120,"GC.3.4491",null,3,null,531,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","OV",6212,530.525]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",1107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6213,1106.858]
[36,{"$raw":"00000000"},21115,"ER 266","OPER",1,"A",162,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6214,162.446]
[784,{"$raw":"00000000"},21103,"GC.3.4511",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6215,9.207]
[784,{"$raw":"00000000"},21119,"GC.3.4511",null,3,"T",35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6216,34.629]
[784,{"$raw":"00000000"},21103,"GC.3.4512",null,3,"T",769,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6217,769.430]
[784,{"$raw":"00000000"},21119,"GC.3.4512",null,3,"T",271,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6218,271.237]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,285,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6219,285.149]
[19,{"$raw":"00000000"},21119,"CM 1187","OPER",2,null,7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6220,6.620]
[3040,{"$raw":"00000000"},21118,"GC.3.4538",null,3,"T",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6221,334.472]
[3040,{"$raw":"00000000"},21122,"GC.3.4538",null,3,"T",664,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6222,664.478]
[2815,{"$raw":"00000000"},21118,"GC.3.4539",null,3,"T",393,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6223,392.577]
[2815,{"$raw":"00000000"},21122,"GC.3.4539",null,3,"T",898,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6224,897.907]
[1459,{"$raw":"00000000"},21103,"GC.3.4552",null,3,"T",43,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6225,43.170]
[1459,{"$raw":"00000000"},21119,"GC.3.4552",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6226,6.048]
[3982,{"$raw":"00000000"},21119,"GC.3.4571",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6227,33.862]
[3982,{"$raw":"00000000"},21115,"GC.3.4571",null,3,"T",3610,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6228,3610.426]
[22,{"$raw":"00000000"},21107,"EM 123-1","OPER",2,"A",458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6229,458.402]
[22,{"$raw":"00000000"},0,"EM 123-1","OPER",2,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,null,"Grândola-Cercal","EM",6230,0.214]
[15,{"$raw":"00000000"},21121,"CM 1158","OPER",2,null,655,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6231,655.158]
[15,{"$raw":"00000000"},21117,"CM 1158","OPER",2,null,213,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6232,212.568]
[2104,{"$raw":"00000000"},21106,"GC.3.4630",null,3,"T",623,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6233,622.549]
[2104,{"$raw":"00000000"},0,"GC.3.4630",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6234,0.196]
[4067,{"$raw":"00000000"},21103,"GC.3.4644",null,3,"T",277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6235,276.681]
[4067,{"$raw":"00000000"},21121,"GC.3.4644",null,3,"T",812,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6236,812.303]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6237,16.753]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",1434,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6238,1433.681]
[4537,{"$raw":"00000000"},21102,"GC.3.4665",null,3,"T",1057,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6239,1056.630]
[4537,{"$raw":"00000000"},21118,"GC.3.4665",null,3,"T",997,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6240,996.689]
[3658,{"$raw":"00000000"},21118,"GC.3.4675",null,3,"T",1406,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6241,1406.398]
[3658,{"$raw":"00000000"},0,"GC.3.4675",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6242,29.155]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6243,126.300]
[36,{"$raw":"00000000"},21119,"ER 266","OPER",1,"A",269,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6244,268.926]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6245,17.295]
[36,{"$raw":"00000000"},21119,"ER 266","OPER",1,"A",126,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6246,126.303]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",174,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6247,174.184]
[3526,{"$raw":"00000000"},21120,"GC.3.4688",null,3,"T",197,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6248,196.678]
[3526,{"$raw":"00000000"},21102,"GC.3.4688",null,3,"T",44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6249,44.417]
[31,{"$raw":"00000000"},21103,"EM 541","OPER",2,"A",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6250,27.503]
[31,{"$raw":"00000000"},21119,"EM 541","OPER",2,"A",64,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6251,63.990]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",1606,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6252,1606.144]
[36,{"$raw":"00000000"},0,"ER 266","OPER",1,"A",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,null,"Grândola-Cercal","ER",6253,4.404]
[502,{"$raw":"00000000"},21103,"GC.3.4698",null,3,"T",51,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6254,50.708]
[502,{"$raw":"00000000"},21121,"GC.3.4698",null,3,"T",146,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6255,146.071]
[19,{"$raw":"00000000"},21103,"CM 1187","OPER",2,null,222,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6256,221.866]
[19,{"$raw":"00000000"},21121,"CM 1187","OPER",2,null,256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6257,256.241]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",424,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6258,424.322]
[30,{"$raw":"00000000"},21111,"EM 532","OPER",2,"A",122,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6259,122.346]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",421,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6260,420.810]
[40,{"$raw":"00000000"},21107,"ER 123","OPER",1,"A",44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6261,44.435]
[39,{"$raw":"00000000"},21120,"ER 393","OPER",1,"A",1934,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6262,1934.276]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",68,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6263,68.391]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6264,97.727]
[35,{"$raw":"00000000"},0,"ER 120","OPER",1,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,null,"Grândola-Cercal","ER",6265,0.145]
[128,{"$raw":"00000000"},21103,"GC.3.4730",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6266,27.516]
[128,{"$raw":"00000000"},21121,"GC.3.4730",null,3,"T",1630,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6267,1629.736]
[36,{"$raw":"00000000"},21119,"ER 266","OPER",1,"A",570,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6268,570.326]
[428,{"$raw":"00000000"},21103,"GC.3.4756",null,3,"T",2252,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6269,2252.125]
[428,{"$raw":"00000000"},21121,"GC.3.4756",null,3,"T",1428,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6270,1427.579]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",331,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6271,330.856]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",1568,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6272,1567.829]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",466,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6273,465.501]
[35,{"$raw":"00000000"},21106,"ER 120","OPER",1,"A",342,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6274,342.147]
[40,{"$raw":"00000000"},21115,"ER 123","OPER",1,"A",42,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6275,42.435]
[40,{"$raw":"00000000"},21120,"ER 123","OPER",1,"A",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6276,16.932]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6277,87.805]
[10,{"$raw":"00000000"},21117,"CM 1124","OPER",2,null,325,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6278,325.419]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6279,60.325]
[32,{"$raw":"00000000"},21116,"EM 552","OPER",2,"A",514,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6280,514.279]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",37,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6281,37.289]
[32,{"$raw":"00000000"},21103,"EM 552","OPER",2,"A",18,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6282,18.005]
[32,{"$raw":"00000000"},21121,"EM 552","OPER",2,"A",1635,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6283,1634.829]
[1009,{"$raw":"00000000"},21121,"GC.3.4825",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6284,84.961]
[1009,{"$raw":"00000000"},21117,"GC.3.4825",null,3,"T",955,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6285,954.905]
[10,{"$raw":"00000000"},21121,"CM 1124","OPER",2,null,113,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6286,112.705]
[10,{"$raw":"00000000"},21117,"CM 1124","OPER",2,null,539,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6287,538.613]
[1174,{"$raw":"00000000"},21121,"GC.3.4843",null,3,"T",107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6288,107.312]
[1174,{"$raw":"00000000"},21117,"GC.3.4843",null,3,"T",635,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6289,635.143]
[14,{"$raw":"00000000"},21115,"CM 1127","OPER",2,null,421,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6290,421.001]
[14,{"$raw":"00000000"},21102,"CM 1127","OPER",2,null,1108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6291,1107.770]
[1193,{"$raw":"00000000"},21120,"GC.3.4845",null,3,"T",549,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6292,549.089]
