{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"Validado","type":"character","width":50},{"name":"Classifica","type":"character","width":50},{"name":"Design_Cla","type":"character","width":50},{"name":"Design_Arr","type":"character","width":50},{"name":"Observaçõe","type":"character","width":50},{"name":"Confirmado","type":"character","width":50},{"name":"Tipo_Arrua","type":"character","width":10},{"name":"Entidade_R","type":"character","width":100},{"name":"Cod_DTCCFR","type":"character","width":6},{"name":"COUNT","type":"number","width":5,"decimals":0},{"name":"DTCCFR2","type":"character","width":50},{"name":"Arruamento","type":"character","width":75},{"name":"Cod_Troço","type":"number","width":10,"decimals":0},{"name":"ID_RV","type":"number","width":5,"decimals":0},{"name":"DATA_ACCAO","type":"date","width":8},{"name":"COD_INE","type":"character","width":6},{"name":"DESIGNACAO","type":"character","width":75},{"name":"OPERAC","type":"character","width":4},{"name":"REDE_DFCI","type":"number","width":5,"decimals":0},{"name":"TIPO_PISO","type":"character","width":1},{"name":"COMPRIM","type":"number","width":24,"decimals":5},{"name":"LARGURA","type":"number","width":24,"decimals":5},{"name":"INTER_2013","type":"character","width":3},{"name":"INTER_2014","type":"character","width":3},{"name":"INTER_2015","type":"character","width":3},{"name":"INTER_2016","type":"character","width":3},{"name":"INTER_2017","type":"character","width":3},{"name":"EXEC_2013","type":"number","width":5,"decimals":0},{"name":"EXEC_2014","type":"number","width":5,"decimals":0},{"name":"EXEC_2015","type":"number","width":5,"decimals":0},{"name":"EXEC_2016","type":"number","width":5,"decimals":0},{"name":"EXEC_2017","type":"number","width":5,"decimals":0},{"name":"FIN_2013","type":"number","width":5,"decimals":0},{"name":"FIN_2014","type":"number","width":5,"decimals":0},{"name":"FIN_2015","type":"number","width":5,"decimals":0},{"name":"FIN_2016","type":"number","width":5,"decimals":0},{"name":"FIN_2017","type":"number","width":5,"decimals":0},{"name":"FASE_2013","type":"number","width":5,"decimals":0},{"name":"FASE_2014","type":"number","width":5,"decimals":0},{"name":"FASE_2015","type":"number","width":5,"decimals":0},{"name":"FASE_2016","type":"number","width":5,"decimals":0},{"name":"FASE_2017","type":"number","width":5,"decimals":0},{"name":"TIPO_VEICU","type":"character","width":4},{"name":"OBSERV","type":"character","width":254}],"n_rows":10878,"rows_kept":10878,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",1,1,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",92.39593,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",2,2,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",81.95431,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","IC","2","2",null,null,"IC",null,null,0,null,"IC 2",3,3,{"$raw":"00000000"},null,"IC 2",null,1,"A",47.49219,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4,4,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.62225,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5,5,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,71.43827,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6,6,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,152.57977,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7,7,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,95.77131,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",8,8,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",61.61420,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,null,0,null,"EN 1-5",9,9,{"$raw":"00000000"},null,"EN 1-5",null,1,"A",41.19371,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",10,10,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",157.32014,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",11,11,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",9.56169,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",12,12,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",134.51674,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",13,13,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",440.78464,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","EN","115-1","DA ASCENSÃO","processo 03/2011/110, SGD 6372, 20 jul 2011","22 nov 2011","R",null,"110405",1,null,"R DA ASCENSÃO",14,14,{"$raw":"00000000"},"110405","R DA ASCENSÃO","OPER",1,"A",87.45191,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,15,15,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,16,16,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,40.35111,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,17,17,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.46532,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,18,18,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,96.78244,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,19,19,{"$raw":"00000000"},"110403","MJ.3.1","INOP",3,"T",122.41316,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,20,20,{"$raw":"00000000"},"110403","MJ.3.2","INOP",3,"T",7.23053,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,21,21,{"$raw":"00000000"},"110405","MJ.2.1","OPER",2,"A",48.80446,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,22,22,{"$raw":"00000000"},"110405","MJ.2.2","OPER",2,"A",61.23847,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,23,23,{"$raw":"00000000"},"110405","MJ.2.3","OPER",2,"A",109.18798,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,24,24,{"$raw":"00000000"},"110405","MJ.2.4","OPER",2,"A",122.92633,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,25,25,{"$raw":"00000000"},"110405","MJ.2.5","OPER",2,"A",2.81007,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,26,26,{"$raw":"00000000"},"110405","MJ.2.6","OPER",2,"A",21.79158,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,27,27,{"$raw":"00000000"},"110405","MJ.2.7","OPER",2,"A",13.33148,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,28,28,{"$raw":"00000000"},"110405","MJ.2.8","OPER",2,"A",31.21737,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,29,29,{"$raw":"00000000"},"110405","MJ.2.9","OPER",2,"A",77.09668,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,30,30,{"$raw":"00000000"},"110405","MJ.2.10","OPER",2,"A",27.02682,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",31,31,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",403.13881,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",32,32,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",180.65290,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",33,33,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",76.91951,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",34,34,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",102.20985,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",35,35,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",182.57622,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",36,36,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",357.25430,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",37,37,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",99.72874,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",38,38,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",336.36530,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","EN","115-1","DA ASCENSÃO","processo 03/2011/110","22 nov 2011","R",null,"110405",1,null,"R DA ASCENSÃO",39,39,{"$raw":"00000000"},"110405","R DA ASCENSÃO","OPER",1,"A",71.52819,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","CASAL VIMEIRO",null,null,"R",null,"110405",1,null,"R CASAL VIMEIRO",40,40,{"$raw":"00000000"},"110405","R CASAL VIMEIRO","OPER",2,"A",294.90546,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","IC","2","2",null,null,"IC",null,null,0,null,"IC 2",41,41,{"$raw":"00000000"},null,"IC 2",null,1,"A",360.93746,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,null,0,null,"EN 1-5",42,42,{"$raw":"00000000"},null,"EN 1-5",null,1,"A",223.02244,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CARLOS ANICETO",null,null,"R",null,"110403",1,null,"R CARLOS ANICETO",43,43,{"$raw":"00000000"},"110403","R CARLOS ANICETO","INOP",3,"T",267.02245,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",44,44,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",67.59360,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",45,45,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",223.73896,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",46,46,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",284.72072,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",47,47,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",149.30521,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","S PEDRO",null,null,"BR",null,"110409",1,null,"BR S PEDRO",48,48,{"$raw":"00000000"},"110409","BR S PEDRO","OPER",1,"A",24.10218,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,49,49,{"$raw":"00000000"},"110405","MJ.2.11","OPER",2,"A",35.66308,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,50,50,{"$raw":"00000000"},"110405","MJ.2.12","OPER",2,"A",1.44402,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,51,51,{"$raw":"00000000"},"110405","MJ.2.13","OPER",2,"A",19.14561,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,52,52,{"$raw":"00000000"},"110405","MJ.2.14","OPER",2,"A",49.94161,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,53,53,{"$raw":"00000000"},"110405","MJ.2.15","OPER",2,"A",27.97659,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,54,54,{"$raw":"00000000"},"110405","MJ.2.16","OPER",2,"A",32.94431,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,55,55,{"$raw":"00000000"},"110405","MJ.2.17","OPER",2,"A",16.24275,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,56,56,{"$raw":"00000000"},"110405","MJ.2.18","OPER",2,"A",114.76043,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,57,57,{"$raw":"00000000"},"110405","MJ.2.19","OPER",2,"A",20.12046,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,58,58,{"$raw":"00000000"},"110405","MJ.2.20","OPER",2,"A",64.95613,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,59,59,{"$raw":"00000000"},"110405","MJ.2.21","OPER",2,"A",139.26182,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,60,60,{"$raw":"00000000"},"110405","MJ.2.22","OPER",2,"A",34.61691,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,61,61,{"$raw":"00000000"},"110405","MJ.2.23","OPER",2,"A",152.64701,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,62,62,{"$raw":"00000000"},"110405","MJ.2.24","OPER",2,"A",26.65850,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,63,63,{"$raw":"00000000"},"110405","MJ.2.25","OPER",2,"A",158.77137,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,64,64,{"$raw":"00000000"},"110405","MJ.2.26","OPER",2,"A",72.68902,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,65,65,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,86.72624,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",66,66,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",860.48863,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",67,67,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",42.51155,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",68,68,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",58.97657,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",69,69,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",41.02908,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",70,70,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",34.09146,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",71,71,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",72.15598,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","VIA","SD",null,null,null,null,null,"110405",1,null,null,72,72,{"$raw":"00000000"},"110405","MJ.1.1","OPER",1,"A",497.03528,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,73,73,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,344.98750,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,74,74,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,195.37652,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,75,75,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,156.36945,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,76,76,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,190.87899,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,77,77,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,14.89304,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,78,78,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,159.21326,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,79,79,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,33.17702,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,80,80,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.02176,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,81,81,{"$raw":"00000000"},"110403","MJ.3.3","INOP",3,"A",4.65903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,82,82,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,139.36183,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,83,83,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,138.43359,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,84,84,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.45680,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,85,85,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.67823,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,86,86,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,39.03931,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,87,87,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.05610,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,88,88,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,66.61288,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,89,89,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,7.80675,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,90,90,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.09659,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,91,91,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.87282,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,92,92,{"$raw":"00000000"},"110403","MJ.3.4","INOP",3,"T",4.45220,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,93,93,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.69029,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,94,94,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.32182,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,95,95,{"$raw":"00000000"},"110403","MJ.1.2","OPER",1,"A",4.98061,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,96,96,{"$raw":"00000000"},"110403","MJ.3.5","INOP",3,"A",431.09948,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,97,97,{"$raw":"00000000"},"110403","MJ.3.6","INOP",3,"A",192.16702,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,98,98,{"$raw":"00000000"},"110405","MJ.3.7","INOP",3,"T",310.45988,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,99,99,{"$raw":"00000000"},"110405","MJ.3.8","INOP",3,"A",77.43414,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,100,100,{"$raw":"00000000"},"110405","MJ.3.9","INOP",3,"A",496.14166,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,101,101,{"$raw":"00000000"},"110405","MJ.3.10","INOP",3,"T",104.74168,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,102,102,{"$raw":"00000000"},"110405","MJ.3.11","INOP",3,"T",626.95390,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,103,103,{"$raw":"00000000"},"110405","MJ.3.12","INOP",3,"A",59.57320,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,104,104,{"$raw":"00000000"},"110405","MJ.3.13","INOP",3,"A",423.38065,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,105,105,{"$raw":"00000000"},"110405","MJ.3.14","INOP",3,"T",298.19706,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,106,106,{"$raw":"00000000"},"110405","MJ.3.15","INOP",3,"T",44.12778,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,107,107,{"$raw":"00000000"},"110405","MJ.3.16","INOP",3,"T",14.26485,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,108,108,{"$raw":"00000000"},"110405","MJ.2.27","OPER",2,"A",2.62275,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,109,109,{"$raw":"00000000"},"110405","MJ.3.17","INOP",3,"A",150.97189,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,110,110,{"$raw":"00000000"},"110403","MJ.3.18","INOP",3,"T",135.08832,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,111,111,{"$raw":"00000000"},"110405","MJ.3.19","INOP",3,"T",106.25834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,112,112,{"$raw":"00000000"},"110403","MJ.3.20","INOP",3,"T",94.28977,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,113,113,{"$raw":"00000000"},"110403","MJ.3.21","INOP",3,"T",251.21007,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,114,114,{"$raw":"00000000"},"110405","MJ.3.22","INOP",3,"T",21.25885,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,115,115,{"$raw":"00000000"},"110405","MJ.3.23","INOP",3,"T",67.36588,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,116,116,{"$raw":"00000000"},"110405","MJ.3.24","INOP",3,"A",42.62089,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,117,117,{"$raw":"00000000"},"110405","MJ.3.25","INOP",3,"T",180.49356,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,118,118,{"$raw":"00000000"},"110405","MJ.3.26","INOP",3,"T",626.62960,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,119,119,{"$raw":"00000000"},"110403","MJ.3.27","INOP",3,"A",360.75046,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,120,120,{"$raw":"00000000"},"110403","MJ.3.28","INOP",3,"T",222.93247,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS SALLES",null,null,"R",null,"110403",1,null,"R DOS SALLES",121,121,{"$raw":"00000000"},"110403","R DOS SALLES","INOP",3,"T",90.13936,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS SALES",null,null,"R",null,"110403",1,null,"R DOS SALES",122,122,{"$raw":"00000000"},"110403","R DOS SALES","INOP",3,"T",96.68316,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS SALES",null,null,"R",null,"110403",1,null,"R DOS SALES",123,123,{"$raw":"00000000"},"110403","R DOS SALES","INOP",3,"T",5.42726,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CARMOS",null,null,"R",null,"110403",1,null,"R DOS CARMOS",124,124,{"$raw":"00000000"},"110403","R DOS CARMOS","INOP",3,"T",129.92611,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,125,125,{"$raw":"00000000"},"110403","MJ.3.29","INOP",3,"T",43.97049,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,126,126,{"$raw":"00000000"},"110403","MJ.3.30","INOP",3,"T",3.97417,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,127,127,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.86122,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,128,128,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.55901,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,129,129,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,175.25395,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,130,130,{"$raw":"00000000"},"110403","MJ.3.31","INOP",3,"T",5.39189,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,131,131,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,173.07044,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,132,132,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.53600,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,133,133,{"$raw":"00000000"},"110403","MJ.1.3","OPER",1,"A",5.88045,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,134,134,{"$raw":"00000000"},"110403","MJ.3.32","INOP",3,"T",0.57140,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,135,135,{"$raw":"00000000"},"110403","MJ.3.33","INOP",3,"A",6.01896,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,136,136,{"$raw":"00000000"},"110403","MJ.3.34","INOP",3,"T",0.53226,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,137,137,{"$raw":"00000000"},"110403","MJ.3.35","INOP",3,"T",624.23025,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,138,138,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,84.69268,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,139,139,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.98609,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,140,140,{"$raw":"00000000"},"110403","MJ.3.36","INOP",3,"T",445.46269,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,141,141,{"$raw":"00000000"},"110403","MJ.3.37","INOP",3,"T",43.63398,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,142,142,{"$raw":"00000000"},"110403","MJ.3.38","INOP",3,"T",169.04483,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,143,143,{"$raw":"00000000"},"110403","MJ.3.39","INOP",3,"T",386.87590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,144,144,{"$raw":"00000000"},"110403","MJ.3.40","INOP",3,"A",143.52459,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,145,145,{"$raw":"00000000"},"110403","MJ.3.41","INOP",3,"T",264.88758,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,146,146,{"$raw":"00000000"},"110403","MJ.3.42","INOP",3,"T",113.95919,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,147,147,{"$raw":"00000000"},"110403","MJ.1.4","OPER",1,"A",6.31506,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,148,148,{"$raw":"00000000"},"110403","MJ.3.43","INOP",3,"T",186.75680,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,149,149,{"$raw":"00000000"},"110403","MJ.3.44","INOP",3,"A",246.96222,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,150,150,{"$raw":"00000000"},"110403","MJ.3.45","INOP",3,"T",1.49272,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,151,151,{"$raw":"00000000"},"110403","MJ.3.46","INOP",3,"A",288.71374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,152,152,{"$raw":"00000000"},"110403","MJ.3.47","INOP",3,"T",35.26115,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,153,153,{"$raw":"00000000"},"110403","MJ.3.48","INOP",3,"T",2.07714,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,154,154,{"$raw":"00000000"},"110403","MJ.3.49","INOP",3,"T",301.48765,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,155,155,{"$raw":"00000000"},"110403","MJ.3.50","INOP",3,"T",63.64364,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,156,156,{"$raw":"00000000"},"110403","MJ.1.5","OPER",1,"A",5.67565,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,157,157,{"$raw":"00000000"},"110403","MJ.3.51","INOP",3,"T",0.42755,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,158,158,{"$raw":"00000000"},"110403","MJ.3.52","INOP",3,"T",480.98232,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,159,159,{"$raw":"00000000"},"110403","MJ.3.53","INOP",3,"T",5.48454,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,160,160,{"$raw":"00000000"},"110403","MJ.3.54","INOP",3,"T",490.29172,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,161,161,{"$raw":"00000000"},"110403","MJ.3.55","INOP",3,"T",202.94844,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,162,162,{"$raw":"00000000"},"110403","MJ.2.28","OPER",2,"A",62.80547,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,163,163,{"$raw":"00000000"},"110403","MJ.2.29","OPER",2,"A",331.01065,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",164,164,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",24.22863,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,165,165,{"$raw":"00000000"},"110403","MJ.3.56","INOP",3,"A",3.83651,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,166,166,{"$raw":"00000000"},"110403","MJ.3.57","INOP",3,"A",6.23755,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,167,167,{"$raw":"00000000"},"110403","MJ.3.58","INOP",3,"A",2.97935,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,168,168,{"$raw":"00000000"},"110403","MJ.3.59","INOP",3,"A",575.86523,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,169,169,{"$raw":"00000000"},"110405","MJ.3.60","INOP",3,"T",698.64753,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,170,170,{"$raw":"00000000"},"110405","MJ.3.61","INOP",3,"T",231.71576,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,171,171,{"$raw":"00000000"},"110405","MJ.3.62","INOP",3,"T",499.14774,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,172,172,{"$raw":"00000000"},"110405","MJ.3.63","INOP",3,"T",486.11078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",173,173,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",328.78393,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",174,174,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",371.99657,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",175,175,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",756.68553,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",176,176,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",987.83582,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",177,177,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",381.17924,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1",null,null,"DOS CARMOS",null,null,"R",null,"110403",1,null,"R DOS CARMOS",178,178,{"$raw":"00000000"},"110403","R DOS CARMOS","INOP",3,"T",114.26096,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,179,179,{"$raw":"00000000"},"110405","MJ.3.64","INOP",3,"T",147.90025,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,180,180,{"$raw":"00000000"},"110405","MJ.3.65","INOP",3,"T",974.67364,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,181,181,{"$raw":"00000000"},"110405","MJ.3.66","INOP",3,"T",153.53093,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,182,182,{"$raw":"00000000"},"110405","MJ.3.67","INOP",3,"T",278.27262,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",183,183,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",294.51314,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",184,184,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",149.02807,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,185,185,{"$raw":"00000000"},"110405","MJ.3.68","INOP",3,"T",152.18127,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,186,186,{"$raw":"00000000"},"110405","MJ.3.69","INOP",3,"T",236.34503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,187,187,{"$raw":"00000000"},"110405","MJ.3.70","INOP",3,"T",37.96139,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,188,188,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,10.56304,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,189,189,{"$raw":"00000000"},"110405","MJ.1.6","OPER",1,"A",2.40052,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,190,190,{"$raw":"00000000"},"110405","MJ.1.7","OPER",1,"A",4.49623,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,191,191,{"$raw":"00000000"},"110405","MJ.3.71","INOP",3,"T",78.20905,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,192,192,{"$raw":"00000000"},"110405","MJ.3.72","INOP",3,"T",15.30797,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,193,193,{"$raw":"00000000"},"110403","MJ.3.73","INOP",3,"T",106.61613,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,194,194,{"$raw":"00000000"},"110405","MJ.3.74","INOP",3,"A",86.63057,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","VIA","SD",null,null,null,null,null,"110405",1,null,null,195,195,{"$raw":"00000000"},"110405","MJ.3.75","INOP",3,"T",203.75571,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,196,196,{"$raw":"00000000"},"110403","MJ.3.76","INOP",3,"T",711.43179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,197,197,{"$raw":"00000000"},"110403","MJ.3.77","INOP",3,"T",456.99458,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,198,198,{"$raw":"00000000"},"110403","MJ.3.78","INOP",3,"T",610.63469,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,199,199,{"$raw":"00000000"},"110403","MJ.3.79","INOP",3,"T",771.90604,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,200,200,{"$raw":"00000000"},"110403","MJ.3.80","INOP",3,"T",539.43956,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,201,201,{"$raw":"00000000"},"110403","MJ.3.81","INOP",3,"T",124.35036,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,202,202,{"$raw":"00000000"},"110403","MJ.3.82","INOP",3,"T",249.18539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,203,203,{"$raw":"00000000"},"110403","MJ.3.83","INOP",3,"A",213.04078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,204,204,{"$raw":"00000000"},"110403","MJ.3.84","INOP",3,"T",270.80371,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,205,205,{"$raw":"00000000"},"110403","MJ.3.85","INOP",3,"T",216.91014,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,206,206,{"$raw":"00000000"},"110403","MJ.3.86","INOP",3,"T",283.15393,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,207,207,{"$raw":"00000000"},"110403","MJ.3.87","INOP",3,"T",306.49380,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,208,208,{"$raw":"00000000"},"110403","MJ.3.88","INOP",3,"T",161.20171,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,209,209,{"$raw":"00000000"},"110403","MJ.3.89","INOP",3,"T",121.96778,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,210,210,{"$raw":"00000000"},"110403","MJ.3.90","INOP",3,"T",115.48301,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,211,211,{"$raw":"00000000"},"110403","MJ.3.91","INOP",3,"T",409.34958,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,212,212,{"$raw":"00000000"},"110403","MJ.3.92","INOP",3,"T",474.97985,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,213,213,{"$raw":"00000000"},"110403","MJ.2.30","OPER",2,"A",69.39004,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,214,214,{"$raw":"00000000"},"110403","MJ.3.93","INOP",3,"T",219.26867,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,215,215,{"$raw":"00000000"},"110403","MJ.3.94","INOP",3,"T",89.82776,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,216,216,{"$raw":"00000000"},"110403","MJ.3.95","INOP",3,"T",376.19918,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,217,217,{"$raw":"00000000"},"110403","MJ.2.31","OPER",2,"A",4.65146,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,218,218,{"$raw":"00000000"},"110405","MJ.3.96","INOP",3,"A",244.26179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,219,219,{"$raw":"00000000"},"110405","MJ.3.97","INOP",3,"T",7.87345,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,220,220,{"$raw":"00000000"},"110405","MJ.3.98","INOP",3,"A",126.09589,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,221,221,{"$raw":"00000000"},"110405","MJ.3.99","INOP",3,"A",99.42723,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,222,222,{"$raw":"00000000"},"110405","MJ.3.100","INOP",3,"A",4.61056,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,223,223,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,148.60243,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,224,224,{"$raw":"00000000"},"110405","MJ.3.101","INOP",3,"A",7.83924,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,225,225,{"$raw":"00000000"},"110405","MJ.3.102","INOP",3,"A",61.71273,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,226,226,{"$raw":"00000000"},"110405","MJ.3.103","INOP",3,"T",2.34676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,227,227,{"$raw":"00000000"},"110405","MJ.1.8","OPER",1,"A",2.58292,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,228,228,{"$raw":"00000000"},"110405","MJ.3.104","INOP",3,"T",51.42830,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,229,229,{"$raw":"00000000"},"110405","MJ.1.9","OPER",1,"A",2.67479,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,230,230,{"$raw":"00000000"},"110405","MJ.3.105","INOP",3,"T",169.90651,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,231,231,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.45660,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CARMOS",null,null,"R",null,"110403",1,null,"R DOS CARMOS",232,232,{"$raw":"00000000"},"110403","R DOS CARMOS","INOP",3,"T",56.21672,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,233,233,{"$raw":"00000000"},"110403","MJ.3.106","INOP",3,"T",9.10448,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CARMOS",null,null,"R",null,"110403",1,null,"R DOS CARMOS",234,234,{"$raw":"00000000"},"110403","R DOS CARMOS","INOP",3,"T",18.35949,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,235,235,{"$raw":"00000000"},"110403","MJ.3.107","INOP",3,"T",49.57151,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,236,236,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,391.83257,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,237,237,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.59825,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,238,238,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,436.82211,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,239,239,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,222.37123,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,240,240,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,129.21300,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,241,241,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,54.76301,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,242,242,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.69155,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,243,243,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.01178,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,244,244,{"$raw":"00000000"},"110403","MJ.3.108","INOP",3,"T",7.09493,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,245,245,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,228.12734,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,246,246,{"$raw":"00000000"},"110403","MJ.3.109","INOP",3,"T",6.36755,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,247,247,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.74330,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,248,248,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,93.71868,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,249,249,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,83.30266,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,250,250,{"$raw":"00000000"},"110403","MJ.3.110","INOP",3,"A",237.30477,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,251,251,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,434.45434,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,252,252,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,60.91622,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,253,253,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,235.66434,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,254,254,{"$raw":"00000000"},"110403","MJ.3.111","INOP",3,"T",439.57030,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,255,255,{"$raw":"00000000"},"110405","MJ.3.112","INOP",3,"A",277.38650,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,256,256,{"$raw":"00000000"},"110403","MJ.3.113","INOP",3,"A",30.27199,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,257,257,{"$raw":"00000000"},"110403","MJ.3.114","INOP",3,"T",1010.96080,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,258,258,{"$raw":"00000000"},"110403","MJ.3.115","INOP",3,"T",681.41803,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,259,259,{"$raw":"00000000"},"110403","MJ.3.116","INOP",3,"T",247.80128,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,260,260,{"$raw":"00000000"},"110405","MJ.3.117","INOP",3,"T",215.05306,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,261,261,{"$raw":"00000000"},"110405","MJ.3.118","INOP",3,"A",188.77964,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,262,262,{"$raw":"00000000"},"110405","MJ.1.10","OPER",1,"A",4.04665,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,263,263,{"$raw":"00000000"},"110405","MJ.3.119","INOP",3,"T",15.47179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,264,264,{"$raw":"00000000"},"110405","MJ.3.120","INOP",3,"T",2.37497,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,265,265,{"$raw":"00000000"},"110405","MJ.3.121","INOP",3,"A",54.56632,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,266,266,{"$raw":"00000000"},"110405","MJ.3.122","INOP",3,"A",58.02064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,267,267,{"$raw":"00000000"},"110405","MJ.3.123","INOP",3,"A",3.04869,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,268,268,{"$raw":"00000000"},"110405","MJ.3.124","INOP",3,"A",37.74870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,269,269,{"$raw":"00000000"},"110405","MJ.3.125","INOP",3,"A",46.41986,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,270,270,{"$raw":"00000000"},"110405","MJ.3.126","INOP",3,"A",118.80182,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,271,271,{"$raw":"00000000"},"110405","MJ.3.127","INOP",3,"A",27.29079,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,272,272,{"$raw":"00000000"},"110405","MJ.3.128","INOP",3,"A",147.26823,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,273,273,{"$raw":"00000000"},"110405","MJ.3.129","INOP",3,"T",41.68350,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,274,274,{"$raw":"00000000"},"110405","MJ.3.130","INOP",3,"T",278.87096,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,275,275,{"$raw":"00000000"},"110405","MJ.3.131","INOP",3,"T",12.14968,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,276,276,{"$raw":"00000000"},"110405","MJ.3.132","INOP",3,"T",199.09810,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,277,277,{"$raw":"00000000"},"110405","MJ.3.133","INOP",3,"A",10.32230,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,278,278,{"$raw":"00000000"},"110405","MJ.3.134","INOP",3,"T",143.17848,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,279,279,{"$raw":"00000000"},"110405","MJ.3.135","INOP",3,"T",540.41944,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,280,280,{"$raw":"00000000"},"110405","MJ.3.136","INOP",3,"A",232.96014,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,281,281,{"$raw":"00000000"},"110405","MJ.3.137","INOP",3,"T",53.10994,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,282,282,{"$raw":"00000000"},"110405","MJ.3.138","INOP",3,"T",531.64922,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,283,283,{"$raw":"00000000"},"110405","MJ.3.139","INOP",3,"T",187.90257,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,284,284,{"$raw":"00000000"},"110405","MJ.3.140","INOP",3,"A",652.61044,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,285,285,{"$raw":"00000000"},"110405","MJ.2.32","OPER",2,"A",253.30301,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,286,286,{"$raw":"00000000"},"110405","MJ.2.33","OPER",2,"A",329.62168,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,287,287,{"$raw":"00000000"},"110403","MJ.3.141","INOP",3,"A",474.29716,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,288,288,{"$raw":"00000000"},"110403","MJ.3.142","INOP",3,"T",116.77438,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",289,289,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",31.51630,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,290,290,{"$raw":"00000000"},"110403","MJ.3.143","INOP",3,"T",62.12138,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,291,291,{"$raw":"00000000"},"110403","MJ.3.144","INOP",3,"T",249.70838,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,292,292,{"$raw":"00000000"},"110403","MJ.3.145","INOP",3,"T",134.74761,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,293,293,{"$raw":"00000000"},"110403","MJ.3.146","INOP",3,"T",10.22433,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,294,294,{"$raw":"00000000"},"110403","MJ.3.147","INOP",3,"T",90.65527,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,295,295,{"$raw":"00000000"},"110403","MJ.3.148","INOP",3,"T",19.28347,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,296,296,{"$raw":"00000000"},"110403","MJ.3.149","INOP",3,"T",18.79856,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,297,297,{"$raw":"00000000"},"110403","MJ.3.150","INOP",3,"T",37.23644,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,298,298,{"$raw":"00000000"},"110403","MJ.3.151","INOP",3,"T",111.35713,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,299,299,{"$raw":"00000000"},"110403","MJ.3.152","INOP",3,"T",641.32083,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,300,300,{"$raw":"00000000"},"110403","MJ.3.153","INOP",3,"T",284.39822,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,301,301,{"$raw":"00000000"},"110403","MJ.3.154","INOP",3,"T",61.49518,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,302,302,{"$raw":"00000000"},"110403","MJ.3.155","INOP",3,"T",450.92178,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,303,303,{"$raw":"00000000"},"110403","MJ.3.156","INOP",3,"T",86.65073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,304,304,{"$raw":"00000000"},"110403","MJ.3.157","INOP",3,"T",134.61657,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,305,305,{"$raw":"00000000"},"110403","MJ.3.158","INOP",3,"T",322.13407,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,306,306,{"$raw":"00000000"},"110403","MJ.3.159","INOP",3,"T",7.74019,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,307,307,{"$raw":"00000000"},"110403","MJ.3.160","INOP",3,"T",391.11442,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,308,308,{"$raw":"00000000"},"110403","MJ.3.161","INOP",3,"T",6.84462,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,309,309,{"$raw":"00000000"},"110405","MJ.3.162","INOP",3,"A",330.09211,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,310,310,{"$raw":"00000000"},"110405","MJ.3.163","INOP",3,"T",146.01970,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,311,311,{"$raw":"00000000"},"110405","MJ.3.164","INOP",3,"A",85.96481,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,312,312,{"$raw":"00000000"},"110405","MJ.3.165","INOP",3,"A",206.31487,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,313,313,{"$raw":"00000000"},"110405","MJ.3.166","INOP",3,"T",376.22946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110405",1,null,null,314,314,{"$raw":"00000000"},"110405","MJ.3.167","INOP",3,"A",177.11465,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,315,315,{"$raw":"00000000"},"110405","MJ.3.168","INOP",3,"T",50.40639,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,316,316,{"$raw":"00000000"},"110405","MJ.3.169","INOP",3,"T",585.63049,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,317,317,{"$raw":"00000000"},"110405","MJ.3.170","INOP",3,"T",521.72326,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,318,318,{"$raw":"00000000"},"110405","MJ.3.171","INOP",3,"T",41.45702,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","DO MONTEJUNTO",null,null,"R",null,"110403",1,null,"R DO MONTEJUNTO",319,319,{"$raw":"00000000"},"110403","R DO MONTEJUNTO","OPER",1,"A",66.20280,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,320,320,{"$raw":"00000000"},"110403","MJ.3.172","INOP",3,"T",50.93191,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CARMOS",null,null,"R",null,"110403",1,null,"R DOS CARMOS",321,321,{"$raw":"00000000"},"110403","R DOS CARMOS","INOP",3,"T",45.10923,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","DO MONTEJUNTO",null,null,"R",null,null,0,null,"R DO MONTEJUNTO",322,322,{"$raw":"00000000"},null,"R DO MONTEJUNTO",null,2,"A",87.30766,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","DO MONTEJUNTO",null,null,"R",null,"110403",1,null,"R DO MONTEJUNTO",323,323,{"$raw":"00000000"},"110403","R DO MONTEJUNTO","OPER",1,"A",84.97296,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,324,324,{"$raw":"00000000"},"110405","MJ.1.11","OPER",1,"A",5.54725,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,325,325,{"$raw":"00000000"},"110405","MJ.1.12","OPER",1,"A",28.19216,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,326,326,{"$raw":"00000000"},"110405","MJ.1.13","OPER",1,"A",35.55526,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,327,327,{"$raw":"00000000"},"110405","MJ.2.34","OPER",2,"A",24.17213,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR","Montejunto",null,null,null,null,null,"110405",1,null,null,328,328,{"$raw":"00000000"},"110405","MJ.1.14","OPER",1,"A",117.24484,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",329,329,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",42.08842,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",330,330,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",42.22640,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",331,331,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",3.52899,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",332,332,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",36.36018,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",333,333,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",10.99305,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,334,334,{"$raw":"00000000"},"110405","MJ.3.173","INOP",3,"T",513.58178,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,335,335,{"$raw":"00000000"},"110405","MJ.3.174","INOP",3,"A",372.01617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,336,336,{"$raw":"00000000"},"110405","MJ.3.175","INOP",3,"T",350.27051,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,337,337,{"$raw":"00000000"},"110405","MJ.3.176","INOP",3,"T",345.05987,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,338,338,{"$raw":"00000000"},"110405","MJ.3.177","INOP",3,"T",140.56862,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,339,339,{"$raw":"00000000"},"110405","MJ.3.178","INOP",3,"T",143.08387,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,340,340,{"$raw":"00000000"},"110405","MJ.3.179","INOP",3,"T",339.06191,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,341,341,{"$raw":"00000000"},"110405","MJ.3.180","INOP",3,"T",418.28088,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,342,342,{"$raw":"00000000"},"110405","MJ.1.15","OPER",1,"A",2.92606,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,343,343,{"$raw":"00000000"},"110405","MJ.3.181","INOP",3,"T",61.76859,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,344,344,{"$raw":"00000000"},"110405","MJ.3.182","INOP",3,"T",2.90911,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,345,345,{"$raw":"00000000"},"110405","MJ.3.183","INOP",3,"T",56.99684,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,346,346,{"$raw":"00000000"},"110405","MJ.3.184","INOP",3,"T",100.50693,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,347,347,{"$raw":"00000000"},"110405","MJ.3.185","INOP",3,"A",83.16939,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,348,348,{"$raw":"00000000"},"110405","MJ.2.35","OPER",2,"A",21.16351,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCO CARDOSO",null,null,"R",null,"110403",1,null,"R FRANCISCO CARDOSO",349,349,{"$raw":"00000000"},"110403","R FRANCISCO CARDOSO","INOP",3,"T",53.76852,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","DO MONTEJUNTO",null,null,"R",null,"110403",1,null,"ESTR FLORESTAL",350,350,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",67.57648,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",351,351,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",44.50853,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",352,352,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",93.32588,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,353,353,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,19.16812,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,354,354,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,248.06877,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,355,355,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,43.24149,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,356,356,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,133.10106,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,357,357,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,9.95229,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,358,358,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,126.47241,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,359,359,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,14.55277,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,360,360,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,259.58259,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,361,361,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.42177,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",362,362,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",101.40313,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1",null,null,"DA EIRA",null,null,"R",null,"110403",1,null,"R DA EIRA",363,363,{"$raw":"00000000"},"110403","R DA EIRA","INOP",3,"T",172.20042,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",364,364,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",142.36232,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",365,365,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",111.93130,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",366,366,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",188.59579,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",367,367,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",323.71565,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",368,368,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",570.49534,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","EM","517","517",null,null,"EM",null,"110405",1,null,"EM 517",369,369,{"$raw":"00000000"},"110405","EM 517","OPER",1,"A",1154.10459,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",370,370,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",1012.47108,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",371,371,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",259.28744,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110410",1,null,"ESTR FLORESTAL",372,372,{"$raw":"00000000"},"110410","ESTR FLORESTAL","OPER",1,"A",2362.97760,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1",null,null,"DOS CARMOS",null,null,"R",null,"110403",1,null,"R DOS CARMOS",373,373,{"$raw":"00000000"},"110403","R DOS CARMOS","INOP",3,"T",5.23700,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALENQUER",null,null,"R",null,"110403",1,null,"R DO ALENQUER",374,374,{"$raw":"00000000"},"110403","R DO ALENQUER","INOP",3,"T",105.34892,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCO CARDOSO",null,null,"R",null,"110403",1,null,"R FRANCISCO CARDOSO",375,375,{"$raw":"00000000"},"110403","R FRANCISCO CARDOSO","OPER",1,"A",140.75360,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"R",null,"110405",1,null,"R DO MOINHO",376,376,{"$raw":"00000000"},"110405","R DO MOINHO","INOP",3,"T",68.71587,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"R",null,"110405",1,null,"R DO MOINHO",377,377,{"$raw":"00000000"},"110405","R DO MOINHO","INOP",3,"T",429.64444,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"R",null,"110405",1,null,"R DO MOINHO",378,378,{"$raw":"00000000"},"110405","R DO MOINHO","INOP",3,"T",37.42280,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,379,379,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,380,380,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.76704,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,381,381,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,67.43663,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,382,382,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,93.90223,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,383,383,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,225.82938,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,384,384,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,10.70707,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,385,385,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,62.78583,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,386,386,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.19249,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCO CARDOSO",null,null,"R",null,"110403",1,null,"R FRANCISCO CARDOSO",387,387,{"$raw":"00000000"},"110403","R FRANCISCO