{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":8,"decimals":0},{"name":"NOME","type":"character","width":16},{"name":"OBSERV","type":"character","width":16},{"name":"OPERAC","type":"character","width":16},{"name":"SINALIZ","type":"character","width":14},{"name":"DESIGNAçãO","type":"character","width":30},{"name":"COD_INE","type":"character","width":16},{"name":"DATA_ACTLZ","type":"character","width":16},{"name":"CLASSE_PA","type":"character","width":16},{"name":"COORD_X","type":"number","width":10,"decimals":3},{"name":"COORD_Y","type":"number","width":10,"decimals":3},{"name":"TIPO_PA","type":"number","width":3,"decimals":0},{"name":"TIPO_PROP","type":"character","width":3},{"name":"FORMATO","type":"number","width":1,"decimals":0},{"name":"LARGURA","type":"number","width":10,"decimals":3},{"name":"COMPRIM","type":"number","width":10,"decimals":3},{"name":"ALTURA","type":"number","width":10,"decimals":3},{"name":"RAIO","type":"number","width":10,"decimals":3},{"name":"VOL_MAX","type":"number","width":10,"decimals":3},{"name":"CAPTACAO","type":"number","width":1,"decimals":0},{"name":"TIPO_VIA","type":"character","width":2},{"name":"COD_SINAL","type":"character","width":20},{"name":"CATEGORIA","type":"number","width":16,"decimals":0},{"name":"INTER_2015","type":"character","width":16},{"name":"INTER_2016","type":"character","width":16},{"name":"INTER_2017","type":"character","width":16},{"name":"INTER_2018","type":"character","width":16},{"name":"INTER_2019","type":"character","width":16},{"name":"EXEC_2015","type":"number","width":16,"decimals":0},{"name":"EXEC_2016","type":"number","width":16,"decimals":0},{"name":"EXEC_2017","type":"number","width":16,"decimals":0},{"name":"EXEC_2018","type":"number","width":16,"decimals":0},{"name":"EXEC_2019","type":"number","width":16,"decimals":0},{"name":"FIN_2015","type":"number","width":16,"decimals":0},{"name":"FIN_2016","type":"number","width":16,"decimals":0},{"name":"FIN_2017","type":"number","width":16,"decimals":0},{"name":"FIN_2018","type":"number","width":16,"decimals":0},{"name":"FIN_2019","type":"number","width":16,"decimals":0},{"name":"FASE_2015","type":"number","width":16,"decimals":0},{"name":"FASE_2016","type":"number","width":16,"decimals":0},{"name":"FASE_2017","type":"number","width":16,"decimals":0},{"name":"FASE_2018","type":"number","width":16,"decimals":0},{"name":"FASE_2019","type":"number","width":16,"decimals":0}],"n_rows":14,"rows_kept":14,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[1,"SF_Bidueiro","Com agua+vegetac","1","OT","OUTROS","61704","2014","T",194259.000,361820.000,115,"PUB",2,12.000,7.000,2.000,0.000,168.000,1,"3","PRS.OT.M2.007",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[2,"CG_Olho Marinho","Com agua","1","TQ","TANQUE DE REGA","61704","2014","T",195207.873,359321.258,114,"PRI",2,0.000,0.000,0.000,0.000,50.000,2,"3","PRS.TQ.T2.009",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[3,"Piscinas Fraga","C /agua","2","PI","PISCINAS","61704","2014","M",192603.000,361112.000,113,"PRI",2,9.000,18.000,2.000,0.000,324.000,2,"3","PRS.PI.M2.010",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[4,"Ponte de Mucela","Com agua","1","RI","RIO","61702","2014","T",194450.720,364750.410,222,"PUB",4,0.000,0.000,0.000,0.000,576.000,2,"3","PRS.RI.T2.005",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[5,"Rio Alva","Com agua","1","RI","RIO","61702","2014","M",194734.170,364534.290,222,"PUB",4,0.000,0.000,0.000,0.000,462.000,2,"3","PRS.RI.M2.004",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[6,"Rio Mondego","Com agua","1","RI","RIO","61701","2014","A",186908.990,363248.440,222,"PUB",4,0.000,0.000,0.000,0.000,900.000,2,"3","PRS.RI.A2.001",1,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[7,"Terreiros/Carval","Com agua","1","RS","TANQUE","61701","2014","M",184966.200,361031.280,111,"PUB",2,3.000,7.000,2.500,0.000,52.000,2,"1","PRS.RS.M2.002",2,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,2,4,0,0,0,0]
[8,"VN Poiares","Com agua","1","PI","PISCINA","61703","2014","T",189150.000,360191.000,113,"PRI",2,6.190,13.190,1.800,0.000,147.000,2,"3","PRS.PI.T2.006",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[9,"Venda Nova","Com agua","1","CH","CHARCA","61704","2014","M",192250.000,362963.000,214,"PUB",2,20.000,30.000,3.000,0.000,1800.000,2,"2","PRS.CH.M1.008",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[10,"Cômoras2","S/agua+vegetac","6","RS","RESERVATÓRIO","61701","2014","M",185109.000,361710.000,311,"PRI",2,8.000,14.000,1.900,0.000,213.000,2,"1","PRS.RS.M2.003",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[12,"Medas","Com agua+vegetac","1","TQ","TANQUE DE REGA","61704","2014","T",192656.000,361884.000,114,"PRI",2,0.000,0.000,0.000,0.000,60.600,2,"3","PRS.TQ.T2.012",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[13,"Cômoras/VG","Com agua","1","RP","RESERVATÓRIO","61704","2014","T",185109.419,361709.571,310,"PUB",2,5.000,5.000,3.000,0.000,75.000,2,"3","PRS.RP.T2.013",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[14,"Cabouco","Com agua","1","TQ","TANQUE DE REGA","61703","2014","T",190123.351,360501.834,114,"PRI",2,5.000,10.000,3.000,0.000,150.000,2,"2","PRS.CH.T2.015",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]
[15,"Z INDUSTRIAL","Com agua","6","CH","CHARCA","61704","2014","A",191135.573,360695.564,214,"PUB",3,0.000,0.000,0.000,0.000,2038.400,2,"2","PRS.RI.A2.016",2,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0]