[1193,{"$raw":"00000000"},21117,"GC.3.4845",null,3,"T",123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6293,123.301]
[1208,{"$raw":"00000000"},21107,"GC.3.4847",null,3,"T",862,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6294,862.005]
[1208,{"$raw":"00000000"},0,"GC.3.4847",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6295,4.283]
[17,{"$raw":"00000000"},21119,"CM 1162","OPER",2,null,940,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6296,940.129]
[17,{"$raw":"00000000"},21107,"CM 1162","OPER",2,null,198,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6297,198.181]
[2726,{"$raw":"00000000"},21118,"GC.3.4942",null,3,"T",634,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6298,633.691]
[2726,{"$raw":"00000000"},21122,"GC.3.4942",null,3,"T",75,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6299,74.863]
[2842,{"$raw":"00000000"},21118,"GC.3.4954",null,3,"T",481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6300,480.531]
[2842,{"$raw":"00000000"},21122,"GC.3.4954",null,3,"T",404,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6301,403.782]
[2744,{"$raw":"00000000"},21118,"GC.3.4957",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6302,3.628]
[2744,{"$raw":"00000000"},21122,"GC.3.4957",null,3,"T",213,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6303,213.089]
[30,{"$raw":"00000000"},21102,"EM 532","OPER",2,"A",214,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6304,214.223]
[30,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",67,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6305,67.209]
[3524,{"$raw":"00000000"},21120,"GC.3.5009",null,3,"T",1014,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6306,1013.662]
[3524,{"$raw":"00000000"},21102,"GC.3.5009",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6307,3.629]
[34,{"$raw":"00000000"},21120,"EN 263","OPER",1,"A",548,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","EN",6308,548.432]
[34,{"$raw":"00000000"},21102,"EN 263","OPER",1,"A",503,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","EN",6309,502.719]
[3753,{"$raw":"00000000"},21103,"GC.3.5031",null,3,"T",63,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6310,63.054]
[3753,{"$raw":"00000000"},21119,"GC.3.5031",null,3,"T",153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6311,153.488]
[3983,{"$raw":"00000000"},21119,"GC.3.5049",null,3,"T",130,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6312,130.166]
[3983,{"$raw":"00000000"},21115,"GC.3.5049",null,3,"T",424,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6313,423.685]
[18,{"$raw":"00000000"},21115,"CM 1162-2","OPER",2,null,18,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6314,17.830]
[39,{"$raw":"00000000"},21117,"ER 393","OPER",1,"A",688,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6315,687.519]
[39,{"$raw":"00000000"},21111,"ER 393","OPER",1,"A",468,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6316,468.360]
[18,{"$raw":"00000000"},21119,"CM 1162-2","OPER",2,null,55,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6317,55.383]
[4040,{"$raw":"00000000"},21103,"GC.3.5059",null,3,"T",1231,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6318,1231.428]
[4040,{"$raw":"00000000"},21119,"GC.3.5059",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6319,2.075]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6320,26.634]
[36,{"$raw":"00000000"},21119,"ER 266","OPER",1,"A",55,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6321,55.238]
[4053,{"$raw":"00000000"},21103,"GC.3.5062",null,3,"T",206,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6322,205.698]
[4053,{"$raw":"00000000"},21119,"GC.3.5062",null,3,"T",158,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6323,158.267]
[28,{"$raw":"00000000"},21107,"EM 503","OPER",2,"A",626,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6324,626.269]
[28,{"$raw":"00000000"},0,"EM 503","OPER",2,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,null,"Grândola-Cercal","EM",6325,0.137]
[4126,{"$raw":"00000000"},21118,"GC.3.5073",null,3,"T",426,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6326,425.663]
[4126,{"$raw":"00000000"},0,"GC.3.5073",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6327,0.131]
[2,{"$raw":"00000000"},21122,"CM 1074","OPER",2,null,940,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6328,939.531]
[2,{"$raw":"00000000"},0,"CM 1074","OPER",2,null,1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,null,"Grândola-Cercal","CM",6329,0.795]
[35,{"$raw":"00000000"},21116,"ER 120","OPER",1,"A",110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6330,109.568]
[35,{"$raw":"00000000"},21121,"ER 120","OPER",1,"A",261,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6331,261.103]
[16,{"$raw":"00000000"},21116,"CM 1159","OPER",2,null,26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6332,25.795]
[16,{"$raw":"00000000"},21121,"CM 1159","OPER",2,null,1259,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6333,1258.822]
[16,{"$raw":"00000000"},21117,"CM 1159","OPER",2,null,10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6334,10.179]
[35,{"$raw":"00000000"},21116,"ER 120","OPER",1,"A",323,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6335,322.858]
[35,{"$raw":"00000000"},21120,"ER 120","OPER",1,"A",719,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6336,719.490]
[3920,{"$raw":"00000000"},21116,"GC.3.5165",null,3,null,350,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","OV",6337,349.607]
[3920,{"$raw":"00000000"},21120,"GC.3.5165",null,3,null,325,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","OV",6338,324.760]
[7,{"$raw":"00000000"},21121,"CM 1122","OPER",2,null,553,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6339,553.346]
[7,{"$raw":"00000000"},21117,"CM 1122","OPER",2,null,848,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6340,848.369]
[4055,{"$raw":"00000000"},21103,"GC.3.5173",null,3,"T",842,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6341,841.777]
[4055,{"$raw":"00000000"},21115,"GC.3.5173",null,3,"T",1169,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6342,1169.043]
[18,{"$raw":"00000000"},21115,"CM 1162-2","OPER",2,null,6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6343,5.890]
[2745,{"$raw":"00000000"},21118,"GC.3.5175",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6344,9.143]
[2745,{"$raw":"00000000"},21122,"GC.3.5175",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6345,143.506]
[33,{"$raw":"00000000"},21118,"EN 262","OPER",1,"A",860,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","EN",6346,859.580]
[33,{"$raw":"00000000"},21122,"EN 262","OPER",1,"A",58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","EN",6347,58.298]
[16,{"$raw":"00000000"},21116,"CM 1159","OPER",2,null,486,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6348,486.436]
[16,{"$raw":"00000000"},21120,"CM 1159","OPER",2,null,429,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6349,429.358]
[24,{"$raw":"00000000"},21117,"EM 393-1","OPER",2,"A",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6350,334.431]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6351,0.581]
[24,{"$raw":"00000000"},21117,"EM 393-1","OPER",2,"A",440,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6352,440.109]
[83,{"$raw":"00000000"},21103,"GC.3.39",null,3,"T",72,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6353,71.688]
[83,{"$raw":"00000000"},21103,"GC.3.39",null,3,"T",12,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6354,12.246]
[83,{"$raw":"00000000"},21103,"GC.3.39",null,3,"T",612,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6355,612.437]
[83,{"$raw":"00000000"},21103,"GC.3.39",null,3,"T",44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6356,43.884]
[83,{"$raw":"00000000"},21103,"GC.3.39",null,3,"T",109,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6357,108.635]
[83,{"$raw":"00000000"},21115,"GC.3.39",null,3,"T",42,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6358,41.740]
[83,{"$raw":"00000000"},21115,"GC.3.39",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6359,17.467]
[83,{"$raw":"00000000"},21120,"GC.3.39",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6360,7.109]
[83,{"$raw":"00000000"},21120,"GC.3.39",null,3,"T",54,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6361,54.246]
[83,{"$raw":"00000000"},21120,"GC.3.39",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6362,7.564]
[86,{"$raw":"00000000"},21115,"GC.3.42",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6363,66.463]
[86,{"$raw":"00000000"},21115,"GC.3.42",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6364,29.733]
[86,{"$raw":"00000000"},21115,"GC.3.42",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6365,6.482]
[86,{"$raw":"00000000"},21115,"GC.3.42",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6366,8.411]
[86,{"$raw":"00000000"},21115,"GC.3.42",null,3,"T",49,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6367,48.920]
[86,{"$raw":"00000000"},21115,"GC.3.42",null,3,"T",32,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6368,32.479]
[86,{"$raw":"00000000"},21115,"GC.3.42",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6369,97.806]
[86,{"$raw":"00000000"},21115,"GC.3.42",null,3,"T",71,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6370,71.057]
[86,{"$raw":"00000000"},21115,"GC.3.42",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6371,1.907]
[86,{"$raw":"00000000"},21115,"GC.3.42",null,3,"T",116,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6372,116.380]
[86,{"$raw":"00000000"},21120,"GC.3.42",null,3,"T",1550,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6373,1550.236]