CARDOSO","INOP",3,"T",58.29235,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,388,388,{"$raw":"00000000"},"110405","MJ.3.186","INOP",3,"A",344.89390,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,389,389,{"$raw":"00000000"},"110405","MJ.3.187","INOP",3,"A",38.70281,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,390,390,{"$raw":"00000000"},"110405","MJ.1.16","OPER",1,"A",3.01240,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,391,391,{"$raw":"00000000"},"110405","MJ.3.188","INOP",3,"T",103.60860,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,392,392,{"$raw":"00000000"},"110405","MJ.3.189","INOP",3,"T",12.21985,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,393,393,{"$raw":"00000000"},"110405","MJ.3.190","INOP",3,"T",49.82971,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,394,394,{"$raw":"00000000"},"110405","MJ.1.17","OPER",1,"A",4.49623,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,395,395,{"$raw":"00000000"},"110405","MJ.3.191","INOP",3,"T",205.13138,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,396,396,{"$raw":"00000000"},"110405","MJ.3.192","INOP",3,"A",35.62906,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,397,397,{"$raw":"00000000"},"110405","MJ.3.193","INOP",3,"A",85.49520,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,398,398,{"$raw":"00000000"},"110405","MJ.3.194","INOP",3,"T",80.22592,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,399,399,{"$raw":"00000000"},"110405","MJ.3.195","INOP",3,"T",192.24997,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,400,400,{"$raw":"00000000"},"110405","MJ.3.196","INOP",3,"T",4.72560,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,401,401,{"$raw":"00000000"},"110405","MJ.3.197","INOP",3,"A",39.77803,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,402,402,{"$raw":"00000000"},"110405","MJ.3.198","INOP",3,"A",162.90918,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,403,403,{"$raw":"00000000"},"110405","MJ.3.199","INOP",3,"T",2.67380,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,404,404,{"$raw":"00000000"},"110405","MJ.3.200","INOP",3,"T",15.09523,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,405,405,{"$raw":"00000000"},"110405","MJ.3.201","INOP",3,"T",154.41590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,406,406,{"$raw":"00000000"},"110405","MJ.3.202","INOP",3,"T",203.36332,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,407,407,{"$raw":"00000000"},"110405","MJ.3.203","INOP",3,"T",3.08444,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,408,408,{"$raw":"00000000"},"110405","MJ.3.204","INOP",3,"T",2.90988,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,409,409,{"$raw":"00000000"},"110405","MJ.3.205","INOP",3,"T",121.63124,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,410,410,{"$raw":"00000000"},"110405","MJ.3.206","INOP",3,"T",348.42482,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,411,411,{"$raw":"00000000"},"110405","MJ.3.207","INOP",3,"T",2.96015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,412,412,{"$raw":"00000000"},"110405","MJ.3.208","INOP",3,"T",3.10413,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,413,413,{"$raw":"00000000"},"110405","MJ.3.209","INOP",3,"T",63.08245,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",2,null,null,414,414,{"$raw":"00000000"},"110405","MJ.3.210","INOP",3,"T",321.06499,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",415,415,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",40.47007,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",416,416,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",183.36634,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,417,417,{"$raw":"00000000"},"110405","MJ.3.211","INOP",3,"T",193.02611,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,418,418,{"$raw":"00000000"},"110405","MJ.3.212","INOP",3,"T",344.86840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,419,419,{"$raw":"00000000"},"110405","MJ.3.213","INOP",3,"T",685.38093,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,420,420,{"$raw":"00000000"},"110405","MJ.3.214","INOP",3,"T",200.72271,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,421,421,{"$raw":"00000000"},"110405","MJ.3.215","INOP",3,"T",132.96306,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,422,422,{"$raw":"00000000"},"110405","MJ.3.216","INOP",3,"T",95.63851,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,423,423,{"$raw":"00000000"},"110405","MJ.3.217","INOP",3,"T",84.37767,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,424,424,{"$raw":"00000000"},"110405","MJ.3.218","INOP",3,"T",289.76129,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",425,425,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",2.84079,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,426,426,{"$raw":"00000000"},"110405","MJ.3.219","INOP",3,"A",97.92599,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,427,427,{"$raw":"00000000"},"110405","MJ.3.220","INOP",3,"T",32.80743,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,428,428,{"$raw":"00000000"},"110405","MJ.3.221","INOP",3,"T",4.44416,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,429,429,{"$raw":"00000000"},"110405","MJ.3.222","INOP",3,"T",5.23637,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,430,430,{"$raw":"00000000"},"110405","MJ.1.18","OPER",1,"A",27.93912,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,431,431,{"$raw":"00000000"},"110405","MJ.3.223","INOP",3,"A",183.17631,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,432,432,{"$raw":"00000000"},"110405","MJ.3.224","INOP",3,"A",27.49232,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,433,433,{"$raw":"00000000"},"110403","MJ.2.36","OPER",2,"A",234.37474,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",434,434,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",774.86186,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",435,435,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",348.45157,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1",null,null,"DA PORTELA ??",null,null,"R",null,"110405",1,null,"R DA PORTELA ??",436,436,{"$raw":"00000000"},"110405","R DA PORTELA ??","OPER",1,"A",105.71027,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110405",1,null,"R DO CASTELO",437,437,{"$raw":"00000000"},"110405","R DO CASTELO","OPER",2,"A",156.17220,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",438,438,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",1195.81718,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1",null,null,"DA FONTE",null,null,"TV",null,"110405",1,null,"TV DA FONTE",439,439,{"$raw":"00000000"},"110405","TV DA FONTE","OPER",2,"A",98.22456,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",440,440,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",12.55858,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",441,441,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",302.62350,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","DA IGREJA",null,null,"R",null,"110405",1,null,"R DA IGREJA",442,442,{"$raw":"00000000"},"110405","R DA IGREJA","OPER",2,"A",123.95448,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","ESTRADA DO CADAVAL",null,null,"R",null,"110403",1,null,"R ESTRADA DO CADAVAL",443,443,{"$raw":"00000000"},"110403","R ESTRADA DO CADAVAL","OPER",1,"A",187.97719,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,444,444,{"$raw":"00000000"},"110403","MJ.2.37","OPER",2,"A",218.39246,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,445,445,{"$raw":"00000000"},"110403","MJ.3.225","INOP",3,"A",36.61313,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,446,446,{"$raw":"00000000"},"110403","MJ.2.38","OPER",2,"A",652.28788,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,447,447,{"$raw":"00000000"},"110403","MJ.2.39","OPER",2,"A",95.51604,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,448,448,{"$raw":"00000000"},"110403","MJ.3.226","INOP",3,"T",224.46987,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,449,449,{"$raw":"00000000"},"110403","MJ.3.227","INOP",3,"T",8.55398,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,450,450,{"$raw":"00000000"},"110403","MJ.3.228","INOP",3,"T",414.82690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,451,451,{"$raw":"00000000"},"110403","MJ.3.229","INOP",3,"T",44.45296,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,452,452,{"$raw":"00000000"},"110403","MJ.3.230","INOP",3,"A",111.53940,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,453,453,{"$raw":"00000000"},"110405","MJ.3.231","INOP",3,"A",55.97474,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,454,454,{"$raw":"00000000"},"110405","MJ.3.232","INOP",3,"A",121.80681,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,455,455,{"$raw":"00000000"},"110403","MJ.3.233","INOP",3,"T",64.51609,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,456,456,{"$raw":"00000000"},"110403","MJ.3.234","INOP",3,"A",253.23487,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,457,457,{"$raw":"00000000"},"110405","MJ.3.235","INOP",3,"A",208.51744,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,458,458,{"$raw":"00000000"},"110405","MJ.3.236","INOP",3,"A",302.29134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,459,459,{"$raw":"00000000"},"110405","MJ.3.237","INOP",3,"T",2.58258,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,460,460,{"$raw":"00000000"},"110405","MJ.3.238","INOP",3,"T",116.02628,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,461,461,{"$raw":"00000000"},"110403","MJ.3.239","INOP",3,"T",2.24902,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,462,462,{"$raw":"00000000"},"110405","MJ.3.240","INOP",3,"T",266.32910,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,463,463,{"$raw":"00000000"},null,"MJ.3.241",null,3,"T",81.24703,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,464,464,{"$raw":"00000000"},"110405","MJ.3.242","INOP",3,"A",13.83709,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,465,465,{"$raw":"00000000"},"110405","MJ.3.243","INOP",3,"T",131.50179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,466,466,{"$raw":"00000000"},"110405","MJ.3.244","INOP",3,"T",37.25854,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,467,467,{"$raw":"00000000"},"110405","MJ.3.245","INOP",3,"A",66.29345,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,468,468,{"$raw":"00000000"},"110405","MJ.3.246","INOP",3,"A",2.94002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110405",1,null,null,469,469,{"$raw":"00000000"},"110405","MJ.2.40","OPER",2,"A",15.40505,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110405",1,null,null,470,470,{"$raw":"00000000"},"110405","MJ.3.247","INOP",3,"A",76.51410,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,471,471,{"$raw":"00000000"},"110405","MJ.2.41","OPER",2,"A",4.61936,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110405",1,null,null,472,472,{"$raw":"00000000"},"110405","MJ.2.42","OPER",2,"A",137.51474,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,473,473,{"$raw":"00000000"},"110405","MJ.3.248","INOP",3,"T",13.13351,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,474,474,{"$raw":"00000000"},"110405","MJ.3.249","INOP",3,"A",101.54469,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,475,475,{"$raw":"00000000"},"110405","MJ.2.43","OPER",2,"A",21.61764,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,476,476,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,477,477,{"$raw":"00000000"},"110405","MJ.2.44","OPER",2,"A",30.62932,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,478,478,{"$raw":"00000000"},"110405","MJ.2.45","OPER",2,"A",24.73112,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,479,479,{"$raw":"00000000"},"110405","MJ.2.46","OPER",2,"A",21.33116,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,480,480,{"$raw":"00000000"},"110405","MJ.2.47","OPER",2,"A",23.88931,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,481,481,{"$raw":"00000000"},"110405","MJ.2.48","OPER",2,"A",2.75305,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,482,482,{"$raw":"00000000"},"110405","MJ.3.250","INOP",3,"T",42.06359,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,483,483,{"$raw":"00000000"},"110405","MJ.3.251","INOP",3,"A",35.75888,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,484,484,{"$raw":"00000000"},"110405","MJ.3.252","INOP",3,"A",8.71636,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,485,485,{"$raw":"00000000"},"110405","MJ.3.253","INOP",3,"A",81.09625,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,486,486,{"$raw":"00000000"},"110405","MJ.3.254","INOP",3,"T",82.79214,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110405",1,null,null,487,487,{"$raw":"00000000"},"110405","MJ.2.49","OPER",2,"A",59.06306,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,488,488,{"$raw":"00000000"},"110405","MJ.2.50","OPER",2,"A",91.69499,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,489,489,{"$raw":"00000000"},"110405","MJ.3.255","INOP",3,"A",39.21793,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,490,490,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,409.63503,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,491,491,{"$raw":"00000000"},"110403","MJ.3.256","INOP",3,"T",380.51733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,492,492,{"$raw":"00000000"},"110403","MJ.3.257","INOP",3,"T",314.04005,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,493,493,{"$raw":"00000000"},"110405","MJ.3.258","INOP",3,"T",559.63495,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,494,494,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,245.79091,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",495,495,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",273.01378,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,496,496,{"$raw":"00000000"},"110405","MJ.3.259","INOP",3,"A",363.13372,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,497,497,{"$raw":"00000000"},"110405","MJ.3.260","INOP",3,"A",534.43038,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,498,498,{"$raw":"00000000"},"110405","MJ.3.261","INOP",3,"A",288.56874,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,499,499,{"$raw":"00000000"},"110405","MJ.3.262","INOP",3,"T",127.47537,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,500,500,{"$raw":"00000000"},"110405","MJ.3.263","INOP",3,"T",515.17620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,501,501,{"$raw":"00000000"},"110405","MJ.3.264","INOP",3,"T",88.86342,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,502,502,{"$raw":"00000000"},"110405","MJ.3.265","INOP",3,"T",122.78917,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,503,503,{"$raw":"00000000"},"110405","MJ.3.266","INOP",3,"T",119.57684,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,504,504,{"$raw":"00000000"},"110405","MJ.3.267","INOP",3,"T",426.91454,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,505,505,{"$raw":"00000000"},"110403","MJ.3.268","INOP",3,"T",632.81545,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,506,506,{"$raw":"00000000"},"110403","MJ.3.269","INOP",3,"T",206.11581,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,507,507,{"$raw":"00000000"},"110403","MJ.3.270","INOP",3,"T",187.67427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",2,null,null,508,508,{"$raw":"00000000"},"110405","MJ.3.271","INOP",3,"A",1227.84431,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,509,509,{"$raw":"00000000"},null,"MJ.3.272",null,3,"T",34.46340,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,510,510,{"$raw":"00000000"},"110405","MJ.3.273","INOP",3,"T",724.14043,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,511,511,{"$raw":"00000000"},"110405","MJ.3.274","INOP",3,"T",65.20390,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,512,512,{"$raw":"00000000"},"110403","MJ.3.275","INOP",3,"T",277.28567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,513,513,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,513.97135,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,514,514,{"$raw":"00000000"},"110403","MJ.3.276","INOP",3,"T",753.33638,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,515,515,{"$raw":"00000000"},"110403","MJ.3.277","INOP",3,"T",92.24728,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,516,516,{"$raw":"00000000"},"110403","MJ.3.278","INOP",3,"T",734.03102,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,517,517,{"$raw":"00000000"},"110403","MJ.3.279","INOP",3,"T",200.21027,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,518,518,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,130.90639,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,519,519,{"$raw":"00000000"},"110403","MJ.3.280","INOP",3,"T",169.91285,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,520,520,{"$raw":"00000000"},"110403","MJ.3.281","INOP",3,"A",99.69476,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,521,521,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,400.36260,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CARMOS",null,null,"R",null,"110403",1,null,"R DOS CARMOS",522,522,{"$raw":"00000000"},"110403","R DOS CARMOS","INOP",3,"T",26.94713,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,523,523,{"$raw":"00000000"},"110403","MJ.3.282","INOP",3,"A",80.87111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CANTINHO",null,null,"LG",null,"110405",1,null,"LG CANTINHO",524,524,{"$raw":"00000000"},"110405","LG CANTINHO","OPER",1,"A",25.26195,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,525,525,{"$raw":"00000000"},"110403","MJ.3.283","INOP",3,"A",16.94759,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,526,526,{"$raw":"00000000"},"110405","MJ.3.284","INOP",3,"A",296.89916,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,527,527,{"$raw":"00000000"},"110405","MJ.2.51","OPER",2,"A",26.05735,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,528,528,{"$raw":"00000000"},"110403","MJ.1.19","OPER",1,"A",6.85143,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",529,529,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",182.33012,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,530,530,{"$raw":"00000000"},"110403","MJ.3.285","INOP",3,"A",336.52604,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,531,531,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,152.12278,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,532,532,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.29926,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,533,533,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,156.91270,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,534,534,{"$raw":"00000000"},"110405","MJ.3.286","INOP",3,"T",239.54921,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,535,535,{"$raw":"00000000"},"110405","MJ.3.287","INOP",3,"T",4.22134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,536,536,{"$raw":"00000000"},"110405","MJ.3.288","INOP",3,"T",62.41580,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,537,537,{"$raw":"00000000"},"110405","MJ.3.289","INOP",3,"T",22.29654,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,538,538,{"$raw":"00000000"},"110405","MJ.3.290","INOP",3,"T",74.31264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,539,539,{"$raw":"00000000"},"110405","MJ.3.291","INOP",3,"A",143.96118,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,540,540,{"$raw":"00000000"},"110405","MJ.2.52","OPER",2,"A",2.77363,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,541,541,{"$raw":"00000000"},"110405","MJ.2.53","OPER",2,"A",8.20639,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,542,542,{"$raw":"00000000"},"110403","MJ.3.292","INOP",3,"A",12.29525,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,543,543,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,143.88727,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,544,544,{"$raw":"00000000"},"110403","MJ.3.293","INOP",3,"T",98.58604,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,545,545,{"$raw":"00000000"},"110403","MJ.3.294","INOP",3,"T",458.28196,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,546,546,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,96.26675,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,547,547,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,120.82069,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,548,548,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,204.92852,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,549,549,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,71.73621,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,550,550,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,138.50767,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,551,551,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,122.36672,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,552,552,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,110.91626,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,553,553,{"$raw":"00000000"},"110403","MJ.3.295","INOP",3,"A",242.25527,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,554,554,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,26.60881,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,555,555,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,563.76962,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,556,556,{"$raw":"00000000"},"110403","MJ.3.296","INOP",3,"T",602.08498,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,557,557,{"$raw":"00000000"},"110403","MJ.3.297","INOP",3,"T",433.70188,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,558,558,{"$raw":"00000000"},"110403","MJ.3.298","INOP",3,"T",273.26773,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,559,559,{"$raw":"00000000"},"110403","MJ.3.299","INOP",3,"T",449.05035,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,560,560,{"$raw":"00000000"},"110403","MJ.3.300","INOP",3,"T",442.46036,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,561,561,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,202.08548,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,562,562,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,142.85964,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,563,563,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,357.34531,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,564,564,{"$raw":"00000000"},"110405","MJ.3.301","INOP",3,"T",486.94504,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,565,565,{"$raw":"00000000"},"110405","MJ.3.302","INOP",3,"T",32.77685,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,566,566,{"$raw":"00000000"},"110405","MJ.3.303","INOP",3,"T",473.25219,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,567,567,{"$raw":"00000000"},"110405","MJ.3.304","INOP",3,"A",364.75900,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,568,568,{"$raw":"00000000"},"110410","MJ.3.305","INOP",3,"T",214.44560,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,569,569,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,86.88146,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,570,570,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,377.75287,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,571,571,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,124.66347,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,572,572,{"$raw":"00000000"},"110407","MJ.3.306","INOP",3,"T",131.87979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,573,573,{"$raw":"00000000"},"110405","MJ.3.307","INOP",3,"T",73.96968,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,574,574,{"$raw":"00000000"},"110405","MJ.3.308","INOP",3,"T",124.98510,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",2,null,null,575,575,{"$raw":"00000000"},"110405","MJ.3.309","INOP",3,"T",223.50285,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",2,null,null,576,576,{"$raw":"00000000"},"110405","MJ.3.310","INOP",3,"T",100.42475,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,577,577,{"$raw":"00000000"},"110407","MJ.3.311","INOP",3,"T",73.00551,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,578,578,{"$raw":"00000000"},"110403","MJ.3.312","INOP",3,"T",238.91323,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,579,579,{"$raw":"00000000"},"110403","MJ.3.313","INOP",3,"T",12.54242,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,580,580,{"$raw":"00000000"},"110403","MJ.3.314","INOP",3,"T",68.42867,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,581,581,{"$raw":"00000000"},"110407","MJ.3.315","INOP",3,"T",18.08746,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,582,582,{"$raw":"00000000"},"110407","MJ.3.316","INOP",3,"T",66.00640,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,583,583,{"$raw":"00000000"},"110405","MJ.1.20","OPER",1,"A",2.93539,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,584,584,{"$raw":"00000000"},"110407","MJ.3.317","INOP",3,"T",2.59563,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,585,585,{"$raw":"00000000"},"110403","MJ.3.318","INOP",3,"T",245.25086,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,586,586,{"$raw":"00000000"},"110403","MJ.3.319","INOP",3,"T",92.20411,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA MISERICÓRDIA",null,"21/02/2006","LG",null,"110402",1,null,"LG DA MISERICÓRDIA",587,587,{"$raw":"00000000"},"110402","LG DA MISERICÓRDIA","INOP",3,"T",110.25721,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,588,588,{"$raw":"00000000"},"110403","MJ.3.320","INOP",3,"T",82.43524,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,589,589,{"$raw":"00000000"},"110403","MJ.3.321","INOP",3,"T",141.67611,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,590,590,{"$raw":"00000000"},"110403","MJ.3.322","INOP",3,"T",12.41760,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,591,591,{"$raw":"00000000"},"110401","MJ.3.323","INOP",3,"T",230.84787,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,592,592,{"$raw":"00000000"},"110401","MJ.3.324","INOP",3,"T",236.01923,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,593,593,{"$raw":"00000000"},"110401","MJ.3.325","INOP",3,"T",39.83418,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,594,594,{"$raw":"00000000"},"110401","MJ.3.326","INOP",3,"T",33.82722,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,595,595,{"$raw":"00000000"},"110401","MJ.3.327","INOP",3,"T",21.49511,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,596,596,{"$raw":"00000000"},"110403","MJ.3.328","INOP",3,"T",43.30459,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,597,597,{"$raw":"00000000"},"110401","MJ.3.329","INOP",3,"T",37.77616,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,598,598,{"$raw":"00000000"},"110407","MJ.3.330","INOP",3,"T",114.61740,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,599,599,{"$raw":"00000000"},"110403","MJ.3.331","INOP",3,"T",18.77248,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,600,600,{"$raw":"00000000"},"110403","MJ.3.332","INOP",3,"T",194.58882,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,601,601,{"$raw":"00000000"},"110403","MJ.3.333","INOP",3,"T",4.29162,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,602,602,{"$raw":"00000000"},"110403","MJ.3.334","INOP",3,"T",3.84416,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,603,603,{"$raw":"00000000"},"110403","MJ.3.335","INOP",3,"T",7.19136,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,604,604,{"$raw":"00000000"},"110403","MJ.3.336","INOP",3,"T",267.65185,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,605,605,{"$raw":"00000000"},"110403","MJ.3.337","INOP",3,"T",10.95851,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,606,606,{"$raw":"00000000"},"110403","MJ.3.338","INOP",3,"T",9.48287,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,607,607,{"$raw":"00000000"},"110403","MJ.3.339","INOP",3,"T",11.77391,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,608,608,{"$raw":"00000000"},"110403","MJ.3.340","INOP",3,"T",12.36322,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,609,609,{"$raw":"00000000"},"110403","MJ.3.341","INOP",3,"T",152.73313,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,610,610,{"$raw":"00000000"},"110403","MJ.3.342","INOP",3,"T",266.76463,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,611,611,{"$raw":"00000000"},"110407","MJ.3.343","INOP",3,"T",75.44686,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,612,612,{"$raw":"00000000"},"110407","MJ.3.344","INOP",3,"T",3.11365,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,613,613,{"$raw":"00000000"},"110405","MJ.3.345","INOP",3,"T",34.35944,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,614,614,{"$raw":"00000000"},"110405","MJ.2.54","OPER",2,"A",2.30835,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,615,615,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.60340,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,616,616,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,60.76361,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,617,617,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,196.15975,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,618,618,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,55.49906,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,619,619,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.91872,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,620,620,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,335.16780,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,621,621,{"$raw":"00000000"},"110403","MJ.3.346","INOP",3,"T",177.64458,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,622,622,{"$raw":"00000000"},"110403","MJ.3.347","INOP",3,"T",67.18518,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,623,623,{"$raw":"00000000"},"110403","MJ.3.348","INOP",3,"T",136.99314,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,624,624,{"$raw":"00000000"},"110403","MJ.3.349","INOP",3,"T",36.48751,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,625,625,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,124.94799,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,626,626,{"$raw":"00000000"},"110403","MJ.3.350","INOP",3,"T",92.52695,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,627,627,{"$raw":"00000000"},"110403","MJ.3.351","INOP",3,"T",142.00121,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,628,628,{"$raw":"00000000"},"110403","MJ.3.352","INOP",3,"T",94.27554,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,629,629,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,200.85551,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,630,630,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.68076,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,631,631,{"$raw":"00000000"},"110403","MJ.3.353","INOP",3,"T",37.38901,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,632,632,{"$raw":"00000000"},"110403","MJ.3.354","INOP",3,"T",55.25828,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,633,633,{"$raw":"00000000"},"110403","MJ.3.355","INOP",3,"T",54.11210,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,634,634,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,11.56107,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,635,635,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,10.99520,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,636,636,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,53.86788,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,637,637,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,21.16965,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,638,638,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,86.94960,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,639,639,{"$raw":"00000000"},"110403","MJ.3.356","INOP",3,"T",85.17610,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,640,640,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,61.40063,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,641,641,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,33.92321,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,642,642,{"$raw":"00000000"},"110403","MJ.3.357","INOP",3,"T",92.36550,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,643,643,{"$raw":"00000000"},"110403","MJ.3.358","INOP",3,"T",87.46842,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,644,644,{"$raw":"00000000"},"110403","MJ.3.359","INOP",3,"T",190.22966,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,645,645,{"$raw":"00000000"},"110403","MJ.3.360","INOP",3,"T",161.99287,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,646,646,{"$raw":"00000000"},"110403","MJ.3.361","INOP",3,"T",1.49777,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,647,647,{"$raw":"00000000"},"110403","MJ.3.362","INOP",3,"T",36.09738,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,648,648,{"$raw":"00000000"},"110403","MJ.3.363","INOP",3,"T",299.75943,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,649,649,{"$raw":"00000000"},"110407","MJ.3.364","INOP",3,"T",75.03449,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,650,650,{"$raw":"00000000"},"110407","MJ.3.365","INOP",3,"T",6.66982,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,651,651,{"$raw":"00000000"},"110407","MJ.3.366","INOP",3,"T",30.33656,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,652,652,{"$raw":"00000000"},"110407","MJ.3.367","INOP",3,"T",126.26327,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,653,653,{"$raw":"00000000"},"110407","MJ.3.368","INOP",3,"T",91.72944,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"TV",null,"110407",1,null,"TV DO MOINHO",654,654,{"$raw":"00000000"},"110407","TV DO MOINHO","INOP",3,"T",37.98474,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,655,655,{"$raw":"00000000"},"110407","MJ.3.369","INOP",3,"T",8.79291,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,656,656,{"$raw":"00000000"},"110407","MJ.3.370","INOP",3,"T",81.93431,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,657,657,{"$raw":"00000000"},"110407","MJ.3.371","INOP",3,"T",4.10517,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,658,658,{"$raw":"00000000"},"110407","MJ.3.372","INOP",3,"T",96.54029,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,659,659,{"$raw":"00000000"},"110407","MJ.3.373","INOP",3,"T",3.29888,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,660,660,{"$raw":"00000000"},"110407","MJ.3.374","INOP",3,"T",99.25780,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,661,661,{"$raw":"00000000"},"110407","MJ.3.375","INOP",3,"T",2.56322,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,662,662,{"$raw":"00000000"},"110407","MJ.3.376","INOP",3,"T",40.72931,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,663,663,{"$raw":"00000000"},"110407","MJ.3.377","INOP",3,"T",1.52003,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,664,664,{"$raw":"00000000"},"110407","MJ.3.378","INOP",3,"T",31.93235,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALTO DO MOINHO",null,null,"TV",null,"110407",1,null,"TV ALTO DO MOINHO",665,665,{"$raw":"00000000"},"110407","TV ALTO DO MOINHO","INOP",3,"T",34.12263,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"R",null,"110407",1,null,"R DO MOINHO",666,666,{"$raw":"00000000"},"110407","R DO MOINHO","INOP",3,"T",93.04112,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"CARREIRO",null,"110407",1,null,"CARREIRO DO MOINHO",667,667,{"$raw":"00000000"},"110407","CARREIRO DO MOINHO","INOP",3,"T",58.73447,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"TV",null,"110407",1,null,"TV DO MOINHO",668,668,{"$raw":"00000000"},"110407","TV DO MOINHO","INOP",3,"T",59.27379,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,669,669,{"$raw":"00000000"},"110407","MJ.3.379","INOP",3,"T",34.84122,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,670,670,{"$raw":"00000000"},"110407","MJ.3.380","INOP",3,"T",200.21082,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,671,671,{"$raw":"00000000"},"110407","MJ.1.21","OPER",1,"A",6.21103,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,672,672,{"$raw":"00000000"},"110407","MJ.3.381","INOP",3,"T",194.09200,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,673,673,{"$raw":"00000000"},"110407","MJ.2.55","OPER",2,"A",2.73790,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,674,674,{"$raw":"00000000"},"110407","MJ.3.382","INOP",3,"T",55.31344,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,675,675,{"$raw":"00000000"},"110407","MJ.3.383","INOP",3,"T",2.70647,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,676,676,{"$raw":"00000000"},"110407","MJ.3.384","INOP",3,"T",64.78347,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,677,677,{"$raw":"00000000"},"110407","MJ.3.385","INOP",3,"T",29.39996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,678,678,{"$raw":"00000000"},"110407","MJ.3.386","INOP",3,"T",3.03402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,679,679,{"$raw":"00000000"},"110407","MJ.3.387","INOP",3,"T",7.30953,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,680,680,{"$raw":"00000000"},"110407","MJ.3.388","INOP",3,"T",2.72472,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,681,681,{"$raw":"00000000"},"110407","MJ.3.389","INOP",3,"T",104.28666,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,682,682,{"$raw":"00000000"},"110407","MJ.3.390","INOP",3,"T",2.70801,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,683,683,{"$raw":"00000000"},"110403","MJ.3.391","INOP",3,"T",2.87327,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,684,684,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,9.03562,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTONIO LUIS S NOBRE",null,null,"R",null,"110403",1,null,"R ANTONIO LUIS S NOBRE",685,685,{"$raw":"00000000"},"110403","R ANTONIO LUIS S NOBRE","INOP",3,"T",35.87400,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ FILIPE FARIA MARQUES","Processo 03/2009/146",null,"R",null,"110403",1,null,"R JOSÉ FILIPE FARIA MARQUES",686,686,{"$raw":"00000000"},"110403","R JOSÉ FILIPE FARIA MARQUES","INOP",3,"T",32.35688,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTONIO LUIS S NOBRE",null,null,"R",null,"110403",1,null,"R ANTONIO LUIS S NOBRE",687,687,{"$raw":"00000000"},"110403","R ANTONIO LUIS S NOBRE","INOP",3,"T",61.51336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",688,688,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",36.61102,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",689,689,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",28.74259,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA VARZEA",null,null,"R",null,"110403",1,null,"R DA VARZEA",690,690,{"$raw":"00000000"},"110403","R DA VARZEA","INOP",3,"T",30.41452,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA VARZEA",null,null,"R",null,"110403",1,null,"R DA VARZEA",691,691,{"$raw":"00000000"},"110403","R DA VARZEA","INOP",3,"T",11.98174,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,692,692,{"$raw":"00000000"},"110403","MJ.3.392","INOP",3,"T",8.40977,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,693,693,{"$raw":"00000000"},"110403","MJ.3.393","INOP",3,"T",16.50174,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA VARZEA",null,null,"R",null,"110403",1,null,"R DA VARZEA",694,694,{"$raw":"00000000"},"110403","R DA VARZEA","INOP",3,"T",25.13481,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOAQUIM S BORDA D`AGUA",null,null,"R",null,"110403",1,null,"R JOAQUIM S BORDA D`AGUA",695,695,{"$raw":"00000000"},"110403","R JOAQUIM S BORDA D`AGUA","INOP",3,"T",47.22705,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",696,696,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",4.88361,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS FERREIRA FARIA",null,null,"R",null,"110403",1,null,"R LUIS FERREIRA FARIA",697,697,{"$raw":"00000000"},"110403","R LUIS FERREIRA FARIA","INOP",3,"T",80.25947,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOAQUIM S BORDA D`AGUA",null,null,"R",null,"110403",1,null,"R JOAQUIM S BORDA D`AGUA",698,698,{"$raw":"00000000"},"110403","R JOAQUIM S BORDA D`AGUA","INOP",3,"T",84.18170,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",699,699,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",106.59227,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOAQUIM S BORDA D`AGUA",null,null,"R",null,"110403",1,null,"R JOAQUIM S BORDA D`AGUA",700,700,{"$raw":"00000000"},"110403","R JOAQUIM S BORDA D`AGUA","INOP",3,"T",3.31079,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"LG",null,"110403",1,null,"LG DO ROSSIO",701,701,{"$raw":"00000000"},"110403","LG DO ROSSIO","INOP",3,"T",29.85477,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"LG",null,"110403",1,null,"LG DO ROSSIO",702,702,{"$raw":"00000000"},"110403","LG DO ROSSIO","INOP",3,"T",37.30374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",703,703,{"$raw":"00000000"},"110408","EM 570","INOP",3,"T",8.97644,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",704,704,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",49.82144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",705,705,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",68.34261,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",706,706,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",279.84041,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110401","EN 366",707,707,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",271.25384,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOUROS",null,null,"ESTR",null,"110404",1,null,"ESTR DOS MOUROS",708,708,{"$raw":"00000000"},"110404","ESTR DOS MOUROS","INOP",3,"T",185.31464,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,709,709,{"$raw":"00000000"},"110401","MJ.3.394","INOP",3,"T",18.97737,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,710,710,{"$raw":"00000000"},"110401","MJ.3.395","INOP",3,"T",82.89412,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,711,711,{"$raw":"00000000"},"110401","MJ.3.396","INOP",3,"T",99.33935,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,712,712,{"$raw":"00000000"},"110401","MJ.3.397","INOP",3,"T",158.22465,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,713,713,{"$raw":"00000000"},"110401","MJ.3.398","INOP",3,"T",446.94585,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,714,714,{"$raw":"00000000"},"110401","MJ.3.399","INOP",3,"T",161.11313,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,715,715,{"$raw":"00000000"},"110401","MJ.3.400","INOP",3,"T",375.41495,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,716,716,{"$raw":"00000000"},"110401","MJ.2.56","OPER",2,"A",202.38475,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,717,717,{"$raw":"00000000"},"110404","MJ.3.401","INOP",3,"T",91.41925,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,718,718,{"$raw":"00000000"},"110404","MJ.3.402","INOP",3,"T",152.28666,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,719,719,{"$raw":"00000000"},"110407","MJ.3.403","INOP",3,"T",403.88791,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,720,720,{"$raw":"00000000"},"110407","MJ.3.404","INOP",3,"T",69.15231,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,721,721,{"$raw":"00000000"},"110407","MJ.3.405","INOP",3,"T",4.27612,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,722,722,{"$raw":"00000000"},"110401","MJ.3.406","INOP",3,"T",1.93869,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,723,723,{"$raw":"00000000"},"110401","MJ.3.407","INOP",3,"T",32.94935,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,724,724,{"$raw":"00000000"},"110401","MJ.3.408","INOP",3,"T",137.65353,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,725,725,{"$raw":"00000000"},"110401","MJ.3.409","INOP",3,"T",1.40911,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,726,726,{"$raw":"00000000"},"110401","MJ.3.410","INOP",3,"T",15.92633,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,727,727,{"$raw":"00000000"},"110401","MJ.3.411","INOP",3,"T",15.57438,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,729,729,{"$raw":"00000000"},"110401","MJ.3.413","INOP",3,"T",25.98437,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,730,730,{"$raw":"00000000"},"110401","MJ.3.414","INOP",3,"T",29.74250,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,731,731,{"$raw":"00000000"},"110401","MJ.3.415","INOP",3,"T",9.93669,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,732,732,{"$raw":"00000000"},"110401","MJ.3.416","INOP",3,"T",20.22034,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,733,733,{"$raw":"00000000"},"110401","MJ.3.417","INOP",3,"T",82.44523,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,734,734,{"$raw":"00000000"},"110401","MJ.3.418","INOP",3,"T",43.63452,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,735,735,{"$raw":"00000000"},"110401","MJ.3.419","INOP",3,"T",137.45972,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,736,736,{"$raw":"00000000"},"110401","MJ.3.420","INOP",3,"T",144.39262,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,737,737,{"$raw":"00000000"},"110401","MJ.3.421","INOP",3,"T",111.12919,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,738,738,{"$raw":"00000000"},"110401","MJ.3.422","INOP",3,"T",10.85920,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,739,739,{"$raw":"00000000"},"110401","MJ.3.423","INOP",3,"T",50.77986,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,740,740,{"$raw":"00000000"},"110401","MJ.3.424","INOP",3,"T",63.46360,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,741,741,{"$raw":"00000000"},"110406","MJ.3.425","INOP",3,"T",84.76388,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,742,742,{"$raw":"00000000"},"110406","MJ.3.426","INOP",3,"T",69.40136,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,743,743,{"$raw":"00000000"},"110401","MJ.3.427","INOP",3,"T",51.33572,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,744,744,{"$raw":"00000000"},"110401","MJ.3.428","INOP",3,"T",291.43265,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,745,745,{"$raw":"00000000"},"110401","MJ.3.429","INOP",3,"T",341.37896,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,746,746,{"$raw":"00000000"},"110401","MJ.3.430","INOP",3,"T",148.88140,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,747,747,{"$raw":"00000000"},"110405","MJ.3.431","INOP",3,"T",50.07788,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,748,748,{"$raw":"00000000"},"110405","MJ.3.432","INOP",3,"T",1.89447,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,749,749,{"$raw":"00000000"},"110405","MJ.3.433","INOP",3,"T",68.35344,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,750,750,{"$raw":"00000000"},"110405","MJ.3.434","INOP",3,"T",382.47159,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,751,751,{"$raw":"00000000"},"110405","MJ.3.435","INOP",3,"T",163.99834,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,752,752,{"$raw":"00000000"},"110405","MJ.3.436","INOP",3,"T",23.08418,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,753,753,{"$raw":"00000000"},"110405","MJ.3.437","INOP",3,"T",86.75265,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,754,754,{"$raw":"00000000"},"110405","MJ.3.438","INOP",3,"T",2.71531,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,755,755,{"$raw":"00000000"},"110405","MJ.3.439","INOP",3,"T",417.38971,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,756,756,{"$raw":"00000000"},"110405","MJ.3.440","INOP",3,"T",166.81478,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,757,757,{"$raw":"00000000"},"110405","MJ.3.441","INOP",3,"T",149.55370,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,758,758,{"$raw":"00000000"},"110405","MJ.3.442","INOP",3,"T",188.07727,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,759,759,{"$raw":"00000000"},"110408","MJ.3.443","INOP",3,"T",568.26664,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,760,760,{"$raw":"00000000"},"110408","MJ.2.57","OPER",2,"A",221.83285,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,761,761,{"$raw":"00000000"},"110408","MJ.3.444","INOP",3,"T",160.72792,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,762,762,{"$raw":"00000000"},"110408","MJ.3.445","INOP",3,null,55.39038,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,763,763,{"$raw":"00000000"},"110408","MJ.3.446","INOP",3,"T",579.41226,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,764,764,{"$raw":"00000000"},"110408","MJ.3.447","INOP",3,"T",334.54163,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,765,765,{"$raw":"00000000"},"110408","MJ.3.448","INOP",3,"T",501.99580,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,766,766,{"$raw":"00000000"},"110408","MJ.3.449","INOP",3,"T",255.36259,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,767,767,{"$raw":"00000000"},"110408","MJ.2.58","OPER",2,"A",2.11811,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,768,768,{"$raw":"00000000"},"110408","MJ.2.59","OPER",2,"A",236.09471,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,769,769,{"$raw":"00000000"},"110408","MJ.3.450","INOP",3,"T",68.90254,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,770,770,{"$raw":"00000000"},"110408","MJ.2.60","OPER",2,"A",241.69277,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,771,771,{"$raw":"00000000"},"110408","MJ.3.451","INOP",3,"T",315.38695,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,772,772,{"$raw":"00000000"},"110408","MJ.2.61","OPER",2,"A",8.70463,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,773,773,{"$raw":"00000000"},"110408","MJ.3.452","INOP",3,"T",60.07773,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,774,774,{"$raw":"00000000"},"110408","MJ.3.453","INOP",3,"T",17.91291,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,775,775,{"$raw":"00000000"},"110408","MJ.3.454","INOP",3,"T",244.11110,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,776,776,{"$raw":"00000000"},"110408","MJ.3.455","INOP",3,"T",150.04238,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,777,777,{"$raw":"00000000"},"110408","MJ.3.456","INOP",3,"T",153.21240,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,778,778,{"$raw":"00000000"},"110408","MJ.3.457","INOP",3,"T",158.17745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,779,779,{"$raw":"00000000"},"110408","MJ.3.458","INOP",3,"T",312.69620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,780,780,{"$raw":"00000000"},"110408","MJ.3.459","INOP",3,"T",227.77437,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,781,781,{"$raw":"00000000"},"110408","MJ.3.460","INOP",3,"T",12.04521,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,782,782,{"$raw":"00000000"},"110408","MJ.3.461","INOP",3,"T",116.14844,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"R DE VALE SOBREIRO",null,"24 set 2002","R",null,"110408",1,null,"R DE VALE SOBREIRO",783,783,{"$raw":"00000000"},"110408","R DE VALE SOBREIRO","INOP",3,"T",106.19626,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,"10 Set 2002","R",null,"110405",1,null,"R DA BICA",784,784,{"$raw":"00000000"},"110405","R DA BICA","INOP",3,"T",322.82138,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,785,785,{"$raw":"00000000"},"110405","MJ.3.462","INOP",3,"T",87.62300,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,786,786,{"$raw":"00000000"},"110405","MJ.3.463","INOP",3,"T",211.70631,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,null,"R",null,"110405",1,null,"R DA BICA",787,787,{"$raw":"00000000"},"110405","R DA BICA","INOP",3,"T",332.28733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,788,788,{"$raw":"00000000"},"110405","MJ.3.464","INOP",3,"T",241.70324,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,789,789,{"$raw":"00000000"},"110405","MJ.3.465","INOP",3,"T",77.53485,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,790,790,{"$raw":"00000000"},"110405","MJ.3.466","INOP",3,null,144.22705,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,791,791,{"$raw":"00000000"},"110405","MJ.3.467","INOP",3,"T",239.62744,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Fonte D. Durão",null,null,null,null,null,"110405",1,null,null,792,792,{"$raw":"00000000"},"110405","MJ.3.468","INOP",3,"T",107.13642,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,793,793,{"$raw":"00000000"},"110402","MJ.3.469","INOP",3,"T",506.67934,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,794,794,{"$raw":"00000000"},"110405","MJ.3.470","INOP",3,"T",362.04951,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,795,795,{"$raw":"00000000"},"110405","MJ.3.471","INOP",3,"T",395.22834,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",2,null,null,796,796,{"$raw":"00000000"},"110405","MJ.3.472","INOP",3,"T",745.93386,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",2,null,null,797,797,{"$raw":"00000000"},"110405","MJ.3.473","INOP",3,"T",82.79132,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,798,798,{"$raw":"00000000"},"110405","MJ.3.474","INOP",3,"T",402.78569,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,799,799,{"$raw":"00000000"},"110405","MJ.3.475","INOP",3,"T",12.79643,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,800,800,{"$raw":"00000000"},"110405","MJ.3.476","INOP",3,"T",468.30990,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,801,801,{"$raw":"00000000"},"110405","MJ.3.477","INOP",3,"T",54.89465,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",2,null,null,802,802,{"$raw":"00000000"},"110405","MJ.3.478","INOP",3,"T",152.81040,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,803,803,{"$raw":"00000000"},"110402","MJ.3.479","INOP",3,"T",593.92959,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,804,804,{"$raw":"00000000"},"110402","MJ.3.480","INOP",3,"T",172.97959,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,805,805,{"$raw":"00000000"},"110402","MJ.3.481","INOP",3,"T",59.30714,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,806,806,{"$raw":"00000000"},"110402","MJ.3.482","INOP",3,"T",259.69317,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,807,807,{"$raw":"00000000"},"110402","MJ.3.483","INOP",3,"T",225.01531,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,808,808,{"$raw":"00000000"},"110402","MJ.3.484","INOP",3,"T",7.65146,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,809,809,{"$raw":"00000000"},"110405","MJ.3.485","INOP",3,"T",3.27410,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,810,810,{"$raw":"00000000"},"110405","MJ.3.486","INOP",3,"T",61.97744,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,811,811,{"$raw":"00000000"},"110405","MJ.3.487","INOP",3,"T",3.97005,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,812,812,{"$raw":"00000000"},"110405","MJ.3.488","INOP",3,"T",3.23595,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,813,813,{"$raw":"00000000"},"110402","MJ.1.22","OPER",1,"A",3.87001,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,814,814,{"$raw":"00000000"},"110402","MJ.3.489","INOP",3,"T",17.50005,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,815,815,{"$raw":"00000000"},"110402","MJ.3.490","INOP",3,"T",38.60401,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,816,816,{"$raw":"00000000"},"110402","MJ.3.491","INOP",3,"A",135.85264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,817,817,{"$raw":"00000000"},"110402","MJ.3.492","INOP",3,"T",70.84450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,818,818,{"$raw":"00000000"},"110402","MJ.3.493","INOP",3,"T",56.27222,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,819,819,{"$raw":"00000000"},"110402","MJ.3.494","INOP",3,"T",17.14594,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,820,820,{"$raw":"00000000"},"110402","MJ.3.495","INOP",3,"T",44.13583,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,821,821,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,264.32352,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,822,822,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,104.28217,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,823,823,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,32.28497,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,824,824,{"$raw":"00000000"},"110410","MJ.3.496","INOP",3,"T",309.45023,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,825,825,{"$raw":"00000000"},"110405","MJ.3.497","INOP",3,"T",2.52733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,826,826,{"$raw":"00000000"},"110405","MJ.3.498","INOP",3,"T",92.08937,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,827,827,{"$raw":"00000000"},"110405","MJ.3.499","INOP",3,"T",0.06708,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,828,828,{"$raw":"00000000"},"110405","MJ.3.500","INOP",3,"T",0.26926,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,829,829,{"$raw":"00000000"},"110405","MJ.3.501","INOP",3,"T",1.28089,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,830,830,{"$raw":"00000000"},"110405","MJ.3.502","INOP",3,"T",1.74725,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,831,831,{"$raw":"00000000"},"110405","MJ.3.503","INOP",3,"T",1.19553,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,832,832,{"$raw":"00000000"},"110405","MJ.3.504","INOP",3,"T",393.98010,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,833,833,{"$raw":"00000000"},"110405","MJ.3.505","INOP",3,"T",5.21072,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,834,834,{"$raw":"00000000"},"110405","MJ.3.506","INOP",3,"T",115.79251,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110403",1,null,"ESTR