[86,{"$raw":"00000000"},21120,"GC.3.42",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6374,0.249]
[86,{"$raw":"00000000"},21120,"GC.3.42",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6375,24.460]
[86,{"$raw":"00000000"},21120,"GC.3.42",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6376,4.637]
[86,{"$raw":"00000000"},21120,"GC.3.42",null,3,"T",64,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6377,64.396]
[86,{"$raw":"00000000"},21120,"GC.3.42",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6378,4.235]
[86,{"$raw":"00000000"},21120,"GC.3.42",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6379,23.661]
[86,{"$raw":"00000000"},21120,"GC.3.42",null,3,"T",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6380,81.796]
[86,{"$raw":"00000000"},21120,"GC.3.42",null,3,"T",70,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6381,69.937]
[86,{"$raw":"00000000"},21120,"GC.3.42",null,3,"T",257,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6382,256.748]
[87,{"$raw":"00000000"},21115,"GC.3.43",null,3,"T",945,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6383,944.728]
[87,{"$raw":"00000000"},21115,"GC.3.43",null,3,"T",170,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6384,169.681]
[87,{"$raw":"00000000"},21120,"GC.3.43",null,3,"T",12,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6385,12.269]
[87,{"$raw":"00000000"},21120,"GC.3.43",null,3,"T",236,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6386,236.160]
[95,{"$raw":"00000000"},21115,"GC.3.51",null,3,"T",43,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6387,42.971]
[95,{"$raw":"00000000"},21115,"GC.3.51",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6388,41.344]
[95,{"$raw":"00000000"},21120,"GC.3.51",null,3,"T",453,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6389,452.830]
[95,{"$raw":"00000000"},21120,"GC.3.51",null,3,"T",176,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6390,176.320]
[375,{"$raw":"00000000"},21121,"GC.3.297",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6391,8.582]
[375,{"$raw":"00000000"},21121,"GC.3.297",null,3,"T",248,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6392,247.747]
[400,{"$raw":"00000000"},21103,"GC.3.320",null,3,"T",2558,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6393,2557.990]
[400,{"$raw":"00000000"},21103,"GC.3.320",null,3,"T",443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6394,442.737]
[400,{"$raw":"00000000"},21103,"GC.3.320",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6395,4.781]
[400,{"$raw":"00000000"},21121,"GC.3.320",null,3,"T",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6396,81.731]
[400,{"$raw":"00000000"},21121,"GC.3.320",null,3,"T",217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6397,216.675]
[400,{"$raw":"00000000"},21121,"GC.3.320",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6398,10.736]
[475,{"$raw":"00000000"},0,"GC.3.382",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6399,9.889]
[475,{"$raw":"00000000"},0,"GC.3.382",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6400,10.396]
[476,{"$raw":"00000000"},21103,"GC.3.383",null,3,"T",67,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6401,66.784]
[476,{"$raw":"00000000"},21103,"GC.3.383",null,3,"T",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6402,19.028]
[476,{"$raw":"00000000"},21103,"GC.3.383",null,3,"T",31,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6403,31.421]
[476,{"$raw":"00000000"},21103,"GC.3.383",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6404,85.063]
[476,{"$raw":"00000000"},0,"GC.3.383",null,3,"T",52,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6405,52.188]
[476,{"$raw":"00000000"},0,"GC.3.383",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6406,30.344]
[476,{"$raw":"00000000"},0,"GC.3.383",null,3,"T",38,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6407,37.600]
[476,{"$raw":"00000000"},0,"GC.3.383",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6408,19.921]
[476,{"$raw":"00000000"},0,"GC.3.383",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6409,3.649]
[478,{"$raw":"00000000"},0,"GC.3.385",null,3,"T",35,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,null,null,"Grândola-Cercal","RVF",6410,34.731]
[478,{"$raw":"00000000"},0,"GC.3.385",null,3,"T",108,0.00,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"MAN",5,2,1,"VLCI",null,null,null,"Grândola-Cercal","RVF",6411,108.472]
[610,{"$raw":"00000000"},21115,"GC.3.484",null,3,"T",249,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6412,249.327]
[610,{"$raw":"00000000"},21115,"GC.3.484",null,3,"T",304,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6413,303.915]
[610,{"$raw":"00000000"},21115,"GC.3.484",null,3,"T",806,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6414,806.493]
[610,{"$raw":"00000000"},21115,"GC.3.484",null,3,"T",201,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6415,201.414]
[610,{"$raw":"00000000"},21120,"GC.3.484",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6416,40.413]
[610,{"$raw":"00000000"},21120,"GC.3.484",null,3,"T",37,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6417,36.501]
[610,{"$raw":"00000000"},21120,"GC.3.484",null,3,"T",140,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6418,140.379]
[610,{"$raw":"00000000"},21120,"GC.3.484",null,3,"T",493,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6419,492.653]
[655,{"$raw":"00000000"},21116,"GC.3.521",null,3,"T",178,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6420,177.802]
[655,{"$raw":"00000000"},21116,"GC.3.521",null,3,"T",14,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6421,13.550]
[655,{"$raw":"00000000"},21116,"GC.3.521",null,3,"T",108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6422,108.193]
[655,{"$raw":"00000000"},21121,"GC.3.521",null,3,"T",1613,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6423,1612.916]
[655,{"$raw":"00000000"},21121,"GC.3.521",null,3,"T",325,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6424,324.708]
[655,{"$raw":"00000000"},21121,"GC.3.521",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6425,3.024]
[655,{"$raw":"00000000"},21121,"GC.3.521",null,3,"T",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6426,19.088]
[657,{"$raw":"00000000"},21116,"GC.3.522",null,3,"T",2151,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6427,2151.241]
[657,{"$raw":"00000000"},21116,"GC.3.522",null,3,"T",77,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6428,76.508]
[657,{"$raw":"00000000"},21116,"GC.3.522",null,3,"T",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6429,21.116]
[657,{"$raw":"00000000"},21116,"GC.3.522",null,3,"T",63,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6430,62.774]
[657,{"$raw":"00000000"},21121,"GC.3.522",null,3,"T",1015,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6431,1014.984]
[657,{"$raw":"00000000"},21121,"GC.3.522",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6432,15.775]
[657,{"$raw":"00000000"},21121,"GC.3.522",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6433,40.417]
[657,{"$raw":"00000000"},21121,"GC.3.522",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6434,13.149]
[659,{"$raw":"00000000"},21103,"GC.3.524",null,3,"T",435,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6435,434.897]
[659,{"$raw":"00000000"},21103,"GC.3.524",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6436,3.820]
[659,{"$raw":"00000000"},21103,"GC.3.524",null,3,"T",43,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6437,43.145]
[659,{"$raw":"00000000"},21103,"GC.3.524",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6438,66.398]
[659,{"$raw":"00000000"},21103,"GC.3.524",null,3,"T",43,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6439,43.248]
[659,{"$raw":"00000000"},21103,"GC.3.524",null,3,"T",96,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6440,95.920]
[659,{"$raw":"00000000"},21103,"GC.3.524",null,3,"T",63,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6441,62.914]
[659,{"$raw":"00000000"},21103,"GC.3.524",null,3,"T",50,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6442,50.408]
[659,{"$raw":"00000000"},21103,"GC.3.524",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6443,15.386]
[659,{"$raw":"00000000"},21103,"GC.3.524",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6444,39.446]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",511,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6445,510.890]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",208,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6446,208.499]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6447,27.779]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6448,36.264]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",50,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6449,50.339]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6450,28.050]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",211,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6451,211.300]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6452,190.185]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6453,10.849]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",89,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6454,88.717]
[659,{"$raw":"00000000"},21120,"GC.3.524",null,3,"T",407,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6455,407.383]
[686,{"$raw":"00000000"},21115,"GC.3.549",null,3,"T",481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6456,480.840]
[686,{"$raw":"00000000"},21115,"GC.3.549",null,3,"T",67,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6457,67.174]
[686,{"$raw":"00000000"},21120,"GC.3.549",null,3,"T",27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6458,26.696]
[686,{"$raw":"00000000"},21120,"GC.3.549",null,3,"T",441,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6459,440.610]
[687,{"$raw":"00000000"},21115,"GC.3.550",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6460,29.463]
[687,{"$raw":"00000000"},21115,"GC.3.550",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6461,34.460]
[687,{"$raw":"00000000"},21120,"GC.3.550",null,3,"T",1597,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6462,1597.499]
[687,{"$raw":"00000000"},21120,"GC.3.550",null,3,"T",40,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6463,39.560]
[687,{"$raw":"00000000"},21120,"GC.3.550",null,3,"T",101,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6464,101.263]
[698,{"$raw":"00000000"},21103,"GC.3.560",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6465,20.357]
[698,{"$raw":"00000000"},21103,"GC.3.560",null,3,"T",1444,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6466,1444.048]
[698,{"$raw":"00000000"},21115,"GC.3.560",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6467,5.131]
[698,{"$raw":"00000000"},21115,"GC.3.560",null,3,"T",1235,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6468,1235.114]
[709,{"$raw":"00000000"},21103,"GC.3.571",null,3,"T",681,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6469,681.388]
[709,{"$raw":"00000000"},21103,"GC.3.571",null,3,"T",408,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6470,408.022]
[715,{"$raw":"00000000"},21103,"GC.3.577",null,3,"T",55,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6471,54.692]
[715,{"$raw":"00000000"},21103,"GC.3.577",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6472,65.842]
[715,{"$raw":"00000000"},21103,"GC.3.577",null,3,"T",3498,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6473,3497.740]
[715,{"$raw":"00000000"},21115,"GC.3.577",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6474,23.614]
[715,{"$raw":"00000000"},21115,"GC.3.577",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6475,8.379]
[778,{"$raw":"00000000"},21103,"GC.3.631",null,3,"T",22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6476,22.086]
[778,{"$raw":"00000000"},21103,"GC.3.631",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6477,1.536]
[778,{"$raw":"00000000"},21115,"GC.3.631",null,3,"T",100,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6478,99.710]
[778,{"$raw":"00000000"},21115,"GC.3.631",null,3,"T",195,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6479,194.737]
[780,{"$raw":"00000000"},21115,"GC.3.633",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6480,8.665]
[780,{"$raw":"00000000"},21115,"GC.3.633",null,3,"T",2950,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6481,2949.641]
[794,{"$raw":"00000000"},21115,"GC.3.642",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6482,0.510]
[794,{"$raw":"00000000"},21115,"GC.3.642",null,3,"T",153,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6483,152.832]
[794,{"$raw":"00000000"},21115,"GC.3.642",null,3,"T",51,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6484,50.838]
[794,{"$raw":"00000000"},21102,"GC.3.642",null,3,"T",3434,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6485,3434.456]
[794,{"$raw":"00000000"},21102,"GC.3.642",null,3,"T",18,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6486,18.190]
[794,{"$raw":"00000000"},21102,"GC.3.642",null,3,"T",308,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6487,307.706]
[795,{"$raw":"00000000"},21107,"GC.3.643",null,3,"T",101,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6488,100.994]
[795,{"$raw":"00000000"},21107,"GC.3.643",null,3,"T",110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6489,109.865]
[795,{"$raw":"00000000"},21107,"GC.3.643",null,3,"T",208,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6490,208.332]
[795,{"$raw":"00000000"},21102,"GC.3.643",null,3,"T",272,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6491,272.415]
[795,{"$raw":"00000000"},21102,"GC.3.643",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6492,7.537]
[795,{"$raw":"00000000"},21102,"GC.3.643",null,3,"T",88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6493,88.262]
[795,{"$raw":"00000000"},21102,"GC.3.643",null,3,"T",164,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6494,164.213]
[798,{"$raw":"00000000"},21107,"GC.3.646",null,3,"T",59,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6495,58.976]
[798,{"$raw":"00000000"},21107,"GC.3.646",null,3,"T",334,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6496,333.795]
[798,{"$raw":"00000000"},21107,"GC.3.646",null,3,"T",192,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6497,192.445]
[798,{"$raw":"00000000"},21102,"GC.3.646",null,3,"T",137,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6498,137.497]
[798,{"$raw":"00000000"},21102,"GC.3.646",null,3,"T",33,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6499,33.043]
[798,{"$raw":"00000000"},21102,"GC.3.646",null,3,"T",57,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6500,56.578]
[823,{"$raw":"00000000"},21119,"GC.3.667",null,3,"T",246,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6501,246.245]
[823,{"$raw":"00000000"},21119,"GC.3.667",null,3,"T",317,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6502,316.636]
[823,{"$raw":"00000000"},21115,"GC.3.667",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6503,41.214]
[823,{"$raw":"00000000"},21115,"GC.3.667",null,3,"T",199,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6504,198.941]
[826,{"$raw":"00000000"},21119,"GC.3.670",null,3,"T",320,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6505,320.246]
[826,{"$raw":"00000000"},21119,"GC.3.670",null,3,"T",2489,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6506,2489.024]
[828,{"$raw":"00000000"},21119,"GC.3.672",null,3,"T",61,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6507,61.321]
[828,{"$raw":"00000000"},21119,"GC.3.672",null,3,"T",122,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6508,121.867]
[828,{"$raw":"00000000"},21115,"GC.3.672",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6509,7.881]
[828,{"$raw":"00000000"},21115,"GC.3.672",null,3,"T",461,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6510,460.976]
[828,{"$raw":"00000000"},21115,"GC.3.672",null,3,"T",1217,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6511,1217.102]
[832,{"$raw":"00000000"},21115,"GC.3.676",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6512,15.681]
[832,{"$raw":"00000000"},21115,"GC.3.676",null,3,"T",156,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6513,156.093]
[832,{"$raw":"00000000"},21115,"GC.3.676",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6514,28.860]
[832,{"$raw":"00000000"},21115,"GC.3.676",null,3,"T",2392,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6515,2392.441]
[832,{"$raw":"00000000"},21107,"GC.3.676",null,3,"T",132,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6516,131.596]
[832,{"$raw":"00000000"},21107,"GC.3.676",null,3,"T",186,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6517,186.288]
[832,{"$raw":"00000000"},21107,"GC.3.676",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6518,11.036]
[832,{"$raw":"00000000"},21107,"GC.3.676",null,3,"T",445,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6519,444.949]
[835,{"$raw":"00000000"},21119,"GC.3.679",null,3,"T",76,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6520,75.500]
[835,{"$raw":"00000000"},21119,"GC.3.679",null,3,"T",27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6521,26.966]
[835,{"$raw":"00000000"},21107,"GC.3.679",null,3,"T",132,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6522,132.348]
[835,{"$raw":"00000000"},21107,"GC.3.679",null,3,"T",3377,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6523,3376.700]
[855,{"$raw":"00000000"},21119,"GC.3.697",null,3,"T",821,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6524,821.110]
[855,{"$raw":"00000000"},21119,"GC.3.697",null,3,"T",61,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6525,61.025]
[855,{"$raw":"00000000"},21119,"GC.3.697",null,3,"T",194,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6526,194.262]
[855,{"$raw":"00000000"},21119,"GC.3.697",null,3,"T",77,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6527,77.197]
[855,{"$raw":"00000000"},21119,"GC.3.697",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6528,3.137]
[855,{"$raw":"00000000"},21119,"GC.3.697",null,3,"T",18,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6529,18.202]
[855,{"$raw":"00000000"},21119,"GC.3.697",null,3,"T",341,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6530,341.309]
[855,{"$raw":"00000000"},21119,"GC.3.697",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6531,1.689]
[855,{"$raw":"00000000"},21119,"GC.3.697",null,3,"T",361,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6532,361.245]
[855,{"$raw":"00000000"},21107,"GC.3.697",null,3,"T",110,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6533,109.699]
[855,{"$raw":"00000000"},21107,"GC.3.697",null,3,"T",136,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6534,136.092]
[855,{"$raw":"00000000"},21107,"GC.3.697",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6535,17.496]
[855,{"$raw":"00000000"},21107,"GC.3.697",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6536,28.824]
[855,{"$raw":"00000000"},21107,"GC.3.697",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6537,6.315]
[855,{"$raw":"00000000"},21107,"GC.3.697",null,3,"T",339,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6538,338.982]
[855,{"$raw":"00000000"},21107,"GC.3.697",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6539,28.138]