FLORESTAL",835,835,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",211.10922,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",836,836,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",405.68720,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",837,837,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",228.73241,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",838,838,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",41.96453,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,839,839,{"$raw":"00000000"},"110405","MJ.3.507","INOP",3,"T",38.52847,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,840,840,{"$raw":"00000000"},"110405","MJ.3.508","INOP",3,"T",5.35649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,841,841,{"$raw":"00000000"},"110405","MJ.3.509","INOP",3,"T",80.39041,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,842,842,{"$raw":"00000000"},"110405","MJ.3.510","INOP",3,"T",0.31064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,843,843,{"$raw":"00000000"},"110405","MJ.3.511","INOP",3,"T",0.15620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,844,844,{"$raw":"00000000"},"110405","MJ.3.512","INOP",3,"T",1.19854,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,845,845,{"$raw":"00000000"},"110405","MJ.3.513","INOP",3,"T",53.15400,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,846,846,{"$raw":"00000000"},"110405","MJ.3.514","INOP",3,"T",0.19209,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,847,847,{"$raw":"00000000"},"110410","MJ.3.515","INOP",3,"T",4.97426,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,848,848,{"$raw":"00000000"},"110410","MJ.3.516","INOP",3,"T",81.36793,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,849,849,{"$raw":"00000000"},"110410","MJ.3.517","INOP",3,"T",0.47539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,850,850,{"$raw":"00000000"},"110410","MJ.3.518","INOP",3,"T",18.18006,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,851,851,{"$raw":"00000000"},"110405","MJ.3.519","INOP",3,"T",11.82356,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,852,852,{"$raw":"00000000"},"110405","MJ.3.520","INOP",3,"T",64.62713,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,853,853,{"$raw":"00000000"},"110405","MJ.3.521","INOP",3,"T",13.78516,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,854,854,{"$raw":"00000000"},"110405","MJ.3.522","INOP",3,"T",6.19797,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,855,855,{"$raw":"00000000"},"110405","MJ.3.523","INOP",3,"T",52.54538,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,856,856,{"$raw":"00000000"},"110410","MJ.3.524","INOP",3,"T",7.06482,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110410",1,null,null,857,857,{"$raw":"00000000"},"110410","MJ.3.525","INOP",3,"T",4.79051,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,858,858,{"$raw":"00000000"},"110410","MJ.3.526","INOP",3,"T",7.20155,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,859,859,{"$raw":"00000000"},"110410","MJ.3.527","INOP",3,"T",1.38293,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,860,860,{"$raw":"00000000"},"110410","MJ.3.528","INOP",3,"T",8.19306,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,861,861,{"$raw":"00000000"},"110410","MJ.3.529","INOP",3,"T",4.22655,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,862,862,{"$raw":"00000000"},"110410","MJ.3.530","INOP",3,"T",150.59868,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,863,863,{"$raw":"00000000"},"110410","MJ.3.531","INOP",3,"T",32.77412,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,864,864,{"$raw":"00000000"},"110410","MJ.3.532","INOP",3,"T",2.95544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,865,865,{"$raw":"00000000"},"110410","MJ.3.533","INOP",3,"T",119.39522,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,866,866,{"$raw":"00000000"},"110410","MJ.3.534","INOP",3,"T",50.94181,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,867,867,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.96731,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,868,868,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.03606,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,869,869,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,46.19355,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,870,870,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,45.00357,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,871,871,{"$raw":"00000000"},"110405","MJ.1.23","OPER",1,"A",6.02612,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,872,872,{"$raw":"00000000"},"110405","MJ.1.24","OPER",1,"A",0.05831,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,873,873,{"$raw":"00000000"},"110405","MJ.1.25","OPER",1,"A",9.55424,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,874,874,{"$raw":"00000000"},"110405","MJ.1.26","OPER",1,"A",1.86987,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,875,875,{"$raw":"00000000"},"110408","MJ.3.535","INOP",3,"T",15.81367,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,876,876,{"$raw":"00000000"},"110408","MJ.2.62","OPER",2,"A",27.56100,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,877,877,{"$raw":"00000000"},"110408","MJ.3.536","INOP",3,"T",57.08621,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,878,878,{"$raw":"00000000"},"110408","MJ.3.537","INOP",3,"T",11.84474,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,879,879,{"$raw":"00000000"},"110408","MJ.2.63","OPER",2,"A",6.74942,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,880,880,{"$raw":"00000000"},"110408","MJ.2.64","OPER",2,"A",72.80350,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,881,881,{"$raw":"00000000"},"110408","MJ.3.538","INOP",3,"T",380.99275,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,882,882,{"$raw":"00000000"},"110410","MJ.3.539","INOP",3,"T",2.68403,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,883,883,{"$raw":"00000000"},"110410","MJ.3.540","INOP",3,"T",63.14110,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,884,884,{"$raw":"00000000"},"110408","MJ.3.541","INOP",3,"T",119.75496,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,885,885,{"$raw":"00000000"},"110410","MJ.3.542","INOP",3,"T",3.79104,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,886,886,{"$raw":"00000000"},"110410","MJ.3.543","INOP",3,"T",5.23436,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,887,887,{"$raw":"00000000"},"110405","MJ.3.544","INOP",3,"T",339.47279,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,888,888,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,27.70546,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","da Portela",null,null,null,null,null,"110405",1,null,null,889,889,{"$raw":"00000000"},"110405","MJ.3.545","INOP",3,"T",59.33702,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110410",1,null,"CM 1043",890,890,{"$raw":"00000000"},"110410","CM 1043","OPER",2,"A",70.85547,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110405",1,null,"R PE JOSÉ INÁCIO PEREIRA",891,891,{"$raw":"00000000"},"110405","R PE JOSÉ INÁCIO PEREIRA","INOP",3,"T",31.21631,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110405",1,null,"R PE JOSÉ INÁCIO PEREIRA",892,892,{"$raw":"00000000"},"110405","R PE JOSÉ INÁCIO PEREIRA","INOP",3,"T",248.92535,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,null,"R",null,"110405",1,null,"R DO CHAFARIZ",893,893,{"$raw":"00000000"},"110405","R DO CHAFARIZ","INOP",3,"T",98.56470,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DOS SILVESTRES",null,null,"R",null,"110405",1,null,"R DOS SILVESTRES",894,894,{"$raw":"00000000"},"110405","R DOS SILVESTRES","OPER",2,"A",40.12633,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DAS AZENHAS",null,null,"ESTR",null,"110405",1,null,"ESTR DAS AZENHAS",895,895,{"$raw":"00000000"},"110405","ESTR DAS AZENHAS","OPER",2,"A",878.81306,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1",null,null,"DA RESTAURAÇÃO",null,null,"TV",null,"110410",1,null,"TV DA RESTAURAÇÃO",896,896,{"$raw":"00000000"},"110410","TV DA RESTAURAÇÃO","INOP",3,"T",163.29133,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","517","1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",897,897,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",60.49117,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"13 DE JANEIRO",null,"14/06/2005","TV",null,"110410",1,null,"TV 13 DE JANEIRO",898,898,{"$raw":"00000000"},"110410","TV 13 DE JANEIRO","INOP",3,"T",86.97716,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARMO",null,null,"R",null,"110410",1,null,"R DO CARMO",899,899,{"$raw":"00000000"},"110410","R DO CARMO","INOP",3,"T",15.97672,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LOUREIRO",null,null,"R",null,"110405",1,null,"R DO LOUREIRO",900,900,{"$raw":"00000000"},"110405","R DO LOUREIRO","OPER",2,"A",52.00070,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,901,901,{"$raw":"00000000"},"110410","MJ.3.546","INOP",3,"T",240.23278,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,902,902,{"$raw":"00000000"},"110410","MJ.3.547","INOP",3,"T",278.24640,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,903,903,{"$raw":"00000000"},"110408","MJ.3.548","INOP",3,"T",50.29553,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,904,904,{"$raw":"00000000"},"110408","MJ.3.549","INOP",3,"T",222.18095,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,905,905,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,328.93509,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,906,906,{"$raw":"00000000"},"110405","MJ.3.550","INOP",3,"T",19.23397,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,907,907,{"$raw":"00000000"},"110408","MJ.3.551","INOP",3,"T",255.32181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,908,908,{"$raw":"00000000"},"110405","MJ.3.552","INOP",3,"T",112.89799,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,909,909,{"$raw":"00000000"},"110405","MJ.3.553","INOP",3,"T",311.12505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,910,910,{"$raw":"00000000"},"110405","MJ.3.554","INOP",3,"T",233.88033,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,911,911,{"$raw":"00000000"},"110405","MJ.3.555","INOP",3,"T",29.11035,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,912,912,{"$raw":"00000000"},"110408","MJ.3.556","INOP",3,"T",134.55746,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,913,913,{"$raw":"00000000"},"110408","MJ.3.557","INOP",3,"T",58.13369,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,914,914,{"$raw":"00000000"},"110408","MJ.3.558","INOP",3,"T",52.31945,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,915,915,{"$raw":"00000000"},"110408","MJ.3.559","INOP",3,"T",101.75300,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,916,916,{"$raw":"00000000"},"110408","MJ.3.560","INOP",3,"T",113.01563,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,917,917,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,31.16444,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,918,918,{"$raw":"00000000"},"110405","MJ.3.561","INOP",3,"T",17.32188,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,919,919,{"$raw":"00000000"},"110405","MJ.3.562","INOP",3,"T",146.81197,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,920,920,{"$raw":"00000000"},"110405","MJ.3.563","INOP",3,"T",136.68836,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,921,921,{"$raw":"00000000"},"110405","MJ.3.564","INOP",3,"T",83.87682,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,922,922,{"$raw":"00000000"},"110405","MJ.3.565","INOP",3,"T",62.71053,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,923,923,{"$raw":"00000000"},"110405","MJ.3.566","INOP",3,"T",80.79381,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,924,924,{"$raw":"00000000"},"110408","MJ.3.567","INOP",3,"T",257.80409,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,925,925,{"$raw":"00000000"},"110408","MJ.3.568","INOP",3,"T",12.26697,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,926,926,{"$raw":"00000000"},"110408","MJ.2.65","OPER",2,"A",44.53875,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,927,927,{"$raw":"00000000"},"110408","MJ.2.66","OPER",2,"A",20.58656,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,928,928,{"$raw":"00000000"},"110408","MJ.2.67","OPER",2,"A",70.75812,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,929,929,{"$raw":"00000000"},"110410","MJ.3.569","INOP",3,"T",34.15533,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,930,930,{"$raw":"00000000"},"110405","MJ.2.68","OPER",2,"A",41.22821,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,931,931,{"$raw":"00000000"},"110405","MJ.3.570","INOP",3,"A",366.69607,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SERRADO",null,null,"R",null,"110405",1,null,"R DO SERRADO",932,932,{"$raw":"00000000"},"110405","R DO SERRADO","INOP",3,"A",66.09216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,933,933,{"$raw":"00000000"},"110405","MJ.2.69","OPER",2,"A",197.89557,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,934,934,{"$raw":"00000000"},"110405","MJ.2.70","OPER",2,"A",297.60638,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,935,935,{"$raw":"00000000"},"110405","MJ.2.71","OPER",2,"A",274.05019,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,936,936,{"$raw":"00000000"},"110405","MJ.3.571","INOP",3,"T",18.17405,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,937,937,{"$raw":"00000000"},"110405","MJ.3.572","INOP",3,"T",217.98530,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,938,938,{"$raw":"00000000"},"110405","MJ.2.72","OPER",2,"A",213.32345,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,939,939,{"$raw":"00000000"},"110405","MJ.3.573","INOP",3,"T",271.72996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,940,940,{"$raw":"00000000"},"110405","MJ.3.574","INOP",3,"T",16.97882,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,941,941,{"$raw":"00000000"},"110405","MJ.3.575","INOP",3,"T",210.03708,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,942,942,{"$raw":"00000000"},"110405","MJ.2.73","OPER",2,"A",178.44153,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,943,943,{"$raw":"00000000"},"110405","MJ.2.74","OPER",2,"A",66.34944,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,944,944,{"$raw":"00000000"},"110405","MJ.2.75","OPER",2,"A",318.12409,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,945,945,{"$raw":"00000000"},"110405","MJ.3.576","INOP",3,"T",172.21203,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,946,946,{"$raw":"00000000"},"110405","MJ.3.577","INOP",3,"T",10.78822,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,947,947,{"$raw":"00000000"},"110405","MJ.2.76","OPER",2,"A",48.90492,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,948,948,{"$raw":"00000000"},"110405","MJ.3.578","INOP",3,"T",28.61370,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,949,949,{"$raw":"00000000"},"110405","MJ.3.579","INOP",3,"T",239.20766,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,950,950,{"$raw":"00000000"},"110405","MJ.3.580","INOP",3,"T",200.20603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,951,951,{"$raw":"00000000"},"110405","MJ.3.581","INOP",3,"T",89.84915,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,952,952,{"$raw":"00000000"},"110405","MJ.3.582","INOP",3,"T",303.82736,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,953,953,{"$raw":"00000000"},"110405","MJ.3.583","INOP",3,"T",212.44529,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,954,954,{"$raw":"00000000"},"110405","MJ.3.584","INOP",3,"T",232.55667,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,955,955,{"$raw":"00000000"},"110405","MJ.3.585","INOP",3,"T",60.04504,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,956,956,{"$raw":"00000000"},"110405","MJ.3.586","INOP",3,"T",298.46695,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,957,957,{"$raw":"00000000"},"110405","MJ.3.587","INOP",3,"T",248.34129,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,958,958,{"$raw":"00000000"},"110405","MJ.3.588","INOP",3,"T",229.89508,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,959,959,{"$raw":"00000000"},"110405","MJ.3.589","INOP",3,"T",298.35717,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,960,960,{"$raw":"00000000"},"110405","MJ.3.590","INOP",3,"T",243.04683,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,961,961,{"$raw":"00000000"},"110405","MJ.3.591","INOP",3,"T",126.79060,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,962,962,{"$raw":"00000000"},"110405","MJ.3.592","INOP",3,"T",66.85639,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,963,963,{"$raw":"00000000"},"110405","MJ.3.593","INOP",3,"T",345.11726,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,964,964,{"$raw":"00000000"},"110405","MJ.3.594","INOP",3,"T",264.70778,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,965,965,{"$raw":"00000000"},"110405","MJ.2.77","OPER",2,"A",132.77542,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,966,966,{"$raw":"00000000"},"110405","MJ.2.78","OPER",2,"A",397.90225,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,967,967,{"$raw":"00000000"},"110405","MJ.3.595","INOP",3,"T",182.58907,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,968,968,{"$raw":"00000000"},"110405","MJ.3.596","INOP",3,"T",36.17888,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,969,969,{"$raw":"00000000"},"110405","MJ.3.597","INOP",3,"T",292.35050,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,970,970,{"$raw":"00000000"},"110405","MJ.3.598","INOP",3,"T",58.60765,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110405",1,null,"CM 1043",971,971,{"$raw":"00000000"},"110405","CM 1043","OPER",2,"A",111.66721,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,null,"BR",null,"110405",1,null,"BR DA BOAVISTA",972,972,{"$raw":"00000000"},"110405","BR DA BOAVISTA","OPER",1,"A",17.19727,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,null,0,null,"R DA FONTE",973,973,{"$raw":"00000000"},null,"R DA FONTE",null,{"$raw":"*****"},null,108.26621,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,null,"R",null,"110405",1,null,"R DO CHAFARIZ",974,974,{"$raw":"00000000"},"110405","R DO CHAFARIZ","INOP",3,"T",190.84963,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,975,975,{"$raw":"00000000"},"110410","MJ.3.599","INOP",3,"T",320.33059,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,976,976,{"$raw":"00000000"},"110410","MJ.3.600","INOP",3,"T",494.17108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,977,977,{"$raw":"00000000"},"110405","MJ.3.601","INOP",3,"T",61.74946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,978,978,{"$raw":"00000000"},"110405","MJ.3.602","INOP",3,"T",293.00139,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,979,979,{"$raw":"00000000"},"110405","MJ.3.603","INOP",3,"T",19.04119,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,980,980,{"$raw":"00000000"},"110405","MJ.3.604","INOP",3,"T",44.86101,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,981,981,{"$raw":"00000000"},"110405","MJ.3.605","INOP",3,"T",101.94993,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,982,982,{"$raw":"00000000"},"110405","MJ.2.79","OPER",2,"A",184.04426,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,983,983,{"$raw":"00000000"},"110405","MJ.2.80","OPER",2,"A",226.32429,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,984,984,{"$raw":"00000000"},"110405","MJ.3.606","INOP",3,"T",133.36768,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,985,985,{"$raw":"00000000"},"110405","MJ.3.607","INOP",3,"T",308.30262,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,986,986,{"$raw":"00000000"},"110405","MJ.3.608","INOP",3,"T",340.08612,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,987,987,{"$raw":"00000000"},"110405","MJ.3.609","INOP",3,"T",115.53497,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,988,988,{"$raw":"00000000"},"110405","MJ.3.610","INOP",3,"T",394.24618,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,989,989,{"$raw":"00000000"},"110410","MJ.3.611","INOP",3,"T",70.52759,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,990,990,{"$raw":"00000000"},"110410","MJ.3.612","INOP",3,"T",302.39817,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,991,991,{"$raw":"00000000"},"110410","MJ.3.613","INOP",3,"T",382.00341,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,992,992,{"$raw":"00000000"},"110410","MJ.3.614","INOP",3,"T",296.15149,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,993,993,{"$raw":"00000000"},"110410","MJ.3.615","INOP",3,"T",372.40615,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,994,994,{"$raw":"00000000"},"110410","MJ.3.616","INOP",3,"T",403.72052,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,995,995,{"$raw":"00000000"},"110405","MJ.3.617","INOP",3,"T",167.72352,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,996,996,{"$raw":"00000000"},"110405","MJ.3.618","INOP",3,"T",65.00112,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,997,997,{"$raw":"00000000"},"110405","MJ.3.619","INOP",3,"T",379.47280,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,998,998,{"$raw":"00000000"},"110405","MJ.2.81","OPER",2,"A",252.97181,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,999,999,{"$raw":"00000000"},"110405","MJ.3.620","INOP",3,"T",81.24486,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1000,1000,{"$raw":"00000000"},"110405","MJ.3.621","INOP",3,"T",38.69883,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1001,1001,{"$raw":"00000000"},"110405","MJ.3.622","INOP",3,"T",264.20649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1002,1002,{"$raw":"00000000"},"110405","MJ.3.623","INOP",3,"T",28.61714,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1003,1003,{"$raw":"00000000"},"110405","MJ.3.624","INOP",3,"T",346.40042,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1004,1004,{"$raw":"00000000"},"110405","MJ.3.625","INOP",3,"T",242.32296,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1005,1005,{"$raw":"00000000"},"110405","MJ.3.626","INOP",3,"T",262.37846,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1006,1006,{"$raw":"00000000"},"110410","MJ.3.627","INOP",3,"T",326.61888,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1007,1007,{"$raw":"00000000"},"110410","MJ.3.628","INOP",3,"T",450.26716,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110405",1,null,"CM 1043",1008,1008,{"$raw":"00000000"},"110405","CM 1043","OPER",2,"A",145.41729,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1009,1009,{"$raw":"00000000"},"110405","MJ.3.629","INOP",3,"T",179.79452,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1010,1010,{"$raw":"00000000"},"110405","MJ.3.630","INOP",3,"T",23.32078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,1011,1011,{"$raw":"00000000"},"110405","MJ.3.631","INOP",3,"T",216.22269,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1012,1012,{"$raw":"00000000"},"110405","MJ.3.632","INOP",3,"T",162.20231,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110410",2,null,null,1013,1013,{"$raw":"00000000"},"110410","MJ.3.633","INOP",3,"T",445.93810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110410",2,null,null,1014,1014,{"$raw":"00000000"},"110410","MJ.2.82","OPER",2,"A",297.52428,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,1015,1015,{"$raw":"00000000"},"110405","MJ.3.634","INOP",3,"T",316.46885,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1016,1016,{"$raw":"00000000"},"110410","MJ.3.635","INOP",3,"T",7.29816,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",2,null,null,1017,1017,{"$raw":"00000000"},"110410","MJ.3.636","INOP",3,"T",298.23488,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1018,1018,{"$raw":"00000000"},"110410","MJ.3.637","INOP",3,"T",382.78457,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1019,1019,{"$raw":"00000000"},"110410","MJ.2.83","OPER",2,"A",128.05401,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1020,1020,{"$raw":"00000000"},"110410","MJ.3.638","INOP",3,"T",120.01219,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1021,1021,{"$raw":"00000000"},"110410","MJ.3.639","INOP",3,"T",21.09690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1022,1022,{"$raw":"00000000"},"110410","MJ.3.640","INOP",3,"T",113.72183,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1023,1023,{"$raw":"00000000"},"110410","MJ.3.641","INOP",3,"T",316.13134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1024,1024,{"$raw":"00000000"},"110405","MJ.3.642","INOP",3,"T",35.40987,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1025,1025,{"$raw":"00000000"},"110410","MJ.3.643","INOP",3,"T",263.27074,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1026,1026,{"$raw":"00000000"},"110405","MJ.3.644","INOP",3,"T",89.06646,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1027,1027,{"$raw":"00000000"},"110410","MJ.3.645","INOP",3,"T",148.74967,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1028,1028,{"$raw":"00000000"},"110410","MJ.3.646","INOP",3,"T",281.41301,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1029,1029,{"$raw":"00000000"},"110410","MJ.3.647","INOP",3,"T",378.11736,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1030,1030,{"$raw":"00000000"},"110410","MJ.3.648","INOP",3,"T",284.28969,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1031,1031,{"$raw":"00000000"},"110410","MJ.3.649","INOP",3,"T",38.48379,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1032,1032,{"$raw":"00000000"},"110410","MJ.3.650","INOP",3,"T",107.98480,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1033,1033,{"$raw":"00000000"},"110410","MJ.3.651","INOP",3,"T",222.41901,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1034,1034,{"$raw":"00000000"},"110410","MJ.3.652","INOP",3,"T",43.84728,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1035,1035,{"$raw":"00000000"},"110410","MJ.3.653","INOP",3,"T",46.98026,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1036,1036,{"$raw":"00000000"},"110410","MJ.3.654","INOP",3,"T",28.89054,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110410",1,null,"CM 1043",1037,1037,{"$raw":"00000000"},"110410","CM 1043","OPER",2,"A",50.79569,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1038,1038,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,355.21791,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1039,1039,{"$raw":"00000000"},"110410","MJ.3.655","INOP",3,"T",121.81820,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1040,1040,{"$raw":"00000000"},"110410","MJ.3.656","INOP",3,"T",241.44817,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1041,1041,{"$raw":"00000000"},"110410","MJ.3.657","INOP",3,"T",228.73778,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1042,1042,{"$raw":"00000000"},"110410","MJ.3.658","INOP",3,"T",98.65420,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1043,1043,{"$raw":"00000000"},"110410","MJ.3.659","INOP",3,"T",230.42029,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1044,1044,{"$raw":"00000000"},"110410","MJ.3.660","INOP",3,"T",313.87893,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1045,1045,{"$raw":"00000000"},"110410","MJ.3.661","INOP",3,"T",218.39823,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALGARVE",null,null,"R",null,"110405",1,null,"R DO ALGARVE",1046,1046,{"$raw":"00000000"},"110405","R DO ALGARVE","OPER",2,"A",288.22213,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",1047,1047,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",263.60191,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","DO EMIGRANTE",null,null,"BR",null,"110410",1,null,"BR DO EMIGRANTE",1048,1048,{"$raw":"00000000"},"110410","BR DO EMIGRANTE","OPER",2,"A",587.40096,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110402",1,null,"R DO CAMPO DA BOLA",1049,1049,{"$raw":"00000000"},"110402","R DO CAMPO DA BOLA","INOP",3,"T",113.97888,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1050,1050,{"$raw":"00000000"},"110410","MJ.3.662","INOP",3,"T",312.20670,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1051,1051,{"$raw":"00000000"},"110410","MJ.3.663","INOP",3,"T",21.39659,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1052,1052,{"$raw":"00000000"},"110410","MJ.3.664","INOP",3,"T",21.38882,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",1053,1053,{"$raw":"00000000"},"110410","R DAS FLORES","INOP",3,"T",91.36211,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1054,1054,{"$raw":"00000000"},"110405","MJ.3.665","INOP",3,"T",638.99485,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1055,1055,{"$raw":"00000000"},"110410","MJ.3.666","INOP",3,"T",207.39735,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1056,1056,{"$raw":"00000000"},"110405","MJ.3.667","INOP",3,"T",45.73222,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1057,1057,{"$raw":"00000000"},"110405","MJ.3.668","INOP",3,"T",365.61025,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1058,1058,{"$raw":"00000000"},"110405","MJ.3.669","INOP",3,"T",112.29205,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1059,1060,{"$raw":"00000000"},"110410","MJ.1.27","OPER",1,"A",13.55931,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1060,1062,{"$raw":"00000000"},"110405","MJ.3.670","INOP",3,"T",266.28282,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO JUNCAL","Processo nº 01/2011/20","12 Abril 2011","R",null,"110405",1,null,"R DO JUNCAL",1061,1063,{"$raw":"00000000"},"110405","R DO JUNCAL","INOP",3,"T",182.39284,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1062,1064,{"$raw":"00000000"},"110405","MJ.3.671","INOP",3,"T",754.28631,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1063,1065,{"$raw":"00000000"},"110410","MJ.3.672","INOP",3,"T",75.39763,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1064,1066,{"$raw":"00000000"},"110410","MJ.3.673","INOP",3,"T",329.78374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1065,1067,{"$raw":"00000000"},"110410","MJ.3.674","INOP",3,"T",53.15552,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1066,1068,{"$raw":"00000000"},"110410","MJ.3.675","INOP",3,"T",306.19967,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","de Agua",null,null,null,null,null,"110410",1,null,null,1067,1069,{"$raw":"00000000"},"110410","MJ.3.676","INOP",3,"T",106.43475,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1068,1070,{"$raw":"00000000"},"110410","MJ.3.677","INOP",3,"T",43.22871,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1069,1071,{"$raw":"00000000"},"110405","MJ.3.678","INOP",3,"T",131.91331,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1070,1072,{"$raw":"00000000"},"110410","MJ.3.679","INOP",3,"T",126.92213,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1071,1073,{"$raw":"00000000"},"110410","MJ.3.681","INOP",3,"T",253.35625,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1072,1074,{"$raw":"00000000"},"110410","MJ.3.682","INOP",3,"T",202.60419,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1073,1075,{"$raw":"00000000"},"110410","MJ.3.683","INOP",3,"T",255.08708,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1074,1076,{"$raw":"00000000"},"110405","MJ.3.684","INOP",3,"T",176.74189,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FAVACA","Processo nº 01/2011/20","12 Abril 2011","R",null,"110405",1,null,"R DA FAVACA",1075,1077,{"$raw":"00000000"},"110405","R DA FAVACA","INOP",3,"T",486.58699,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110410",1,null,null,1076,1078,{"$raw":"00000000"},"110410","MJ.3.685","INOP",3,"T",340.57704,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1077,1079,{"$raw":"00000000"},"110410","MJ.3.686","INOP",3,"T",401.65932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1078,1080,{"$raw":"00000000"},"110410","MJ.3.687","INOP",3,"T",251.36241,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1079,1081,{"$raw":"00000000"},"110410","MJ.3.688","INOP",3,"T",243.91636,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1080,1082,{"$raw":"00000000"},"110410","MJ.3.689","INOP",3,"T",320.50486,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1081,1083,{"$raw":"00000000"},"110410","MJ.3.690","INOP",3,"T",233.11120,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1082,1084,{"$raw":"00000000"},"110410","MJ.3.691","INOP",3,"T",332.71876,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1083,1085,{"$raw":"00000000"},"110405","MJ.3.692","INOP",3,"T",303.87467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1084,1086,{"$raw":"00000000"},"110410","MJ.3.693","INOP",3,"T",317.17084,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1085,1087,{"$raw":"00000000"},"110410","MJ.3.694","INOP",3,"T",310.01700,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1086,1088,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,47.19355,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1087,1089,{"$raw":"00000000"},"110410","MJ.3.695","INOP",3,"T",306.73816,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1088,1090,{"$raw":"00000000"},"110405","MJ.3.696","INOP",3,"T",226.27501,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1089,1091,{"$raw":"00000000"},"110410","MJ.3.697","INOP",3,"T",200.14248,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TRINDADE",null,"14/06/2005","ESTR",null,"110410",2,"110405","ESTR DA TRINDADE",1090,1092,{"$raw":"00000000"},"110410","ESTR DA TRINDADE","INOP",3,"T",277.51136,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1091,1093,{"$raw":"00000000"},"110410","MJ.3.698","INOP",3,"T",139.22923,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1092,1094,{"$raw":"00000000"},"110410","MJ.3.699","INOP",3,"T",478.94944,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PEDREIRA",null,null,"R",null,"110410",1,null,"R DA PEDREIRA",1093,1095,{"$raw":"00000000"},"110410","R DA PEDREIRA","INOP",3,"T",159.95500,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1094,1096,{"$raw":"00000000"},"110410","MJ.3.700","INOP",3,"T",226.84114,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Principal",null,null,null,null,null,"110410",1,null,null,1095,1097,{"$raw":"00000000"},"110410","MJ.3.701","INOP",3,"T",234.00475,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1096,1098,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,78.30852,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1097,1099,{"$raw":"00000000"},"110410","MJ.3.702","INOP",3,"T",415.43862,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1098,1100,{"$raw":"00000000"},"110410","MJ.3.703","INOP",3,"T",157.50989,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1099,1101,{"$raw":"00000000"},"110410","MJ.3.704","INOP",3,"T",106.89792,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1100,1102,{"$raw":"00000000"},"110410","MJ.3.705","INOP",3,"T",228.49383,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1101,1103,{"$raw":"00000000"},"110410","MJ.3.706","INOP",3,"T",80.81707,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1102,1104,{"$raw":"00000000"},"110410","MJ.3.707","INOP",3,"T",19.03255,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1103,1105,{"$raw":"00000000"},"110410","MJ.3.708","INOP",3,"T",229.80244,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1104,1106,{"$raw":"00000000"},"110410","MJ.3.709","INOP",3,"T",19.69144,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1105,1107,{"$raw":"00000000"},"110410","MJ.3.710","INOP",3,"T",52.08165,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1106,1108,{"$raw":"00000000"},"110410","MJ.3.711","INOP",3,"T",255.44574,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1107,1109,{"$raw":"00000000"},"110410","MJ.3.712","INOP",3,"T",368.64459,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1108,1110,{"$raw":"00000000"},"110405","MJ.3.713","INOP",3,"T",52.87892,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","1036",null,null,"CM",null,"110405",1,null,"CM 1036",1109,1111,{"$raw":"00000000"},"110405","CM 1036","OPER",2,"A",277.69587,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1110,1112,{"$raw":"00000000"},"110405","MJ.3.714","INOP",3,"T",392.89014,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1111,1113,{"$raw":"00000000"},"110410","MJ.3.715","INOP",3,"T",215.78723,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1112,1114,{"$raw":"00000000"},"110410","MJ.3.716","INOP",3,"T",104.16665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1113,1115,{"$raw":"00000000"},"110405","MJ.3.717","INOP",3,"T",106.47766,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1114,1116,{"$raw":"00000000"},"110410","MJ.3.718","INOP",3,"T",139.59084,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1115,1117,{"$raw":"00000000"},"110405","MJ.3.719","INOP",3,"T",111.33465,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1116,1118,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,139.66457,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1117,1119,{"$raw":"00000000"},"110410","MJ.3.720","INOP",3,"T",4.19920,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1118,1120,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,16.47141,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1119,1121,{"$raw":"00000000"},"110405","MJ.3.721","INOP",3,"T",331.81467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1120,1122,{"$raw":"00000000"},"110410","MJ.3.722","INOP",3,"T",124.65272,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1121,1123,{"$raw":"00000000"},"110410","MJ.3.723","INOP",3,"T",180.92073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1122,1124,{"$raw":"00000000"},"110410","MJ.3.724","INOP",3,"T",310.07153,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1123,1125,{"$raw":"00000000"},"110410","MJ.3.725","INOP",3,"T",36.06148,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1124,1126,{"$raw":"00000000"},"110410","MJ.3.726","INOP",3,"T",255.51661,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1125,1127,{"$raw":"00000000"},"110410","MJ.3.727","INOP",3,"T",242.92069,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",2,null,null,1126,1128,{"$raw":"00000000"},"110408","MJ.3.728","INOP",3,"T",314.39894,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1127,1129,{"$raw":"00000000"},"110410","MJ.3.729","INOP",3,null,39.49929,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1128,1130,{"$raw":"00000000"},"110410","MJ.3.730","INOP",3,"T",318.54062,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1129,1131,{"$raw":"00000000"},"110410","MJ.3.731","INOP",3,"T",247.29800,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1130,1132,{"$raw":"00000000"},"110410","MJ.3.732","INOP",3,"T",234.07060,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1131,1133,{"$raw":"00000000"},"110405","MJ.3.733","INOP",3,"T",66.01397,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110410",2,null,null,1132,1134,{"$raw":"00000000"},"110410","MJ.3.734","INOP",3,"T",275.43442,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1133,1135,{"$raw":"00000000"},"110410","MJ.3.735","INOP",3,"T",127.60614,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1134,1136,{"$raw":"00000000"},"110410","MJ.3.736","INOP",3,"T",377.83140,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1135,1137,{"$raw":"00000000"},"110410","MJ.3.737","INOP",3,"T",200.78699,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1136,1138,{"$raw":"00000000"},"110405","MJ.3.738","INOP",3,"T",129.28134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1137,1139,{"$raw":"00000000"},"110410","MJ.3.739","INOP",3,"T",52.66083,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1138,1140,{"$raw":"00000000"},"110410","MJ.3.740","INOP",3,"T",283.97840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1139,1141,{"$raw":"00000000"},"110405","MJ.3.741","INOP",3,"T",39.49584,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1140,1142,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,18.98781,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1141,1143,{"$raw":"00000000"},"110405","MJ.3.742","INOP",3,"T",66.15578,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",2,null,null,1142,1144,{"$raw":"00000000"},"110408","MJ.3.743","INOP",3,"T",440.43593,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1143,1145,{"$raw":"00000000"},"110405","MJ.3.744","INOP",3,"T",170.33904,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1144,1146,{"$raw":"00000000"},"110410","MJ.3.745","INOP",3,"T",315.92505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1145,1147,{"$raw":"00000000"},"110410","MJ.3.746","INOP",3,"T",292.81954,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1146,1148,{"$raw":"00000000"},"110410","MJ.3.747","INOP",3,"T",78.01569,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1147,1149,{"$raw":"00000000"},"110410","MJ.3.748","INOP",3,"T",343.45048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1148,1150,{"$raw":"00000000"},"110410","MJ.3.749","INOP",3,"T",272.06591,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1149,1151,{"$raw":"00000000"},"110410","MJ.3.750","INOP",3,"T",55.76595,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1150,1152,{"$raw":"00000000"},"110410","MJ.3.751","INOP",3,"T",332.19526,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1151,1153,{"$raw":"00000000"},"110410","MJ.3.752","INOP",3,"T",334.49593,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1152,1154,{"$raw":"00000000"},"110410","MJ.3.753","INOP",3,"T",445.36906,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1153,1155,{"$raw":"00000000"},"110410","MJ.3.754","INOP",3,"T",359.45425,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1154,1156,{"$raw":"00000000"},"110410","MJ.3.755","INOP",3,"T",142.06555,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1155,1157,{"$raw":"00000000"},"110410","MJ.3.756","INOP",3,"T",413.43519,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1156,1158,{"$raw":"00000000"},"110410","MJ.3.757","INOP",3,"T",302.10406,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1157,1159,{"$raw":"00000000"},"110410","MJ.3.758","INOP",3,"T",162.02268,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1158,1160,{"$raw":"00000000"},"110410","MJ.3.759","INOP",3,"T",217.14665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1159,1161,{"$raw":"00000000"},"110410","MJ.3.760","INOP",3,"T",224.69590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,1160,1162,{"$raw":"00000000"},"110408","MJ.3.761","INOP",3,"T",125.57260,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1161,1163,{"$raw":"00000000"},"110410","MJ.3.762","INOP",3,"T",414.79672,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1162,1164,{"$raw":"00000000"},"110410","MJ.3.763","INOP",3,"T",42.94322,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1163,1165,{"$raw":"00000000"},"110410","MJ.3.764","INOP",3,"T",12.52776,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1164,1166,{"$raw":"00000000"},"110410","MJ.3.765","INOP",3,"T",324.89183,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1165,1167,{"$raw":"00000000"},"110410","MJ.3.766","INOP",3,"T",342.67764,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1166,1168,{"$raw":"00000000"},"110408","MJ.3.767","INOP",3,"T",256.09787,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1167,1169,{"$raw":"00000000"},"110410","MJ.3.768","INOP",3,"T",20.98541,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1168,1170,{"$raw":"00000000"},"110410","MJ.3.769","INOP",3,"T",212.57357,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1169,1171,{"$raw":"00000000"},"110410","MJ.3.770","INOP",3,"T",245.04391,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1170,1172,{"$raw":"00000000"},"110410","MJ.3.771","INOP",3,"T",87.87870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1171,1173,{"$raw":"00000000"},"110410","MJ.3.772","INOP",3,"T",141.22650,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1172,1174,{"$raw":"00000000"},"110410","MJ.3.773","INOP",3,"T",35.44658,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1173,1175,{"$raw":"00000000"},"110408","MJ.3.774","INOP",3,"T",57.22214,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1174,1176,{"$raw":"00000000"},"110410","MJ.3.775","INOP",3,"T",231.75099,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1175,1177,{"$raw":"00000000"},"110410","MJ.3.776","INOP",3,"T",78.25326,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1176,1178,{"$raw":"00000000"},"110408","MJ.3.777","INOP",3,"T",106.92727,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1177,1179,{"$raw":"00000000"},"110410","MJ.3.778","INOP",3,"T",166.92447,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,1178,1180,{"$raw":"00000000"},"110408","MJ.3.779","INOP",3,"T",164.98586,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110410",1,null,"R DA FONTE",1179,1181,{"$raw":"00000000"},"110410","R DA FONTE","INOP",3,"T",463.63775,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",1180,1182,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",57.11556,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1181,1183,{"$raw":"00000000"},"110408","MJ.3.780","INOP",3,"T",48.51054,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1182,1184,{"$raw":"00000000"},"110410","MJ.3.781","INOP",3,"T",121.78251,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1183,1185,{"$raw":"00000000"},"110410","MJ.3.782","INOP",3,"T",143.65825,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1184,1186,{"$raw":"00000000"},"110410","MJ.3.783","INOP",3,"T",31.99990,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1185,1187,{"$raw":"00000000"},"110410","MJ.3.784","INOP",3,"T",385.75045,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1186,1188,{"$raw":"00000000"},"110410","MJ.3.785","INOP",3,"T",132.78987,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1187,1189,{"$raw":"00000000"},"110410","MJ.3.786","INOP",3,"T",171.62866,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1188,1190,{"$raw":"00000000"},"110410","MJ.3.787","INOP",3,"T",248.01024,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1189,1191,{"$raw":"00000000"},"110410","MJ.3.788","INOP",3,"T",206.10094,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1190,1192,{"$raw":"00000000"},"110410","MJ.3.789","INOP",3,"T",238.09229,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1191,1193,{"$raw":"00000000"},"110410","MJ.3.790","INOP",3,"T",309.52514,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1192,1194,{"$raw":"00000000"},"110410","MJ.3.791","INOP",3,"T",130.38973,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1193,1195,{"$raw":"00000000"},"110410","MJ.3.792","INOP",3,"T",168.91403,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1194,1196,{"$raw":"00000000"},"110410","MJ.3.793","INOP",3,"T",3.08253,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1195,1197,{"$raw":"00000000"},"110410","MJ.3.794","INOP",3,"T",427.69533,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1196,1198,{"$raw":"00000000"},"110408","MJ.3.795","INOP",3,"T",302.70519,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110410",2,null,null,1197,1199,{"$raw":"00000000"},"110410","MJ.3.796","INOP",3,"T",273.75079,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1198,1200,{"$raw":"00000000"},"110410","MJ.3.797","INOP",3,"T",352.35460,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1199,1201,{"$raw":"00000000"},"110408","MJ.3.798","INOP",3,"T",253.32438,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1200,1202,{"$raw":"00000000"},"110410","MJ.3.799","INOP",3,"T",240.39513,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1201,1203,{"$raw":"00000000"},"110410","MJ.3.800","INOP",3,"T",37.41450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1202,1204,{"$raw":"00000000"},"110410","MJ.3.801","INOP",3,"T",50.33263,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1203,1205,{"$raw":"00000000"},"110408","MJ.3.802","INOP",3,"T",293.85497,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1204,1206,{"$raw":"00000000"},"110410","MJ.3.803","INOP",3,"T",213.63426,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1205,1207,{"$raw":"00000000"},"110410","MJ.3.804","INOP",3,"T",8.05801,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1206,1208,{"$raw":"00000000"},"110410","MJ.3.805","INOP",3,"T",380.77437,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1207,1209,{"$raw":"00000000"},"110410","MJ.3.806","INOP",3,"T",325.49024,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1208,1210,{"$raw":"00000000"},"110410","MJ.3.807","INOP",3,"T",24.36912,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1209,1211,{"$raw":"00000000"},"110410","MJ.3.808","INOP",3,"T",211.00146,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1210,1212,{"$raw":"00000000"},"110410","MJ.3.809","INOP",3,"T",77.00211,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","VIA","SD",null,null,null,null,null,null,0,null,null,1211,1213,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,64.20257,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1212,1214,{"$raw":"00000000"},"110410","MJ.3.810","INOP",3,"T",82.65549,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,null,"TV",null,"110410",1,null,"TV DOS ARNEIROS",1213,1215,{"$raw":"00000000"},"110410","TV DOS ARNEIROS","INOP",3,"T",127.42694,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1214,1216,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,239.92423,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1215,1217,{"$raw":"00000000"},"110408","MJ.3.811","INOP",3,"T",37.16945,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,1216,1218,{"$raw":"00000000"},"110408","MJ.3.812","INOP",3,"T",620.11893,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1217,1219,{"$raw":"00000000"},"110410","MJ.3.813","INOP",3,"T",228.09718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1218,1220,{"$raw":"00000000"},"110410","MJ.3.814","INOP",3,"T",272.45266,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1219,1221,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,29.83873,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1220,1222,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,45.01966,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1221,1223,{"$raw":"00000000"},"110410","MJ.3.815","INOP",3,"T",144.65432,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1222,1224,{"$raw":"00000000"},"110410","MJ.3.816","INOP",3,"T",314.73115,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1223,1225,{"$raw":"00000000"},"110410","MJ.3.817","INOP",3,"T",159.36196,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1224,1226,{"$raw":"00000000"},"110408","MJ.3.818","INOP",3,"T",75.37328,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1225,1227,{"$raw":"00000000"},"110408","MJ.3.819","INOP",3,"T",266.47987,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1226,1228,{"$raw":"00000000"},"110408","MJ.3.820","INOP",3,"T",337.55829,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1227,1229,{"$raw":"00000000"},"110408","MJ.2.84","OPER",2,"A",55.78899,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1228,1230,{"$raw":"00000000"},"110410","MJ.3.821","INOP",3,"T",395.58182,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1229,1231,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,86.43229,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1230,1232,{"$raw":"00000000"},"110408","MJ.3.822","INOP",3,"T",243.50281,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1231,1233,{"$raw":"00000000"},"110408","MJ.2.85","OPER",2,"A",477.72733,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1232,1234,{"$raw":"00000000"},"110410","MJ.3.823","INOP",3,"T",129.62116,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1233,1235,{"$raw":"00000000"},"110410","MJ.3.824","INOP",3,"T",271.69572,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1234,1236,{"$raw":"00000000"},"110410","MJ.3.825","INOP",3,"T",106.10226,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1235,1237,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,211.43787,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SOL",null,"26 ago 2003","R",null,"110410",1,null,"R DO SOL",1236,1238,{"$raw":"00000000"},"110410","R DO SOL","OPER",2,"A",180.26639,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1237,1239,{"$raw":"00000000"},"110410","MJ.3.826","INOP",3,"T",296.12870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1238,1240,{"$raw":"00000000"},"110410","MJ.3.827","INOP",3,"T",167.15804,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1239,1241,{"$raw":"00000000"},"110410","MJ.3.828","INOP",3,"T",322.53743,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1240,1242,{"$raw":"00000000"},"110410","MJ.3.829","INOP",3,"T",67.32945,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1241,1243,{"$raw":"00000000"},"110410","MJ.3.830","INOP",3,"T",10.18072,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1242,1244,{"$raw":"00000000"},"110408","MJ.3.831","INOP",3,"T",49.04772,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1243,1245,{"$raw":"00000000"},"110410","MJ.3.832","INOP",3,"T",567.76359,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1244,1246,{"$raw":"00000000"},"110408","MJ.3.833","INOP",3,"T",94.76549,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA RESTAURAÇÃO",null,null,"AV",null,"110410",1,null,"AV DA RESTAURAÇÃO",1245,1247,{"$raw":"00000000"},"110410","AV DA RESTAURAÇÃO","OPER",2,"A",32.98080,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1246,1248,{"$raw":"00000000"},"110410","MJ.3.834","INOP",3,"T",73.80762,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1247,1249,{"$raw":"00000000"},"110410","MJ.3.835","INOP",3,"T",211.79541,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1248,1250,{"$raw":"00000000"},"110410","MJ.3.836","INOP",3,"T",293.34585,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1249,1251,{"$raw":"00000000"},"110410","MJ.3.837","INOP",3,"T",225.38513,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1250,1252,{"$raw":"00000000"},"110410","MJ.3.838","INOP",3,"T",50.79452,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","VIA","SD",null,null,null,null,null,"110410",1,null,null,1251,1253,{"$raw":"00000000"},"110410","MJ.3.839","INOP",3,"T",44.20593,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1252,1254,{"$raw":"00000000"},"110408","MJ.3.840","INOP",3,"T",164.88660,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1253,1255,{"$raw":"00000000"},"110408","MJ.2.86","OPER",2,"A",449.87836,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1",null,null,"DA BICA",null,null,"R",null,"110410",1,null,"R DA BICA",1254,1256,{"$raw":"00000000"},"110410","R DA BICA","INOP",3,"T",89.81731,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,null,"R",null,"110410",1,null,"R DA BICA",1255,1257,{"$raw":"00000000"},"110410","R DA BICA","INOP",3,"T",12.92808,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",1256,1258,{"$raw":"00000000"},"110410","R DAS FLORES","INOP",3,"T",37.71795,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1257,1259,{"$raw":"00000000"},"110410","MJ.3.841","INOP",3,"T",34.70021,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1258,1260,{"$raw":"00000000"},"110408","MJ.3.842","INOP",3,"T",88.89266,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1259,1261,{"$raw":"00000000"},"110408","MJ.3.843","INOP",3,"T",68.28848,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1260,1262,{"$raw":"00000000"},"110410","MJ.3.844","INOP",3,"T",170.08255,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1261,1263,{"$raw":"00000000"},"110410","MJ.3.845","INOP",3,"T",68.12485,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1262,1264,{"$raw":"00000000"},"110410","MJ.3.846","INOP",3,"T",169.54897,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1263,1265,{"$raw":"00000000"},"110408","MJ.3.847","INOP",3,"T",120.65602,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1264,1266,{"$raw":"00000000"},"110408","MJ.3.848","INOP",3,"T",235.06061,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO DA AMÉLIA","processo nº 01/2010/246","4 jan 2011","R",null,"110410",1,null,"R DO MOINHO DA AMÉLIA",1265,1267,{"$raw":"00000000"},"110410","R DO MOINHO DA AMÉLIA","INOP",3,"T",143.03424,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1266,1268,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,110.37808,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1267,1269,{"$raw":"00000000"},"110410","MJ.3.849","INOP",3,"T",104.78835,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1268,1270,{"$raw":"00000000"},"110410","MJ.3.850","INOP",3,"T",76.55434,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1269,1271,{"$raw":"00000000"},"110410","MJ.3.851","INOP",3,"T",376.16015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1270,1272,{"$raw":"00000000"},"110408","MJ.3.852","INOP",3,"T",60.74393,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1271,1273,{"$raw":"00000000"},"110408","MJ.3.853","INOP",3,"T",279.83401,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1272,1274,{"$raw":"00000000"},"110408","MJ.3.854","INOP",3,"T",347.75046,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1273,1275,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,30.17478,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1274,1276,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,270.41426,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1275,1277,{"$raw":"00000000"},"110410","MJ.3.855","INOP",3,"T",43.43871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1276,1278,{"$raw":"00000000"},"110408","MJ.2.87","OPER",2,"A",334.08177,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1277,1279,{"$raw":"00000000"},"110410","MJ.3.856","INOP",3,"T",11.37845,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110410",1,null,null,1278,1280,{"$raw":"00000000"},"110410","MJ.3.857","INOP",3,"T",316.43202,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1279,1281,{"$raw":"00000000"},"110410","MJ.3.858","INOP",3,"T",489.21529,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO DA AMÉLIA","processo nº 01/2010/246","4 Jan 2011","R",null,"110410",1,null,"R DO MOINHO DA AMÉLIA",1280,1282,{"$raw":"00000000"},"110410","R DO MOINHO DA AMÉLIA","INOP",3,"T",157.38278,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1281,1283,{"$raw":"00000000"},"110410","MJ.3.859","INOP",3,"T",310.41921,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1282,1284,{"$raw":"00000000"},"110410","MJ.3.860","INOP",3,"T",135.65549,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1283,1285,{"$raw":"00000000"},"110410","MJ.3.861","INOP",3,null,55.66690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1284,1286,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,251.80145,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1285,1287,{"$raw":"00000000"},"110410","MJ.3.862","INOP",3,"T",88.56387,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1286,1288,{"$raw":"00000000"},"110410","MJ.3.863","INOP",3,"T",261.36336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1287,1289,{"$raw":"00000000"},"110410","MJ.3.864","INOP",3,"T",338.14564,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1288,1290,{"$raw":"00000000"},"110408","MJ.3.865","INOP",3,"T",225.38140,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1289,1291,{"$raw":"00000000"},"110410","MJ.3.866","INOP",3,"T",279.38159,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1290,1292,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,59.93935,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1291,1293,{"$raw":"00000000"},"110408","MJ.3.867","INOP",3,"T",43.38109,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1292,1294,{"$raw":"00000000"},"110408","MJ.3.868","INOP",3,"T",90.56597,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1293,1295,{"$raw":"00000000"},"110408","MJ.3.869","INOP",3,"T",224.21192,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1294,1296,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,129.83772,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1295,1297,{"$raw":"00000000"},"110410","MJ.3.870","INOP",3,"T",120.49985,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1296,1298,{"$raw":"00000000"},"110410","MJ.3.871","INOP",3,"T",403.79435,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1297,1299,{"$raw":"00000000"},"110410","MJ.3.872","INOP",3,"T",200.31760,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1298,1300,{"$raw":"00000000"},"110410","MJ.3.873","INOP",3,"T",17.76532,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1299,1301,{"$raw":"00000000"},"110410","MJ.3.874","INOP",3,"T",302.69109,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1300,1302,{"$raw":"00000000"},"110408","MJ.3.875","INOP",3,"T",211.49592,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1301,1303,{"$raw":"00000000"},"110410","MJ.3.876","INOP",3,"T",145.65817,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1302,1304,{"$raw":"00000000"},"110410","MJ.3.877","INOP",3,"T",338.22938,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1303,1305,{"$raw":"00000000"},"110410","MJ.3.878","INOP",3,"T",95.54218,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1304,1306,{"$raw":"00000000"},"110410","MJ.3.879","INOP",3,"T",79.66209,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1305,1307,{"$raw":"00000000"},"110408","MJ.3.880","INOP",3,"T",253.38529,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1306,1308,{"$raw":"00000000"},"110408","MJ.3.881","INOP",3,"T",259.42758,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1307,1309,{"$raw":"00000000"},"110410","MJ.3.882","INOP",3,"T",268.66441,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1308,1310,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,73.31155,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1309,1311,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,279.18283,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1310,1312,{"$raw":"00000000"},"110410","MJ.3.883","INOP",3,"T",99.36535,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1311,1313,{"$raw":"00000000"},"110410","MJ.3.884","INOP",3,"T",45.44037,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1312,1314,{"$raw":"00000000"},"110410","MJ.3.885","INOP",3,"T",326.53486,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1313,1315,{"$raw":"00000000"},"110408","MJ.3.886","INOP",3,"T",258.34667,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1314,1316,{"$raw":"00000000"},"110408","MJ.3.887","INOP",3,"T",487.15778,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1315,1317,{"$raw":"00000000"},"110408","MJ.3.888","INOP",3,"T",430.60212,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1316,1318,{"$raw":"00000000"},"110408","MJ.2.88","OPER",2,"A",331.03978,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1317,1319,{"$raw":"00000000"},"110408","MJ.2.89","OPER",2,"A",323.73757,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1318,1320,{"$raw":"00000000"},"110410","MJ.3.889","INOP",3,"T",23.36261,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1319,1321,{"$raw":"00000000"},"110410","MJ.3.890","INOP",3,"T",69.22062,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1320,1322,{"$raw":"00000000"},"110410","MJ.3.891","INOP",3,"T",136.47456,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ROMEIRA",null,"26 ago 2003","R",null,"110410",1,null,"R DA ROMEIRA",1321,1323,{"$raw":"00000000"},"110410","R DA ROMEIRA","INOP",3,"T",13.72184,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,"26 ago 2003","EN",null,"110410",1,null,"EN 115",1322,1324,{"$raw":"00000000"},"110410","EN 115","OPER",1,"A",124.33116,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARMO",null,null,"R",null,"110410",1,null,"R DO CARMO",1323,1325,{"$raw":"00000000"},"110410","R DO CARMO","INOP",3,"T",12.44313,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO HENRIQUES",null,null,"LG",null,"110410",1,null,"LG JOÃO HENRIQUES",1324,1326,{"$raw":"00000000"},"110410","LG JOÃO HENRIQUES","INOP",3,"T",10.88293,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FERNANDO JOSÉ RUSSO",null,"02 Dez 2003","R",null,"110405",1,null,"R FERNANDO JOSÉ RUSSO",1325,1327,{"$raw":"00000000"},"110405","R FERNANDO JOSÉ RUSSO","OPER",1,"A",109.26036,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO NORTE",null,null,"BC",null,"110405",1,null,"BC DO NORTE",1326,1328,{"$raw":"00000000"},"110405","BC DO NORTE","INOP",3,"T",38.40059,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1327,1329,{"$raw":"00000000"},"110410","MJ.3.892","INOP",3,"T",25.94455,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1328,1330,{"$raw":"00000000"},"110410","MJ.3.893","INOP",3,"T",254.99022,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1329,1331,{"$raw":"00000000"},"110408","MJ.3.894","INOP",3,"T",57.96678,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1330,1332,{"$raw":"00000000"},"110408","MJ.3.895","INOP",3,"T",284.76628,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1331,1333,{"$raw":"00000000"},"110408","MJ.3.896","INOP",3,"T",495.73068,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1332,1334,{"$raw":"00000000"},"110410","MJ.3.897","INOP",3,"T",205.60496,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1333,1335,{"$raw":"00000000"},"110410","MJ.3.898","INOP",3,"T",75.85303,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1334,1336,{"$raw":"00000000"},"110410","MJ.3.899","INOP",3,"T",282.01542,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1335,1337,{"$raw":"00000000"},"110410","MJ.3.900","INOP",3,"T",25.52007,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1336,1338,{"$raw":"00000000"},"110410","MJ.3.901","INOP",3,"T",287.39998,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1337,1339,{"$raw":"00000000"},"110408","MJ.3.902","INOP",3,"T",200.62683,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1338,1340,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,327.28919,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1339,1341,{"$raw":"00000000"},"110410","MJ.3.903","INOP",3,"T",134.61264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1340,1342,{"$raw":"00000000"},null,"MJ.3.904",null,3,"T",116.59944,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1341,1343,{"$raw":"00000000"},"110410","MJ.3.905","INOP",3,"T",327.32881,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1342,1344,{"$raw":"00000000"},"110408","MJ.3.906","INOP",3,"T",54.25617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1343,1345,{"$raw":"00000000"},"110408","MJ.3.907","INOP",3,"T",280.03210,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1344,1346,{"$raw":"00000000"},"110408","MJ.3.908","INOP",3,"T",97.52937,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1345,1347,{"$raw":"00000000"},"110408","MJ.3.909","INOP",3,"T",291.78263,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1346,1348,{"$raw":"00000000"},"110410","MJ.3.910","INOP",3,"T",131.35402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1347,1349,{"$raw":"00000000"},"110410","MJ.3.911","INOP",3,"T",127.02264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1348,1350,{"$raw":"00000000"},"110410","MJ.3.912","INOP",3,"T",186.43778,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1349,1351,{"$raw":"00000000"},"110410","MJ.3.913","INOP",3,"T",7.65610,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1350,1352,{"$raw":"00000000"},"110410","MJ.3.914","INOP",3,"T",263.32544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1351,1353,{"$raw":"00000000"},"110408","MJ.2.90","OPER",2,"A",150.91496,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1352,1354,{"$raw":"00000000"},"110408","MJ.2.91","OPER",2,"A",201.94322,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,1353,1355,{"$raw":"00000000"},"110408","MJ.2.92","OPER",2,"A",396.25082,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1354,1356,{"$raw":"00000000"},"110410","MJ.3.915","INOP",3,"T",277.85078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1355,1357,{"$raw":"00000000"},"110410","MJ.3.916","INOP",3,"T",229.06998,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1356,1358,{"$raw":"00000000"},"110410","MJ.3.917","INOP",3,"T",213.09188,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1357,1359,{"$raw":"00000000"},"110410","MJ.3.918","INOP",3,"T",257.98149,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1358,1360,{"$raw":"00000000"},"110410","MJ.3.919","INOP",3,"T",257.54194,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1359,1361,{"$raw":"00000000"},"110408","MJ.3.920","INOP",3,"T",291.48176,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1360,1362,{"$raw":"00000000"},"110408","MJ.3.921","INOP",3,"T",272.35471,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,1361,1363,{"$raw":"00000000"},"110408","MJ.3.922","INOP",3,"T",218.49792,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1362,1364,{"$raw":"00000000"},"110408","MJ.2.93","OPER",2,"A",182.95212,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1363,1365,{"$raw":"00000000"},"110408","MJ.2.94","OPER",2,"A",370.80393,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1364,1366,{"$raw":"00000000"},"110408","MJ.2.95","OPER",2,"A",142.43714,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1365,1367,{"$raw":"00000000"},"110408","MJ.3.923","INOP",3,"T",82.68147,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1366,1368,{"$raw":"00000000"},"110408","MJ.3.924","INOP",3,"T",325.41642,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1367,1369,{"$raw":"00000000"},"110410","MJ.3.925","INOP",3,"T",158.33588,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1368,1370,{"$raw":"00000000"},"110410","MJ.3.926","INOP",3,"T",164.86567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1369,1371,{"$raw":"00000000"},"110410","MJ.3.927","INOP",3,"T",348.86105,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1370,1372,{"$raw":"00000000"},"110410","MJ.3.928","INOP",3,"T",27.54245,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1371,1373,{"$raw":"00000000"},"110408","MJ.2.96","OPER",2,"A",69.29699,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1372,1374,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,233.11825,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1373,1375,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,303.65033,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1374,1376,{"$raw":"00000000"},"110408","MJ.2.97","OPER",2,"A",414.09690,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1375,1377,{"$raw":"00000000"},"110408","MJ.3.929","INOP",3,"T",541.81534,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1376,1378,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,152.90792,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1377,1379,{"$raw":"00000000"},"110408","MJ.2.98","OPER",2,"A",206.83805,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1378,1380,{"$raw":"00000000"},"110408","MJ.2.99","OPER",2,"A",231.12881,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1379,1381,{"$raw":"00000000"},"110408","MJ.2.100","OPER",2,"A",153.38859,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1380,1382,{"$raw":"00000000"},"110408","MJ.3.930","INOP",3,null,484.59843,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1381,1383,{"$raw":"00000000"},"110408","MJ.3.931","INOP",3,"T",206.74647,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1382,1384,{"$raw":"00000000"},"110408","MJ.2.101","OPER",2,"A",131.37959,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1383,1385,{"$raw":"00000000"},"110408","MJ.2.102","OPER",2,"A",317.44790,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1384,1386,{"$raw":"00000000"},"110410","MJ.3.932","INOP",3,"T",325.49129,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1385,1387,{"$raw":"00000000"},"110410","MJ.3.933","INOP",3,"T",16.49844,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1386,1388,{"$raw":"00000000"},"110410","MJ.3.934","INOP",3,"T",272.09724,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1387,1389,{"$raw":"00000000"},"110408","MJ.3.935","INOP",3,"T",202.14442,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1388,1390,{"$raw":"00000000"},"110408","MJ.3.936","INOP",3,"T",378.78720,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1389,1391,{"$raw":"00000000"},"110408","MJ.3.937","INOP",3,"T",162.25814,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1390,1392,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,268.08314,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1391,1393,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,27.58199,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1392,1394,{"$raw":"00000000"},"110408","MJ.3.938","INOP",3,"T",83.49680,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1393,1395,{"$raw":"00000000"},"110408","MJ.3.939","INOP",3,"T",98.94559,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1394,1396,{"$raw":"00000000"},"110410","MJ.3.940","INOP",3,"T",404.07289,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1395,1397,{"$raw":"00000000"},"110408","MJ.2.103","OPER",2,"A",245.82533,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1396,1398,{"$raw":"00000000"},"110408","MJ.3.941","INOP",3,"T",85.25665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1397,1399,{"$raw":"00000000"},"110408","MJ.2.104","OPER",2,"A",326.99161,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1398,1400,{"$raw":"00000000"},"110408","MJ.2.105","OPER",2,"A",280.80438,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1399,1401,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,112.95914,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1400,1402,{"$raw":"00000000"},"110410","MJ.3.942","INOP",3,"T",157.18347,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1401,1403,{"$raw":"00000000"},"110410","MJ.3.943","INOP",3,"T",308.56103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO HENRIQUES",null,null,"LG",null,"110410",1,null,"LG JOÃO HENRIQUES",1402,1404,{"$raw":"00000000"},"110410","LG JOÃO HENRIQUES","OPER",2,"A",23.81361,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1403,1405,{"$raw":"00000000"},"110408","MJ.3.944","INOP",2,"T",53.92514,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1404,1406,{"$raw":"00000000"},"110408","MJ.2.106","OPER",2,"A",417.56708,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1405,1407,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,364.74434,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1406,1408,{"$raw":"00000000"},"110408","MJ.2.107","INOP",2,"T",142.83940,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1407,1409,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,143.69480,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1408,1410,{"$raw":"00000000"},"110408","MJ.2.108","OPER",2,"A",86.14618,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1409,1411,{"$raw":"00000000"},"110410","MJ.3.945","INOP",3,"T",189.13337,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1410,1412,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,312.74393,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1411,1413,{"$raw":"00000000"},"110410","MJ.3.946","INOP",3,"T",40.18335,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1412,1414,{"$raw":"00000000"},"110410","MJ.3.947","INOP",3,"T",366.76254,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1413,1415,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,104.89050,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1414,1416,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,25.33587,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1415,1417,{"$raw":"00000000"},"110408","MJ.3.948","INOP",3,"T",311.45049,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1416,1418,{"$raw":"00000000"},"110408","MJ.3.949","INOP",3,"T",36.48615,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1417,1419,{"$raw":"00000000"},"110410","MJ.2.109","OPER",2,"A",354.83230,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1418,1420,{"$raw":"00000000"},"110408","MJ.2.110","OPER",2,"A",69.47182,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1419,1421,{"$raw":"00000000"},"110408","MJ.3.950","INOP",3,"T",253.62581,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1420,1422,{"$raw":"00000000"},"110408","MJ.2.111","OPER",2,"A",143.18931,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1421,1423,{"$raw":"00000000"},"110408","MJ.2.112","OPER",2,"A",83.45508,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1422,1424,{"$raw":"00000000"},"110408","MJ.2.113","OPER",2,"A",662.12608,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1423,1425,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,235.63245,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1424,1426,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,328.59050,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1425,1427,{"$raw":"00000000"},"110410","MJ.2.114","OPER",2,"A",100.00340,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1426,1428,{"$raw":"00000000"},"110408","MJ.3.951","INOP",3,"T",155.03423,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1427,1429,{"$raw":"00000000"},"110408","MJ.3.952","INOP",3,"T",352.83796,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1428,1430,{"$raw":"00000000"},"110410","MJ.2.115","OPER",2,"A",163.76070,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1429,1431,{"$raw":"00000000"},"110408","MJ.2.116","OPER",2,"A",268.77605,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1430,1432,{"$raw":"00000000"},"110408","MJ.3.953","INOP",3,"T",148.03994,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1431,1433,{"$raw":"00000000"},"110408","MJ.3.954","INOP",3,"T",365.59883,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1432,1434,{"$raw":"00000000"},"110408","MJ.3.955","INOP",3,"T",85.66157,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1433,1435,{"$raw":"00000000"},"110408","MJ.3.956","INOP",3,"T",317.44467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1434,1436,{"$raw":"00000000"},"110408","MJ.3.957","INOP",3,"T",401.91429,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1435,1437,{"$raw":"00000000"},"110408","MJ.2.117","OPER",2,"A",560.71996,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1436,1438,{"$raw":"00000000"},"110410","MJ.3.958","INOP",3,"T",212.19321,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1437,1439,{"$raw":"00000000"},"110405","MJ.3.959","INOP",3,"T",14.19877,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1438,1440,{"$raw":"00000000"},"110405","MJ.3.960","INOP",3,"T",15.93177,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1439,1441,{"$raw":"00000000"},"110405","MJ.3.961","INOP",3,"T",1.30599,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1440,1442,{"$raw":"00000000"},"110405","MJ.3.962","INOP",3,"T",21.35844,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1441,1443,{"$raw":"00000000"},"110405","MJ.3.963","INOP",3,"T",48.85101,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1442,1444,{"$raw":"00000000"},"110405","MJ.3.964","INOP",3,"T",72.30702,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,null,"BR",null,"110405",1,null,"BR DA BOAVISTA",1443,1445,{"$raw":"00000000"},"110405","BR DA BOAVISTA","OPER",1,"A",80.02168,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1444,1446,{"$raw":"00000000"},"110410","MJ.2.118","OPER",2,"A",62.08958,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1445,1447,{"$raw":"00000000"},"110410","MJ.2.119","OPER",2,"A",2.69017,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1446,1448,{"$raw":"00000000"},"110410","MJ.3.965","INOP",3,"T",88.02829,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1447,1449,{"$raw":"00000000"},"110410","MJ.3.966","INOP",3,"T",98.22854,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1448,1450,{"$raw":"00000000"},"110410","MJ.3.967","INOP",3,"T",29.46416,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1449,1451,{"$raw":"00000000"},"110410","MJ.3.968","INOP",3,"T",22.16830,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1450,1452,{"$raw":"00000000"},"110410","MJ.3.969","INOP",3,"T",337.11445,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1451,1453,{"$raw":"00000000"},"110410","MJ.3.970","INOP",3,"T",26.68164,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1452,1454,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,63.97051,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1453,1455,{"$raw":"00000000"},"110410","MJ.3.971","INOP",3,"T",254.48226,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1454,1456,{"$raw":"00000000"},"110410","MJ.3.972","INOP",3,"T",49.27650,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1455,1457,{"$raw":"00000000"},"110410","MJ.3.973","INOP",3,"T",3.41621,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1456,1458,{"$raw":"00000000"},"110410","MJ.3.974","INOP",3,"T",6.90254,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1457,1459,{"$raw":"00000000"},"110410","MJ.3.975","INOP",3,"T",34.70649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1458,1460,{"$raw":"00000000"},"110410","MJ.3.976","INOP",3,"T",10.92568,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1459,1461,{"$raw":"00000000"},"110410","MJ.3.977","INOP",3,"T",83.36342,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1460,1462,{"$raw":"00000000"},"110410","MJ.3.978","INOP",3,"T",38.57139,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1461,1463,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,12.19628,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1462,1464,{"$raw":"00000000"},"110410","MJ.3.979","INOP",3,"T",66.71944,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1463,1465,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,62.91138,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1464,1466,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,71.24797,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1465,1467,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,112.15884,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1466,1468,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,13.22313,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1467,1469,{"$raw":"00000000"},"110410","MJ.3.980","INOP",3,"T",2.57934,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1468,1470,{"$raw":"00000000"},"110410","MJ.3.981","INOP",3,"T",118.54519,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1469,1471,{"$raw":"00000000"},"110410","MJ.3.982","INOP",3,"T",2.81576,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1470,1472,{"$raw":"00000000"},"110410","MJ.3.983","INOP",3,"T",76.85595,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110405",1,null,"CM 1043",1471,1473,{"$raw":"00000000"},"110405","CM 1043","OPER",2,"A",108.49332,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110405",1,null,"CM 1043",1472,1474,{"$raw":"00000000"},"110405","CM 1043","OPER",2,"A",468.95852,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1",null,null,"DA ESCOLA",null,null,"R",null,"110402",1,null,"R DA ESCOLA",1473,1475,{"$raw":"00000000"},"110402","R DA ESCOLA","INOP",3,"T",49.85918,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FELICIDADE",null,null,"R",null,"110405",1,null,"R DA FELICIDADE",1474,1476,{"$raw":"00000000"},"110405","R DA FELICIDADE","OPER",2,"A",88.56830,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",1475,1477,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",85.78243,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","1042",null,null,"CM",null,"110410",1,null,"CM 1042",1476,1478,{"$raw":"00000000"},"110410","CM 1042","OPER",2,"A",111.98205,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","570-1",null,null,"EM",null,"110408",1,null,"EM 570-1",1477,1479,{"$raw":"00000000"},"110408","EM 570-1","OPER",1,"A",369.10435,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1478,1480,{"$raw":"00000000"},"110410","MJ.3.984","INOP",3,"T",45.26283,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1479,1481,{"$raw":"00000000"},"110410","MJ.2.120","OPER",2,"A",2.56258,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1480,1482,{"$raw":"00000000"},"110410","MJ.3.985","INOP",3,"T",83.07046,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1481,1483,{"$raw":"00000000"},"110410","MJ.3.986","INOP",3,"T",2.91440,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1482,1484,{"$raw":"00000000"},"110410","MJ.3.987","INOP",3,"T",3.38733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1483,1485,{"$raw":"00000000"},"110410","MJ.3.988","INOP",3,"T",29.96686,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1484,1486,{"$raw":"00000000"},"110410","MJ.3.989","INOP",3,"T",18.78959,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1485,1487,{"$raw":"00000000"},"110410","MJ.3.990","INOP",3,"T",29.73774,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1486,1488,{"$raw":"00000000"},"110410","MJ.2.121","OPER",2,"A",2.67675,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1487,1489,{"$raw":"00000000"},"110410","MJ.2.122","OPER",2,"A",2.62688,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1488,1490,{"$raw":"00000000"},"110410","MJ.3.991","INOP",3,"T",101.48575,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1489,1491,{"$raw":"00000000"},"110410","MJ.3.992","INOP",3,"T",4.52637,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1490,1492,{"$raw":"00000000"},"110410","MJ.2.123","OPER",2,"A",2.26294,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110410",1,null,null,1491,1493,{"$raw":"00000000"},"110410","MJ.3.993","INOP",3,"T",81.40624,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1492,1494,{"$raw":"00000000"},"110410","MJ.3.994","INOP",3,"T",63.01963,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1493,1495,{"$raw":"00000000"},"110410","MJ.3.995","INOP",3,"T",3.75868,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1494,1496,{"$raw":"00000000"},"110410","MJ.3.996","INOP",3,"T",3.43424,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1495,1497,{"$raw":"00000000"},"110410","MJ.3.997","INOP",3,"T",46.13167,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO MOURISCO",null,null,"R",null,"110410",1,null,"R DO OUTEIRO MOURISCO",1496,1498,{"$raw":"00000000"},"110410","R DO OUTEIRO MOURISCO","INOP",3,"T",75.35452,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1497,1499,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,51.21709,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1498,1500,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,33.67496,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1499,1501,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,183.51963,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1500,1502,{"$raw":"00000000"},"110410","MJ.3.998","INOP",3,"T",72.70629,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","VIA","SD",null,null,null,null,null,"110410",1,null,null,1501,1503,{"$raw":"00000000"},"110410","MJ.3.999","INOP",3,"T",150.29547,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1502,1504,{"$raw":"00000000"},"110410","MJ.3.1000","INOP",3,"T",7.24570,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1503,1505,{"$raw":"00000000"},"110410","MJ.3.1001","INOP",3,"T",9.24899,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1504,1506,{"$raw":"00000000"},"110410","MJ.3.1002","INOP",3,"T",184.68265,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1505,1507,{"$raw":"00000000"},"110410","MJ.3.1003","INOP",3,"T",44.81708,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1506,1508,{"$raw":"00000000"},"110410","MJ.3.1004","INOP",3,"T",12.25457,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1507,1509,{"$raw":"00000000"},"110410","MJ.3.1005","INOP",3,"T",12.02015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1508,1510,{"$raw":"00000000"},"110410","MJ.3.1006","INOP",3,"T",158.99539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1509,1511,{"$raw":"00000000"},"110410","MJ.3.1007","INOP",3,"T",135.35400,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1510,1512,{"$raw":"00000000"},"110410","MJ.3.1008","INOP",3,"T",6.61223,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1511,1513,{"$raw":"00000000"},"110410","MJ.3.1009","INOP",3,"T",12.47734,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1512,1514,{"$raw":"00000000"},"110410","MJ.3.1010","INOP",3,"T",21.83022,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1513,1515,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.60342,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1514,1516,{"$raw":"00000000"},"110410","MJ.3.1011","INOP",3,"T",130.41249,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1515,1517,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.50912,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1516,1518,{"$raw":"00000000"},"110410","MJ.3.1012","INOP",3,"T",102.57125,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1517,1519,{"$raw":"00000000"},"110410","MJ.1.28","OPER",1,"A",3.95034,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1518,1520,{"$raw":"00000000"},"110410","MJ.3.1013","INOP",3,"T",64.88882,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1519,1521,{"$raw":"00000000"},"110410","MJ.3.1014","INOP",3,"T",81.99481,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1520,1522,{"$raw":"00000000"},"110410","MJ.3.1015","INOP",3,"T",158.97732,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1521,1523,{"$raw":"00000000"},"110410","MJ.3.1016","INOP",3,"T",226.07293,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1522,1524,{"$raw":"00000000"},"110410","MJ.3.1017","INOP",3,"T",2.70254,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1523,1525,{"$raw":"00000000"},"110410","MJ.3.1018","INOP",3,"T",39.45336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ANDRÉS",null,null,"R",null,"110410",1,null,"R DOS ANDRÉS",1524,1526,{"$raw":"00000000"},"110410","R DOS ANDRÉS","INOP",3,"T",45.88072,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1525,1527,{"$raw":"00000000"},"110410","MJ.3.1019","INOP",3,"T",22.33926,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA RESTAURAÇÃO",null,null,"AV",null,"110410",1,null,"AV DA RESTAURAÇÃO",1526,1528,{"$raw":"00000000"},"110410","AV DA RESTAURAÇÃO","INOP",3,"T",32.61114,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA RESTAURAÇÃO",null,null,"AV",null,"110410",1,null,"AV DA RESTAURAÇÃO",1527,1529,{"$raw":"00000000"},"110410","AV DA RESTAURAÇÃO","INOP",3,"T",17.02629,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA RESTAURAÇÃO",null,null,"AV",null,"110410",1,null,"AV DA RESTAURAÇÃO",1528,1530,{"$raw":"00000000"},"110410","AV DA RESTAURAÇÃO","INOP",3,"T",38.59165,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO DA AMÉLIA","processo nº 01/2010/246","4 jan 2011","R",null,"110410",1,null,"R DO MOINHO DA AMÉLIA",1529,1531,{"$raw":"00000000"},"110410","R DO MOINHO DA AMÉLIA","INOP",3,"T",36.57395,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1530,1532,{"$raw":"00000000"},"110410","MJ.3.1020","INOP",3,"T",61.92214,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1531,1533,{"$raw":"00000000"},"110410","MJ.3.1021","INOP",3,"T",64.25205,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1532,1534,{"$raw":"00000000"},"110410","MJ.3.1022","INOP",3,"T",145.92378,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BONJARDIM",null,null,"TV",null,"110410",1,null,"TV DO BONJARDIM",1533,1535,{"$raw":"00000000"},"110410","TV DO BONJARDIM","OPER",2,"A",78.75387,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA RESTAURAÇÃO",null,null,"AV",null,"110410",1,null,"AV DA RESTAURAÇÃO",1534,1536,{"$raw":"00000000"},"110410","AV DA RESTAURAÇÃO","OPER",2,null,85.24448,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA RESTAURAÇÃO",null,null,"AV",null,"110410",1,null,"AV DA RESTAURAÇÃO",1535,1537,{"$raw":"00000000"},"110410","AV DA RESTAURAÇÃO","OPER",2,"A",234.44267,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","DO COMÉRCIO",null,null,"R",null,"110410",1,null,"R DO COMÉRCIO",1536,1538,{"$raw":"00000000"},"110410","R DO COMÉRCIO","OPER",2,"A",89.12389,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","1044",null,null,"CM",null,"110405",1,null,"CM 1044",1537,1539,{"$raw":"00000000"},"110405","CM 1044","OPER",2,"A",110.81712,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1",null,null,"DA CHOPA",null,null,"R",null,"110410",1,null,"R DA CHOPA",1538,1540,{"$raw":"00000000"},"110410","R DA CHOPA","INOP",3,"T",59.58262,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL CARROTO",null,null,"TV",null,"110410",1,null,"TV DO CASAL CARROTO",1539,1541,{"$raw":"00000000"},"110410","TV DO CASAL CARROTO","INOP",3,"T",72.88188,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL VALE CARROTO",null,"26 ago 2003","R",null,"110410",1,null,"R CASAL VALE CARROTO",1540,1542,{"$raw":"00000000"},"110410","R CASAL VALE CARROTO","INOP",3,"T",195.22774,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1541,1543,{"$raw":"00000000"},"110410","MJ.1.29","OPER",1,"A",3.53836,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1542,1544,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.00000,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1543,1545,{"$raw":"00000000"},"110410","MJ.3.1023","INOP",3,"T",174.66602,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",1544,1546,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","INOP",3,"T",299.77801,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1545,1547,{"$raw":"00000000"},"110410","MJ.3.1024","INOP",3,"T",111.07848,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1546,1548,{"$raw":"00000000"},"110410","MJ.3.1025","INOP",3,"T",31.12530,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1547,1549,{"$raw":"00000000"},"110405","MJ.3.1026","INOP",3,"T",4.71510,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1548,1550,{"$raw":"00000000"},"110410","MJ.3.1027","INOP",3,"T",20.86974,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1549,1551,{"$raw":"00000000"},"110410","MJ.3.1028","INOP",3,"T",75.83199,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1550,1552,{"$raw":"00000000"},"110410","MJ.3.1029","INOP",3,"T",178.14655,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1551,1553,{"$raw":"00000000"},"110405","MJ.3.1030","INOP",3,"T",39.07032,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1552,1554,{"$raw":"00000000"},"110405","MJ.2.124","OPER",2,"A",38.86390,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1553,1555,{"$raw":"00000000"},"110405","MJ.1.30","OPER",1,"A",1.91930,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1554,1556,{"$raw":"00000000"},"110405","MJ.1.31","OPER",1,"A",84.54831,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1555,1557,{"$raw":"00000000"},"110405","MJ.3.1031","INOP",3,"T",3.00088,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1556,1558,{"$raw":"00000000"},"110405","MJ.3.1032","INOP",3,"T",10.80956,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1557,1559,{"$raw":"00000000"},"110405","MJ.3.1033","INOP",3,"T",64.07228,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1558,1560,{"$raw":"00000000"},"110405","MJ.3.1034","INOP",3,"T",3.32605,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1559,1561,{"$raw":"00000000"},"110405","MJ.2.125","OPER",2,"A",62.74247,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1560,1562,{"$raw":"00000000"},"110405","MJ.3.1035","INOP",3,"T",9.65535,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1561,1563,{"$raw":"00000000"},"110410","MJ.3.1036","INOP",3,"A",2.82461,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1562,1564,{"$raw":"00000000"},"110410","MJ.3.1037","INOP",3,"T",72.88972,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1563,1565,{"$raw":"00000000"},"110410","MJ.3.1038","INOP",3,"T",211.03761,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1564,1566,{"$raw":"00000000"},"110410","MJ.3.1039","INOP",3,"T",66.13247,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1565,1567,{"$raw":"00000000"},"110410","MJ.3.1040","INOP",3,"T",42.65108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1566,1568,{"$raw":"00000000"},"110410","MJ.3.1041","INOP",3,"T",17.08436,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1567,1569,{"$raw":"00000000"},"110410","MJ.3.1042","INOP",3,"T",7.65370,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1568,1570,{"$raw":"00000000"},"110410","MJ.3.1043","INOP",3,"T",12.00177,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1569,1571,{"$raw":"00000000"},"110410","MJ.3.1044","INOP",3,"T",10.09024,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1570,1572,{"$raw":"00000000"},"110410","MJ.3.1045","INOP",3,"T",16.54680,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FAVACA","Processo nº 01/2011/20","12 Abril 2011","R",null,"110405",1,null,"R DA FAVACA",1571,1573,{"$raw":"00000000"},"110405","R DA FAVACA","INOP",3,"T",56.93869,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1572,1574,{"$raw":"00000000"},"110410","MJ.3.1046","INOP",3,"T",3.49803,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1573,1575,{"$raw":"00000000"},"110410","MJ.3.1047","INOP",3,"T",6.54618,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1574,1576,{"$raw":"00000000"},"110410","MJ.3.1048","INOP",3,"T",30.09490,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1575,1577,{"$raw":"00000000"},"110408","MJ.3.1049","INOP",3,"T",55.55110,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1576,1578,{"$raw":"00000000"},"110408","MJ.3.1050","INOP",3,"T",12.51619,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1577,1579,{"$raw":"00000000"},"110408","MJ.2.126","OPER",2,"A",112.47018,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1578,1580,{"$raw":"00000000"},"110408","MJ.2.127","INOP",2,"T",4.56067,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1579,1581,{"$raw":"00000000"},"110408","MJ.2.128","OPER",2,"A",400.42068,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1580,1582,{"$raw":"00000000"},"110408","MJ.2.129","OPER",2,"A",118.35626,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1581,1583,{"$raw":"00000000"},"110408","MJ.2.130","OPER",2,"A",16.22507,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1582,1584,{"$raw":"00000000"},"110408","MJ.2.131","OPER",2,"A",154.53285,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1583,1585,{"$raw":"00000000"},"110405","MJ.2.132","OPER",2,"A",2.05922,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1584,1586,{"$raw":"00000000"},"110405","MJ.2.133","OPER",2,"A",3.18022,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1585,1587,{"$raw":"00000000"},"110405","MJ.3.1051","INOP",3,"T",3.35336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1586,1588,{"$raw":"00000000"},"110405","MJ.3.1052","INOP",3,"T",291.92853,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",2,null,null,1587,1589,{"$raw":"00000000"},"110408","MJ.3.1053","INOP",3,"T",97.91416,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1588,1590,{"$raw":"00000000"},"110408","MJ.2.134","OPER",2,"A",326.87295,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1589,1591,{"$raw":"00000000"},"110408","MJ.3.1054","INOP",3,"T",5.51678,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1590,1592,{"$raw":"00000000"},"110408","MJ.2.135","OPER",2,"A",183.78149,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1591,1593,{"$raw":"00000000"},"110410","MJ.3.1055","INOP",3,"T",47.35566,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1592,1594,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,50.61225,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1593,1595,{"$raw":"00000000"},"110408","MJ.3.1056","INOP",3,"T",12.32688,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1594,1596,{"$raw":"00000000"},"110408","MJ.3.1057","INOP",3,"T",149.53076,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1595,1597,{"$raw":"00000000"},"110408","MJ.2.136","OPER",2,"A",124.58206,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1596,1598,{"$raw":"00000000"},"110408","MJ.3.1058","INOP",3,"T",4.27687,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1597,1599,{"$raw":"00000000"},"110408","MJ.2.137","OPER",2,"A",55.70182,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1598,1600,{"$raw":"00000000"},"110408","MJ.3.1059","INOP",3,"T",3.11014,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1599,1601,{"$raw":"00000000"},"110408","MJ.2.138","OPER",2,"A",78.99098,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1600,1602,{"$raw":"00000000"},"110408","MJ.3.1060","INOP",3,"T",138.74937,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1601,1603,{"$raw":"00000000"},"110408","MJ.2.139","OPER",2,"A",252.50191,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,1602,1604,{"$raw":"00000000"},"110408","MJ.2.140","OPER",2,"A",224.10365,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110410",1,null,"CM 1043",1603,1605,{"$raw":"00000000"},"110410","CM 1043","OPER",2,"A",276.78650,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PEDREIRA",null,null,"R",null,"110410",1,null,"R DA PEDREIRA",1604,1606,{"$raw":"00000000"},"110410","R DA PEDREIRA","OPER",2,"A",20.61440,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CANAGA",null,"21/09/2004","ESTR",null,"110410",1,null,"ESTR DA CANAGA",1605,1607,{"$raw":"00000000"},"110410","ESTR DA CANAGA","OPER",2,"A",533.43666,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","BERNARDO MARTINS",null,null,"R",null,"110405",1,null,"R BERNARDO MARTINS",1606,1608,{"$raw":"00000000"},"110405","R BERNARDO MARTINS","OPER",2,"A",112.47575,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DO POÇO",null,null,"R",null,"110405",1,null,"R DO POÇO",1607,1609,{"$raw":"00000000"},"110405","R DO POÇO","OPER",2,"A",61.70040,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1608,1610,{"$raw":"00000000"},"110408","MJ.2.141","OPER",2,"A",120.23261,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1609,1611,{"$raw":"00000000"},"110408","MJ.2.142","OPER",2,"A",203.61050,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1610,1612,{"$raw":"00000000"},"110408","MJ.3.1061","INOP",3,"T",177.73036,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1611,1613,{"$raw":"00000000"},"110408","MJ.3.1062","INOP",3,"T",234.85389,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1612,1614,{"$raw":"00000000"},"110408","MJ.3.1063","INOP",3,"T",203.66192,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1613,1615,{"$raw":"00000000"},"110408","MJ.3.1064","INOP",3,"T",2.37124,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1614,1616,{"$raw":"00000000"},"110408","MJ.2.143","OPER",2,"A",8.34326,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1615,1617,{"$raw":"00000000"},"110408","MJ.3.1065","INOP",3,"T",420.64716,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1616,1618,{"$raw":"00000000"},"110408","MJ.3.1066","INOP",3,"T",0.64475,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1617,1619,{"$raw":"00000000"},"110408","MJ.3.1067","INOP",3,"T",156.10563,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1618,1620,{"$raw":"00000000"},"110408","MJ.3.1068","INOP",3,"T",2.81007,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1619,1621,{"$raw":"00000000"},"110408","MJ.3.1069","INOP",3,"T",315.89135,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1620,1622,{"$raw":"00000000"},"110408","MJ.3.1070","INOP",3,"T",3.05041,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1621,1623,{"$raw":"00000000"},"110408","MJ.2.144","OPER",2,"A",258.31470,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1622,1624,{"$raw":"00000000"},"110405","MJ.3.1071","INOP",3,"T",6.61568,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1623,1625,{"$raw":"00000000"},"110405","MJ.3.1072","INOP",3,"T",30.10514,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1624,1626,{"$raw":"00000000"},"110405","MJ.3.1073","INOP",3,"T",41.53591,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1625,1627,{"$raw":"00000000"},"110405","MJ.3.1074","INOP",3,"T",47.45505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110405",1,null,"CM 1043",1626,1628,{"$raw":"00000000"},"110405","CM 1043","OPER",2,"A",127.97525,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110405",1,null,"CM 1043",1627,1629,{"$raw":"00000000"},"110405","CM 1043","OPER",2,"A",122.83752,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1628,1630,{"$raw":"00000000"},"110405","MJ.3.1075","INOP",3,"T",20.35505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1629,1631,{"$raw":"00000000"},"110405","MJ.3.1076","INOP",3,"T",3.70135,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,1630,1632,{"$raw":"00000000"},"110405","MJ.3.1077","INOP",3,"T",5.56230,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1631,1633,{"$raw":"00000000"},"110408","MJ.3.1078","INOP",3,"T",144.44064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1632,1634,{"$raw":"00000000"},null,"MJ.3.1079",null,3,"T",74.34134,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1633,1635,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.12570,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1634,1636,{"$raw":"00000000"},"110405","MJ.2.145","OPER",2,"A",3.45913,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,1635,1637,{"$raw":"00000000"},"110405","MJ.3.1080","INOP",3,"T",198.33208,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1636,1638,{"$raw":"00000000"},"110405","MJ.1.32","OPER",1,"A",16.63165,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1637,1639,{"$raw":"00000000"},"110405","MJ.1.33","OPER",1,"A",5.86160,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1638,1640,{"$raw":"00000000"},"110405","MJ.1.34","OPER",1,"A",2.80601,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1639,1641,{"$raw":"00000000"},"110405","MJ.1.35","OPER",1,"A",44.85051,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1640,1642,{"$raw":"00000000"},"110405","MJ.2.146","OPER",2,"A",5.26932,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1641,1643,{"$raw":"00000000"},"110405","MJ.1.36","OPER",1,"A",88.35607,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1642,1644,{"$raw":"00000000"},"110405","MJ.3.1081","INOP",3,"T",2.58600,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1643,1645,{"$raw":"00000000"},"110405","MJ.3.1082","INOP",3,"T",68.33252,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1644,1646,{"$raw":"00000000"},"110405","MJ.3.1083","INOP",3,"T",3.46902,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1645,1647,{"$raw":"00000000"},"110405","MJ.3.1084","INOP",3,"T",110.73991,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1646,1648,{"$raw":"00000000"},"110405","MJ.3.1085","INOP",3,"T",45.61155,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1647,1649,{"$raw":"00000000"},"110405","MJ.3.1086","INOP",3,"T",80.53351,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1648,1650,{"$raw":"00000000"},"110405","MJ.3.1087","INOP",3,"T",3.66182,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1649,1651,{"$raw":"00000000"},"110410","MJ.3.1088","INOP",3,"A",3.23785,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1650,1652,{"$raw":"00000000"},"110410","MJ.3.1089","INOP",3,"T",43.69210,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1651,1653,{"$raw":"00000000"},"110410","MJ.3.1090","INOP",3,"T",9.34126,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1652,1654,{"$raw":"00000000"},"110410","MJ.3.1091","INOP",3,"T",24.89021,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1653,1655,{"$raw":"00000000"},"110410","MJ.2.147","OPER",2,"A",2.46051,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1654,1656,{"$raw":"00000000"},"110410","MJ.3.1092","INOP",3,"T",1.99264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1655,1657,{"$raw":"00000000"},"110410","MJ.3.1093","INOP",3,"T",2.57721,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1656,1658,{"$raw":"00000000"},"110410","MJ.3.1094","INOP",3,"T",46.01240,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1657,1659,{"$raw":"00000000"},"110410","MJ.3.1095","INOP",3,"T",3.57001,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1658,1660,{"$raw":"00000000"},"110410","MJ.2.148","OPER",2,"A",6.02231,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1659,1661,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.00122,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1660,1662,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,49.19305,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Bairro","da Boa Vista",null,null,null,null,null,"110410",1,null,null,1661,1663,{"$raw":"00000000"},"110410","MJ.3.1096","INOP",3,"T",84.42992,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1662,1664,{"$raw":"00000000"},"110410","MJ.3.1097","INOP",3,"T",1.80812,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110410",1,null,"CM 1043",1663,1665,{"$raw":"00000000"},"110410","CM 1043","OPER",2,"A",36.71505,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,null,"BR",null,"110405",1,null,"BR DA BOAVISTA",1664,1666,{"$raw":"00000000"},"110405","BR DA BOAVISTA","INOP",3,"T",47.81570,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",1665,1667,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",829.10611,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","EM","574","BERNARDO MARTINS",null,null,"R",null,"110405",1,null,"R BERNARDO MARTINS",1666,1668,{"$raw":"00000000"},"110405","R BERNARDO MARTINS","OPER",2,"A",223.22424,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",1667,1669,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",202.74480,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1668,1670,{"$raw":"00000000"},"110405","MJ.1.37","OPER",1,"A",66.24825,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA ANTÓNIA BORGES DE CASTRO",null,null,"R",null,"110405",1,null,"R MARIA ANTÓNIA BORGES DE CASTRO",1669,1671,{"$raw":"00000000"},"110405","R MARIA ANTÓNIA BORGES DE CASTRO","OPER",2,"A",107.71011,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","DAS ANDORINHAS","Dúvidas se é Rua",null,"R",null,"110405",1,null,"R DAS ANDORINHAS",1670,1672,{"$raw":"00000000"},"110405","TV DAS ANDORINHAS","OPER",1,"A",35.90890,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1671,1673,{"$raw":"00000000"},"110405","MJ.3.1098","INOP",3,"T",111.36315,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1672,1674,{"$raw":"00000000"},"110405","MJ.3.1099","INOP",3,"T",48.84496,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE MARÇO",null,null,"R",null,"110410",1,null,"R 15 DE MARÇO",1673,1675,{"$raw":"00000000"},"110410","R 15 DE MARÇO","INOP",3,"T",30.65272,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CASINHAS",null,null,"R",null,"110410",1,null,"R DAS CASINHAS",1674,1676,{"$raw":"00000000"},"110410","R DAS CASINHAS","INOP",3,"T",52.02099,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1675,1677,{"$raw":"00000000"},"110410","MJ.3.1100","INOP",3,"T",77.70196,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",1676,1678,{"$raw":"00000000"},"110410","R DAS FLORES","OPER",2,"A",82.35803,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CASALINHOS",null,null,"R",null,"110410",1,null,"R DOS CASALINHOS",1677,1679,{"$raw":"00000000"},"110410","R DOS CASALINHOS","INOP",3,"T",5.81826,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA ANTÓNIA BORGES DE CASTRO",null,null,"R",null,"110405",1,null,"R MARIA ANTÓNIA BORGES DE CASTRO",1678,1680,{"$raw":"00000000"},"110405","R