[855,{"$raw":"00000000"},21107,"GC.3.697",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6540,39.420]
[907,{"$raw":"00000000"},21121,"GC.3.732",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6541,5.849]
[907,{"$raw":"00000000"},21121,"GC.3.732",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6542,84.611]
[907,{"$raw":"00000000"},21121,"GC.3.732",null,3,"T",411,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6543,411.283]
[907,{"$raw":"00000000"},21117,"GC.3.732",null,3,"T",168,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6544,168.026]
[907,{"$raw":"00000000"},21117,"GC.3.732",null,3,"T",415,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6545,414.911]
[907,{"$raw":"00000000"},21117,"GC.3.732",null,3,"T",305,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6546,305.122]
[932,{"$raw":"00000000"},21103,"GC.3.746",null,3,"T",605,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6547,605.194]
[932,{"$raw":"00000000"},21103,"GC.3.746",null,3,"T",311,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6548,310.817]
[932,{"$raw":"00000000"},21103,"GC.3.746",null,3,"T",459,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6549,459.144]
[932,{"$raw":"00000000"},21116,"GC.3.746",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6550,34.063]
[932,{"$raw":"00000000"},21116,"GC.3.746",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6551,4.158]
[1017,{"$raw":"00000000"},21121,"GC.3.814",null,3,"T",176,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6552,176.228]
[1017,{"$raw":"00000000"},21121,"GC.3.814",null,3,"T",585,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6553,585.248]
[1064,{"$raw":"00000000"},21116,"GC.3.845",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6554,85.316]
[1064,{"$raw":"00000000"},21116,"GC.3.845",null,3,"T",277,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6555,276.986]
[1064,{"$raw":"00000000"},21121,"GC.3.845",null,3,"T",36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6556,36.373]
[1064,{"$raw":"00000000"},21121,"GC.3.845",null,3,"T",1542,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6557,1542.489]
[1180,{"$raw":"00000000"},21115,"GC.3.944",null,3,"T",384,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6558,383.729]
[1180,{"$raw":"00000000"},21115,"GC.3.944",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6559,40.993]
[1180,{"$raw":"00000000"},21115,"GC.3.944",null,3,"T",150,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6560,150.245]
[1180,{"$raw":"00000000"},21115,"GC.3.944",null,3,"T",22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6561,22.258]
[1180,{"$raw":"00000000"},21102,"GC.3.944",null,3,"T",296,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6562,295.935]
[1180,{"$raw":"00000000"},21102,"GC.3.944",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6563,28.085]
[1180,{"$raw":"00000000"},21102,"GC.3.944",null,3,"T",256,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6564,256.414]
[1180,{"$raw":"00000000"},21102,"GC.3.944",null,3,"T",151,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6565,150.868]
[1181,{"$raw":"00000000"},21102,"GC.3.945",null,3,"T",600,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6566,600.458]
[1181,{"$raw":"00000000"},21102,"GC.3.945",null,3,"T",85,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6567,84.555]
[1214,{"$raw":"00000000"},21107,"GC.3.968",null,3,"T",222,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6568,222.071]
[1214,{"$raw":"00000000"},21107,"GC.3.968",null,3,"T",104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6569,103.533]
[1236,{"$raw":"00000000"},0,"GC.3.987",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6570,1.247]
[1236,{"$raw":"00000000"},0,"GC.3.987",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6571,0.284]
[1276,{"$raw":"00000000"},0,"GC.3.1022",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6572,4.692]
[1276,{"$raw":"00000000"},0,"GC.3.1022",null,3,"T",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6573,22.879]
[1277,{"$raw":"00000000"},0,"GC.3.1023",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6574,6.524]
[1277,{"$raw":"00000000"},0,"GC.3.1023",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6575,2.166]
[1278,{"$raw":"00000000"},0,"GC.3.1024",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6576,30.181]
[1278,{"$raw":"00000000"},0,"GC.3.1024",null,3,"T",29,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6577,28.694]
[1293,{"$raw":"00000000"},0,"GC.3.1039",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6578,2.627]
[1293,{"$raw":"00000000"},0,"GC.3.1039",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6579,7.269]
[1295,{"$raw":"00000000"},0,"GC.3.1041",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6580,0.753]
[1295,{"$raw":"00000000"},0,"GC.3.1041",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6581,5.671]
[1372,{"$raw":"00000000"},21102,"GC.3.1109",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6582,23.836]
[1372,{"$raw":"00000000"},21102,"GC.3.1109",null,3,"T",410,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6583,410.408]
[1372,{"$raw":"00000000"},21118,"GC.3.1109",null,3,"T",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6584,94.940]
[1372,{"$raw":"00000000"},21118,"GC.3.1109",null,3,"T",197,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6585,197.182]
[1940,{"$raw":"00000000"},21111,"GC.3.1611",null,3,"T",76,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6586,76.165]
[1940,{"$raw":"00000000"},21111,"GC.3.1611",null,3,"T",66,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6587,66.358]
[1947,{"$raw":"00000000"},21106,"GC.3.1618",null,3,"T",107,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6588,106.507]
[1947,{"$raw":"00000000"},21106,"GC.3.1618",null,3,"T",307,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6589,307.049]
[1947,{"$raw":"00000000"},21111,"GC.3.1618",null,3,"T",144,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6590,144.359]
[1947,{"$raw":"00000000"},21111,"GC.3.1618",null,3,"T",423,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6591,423.309]
[2089,{"$raw":"00000000"},21106,"GC.3.1749",null,3,"T",404,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6592,404.202]
[2089,{"$raw":"00000000"},21106,"GC.3.1749",null,3,"T",1085,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6593,1084.568]
[2098,{"$raw":"00000000"},0,"GC.3.1757",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6594,0.212]
[2098,{"$raw":"00000000"},0,"GC.3.1757",null,3,"T",54,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6595,53.621]
[2100,{"$raw":"00000000"},21106,"GC.3.1759",null,3,"T",147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6596,147.289]
[2100,{"$raw":"00000000"},21106,"GC.3.1759",null,3,"T",240,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6597,240.239]
[2463,{"$raw":"00000000"},21102,"GC.3.2068",null,3,"T",596,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6598,595.826]
[2463,{"$raw":"00000000"},21102,"GC.3.2068",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6599,4.556]
[2463,{"$raw":"00000000"},21102,"GC.3.2068",null,3,"T",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6600,22.529]
[2463,{"$raw":"00000000"},21102,"GC.3.2068",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6601,16.426]
[2463,{"$raw":"00000000"},21106,"GC.3.2068",null,3,"T",1477,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6602,1476.657]
[2463,{"$raw":"00000000"},21106,"GC.3.2068",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6603,17.367]
[2463,{"$raw":"00000000"},21106,"GC.3.2068",null,3,"T",34,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6604,33.678]
[2463,{"$raw":"00000000"},21106,"GC.3.2068",null,3,"T",154,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6605,154.127]
[2526,{"$raw":"00000000"},21120,"GC.3.2126",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6606,7.415]
[2526,{"$raw":"00000000"},21120,"GC.3.2126",null,3,"T",1414,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6607,1414.102]
[2526,{"$raw":"00000000"},21106,"GC.3.2126",null,3,"T",37,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6608,37.040]
[2526,{"$raw":"00000000"},21106,"GC.3.2126",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6609,11.053]
[2549,{"$raw":"00000000"},21120,"GC.3.2148",null,3,"T",27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6610,26.918]
[2549,{"$raw":"00000000"},21120,"GC.3.2148",null,3,"T",114,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6611,114.358]
[2549,{"$raw":"00000000"},21106,"GC.3.2148",null,3,"T",481,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6612,481.425]
[2549,{"$raw":"00000000"},21106,"GC.3.2148",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6613,78.626]
[2549,{"$raw":"00000000"},21106,"GC.3.2148",null,3,"T",79,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6614,78.579]
[2639,{"$raw":"00000000"},21102,"GC.3.2233",null,3,"T",1045,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6615,1045.026]
[2639,{"$raw":"00000000"},21102,"GC.3.2233",null,3,"T",926,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6616,926.289]
[2667,{"$raw":"00000000"},21120,"GC.3.2259",null,3,"T",193,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6617,193.494]
[2667,{"$raw":"00000000"},21120,"GC.3.2259",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6618,8.267]
[2667,{"$raw":"00000000"},21102,"GC.3.2259",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6619,7.117]
[2667,{"$raw":"00000000"},21102,"GC.3.2259",null,3,"T",82,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6620,82.211]
[2667,{"$raw":"00000000"},21102,"GC.3.2259",null,3,"T",147,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6621,146.603]
[2667,{"$raw":"00000000"},21106,"GC.3.2259",null,3,"T",127,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6622,127.020]
[2667,{"$raw":"00000000"},21106,"GC.3.2259",null,3,"T",112,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6623,112.452]
[2667,{"$raw":"00000000"},21106,"GC.3.2259",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6624,0.864]
[2667,{"$raw":"00000000"},21106,"GC.3.2259",null,3,"T",55,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6625,54.676]
[2684,{"$raw":"00000000"},21120,"GC.3.2274",null,3,"T",1440,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6626,1439.870]
[2684,{"$raw":"00000000"},21120,"GC.3.2274",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6627,5.986]
[2684,{"$raw":"00000000"},21120,"GC.3.2274",null,3,"T",47,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6628,47.166]
[2684,{"$raw":"00000000"},21102,"GC.3.2274",null,3,"T",238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6629,238.125]
[2684,{"$raw":"00000000"},21102,"GC.3.2274",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6630,12.796]
[2684,{"$raw":"00000000"},21102,"GC.3.2274",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6631,98.024]
[2746,{"$raw":"00000000"},21118,"GC.3.2331",null,3,"T",279,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6632,279.372]
[2746,{"$raw":"00000000"},21118,"GC.3.2331",null,3,"T",412,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6633,412.086]
[2852,{"$raw":"00000000"},0,"GC.3.2415",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6634,3.602]
[2852,{"$raw":"00000000"},0,"GC.3.2415",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6635,41.250]
[2859,{"$raw":"00000000"},21122,"GC.3.2422",null,3,"T",78,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6636,78.009]
[2859,{"$raw":"00000000"},21122,"GC.3.2422",null,3,"T",743,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6637,743.420]
[2859,{"$raw":"00000000"},0,"GC.3.2422",null,3,"T",238,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6638,238.125]
[2859,{"$raw":"00000000"},0,"GC.3.2422",null,3,"T",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6639,59.873]
[3298,{"$raw":"00000000"},21102,"GC.3.2800",null,3,"T",241,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6640,240.647]
[3298,{"$raw":"00000000"},21102,"GC.3.2800",null,3,"T",21,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6641,20.808]
[3298,{"$raw":"00000000"},21102,"GC.3.2800",null,3,"T",201,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6642,201.438]
[3298,{"$raw":"00000000"},21102,"GC.3.2800",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6643,3.461]
[3298,{"$raw":"00000000"},21118,"GC.3.2800",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6644,15.964]
[3298,{"$raw":"00000000"},21118,"GC.3.2800",null,3,"T",113,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6645,113.438]
[3298,{"$raw":"00000000"},21118,"GC.3.2800",null,3,"T",192,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6646,191.666]
[3298,{"$raw":"00000000"},21118,"GC.3.2800",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6647,24.248]
[3342,{"$raw":"00000000"},21102,"GC.3.2842",null,3,"T",123,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6648,123.283]
[3342,{"$raw":"00000000"},21102,"GC.3.2842",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6649,2.628]
[3342,{"$raw":"00000000"},21102,"GC.3.2842",null,3,"T",103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6650,102.787]
[3342,{"$raw":"00000000"},21102,"GC.3.2842",null,3,"T",1861,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6651,1860.707]
[3342,{"$raw":"00000000"},21118,"GC.3.2842",null,3,"T",282,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6652,281.725]
[3342,{"$raw":"00000000"},21118,"GC.3.2842",null,3,"T",111,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6653,110.772]
[3342,{"$raw":"00000000"},21118,"GC.3.2842",null,3,"T",545,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6654,545.318]
[3450,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6655,19.529]
[3450,{"$raw":"00000000"},21106,"EM 532","OPER",2,"A",765,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6656,764.558]
[3523,{"$raw":"00000000"},21102,"GC.3.3009",null,3,"T",237,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6657,236.768]
[3523,{"$raw":"00000000"},21102,"GC.3.3009",null,3,"T",1128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6658,1128.225]
[3657,{"$raw":"00000000"},21118,"GC.3.3122",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6659,61.534]
[3657,{"$raw":"00000000"},21118,"GC.3.3122",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6660,10.184]
[3657,{"$raw":"00000000"},0,"GC.3.3122",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6661,39.010]
[3657,{"$raw":"00000000"},0,"GC.3.3122",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6662,17.059]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",496,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6663,496.256]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6664,15.456]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6665,19.465]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",160,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6666,160.039]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6667,4.288]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6668,36.402]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6669,0.489]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6670,5.186]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",129,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6671,129.001]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",32,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6672,32.398]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6673,23.607]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6674,19.122]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6675,7.635]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",470,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6676,470.196]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6677,23.501]
[3697,{"$raw":"00000000"},21120,"GC.3.3150",null,3,"T",128,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6678,127.659]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6679,8.456]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6680,3.522]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",289,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6681,288.660]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6682,16.395]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6683,21.818]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6684,10.968]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6685,4.742]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",89,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6686,89.294]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",265,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6687,265.071]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",443,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6688,443.115]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6689,9.596]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6690,17.249]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6691,29.879]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6692,1.561]
[3697,{"$raw":"00000000"},21102,"GC.3.3150",null,3,"T",22,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6693,21.621]
[3719,{"$raw":"00000000"},21107,"GC.3.3167",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6694,24.078]
[3719,{"$raw":"00000000"},21107,"GC.3.3167",null,3,"T",95,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6695,95.498]
[3790,{"$raw":"00000000"},21103,"GC.3.3225",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6696,29.572]
[3790,{"$raw":"00000000"},21103,"GC.3.3225",null,3,"T",13,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6697,13.277]
[3790,{"$raw":"00000000"},21103,"GC.3.3225",null,3,"T",170,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6698,170.076]
[3790,{"$raw":"00000000"},21119,"GC.3.3225",null,3,"T",42,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6699,41.562]
[3790,{"$raw":"00000000"},21119,"GC.3.3225",null,3,"T",12,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6700,11.729]
[3790,{"$raw":"00000000"},21119,"GC.3.3225",null,3,"T",44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6701,43.822]
[3897,{"$raw":"00000000"},21119,"GC.3.3328",null,3,"T",20,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6702,19.542]
[3897,{"$raw":"00000000"},21119,"GC.3.3328",null,3,"T",1252,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6703,1252.174]
[3897,{"$raw":"00000000"},21115,"GC.3.3328",null,3,"T",44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6704,43.559]
[3897,{"$raw":"00000000"},21115,"GC.3.3328",null,3,"T",14,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6705,13.907]
[3991,{"$raw":"00000000"},21121,"GC.3.3388",null,3,"T",75,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6706,74.741]
[3991,{"$raw":"00000000"},21121,"GC.3.3388",null,3,"T",103,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6707,103.077]
[3991,{"$raw":"00000000"},21121,"GC.3.3388",null,3,"T",4039,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6708,4038.676]
[3991,{"$raw":"00000000"},0,"GC.3.3388",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6709,0.134]
[3991,{"$raw":"00000000"},0,"GC.3.3388",null,3,"T",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6710,19.272]