MARIA ANTÓNIA BORGES DE CASTRO","OPER",2,"A",47.94890,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA ANTÓNIA BORGES DE CASTRO",null,null,"R",null,"110405",1,null,"R MARIA ANTÓNIA BORGES DE CASTRO",1679,1681,{"$raw":"00000000"},"110405","R MARIA ANTÓNIA BORGES DE CASTRO","OPER",2,"A",124.71559,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE AGOSTO",null,null,"R",null,"110410",1,null,"R 15 DE AGOSTO",1680,1682,{"$raw":"00000000"},"110410","R 15 DE AGOSTO","OPER",2,"T",36.02323,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PENEDO AMARELO",null,null,"R",null,"110410",1,null,"R DO PENEDO AMARELO",1681,1683,{"$raw":"00000000"},"110410","R DO PENEDO AMARELO","INOP",3,"T",157.90673,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","1044",null,null,"CM",null,"110405",1,null,"CM 1044",1682,1684,{"$raw":"00000000"},"110405","CM 1044","OPER",1,"A",1.55596,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1683,1685,{"$raw":"00000000"},"110405","MJ.1.38","OPER",1,"A",34.50956,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ANDORINHAS","DÚVIDAS SE É RUA",null,"TV",null,"110405",1,null,"TV DAS ANDORINHAS",1684,1686,{"$raw":"00000000"},"110405","TV DAS ANDORINHAS","OPER",1,"A",43.57571,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA EIRINHA",null,null,"R",null,"110405",1,null,"R DA EIRINHA",1685,1687,{"$raw":"00000000"},"110405","R DA EIRINHA","OPER",1,"A",72.28910,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1686,1688,{"$raw":"00000000"},"110405","MJ.1.39","OPER",1,"A",34.05336,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALVERDE",null,null,"R",null,"110410",1,null,"R DO VALVERDE",1687,1689,{"$raw":"00000000"},"110410","R DO VALVERDE","INOP",3,"T",27.49264,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA ANTÓNIA BORGES DE CASTRO",null,null,"R",null,"110405",1,null,"R MARIA ANTÓNIA BORGES DE CASTRO",1688,1690,{"$raw":"00000000"},"110405","R MARIA ANTÓNIA BORGES DE CASTRO","OPER",2,"A",56.57982,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ GREGORIO DE MOURA",null,null,"R",null,"110410",1,null,"R JOSÉ GREGORIO DE MOURA",1689,1691,{"$raw":"00000000"},"110410","R JOSÉ GREGORIO DE MOURA","OPER",2,"A",69.53806,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"R",null,"110405",1,null,"R 1º DE MAIO",1690,1692,{"$raw":"00000000"},"110405","R 1º DE MAIO","INOP",3,"T",31.38887,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DO PICOTO",null,"16 Jul 2002","R",null,"110407",1,null,"R DO PICOTO",1691,1693,{"$raw":"00000000"},"110407","R DO PICOTO","OPER",2,"A",122.92292,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",1692,1694,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",27.05099,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO COMERCIO",null,null,"R",null,"110410",1,null,"R DO COMERCIO",1693,1695,{"$raw":"00000000"},"110410","R DO COMERCIO","INOP",3,"T",136.51276,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S JOÃO DE BRITO",null,null,"CC",null,"110410",1,null,"CC S JOÃO DE BRITO",1694,1696,{"$raw":"00000000"},"110410","CC S JOÃO DE BRITO","INOP",3,"T",352.07618,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"16 DE DEZEMBRO",null,"16 Ago 2003","LG",null,"110410",1,null,"LG 16 DE DEZEMBRO",1695,1697,{"$raw":"00000000"},"110410","LG 16 DE DEZEMBRO","OPER",2,"A",31.38055,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE AGOSTO",null,null,"R",null,"110410",1,null,"R 15 DE AGOSTO",1696,1698,{"$raw":"00000000"},"110410","R 15 DE AGOSTO","OPER",2,"A",35.30464,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110410",1,null,"EN 361-1",1697,1699,{"$raw":"00000000"},"110410","EN 361-1","OPER",1,"A",111.56422,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110410",1,null,"EN 361-1",1698,1700,{"$raw":"00000000"},"110410","EN 361-1","OPER",1,"A",49.62253,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CIPRIANO CARDOSO",null,null,"TV",null,"110405",1,null,"TV CIPRIANO CARDOSO",1699,1701,{"$raw":"00000000"},"110405","TV CIPRIANO CARDOSO","INOP",3,"T",49.12200,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","PADRE ANTÓNIO MARIA DE OLIVEIRA",null,null,"R",null,"110410",1,null,"R PADRE ANTÓNIO MARIA DE OLIVEIRA",1700,1702,{"$raw":"00000000"},"110410","R PADRE ANTÓNIO MARIA DE OLIVEIRA","OPER",2,"A",155.96680,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA MARINHA",null,null,"R",null,"110410",1,null,"R DA MARINHA",1701,1703,{"$raw":"00000000"},"110410","R DA MARINHA","OPER",1,"A",53.94760,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PONTE DO GADO",null,null,"R",null,"110410",1,null,"R PONTE DO GADO",1702,1704,{"$raw":"00000000"},"110410","R PONTE DO GADO","INOP",3,"A",109.50162,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110410",1,null,"R DA ESPERANÇA",1703,1705,{"$raw":"00000000"},"110410","R DA ESPERANÇA","INOP",3,"T",8.87815,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110410",1,null,"R DA ESPERANÇA",1704,1706,{"$raw":"00000000"},"110410","R DA ESPERANÇA","INOP",3,"T",38.81397,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MATA DO VALVERDE",null,null,"R",null,"110410",1,null,"R MATA DO VALVERDE",1705,1707,{"$raw":"00000000"},"110410","R MATA DO VALVERDE","INOP",3,"T",191.24653,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1706,1708,{"$raw":"00000000"},"110405","MJ.3.1101","INOP",3,"T",2.83129,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1707,1709,{"$raw":"00000000"},"110405","MJ.3.1102","INOP",3,"T",67.14709,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1708,1710,{"$raw":"00000000"},"110405","MJ.3.1103","INOP",3,"T",3.85068,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1709,1711,{"$raw":"00000000"},"110410","MJ.2.149","OPER",2,"A",62.01516,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",1710,1712,{"$raw":"00000000"},"110410","R DAS FLORES","OPER",2,"A",27.74953,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA UNIÃO",null,null,"R",null,"110405",1,null,"R DA BOA UNIÃO",1711,1713,{"$raw":"00000000"},"110405","R DA BOA UNIÃO","OPER",1,"A",20.11870,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"5 DE AGOSTO",null,null,"TV",null,"110405",1,null,"TV 5 DE AGOSTO",1712,1714,{"$raw":"00000000"},"110405","TV 5 DE AGOSTO","OPER",2,"A",68.78691,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110405",1,null,"R DO CASTELO",1713,1715,{"$raw":"00000000"},"110405","R DO CASTELO","OPER",2,"A",16.38367,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110405",1,null,"R DO CASTELO",1714,1716,{"$raw":"00000000"},"110405","R DO CASTELO","OPER",1,"A",35.06312,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1715,1717,{"$raw":"00000000"},"110405","MJ.3.1104","INOP",3,"T",21.58234,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PORTELA",null,null,"R",null,"110405",1,null,"R DA PORTELA",1716,1718,{"$raw":"00000000"},"110405","R DA PORTELA","OPER",2,"A",153.11221,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PORTELA",null,null,"R",null,"110405",1,null,"R DA PORTELA",1717,1719,{"$raw":"00000000"},"110405","R DA PORTELA","OPER",2,"A",11.78481,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110405",1,null,"R DA ESPERANÇA",1718,1720,{"$raw":"00000000"},"110405","R DA ESPERANÇA","OPER",1,"A",47.35859,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110405",1,null,"R DA ESPERANÇA",1719,1721,{"$raw":"00000000"},"110405","R DA ESPERANÇA","OPER",1,"A",29.86913,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PORTELA",null,null,"R",null,"110405",1,null,"R DA PORTELA",1720,1722,{"$raw":"00000000"},"110405","R DA PORTELA","OPER",1,"A",31.76053,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE FEVEREIRO DE 1999",null,null,"R",null,"110405",1,null,"R 1º DE FEVEREIRO DE 1999",1721,1723,{"$raw":"00000000"},"110405","R 1º DE FEVEREIRO DE 1999","OPER",1,"A",187.75501,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1722,1724,{"$raw":"00000000"},"110405","MJ.1.40","OPER",1,"A",12.78077,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA VONTADE",null,null,"R",null,"110405",1,null,"R DA BOA VONTADE",1723,1725,{"$raw":"00000000"},"110405","R DA BOA VONTADE","OPER",1,"A",71.67266,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BAIRRO NOVO",null,"26 ago 2003","R",null,"110410",1,null,"R DO BAIRRO NOVO",1724,1726,{"$raw":"00000000"},"110410","R DO BAIRRO NOVO","INOP",3,"T",97.08282,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BAIRRO NOVO",null,"26 ago 2003","R",null,"110410",1,null,"R DO BAIRRO NOVO",1725,1727,{"$raw":"00000000"},"110410","R DO BAIRRO NOVO","INOP",3,"T",129.65617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARRIL",null,"26 ago 2003","R",null,"110410",1,null,"R DO CARRIL",1726,1728,{"$raw":"00000000"},"110410","R DO CARRIL","INOP",3,"T",73.67803,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",1727,1729,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",63.53947,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"RAFAEL S CARVALHO",null,null,"TV",null,"110403",1,null,"TV RAFAEL S CARVALHO",1728,1730,{"$raw":"00000000"},"110403","TV RAFAEL S CARVALHO","OPER",1,"A",46.30863,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTIGA",null,"26 ago 2003","R",null,"110410",1,null,"R ANTIGA",1729,1731,{"$raw":"00000000"},"110410","R ANTIGA","INOP",3,"T",99.53648,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,null,0,null,"ESTR FLORESTAL",1730,1732,{"$raw":"00000000"},null,"ESTR FLORESTAL",null,2,"A",661.28573,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DA GRANDE GUERRA",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DA GRANDE GUERRA",1731,1733,{"$raw":"00000000"},"110405","R DOS COMBATENTES DA GRANDE GUERRA","OPER",2,"A",64.82356,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAGES",null,null,"R",null,"110405",1,null,"R DAS LAGES",1732,1734,{"$raw":"00000000"},"110405","R DAS LAGES","OPER",2,"A",32.11662,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARMO",null,null,"R",null,"110410",1,null,"R DO CARMO",1733,1735,{"$raw":"00000000"},"110410","R DO CARMO","INOP",3,"T",241.60724,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ROMEIRA",null,"26 ago 2003","R",null,"110410",1,null,"R DA ROMEIRA",1734,1736,{"$raw":"00000000"},"110410","R DA ROMEIRA","INOP",3,"T",389.10381,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"R DO EMIGRANTE",null,null,"R",null,"110410",1,null,"R DO EMIGRANTE",1735,1737,{"$raw":"00000000"},"110410","R DO EMIGRANTE","INOP",3,null,310.54311,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DE ALCÂNTARA",null,null,"R",null,"110410",1,null,"R DE ALCÂNTARA",1736,1738,{"$raw":"00000000"},"110410","R DE ALCÂNTARA","OPER",2,"A",19.37146,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","DO BONJARDIM",null,null,"R",null,"110410",1,null,"R DO BONJARDIM",1737,1739,{"$raw":"00000000"},"110410","R DO BONJARDIM","OPER",1,"A",264.32533,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA EIRINHA",null,null,"R",null,"110405",1,null,"R DA EIRINHA",1738,1740,{"$raw":"00000000"},"110405","R DA EIRINHA","OPER",1,"A",92.29313,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",1739,1741,{"$raw":"00000000"},"110410","R DAS FLORES","OPER",2,"A",37.40997,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","DA IGREJA",null,null,"R",null,"110405",1,null,"R DA IGREJA",1740,1742,{"$raw":"00000000"},"110405","R DA IGREJA","OPER",2,"A",68.65826,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ANDORINHAS",null,null,"R",null,"110405",1,null,"R DAS ANDORINHAS",1741,1743,{"$raw":"00000000"},"110405","R DAS ANDORINHAS","OPER",1,"A",157.00141,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","DA LIBERDADE",null,null,"AV",null,"110410",1,null,"AV DA LIBERDADE",1742,1744,{"$raw":"00000000"},"110410","AV DA LIBERDADE","OPER",2,"A",106.37815,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE MARÇO",null,null,"R",null,"110410",1,null,"R 15 DE MARÇO",1743,1745,{"$raw":"00000000"},"110410","R 15 DE MARÇO","INOP",3,"T",30.69386,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,null,"R",null,"110410",1,null,"R DA CAPELA",1744,1746,{"$raw":"00000000"},"110410","R DA CAPELA","INOP",3,"T",126.72495,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"R",null,"110410",1,null,"R DAS EIRAS",1745,1747,{"$raw":"00000000"},"110410","R DAS EIRAS","INOP",3,"T",100.92793,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DO POÇO",null,null,"R",null,"110405",1,null,"R DO POÇO",1746,1748,{"$raw":"00000000"},"110405","R DO POÇO","OPER",2,"A",12.91736,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1747,1749,{"$raw":"00000000"},"110406","MJ.3.1105","INOP",3,"T",118.19086,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1748,1750,{"$raw":"00000000"},"110404","MJ.3.1106","INOP",3,"T",140.41381,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1749,1751,{"$raw":"00000000"},"110406","MJ.3.1107","INOP",3,"T",144.62473,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VITORINO",null,null,"R",null,"110404",1,null,"R DO VITORINO",1750,1752,{"$raw":"00000000"},"110404","R DO VITORINO","INOP",3,"T",249.12711,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1751,1753,{"$raw":"00000000"},"110407","MJ.3.1108","INOP",3,"T",67.78075,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1752,1754,{"$raw":"00000000"},"110406","MJ.3.1109","INOP",3,"T",90.11168,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1753,1755,{"$raw":"00000000"},"110407","MJ.3.1110","INOP",3,"T",206.60635,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1754,1756,{"$raw":"00000000"},"110406","MJ.3.1111","INOP",3,"T",168.09024,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1755,1757,{"$raw":"00000000"},"110407","MJ.3.1112","INOP",3,"T",48.68075,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1756,1758,{"$raw":"00000000"},"110406","MJ.3.1113","INOP",3,"T",101.09040,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,null,"R",null,"110407",1,null,"R DOS ARNEIROS",1757,1759,{"$raw":"00000000"},"110407","R DOS ARNEIROS","INOP",3,"T",298.58340,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",1,null,null,1758,1760,{"$raw":"00000000"},"110404","MJ.3.1114","INOP",3,"T",110.31222,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1759,1761,{"$raw":"00000000"},"110406","MJ.3.1115","INOP",3,"T",197.65555,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1760,1762,{"$raw":"00000000"},"110407","MJ.3.1116","INOP",3,"T",54.88594,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1761,1763,{"$raw":"00000000"},"110406","MJ.3.1117","INOP",3,"T",172.34561,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,1762,1764,{"$raw":"00000000"},"110407","MJ.3.1118","INOP",3,"T",131.72515,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1763,1765,{"$raw":"00000000"},"110404","MJ.3.1119","INOP",3,"T",82.00811,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1764,1766,{"$raw":"00000000"},"110406","MJ.3.1120","INOP",3,"T",28.02078,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1765,1767,{"$raw":"00000000"},"110407","MJ.3.1121","INOP",3,"T",14.34981,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1766,1768,{"$raw":"00000000"},"110407","MJ.3.1122","INOP",3,"T",54.73990,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1767,1769,{"$raw":"00000000"},"110407","MJ.3.1123","INOP",3,"T",288.61192,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","Cavaco",null,null,null,null,null,"110406",1,null,null,1768,1770,{"$raw":"00000000"},"110406","MJ.3.1124","INOP",3,"T",134.14621,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,1769,1771,{"$raw":"00000000"},"110406","MJ.3.1125","INOP",3,"T",157.39790,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1770,1772,{"$raw":"00000000"},"110406","MJ.3.1126","INOP",3,"T",159.23494,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1771,1773,{"$raw":"00000000"},"110406","MJ.3.1127","INOP",3,"T",277.50142,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1772,1774,{"$raw":"00000000"},"110407","MJ.3.1128","INOP",3,"T",188.28256,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1773,1775,{"$raw":"00000000"},"110407","MJ.3.1129","INOP",3,"T",263.16361,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1774,1776,{"$raw":"00000000"},"110406","MJ.3.1130","INOP",3,"T",65.34228,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1775,1777,{"$raw":"00000000"},"110407","MJ.3.1131","INOP",3,"T",115.87111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,1776,1778,{"$raw":"00000000"},"110407","MJ.3.1132","INOP",3,"T",189.08826,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,1777,1779,{"$raw":"00000000"},"110407","MJ.3.1133","INOP",3,"T",239.64767,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1778,1780,{"$raw":"00000000"},"110407","MJ.3.1134","INOP",3,"T",47.73599,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1779,1781,{"$raw":"00000000"},"110407","MJ.3.1135","INOP",3,"T",205.78723,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1780,1782,{"$raw":"00000000"},"110407","MJ.3.1136","INOP",3,"T",136.59782,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1781,1783,{"$raw":"00000000"},"110401","MJ.1.41","OPER",1,"A",2.64282,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1782,1784,{"$raw":"00000000"},"110401","MJ.3.1137","INOP",3,"T",27.06331,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1783,1785,{"$raw":"00000000"},"110401","MJ.3.1138","INOP",3,"T",143.76512,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1784,1786,{"$raw":"00000000"},"110401","MJ.3.1139","INOP",3,"T",4.85412,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1785,1787,{"$raw":"00000000"},"110401","MJ.3.1140","INOP",3,"T",44.83183,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1786,1788,{"$raw":"00000000"},"110401","MJ.3.1141","INOP",3,"T",40.93200,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1787,1789,{"$raw":"00000000"},"110404","MJ.1.42","OPER",1,"A",73.27744,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1788,1790,{"$raw":"00000000"},"110404","MJ.1.43","OPER",1,"A",46.16904,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1789,1791,{"$raw":"00000000"},"110404","MJ.1.44","OPER",1,"A",3.46810,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1790,1792,{"$raw":"00000000"},"110401","MJ.3.1142","INOP",3,"T",8.74357,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0","CSL","Arneirinho",null,null,null,null,null,"110406",1,null,null,1791,1793,{"$raw":"00000000"},"110406","MJ.3.1143","INOP",3,"T",109.29363,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1792,1794,{"$raw":"00000000"},"110407","MJ.3.1144","INOP",3,"T",69.47769,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1793,1795,{"$raw":"00000000"},"110407","MJ.2.150","OPER",2,"A",2.75036,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1794,1796,{"$raw":"00000000"},"110404","MJ.1.45","OPER",1,"A",2.89914,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1795,1797,{"$raw":"00000000"},"110404","MJ.3.1145","INOP",3,"T",4.76942,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1798,1800,{"$raw":"00000000"},"110404","MJ.2.151","OPER",2,"A",3.18989,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1799,1801,{"$raw":"00000000"},"110404","MJ.3.1148","INOP",3,"T",69.57551,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1800,1802,{"$raw":"00000000"},"110404","MJ.3.1149","INOP",3,"T",22.93137,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1801,1803,{"$raw":"00000000"},"110404","MJ.2.152","OPER",2,"A",3.11448,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1802,1804,{"$raw":"00000000"},"110406","MJ.3.1150","INOP",3,"T",3.74445,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1803,1805,{"$raw":"00000000"},"110401","MJ.3.1151","INOP",3,"T",2.12850,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1804,1806,{"$raw":"00000000"},"110401","MJ.3.1152","INOP",3,"T",2.94837,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1805,1807,{"$raw":"00000000"},"110401","MJ.3.1153","INOP",3,"T",25.66131,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,1806,1808,{"$raw":"00000000"},"110401","MJ.3.1154","INOP",3,"T",2.71312,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CRUZEIRO",null,null,"R",null,"110407",1,null,"R DO CRUZEIRO",1807,1809,{"$raw":"00000000"},"110407","R DO CRUZEIRO","INOP",3,"T",257.58055,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110406",1,null,"EM 568",1808,1810,{"$raw":"00000000"},"110406","EM 568","OPER",2,"A",566.04095,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,1809,1811,{"$raw":"00000000"},"110402","MJ.3.1155","INOP",3,"T",33.16319,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1810,1812,{"$raw":"00000000"},"110404","MJ.2.153","OPER",2,"A",2.29367,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1811,1813,{"$raw":"00000000"},"110406","MJ.3.1156","INOP",3,"T",49.87560,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1812,1814,{"$raw":"00000000"},"110406","MJ.2.154","OPER",2,"A",2.51066,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,1813,1815,{"$raw":"00000000"},"110404","MJ.3.1157","INOP",3,"T",137.34989,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1814,1816,{"$raw":"00000000"},"110406","MJ.3.1158","INOP",3,"T",24.50553,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,1815,1817,{"$raw":"00000000"},"110406","MJ.3.1159","INOP",3,"T",82.33391,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,1816,1818,{"$raw":"00000000"},"110404","MJ.3.1160","INOP",3,"T",45.20622,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1817,1819,{"$raw":"00000000"},"110404","MJ.3.1161","INOP",3,"T",23.84663,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1818,1820,{"$raw":"00000000"},"110404","MJ.3.1162","INOP",3,"T",65.19844,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PALMEIRA",null,null,"R",null,"110404",1,null,"R DA PALMEIRA",1819,1821,{"$raw":"00000000"},"110404","R DA PALMEIRA","INOP",3,"T",64.23973,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PALMEIRA",null,null,"R",null,"110404",1,null,"R DA PALMEIRA",1820,1822,{"$raw":"00000000"},"110404","R DA PALMEIRA","INOP",3,"T",37.98184,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110404",1,null,"R DO CASTELO",1821,1823,{"$raw":"00000000"},"110404","R DO CASTELO","INOP",3,"T",48.14718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",1,null,null,1822,1824,{"$raw":"00000000"},"110404","MJ.3.1163","INOP",3,"T",131.60111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1823,1825,{"$raw":"00000000"},"110404","MJ.3.1164","INOP",3,"T",92.70443,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1824,1826,{"$raw":"00000000"},"110404","MJ.3.1165","INOP",3,"T",29.12346,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1825,1827,{"$raw":"00000000"},"110404","MJ.3.1166","INOP",3,"T",86.63869,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1826,1828,{"$raw":"00000000"},"110404","MJ.3.1167","INOP",3,"T",20.02304,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1827,1829,{"$raw":"00000000"},"110404","MJ.3.1168","INOP",3,"T",56.34374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1828,1830,{"$raw":"00000000"},"110404","MJ.1.46","OPER",1,"A",3.02106,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1829,1831,{"$raw":"00000000"},"110404","MJ.1.47","OPER",1,"A",76.12098,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1830,1832,{"$raw":"00000000"},"110404","MJ.1.48","OPER",1,"A",12.26010,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1831,1833,{"$raw":"00000000"},"110404","MJ.1.49","OPER",1,"A",2.46002,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1832,1834,{"$raw":"00000000"},"110404","MJ.1.50","OPER",1,"A",2.12869,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1833,1835,{"$raw":"00000000"},"110404","MJ.3.1169","INOP",3,"T",2.66918,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1834,1836,{"$raw":"00000000"},"110404","MJ.3.1170","INOP",3,"T",33.69187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1835,1837,{"$raw":"00000000"},"110404","MJ.3.1171","INOP",3,"T",2.53571,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1836,1838,{"$raw":"00000000"},"110404","MJ.1.51","OPER",1,"A",2.71544,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,1837,1839,{"$raw":"00000000"},"110407","MJ.3.1172","INOP",3,"T",42.09156,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1838,1840,{"$raw":"00000000"},"110407","MJ.3.1173","INOP",3,"T",3.28783,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,1839,1841,{"$raw":"00000000"},"110407","MJ.3.1174","INOP",3,"T",89.63803,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1840,1842,{"$raw":"00000000"},"110407","MJ.3.1175","INOP",3,"T",2.88979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1841,1843,{"$raw":"00000000"},"110404","MJ.3.1176","INOP",3,"T",63.19375,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1842,1844,{"$raw":"00000000"},"110404","MJ.3.1177","INOP",3,"T",17.73976,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1843,1845,{"$raw":"00000000"},"110404","MJ.3.1178","INOP",3,"T",15.47261,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,1844,1846,{"$raw":"00000000"},"110407","MJ.3.1179","INOP",3,"T",2.85160,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1845,1847,{"$raw":"00000000"},"110407","MJ.2.155","OPER",2,"A",3.12743,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,1846,1848,{"$raw":"00000000"},"110407","MJ.2.156","OPER",2,"A",7.87052,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1847,1849,{"$raw":"00000000"},"110404","MJ.3.1180","INOP",3,"T",66.80277,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1848,1850,{"$raw":"00000000"},"110404","MJ.3.1181","INOP",3,"T",130.56500,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1849,1851,{"$raw":"00000000"},"110404","MJ.3.1182","INOP",3,"T",16.68205,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,1850,1852,{"$raw":"00000000"},"110407","MJ.3.1183","INOP",3,"T",2.90222,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1851,1853,{"$raw":"00000000"},"110407","MJ.3.1184","INOP",3,"T",57.92460,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,1852,1854,{"$raw":"00000000"},"110404","MJ.3.1185","INOP",3,"T",111.63526,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,1853,1855,{"$raw":"00000000"},"110407","MJ.3.1186","INOP",3,"T",4.08585,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1854,1856,{"$raw":"00000000"},"110407","MJ.3.1187","INOP",3,"T",1.81339,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1855,1857,{"$raw":"00000000"},"110407","MJ.3.1188","INOP",3,"T",146.82698,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1856,1858,{"$raw":"00000000"},"110407","MJ.3.1189","INOP",3,"T",2.06526,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1857,1859,{"$raw":"00000000"},"110407","MJ.3.1190","INOP",3,"T",2.21635,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1858,1860,{"$raw":"00000000"},"110407","MJ.3.1191","INOP",3,"T",103.08318,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1859,1861,{"$raw":"00000000"},"110407","MJ.3.1192","INOP",3,"T",95.40045,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1860,1862,{"$raw":"00000000"},"110407","MJ.3.1193","INOP",3,"T",124.02311,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1861,1863,{"$raw":"00000000"},"110407","MJ.3.1194","INOP",3,"T",2.23893,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1862,1864,{"$raw":"00000000"},"110407","MJ.3.1195","INOP",3,"T",20.65976,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1863,1865,{"$raw":"00000000"},"110407","MJ.3.1196","INOP",3,"T",3.37464,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,1864,1866,{"$raw":"00000000"},"110407","MJ.3.1197","INOP",3,"T",44.16817,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VENTURAS",null,null,"TV",null,"110404",1,null,"TV DOS VENTURAS",1865,1867,{"$raw":"00000000"},"110404","TV DOS VENTURAS","INOP",3,"T",50.11205,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"R",null,"110404",2,"110406","R DA BELA VISTA",1866,1868,{"$raw":"00000000"},"110404","R DA BELA VISTA","INOP",3,"T",81.39597,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PORTELA",null,null,"R",null,"110401",1,null,"R DA PORTELA",1867,1869,{"$raw":"00000000"},"110401","R DA PORTELA","INOP",3,"A",98.37778,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LAVADOUROS","Confirmado, Março 2007",null,"TV",null,"110401",1,null,"TV DOS LAVADOUROS",1868,1870,{"$raw":"00000000"},"110401","TV DOS LAVADOUROS","INOP",3,"T",45.69498,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DA BOIÇA",null,null,"ESTR",null,"110404",1,null,"ESTR DA BOIÇA",1869,1871,{"$raw":"00000000"},"110404","ESTR DA BOIÇA","OPER",2,null,784.53810,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,1870,1872,{"$raw":"00000000"},"110403","MJ.3.1198","INOP",3,"T",41.49765,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",1871,1873,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",361.02238,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,"26 ago 2003","EN",null,"110410",1,null,"EN 115",1872,1874,{"$raw":"00000000"},"110410","EN 115","OPER",1,"A",29.25510,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,"26 ago 2003","EN",null,"110410",1,null,"EN 115",1873,1875,{"$raw":"00000000"},"110410","EN 115","OPER",1,"A",170.20980,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110410",1,null,"EN 115",1874,1876,{"$raw":"00000000"},"110410","EN 115","OPER",1,"A",213.08951,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110410",1,null,"EN 115",1875,1877,{"$raw":"00000000"},"110410","EN 115","OPER",1,"A",167.84025,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BAIRRO NOVO",null,"26 ago 2003","R",null,"110410",1,null,"R DO BAIRRO NOVO",1876,1878,{"$raw":"00000000"},"110410","R DO BAIRRO NOVO","INOP",3,"T",102.49597,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BONJARDIM",null,null,"TV",null,"110410",1,null,"TV DO BONJARDIM",1877,1879,{"$raw":"00000000"},"110410","TV DO BONJARDIM","INOP",3,"T",96.32829,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ESCOLAS",null,null,"R",null,"110410",1,null,"R DAS ESCOLAS",1878,1880,{"$raw":"00000000"},"110410","R DAS ESCOLAS","INOP",3,"T",73.23344,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110410",1,null,"EN 115",1879,1881,{"$raw":"00000000"},"110410","EN 115","OPER",2,"A",146.91126,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CANAGA",null,"21/09/2004","ESTR",null,"110410",1,null,"ESTR DA CANAGA",1880,1882,{"$raw":"00000000"},"110410","ESTR DA CANAGA","INOP",3,"T",27.55908,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110410",2,null,"EN 115",1881,1883,{"$raw":"00000000"},"110410","EN 115","OPER",1,"A",274.61386,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"POÇO NOVO","?",null,"LG",null,"110408",1,null,"LG POÇO NOVO",1882,1884,{"$raw":"00000000"},"110408","LG POÇO NOVO","INOP",3,"T",4.16019,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",1883,1885,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",121.91316,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCO CARDOSO",null,null,"R",null,"110403",1,null,"R FRANCISCO CARDOSO",1884,1886,{"$raw":"00000000"},"110403","R FRANCISCO CARDOSO","INOP",3,"T",69.80320,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",1885,1887,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",3.74721,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",1886,1888,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",276.28631,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",1887,1889,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",98.36876,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","8","8",null,null,"EN",null,"110408",1,null,"IC 1",1888,1890,{"$raw":"00000000"},"110408","IC 1","OPER",1,"A",309.67310,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MIGUEL PIO",null,null,"R",null,"110405",1,null,"R MIGUEL PIO",1889,1891,{"$raw":"00000000"},"110405","R MIGUEL PIO","INOP",3,"T",215.96534,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,1890,1892,{"$raw":"00000000"},"110403","MJ.3.1199","INOP",3,"T",125.54616,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,1891,1893,{"$raw":"00000000"},"110403","MJ.3.1200","INOP",3,"T",22.57260,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1892,1894,{"$raw":"00000000"},"110410","MJ.3.1201","INOP",3,"T",2.51366,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1893,1895,{"$raw":"00000000"},"110410","MJ.3.1202","INOP",3,"T",93.05626,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1894,1896,{"$raw":"00000000"},"110410","MJ.3.1203","INOP",3,"T",75.13032,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1895,1897,{"$raw":"00000000"},"110410","MJ.3.1204","INOP",3,"T",3.38999,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,1896,1898,{"$raw":"00000000"},"110410","MJ.3.1205","INOP",3,"T",3.38245,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1897,1899,{"$raw":"00000000"},"110410","MJ.3.1206","INOP",3,"T",361.13764,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1898,1900,{"$raw":"00000000"},"110410","MJ.1.52","OPER",1,"A",3.31024,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1899,1901,{"$raw":"00000000"},"110410","MJ.3.1207","INOP",3,"T",124.69886,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1900,1902,{"$raw":"00000000"},"110410","MJ.3.1208","INOP",3,"T",22.87871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1901,1903,{"$raw":"00000000"},"110410","MJ.3.1209","INOP",3,"T",106.79648,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1902,1904,{"$raw":"00000000"},"110410","MJ.1.53","OPER",1,"A",3.09840,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1903,1905,{"$raw":"00000000"},"110410","MJ.3.1210","INOP",3,"T",35.70152,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1904,1906,{"$raw":"00000000"},"110410","MJ.3.1211","INOP",3,"T",14.77248,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1905,1907,{"$raw":"00000000"},"110410","MJ.3.1212","INOP",3,"T",4.55721,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1906,1908,{"$raw":"00000000"},"110410","MJ.3.1213","INOP",3,"T",263.10718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1907,1909,{"$raw":"00000000"},"110410","MJ.1.54","OPER",1,"A",2.96068,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1908,1910,{"$raw":"00000000"},"110408","MJ.2.157","OPER",2,"A",44.23410,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,1909,1911,{"$raw":"00000000"},"110405","MJ.3.1214","INOP",3,"T",40.97237,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS GALVEIAS",null,null,"R",null,"110410",1,null,"R DOS GALVEIAS",1910,1912,{"$raw":"00000000"},"110410","R DOS GALVEIAS","INOP",3,"T",157.38169,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DE FUTEBOL",null,null,"R",null,"110410",1,null,"R DO CAMPO DE FUTEBOL",1911,1913,{"$raw":"00000000"},"110410","R DO CAMPO DE FUTEBOL","INOP",3,"T",70.31548,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1912,1914,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.59124,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA SERRADA",null,"26 ago 2003","R",null,"110410",1,null,"R DA SERRADA",1913,1915,{"$raw":"00000000"},"110410","R DA SERRADA","INOP",3,"T",83.54530,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1914,1916,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,8.06659,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ROMEIRA",null,null,"R",null,"110410",1,null,"R DA ROMEIRA",1915,1917,{"$raw":"00000000"},"110410","R DA ROMEIRA","INOP",3,"T",4.64707,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1916,1918,{"$raw":"00000000"},"110410","MJ.3.1215","INOP",3,"T",18.97682,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1917,1919,{"$raw":"00000000"},"110410","MJ.3.1216","INOP",3,"T",2.72010,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1918,1920,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.52273,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1919,1921,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,18.95741,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1920,1922,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,40.17294,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1921,1923,{"$raw":"00000000"},"110410","MJ.3.1217","INOP",3,"T",1.39086,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1922,1924,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,30.23280,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1923,1925,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,9.93488,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1924,1926,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.56070,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1925,1927,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,73.37301,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1926,1928,{"$raw":"00000000"},"110410","MJ.3.1218","INOP",3,"T",10.03498,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1927,1929,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,10.59151,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1928,1930,{"$raw":"00000000"},"110410","MJ.3.1219","INOP",3,"T",86.88704,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1929,1931,{"$raw":"00000000"},"110410","MJ.3.1220","INOP",3,"T",24.56481,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1930,1932,{"$raw":"00000000"},"110410","MJ.3.1221","INOP",3,"T",25.68290,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1931,1933,{"$raw":"00000000"},"110410","MJ.3.1222","INOP",3,"T",20.36503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1932,1934,{"$raw":"00000000"},"110410","MJ.3.1223","INOP",3,"T",26.20305,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1933,1935,{"$raw":"00000000"},"110410","MJ.3.1224","INOP",3,"T",33.07680,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1934,1936,{"$raw":"00000000"},"110410","MJ.3.1225","INOP",3,"T",78.70242,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1935,1937,{"$raw":"00000000"},"110410","MJ.3.1226","INOP",3,"T",12.38128,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1936,1938,{"$raw":"00000000"},"110410","MJ.3.1227","INOP",3,"T",16.78296,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1937,1939,{"$raw":"00000000"},"110410","MJ.3.1228","INOP",3,"T",1.48946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1938,1940,{"$raw":"00000000"},"110410","MJ.3.1229","INOP",3,"T",154.66153,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1939,1941,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,57.44028,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1940,1942,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,38.63753,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1941,1943,{"$raw":"00000000"},"110410","MJ.3.1230","INOP",3,"T",76.39856,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1942,1944,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,157.23087,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1943,1945,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.14142,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1944,1946,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.90913,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1945,1947,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,7.01783,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1946,1948,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,7.40824,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1947,1949,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,32.57681,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1948,1950,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,19.61676,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1949,1951,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,17.69765,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1950,1952,{"$raw":"00000000"},"110410","MJ.1.55","OPER",1,"A",5.27944,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1951,1953,{"$raw":"00000000"},"110410","MJ.1.56","OPER",1,"A",13.46695,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1952,1954,{"$raw":"00000000"},"110410","MJ.3.1231","INOP",3,"T",103.38460,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRINCIPAL",null,"26 ago 2003","R",null,"110410",1,null,"R PRINCIPAL",1953,1955,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",161.12393,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTIGA",null,"26 ago 2003","R",null,"110410",1,null,"R ANTIGA",1954,1956,{"$raw":"00000000"},"110410","R ANTIGA","INOP",3,"T",39.47670,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,"26 ago 2003","R",null,"110410",1,null,"R DA CAPELA",1955,1957,{"$raw":"00000000"},"110410","R DA CAPELA","INOP",3,"T",282.46715,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MOINHO",null,null,"TV",null,"110405",1,null,"TV MOINHO",1956,1958,{"$raw":"00000000"},"110405","TV MOINHO","OPER",2,"A",55.28766,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MIGUEL PIO",null,null,"R",null,"110405",1,null,"R MIGUEL PIO",1957,1959,{"$raw":"00000000"},"110405","R MIGUEL PIO","INOP",3,"T",161.75951,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CASALINHOS",null,null,"R",null,"110410",1,null,"R DOS CASALINHOS",1958,1960,{"$raw":"00000000"},"110410","R DOS CASALINHOS","INOP",3,"T",132.04534,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL VALE CARROTO",null,null,"R",null,"110410",1,null,"R CASAL VALE CARROTO",1959,1961,{"$raw":"00000000"},"110410","R CASAL VALE CARROTO","INOP",3,"T",30.21325,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","PRINCIPAL",null,null,"R",null,"110406",1,null,"R PRINCIPAL",1960,1962,{"$raw":"00000000"},"110406","R PRINCIPAL","OPER",2,"A",155.72369,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DO ROSÁRIO",null,null,"R",null,"110405",1,null,"R Nª SENHORA DO ROSÁRIO",1961,1963,{"$raw":"00000000"},"110405","R Nª SENHORA DO ROSÁRIO","OPER",2,"A",471.23224,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1962,1964,{"$raw":"00000000"},"110410","MJ.3.1232","INOP",3,"T",28.58137,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1963,1965,{"$raw":"00000000"},"110410","MJ.3.1233","INOP",3,"T",48.26120,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1964,1966,{"$raw":"00000000"},"110410","MJ.3.1234","INOP",3,"T",13.78697,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,1965,1967,{"$raw":"00000000"},"110410","MJ.3.1235","INOP",3,"T",134.08963,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1966,1968,{"$raw":"00000000"},"110410","MJ.3.1236","INOP",3,"T",34.92979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1967,1969,{"$raw":"00000000"},"110410","MJ.3.1237","INOP",3,"T",30.94933,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1968,1970,{"$raw":"00000000"},"110410","MJ.3.1238","INOP",3,"T",82.10862,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1969,1971,{"$raw":"00000000"},"110410","MJ.3.1239","INOP",3,"T",90.04777,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1970,1972,{"$raw":"00000000"},"110410","MJ.3.1240","INOP",3,"T",98.32763,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PADRE LEANDRO SERRÃO",null,null,"R",null,"110410",1,null,"R PADRE LEANDRO SERRÃO",1971,1973,{"$raw":"00000000"},"110410","R PADRE LEANDRO SERRÃO","INOP",3,"T",57.48308,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1972,1974,{"$raw":"00000000"},"110410","MJ.3.1241","INOP",3,"T",123.21644,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1973,1975,{"$raw":"00000000"},"110410","MJ.3.1242","INOP",3,"T",9.78833,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1974,1976,{"$raw":"00000000"},"110410","MJ.3.1243","INOP",3,"T",32.14621,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1975,1977,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,150.06136,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1976,1978,{"$raw":"00000000"},"110410","MJ.3.1244","INOP",3,"T",31.74358,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1977,1979,{"$raw":"00000000"},null,"MJ.1.57",null,1,null,3.96793,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1978,1980,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,13.78486,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1979,1981,{"$raw":"00000000"},"110410","MJ.3.1245","INOP",3,"T",30.44098,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1980,1982,{"$raw":"00000000"},"110410","MJ.3.1246","INOP",3,"T",0.34828,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1981,1983,{"$raw":"00000000"},"110410","MJ.3.1247","INOP",3,"T",3.50435,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1982,1984,{"$raw":"00000000"},"110410","MJ.3.1248","INOP",3,"T",67.06715,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1983,1985,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,73.00055,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1984,1986,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,105.68492,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1985,1987,{"$raw":"00000000"},"110410","MJ.3.1249","INOP",3,"T",4.23458,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1986,1988,{"$raw":"00000000"},"110410","MJ.3.1250","INOP",3,"T",46.39380,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1987,1989,{"$raw":"00000000"},"110410","MJ.3.1251","INOP",3,"T",41.81451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1988,1990,{"$raw":"00000000"},"110410","MJ.3.1252","INOP",3,"T",50.67010,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1989,1991,{"$raw":"00000000"},"110410","MJ.3.1253","INOP",3,"T",105.24992,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1990,1992,{"$raw":"00000000"},"110410","MJ.3.1254","INOP",3,"T",162.89550,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1991,1993,{"$raw":"00000000"},"110410","MJ.3.1255","INOP",3,"T",44.18188,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1992,1994,{"$raw":"00000000"},"110410","MJ.3.1256","INOP",3,"T",112.05988,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1993,1995,{"$raw":"00000000"},"110410","MJ.3.1257","INOP",3,"T",12.72412,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1994,1996,{"$raw":"00000000"},"110410","MJ.3.1258","INOP",3,"T",61.60379,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1995,1997,{"$raw":"00000000"},"110410","MJ.3.1259","INOP",3,"T",172.06145,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1996,1998,{"$raw":"00000000"},"110410","MJ.3.1260","INOP",3,"T",37.76144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,1997,1999,{"$raw":"00000000"},"110410","MJ.3.1261","INOP",3,"T",1.12787,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,1998,2000,{"$raw":"00000000"},"110408","MJ.3.1262","INOP",3,"T",9.19035,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,1999,2001,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,231.21894,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2000,2002,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,135.10774,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2001,2003,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,10.81409,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2002,2004,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,272.78702,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2003,2005,{"$raw":"00000000"},"110408","MJ.3.1263","INOP",3,"T",23.99197,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2004,2006,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,123.95486,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2005,2007,{"$raw":"00000000"},"110408","MJ.3.1264","INOP",3,"T",47.51461,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2006,2008,{"$raw":"00000000"},"110410","MJ.3.1265","INOP",3,"T",2.71120,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2007,2009,{"$raw":"00000000"},"110410","MJ.3.1266","INOP",3,"T",185.37135,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2008,2010,{"$raw":"00000000"},"110408","MJ.3.1267","INOP",3,"T",5.50093,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2009,2011,{"$raw":"00000000"},"110408","MJ.1.58","OPER",1,"A",3.75832,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2010,2012,{"$raw":"00000000"},"110408","MJ.3.1268","INOP",3,"T",140.44279,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,2011,2013,{"$raw":"00000000"},"110410","MJ.3.1269","INOP",3,"T",192.30474,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2012,2014,{"$raw":"00000000"},"110410","MJ.2.158","OPER",2,"A",282.05661,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2013,2015,{"$raw":"00000000"},"110410","MJ.3.1270","INOP",3,"T",350.88241,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2014,2016,{"$raw":"00000000"},"110410","MJ.3.1271","INOP",3,"T",37.44072,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2015,2017,{"$raw":"00000000"},"110408","MJ.3.1272","INOP",3,"T",105.13335,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2016,2018,{"$raw":"00000000"},"110410","MJ.3.1273","INOP",3,"T",161.84960,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2017,2019,{"$raw":"00000000"},"110410","MJ.3.1274","INOP",3,"T",2.73095,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2018,2020,{"$raw":"00000000"},"110410","MJ.3.1275","INOP",3,"T",25.50670,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2019,2021,{"$raw":"00000000"},"110410","MJ.3.1276","INOP",3,"T",22.06236,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO DA AMÉLIA","processo nº 01/2010/246","4 jan 2011","R",null,"110410",1,null,"R DO MOINHA DA AMÉLIA",2020,2022,{"$raw":"00000000"},"110410","R DO MOINHA DA AMÉLIA","INOP",3,"T",49.79992,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PÃO DE MILHO",null,"26 ago 2003","R",null,"110410",1,null,"R DO PÃO DE MILHO",2021,2023,{"$raw":"00000000"},"110410","R DO PÃO DE MILHO","INOP",3,"T",39.38930,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO DA AMÉLIA","processo nº 01/2010/246","4 jan 2011","R",null,"110410",1,null,"R DO MOINHO DA AMÉLIA",2022,2024,{"$raw":"00000000"},"110410","R DO MOINHO DA AMÉLIA","INOP",3,"T",3.05792,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF. JULIA CHAVEIRO SOUSA SOARES",null,null,"R",null,"110409",1,null,"R PROF. JULIA CHAVEIRO SOUSA SOARES",2023,2025,{"$raw":"00000000"},"110409","R PROF. JULIA CHAVEIRO SOUSA SOARES","INOP",3,"T",157.80616,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NOVA DO MOINHO",null,"26 mar 2001","R",null,"110405",1,null,"R NOVA DO MOINHO",2024,2026,{"$raw":"00000000"},"110405","R NOVA DO MOINHO","INOP",3,"T",325.47070,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO GUILHERMINO",null,null,"R",null,"110410",1,null,"R DO GUILHERMINO",2025,2027,{"$raw":"00000000"},"110410","R DO GUILHERMINO","INOP",3,"T",70.35670,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PEDREIRA",null,null,"R",null,"110410",1,null,"R DA PEDREIRA",2026,2028,{"$raw":"00000000"},"110410","R DA PEDREIRA","INOP",3,"T",148.98278,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","NOVO",null,null,"BR",null,"110410",1,null,"BR NOVO",2027,2029,{"$raw":"00000000"},"110410","BR NOVO","OPER",2,"A",85.62125,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LAVADOUROS",null,"14/06/2005","ESTR",null,"110401",1,null,"ESTR DOS LAVADOUROS",2028,2030,{"$raw":"00000000"},"110401","ESTR DOS LAVADOUROS","INOP",3,"T",92.10295,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",2029,2031,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",521.01628,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"TV",null,"110410",1,null,"TV DA FONTE",2030,2032,{"$raw":"00000000"},"110410","TV DA FONTE","INOP",3,"T",0.16098,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2031,2033,{"$raw":"00000000"},"110410","MJ.3.1277","INOP",3,"T",42.41600,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2032,2034,{"$raw":"00000000"},"110410","MJ.3.1278","INOP",3,"T",158.16187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2033,2035,{"$raw":"00000000"},"110410","MJ.3.1279","INOP",3,"T",83.94023,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2034,2036,{"$raw":"00000000"},"110410","MJ.3.1280","INOP",3,"T",7.05003,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2035,2037,{"$raw":"00000000"},"110410","MJ.3.1281","INOP",3,"T",77.04833,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2036,2038,{"$raw":"00000000"},"110410","MJ.3.1282","INOP",3,"T",61.88240,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2037,2039,{"$raw":"00000000"},"110410","MJ.3.1283","INOP",3,"T",16.27853,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2038,2040,{"$raw":"00000000"},"110410","MJ.3.1284","INOP",3,"T",9.28259,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2039,2041,{"$raw":"00000000"},"110410","MJ.3.1285","INOP",3,"T",20.13922,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2040,2042,{"$raw":"00000000"},"110410","MJ.3.1286","INOP",3,"T",16.41917,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2041,2043,{"$raw":"00000000"},"110410","MJ.3.1287","INOP",3,"T",63.48207,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2042,2044,{"$raw":"00000000"},"110410","MJ.3.1288","INOP",3,"T",56.74160,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2043,2045,{"$raw":"00000000"},"110410","MJ.3.1289","INOP",3,"T",33.30674,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,2044,2046,{"$raw":"00000000"},"110410","MJ.3.1290","INOP",3,"T",108.24203,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2045,2047,{"$raw":"00000000"},"110410","MJ.3.1291","INOP",3,"T",31.47246,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2046,2048,{"$raw":"00000000"},"110410","MJ.3.1292","INOP",3,"T",3.75410,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2047,2049,{"$raw":"00000000"},"110410","MJ.3.1293","INOP",3,"T",12.18608,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2048,2050,{"$raw":"00000000"},"110410","MJ.3.1294","INOP",3,"T",6.93214,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2049,2051,{"$raw":"00000000"},"110410","MJ.3.1295","INOP",3,"T",8.89247,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2050,2052,{"$raw":"00000000"},"110410","MJ.3.1296","INOP",3,"T",123.18327,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2051,2053,{"$raw":"00000000"},"110410","MJ.3.1297","INOP",3,"T",83.76440,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2052,2054,{"$raw":"00000000"},"110410","MJ.3.1298","INOP",3,"T",5.04946,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2053,2055,{"$raw":"00000000"},"110410","MJ.3.1299","INOP",3,"T",8.60058,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2054,2056,{"$raw":"00000000"},"110410","MJ.3.1300","INOP",3,"T",21.67466,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2055,2057,{"$raw":"00000000"},"110410","MJ.3.1301","INOP",3,"T",36.19263,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2056,2058,{"$raw":"00000000"},"110410","MJ.3.1302","INOP",3,"T",60.21378,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2057,2059,{"$raw":"00000000"},"110410","MJ.3.1303","INOP",3,"T",38.96471,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2058,2060,{"$raw":"00000000"},"110410","MJ.3.1304","INOP",3,"T",29.74328,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2059,2061,{"$raw":"00000000"},"110410","MJ.3.1305","INOP",3,"T",21.81110,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2060,2062,{"$raw":"00000000"},"110410","MJ.3.1306","INOP",3,"T",109.83626,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2061,2064,{"$raw":"00000000"},"110410","MJ.3.1307","INOP",3,"T",177.66133,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2062,2065,{"$raw":"00000000"},"110410","MJ.3.1308","INOP",3,"T",10.30895,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2063,2066,{"$raw":"00000000"},"110410","MJ.3.1309","INOP",3,"T",4.22043,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2064,2067,{"$raw":"00000000"},"110410","MJ.3.1310","INOP",3,"T",15.96885,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2065,2068,{"$raw":"00000000"},"110410","MJ.3.1311","INOP",3,"T",98.72865,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2066,2069,{"$raw":"00000000"},"110410","MJ.3.1312","INOP",3,"T",4.25282,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110410",1,null,null,2067,2070,{"$raw":"00000000"},"110410","MJ.3.1313","INOP",3,"T",148.13299,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2068,2071,{"$raw":"00000000"},"110410","MJ.3.1314","INOP",3,"T",29.36045,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2069,2072,{"$raw":"00000000"},"110410","MJ.3.1315","INOP",3,"T",13.50447,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2070,2073,{"$raw":"00000000"},"110410","MJ.3.1316","INOP",3,"T",118.05093,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2071,2074,{"$raw":"00000000"},"110405","MJ.3.1317","INOP",3,"T",39.81315,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2072,2075,{"$raw":"00000000"},"110405","MJ.3.1318","INOP",3,"T",103.37557,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2073,2076,{"$raw":"00000000"},"110405","MJ.3.1319","INOP",3,"T",12.23842,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,2074,2077,{"$raw":"00000000"},"110410","MJ.3.1320","INOP",3,"T",17.23838,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,2075,2078,{"$raw":"00000000"},"110410","MJ.3.1321","INOP",3,"T",16.26866,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2076,2079,{"$raw":"00000000"},"110410","MJ.3.1322","INOP",3,"T",6.28898,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2077,2080,{"$raw":"00000000"},"110410","MJ.3.1323","INOP",3,"T",5.31681,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2078,2081,{"$raw":"00000000"},"110410","MJ.3.1324","INOP",3,"T",34.82676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2079,2082,{"$raw":"00000000"},"110410","MJ.3.1325","INOP",3,"T",99.15477,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2080,2083,{"$raw":"00000000"},"110410","MJ.3.1326","INOP",3,"T",23.06972,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2081,2084,{"$raw":"00000000"},"110410","MJ.3.1327","INOP",3,"T",3.35058,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2082,2085,{"$raw":"00000000"},"110410","MJ.3.1328","INOP",3,"T",46.15248,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110410",1,null,"CM 