[4004,{"$raw":"00000000"},0,"GC.3.3398",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6711,2.484]
[4004,{"$raw":"00000000"},0,"GC.3.3398",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6712,8.994]
[4080,{"$raw":"00000000"},21115,"GC.3.3450",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6713,41.077]
[4080,{"$raw":"00000000"},21115,"GC.3.3450",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6714,15.613]
[4080,{"$raw":"00000000"},21115,"GC.3.3450",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6715,61.641]
[4080,{"$raw":"00000000"},21115,"GC.3.3450",null,3,"T",139,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6716,138.620]
[4080,{"$raw":"00000000"},21120,"GC.3.3450",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6717,15.712]
[4080,{"$raw":"00000000"},21120,"GC.3.3450",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6718,188.564]
[4080,{"$raw":"00000000"},21120,"GC.3.3450",null,3,"T",16,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6719,15.997]
[4080,{"$raw":"00000000"},21120,"GC.3.3450",null,3,"T",301,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6720,300.841]
[4102,{"$raw":"00000000"},0,"GC.3.3461",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6721,3.929]
[4102,{"$raw":"00000000"},0,"GC.3.3461",null,3,"T",14,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6722,13.684]
[4105,{"$raw":"00000000"},0,"GC.3.3464",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6723,9.552]
[4105,{"$raw":"00000000"},0,"GC.3.3464",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6724,6.923]
[4107,{"$raw":"00000000"},0,"GC.3.3466",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6725,6.361]
[4107,{"$raw":"00000000"},0,"GC.3.3466",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6726,2.005]
[4115,{"$raw":"00000000"},21107,"GC.3.3473",null,3,"T",72,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6727,71.790]
[4115,{"$raw":"00000000"},21107,"GC.3.3473",null,3,"T",406,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6728,406.071]
[4115,{"$raw":"00000000"},0,"GC.3.3473",null,3,"T",17,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6729,17.096]
[4115,{"$raw":"00000000"},0,"GC.3.3473",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6730,3.779]
[4124,{"$raw":"00000000"},21122,"GC.3.3481",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6731,1.065]
[4124,{"$raw":"00000000"},21122,"GC.3.3481",null,3,"T",104,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6732,103.871]
[4124,{"$raw":"00000000"},0,"GC.3.3481",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6733,97.827]
[4124,{"$raw":"00000000"},0,"GC.3.3481",null,3,"T",71,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6734,70.739]
[4124,{"$raw":"00000000"},0,"GC.3.3481",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6735,2.844]
[4245,{"$raw":"00000000"},21111,"GC.3.3580",null,3,"T",23,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6736,22.764]
[4245,{"$raw":"00000000"},21111,"GC.3.3580",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6737,24.182]
[4245,{"$raw":"00000000"},0,"GC.3.3580",null,3,"T",31,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6738,31.378]
[4245,{"$raw":"00000000"},0,"GC.3.3580",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6739,9.897]
[4633,{"$raw":"00000000"},0,"GC.3.3915",null,3,"T",48,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6740,48.447]
[4633,{"$raw":"00000000"},0,"GC.3.3915",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6741,4.370]
[4641,{"$raw":"00000000"},0,"GC.3.3922",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6742,1.043]
[4641,{"$raw":"00000000"},0,"GC.3.3922",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6743,0.142]
[4799,{"$raw":"00000000"},21102,"GC.3.4055",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6744,1.522]
[4799,{"$raw":"00000000"},21102,"GC.3.4055",null,3,"T",1353,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6745,1352.746]
[4850,{"$raw":"00000000"},21107,"GC.3.4092",null,3,"T",24,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6746,24.081]
[4850,{"$raw":"00000000"},21107,"GC.3.4092",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6747,8.933]
[4850,{"$raw":"00000000"},21102,"GC.3.4092",null,3,"T",26,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6749,25.559]
[4877,{"$raw":"00000000"},21115,"GC.3.4113",null,3,"T",59,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6750,59.005]
[4877,{"$raw":"00000000"},21115,"GC.3.4113",null,3,"T",14,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6751,14.149]
[4877,{"$raw":"00000000"},21120,"GC.3.4113",null,3,"T",164,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6752,164.480]
[4877,{"$raw":"00000000"},21120,"GC.3.4113",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6753,91.601]
[4877,{"$raw":"00000000"},21120,"GC.3.4113",null,3,"T",322,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6754,321.939]
[4877,{"$raw":"00000000"},21120,"GC.3.4113",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6755,0.310]
[4877,{"$raw":"00000000"},21102,"GC.3.4113",null,3,"T",45,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6756,44.634]
[4877,{"$raw":"00000000"},21102,"GC.3.4113",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6757,3.789]
[4877,{"$raw":"00000000"},21102,"GC.3.4113",null,3,"T",196,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6758,196.049]
[4901,{"$raw":"00000000"},0,"GC.3.4134",null,3,"T",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6759,0.196]
[4901,{"$raw":"00000000"},0,"GC.3.4134",null,3,"T",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6760,59.547]
[4902,{"$raw":"00000000"},0,"GC.3.4135",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6761,1.137]
[4902,{"$raw":"00000000"},0,"GC.3.4135",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6762,4.429]
[4930,{"$raw":"00000000"},0,"GC.3.4158",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6763,2.699]
[4930,{"$raw":"00000000"},0,"GC.3.4158",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6764,41.351]
[4983,{"$raw":"00000000"},0,"GC.3.4201",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6765,3.080]
[4983,{"$raw":"00000000"},0,"GC.3.4201",null,3,"T",173,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6766,172.580]
[4984,{"$raw":"00000000"},0,"GC.3.4202",null,3,"T",18,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6767,18.391]
[4984,{"$raw":"00000000"},0,"GC.3.4202",null,3,"T",37,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6768,36.686]
[4985,{"$raw":"00000000"},0,"GC.3.4203",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6769,53.077]
[4985,{"$raw":"00000000"},0,"GC.3.4203",null,3,"T",115,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6770,114.590]
[4986,{"$raw":"00000000"},0,"GC.3.4204",null,3,"T",92,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6771,92.141]
[4986,{"$raw":"00000000"},0,"GC.3.4204",null,3,"T",43,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6772,43.243]
[4987,{"$raw":"00000000"},21103,"GC.3.4205",null,3,"T",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6773,18.765]
[4987,{"$raw":"00000000"},21103,"GC.3.4205",null,3,"T",41,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6774,40.828]
[4987,{"$raw":"00000000"},0,"GC.3.4205",null,3,"T",70,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6775,69.733]
[4987,{"$raw":"00000000"},0,"GC.3.4205",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6776,5.151]
[4987,{"$raw":"00000000"},0,"GC.3.4205",null,3,"T",58,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6777,58.474]
[4989,{"$raw":"00000000"},21103,"GC.3.4207",null,3,"T",37,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6778,37.376]
[4989,{"$raw":"00000000"},21103,"GC.3.4207",null,3,"T",28,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6779,28.440]
[4989,{"$raw":"00000000"},21103,"GC.3.4207",null,3,"T",108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6780,108.309]
[4989,{"$raw":"00000000"},0,"GC.3.4207",null,3,"T",127,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6781,127.470]
[4989,{"$raw":"00000000"},0,"GC.3.4207",null,3,"T",38,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6782,37.505]
[4990,{"$raw":"00000000"},0,"GC.3.4208",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6783,4.586]
[4990,{"$raw":"00000000"},0,"GC.3.4208",null,3,"T",7,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6784,6.851]
[4994,{"$raw":"00000000"},0,"GC.3.4212",null,3,"T",35,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6785,35.391]
[4994,{"$raw":"00000000"},0,"GC.3.4212",null,3,"T",53,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6786,52.835]
[4995,{"$raw":"00000000"},0,"GC.3.4213",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6787,4.912]
[4995,{"$raw":"00000000"},0,"GC.3.4213",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6788,1.810]
[5022,{"$raw":"00000000"},21120,"GC.3.4232",null,3,"T",27,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6789,27.311]
[5022,{"$raw":"00000000"},21120,"GC.3.4232",null,3,"T",213,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6790,213.370]
[5022,{"$raw":"00000000"},21102,"GC.3.4232",null,3,"T",60,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6791,59.629]
[5022,{"$raw":"00000000"},21102,"GC.3.4232",null,3,"T",36,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6792,36.440]
[5185,{"$raw":"00000000"},21120,"GC.3.4381",null,3,"T",262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6793,262.041]
[5185,{"$raw":"00000000"},21120,"GC.3.4381",null,3,"T",189,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6794,189.268]
[5185,{"$raw":"00000000"},21120,"GC.3.4381",null,3,"T",341,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6795,341.422]