1043",2083,2086,{"$raw":"00000000"},"110410","CM 1043","OPER",2,"A",25.35379,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2084,2087,{"$raw":"00000000"},"110410","MJ.3.1329","INOP",3,"T",26.06171,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2085,2088,{"$raw":"00000000"},"110410","MJ.3.1330","INOP",3,"T",7.65645,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2086,2089,{"$raw":"00000000"},"110410","MJ.3.1331","INOP",3,"T",178.44504,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2087,2090,{"$raw":"00000000"},"110410","MJ.3.1332","INOP",3,"T",150.86477,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2088,2091,{"$raw":"00000000"},"110405","MJ.3.1333","INOP",3,"T",41.43525,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2089,2092,{"$raw":"00000000"},"110405","MJ.3.1334","INOP",3,"T",40.82848,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL DUARTE",null,"20 Jul 1998","R",null,"110410",1,null,"R MANUEL DUARTE",2090,2093,{"$raw":"00000000"},"110410","R MANUEL DUARTE","INOP",3,"T",75.78383,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PADRE LEANDRO SERRÃO",null,null,"R",null,"110410",1,null,"R PADRE LEANDRO SERRÃO",2091,2094,{"$raw":"00000000"},"110410","R PADRE LEANDRO SERRÃO","INOP",3,"T",383.49568,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,"20 Jul 1998","R",null,"110410",1,null,"R PRINCIPAL",2092,2095,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",379.76250,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2093,2096,{"$raw":"00000000"},"110405","MJ.3.1335","INOP",3,"T",114.58108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2094,2097,{"$raw":"00000000"},"110405","MJ.3.1336","INOP",3,"T",10.31157,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2095,2098,{"$raw":"00000000"},"110405","MJ.3.1337","INOP",3,"T",19.17947,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2096,2099,{"$raw":"00000000"},"110405","MJ.2.159","OPER",2,"A",98.15898,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2097,2100,{"$raw":"00000000"},"110405","MJ.3.1338","INOP",3,"T",157.45738,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2098,2101,{"$raw":"00000000"},"110405","MJ.3.1339","INOP",3,"T",3.20128,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2099,2102,{"$raw":"00000000"},"110405","MJ.3.1340","INOP",3,"A",29.94747,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2100,2103,{"$raw":"00000000"},"110405","MJ.3.1341","INOP",3,"T",13.69305,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2101,2104,{"$raw":"00000000"},"110405","MJ.3.1342","INOP",3,"T",41.45514,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2102,2105,{"$raw":"00000000"},"110405","MJ.1.59","OPER",1,"A",3.22014,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2103,2106,{"$raw":"00000000"},"110405","MJ.3.1343","INOP",3,"T",42.76044,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2104,2107,{"$raw":"00000000"},"110405","MJ.3.1344","INOP",3,"T",4.54528,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND","da Eirinha",null,null,null,null,null,"110405",1,null,null,2105,2108,{"$raw":"00000000"},"110405","MJ.1.60","OPER",1,"A",160.95593,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2106,2109,{"$raw":"00000000"},"110405","MJ.3.1345","INOP",3,"T",45.05472,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2107,2110,{"$raw":"00000000"},"110405","MJ.3.1346","INOP",3,"T",25.66676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,2108,2111,{"$raw":"00000000"},"110405","MJ.3.1347","INOP",3,"T",292.61081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2109,2112,{"$raw":"00000000"},"110405","MJ.3.1348","INOP",3,"T",193.62421,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2110,2113,{"$raw":"00000000"},"110405","MJ.3.1349","INOP",3,"T",2.26108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2111,2114,{"$raw":"00000000"},"110405","MJ.2.160","OPER",2,"A",2.06119,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2112,2115,{"$raw":"00000000"},"110405","MJ.3.1350","INOP",3,"T",4.72573,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","1º de Dezembro",null,null,null,null,null,"110405",1,null,null,2113,2116,{"$raw":"00000000"},"110405","MJ.3.1351","INOP",3,"T",147.15702,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,2114,2117,{"$raw":"00000000"},"110405","MJ.2.161","OPER",2,"A",177.90401,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2115,2118,{"$raw":"00000000"},"110405","MJ.3.1352","INOP",3,"T",91.24730,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2116,2119,{"$raw":"00000000"},"110405","MJ.2.162","OPER",2,"A",119.02335,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2117,2120,{"$raw":"00000000"},"110405","MJ.2.163","OPER",2,"A",7.00461,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2118,2121,{"$raw":"00000000"},"110405","MJ.2.164","OPER",2,"A",182.90215,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2119,2122,{"$raw":"00000000"},"110405","MJ.3.1353","INOP",3,"T",109.80088,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2120,2123,{"$raw":"00000000"},"110405","MJ.2.165","OPER",2,"A",16.06614,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2121,2124,{"$raw":"00000000"},"110405","MJ.3.1354","INOP",3,"T",19.41150,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2122,2125,{"$raw":"00000000"},"110405","MJ.3.1355","INOP",3,"T",104.73371,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2123,2126,{"$raw":"00000000"},"110410","MJ.3.1356","INOP",3,"T",52.36134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2124,2129,{"$raw":"00000000"},"110410","MJ.3.1357","INOP",3,"T",44.31021,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D LAURA",null,null,"LG",null,"110410",1,null,"LG D LAURA",2125,2130,{"$raw":"00000000"},"110410","LG D LAURA","OPER",2,"A",13.94775,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","BERNARDO MARTINS",null,null,"R",null,"110410",2,"110405","R BERNARDO MARTINS",2126,2131,{"$raw":"00000000"},"110410","R BERNARDO MARTINS","OPER",2,"A",170.83604,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO NOVO",null,null,"R",null,"110410",1,null,"R DO POÇO NOVO",2127,2132,{"$raw":"00000000"},"110410","R DO POÇO NOVO","INOP",3,"A",33.11364,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,null,0,null,"ESTR FLORESTAL",2128,2133,{"$raw":"00000000"},null,"ESTR FLORESTAL",null,2,"A",532.09654,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GENERAL COSTA GOMES",null,null,"LG",null,"110405",1,null,"LG GENERAL COSTA GOMES",2129,2134,{"$raw":"00000000"},"110405","LG GENERAL COSTA GOMES","OPER",2,"A",11.37050,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAVACO",null,null,"TV",null,"110405",1,null,"TV DO CAVACO",2130,2135,{"$raw":"00000000"},"110405","TV DO CAVACO","INOP",3,"T",55.83749,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DAS FLORES",null,null,"R",null,"110405",1,null,"R DAS FLORES",2131,2136,{"$raw":"00000000"},"110405","R DAS FLORES","OPER",2,"A",43.33590,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CERRADINHO",null,null,"R",null,"110405",1,null,"R CERRADINHO",2132,2137,{"$raw":"00000000"},"110405","R CERRADINHO","INOP",3,"T",47.14457,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2133,2138,{"$raw":"00000000"},"110410","MJ.3.1358","INOP",3,"T",42.70048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2134,2139,{"$raw":"00000000"},"110405","MJ.3.1359","INOP",3,"T",50.76470,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2135,2140,{"$raw":"00000000"},"110410","MJ.3.1360","INOP",3,"T",39.88871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2136,2141,{"$raw":"00000000"},"110410","MJ.3.1361","INOP",3,"T",23.09789,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2137,2142,{"$raw":"00000000"},"110410","MJ.3.1362","INOP",3,"T",30.49070,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2138,2143,{"$raw":"00000000"},"110410","MJ.3.1363","INOP",3,"T",40.12700,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2139,2144,{"$raw":"00000000"},"110410","MJ.3.1364","INOP",3,"T",121.14424,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,2140,2145,{"$raw":"00000000"},"110410","MJ.3.1365","INOP",3,"T",255.49331,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2141,2146,{"$raw":"00000000"},"110405","MJ.3.1366","INOP",3,"T",5.98389,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2142,2147,{"$raw":"00000000"},"110405","MJ.3.1367","INOP",3,"T",17.33776,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2143,2148,{"$raw":"00000000"},"110405","MJ.3.1368","INOP",3,"T",31.17190,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2144,2149,{"$raw":"00000000"},"110410","MJ.3.1369","INOP",3,"T",111.34826,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2145,2150,{"$raw":"00000000"},"110410","MJ.3.1370","INOP",3,"T",8.26947,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2146,2151,{"$raw":"00000000"},"110410","MJ.3.1371","INOP",3,"T",44.08243,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2147,2152,{"$raw":"00000000"},"110410","MJ.3.1372","INOP",3,"T",18.46231,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,2148,2153,{"$raw":"00000000"},"110410","MJ.3.1373","INOP",3,"T",172.68301,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2149,2154,{"$raw":"00000000"},"110408","MJ.3.1374","INOP",3,"T",4.39073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2150,2155,{"$raw":"00000000"},"110408","MJ.1.61","OPER",1,"A",3.55609,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2151,2156,{"$raw":"00000000"},"110408","MJ.2.166","OPER",2,"A",85.27051,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2152,2157,{"$raw":"00000000"},"110408","MJ.3.1375","INOP",3,"T",29.46388,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2153,2158,{"$raw":"00000000"},"110410","MJ.3.1376","INOP",3,"T",332.98421,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2154,2159,{"$raw":"00000000"},"110408","MJ.3.1377","INOP",3,"T",15.39774,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2155,2160,{"$raw":"00000000"},"110408","MJ.2.167","OPER",2,"A",357.94228,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2156,2161,{"$raw":"00000000"},"110408","MJ.2.168","OPER",2,"A",37.33609,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2157,2162,{"$raw":"00000000"},"110408","MJ.2.169","OPER",2,"A",2.25258,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2158,2163,{"$raw":"00000000"},"110408","MJ.2.170","OPER",2,"A",129.77483,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2159,2164,{"$raw":"00000000"},"110408","MJ.2.171","OPER",2,"A",20.88651,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2160,2165,{"$raw":"00000000"},"110408","MJ.3.1378","INOP",3,"T",4.89286,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2161,2166,{"$raw":"00000000"},"110408","MJ.3.1379","INOP",3,"T",167.00709,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2162,2167,{"$raw":"00000000"},"110408","MJ.3.1380","INOP",3,"T",133.36737,3.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2163,2168,{"$raw":"00000000"},"110408","MJ.2.172","OPER",2,"A",23.38006,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2164,2169,{"$raw":"00000000"},"110408","MJ.3.1381","INOP",3,"T",29.17994,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2165,2170,{"$raw":"00000000"},"110408","MJ.3.1382","INOP",3,"T",253.78618,3.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2166,2171,{"$raw":"00000000"},"110408","MJ.3.1383","INOP",3,"T",202.67261,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2167,2172,{"$raw":"00000000"},"110408","MJ.3.1384","INOP",3,"T",141.01845,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2168,2173,{"$raw":"00000000"},"110408","MJ.3.1385","INOP",2,"T",185.12513,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2169,2174,{"$raw":"00000000"},"110408","MJ.3.1386","INOP",3,"T",240.81639,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2170,2175,{"$raw":"00000000"},"110408","MJ.2.173","OPER",2,"A",198.22991,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2171,2176,{"$raw":"00000000"},"110408","MJ.2.174","OPER",2,"A",32.63006,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2172,2177,{"$raw":"00000000"},"110405","MJ.3.1387","INOP",3,"T",10.97235,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2173,2178,{"$raw":"00000000"},"110405","MJ.3.1388","INOP",3,"T",123.81542,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2174,2179,{"$raw":"00000000"},"110405","MJ.3.1389","INOP",3,"T",2.28650,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2175,2180,{"$raw":"00000000"},"110405","MJ.3.1390","INOP",3,"T",57.92302,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2176,2181,{"$raw":"00000000"},"110405","MJ.3.1391","INOP",3,"T",20.99077,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2177,2182,{"$raw":"00000000"},"110405","MJ.3.1392","INOP",3,"T",2.59017,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2178,2183,{"$raw":"00000000"},"110405","MJ.3.1393","INOP",3,"T",135.63877,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2179,2184,{"$raw":"00000000"},"110405","MJ.3.1394","INOP",3,"T",5.75254,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2180,2185,{"$raw":"00000000"},"110405","MJ.3.1395","INOP",3,"T",7.82668,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2181,2186,{"$raw":"00000000"},"110405","MJ.3.1396","INOP",3,"T",108.71417,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2182,2187,{"$raw":"00000000"},"110405","MJ.3.1397","INOP",3,"T",28.49778,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2183,2188,{"$raw":"00000000"},"110405","MJ.3.1398","INOP",3,"T",2.47935,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2184,2189,{"$raw":"00000000"},"110405","MJ.3.1399","INOP",3,"T",64.18293,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2185,2190,{"$raw":"00000000"},"110405","MJ.2.175","OPER",2,"A",2.93109,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2186,2191,{"$raw":"00000000"},"110405","MJ.3.1400","INOP",3,"T",40.43464,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2187,2192,{"$raw":"00000000"},"110405","MJ.3.1401","INOP",3,"T",56.81252,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2188,2193,{"$raw":"00000000"},"110405","MJ.3.1402","INOP",3,"T",1.68440,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2189,2194,{"$raw":"00000000"},"110405","MJ.3.1403","INOP",3,"T",1.76828,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2190,2195,{"$raw":"00000000"},"110405","MJ.3.1404","INOP",3,"T",71.39956,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2191,2196,{"$raw":"00000000"},"110405","MJ.3.1405","INOP",3,"T",21.36498,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2192,2197,{"$raw":"00000000"},"110405","MJ.3.1406","INOP",3,"T",4.34425,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2193,2198,{"$raw":"00000000"},"110405","MJ.3.1407","INOP",3,"T",117.30687,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2194,2199,{"$raw":"00000000"},"110405","MJ.3.1408","INOP",3,"T",6.97284,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2195,2200,{"$raw":"00000000"},"110405","MJ.3.1409","INOP",3,"T",53.68170,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS CAPITÃES",null,null,"R",null,"110405",1,null,"R DOS CAPITÃES",2196,2201,{"$raw":"00000000"},"110405","R DOS CAPITÃES","OPER",2,"A",137.65819,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110410",1,null,"R DA FONTE",2197,2202,{"$raw":"00000000"},"110410","R DA FONTE","INOP",3,"T",45.63118,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LOUREIRO",null,null,"R",null,"110410",2,"110405","R DO LOUREIRO",2198,2203,{"$raw":"00000000"},"110410","R DO LOUREIRO","OPER",2,"A",81.97221,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2199,2204,{"$raw":"00000000"},"110405","MJ.3.1410","INOP",3,"T",4.01383,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2200,2205,{"$raw":"00000000"},"110405","MJ.3.1411","INOP",3,"T",11.66410,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2201,2206,{"$raw":"00000000"},"110405","MJ.3.1412","INOP",3,"T",29.98358,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2202,2207,{"$raw":"00000000"},"110405","MJ.3.1413","INOP",3,"T",91.78790,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2203,2208,{"$raw":"00000000"},"110405","MJ.3.1414","INOP",3,"T",132.12636,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2204,2209,{"$raw":"00000000"},"110405","MJ.3.1415","INOP",3,"T",21.86189,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2205,2210,{"$raw":"00000000"},"110405","MJ.3.1416","INOP",3,"T",8.94533,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2206,2211,{"$raw":"00000000"},"110405","MJ.3.1417","INOP",3,"T",115.18971,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2207,2212,{"$raw":"00000000"},"110405","MJ.3.1418","INOP",3,"T",70.39876,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2208,2213,{"$raw":"00000000"},"110405","MJ.3.1419","INOP",3,"T",29.37565,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2209,2214,{"$raw":"00000000"},"110405","MJ.3.1420","INOP",3,"T",56.76926,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2210,2215,{"$raw":"00000000"},"110405","MJ.3.1421","INOP",3,"T",74.73600,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2211,2216,{"$raw":"00000000"},"110405","MJ.3.1422","INOP",3,"T",72.65311,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2212,2217,{"$raw":"00000000"},"110405","MJ.3.1423","INOP",3,"T",12.43101,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2213,2218,{"$raw":"00000000"},"110405","MJ.3.1424","INOP",3,"T",28.58866,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2214,2219,{"$raw":"00000000"},"110405","MJ.3.1425","INOP",3,"T",27.85886,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2215,2220,{"$raw":"00000000"},"110405","MJ.3.1426","INOP",3,"T",95.96633,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2216,2221,{"$raw":"00000000"},"110405","MJ.3.1427","INOP",3,"T",25.45008,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2217,2222,{"$raw":"00000000"},"110405","MJ.3.1428","INOP",3,"T",4.49911,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2218,2223,{"$raw":"00000000"},"110405","MJ.3.1429","INOP",3,"T",19.94601,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2219,2224,{"$raw":"00000000"},"110405","MJ.3.1430","INOP",3,"T",11.97810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2220,2225,{"$raw":"00000000"},"110405","MJ.3.1431","INOP",3,"T",24.39219,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2221,2226,{"$raw":"00000000"},"110405","MJ.2.176","OPER",2,"A",3.32343,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2222,2227,{"$raw":"00000000"},"110405","MJ.3.1432","INOP",3,"T",36.89508,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2223,2228,{"$raw":"00000000"},"110405","MJ.3.1433","INOP",3,"T",0.92266,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2224,2229,{"$raw":"00000000"},"110405","MJ.3.1434","INOP",3,"T",4.35178,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2225,2230,{"$raw":"00000000"},"110405","MJ.3.1435","INOP",3,"T",3.25719,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2226,2231,{"$raw":"00000000"},"110405","MJ.3.1436","INOP",3,"T",0.47413,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2227,2232,{"$raw":"00000000"},"110405","MJ.3.1437","INOP",3,"T",49.38752,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2228,2233,{"$raw":"00000000"},"110405","MJ.3.1438","INOP",3,"T",38.71009,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2229,2234,{"$raw":"00000000"},"110405","MJ.3.1439","INOP",3,"T",51.20090,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2230,2235,{"$raw":"00000000"},"110405","MJ.3.1440","INOP",3,"T",14.14475,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2231,2236,{"$raw":"00000000"},"110405","MJ.3.1441","INOP",3,"T",81.36400,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2232,2237,{"$raw":"00000000"},"110405","MJ.3.1442","INOP",3,"T",25.79259,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2233,2238,{"$raw":"00000000"},"110405","MJ.3.1443","INOP",3,"T",24.10258,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2234,2239,{"$raw":"00000000"},"110405","MJ.3.1444","INOP",3,"T",75.89061,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2235,2240,{"$raw":"00000000"},"110405","MJ.3.1445","INOP",3,"T",123.19672,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2236,2241,{"$raw":"00000000"},"110405","MJ.3.1446","INOP",3,"T",38.56135,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2237,2242,{"$raw":"00000000"},"110405","MJ.3.1447","INOP",3,"T",127.42891,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2238,2243,{"$raw":"00000000"},"110405","MJ.3.1448","INOP",3,"T",25.62745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2239,2244,{"$raw":"00000000"},"110405","MJ.3.1449","INOP",3,"T",33.54247,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2240,2245,{"$raw":"00000000"},"110405","MJ.3.1450","INOP",3,"T",23.96118,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2241,2246,{"$raw":"00000000"},"110405","MJ.3.1451","INOP",3,"T",9.64075,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2242,2247,{"$raw":"00000000"},"110405","MJ.3.1452","INOP",3,"T",23.61356,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2243,2248,{"$raw":"00000000"},"110405","MJ.3.1453","INOP",3,"T",3.39165,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2244,2249,{"$raw":"00000000"},"110405","MJ.3.1454","INOP",3,"T",300.57181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2245,2250,{"$raw":"00000000"},"110405","MJ.3.1455","INOP",3,"T",19.21422,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2246,2251,{"$raw":"00000000"},"110405","MJ.3.1456","INOP",3,"T",2.56720,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2247,2252,{"$raw":"00000000"},"110405","MJ.3.1457","INOP",3,"T",2.24589,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2248,2253,{"$raw":"00000000"},"110405","MJ.3.1458","INOP",3,"T",9.41667,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2249,2254,{"$raw":"00000000"},"110405","MJ.3.1459","INOP",3,"T",107.11646,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2250,2255,{"$raw":"00000000"},"110405","MJ.3.1460","INOP",3,"T",20.27881,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2251,2256,{"$raw":"00000000"},"110405","MJ.3.1461","INOP",3,"T",82.65798,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2252,2257,{"$raw":"00000000"},"110405","MJ.3.1462","INOP",3,"T",5.50599,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,2253,2258,{"$raw":"00000000"},"110405","MJ.3.1463","INOP",3,"T",142.11324,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2254,2259,{"$raw":"00000000"},"110405","MJ.3.1464","INOP",3,"T",19.09510,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,2255,2260,{"$raw":"00000000"},"110410","MJ.3.1465","INOP",3,"T",36.75502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2256,2261,{"$raw":"00000000"},"110405","MJ.3.1466","INOP",3,"T",365.89291,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2257,2262,{"$raw":"00000000"},"110405","MJ.3.1467","INOP",3,"T",1.11288,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2258,2263,{"$raw":"00000000"},"110405","MJ.3.1468","INOP",3,"T",8.95303,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2259,2264,{"$raw":"00000000"},"110405","MJ.3.1469","INOP",3,"T",13.41380,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2260,2265,{"$raw":"00000000"},"110405","MJ.3.1470","INOP",3,"T",50.31973,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2261,2266,{"$raw":"00000000"},"110405","MJ.3.1471","INOP",3,"T",48.04716,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2262,2267,{"$raw":"00000000"},"110408","MJ.3.1472","INOP",3,"T",18.95537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2263,2268,{"$raw":"00000000"},"110408","MJ.3.1473","INOP",3,"T",173.34818,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2264,2269,{"$raw":"00000000"},"110408","MJ.3.1474","INOP",3,"T",137.28128,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2265,2270,{"$raw":"00000000"},"110408","MJ.3.1475","INOP",3,"T",1.73649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2266,2271,{"$raw":"00000000"},"110408","MJ.3.1476","INOP",3,"T",8.98226,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2267,2272,{"$raw":"00000000"},"110408","MJ.3.1477","INOP",3,"T",3.38256,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2268,2273,{"$raw":"00000000"},"110408","MJ.3.1478","INOP",3,"T",190.87013,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2269,2274,{"$raw":"00000000"},"110408","MJ.3.1479","INOP",3,"T",195.48908,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2270,2275,{"$raw":"00000000"},"110408","MJ.3.1480","INOP",3,"T",37.14794,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2271,2276,{"$raw":"00000000"},"110408","MJ.3.1481","INOP",3,"T",3.68741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2272,2277,{"$raw":"00000000"},"110408","MJ.3.1482","INOP",3,"T",149.91340,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2273,2278,{"$raw":"00000000"},"110408","MJ.3.1483","INOP",3,"T",3.69303,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA QUINTA DA NORUEGA",null,"16/11/2004","ESTR",null,"110405",1,null,"ESTR DA QUINTA DA NORUEGA",2274,2279,{"$raw":"00000000"},"110405","ESTR DA QUINTA DA NORUEGA","INOP",3,"T",330.61047,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZINHA",null,null,"R",null,"110405",1,null,"R DA CRUZINHA",2275,2280,{"$raw":"00000000"},"110405","R DA CRUZINHA","OPER",2,"A",148.84951,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2276,2281,{"$raw":"00000000"},"110408","MJ.3.1484","INOP",3,"T",3.63347,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2277,2282,{"$raw":"00000000"},"110408","MJ.3.1485","INOP",3,"T",56.62618,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2278,2283,{"$raw":"00000000"},"110408","MJ.3.1486","INOP",3,"T",64.51279,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2279,2284,{"$raw":"00000000"},"110408","MJ.3.1487","INOP",3,"T",3.84401,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2280,2285,{"$raw":"00000000"},"110408","MJ.2.177","OPER",2,"A",63.65090,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2281,2286,{"$raw":"00000000"},"110408","MJ.2.178","OPER",2,"A",20.01211,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2282,2287,{"$raw":"00000000"},"110408","MJ.2.179","INOP",2,"T",94.44468,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2283,2288,{"$raw":"00000000"},"110408","MJ.2.180","OPER",2,"A",13.49397,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2284,2289,{"$raw":"00000000"},"110408","MJ.3.1488","INOP",3,"T",1.31700,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2285,2290,{"$raw":"00000000"},"110408","MJ.3.1489","INOP",3,"T",226.64083,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2286,2291,{"$raw":"00000000"},"110408","MJ.3.1490","INOP",3,"T",2.35697,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2287,2292,{"$raw":"00000000"},"110408","MJ.3.1491","INOP",3,"T",17.11935,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2288,2293,{"$raw":"00000000"},"110408","MJ.3.1492","INOP",3,"T",145.91980,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2289,2294,{"$raw":"00000000"},"110408","MJ.3.1493","INOP",3,"T",7.00877,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2290,2295,{"$raw":"00000000"},"110408","MJ.3.1494","INOP",3,"T",3.16244,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2291,2296,{"$raw":"00000000"},"110408","MJ.3.1495","INOP",3,"T",70.07054,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2292,2297,{"$raw":"00000000"},"110408","MJ.3.1496","INOP",3,"T",14.59189,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2293,2298,{"$raw":"00000000"},"110408","MJ.3.1497","INOP",3,"T",117.69907,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2294,2299,{"$raw":"00000000"},"110408","MJ.3.1498","INOP",3,"T",197.78361,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2295,2300,{"$raw":"00000000"},"110408","MJ.3.1499","INOP",3,"T",7.80283,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2296,2301,{"$raw":"00000000"},"110408","MJ.3.1500","INOP",3,"T",7.78792,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2297,2302,{"$raw":"00000000"},"110408","MJ.3.1501","INOP",3,"T",168.42026,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2298,2303,{"$raw":"00000000"},"110408","MJ.3.1502","INOP",3,"T",73.39040,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2299,2304,{"$raw":"00000000"},"110408","MJ.3.1503","INOP",3,"T",79.09321,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2300,2305,{"$raw":"00000000"},"110408","MJ.3.1504","INOP",3,"T",2.42539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2301,2306,{"$raw":"00000000"},"110408","MJ.3.1505","INOP",3,"T",78.79448,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2302,2307,{"$raw":"00000000"},"110408","MJ.3.1506","INOP",3,"T",19.86809,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2303,2308,{"$raw":"00000000"},"110408","MJ.3.1507","INOP",3,"T",27.46419,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2304,2309,{"$raw":"00000000"},"110408","MJ.3.1508","INOP",3,"T",15.49752,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2305,2310,{"$raw":"00000000"},"110408","MJ.3.1509","INOP",3,"T",44.64951,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2306,2311,{"$raw":"00000000"},"110408","MJ.3.1510","INOP",3,"T",80.27243,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2307,2312,{"$raw":"00000000"},"110408","MJ.3.1511","INOP",3,"T",58.98638,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2308,2313,{"$raw":"00000000"},"110408","MJ.3.1512","INOP",3,"T",44.26244,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2309,2314,{"$raw":"00000000"},"110408","MJ.3.1513","INOP",3,"T",369.27272,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2310,2315,{"$raw":"00000000"},"110408","MJ.3.1514","INOP",3,"T",3.92818,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2311,2316,{"$raw":"00000000"},"110408","MJ.3.1515","INOP",3,"T",1.82428,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2312,2317,{"$raw":"00000000"},"110408","MJ.3.1516","INOP",3,"T",76.20721,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2313,2318,{"$raw":"00000000"},"110408","MJ.3.1517","INOP",3,"T",2.27695,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2314,2319,{"$raw":"00000000"},"110408","MJ.3.1518","INOP",3,"T",18.00983,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2315,2320,{"$raw":"00000000"},"110408","MJ.3.1519","INOP",3,"T",22.20659,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2316,2321,{"$raw":"00000000"},"110408","MJ.3.1520","INOP",3,"T",84.14097,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2317,2322,{"$raw":"00000000"},"110408","MJ.3.1521","INOP",3,"T",128.04812,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2318,2323,{"$raw":"00000000"},"110408","MJ.3.1522","INOP",3,"T",47.55938,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2319,2324,{"$raw":"00000000"},"110408","MJ.2.181","OPER",2,"A",377.69080,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2320,2325,{"$raw":"00000000"},"110408","MJ.2.182","OPER",2,"A",46.86560,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2321,2326,{"$raw":"00000000"},"110408","MJ.2.183","OPER",2,"A",10.38058,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2322,2327,{"$raw":"00000000"},"110408","MJ.3.1523","INOP",3,"T",4.18011,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2323,2328,{"$raw":"00000000"},"110408","MJ.3.1524","INOP",3,"T",3.18291,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2324,2329,{"$raw":"00000000"},"110408","MJ.3.1525","INOP",3,"T",125.17367,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2325,2330,{"$raw":"00000000"},"110408","MJ.3.1526","INOP",3,"T",44.75422,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2326,2331,{"$raw":"00000000"},"110408","MJ.3.1527","INOP",3,"T",617.31028,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2327,2332,{"$raw":"00000000"},"110408","MJ.3.1528","INOP",3,"T",5.97235,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2328,2333,{"$raw":"00000000"},"110408","MJ.3.1529","INOP",3,"T",5.88874,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2329,2334,{"$raw":"00000000"},"110408","MJ.2.184","OPER",2,"A",130.68834,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2330,2335,{"$raw":"00000000"},"110408","MJ.2.185","OPER",2,"A",3.64792,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2331,2336,{"$raw":"00000000"},"110408","MJ.3.1530","INOP",3,"T",9.71404,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2332,2337,{"$raw":"00000000"},"110408","MJ.3.1531","INOP",3,"T",2.03794,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2333,2338,{"$raw":"00000000"},"110408","MJ.2.186","OPER",2,"A",224.91828,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2334,2339,{"$raw":"00000000"},"110408","MJ.2.187","OPER",2,"A",167.51935,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2335,2340,{"$raw":"00000000"},"110408","MJ.2.188","OPER",2,"A",85.75798,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2336,2341,{"$raw":"00000000"},"110408","MJ.2.189","OPER",2,"A",237.71187,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2337,2342,{"$raw":"00000000"},"110408","MJ.2.190","OPER",2,"A",145.74308,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2338,2343,{"$raw":"00000000"},"110408","MJ.2.191","OPER",2,"A",91.59083,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2339,2344,{"$raw":"00000000"},"110408","MJ.3.1532","INOP",3,"T",170.21608,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2340,2345,{"$raw":"00000000"},"110408","MJ.2.192","OPER",2,"A",187.86084,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2341,2346,{"$raw":"00000000"},"110408","MJ.3.1533","INOP",3,"T",165.98423,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2342,2347,{"$raw":"00000000"},"110408","MJ.3.1534","INOP",3,"T",85.86418,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2343,2348,{"$raw":"00000000"},"110408","MJ.2.193","INOP",2,"T",10.65879,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2344,2349,{"$raw":"00000000"},"110408","MJ.2.194","INOP",2,"T",8.56557,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2345,2350,{"$raw":"00000000"},"110408","MJ.2.195","INOP",2,"T",19.54737,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2346,2351,{"$raw":"00000000"},"110408","MJ.2.196","OPER",2,"A",47.55980,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2347,2352,{"$raw":"00000000"},"110408","MJ.2.197","INOP",2,"T",13.32424,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2348,2353,{"$raw":"00000000"},"110408","MJ.3.1535","INOP",3,"T",16.69722,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOISÉS",null,null,"R",null,"110405",1,null,"R DO MOISÉS",2349,2354,{"$raw":"00000000"},"110405","R DO MOISÉS","OPER",2,"A",30.02183,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,"20 Jul 1998","R",null,"110410",1,null,"R PRINCIPAL",2350,2355,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",84.32985,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS AMAROS",null,null,"R",null,"110410",2,"110405","R DOS AMAROS",2351,2356,{"$raw":"00000000"},"110410","R DOS AMAROS","OPER",2,"A",10.98736,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,"20 Jul 1998","R",null,"110410",1,null,"R PRINCIPAL",2352,2357,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",11.14849,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS AMAROS",null,null,"R",null,"110410",2,"110405","R DOS AMAROS",2353,2358,{"$raw":"00000000"},"110410","R DOS AMAROS","OPER",2,"A",58.41003,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110408",1,null,"R DO CAMPO DA BOLA",2354,2359,{"$raw":"00000000"},"110408","R DO CAMPO DA BOLA","OPER",2,"A",207.65333,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CANTIGAS",null,null,"R",null,"110408",1,null,"R DAS CANTIGAS",2355,2360,{"$raw":"00000000"},"110408","R DAS CANTIGAS","INOP",3,"T",133.05000,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",2356,2361,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",74.02691,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","DA EIRA",null,null,"R",null,"110405",1,null,"R DA EIRA",2357,2362,{"$raw":"00000000"},"110405","R DA EIRA","OPER",2,"A",234.06317,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DA FONTE",null,null,"R",null,"110410",2,"110405","R DA FONTE",2358,2363,{"$raw":"00000000"},"110410","R DA FONTE","OPER",2,"A",112.98536,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","1043-1",null,null,"CM",null,"110410",1,null,"CM 1043-1",2359,2364,{"$raw":"00000000"},"110410","CM 1043-1","OPER",2,"A",204.50995,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","1043-1",null,null,"CM",null,"110410",1,null,"CM 1043-1",2360,2365,{"$raw":"00000000"},"110410","CM 1043-1","OPER",2,"A",440.63866,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CASINHAS",null,null,"R",null,"110410",1,null,"R DAS CASINHAS",2361,2366,{"$raw":"00000000"},"110410","R DAS CASINHAS","OPER",2,"A",190.47080,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS VELHAS",null,null,"R",null,"110405",1,null,"R DAS EIRAS VELHAS",2362,2367,{"$raw":"00000000"},"110405","R DAS EIRAS VELHAS","OPER",2,"A",64.09237,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","1043-1",null,null,"CM",null,"110410",1,null,"CM 1043-1",2363,2368,{"$raw":"00000000"},"110410","CM 1043-1","OPER",2,"A",117.60658,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",2364,2369,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",201.85291,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","DO BONJARDIM",null,null,"R",null,"110410",1,null,"R DO BONJARDIM",2365,2370,{"$raw":"00000000"},"110410","R DO BONJARDIM","OPER",1,"A",221.00190,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110410",1,null,"EN 361-1",2366,2371,{"$raw":"00000000"},"110410","EN 361-1","OPER",1,"A",112.27954,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110410",1,null,"EN 361-1",2367,2372,{"$raw":"00000000"},"110410","EN 361-1","OPER",1,"A",295.13898,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2368,2373,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",151.84277,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2369,2374,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",584.69215,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",2370,2375,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",440.20307,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",2371,2376,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",249.36962,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",2372,2377,{"$raw":"00000000"},"110410","R DAS FLORES","OPER",2,"A",35.51192,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","1042",null,null,"CM",null,"110410",1,null,"CM 1042",2373,2378,{"$raw":"00000000"},"110410","CM 1042","OPER",2,"A",521.37487,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110410",1,null,"EM 574",2374,2379,{"$raw":"00000000"},"110410","EM 574","OPER",2,"A",364.92585,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2375,2380,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",231.02474,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2376,2381,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",51.47486,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",2377,2382,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",19.53683,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ATRÁS DOS QUINTAIS",null,null,"R",null,"110410",1,null,"R ATRÁS DOS QUINTAIS",2378,2383,{"$raw":"00000000"},"110410","R ATRÁS DOS QUINTAIS","OPER",2,"A",120.38805,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CEDROS",null,null,"R",null,"110405",1,null,"R DOS CEDROS",2379,2384,{"$raw":"00000000"},"110405","R DOS CEDROS","INOP",3,"T",407.93104,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2380,2385,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,9.04829,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2381,2386,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,41.19755,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2382,2387,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,22.83033,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","1042",null,null,"CM",null,"110410",1,null,"CM 1042",2383,2388,{"$raw":"00000000"},"110410","CM 1042","OPER",2,"A",220.18174,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",2384,2389,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",26.98437,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALVERDE",null,null,"R",null,"110410",1,null,"R DO VALVERDE",2385,2390,{"$raw":"00000000"},"110410","R DO VALVERDE","INOP",3,"T",161.71290,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALVERDE",null,null,"R",null,"110410",1,null,"R DO VALVERDE",2386,2391,{"$raw":"00000000"},"110410","R DO VALVERDE","INOP",3,"T",82.12358,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DAS FLORES",null,null,"R",null,"110405",1,null,"R DAS FLORES",2387,2392,{"$raw":"00000000"},"110405","R DAS FLORES","OPER",2,"A",129.74754,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2388,2393,{"$raw":"00000000"},"110405","MJ.1.62","OPER",1,"A",15.63278,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",2389,2394,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",179.12043,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2390,2395,{"$raw":"00000000"},"110405","MJ.1.63","OPER",1,"A",36.33923,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2391,2396,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,65.77255,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","CASAL VALVERDE",null,null,"R",null,"110405",1,null,"R CASAL VALVERDE",2392,2397,{"$raw":"00000000"},"110405","R CASAL VALVERDE","OPER",2,"A",114.67132,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","CASAL VALVERDE",null,null,"R",null,"110405",1,null,"R CASAL VALVERDE",2393,2398,{"$raw":"00000000"},"110405","R CASAL VALVERDE","OPER",2,"A",295.11962,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"4 DE AGOSTO",null,null,"R",null,"110405",1,null,"R 4 DE AGOSTO",2394,2399,{"$raw":"00000000"},"110405","R 4 DE AGOSTO","OPER",2,"A",500.51512,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","1036",null,null,"CM",null,"110405",1,null,"CM 1036",2395,2400,{"$raw":"00000000"},"110405","CM 1036","OPER",2,"A",96.34901,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","1036",null,null,"CM",null,"110405",1,null,"CM 1036",2396,2401,{"$raw":"00000000"},"110405","CM 1036","OPER",2,"A",123.09237,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","DA LIBERDADE",null,null,"AV",null,"110410",1,null,"AV DA LIBERDADE",2397,2402,{"$raw":"00000000"},"110410","AV DA LIBERDADE","OPER",2,"A",184.99333,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","DA LIBERDADE",null,null,"AV",null,"110410",1,null,"AV DA LIBERDADE",2398,2403,{"$raw":"00000000"},"110410","AV DA LIBERDADE","OPER",2,"A",119.24168,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","LAURA SANTOS LIMA",null,null,"AV",null,"110410",1,null,"AV LAURA SANTOS LIMA",2399,2404,{"$raw":"00000000"},"110410","AV LAURA SANTOS LIMA","OPER",2,"A",159.98483,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",2400,2405,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",32.70727,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",2401,2406,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",159.25805,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",2402,2407,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",45.73348,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2403,2408,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1","CM","1042-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",2404,2409,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",115.30937,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",2405,2410,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","INOP",3,"T",37.28591,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2406,2411,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",119.03129,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2407,2412,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",28.53339,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,"14/06/2005","R",null,"110409",1,null,"R 25 DE ABRIL",2408,2413,{"$raw":"00000000"},"110409","R 25 DE ABRIL","OPER",1,"A",41.41810,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",2409,2414,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",109.40565,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"R",null,"110405",1,null,"R 1º DE MAIO",2410,2415,{"$raw":"00000000"},"110405","R 1º DE MAIO","INOP",3,"T",38.50705,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PENEDO AMARELO",null,null,"R",null,"110410",1,null,"R DO PENEDO AMARELO",2411,2416,{"$raw":"00000000"},"110410","R DO PENEDO AMARELO","INOP",3,"T",49.02678,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DE ALCÂNTARA",null,null,"R",null,"110410",1,null,"R DE ALCÂNTARA",2412,2417,{"$raw":"00000000"},"110410","R DE ALCÂNTARA","OPER",1,"A",260.48563,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","DO BONJARDIM",null,null,"R",null,"110410",1,null,"R DO BONJARDIM",2413,2418,{"$raw":"00000000"},"110410","R DO BONJARDIM","OPER",1,"A",172.84732,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CASALINHOS",null,null,"R",null,"110410",1,null,"R DOS CASALINHOS",2414,2419,{"$raw":"00000000"},"110410","R DOS CASALINHOS","INOP",3,"T",174.91738,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CASALINHOS",null,null,"R",null,"110410",1,null,"R DOS CASALINHOS",2415,2420,{"$raw":"00000000"},"110410","R DOS CASALINHOS","INOP",3,"T",118.74338,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,null,0,null,"EN 361-1",2416,2421,{"$raw":"00000000"},null,"EN 361-1",null,1,"A",299.69664,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110405",1,null,"R DA ESPERANÇA",2417,2422,{"$raw":"00000000"},"110405","R DA ESPERANÇA","OPER",1,"A",132.21681,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",2418,2423,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",189.99705,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","DO BONJARDIM",null,null,"R",null,"110410",1,null,"R DO BONJARDIM",2419,2424,{"$raw":"00000000"},"110410","R DO BONJARDIM","OPER",1,"A",134.87107,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110410",1,null,"EN 361-1",2420,2425,{"$raw":"00000000"},"110410","EN 361-1","OPER",1,"A",382.32177,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2421,2426,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",81.42447,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",2422,2427,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",22.11142,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,null,"R",null,"110410",1,null,"R DA CAPELA",2423,2428,{"$raw":"00000000"},"110410","R DA CAPELA","INOP",3,"T",34.31081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,null,"R",null,"110410",1,null,"R DA CAPELA",2424,2429,{"$raw":"00000000"},"110410","R DA CAPELA","OPER",2,"A",88.68616,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","PADRE ANTÓNIO MARIA DE OLIVEIRA",null,null,"R",null,"110410",1,null,"R PADRE ANTÓNIO MARIA DE OLIVEIRA",2425,2430,{"$raw":"00000000"},"110410","R PADRE ANTÓNIO MARIA DE OLIVEIRA","OPER",2,"A",9.98644,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","DO COMÉRCIO",null,null,"R",null,"110410",1,null,"R DO COMÉRCIO",2426,2431,{"$raw":"00000000"},"110410","R DO COMÉRCIO","OPER",2,"A",46.34320,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DAS FLORES",null,null,"R",null,"110405",1,null,"R DAS FLORES",2427,2432,{"$raw":"00000000"},"110405","R DAS FLORES","OPER",2,"A",125.52361,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DA FONTE",null,null,"R",null,"110405",1,null,"R DA FONTE",2428,2433,{"$raw":"00000000"},"110405","R DA FONTE","OPER",2,"A",44.53167,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ROMEIRA",null,null,"R",null,"110405",1,null,"R DA ROMEIRA",2429,2434,{"$raw":"00000000"},"110405","R DA ROMEIRA","INOP",3,"T",8.25998,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ROMEIRA",null,null,"R",null,"110405",1,null,"R DA ROMEIRA",2430,2435,{"$raw":"00000000"},"110405","R DA ROMEIRA","INOP",3,"T",226.07689,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ROMEIRA",null,null,"R",null,"110405",1,null,"R DA ROMEIRA",2431,2436,{"$raw":"00000000"},"110405","R DA ROMEIRA","INOP",3,"T",12.25450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","DOS COMBATENTES DA GRANDE GUERRA",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DA GRANDE GUERRA",2432,2437,{"$raw":"00000000"},"110405","R DOS COMBATENTES DA GRANDE GUERRA","OPER",2,"A",19.45414,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","DA IGREJA",null,null,"R",null,"110405",1,null,"R DA IGREJA",2433,2438,{"$raw":"00000000"},"110405","R DA IGREJA","OPER",2,"A",28.44704,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","DA IGREJA",null,null,"R",null,"110405",1,null,"R DA IGREJA",2434,2439,{"$raw":"00000000"},"110405","R DA IGREJA","OPER",2,"A",63.60839,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","DA IGREJA",null,null,"R",null,"110405",1,null,"R DA IGREJA",2435,2440,{"$raw":"00000000"},"110405","R DA IGREJA","OPER",2,"A",55.38054,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","DA IGREJA",null,null,"R",null,"110405",1,null,"R DA IGREJA",2436,2441,{"$raw":"00000000"},"110405","R DA IGREJA","OPER",2,"A",56.90469,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110405",1,null,"R DA IGREJA",2437,2442,{"$raw":"00000000"},"110405","R DA IGREJA","INOP",3,"T",29.28511,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2438,2443,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2439,2444,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,230.30852,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2440,2445,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,109.91463,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2441,2446,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.96023,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","DO BONJARDIM",null,null,"R",null,"110410",1,null,"R DO BONJARDIM",2442,2447,{"$raw":"00000000"},"110410","R DO BONJARDIM","OPER",1,"A",55.28006,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","DO BONJARDIM",null,null,"R",null,"110410",1,null,"R DO BONJARDIM",2443,2448,{"$raw":"00000000"},"110410","R DO BONJARDIM","OPER",1,"A",6.05832,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110410",1,null,"EN 361-1",2444,2449,{"$raw":"00000000"},"110410","EN 361-1","OPER",1,"A",119.21183,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,null,0,null,"ESTR FLORESTAL",2445,2450,{"$raw":"00000000"},null,"ESTR FLORESTAL",null,2,"A",4.25851,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","DO COMÉRCIO",null,null,"R",null,"110410",1,null,"R DO COMÉRCIO",2446,2451,{"$raw":"00000000"},"110410","R DO COMÉRCIO","OPER",2,"A",32.37867,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","DO COMÉRCIO",null,null,"R",null,"110410",1,null,"R DO COMÉRCIO",2447,2452,{"$raw":"00000000"},"110410","R DO COMÉRCIO","OPER",2,"A",38.37304,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","DO BONJARDIM",null,null,"R",null,"110410",1,null,"R DO BONJARDIM",2448,2453,{"$raw":"00000000"},"110410","R DO BONJARDIM","OPER",1,"A",50.24875,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110410",1,null,"EN 361-1",2449,2454,{"$raw":"00000000"},"110410","EN 361-1","OPER",1,"A",5.98273,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","DO BONJARDIM",null,null,"R",null,"110410",1,null,"R DO BONJARDIM",2450,2455,{"$raw":"00000000"},"110410","R DO BONJARDIM","OPER",1,"A",47.44313,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","DO BONJARDIM",null,null,"R",null,"110410",1,null,"R DO BONJARDIM",2451,2456,{"$raw":"00000000"},"110410","R DO BONJARDIM","OPER",1,"A",4.77821,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","1043-1",null,null,"CM",null,"110410",1,null,"CM 1043-1",2452,2457,{"$raw":"00000000"},"110410","CM 1043-1","OPER",2,"A",36.55722,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","DA LIBERDADE",null,null,"AV",null,"110410",1,null,"AV DA LIBERDADE",2453,2458,{"$raw":"00000000"},"110410","AV DA LIBERDADE","OPER",2,"A",59.14920,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2454,2459,{"$raw":"00000000"},"110410","MJ.3.1536","INOP",3,"T",0.57385,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2455,2460,{"$raw":"00000000"},"110405","MJ.2.198","OPER",2,"A",230.71971,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2456,2461,{"$raw":"00000000"},"110405","MJ.2.199","OPER",2,"A",242.26685,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2457,2462,{"$raw":"00000000"},"110405","MJ.2.200","OPER",2,"A",114.04986,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2458,2463,{"$raw":"00000000"},"110405","MJ.2.201","OPER",2,"A",19.17641,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2459,2464,{"$raw":"00000000"},"110405","MJ.2.202","OPER",2,"A",115.89518,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","517","1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2460,2465,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",114.40411,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","517","1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2461,2466,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",100.03518,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","517","1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2462,2467,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",61.36801,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","517","1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2463,2468,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",86.90072,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DA GRANDE GUERRA",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DA GRANDE GUERRA",2464,2469,{"$raw":"00000000"},"110405","R DOS COMBATENTES DA GRANDE GUERRA","OPER",2,"A",73.37209,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110410",1,null,"EM 574",2465,2470,{"$raw":"00000000"},"110410","EM 574","OPER",2,"A",197.54193,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS AMAROS",null,null,"R",null,"110405",2,"110410","R DOS AMAROS",2466,2471,{"$raw":"00000000"},"110405","R DOS AMAROS","OPER",2,"A",13.31246,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DA FONTE",null,null,"R",null,"110405",1,null,"R DA FONTE",2467,2472,{"$raw":"00000000"},"110405","R DA FONTE","OPER",2,"A",8.38999,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DA FONTE",null,null,"R",null,"110405",1,null,"R DA FONTE",2468,2473,{"$raw":"00000000"},"110405","R DA FONTE","OPER",2,"A",52.08618,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS AMAROS",null,null,"R",null,"110410",2,"110405","R DOS AMAROS",2469,2474,{"$raw":"00000000"},"110410","EM 574","OPER",2,"A",106.58555,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2470,2475,{"$raw":"00000000"},"110410","MJ.3.1537","INOP",3,"T",8.67172,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2471,2476,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.81016,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2472,2477,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,6.88534,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2473,2478,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",117.90595,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2474,2479,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",5.58707,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2475,2480,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",2,"A",2.83699,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2476,2481,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",157.58013,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",2477,2482,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",46.16597,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",2478,2483,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",2.98663,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,"20 Jul 1998","R",null,"110410",1,null,"R 1º DE MAIO",2479,2484,{"$raw":"00000000"},"110410","R 1º DE MAIO","INOP",3,"T",2.85565,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA MATA",null,"26 ago 2003","R",null,"110410",1,null,"R DA MATA",2480,2485,{"$raw":"00000000"},"110410","R DA MATA","INOP",3,"T",84.75019,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",2481,2486,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",282.56113,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",2482,2487,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",18.24610,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"R",null,"110405",1,null,"R 1º DE MAIO",2483,2488,{"$raw":"00000000"},"110405","R 1º DE MAIO","INOP",3,"T",221.56259,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA COVA DA MOURA",null,null,"R",null,"110410",1,null,"R DA COVA DA MOURA",2484,2489,{"$raw":"00000000"},"110410","R DA COVA DA MOURA","INOP",3,"T",324.09996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FIGUEIRA DO N0BRE",null,null,"TV",null,"110410",1,null,"TV DA FIGUEIRA DO N0BRE",2485,2490,{"$raw":"00000000"},"110410","TV DA FIGUEIRA DO N0BRE","INOP",3,"T",152.83338,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110410",1,null,"EM 574",2486,2491,{"$raw":"00000000"},"110410","EM 574","OPER",2,"A",288.47205,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110410",2,null,"EN 115",2487,2492,{"$raw":"00000000"},"110410","EN 115","OPER",1,"A",373.66355,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2488,2493,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",74.27675,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2489,2494,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",36.68602,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2490,2495,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",267.08356,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2491,2496,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",227.95195,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2492,2497,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",140.64300,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110410",1,null,"EN 361-1",2493,2498,{"$raw":"00000000"},"110410","EN 361-1","OPER",1,"A",198.75881,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,"26 ago 2003","R",null,"110410",1,null,"R DOS ARNEIROS",2494,2499,{"$raw":"00000000"},"110410","R DOS ARNEIROS","INOP",3,"T",100.05105,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ISIDORO",null,"15 Nov 2005","BC",null,"110405",1,null,"BC DO ISIDORO",2495,2500,{"$raw":"00000000"},"110405","BC DO ISIDORO","INOP",3,"T",17.63742,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","1043-1",null,null,"CM",null,"110410",1,null,"CM 1043-1",2496,2501,{"$raw":"00000000"},"110410","CM 1043-1","OPER",2,"A",12.01193,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","NOVO",null,null,"BR",null,"110410",1,null,"BR NOVO",2497,2502,{"$raw":"00000000"},"110410","BR NOVO","OPER",2,"A",58.60402,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","NOVO",null,null,"BR",null,"110410",1,null,"BR NOVO",2498,2503,{"$raw":"00000000"},"110410","BR NOVO","OPER",2,"A",5.01851,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","NOVO",null,null,"BR",null,"110410",1,null,"BR NOVO",2499,2504,{"$raw":"00000000"},"110410","BR NOVO","OPER",2,"A",64.34179,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALVERDE",null,null,"R",null,"110410",1,null,"R DO VALVERDE",2500,2505,{"$raw":"00000000"},"110410","R DO VALVERDE","INOP",3,"T",8.86052,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",2501,2506,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",2.59069,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",2502,2507,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",5.24387,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",2503,2508,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",191.24363,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","BERNARDO MARTINS",null,null,"R",null,"110405",1,null,"R BERNARDO MARTINS",2504,2509,{"$raw":"00000000"},"110405","R BERNARDO MARTINS","OPER",2,"A",63.88459,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",2505,2510,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",12.04945,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",2506,2511,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",10.54341,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2507,2512,{"$raw":"00000000"},"110410","MJ.3.1538","INOP",3,"T",5.72081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAGES",null,null,"R",null,"110405",1,null,"R DAS LAGES",2508,2513,{"$raw":"00000000"},"110405","R DAS LAGES","INOP",3,"T",73.17688,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110405",1,null,"R DO CASTELO",2509,2514,{"$raw":"00000000"},"110405","R DO CASTELO","OPER",1,"A",28.86060,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",2510,2515,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",263.71649,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ANDORINHAS",null,null,"R",null,"110405",1,null,"R DAS ANDORINHAS",2511,2516,{"$raw":"00000000"},"110405","R DAS ANDORINHAS","OPER",1,"A",71.82597,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",2512,2517,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",249.60361,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110403",1,null,"R DA FONTE",2513,2518,{"$raw":"00000000"},"110403","R DA FONTE","OPER",1,"A",346.75390,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"AV",null,"110409",1,null,"AV D AFONSO HENRIQUES",2514,2519,{"$raw":"00000000"},"110409","AV D AFONSO HENRIQUES","INOP",3,"T",64.82836,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA COSTA","Dúvidas se poderá ser Estrada em vez de Rua","14/06/2005","R",null,"110409",1,null,"R DA COSTA",2515,2520,{"$raw":"00000000"},"110409","R DA COSTA","INOP",3,"T",46.26026,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D DINIZ",null,null,"AZ",null,"110408",1,null,"AZ D DINIZ",2516,2521,{"$raw":"00000000"},"110408","AZ D DINIZ","OPER",2,"A",261.55582,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TRINDADE",null,"14/06/2005","ESTR",null,"110410",2,"110405","ESTR DA TRINDADE",2517,2522,{"$raw":"00000000"},"110410","ESTR DA TRINDADE","INOP",3,"T",161.28894,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",2518,2523,{"$raw":"00000000"},"110410","R DAS FLORES","INOP",3,"T",113.24642,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALVERDE",null,null,"R",null,"110410",1,null,"R DO VALVERDE",2519,2524,{"$raw":"00000000"},"110410","R DO VALVERDE","INOP",3,"T",101.59163,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","1036",null,null,"CM",null,"110405",1,null,"CM 1036",2520,2525,{"$raw":"00000000"},"110405","CM 1036","OPER",2,"A",63.41888,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","BERNARDO MARTINS",null,null,"R",null,"110405",1,null,"R BERNARDO MARTINS",2521,2526,{"$raw":"00000000"},"110405","R BERNARDO MARTINS","OPER",2,"A",248.96871,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","DOS COMBATENTES DA GRANDE GUERRA",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DA GRANDE GUERRA",2522,2527,{"$raw":"00000000"},"110405","R DOS COMBATENTES DA GRANDE GUERRA","OPER",2,"A",19.71823,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1023","1023",null,null,"CM",null,"110409",1,null,"CM 1023",2523,2528,{"$raw":"00000000"},"110409","CM 1023","OPER",2,"A",251.25915,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,"04/04/2006","TV",null,"110402",1,null,"TV DA LIBERDADE",2524,2529,{"$raw":"00000000"},"110402","TV DA LIBERDADE","OPER",1,"A",103.08027,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LOUREIRO",null,null,"TV",null,"110410",2,"110405","TV DO LOUREIRO",2525,2530,{"$raw":"00000000"},"110410","TV DO LOUREIRO","OPER",2,"A",69.70166,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2526,2531,{"$raw":"00000000"},"110410","MJ.3.1539","INOP",3,"T",37.62388,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE MARÇO",null,null,"R",null,"110410",1,null,"R 15 DE MARÇO",2527,2532,{"$raw":"00000000"},"110410","R 15 DE MARÇO","INOP",3,"T",37.20233,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE MARÇO",null,null,"R",null,"110410",1,null,"R 15 DE MARÇO",2528,2533,{"$raw":"00000000"},"110410","R 15 DE MARÇO","INOP",3,"T",22.45216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110410",1,null,"R DA IGREJA",2529,2534,{"$raw":"00000000"},"110410","R DA IGREJA","INOP",3,"T",95.82231,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",2530,2535,{"$raw":"00000000"},"110410","R DAS FLORES","INOP",3,"T",55.11741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL GAMBOA",null,null,"TV",null,"110410",1,null,"TV MANUEL GAMBOA",2531,2536,{"$raw":"00000000"},"110410","TV MANUEL GAMBOA","INOP",3,"T",6.73085,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",2532,2537,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",73.33828,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110410",2,null,"EN 115",2533,2538,{"$raw":"00000000"},"110410","EN 115","OPER",1,"A",205.15094,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110410",2,null,"EN 115",2534,2539,{"$raw":"00000000"},"110410","EN 115","OPER",1,"A",45.87318,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA FONTE",null,null,"R",null,"110410",1,null,"R DA FONTE",2535,2540,{"$raw":"00000000"},"110410","R DA FONTE","OPER",1,"A",189.72313,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL GAMBOA",null,null,"TV",null,"110410",1,null,"TV MANUEL GAMBOA",2536,2541,{"$raw":"00000000"},"110410","TV MANUEL GAMBOA","INOP",3,"T",51.34041,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110410",1,null,"EM 574",2537,2542,{"$raw":"00000000"},"110410","EM 574","OPER",2,"A",237.94757,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTA ANA",null,"23 Out 2000","LG",null,"110405",1,null,"LG SANTA ANA",2538,2543,{"$raw":"00000000"},"110405","LG SANTA ANA","INOP",3,"T",4.50894,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S TOMÉ",null,null,"R",null,"110405",1,null,"R S TOMÉ",2539,2544,{"$raw":"00000000"},"110405","R S TOMÉ","OPER",2,"A",66.99408,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CHOPA",null,null,"R",null,"110410",1,null,"R DA CHOPA",2540,2545,{"$raw":"00000000"},"110410","R DA CHOPA","INOP",3,"T",315.79567,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110410",1,null,"EN 361-1",2541,2546,{"$raw":"00000000"},"110410","EN 361-1","OPER",1,"A",278.78041,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PIEDADE",null,"15 Nov 2005","BC",null,"110405",1,null,"BC DA PIEDADE",2542,2547,{"$raw":"00000000"},"110405","BC DA PIEDADE","OPER",2,"A",19.11937,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CERRADINHO",null,null,"R",null,"110405",1,null,"R CERRADINHO",2543,2548,{"$raw":"00000000"},"110405","R CERRADINHO","INOP",3,"T",124.60435,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","BERNARDO MARTINS",null,null,"R",null,"110405",1,null,"R BERNARDO MARTINS",2544,2549,{"$raw":"00000000"},"110405","R BERNARDO MARTINS","OPER",2,"A",318.13544,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SOLARES MONTEJUNTO",null,"31 Maio 2006","R",null,"110405",1,null,"R SOLARES MONTEJUNTO",2545,2550,{"$raw":"00000000"},"110405","R SOLARES MONTEJUNTO","INOP",3,"T",164.81752,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA FONTE",null,null,"R",null,"110410",1,null,"R DA FONTE",2546,2551,{"$raw":"00000000"},"110410","R DA FONTE","OPER",1,"A",62.21284,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA FONTE",null,null,"R",null,"110410",1,null,"R DA FONTE",2547,2552,{"$raw":"00000000"},"110410","R DA FONTE","OPER",1,"A",9.28675,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA FONTE",null,null,"R",null,"110410",1,null,"R DA FONTE",2548,2553,{"$raw":"00000000"},"110410","R DA FONTE","OPER",1,"A",113.37954,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA FONTE",null,null,"R",null,"110410",1,null,"R DA FONTE",2549,2554,{"$raw":"00000000"},"110410","R DA FONTE","OPER",1,"A",162.95474,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DE ALCÂNTARA",null,null,"R",null,"110410",1,null,"R DE ALCÂNTARA",2550,2555,{"$raw":"00000000"},"110410","R DE ALCÂNTARA","OPER",1,"A",42.78881,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,"26 ago 2003","EN",null,null,0,null,"EN 115",2551,2556,{"$raw":"00000000"},null,"EN 115",null,1,"A",56.07792,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,null,0,null,"EN 115",2552,2557,{"$raw":"00000000"},null,"EN 115",null,1,"A",83.71754,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DE ALCÂNTARA",null,null,"R",null,"110410",1,null,"R DE ALCÂNTARA",2553,2558,{"$raw":"00000000"},"110410","R DE ALCÂNTARA","OPER",1,"A",181.04799,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DE ALCÂNTARA",null,null,"R",null,"110410",1,null,"R DE ALCÂNTARA",2554,2559,{"$raw":"00000000"},"110410","R DE ALCÂNTARA","OPER",1,"A",26.12936,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",2555,2560,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",25.71877,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",2556,2561,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",69.76583,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2557,2562,{"$raw":"00000000"},"110408","MJ.3.1540","INOP",3,"T",2.27688,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2558,2563,{"$raw":"00000000"},"110408","MJ.3.1541","INOP",3,"T",1.99539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2559,2564,{"$raw":"00000000"},"110408","MJ.3.1542","INOP",3,"T",3.78715,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2560,2565,{"$raw":"00000000"},"110408","MJ.3.1543","INOP",3,"T",170.13517,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2561,2566,{"$raw":"00000000"},"110408","MJ.3.1544","INOP",3,"T",66.68084,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2562,2567,{"$raw":"00000000"},"110408","MJ.3.1545","INOP",3,"T",3.96386,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2563,2568,{"$raw":"00000000"},"110408","MJ.3.1546","INOP",3,"T",124.28195,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2564,2569,{"$raw":"00000000"},"110408","MJ.3.1547","INOP",3,"T",207.25666,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2565,2570,{"$raw":"00000000"},"110408","MJ.3.1548","INOP",3,"T",4.04821,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2566,2571,{"$raw":"00000000"},"110408","MJ.3.1549","INOP",3,"T",121.01367,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2567,2572,{"$raw":"00000000"},"110408","MJ.3.1550","INOP",3,"T",3.84195,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2568,2573,{"$raw":"00000000"},"110408","MJ.3.1551","INOP",3,"T",223.75628,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2569,2574,{"$raw":"00000000"},"110408","MJ.2.203","OPER",2,"A",75.30142,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2570,2575,{"$raw":"00000000"},"110408","MJ.2.204","OPER",2,"A",345.82474,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2571,2576,{"$raw":"00000000"},"110408","MJ.3.1552","INOP",3,"T",23.61966,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2572,2577,{"$raw":"00000000"},"110408","MJ.2.205","OPER",2,"A",1253.08755,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2573,2578,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,157.18948,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2574,2579,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1215.12829,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2575,2580,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,174.45670,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2576,2581,{"$raw":"00000000"},"110408","MJ.3.1553","INOP",3,"T",485.06469,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2577,2582,{"$raw":"00000000"},"110408","MJ.2.206","OPER",2,"A",127.40544,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2578,2583,{"$raw":"00000000"},"110408","MJ.2.207","OPER",2,"A",199.78018,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2579,2584,{"$raw":"00000000"},"110408","MJ.2.208","OPER",2,"A",507.30410,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2580,2585,{"$raw":"00000000"},"110408","MJ.2.209","OPER",2,"A",268.78735,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2581,2586,{"$raw":"00000000"},"110408","MJ.2.210","OPER",2,"A",600.00558,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2582,2587,{"$raw":"00000000"},"110408","MJ.3.1554","INOP",3,"T",247.69940,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2583,2588,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,139.01886,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2584,2589,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,78.23705,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2585,2590,{"$raw":"00000000"},"110408","MJ.3.1555","INOP",3,"T",781.30756,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2586,2591,{"$raw":"00000000"},"110408","MJ.2.211","OPER",2,"A",666.62530,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2587,2592,{"$raw":"00000000"},"110408","MJ.3.1556","INOP",3,"T",100.02056,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2588,2593,{"$raw":"00000000"},"110408","MJ.3.1557","INOP",3,"T",449.91290,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2589,2594,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,372.39421,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2590,2595,{"$raw":"00000000"},"110408","MJ.3.1558","INOP",3,"T",520.69866,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2591,2596,{"$raw":"00000000"},"110408","MJ.3.1559","INOP",3,"T",34.83699,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2592,2597,{"$raw":"00000000"},"110408","MJ.3.1560","INOP",3,"T",459.58870,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2593,2598,{"$raw":"00000000"},"110408","MJ.3.1561","INOP",3,"T",538.14384,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2594,2599,{"$raw":"00000000"},"110408","MJ.3.1562","INOP",3,"T",388.12618,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2595,2600,{"$raw":"00000000"},"110408","MJ.3.1563","INOP",3,"T",36.25572,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2596,2601,{"$raw":"00000000"},"110408","MJ.3.1564","INOP",3,"T",169.32135,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2597,2602,{"$raw":"00000000"},"110408","MJ.3.1565","INOP",3,"T",247.71126,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","VIA","SD",null,null,null,null,null,"110408",1,null,null,2598,2603,{"$raw":"00000000"},"110408","MJ.3.1566","INOP",3,"T",259.45082,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2599,2604,{"$raw":"00000000"},"110408","MJ.3.1567","INOP",3,"T",251.66584,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2600,2605,{"$raw":"00000000"},"110408","MJ.3.1568","INOP",3,"T",382.58032,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2601,2606,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,21.28098,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2602,2607,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,40.66455,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2603,2608,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,21.49277,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2604,2609,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,212.68588,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2605,2610,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,87.14796,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2606,2611,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,74.00374,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS OUTEIRINHOS",null,null,"R",null,"110410",1,null,"R DOS OUTEIRINHOS",2607,2612,{"$raw":"00000000"},"110410","R DOS OUTEIRINHOS","INOP",3,"T",414.67249,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO MOURISCO",null,null,"R",null,"110410",1,null,"R DO OUTEIRO MOURISCO",2608,2613,{"$raw":"00000000"},"110410","R DO OUTEIRO MOURISCO","INOP",3,"T",199.30456,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA RESTAURAÇÃO",null,null,"AV",null,"110410",1,null,"AV DA RESTAURAÇÃO",2609,2614,{"$raw":"00000000"},"110410","AV DA RESTAURAÇÃO","OPER",2,"A",295.19185,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA FONTE",null,null,"R",null,"110410",1,null,"R DA FONTE",2610,2615,{"$raw":"00000000"},"110410","R DA FONTE","OPER",1,"A",60.63041,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,"26 ago 2003","R",null,"110410",1,null,"R DOS ARNEIROS",2611,2616,{"$raw":"00000000"},"110410","R DOS ARNEIROS","INOP",3,"T",38.01941,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ESCOLAS",null,null,"R",null,"110410",1,null,"R DAS ESCOLAS",2612,2617,{"$raw":"00000000"},"110410","R DAS ESCOLAS","INOP",3,"T",66.51974,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2613,2618,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,75.95595,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2614,2619,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.67642,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2615,2620,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,142.97199,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2616,2621,{"$raw":"00000000"},"110408","MJ.3.1569","INOP",3,"A",221.60452,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2617,2622,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,548.61653,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2618,2623,{"$raw":"00000000"},"110408","MJ.3.1570","INOP",3,"T",313.95143,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","VIA","SD",null,null,null,null,null,"110408",1,null,null,2619,2624,{"$raw":"00000000"},"110408","MJ.3.1571","INOP",3,"T",170.78065,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2620,2625,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.74411,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2621,2626,{"$raw":"00000000"},"110408","MJ.3.1572","INOP",3,"T",117.41382,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2622,2627,{"$raw":"00000000"},"110408","MJ.3.1573","INOP",3,"T",188.51020,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2623,2628,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.16484,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2624,2629,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,39.45478,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2625,2630,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.31758,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2626,2631,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,33.18160,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2627,2632,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,157.85592,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","VIA","SD",null,null,null,null,null,"110408",1,null,null,2628,2633,{"$raw":"00000000"},"110408","MJ.3.1574","INOP",3,"T",606.38460,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2629,2634,{"$raw":"00000000"},"110408","MJ.3.1575","INOP",3,"T",261.06511,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2630,2635,{"$raw":"00000000"},"110408","MJ.1.64","OPER",1,"A",3.71140,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2631,2636,{"$raw":"00000000"},"110408","MJ.1.65","OPER",1,"A",3.04608,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2632,2637,{"$raw":"00000000"},"110408","MJ.3.1576","INOP",3,"T",119.78648,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2633,2638,{"$raw":"00000000"},"110408","MJ.2.212","OPER",2,"A",157.63466,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2634,2639,{"$raw":"00000000"},"110408","MJ.3.1577","INOP",3,"T",2.90078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2635,2640,{"$raw":"00000000"},"110408","MJ.3.1578","INOP",3,"T",2.93232,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2636,2641,{"$raw":"00000000"},"110408","MJ.2.213","OPER",2,"A",241.16648,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2637,2642,{"$raw":"00000000"},"110408","MJ.3.1579","INOP",3,"T",205.22786,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2638,2643,{"$raw":"00000000"},"110408","MJ.2.214","OPER",2,"A",207.11283,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2639,2644,{"$raw":"00000000"},"110408","MJ.3.1580","INOP",3,"T",57.35426,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2640,2645,{"$raw":"00000000"},"110408","MJ.3.1581","INOP",3,"T",83.24782,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2641,2646,{"$raw":"00000000"},"110408","MJ.3.1582","INOP",3,"T",2.90271,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,2642,2647,{"$raw":"00000000"},"110410","MJ.3.1583","INOP",3,"T",41.81718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2643,2648,{"$raw":"00000000"},"110408","MJ.3.1584","INOP",3,"T",300.83615,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",2,null,null,2644,2649,{"$raw":"00000000"},"110410","MJ.3.1585","INOP",3,"T",15.51147,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110410",1,"110408",null,2645,2650,{"$raw":"00000000"},"110410","MJ.2.215","OPER",2,"A",123.46195,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2646,2651,{"$raw":"00000000"},"110408","MJ.2.216","OPER",2,"A",113.25071,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2647,2652,{"$raw":"00000000"},"110408","MJ.2.217","OPER",2,"A",11.34402,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2648,2653,{"$raw":"00000000"},"110408","MJ.3.1586","INOP",3,"T",4.01808,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2649,2654,{"$raw":"00000000"},"110408","MJ.3.1587","INOP",3,"T",102.91540,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,2650,2655,{"$raw":"00000000"},"110408","MJ.3.1588","INOP",3,"A",188.64578,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2651,2656,{"$raw":"00000000"},"110408","MJ.3.1589","INOP",3,"T",113.82093,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2652,2657,{"$raw":"00000000"},"110408","MJ.3.1590","INOP",3,"T",303.62883,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2653,2658,{"$raw":"00000000"},"110408","MJ.3.1591","INOP",3,"T",185.14496,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2654,2659,{"$raw":"00000000"},"110408","MJ.3.1592","INOP",3,"T",345.35153,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2655,2660,{"$raw":"00000000"},"110408","MJ.3.1593","INOP",3,"T",37.71741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2656,2661,{"$raw":"00000000"},"110408","MJ.3.1594","INOP",3,"T",40.59575,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2657,2662,{"$raw":"00000000"},"110408","MJ.3.1595","INOP",3,"T",93.14445,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2658,2663,{"$raw":"00000000"},"110408","MJ.2.218","OPER",2,"A",611.50365,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2659,2664,{"$raw":"00000000"},"110408","MJ.3.1596","INOP",3,"T",268.58792,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2660,2665,{"$raw":"00000000"},"110408","MJ.3.1597","INOP",3,"T",121.24596,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,2661,2666,{"$raw":"00000000"},"110408","MJ.3.1598","INOP",3,"T",113.48519,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2662,2667,{"$raw":"00000000"},"110408","MJ.1.66","OPER",1,"A",3.16481,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2663,2668,{"$raw":"00000000"},"110408","MJ.3.1599","INOP",3,"T",175.00937,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2664,2669,{"$raw":"00000000"},"110408","MJ.3.1600","INOP",3,"T",2.58683,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2665,2670,{"$raw":"00000000"},"110408","MJ.3.1601","INOP",3,"T",260.58741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2666,2671,{"$raw":"00000000"},"110408","MJ.3.1602","INOP",3,"T",7.40932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2667,2672,{"$raw":"00000000"},"110408","MJ.3.1603","INOP",3,"T",106.92224,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2668,2673,{"$raw":"00000000"},"110408","MJ.3.1604","INOP",3,"T",99.80284,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2669,2674,{"$raw":"00000000"},"110408","MJ.3.1605","INOP",3,"T",70.38176,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2670,2675,{"$raw":"00000000"},"110408","MJ.3.1606","INOP",3,"T",67.26071,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2671,2676,{"$raw":"00000000"},"110408","MJ.3.1607","INOP",3,"A",11.10385,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2672,2677,{"$raw":"00000000"},"110408","MJ.3.1608","INOP",3,"T",344.32727,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2673,2678,{"$raw":"00000000"},"110408","MJ.3.1609","INOP",3,"T",3.17586,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2674,2679,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.60931,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2675,2680,{"$raw":"00000000"},"110408","MJ.3.1610","INOP",3,"T",206.83494,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2676,2681,{"$raw":"00000000"},"110408","MJ.3.1611","INOP",3,"T",286.73257,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2677,2682,{"$raw":"00000000"},"110408","MJ.3.1612","INOP",3,"T",162.80589,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2678,2683,{"$raw":"00000000"},"110408","MJ.3.1613","INOP",3,"T",17.78310,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2679,2684,{"$raw":"00000000"},"110408","MJ.2.219","OPER",2,null,95.53763,2.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","LIBERDADE",null,null,"R",null,"110408",1,null,"R LIBERDADE",2680,2685,{"$raw":"00000000"},"110408","R LIBERDADE","OPER",2,"A",162.88296,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2681,2686,{"$raw":"00000000"},"110408","MJ.3.1614","INOP",3,"T",204.59111,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2682,2687,{"$raw":"00000000"},"110408","MJ.3.1615","INOP",3,"T",65.02020,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2683,2688,{"$raw":"00000000"},"110408","MJ.3.1616","INOP",3,"T",70.74332,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2684,2689,{"$raw":"00000000"},"110408","MJ.3.1617","INOP",3,"T",832.84627,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2685,2690,{"$raw":"00000000"},"110408","MJ.1.67","OPER",1,"A",10.46729,14.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2686,2691,{"$raw":"00000000"},"110408","MJ.2.220","OPER",2,"A",184.48813,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2687,2692,{"$raw":"00000000"},"110408","MJ.3.1618","INOP",3,"T",4.35409,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2688,2693,{"$raw":"00000000"},"110408","MJ.2.221","OPER",2,"A",79.19411,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2689,2694,{"$raw":"00000000"},"110408","MJ.3.1619","INOP",3,"T",109.28284,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2690,2695,{"$raw":"00000000"},"110408","MJ.3.1620","INOP",2,"T",92.74425,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2691,2696,{"$raw":"00000000"},"110408","MJ.2.222","OPER",2,"A",72.08072,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2692,2697,{"$raw":"00000000"},"110408","MJ.3.1621","INOP",3,"T",221.82187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2693,2698,{"$raw":"00000000"},"110408","MJ.2.223","INOP",2,"T",109.27090,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2694,2699,{"$raw":"00000000"},"110408","MJ.3.1622","INOP",3,"T",215.33664,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2695,2700,{"$raw":"00000000"},"110408","MJ.3.1623","INOP",3,"T",495.65853,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2696,2701,{"$raw":"00000000"},"110408","MJ.2.224","OPER",2,"A",506.10626,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2697,2702,{"$raw":"00000000"},"110408","MJ.3.1624","INOP",3,"T",2.12085,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2698,2703,{"$raw":"00000000"},"110408","MJ.2.225","OPER",2,"A",155.18377,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2699,2704,{"$raw":"00000000"},"110408","MJ.3.1625","INOP",3,"T",719.57971,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2700,2705,{"$raw":"00000000"},"110408","MJ.3.1626","INOP",3,"T",2.81299,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2701,2706,{"$raw":"00000000"},"110408","MJ.3.1627","INOP",3,"T",11.92942,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2702,2707,{"$raw":"00000000"},"110408","MJ.3.1628","INOP",3,"T",492.03830,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2703,2708,{"$raw":"00000000"},"110408","MJ.3.1629","INOP",3,"T",179.89105,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2704,2709,{"$raw":"00000000"},"110408","MJ.3.1630","INOP",3,"T",89.54320,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2705,2710,{"$raw":"00000000"},"110408","MJ.3.1631","INOP",3,"T",149.04408,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2706,2711,{"$raw":"00000000"},"110408","MJ.3.1632","INOP",3,"T",205.02901,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2707,2712,{"$raw":"00000000"},"110408","MJ.3.1633","INOP",3,"T",255.18848,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2708,2713,{"$raw":"00000000"},"110408","MJ.3.1634","INOP",3,"T",177.90329,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2709,2714,{"$raw":"00000000"},"110408","MJ.3.1635","INOP",3,"T",440.83960,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2710,2715,{"$raw":"00000000"},"110408","MJ.2.226","OPER",2,"A",322.84059,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2711,2716,{"$raw":"00000000"},"110408","MJ.2.227","OPER",2,"A",28.19047,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2712,2717,{"$raw":"00000000"},"110408","MJ.2.228","INOP",2,null,52.81335,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2713,2718,{"$raw":"00000000"},"110408","MJ.2.229","OPER",2,"A",240.88151,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2714,2719,{"$raw":"00000000"},"110408","MJ.2.230","OPER",2,"A",23.20188,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2715,2720,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.83210,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2716,2721,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,150.04445,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2717,2722,{"$raw":"00000000"},"110408","MJ.3.1636","INOP",3,"T",420.10579,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2718,2723,{"$raw":"00000000"},"110408","MJ.3.1637","INOP",3,"T",836.53539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2719,2724,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,231.04152,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2720,2725,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,497.50762,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2721,2726,{"$raw":"00000000"},"110408","MJ.2.231","OPER",2,"A",4.14174,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2722,2727,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",257.26409,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2723,2728,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",15.24560,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2724,2729,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",141.68058,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2725,2730,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.00816,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2726,2731,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,252.64499,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",2727,2732,{"$raw":"00000000"},"110408","EN 115","OPER",2,"A",261.18065,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",2728,2733,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",79.67351,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","DOS COMBATENTES DA GRANDE GUERRA",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DA GRANDE GUERRA",2729,2734,{"$raw":"00000000"},"110405","R DOS COMBATENTES DA GRANDE GUERRA","OPER",2,"A",40.57952,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",2730,2735,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",157.74675,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CALÇADA",null,null,"R",null,"110410",1,null,"R DA CALÇADA",2731,2736,{"$raw":"00000000"},"110410","R DA CALÇADA","INOP",3,"T",33.86902,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"R",null,"110405",1,null,"R DO ROSSIO",2732,2737,{"$raw":"00000000"},"110405","R DO ROSSIO","INOP",3,"T",58.90680,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BAIRRO NOVO",null,"26 ago 2003","R",null,"110410",1,null,"R DO BAIRRO NOVO",2733,2738,{"$raw":"00000000"},"110410","R DO BAIRRO NOVO","INOP",3,"T",60.82345,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
[null,"EN","8","8",null,null,"EN",null,"110408",1,null,"IC 1",2734,2739,{"$raw":"00000000"},"110408","IC 1","OPER",1,"A",285.14908,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARREGADO",null,null,"R",null,"110405",1,null,"R DO CARREGADO",2735,2740,{"$raw":"00000000"},"110405","R DO CARREGADO","INOP",3,"T",175.32076,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ARROZ",null,null,"TV",null,"110405",1,null,"TV DO ARROZ",2736,2741,{"$raw":"00000000"},"110405","TV DO ARROZ","INOP",3,"T",96.36647,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2737,2742,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.95552,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2738,2743,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,62.41084,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2739,2744,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,73.40904,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2740,2745,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",198.60244,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,null,0,null,"EN 361-1",2741,2746,{"$raw":"00000000"},null,"EN 361-1",null,1,"A",187.01995,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,null,0,null,"EN 361-1",2742,2747,{"$raw":"00000000"},null,"EN 361-1",null,1,"A",21.49487,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2743,2748,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,24.02424,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2744,2749,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,86.25735,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,null,0,null,"EN 361-1",2745,2750,{"$raw":"00000000"},null,"EN 361-1",null,1,"A",181.78302,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,null,0,null,"EN 361-1",2746,2751,{"$raw":"00000000"},null,"EN 361-1",null,1,"A",237.41292,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2747,2752,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,23.77913,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2748,2753,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,38.80955,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2749,2754,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,22.50866,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,2750,2755,{"$raw":"00000000"},"110408","MJ.1.68","OPER",1,"A",187.95198,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",2751,2756,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",178.85275,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2752,2757,{"$raw":"00000000"},"110403","MJ.3.1638","INOP",3,"T",38.96491,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2753,2758,{"$raw":"00000000"},"110403","MJ.3.1639","INOP",3,"T",5.29755,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2754,2759,{"$raw":"00000000"},"110403","MJ.3.1640","INOP",3,"T",0.64203,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2755,2760,{"$raw":"00000000"},"110403","MJ.3.1641","INOP",3,"T",198.31732,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2756,2761,{"$raw":"00000000"},"110403","MJ.3.1642","INOP",3,"T",107.60780,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2757,2762,{"$raw":"00000000"},"110403","MJ.3.1643","INOP",3,"T",52.71056,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2758,2763,{"$raw":"00000000"},"110403","MJ.3.1644","INOP",3,"T",28.11466,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,2759,2764,{"$raw":"00000000"},"110407","MJ.3.1645","INOP",3,"T",19.87258,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2760,2765,{"$raw":"00000000"},"110403","MJ.3.1646","INOP",3,"T",6.24648,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2761,2766,{"$raw":"00000000"},"110403","MJ.3.1647","INOP",3,"T",150.36339,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2762,2767,{"$raw":"00000000"},"110405","MJ.3.1648","INOP",3,"T",76.06967,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2763,2768,{"$raw":"00000000"},"110405","MJ.3.1649","INOP",3,"T",102.22251,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2764,2769,{"$raw":"00000000"},"110403","MJ.3.1650","INOP",3,"T",6.63083,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2765,2770,{"$raw":"00000000"},"110403","MJ.3.1651","INOP",3,"T",207.60339,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALTO DA EIRA",null,null,"TV",null,"110403",1,null,"TV ALTO DA EIRA",2766,2771,{"$raw":"00000000"},"110403","TV ALTO DA EIRA","INOP",3,"T",22.74504,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALTO DA EIRA",null,null,"TV",null,"110403",1,null,"TV ALTO DA EIRA",2767,2772,{"$raw":"00000000"},"110403","TV ALTO DA EIRA","INOP",3,"T",22.00925,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2768,2773,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.90940,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2769,2774,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.04266,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2770,2775,{"$raw":"00000000"},"110403","MJ.3.1652","INOP",3,"T",114.78421,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2771,2776,{"$raw":"00000000"},"110403","MJ.3.1653","INOP",3,"T",38.88615,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2772,2777,{"$raw":"00000000"},"110403","MJ.3.1654","INOP",3,"T",7.49218,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2773,2778,{"$raw":"00000000"},"110403","MJ.3.1655","INOP",3,"T",335.15452,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2774,2779,{"$raw":"00000000"},"110405","MJ.3.1656","INOP",3,"T",28.41093,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2775,2780,{"$raw":"00000000"},"110405","MJ.3.1657","INOP",3,"T",3.99620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2776,2781,{"$raw":"00000000"},"110405","MJ.3.1658","INOP",3,"T",93.50205,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCO CARDOSO",null,null,"R",null,"110403",1,null,"R FRANCISCO CARDOSO",2777,2782,{"$raw":"00000000"},"110403","R FRANCISCO CARDOSO","INOP",3,"T",83.37517,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",2778,2783,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",209.86076,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"R",null,"110407",1,null,"R DE TRÁS",2779,2784,{"$raw":"00000000"},"110407","R DE TRÁS","INOP",3,"T",21.04168,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2780,2785,{"$raw":"00000000"},"110405","MJ.3.1659","INOP",3,"T",129.18559,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALTO DA EIRA",null,null,"TV",null,"110403",1,null,"TV ALTO DA EIRA",2781,2786,{"$raw":"00000000"},"110403","TV ALTO DA EIRA","INOP",3,"T",20.31946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALTO DA EIRA",null,null,"TV",null,"110403",1,null,"TV ALTO DA EIRA",2782,2787,{"$raw":"00000000"},"110403","TV ALTO DA EIRA","INOP",3,"T",55.33549,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2783,2788,{"$raw":"00000000"},"110403","MJ.3.1660","INOP",3,"T",630.61633,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2784,2789,{"$raw":"00000000"},"110403","MJ.3.1661","INOP",3,"T",5.10083,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2785,2790,{"$raw":"00000000"},"110403","MJ.3.1662","INOP",3,"T",70.35193,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2786,2791,{"$raw":"00000000"},"110403","MJ.3.1663","INOP",3,"T",85.69027,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2787,2792,{"$raw":"00000000"},"110403","MJ.3.1664","INOP",3,"T",3.34079,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2788,2793,{"$raw":"00000000"},"110403","MJ.3.1665","INOP",3,"T",2.12722,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2789,2794,{"$raw":"00000000"},"110403","MJ.3.1666","INOP",3,"T",189.73707,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2790,2795,{"$raw":"00000000"},"110403","MJ.3.1667","INOP",3,"T",3.19547,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2791,2796,{"$raw":"00000000"},"110403","MJ.3.1668","INOP",3,"T",140.50464,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2792,2797,{"$raw":"00000000"},"110403","MJ.3.1669","INOP",3,"T",6.27556,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2793,2798,{"$raw":"00000000"},"110403","MJ.3.1670","INOP",3,"T",4.87908,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2794,2799,{"$raw":"00000000"},"110403","MJ.3.1671","INOP",3,"T",8.21570,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2795,2800,{"$raw":"00000000"},"110403","MJ.3.1672","INOP",3,"T",43.33520,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2796,2801,{"$raw":"00000000"},"110403","MJ.3.1673","INOP",3,"T",4.09625,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2797,2802,{"$raw":"00000000"},"110403","MJ.3.1674","INOP",3,"T",4.93325,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2798,2803,{"$raw":"00000000"},"110403","MJ.3.1675","INOP",3,"T",3.69850,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2799,2804,{"$raw":"00000000"},"110403","MJ.3.1676","INOP",3,"T",5.91230,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,2800,2805,{"$raw":"00000000"},"110407","MJ.3.1677","INOP",3,"T",66.20023,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2801,2806,{"$raw":"00000000"},"110403","MJ.3.1678","INOP",3,"T",4.42030,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2802,2807,{"$raw":"00000000"},"110403","MJ.3.1679","INOP",3,"T",84.03202,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2803,2808,{"$raw":"00000000"},"110403","MJ.3.1680","INOP",3,"T",4.06971,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2804,2809,{"$raw":"00000000"},"110403","MJ.3.1681","INOP",3,"T",231.06042,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2805,2810,{"$raw":"00000000"},"110403","MJ.3.1682","INOP",3,"T",295.20245,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2806,2811,{"$raw":"00000000"},"110403","MJ.3.1683","INOP",3,"T",114.75293,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2807,2812,{"$raw":"00000000"},"110403","MJ.3.1684","INOP",3,"T",75.53961,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2808,2813,{"$raw":"00000000"},"110403","MJ.3.1685","INOP",3,"T",25.47431,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2809,2814,{"$raw":"00000000"},"110403","MJ.3.1686","INOP",3,"T",60.27160,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,2810,2815,{"$raw":"00000000"},"110407","MJ.3.1687","INOP",3,"T",26.04546,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,2811,2816,{"$raw":"00000000"},"110407","MJ.3.1688","INOP",3,"T",217.17413,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2812,2817,{"$raw":"00000000"},"110405","MJ.3.1689","INOP",3,"T",65.52867,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2813,2818,{"$raw":"00000000"},"110405","MJ.3.1690","INOP",3,"T",51.45659,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,2814,2819,{"$raw":"00000000"},"110407","MJ.3.1691","INOP",3,"T",277.35883,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,2815,2820,{"$raw":"00000000"},"110407","MJ.3.1692","INOP",3,"T",69.78481,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2816,2821,{"$raw":"00000000"},"110405","MJ.3.1693","INOP",3,"T",3.75913,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2817,2822,{"$raw":"00000000"},"110405","MJ.3.1694","INOP",3,"T",222.37007,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2818,2823,{"$raw":"00000000"},"110405","MJ.3.1695","INOP",3,"T",92.92358,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2819,2824,{"$raw":"00000000"},"110403","MJ.3.1696","INOP",3,"T",3.56808,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2820,2825,{"$raw":"00000000"},"110403","MJ.3.1697","INOP",3,"T",419.22788,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2821,2826,{"$raw":"00000000"},"110401","MJ.3.1698","INOP",3,"T",115.36312,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2822,2827,{"$raw":"00000000"},"110401","MJ.3.1699","INOP",3,"T",32.27329,3.90000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2823,2828,{"$raw":"00000000"},"110403","MJ.3.1700","INOP",3,"T",8.92552,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2824,2829,{"$raw":"00000000"},"110403","MJ.3.1701","INOP",3,"T",164.07072,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2825,2830,{"$raw":"00000000"},"110403","MJ.3.1702","INOP",3,"T",83.73589,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2826,2831,{"$raw":"00000000"},"110403","MJ.3.1703","INOP",3,"T",150.17086,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2827,2832,{"$raw":"00000000"},"110403","MJ.3.1704","INOP",3,"T",297.83870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2828,2833,{"$raw":"00000000"},"110403","MJ.3.1705","INOP",3,"T",339.51096,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2829,2834,{"$raw":"00000000"},"110403","MJ.3.1706","INOP",3,"T",132.37433,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2830,2835,{"$raw":"00000000"},"110403","MJ.3.1707","INOP",3,"T",273.69254,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2831,2836,{"$raw":"00000000"},"110403","MJ.3.1708","INOP",3,"T",44.27451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2832,2837,{"$raw":"00000000"},"110403","MJ.3.1709","INOP",3,"T",460.46490,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2833,2838,{"$raw":"00000000"},"110403","MJ.3.1710","INOP",3,"T",41.17781,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2834,2839,{"$raw":"00000000"},"110403","MJ.3.1711","INOP",3,"T",345.77287,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2835,2840,{"$raw":"00000000"},"110405","MJ.3.1712","INOP",3,"T",94.45961,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2836,2841,{"$raw":"00000000"},"110405","MJ.3.1713","INOP",3,"T",93.81343,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2837,2842,{"$raw":"00000000"},"110405","MJ.3.1714","INOP",3,"T",93.43733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,2838,2843,{"$raw":"00000000"},"110405","MJ.3.1715","INOP",3,"T",123.11693,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2839,2844,{"$raw":"00000000"},"110403","MJ.3.1716","INOP",3,"T",2.97861,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2840,2845,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,14.20880,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2841,2846,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,11.84527,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2842,2847,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,59.50602,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2843,2848,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,104.62988,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2844,2849,{"$raw":"00000000"},"110403","MJ.3.1717","INOP",3,"T",153.61472,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2845,2850,{"$raw":"00000000"},"110401","MJ.3.1718","INOP",3,"T",419.11820,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2846,2851,{"$raw":"00000000"},"110401","MJ.3.1719","INOP",3,"T",449.71645,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2847,2852,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,230.70677,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2848,2853,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,412.12347,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2849,2854,{"$raw":"00000000"},"110403","MJ.3.1720","INOP",3,"T",441.61609,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2850,2855,{"$raw":"00000000"},"110403","MJ.3.1721","INOP",3,"T",121.31048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2851