[5185,{"$raw":"00000000"},21102,"GC.3.4381",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6796,29.743]
[5185,{"$raw":"00000000"},21102,"GC.3.4381",null,3,"T",6,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6797,6.395]
[5185,{"$raw":"00000000"},21102,"GC.3.4381",null,3,"T",458,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6798,457.932]
[31,{"$raw":"00000000"},0,"EM 541","OPER",2,"A",0,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,null,"Grândola-Cercal","EM",6799,0.029]
[31,{"$raw":"00000000"},0,"EM 541","OPER",2,"A",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,null,"Grândola-Cercal","EM",6800,1.920]
[688,{"$raw":"00000000"},21115,"GC.3.4564",null,3,"T",158,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6801,157.760]
[688,{"$raw":"00000000"},21115,"GC.3.4564",null,3,"T",156,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6802,156.277]
[688,{"$raw":"00000000"},21120,"GC.3.4564",null,3,"T",3,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6803,2.719]
[688,{"$raw":"00000000"},21120,"GC.3.4564",null,3,"T",129,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6804,128.667]
[688,{"$raw":"00000000"},21120,"GC.3.4564",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6805,2.446]
[656,{"$raw":"00000000"},21116,"GC.3.4596",null,3,"T",2108,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6806,2107.503]
[656,{"$raw":"00000000"},21116,"GC.3.4596",null,3,"T",32,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6807,32.189]
[656,{"$raw":"00000000"},21116,"GC.3.4596",null,3,"T",167,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6808,167.142]
[656,{"$raw":"00000000"},21121,"GC.3.4596",null,3,"T",1190,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6809,1190.287]
[656,{"$raw":"00000000"},21121,"GC.3.4596",null,3,"T",163,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6810,162.784]
[656,{"$raw":"00000000"},21121,"GC.3.4596",null,3,"T",88,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6811,88.055]
[656,{"$raw":"00000000"},21121,"GC.3.4596",null,3,"T",19,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6812,19.233]
[3994,{"$raw":"00000000"},21121,"GC.3.4617",null,3,"T",2,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6813,1.850]
[3994,{"$raw":"00000000"},21121,"GC.3.4617",null,3,"T",114,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6814,113.878]
[3994,{"$raw":"00000000"},21121,"GC.3.4617",null,3,"T",1,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6815,0.919]
[3994,{"$raw":"00000000"},0,"GC.3.4617",null,3,"T",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6816,5.349]
[3994,{"$raw":"00000000"},0,"GC.3.4617",null,3,"T",11,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,null,"Grândola-Cercal","RVF",6817,11.013]
[36,{"$raw":"00000000"},21119,"ER 266","OPER",1,"A",1904,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6818,1904.480]
[36,{"$raw":"00000000"},21119,"ER 266","OPER",1,"A",264,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6819,263.579]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",52,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6820,52.226]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",341,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6821,341.184]
[429,{"$raw":"00000000"},21103,"GC.3.4757",null,3,"T",651,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6822,651.331]
[429,{"$raw":"00000000"},21103,"GC.3.4757",null,3,"T",130,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6823,130.067]
[429,{"$raw":"00000000"},21103,"GC.3.4757",null,3,"T",98,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6824,97.889]
[429,{"$raw":"00000000"},21103,"GC.3.4757",null,3,"T",4,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6825,3.582]
[429,{"$raw":"00000000"},21103,"GC.3.4757",null,3,"T",601,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6826,600.676]
[429,{"$raw":"00000000"},21103,"GC.3.4757",null,3,"T",112,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6827,112.312]
[429,{"$raw":"00000000"},21121,"GC.3.4757",null,3,"T",170,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6828,169.828]
[429,{"$raw":"00000000"},21121,"GC.3.4757",null,3,"T",52,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6829,52.158]
[429,{"$raw":"00000000"},21121,"GC.3.4757",null,3,"T",14,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6830,13.548]
[429,{"$raw":"00000000"},21121,"GC.3.4757",null,3,"T",39,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6831,39.273]
[429,{"$raw":"00000000"},21121,"GC.3.4757",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6832,9.320]
[429,{"$raw":"00000000"},21121,"GC.3.4757",null,3,"T",122,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6833,122.406]
[614,{"$raw":"00000000"},21115,"GC.3.4783",null,3,"T",15,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6834,15.492]
[614,{"$raw":"00000000"},21115,"GC.3.4783",null,3,"T",471,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6835,471.005]
[614,{"$raw":"00000000"},21115,"GC.3.4783",null,3,"T",336,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6836,336.267]
[614,{"$raw":"00000000"},21115,"GC.3.4783",null,3,"T",9,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6837,9.061]
[614,{"$raw":"00000000"},21120,"GC.3.4783",null,3,"T",984,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6838,983.595]
[614,{"$raw":"00000000"},21120,"GC.3.4783",null,3,"T",156,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6839,156.086]
[614,{"$raw":"00000000"},21120,"GC.3.4783",null,3,"T",62,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6840,62.264]
[908,{"$raw":"00000000"},21121,"GC.3.4808",null,3,"T",139,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6841,139.430]
[908,{"$raw":"00000000"},21121,"GC.3.4808",null,3,"T",10,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6842,10.309]
[908,{"$raw":"00000000"},21121,"GC.3.4808",null,3,"T",309,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6843,308.976]
[908,{"$raw":"00000000"},21121,"GC.3.4808",null,3,"T",113,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6844,112.681]
[908,{"$raw":"00000000"},21121,"GC.3.4808",null,3,"T",208,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6845,207.964]
[908,{"$raw":"00000000"},21117,"GC.3.4808",null,3,"T",8,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6846,7.723]
[908,{"$raw":"00000000"},21117,"GC.3.4808",null,3,"T",25,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6847,25.374]
[908,{"$raw":"00000000"},21117,"GC.3.4808",null,3,"T",31,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6848,30.515]
[908,{"$raw":"00000000"},21117,"GC.3.4808",null,3,"T",57,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6849,57.343]
[18,{"$raw":"00000000"},21119,"CM 1162-2","OPER",2,null,1143,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6850,1143.245]
[18,{"$raw":"00000000"},21119,"CM 1162-2","OPER",2,null,174,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6851,173.815]
[4035,{"$raw":"00000000"},21103,"GC.3.5057",null,3,"T",30,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6852,29.702]
[4035,{"$raw":"00000000"},21103,"GC.3.5057",null,3,"T",83,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6853,83.422]
[4035,{"$raw":"00000000"},21119,"GC.3.5057",null,3,"T",61,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6854,61.242]
[4035,{"$raw":"00000000"},21119,"GC.3.5057",null,3,"T",1148,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6855,1148.052]
[18,{"$raw":"00000000"},21103,"CM 1162-2","OPER",2,null,262,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6856,261.585]
[18,{"$raw":"00000000"},21103,"CM 1162-2","OPER",2,null,260,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6857,259.885]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",453,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6858,453.175]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",44,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6859,43.836]
[36,{"$raw":"00000000"},21103,"ER 266","OPER",1,"A",212,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6860,211.677]
[36,{"$raw":"00000000"},21119,"ER 266","OPER",1,"A",454,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6861,454.482]
[36,{"$raw":"00000000"},21119,"ER 266","OPER",1,"A",188,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6862,188.224]
[36,{"$raw":"00000000"},21119,"ER 266","OPER",1,"A",1828,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VTGC/ VTTF/ VTTR",null,null,"ODEMIRA","Grândola-Cercal","ER",6863,1828.374]
[18,{"$raw":"00000000"},21103,"CM 1162-2","OPER",2,null,852,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6864,852.377]
[18,{"$raw":"00000000"},21103,"CM 1162-2","OPER",2,null,136,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6865,135.710]
[18,{"$raw":"00000000"},21119,"CM 1162-2","OPER",2,null,93,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6866,93.463]
[18,{"$raw":"00000000"},21119,"CM 1162-2","OPER",2,null,318,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","CM",6867,317.884]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",5,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6868,4.631]
[24,{"$raw":"00000000"},21121,"EM 393-1","OPER",2,"A",456,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VFCI/ VRCI",null,null,"ODEMIRA","Grândola-Cercal","EM",6869,456.011]
[669,{"$raw":"00000000"},21116,"GC.3.534",null,3,"T",535,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,"Boavista dos Pinheiros","ODEMIRA","Grândola-Cercal","RVF",494,535.270]
[4850,{"$raw":"00000000"},21102,"GC.3.4092",null,3,"T",863,0.00,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"ESI",0,0,0,"VLCI",null,null,"ODEMIRA","Grândola-Cercal","RVF",6748,863.424]