,2856,{"$raw":"00000000"},"110403","MJ.3.1722","INOP",3,"T",179.60145,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,2852,2857,{"$raw":"00000000"},"110403","MJ.3.1723","INOP",3,"T",567.58731,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2853,2858,{"$raw":"00000000"},"110403","MJ.3.1724","INOP",3,"T",649.91533,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2854,2859,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,144.13311,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2855,2860,{"$raw":"00000000"},"110401","MJ.3.1725","INOP",3,"T",588.14103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2856,2861,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,129.41988,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2857,2862,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,291.41093,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2858,2863,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,213.53592,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2859,2864,{"$raw":"00000000"},"110403","MJ.3.1726","INOP",3,"T",304.12435,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2860,2865,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,106.25356,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,2861,2866,{"$raw":"00000000"},"110403","MJ.3.1727","INOP",3,"T",263.32319,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2862,2867,{"$raw":"00000000"},"110403","MJ.3.1728","INOP",3,"T",234.45224,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2863,2868,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,179.63631,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2864,2869,{"$raw":"00000000"},"110401","MJ.3.1729","INOP",3,"T",670.89029,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2865,2870,{"$raw":"00000000"},"110403","MJ.3.1730","INOP",3,"T",137.48586,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2866,2871,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,306.61239,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2867,2872,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,559.91799,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2868,2873,{"$raw":"00000000"},"110403","MJ.3.1731","INOP",3,"T",665.52671,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2869,2874,{"$raw":"00000000"},"110401","MJ.3.1732","INOP",3,"T",89.23708,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2870,2875,{"$raw":"00000000"},"110401","MJ.3.1733","INOP",3,"T",652.94737,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2871,2876,{"$raw":"00000000"},"110403","MJ.3.1734","INOP",3,"T",152.21539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2872,2877,{"$raw":"00000000"},"110403","MJ.3.1735","INOP",3,"T",102.15290,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2873,2878,{"$raw":"00000000"},"110401","MJ.3.1736","INOP",3,"T",373.71457,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2874,2879,{"$raw":"00000000"},"110403","MJ.3.1737","INOP",3,"T",7.25810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2875,2880,{"$raw":"00000000"},"110403","MJ.3.1738","INOP",3,"T",473.92918,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2876,2881,{"$raw":"00000000"},"110403","MJ.3.1739","INOP",3,"T",123.00691,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110403",1,null,null,2877,2882,{"$raw":"00000000"},"110403","MJ.3.1740","INOP",3,"T",688.86326,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2878,2883,{"$raw":"00000000"},"110403","MJ.3.1741","INOP",3,"T",385.09987,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,2879,2884,{"$raw":"00000000"},"110403","MJ.3.1742","INOP",3,"T",345.21084,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2880,2885,{"$raw":"00000000"},"110403","MJ.3.1743","INOP",3,"T",834.35683,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2881,2886,{"$raw":"00000000"},"110403","MJ.3.1744","INOP",3,"T",281.85405,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2882,2887,{"$raw":"00000000"},"110403","MJ.3.1745","INOP",3,"T",182.90817,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2883,2888,{"$raw":"00000000"},"110403","MJ.3.1746","INOP",3,"T",155.07383,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2884,2889,{"$raw":"00000000"},"110403","MJ.3.1747","INOP",3,"T",493.69613,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2885,2890,{"$raw":"00000000"},"110403","MJ.3.1748","INOP",3,"T",83.15266,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2886,2891,{"$raw":"00000000"},"110403","MJ.3.1749","INOP",3,"T",343.84791,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2887,2892,{"$raw":"00000000"},"110403","MJ.3.1750","INOP",3,"T",482.83015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2888,2893,{"$raw":"00000000"},"110403","MJ.3.1751","INOP",3,"T",150.75881,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2889,2894,{"$raw":"00000000"},"110403","MJ.3.1752","INOP",3,"T",331.44429,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2890,2895,{"$raw":"00000000"},"110403","MJ.3.1753","INOP",3,"T",211.55452,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2891,2896,{"$raw":"00000000"},"110403","MJ.3.1754","INOP",3,"T",193.24335,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2892,2897,{"$raw":"00000000"},"110403","MJ.3.1755","INOP",3,"T",163.63385,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2893,2898,{"$raw":"00000000"},"110403","MJ.3.1756","INOP",3,"T",343.52149,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",2894,2899,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",393.95775,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2895,2900,{"$raw":"00000000"},"110403","MJ.3.1757","INOP",3,"T",202.34847,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2896,2901,{"$raw":"00000000"},"110403","MJ.3.1758","INOP",3,"T",24.43508,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2897,2902,{"$raw":"00000000"},"110403","MJ.3.1759","INOP",3,"T",517.32023,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2898,2903,{"$raw":"00000000"},"110403","MJ.3.1760","INOP",3,"T",399.99801,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2899,2904,{"$raw":"00000000"},"110403","MJ.3.1761","INOP",3,"T",345.21525,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,2900,2905,{"$raw":"00000000"},"110403","MJ.3.1762","INOP",3,"T",568.68901,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2901,2906,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2902,2907,{"$raw":"00000000"},"110403","MJ.3.1763","INOP",3,"T",264.80825,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2903,2908,{"$raw":"00000000"},"110403","MJ.3.1764","INOP",3,"T",298.80030,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2904,2909,{"$raw":"00000000"},"110403","MJ.3.1765","INOP",3,"T",328.68865,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2905,2910,{"$raw":"00000000"},"110403","MJ.3.1766","INOP",3,"T",104.68496,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2906,2911,{"$raw":"00000000"},"110403","MJ.3.1767","INOP",3,"T",0.20104,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2907,2912,{"$raw":"00000000"},"110403","MJ.3.1768","INOP",3,"T",15.18901,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2908,2913,{"$raw":"00000000"},"110403","MJ.3.1769","INOP",3,"T",361.32317,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2909,2914,{"$raw":"00000000"},"110403","MJ.3.1770","INOP",3,"T",135.93132,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2910,2915,{"$raw":"00000000"},"110401","MJ.3.1771","INOP",3,"T",329.73411,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,2911,2916,{"$raw":"00000000"},"110403","MJ.3.1772","INOP",3,"T",599.28223,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2912,2917,{"$raw":"00000000"},"110403","MJ.3.1773","INOP",3,"T",138.35615,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110403",1,null,null,2913,2918,{"$raw":"00000000"},"110403","MJ.3.1774","INOP",3,"T",284.89819,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2914,2919,{"$raw":"00000000"},"110403","MJ.3.1775","INOP",3,"T",103.88596,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2915,2920,{"$raw":"00000000"},"110403","MJ.3.1776","INOP",3,"T",335.75157,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2916,2921,{"$raw":"00000000"},"110403","MJ.3.1777","INOP",3,"T",53.70665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2917,2922,{"$raw":"00000000"},"110403","MJ.3.1778","INOP",3,"T",574.37919,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2918,2923,{"$raw":"00000000"},"110403","MJ.3.1779","INOP",3,"T",222.97191,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2919,2924,{"$raw":"00000000"},"110403","MJ.3.1780","INOP",3,"T",223.33292,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"TV",null,"110403",1,null,"TV DO OUTEIRO",2920,2925,{"$raw":"00000000"},"110403","TV DO OUTEIRO","INOP",3,"T",62.55095,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2921,2926,{"$raw":"00000000"},"110403","MJ.3.1781","INOP",3,"T",34.98773,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2922,2927,{"$raw":"00000000"},"110403","MJ.3.1782","INOP",3,"T",280.44622,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2923,2928,{"$raw":"00000000"},"110403","MJ.3.1783","INOP",3,"T",622.26460,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2924,2929,{"$raw":"00000000"},"110403","MJ.3.1784","INOP",3,"T",38.24700,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,2925,2930,{"$raw":"00000000"},"110403","MJ.3.1785","INOP",3,"T",98.73934,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,2926,2931,{"$raw":"00000000"},"110403","MJ.3.1786","INOP",3,"T",100.66117,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2927,2932,{"$raw":"00000000"},"110403","MJ.3.1787","INOP",3,"T",87.03525,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2928,2933,{"$raw":"00000000"},"110403","MJ.3.1788","INOP",3,"T",162.53213,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110403",1,null,"R DO OUTEIRO",2929,2934,{"$raw":"00000000"},"110403","R DO OUTEIRO","INOP",3,"T",350.96623,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,2930,2935,{"$raw":"00000000"},"110403","MJ.3.1789","INOP",3,"T",118.78589,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110403",1,null,null,2931,2936,{"$raw":"00000000"},"110403","MJ.3.1790","INOP",3,"T",104.62100,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2932,2937,{"$raw":"00000000"},"110403","MJ.3.1791","INOP",3,"T",294.58391,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2933,2938,{"$raw":"00000000"},"110403","MJ.3.1792","INOP",3,"T",65.05750,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2934,2939,{"$raw":"00000000"},"110403","MJ.3.1793","INOP",3,"T",105.55140,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,2935,2940,{"$raw":"00000000"},"110403","MJ.3.1794","INOP",3,"T",203.26436,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2936,2941,{"$raw":"00000000"},"110403","MJ.3.1795","INOP",3,"T",264.83105,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2937,2942,{"$raw":"00000000"},"110403","MJ.3.1796","INOP",3,"T",130.67301,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2938,2943,{"$raw":"00000000"},"110403","MJ.3.1797","INOP",3,"T",349.32719,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2939,2944,{"$raw":"00000000"},"110403","MJ.3.1798","INOP",3,"T",313.85048,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2940,2945,{"$raw":"00000000"},"110403","MJ.3.1799","INOP",3,"T",314.48138,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2941,2946,{"$raw":"00000000"},"110403","MJ.3.1800","INOP",3,"T",520.24327,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2942,2947,{"$raw":"00000000"},"110403","MJ.3.1801","INOP",3,"T",42.06747,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2943,2948,{"$raw":"00000000"},"110403","MJ.3.1802","INOP",3,"T",51.82234,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM","do Cabaçal",null,null,null,null,null,"110403",1,null,null,2944,2949,{"$raw":"00000000"},"110403","MJ.3.1803","INOP",3,"T",161.79576,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2945,2950,{"$raw":"00000000"},"110403","MJ.3.1804","INOP",3,"T",104.06770,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2946,2951,{"$raw":"00000000"},"110403","MJ.3.1805","INOP",3,"T",239.17034,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2947,2952,{"$raw":"00000000"},"110403","MJ.3.1806","INOP",3,"T",325.35266,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2948,2953,{"$raw":"00000000"},"110403","MJ.3.1807","INOP",3,"T",440.85764,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2949,2954,{"$raw":"00000000"},"110403","MJ.3.1808","INOP",3,"T",252.53313,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2950,2955,{"$raw":"00000000"},"110403","MJ.3.1809","INOP",3,"T",186.82903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2951,2956,{"$raw":"00000000"},"110403","MJ.3.1810","INOP",3,"T",52.04180,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2952,2957,{"$raw":"00000000"},"110403","MJ.3.1811","INOP",3,"T",556.28745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,2953,2958,{"$raw":"00000000"},"110403","MJ.3.1812","INOP",3,"T",163.87924,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","dos Baldios",null,null,null,null,null,"110403",1,null,null,2954,2959,{"$raw":"00000000"},"110403","MJ.3.1813","INOP",3,"T",144.02480,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2955,2960,{"$raw":"00000000"},"110403","MJ.3.1814","INOP",3,"T",19.94620,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2956,2961,{"$raw":"00000000"},"110403","MJ.3.1815","INOP",3,"T",381.06557,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2957,2962,{"$raw":"00000000"},"110403","MJ.3.1816","INOP",3,"T",110.59623,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2958,2963,{"$raw":"00000000"},"110403","MJ.3.1817","INOP",3,"T",494.15120,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","da Varzea",null,null,null,null,null,"110403",1,null,null,2959,2964,{"$raw":"00000000"},"110403","MJ.3.1818","INOP",3,"T",68.34038,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2960,2965,{"$raw":"00000000"},"110403","MJ.3.1819","INOP",3,"T",177.43506,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2961,2966,{"$raw":"00000000"},"110401","MJ.3.1820","INOP",3,"T",153.60361,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2962,2967,{"$raw":"00000000"},"110403","MJ.3.1821","INOP",3,"T",26.27847,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,2963,2968,{"$raw":"00000000"},"110403","MJ.3.1822","INOP",3,"T",49.78643,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2964,2969,{"$raw":"00000000"},"110403","MJ.3.1823","INOP",3,"T",334.25343,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2965,2970,{"$raw":"00000000"},"110403","MJ.3.1824","INOP",3,"T",356.04141,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2966,2971,{"$raw":"00000000"},"110403","MJ.3.1825","INOP",3,"T",299.80509,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM","da Varzea",null,null,null,null,null,"110403",1,null,null,2967,2972,{"$raw":"00000000"},"110403","MJ.3.1826","INOP",3,"T",128.95695,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2968,2973,{"$raw":"00000000"},"110403","MJ.3.1827","INOP",3,"T",217.82904,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2969,2974,{"$raw":"00000000"},"110403","MJ.3.1828","INOP",3,"T",260.33580,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",2970,2975,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",55.22886,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2971,2976,{"$raw":"00000000"},"110403","MJ.3.1829","INOP",3,"T",61.79544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2972,2977,{"$raw":"00000000"},"110401","MJ.3.1830","INOP",3,"T",384.80250,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2973,2978,{"$raw":"00000000"},"110403","MJ.3.1831","INOP",3,"T",275.26021,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,2974,2979,{"$raw":"00000000"},"110403","MJ.3.1832","INOP",3,"T",397.88885,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2975,2980,{"$raw":"00000000"},"110403","MJ.3.1833","INOP",3,"T",127.82470,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2976,2981,{"$raw":"00000000"},"110403","MJ.3.1834","INOP",3,"T",181.83122,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2977,2982,{"$raw":"00000000"},"110403","MJ.3.1835","INOP",3,"T",166.32343,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2978,2983,{"$raw":"00000000"},"110403","MJ.3.1836","INOP",3,"T",263.42939,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2979,2984,{"$raw":"00000000"},"110403","MJ.3.1837","INOP",3,"T",171.96995,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2980,2985,{"$raw":"00000000"},"110403","MJ.3.1838","INOP",3,"T",83.25354,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2981,2986,{"$raw":"00000000"},"110403","MJ.3.1839","INOP",3,"T",243.26149,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2982,2987,{"$raw":"00000000"},"110403","MJ.3.1840","INOP",3,"T",502.89529,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2983,2988,{"$raw":"00000000"},"110403","MJ.3.1841","INOP",3,"T",76.77193,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2984,2989,{"$raw":"00000000"},"110403","MJ.3.1842","INOP",3,"T",99.67245,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2985,2990,{"$raw":"00000000"},"110403","MJ.3.1843","INOP",3,"T",197.84944,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2986,2991,{"$raw":"00000000"},"110403","MJ.3.1844","INOP",3,"T",399.04752,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2987,2992,{"$raw":"00000000"},"110403","MJ.3.1845","INOP",3,"T",175.20934,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,2988,2993,{"$raw":"00000000"},"110401","MJ.3.1846","INOP",3,"T",181.62767,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2990,2995,{"$raw":"00000000"},"110403","MJ.3.1848","INOP",3,"T",262.98291,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2991,2996,{"$raw":"00000000"},"110403","MJ.3.1849","INOP",3,"T",54.86637,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2992,2997,{"$raw":"00000000"},"110403","MJ.3.1850","INOP",3,"T",218.11125,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2993,2998,{"$raw":"00000000"},"110403","MJ.3.1851","INOP",3,"T",85.11834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2994,2999,{"$raw":"00000000"},"110403","MJ.3.1852","INOP",3,"T",222.81272,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,2995,3000,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2996,3001,{"$raw":"00000000"},"110403","MJ.3.1853","INOP",3,"T",59.00930,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2997,3002,{"$raw":"00000000"},"110403","MJ.3.1854","INOP",3,"T",397.46587,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2998,3003,{"$raw":"00000000"},"110403","MJ.3.1855","INOP",3,"T",214.93180,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,2999,3004,{"$raw":"00000000"},"110403","MJ.3.1856","INOP",3,"T",227.13108,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3000,3005,{"$raw":"00000000"},"110403","MJ.3.1857","INOP",3,"T",301.40787,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3001,3006,{"$raw":"00000000"},"110403","MJ.3.1858","INOP",3,"T",410.79170,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3002,3007,{"$raw":"00000000"},"110403","MJ.3.1859","INOP",3,"T",71.94822,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3003,3008,{"$raw":"00000000"},"110403","MJ.3.1860","INOP",3,"T",348.90045,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3004,3009,{"$raw":"00000000"},"110403","MJ.3.1861","INOP",3,"T",130.42089,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3005,3010,{"$raw":"00000000"},"110403","MJ.3.1862","INOP",3,"T",544.49218,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3006,3011,{"$raw":"00000000"},"110403","MJ.3.1863","INOP",3,"T",555.60815,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3007,3012,{"$raw":"00000000"},"110403","MJ.3.1864","INOP",3,"T",180.24611,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3008,3013,{"$raw":"00000000"},"110403","MJ.3.1865","INOP",3,"T",297.31986,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3009,3014,{"$raw":"00000000"},"110403","MJ.3.1866","INOP",3,"T",56.76905,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3010,3015,{"$raw":"00000000"},"110403","MJ.3.1867","INOP",3,"T",406.34827,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3011,3016,{"$raw":"00000000"},"110401","MJ.3.1868","INOP",3,"T",483.50124,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3012,3017,{"$raw":"00000000"},"110403","MJ.3.1869","INOP",3,"T",150.45813,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3013,3018,{"$raw":"00000000"},"110403","MJ.3.1870","INOP",3,"T",535.72526,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3014,3019,{"$raw":"00000000"},"110403","MJ.3.1871","INOP",3,"T",353.65513,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3015,3020,{"$raw":"00000000"},"110403","MJ.3.1872","INOP",3,"T",551.63638,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3016,3021,{"$raw":"00000000"},"110403","MJ.3.1873","INOP",3,"T",138.93971,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3017,3022,{"$raw":"00000000"},"110403","MJ.3.1874","INOP",3,"T",188.48675,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3018,3023,{"$raw":"00000000"},"110403","MJ.3.1875","INOP",3,"T",348.06250,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3019,3024,{"$raw":"00000000"},"110403","MJ.3.1876","INOP",3,"T",98.54567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3020,3025,{"$raw":"00000000"},"110403","MJ.3.1877","INOP",3,"T",314.68186,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3021,3026,{"$raw":"00000000"},"110403","MJ.3.1878","INOP",3,"T",115.95664,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3022,3027,{"$raw":"00000000"},"110403","MJ.3.1879","INOP",3,"T",8.22478,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3023,3028,{"$raw":"00000000"},"110403","MJ.3.1880","INOP",3,"T",233.69243,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3024,3029,{"$raw":"00000000"},"110403","MJ.3.1881","INOP",3,"T",205.78781,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3025,3030,{"$raw":"00000000"},"110403","MJ.3.1882","INOP",3,"T",199.81118,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3026,3031,{"$raw":"00000000"},"110403","MJ.3.1883","INOP",3,"T",313.96021,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3027,3032,{"$raw":"00000000"},"110403","MJ.3.1884","INOP",3,"T",58.36175,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3028,3033,{"$raw":"00000000"},"110403","MJ.3.1885","INOP",3,"T",133.16142,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3029,3034,{"$raw":"00000000"},"110403","MJ.3.1886","INOP",3,"T",201.85985,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3030,3035,{"$raw":"00000000"},"110403","MJ.3.1887","INOP",3,"T",425.50043,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3031,3036,{"$raw":"00000000"},"110401","MJ.3.1888","INOP",3,"T",26.23455,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3032,3037,{"$raw":"00000000"},"110403","MJ.3.1889","INOP",3,"T",267.31146,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3033,3038,{"$raw":"00000000"},"110403","MJ.3.1890","INOP",3,"T",28.65086,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3034,3039,{"$raw":"00000000"},"110403","MJ.3.1891","INOP",3,"T",335.52478,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3035,3040,{"$raw":"00000000"},"110403","ACEIRO","INOP",3,"T",222.75610,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3036,3041,{"$raw":"00000000"},"110403","MJ.3.1892","INOP",3,"T",456.30271,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3037,3042,{"$raw":"00000000"},"110403","MJ.3.1893","INOP",3,"T",47.15611,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3038,3043,{"$raw":"00000000"},"110403","MJ.3.1894","INOP",3,"T",69.26851,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3039,3044,{"$raw":"00000000"},"110401","MJ.3.1895","INOP",3,"T",378.69448,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,3040,3045,{"$raw":"00000000"},"110403","MJ.3.1896","INOP",3,"T",68.78012,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3041,3046,{"$raw":"00000000"},"110403","MJ.3.1897","INOP",3,"T",85.23680,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3042,3047,{"$raw":"00000000"},"110403","MJ.3.1898","INOP",3,"T",81.23012,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3043,3048,{"$raw":"00000000"},"110403","ACEIRO","INOP",3,"T",777.78048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3044,3049,{"$raw":"00000000"},"110401","MJ.3.1899","INOP",3,"T",272.39425,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3045,3050,{"$raw":"00000000"},"110403","MJ.3.1900","INOP",3,"T",86.95143,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3046,3051,{"$raw":"00000000"},"110403","MJ.3.1901","INOP",3,"T",229.94753,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3047,3052,{"$raw":"00000000"},"110403","MJ.3.1902","INOP",3,"T",105.10706,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3048,3053,{"$raw":"00000000"},"110403","MJ.3.1903","INOP",3,"T",313.79687,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3049,3054,{"$raw":"00000000"},"110403","MJ.3.1904","INOP",3,"T",6.92311,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3050,3055,{"$raw":"00000000"},"110403","MJ.3.1905","INOP",3,"T",453.22434,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3051,3056,{"$raw":"00000000"},"110403","MJ.3.1906","INOP",3,"T",115.11026,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3052,3057,{"$raw":"00000000"},"110401","MJ.3.1907","INOP",3,"T",272.49579,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3053,3058,{"$raw":"00000000"},"110403","MJ.3.1908","INOP",3,"T",95.81518,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3054,3059,{"$raw":"00000000"},"110403","MJ.3.1909","INOP",3,"T",534.44859,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3055,3060,{"$raw":"00000000"},"110403","MJ.3.1910","INOP",3,"T",444.53759,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3056,3061,{"$raw":"00000000"},"110403","MJ.3.1911","INOP",3,"T",458.56462,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3057,3062,{"$raw":"00000000"},"110401","MJ.3.1912","INOP",3,"T",97.46084,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3058,3063,{"$raw":"00000000"},"110403","MJ.3.1913","INOP",3,"T",26.99633,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3059,3064,{"$raw":"00000000"},"110403","MJ.3.1914","INOP",3,"T",128.39431,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3060,3065,{"$raw":"00000000"},"110403","MJ.3.1915","INOP",3,"T",222.40676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3061,3066,{"$raw":"00000000"},"110401","MJ.3.1916","INOP",3,"T",146.40658,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3062,3067,{"$raw":"00000000"},"110401","MJ.3.1917","INOP",3,"T",92.69307,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3063,3068,{"$raw":"00000000"},"110401","MJ.3.1918","INOP",3,"T",68.53741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3064,3069,{"$raw":"00000000"},"110403","MJ.3.1919","INOP",3,"T",106.27456,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3065,3070,{"$raw":"00000000"},"110403","MJ.3.1920","INOP",3,"T",47.38112,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3066,3071,{"$raw":"00000000"},"110403","ACEIRO","INOP",3,"T",319.01296,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3067,3072,{"$raw":"00000000"},"110403","MJ.3.1921","INOP",3,"T",585.20190,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3068,3073,{"$raw":"00000000"},"110403","MJ.3.1922","INOP",3,"T",134.67543,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3069,3074,{"$raw":"00000000"},"110403","MJ.3.1923","INOP",3,"T",50.66308,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3070,3075,{"$raw":"00000000"},"110403","MJ.3.1924","INOP",3,"T",201.93738,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3071,3076,{"$raw":"00000000"},"110403","ACEIRO","INOP",3,"T",594.91884,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3072,3077,{"$raw":"00000000"},"110403","MJ.3.1925","INOP",3,"T",53.05770,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3073,3078,{"$raw":"00000000"},"110403","MJ.3.1926","INOP",3,"T",248.22593,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3074,3079,{"$raw":"00000000"},"110403","MJ.3.1927","INOP",3,"T",278.10226,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,3075,3080,{"$raw":"00000000"},"110403","MJ.3.1928","INOP",3,"T",253.80795,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3076,3081,{"$raw":"00000000"},"110403","MJ.3.1929","INOP",3,"T",61.44453,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3077,3082,{"$raw":"00000000"},"110403","MJ.3.1930","INOP",3,"T",331.00569,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3078,3083,{"$raw":"00000000"},"110403","MJ.3.1931","INOP",3,"T",322.27266,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3079,3084,{"$raw":"00000000"},"110403","MJ.3.1932","INOP",3,"T",173.07464,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3080,3085,{"$raw":"00000000"},"110403","MJ.3.1933","INOP",3,"T",67.92647,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3081,3086,{"$raw":"00000000"},"110403","MJ.3.1934","INOP",3,"T",425.91814,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3082,3087,{"$raw":"00000000"},"110407","MJ.3.1935","INOP",3,"T",191.87671,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3083,3088,{"$raw":"00000000"},"110401","MJ.3.1936","INOP",3,"T",423.16689,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3084,3089,{"$raw":"00000000"},"110403","MJ.3.1937","INOP",3,"T",304.14950,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3085,3090,{"$raw":"00000000"},"110403","MJ.3.1938","INOP",3,"T",147.24954,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3086,3091,{"$raw":"00000000"},"110403","MJ.3.1939","INOP",3,"T",409.74169,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3087,3092,{"$raw":"00000000"},"110403","MJ.3.1940","INOP",3,"T",428.29454,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3088,3093,{"$raw":"00000000"},"110403","MJ.3.1941","INOP",3,"T",145.67154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3089,3094,{"$raw":"00000000"},"110407","MJ.3.1942","INOP",3,"T",211.58478,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3090,3095,{"$raw":"00000000"},"110403","MJ.3.1943","INOP",3,"T",71.85421,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3091,3096,{"$raw":"00000000"},"110401","MJ.3.1944","INOP",3,"T",443.20261,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3092,3097,{"$raw":"00000000"},"110403","ACEIRO","INOP",3,"T",194.76756,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3093,3098,{"$raw":"00000000"},"110403","ACEIRO","INOP",3,"T",305.83129,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3094,3099,{"$raw":"00000000"},"110407","MJ.3.1945","INOP",3,"T",286.88406,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3095,3100,{"$raw":"00000000"},"110403","MJ.3.1946","INOP",3,"T",185.54089,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3096,3101,{"$raw":"00000000"},"110403","MJ.3.1947","INOP",3,"T",99.03915,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3097,3102,{"$raw":"00000000"},"110405","MJ.3.1948","INOP",3,"T",65.81572,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3098,3103,{"$raw":"00000000"},"110401","MJ.3.1949","INOP",3,"T",46.43427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3099,3104,{"$raw":"00000000"},"110401","MJ.3.1950","INOP",3,"T",50.58053,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3100,3105,{"$raw":"00000000"},"110407","MJ.3.1951","INOP",3,"T",64.66134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3101,3106,{"$raw":"00000000"},"110403","MJ.3.1952","INOP",3,"T",163.22288,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3102,3107,{"$raw":"00000000"},"110407","MJ.3.1953","INOP",3,"T",119.58923,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3103,3108,{"$raw":"00000000"},"110403","MJ.3.1954","INOP",3,"T",494.37454,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3104,3109,{"$raw":"00000000"},"110403","MJ.3.1955","INOP",3,"T",105.58056,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3105,3110,{"$raw":"00000000"},"110405","MJ.3.1956","INOP",3,"T",81.34756,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3106,3111,{"$raw":"00000000"},"110407","MJ.3.1957","INOP",3,"T",176.03106,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3107,3112,{"$raw":"00000000"},"110407","MJ.3.1958","INOP",3,"T",325.07617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3108,3113,{"$raw":"00000000"},"110403","MJ.3.1959","INOP",3,"T",121.77586,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3109,3114,{"$raw":"00000000"},"110403","MJ.3.1960","INOP",3,"T",102.10112,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3110,3115,{"$raw":"00000000"},"110403","MJ.3.1961","INOP",3,"T",524.85227,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3111,3116,{"$raw":"00000000"},"110407","MJ.3.1962","INOP",3,"T",140.72643,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,3112,3117,{"$raw":"00000000"},"110403","MJ.3.1963","INOP",3,"T",454.68550,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3113,3118,{"$raw":"00000000"},"110407","MJ.3.1964","INOP",3,"T",63.44496,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3114,3119,{"$raw":"00000000"},"110407","MJ.3.1965","INOP",3,"T",18.87065,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3115,3120,{"$raw":"00000000"},"110403","MJ.3.1966","INOP",3,"T",100.72737,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110405",2,null,null,3116,3121,{"$raw":"00000000"},"110405","MJ.3.1967","INOP",3,"T",317.55748,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3117,3122,{"$raw":"00000000"},"110407","MJ.3.1968","INOP",3,"T",111.47102,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3118,3123,{"$raw":"00000000"},"110407","MJ.3.1969","INOP",3,"T",157.67232,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3119,3124,{"$raw":"00000000"},"110403","MJ.3.1970","INOP",3,"T",232.23783,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3120,3125,{"$raw":"00000000"},"110407","MJ.3.1971","INOP",3,"T",130.85131,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3121,3126,{"$raw":"00000000"},"110407","MJ.3.1972","INOP",3,"T",70.03064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3122,3127,{"$raw":"00000000"},"110407","MJ.3.1973","INOP",3,"T",137.01448,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3123,3128,{"$raw":"00000000"},"110403","MJ.3.1974","INOP",3,"T",382.75785,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3124,3129,{"$raw":"00000000"},"110403","MJ.3.1975","INOP",3,"T",532.42013,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3125,3130,{"$raw":"00000000"},"110403","MJ.3.1976","INOP",3,"T",201.26028,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,3126,3131,{"$raw":"00000000"},"110403","MJ.3.1977","INOP",3,"T",484.31689,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3127,3132,{"$raw":"00000000"},"110403","MJ.3.1978","INOP",3,"T",48.57909,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3128,3133,{"$raw":"00000000"},"110403","MJ.3.1979","INOP",3,"T",412.76748,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3129,3134,{"$raw":"00000000"},"110403","MJ.3.1980","INOP",3,"T",103.09502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3130,3135,{"$raw":"00000000"},"110407","MJ.3.1981","INOP",3,"T",252.21888,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3131,3136,{"$raw":"00000000"},"110407","MJ.3.1982","INOP",3,"T",34.48352,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3132,3137,{"$raw":"00000000"},"110405","MJ.3.1983","INOP",3,"T",419.78503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3133,3138,{"$raw":"00000000"},"110407","MJ.3.1984","INOP",3,"T",253.31270,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3134,3139,{"$raw":"00000000"},"110401","MJ.3.1985","INOP",3,"T",154.02332,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3135,3140,{"$raw":"00000000"},"110401","MJ.3.1986","INOP",3,"T",131.96437,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3136,3141,{"$raw":"00000000"},"110405","MJ.3.1987","INOP",3,"T",79.80328,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3137,3142,{"$raw":"00000000"},"110407","MJ.3.1988","INOP",3,"T",45.93716,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3138,3143,{"$raw":"00000000"},"110407","MJ.3.1989","INOP",3,"T",51.56167,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3139,3144,{"$raw":"00000000"},"110405","MJ.3.1990","INOP",3,"T",154.76932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3140,3145,{"$raw":"00000000"},"110407","MJ.3.1991","INOP",3,"T",259.38773,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3141,3146,{"$raw":"00000000"},"110407","MJ.3.1992","INOP",3,"T",21.34563,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3142,3147,{"$raw":"00000000"},"110405","MJ.3.1993","INOP",3,"T",150.22658,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3143,3148,{"$raw":"00000000"},"110405","MJ.3.1994","INOP",3,"T",333.30812,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3144,3149,{"$raw":"00000000"},"110407","MJ.3.1995","INOP",3,"T",54.29970,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,3145,3150,{"$raw":"00000000"},"110407","MJ.3.1996","INOP",3,"T",151.14715,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3146,3151,{"$raw":"00000000"},"110407","MJ.3.1997","INOP",3,"T",355.11575,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3147,3152,{"$raw":"00000000"},"110401","MJ.3.1998","INOP",3,"T",73.68044,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3148,3153,{"$raw":"00000000"},"110405","MJ.3.1999","INOP",3,"T",225.91216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3149,3154,{"$raw":"00000000"},"110405","MJ.3.2000","INOP",3,"T",519.58078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3150,3155,{"$raw":"00000000"},"110407","MJ.3.2001","INOP",3,"T",47.31958,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3151,3156,{"$raw":"00000000"},"110407","MJ.3.2002","INOP",3,"T",182.38071,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3152,3157,{"$raw":"00000000"},"110407","MJ.3.2003","INOP",3,"T",336.07947,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3153,3158,{"$raw":"00000000"},"110407","MJ.3.2004","INOP",3,"T",47.14168,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3154,3159,{"$raw":"00000000"},"110407","MJ.3.2005","INOP",3,"T",287.32391,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3155,3160,{"$raw":"00000000"},"110405","MJ.3.2006","INOP",3,"T",75.38520,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3156,3161,{"$raw":"00000000"},"110407","MJ.3.2007","INOP",3,"T",186.12736,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3157,3162,{"$raw":"00000000"},"110405","MJ.3.2008","INOP",3,"T",466.78271,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3158,3163,{"$raw":"00000000"},"110405","MJ.3.2009","INOP",3,"T",135.85596,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3159,3164,{"$raw":"00000000"},"110405","MJ.3.2010","INOP",3,"T",147.07882,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3160,3165,{"$raw":"00000000"},"110405","MJ.3.2011","INOP",3,"T",110.31160,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3161,3166,{"$raw":"00000000"},"110405","MJ.3.2012","INOP",3,"T",273.45641,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3162,3167,{"$raw":"00000000"},"110407","MJ.3.2013","INOP",3,"T",149.55779,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3163,3168,{"$raw":"00000000"},"110407","MJ.3.2014","INOP",3,"T",281.55835,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3164,3169,{"$raw":"00000000"},"110407","MJ.3.2015","INOP",3,"T",215.54447,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3165,3170,{"$raw":"00000000"},"110407","MJ.3.2016","INOP",3,"T",205.16708,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3166,3171,{"$raw":"00000000"},"110407","MJ.3.2017","INOP",3,"T",7.79973,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3167,3172,{"$raw":"00000000"},"110407","MJ.3.2018","INOP",3,"T",306.75236,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3168,3173,{"$raw":"00000000"},"110407","MJ.3.2019","INOP",3,"T",300.03846,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3169,3174,{"$raw":"00000000"},"110407","MJ.3.2020","INOP",3,"T",68.10156,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3170,3175,{"$raw":"00000000"},"110405","MJ.3.2021","INOP",3,"T",217.12698,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3171,3176,{"$raw":"00000000"},"110405","MJ.3.2022","INOP",3,"T",123.86829,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3172,3177,{"$raw":"00000000"},"110407","MJ.3.2023","INOP",3,"T",93.66986,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3173,3178,{"$raw":"00000000"},"110405","MJ.3.2024","INOP",3,"T",125.50893,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3174,3179,{"$raw":"00000000"},"110405","MJ.3.2025","INOP",3,"T",175.19487,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3175,3180,{"$raw":"00000000"},"110407","MJ.3.2026","INOP",3,"T",232.86221,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3176,3181,{"$raw":"00000000"},"110407","MJ.3.2027","INOP",3,"T",546.57916,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3177,3182,{"$raw":"00000000"},"110405","MJ.3.2028","INOP",3,"T",274.68405,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3178,3183,{"$raw":"00000000"},"110407","MJ.3.2029","INOP",3,"T",194.60052,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3179,3184,{"$raw":"00000000"},"110407","MJ.3.2030","INOP",3,"T",93.89355,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3180,3185,{"$raw":"00000000"},"110407","MJ.3.2031","INOP",3,"T",53.00856,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3181,3186,{"$raw":"00000000"},"110407","MJ.3.2032","INOP",3,"T",264.48590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3182,3187,{"$raw":"00000000"},"110405","MJ.3.2033","INOP",3,"T",237.31358,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3183,3188,{"$raw":"00000000"},"110407","MJ.3.2034","INOP",3,"T",194.58162,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3184,3189,{"$raw":"00000000"},"110405","MJ.3.2035","INOP",3,"T",64.55008,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3185,3190,{"$raw":"00000000"},"110405","MJ.3.2036","INOP",3,"T",204.19046,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3186,3191,{"$raw":"00000000"},"110405","MJ.3.2037","INOP",3,"T",317.15610,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3187,3192,{"$raw":"00000000"},"110405","MJ.3.2038","INOP",3,"T",253.71382,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3188,3193,{"$raw":"00000000"},"110405","MJ.3.2039","INOP",3,"T",285.69625,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3189,3194,{"$raw":"00000000"},"110407","MJ.3.2040","INOP",3,"T",193.51365,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3190,3195,{"$raw":"00000000"},"110405","MJ.3.2041","INOP",3,"T",409.16539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3191,3196,{"$raw":"00000000"},"110405","MJ.3.2042","INOP",3,"T",144.96055,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3192,3197,{"$raw":"00000000"},"110407","MJ.3.2043","INOP",3,"T",145.64318,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3193,3198,{"$raw":"00000000"},"110405","MJ.3.2044","INOP",3,"T",160.95197,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3194,3199,{"$raw":"00000000"},"110407","MJ.3.2045","INOP",3,"T",302.14855,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3195,3200,{"$raw":"00000000"},"110405","MJ.3.2046","INOP",3,"T",42.26435,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3196,3201,{"$raw":"00000000"},"110407","MJ.3.2047","INOP",3,"T",227.68022,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3197,3202,{"$raw":"00000000"},"110407","MJ.3.2048","INOP",3,"T",270.05556,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3198,3203,{"$raw":"00000000"},"110405","MJ.3.2049","INOP",3,"T",197.99592,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3199,3204,{"$raw":"00000000"},"110405","MJ.3.2050","INOP",3,"T",7.96727,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3200,3205,{"$raw":"00000000"},"110405","MJ.3.2051","INOP",3,"T",250.06503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3201,3206,{"$raw":"00000000"},"110405","MJ.3.2052","INOP",3,"T",84.09617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3202,3207,{"$raw":"00000000"},"110407","MJ.3.2053","INOP",3,"T",355.44681,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3203,3208,{"$raw":"00000000"},"110405","MJ.3.2054","INOP",3,"T",10.77776,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3204,3209,{"$raw":"00000000"},"110405","MJ.3.2055","INOP",3,"T",362.39445,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO LEZEIRÃO",null,null,"QTA",null,"110407",1,null,"QTA DO LEZEIRÃO",3205,3210,{"$raw":"00000000"},"110407","QTA DO LEZEIRÃO","INOP",3,"T",239.31417,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LEZEIRÃO",null,null,"QTA",null,"110407",1,null,"QTA DO LEZEIRÃO",3206,3211,{"$raw":"00000000"},"110407","QTA DO LEZEIRÃO","INOP",3,"T",306.78820,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ZACARIAS VIVAS",null,"25 jan 2005","R",null,"110407",1,null,"R ZACARIAS VIVAS",3207,3212,{"$raw":"00000000"},"110407","R ZACARIAS VIVAS","INOP",3,"A",167.53444,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA","PEDESTRE",null,"TV",null,"110410",1,null,"TV DA ESPERANÇA",3208,3213,{"$raw":"00000000"},"110410","TV DA ESPERANÇA","INOP",3,"T",37.34639,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3209,3214,{"$raw":"00000000"},"110407","MJ.3.2056","INOP",3,"T",299.93899,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3210,3215,{"$raw":"00000000"},"110405","MJ.3.2057","INOP",3,"T",61.37727,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3211,3216,{"$raw":"00000000"},"110405","MJ.3.2058","INOP",3,"T",384.52255,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3212,3217,{"$raw":"00000000"},"110407","MJ.3.2059","INOP",3,"T",250.75986,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3213,3218,{"$raw":"00000000"},"110407","MJ.3.2060","INOP",3,"T",293.54168,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",2,null,null,3214,3219,{"$raw":"00000000"},"110405","MJ.3.2061","INOP",3,"T",252.26755,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3215,3220,{"$raw":"00000000"},"110405","MJ.3.2062","INOP",3,"T",159.15087,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3216,3221,{"$raw":"00000000"},"110405","MJ.3.2063","INOP",3,"T",138.06341,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3217,3222,{"$raw":"00000000"},"110405","MJ.3.2064","INOP",3,"T",153.88357,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3218,3223,{"$raw":"00000000"},"110405","MJ.3.2065","INOP",3,"T",219.19708,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3219,3224,{"$raw":"00000000"},"110405","MJ.3.2066","INOP",3,"T",190.90955,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3220,3225,{"$raw":"00000000"},"110405","MJ.3.2067","INOP",3,"T",91.20078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3221,3226,{"$raw":"00000000"},"110405","MJ.3.2068","INOP",3,"T",278.52343,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3222,3227,{"$raw":"00000000"},"110407","MJ.3.2069","INOP",3,"T",27.15295,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3223,3228,{"$raw":"00000000"},"110407","MJ.3.2070","INOP",3,"T",438.56693,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3224,3229,{"$raw":"00000000"},"110405","MJ.3.2071","INOP",3,"T",252.79688,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3225,3230,{"$raw":"00000000"},"110405","MJ.3.2072","INOP",3,"T",159.67481,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3226,3231,{"$raw":"00000000"},"110405","MJ.3.2073","INOP",3,"T",221.48115,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3227,3232,{"$raw":"00000000"},"110405","MJ.3.2074","INOP",3,"T",140.31892,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3228,3233,{"$raw":"00000000"},"110407","MJ.3.2075","INOP",3,"T",161.98418,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3229,3234,{"$raw":"00000000"},"110407","MJ.3.2076","INOP",3,"T",285.58281,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3230,3235,{"$raw":"00000000"},"110407","MJ.3.2077","INOP",3,"T",342.66800,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3231,3236,{"$raw":"00000000"},"110405","MJ.3.2078","INOP",3,"T",130.64918,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3232,3237,{"$raw":"00000000"},"110405","MJ.3.2079","INOP",3,"T",220.38247,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3233,3238,{"$raw":"00000000"},"110405","MJ.3.2080","INOP",3,"T",347.05441,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3234,3239,{"$raw":"00000000"},"110405","MJ.3.2081","INOP",3,"T",50.70899,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3235,3240,{"$raw":"00000000"},"110405","MJ.3.2082","INOP",3,"T",68.94392,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3236,3241,{"$raw":"00000000"},"110405","MJ.3.2083","INOP",3,"T",37.50489,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3237,3242,{"$raw":"00000000"},"110405","MJ.3.2084","INOP",3,"T",82.70292,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3238,3243,{"$raw":"00000000"},"110405","MJ.3.2085","INOP",3,"T",199.75901,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3239,3244,{"$raw":"00000000"},"110407","MJ.3.2086","INOP",3,"T",132.37726,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3240,3245,{"$raw":"00000000"},"110405","MJ.3.2087","INOP",3,"T",166.72430,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3241,3246,{"$raw":"00000000"},"110405","MJ.3.2088","INOP",3,"T",162.98205,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3242,3247,{"$raw":"00000000"},"110407","MJ.3.2089","INOP",3,"T",136.79119,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3243,3248,{"$raw":"00000000"},"110407","MJ.3.2090","INOP",3,"T",145.44136,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3244,3249,{"$raw":"00000000"},"110405","MJ.3.2091","INOP",3,"T",113.31467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3245,3250,{"$raw":"00000000"},"110405","MJ.3.2092","INOP",3,"T",244.74539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3246,3251,{"$raw":"00000000"},"110407","MJ.3.2093","INOP",3,"T",251.02932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3247,3252,{"$raw":"00000000"},"110407","MJ.3.2094","INOP",3,"T",220.62046,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3248,3253,{"$raw":"00000000"},"110405","MJ.3.2095","INOP",3,"T",141.86798,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3249,3254,{"$raw":"00000000"},"110405","MJ.3.2096","INOP",3,"T",158.45274,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3250,3255,{"$raw":"00000000"},"110405","MJ.3.2097","INOP",3,"T",54.30337,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3251,3256,{"$raw":"00000000"},"110405","MJ.3.2098","INOP",3,"T",277.78607,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3252,3257,{"$raw":"00000000"},"110405","MJ.3.2099","INOP",3,"T",227.30450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3253,3258,{"$raw":"00000000"},"110407","MJ.3.2100","INOP",3,"T",193.15044,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,3254,3259,{"$raw":"00000000"},"110407","MJ.3.2101","INOP",3,"T",240.93338,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3255,3260,{"$raw":"00000000"},"110407","MJ.3.2102","INOP",3,"T",265.85093,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3256,3261,{"$raw":"00000000"},"110405","MJ.3.2103","INOP",3,"T",128.27654,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3257,3262,{"$raw":"00000000"},"110405","MJ.3.2104","INOP",3,"T",154.07244,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3258,3263,{"$raw":"00000000"},"110405","MJ.3.2105","INOP",3,"T",514.39503,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3259,3264,{"$raw":"00000000"},"110407","MJ.3.2106","INOP",3,"T",314.22163,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3260,3265,{"$raw":"00000000"},"110407","MJ.3.2107","INOP",3,"T",349.71590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3261,3266,{"$raw":"00000000"},"110407","MJ.3.2108","INOP",3,"T",36.94774,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3262,3267,{"$raw":"00000000"},"110405","MJ.3.2109","INOP",3,"T",303.61169,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3263,3268,{"$raw":"00000000"},"110407","MJ.3.2110","INOP",3,"T",99.15887,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3264,3269,{"$raw":"00000000"},"110405","MJ.3.2111","INOP",3,"T",128.81008,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3265,3270,{"$raw":"00000000"},"110405","MJ.3.2112","INOP",3,"T",212.53519,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3266,3271,{"$raw":"00000000"},"110405","MJ.3.2113","INOP",3,"T",356.25937,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3267,3272,{"$raw":"00000000"},"110405","MJ.3.2114","INOP",3,"T",62.00970,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3268,3273,{"$raw":"00000000"},"110405","MJ.3.2115","INOP",3,"T",247.94686,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3269,3274,{"$raw":"00000000"},"110405","MJ.3.2116","INOP",3,"T",11.28353,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3270,3275,{"$raw":"00000000"},"110405","MJ.3.2117","INOP",3,"T",146.18077,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3271,3276,{"$raw":"00000000"},"110405","MJ.3.2118","INOP",3,"T",124.51293,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3272,3277,{"$raw":"00000000"},"110405","MJ.3.2119","INOP",3,"T",98.43707,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3273,3278,{"$raw":"00000000"},"110407","MJ.3.2120","INOP",3,"T",101.19158,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3274,3279,{"$raw":"00000000"},"110405","MJ.3.2121","INOP",3,"T",129.26823,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3275,3280,{"$raw":"00000000"},"110407","MJ.3.2122","INOP",3,"T",145.97493,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CARVALHEIRA",null,"15 Jan 2001","R",null,"110405",1,null,"R DA CARVALHEIRA",3276,3281,{"$raw":"00000000"},"110405","R DA CARVALHEIRA","INOP",3,"T",19.22204,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3277,3282,{"$raw":"00000000"},"110405","MJ.3.2123","INOP",3,"T",28.55083,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3278,3283,{"$raw":"00000000"},"110405","MJ.3.2124","INOP",3,"T",304.88688,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3279,3284,{"$raw":"00000000"},"110405","MJ.3.2125","INOP",3,"T",364.08864,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3280,3285,{"$raw":"00000000"},"110405","MJ.3.2126","INOP",3,"T",244.66733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3281,3286,{"$raw":"00000000"},"110405","MJ.3.2127","INOP",3,"T",44.79081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA QUINTA DA NORUEGA",null,"16/11/2004","ESTR",null,"110405",1,null,"ESTR DA QUINTA DA NORUEGA",3282,3287,{"$raw":"00000000"},"110405","ESTR DA QUINTA DA NORUEGA","OPER",2,"A",165.38734,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3283,3288,{"$raw":"00000000"},"110407","MJ.3.2128","INOP",3,"T",15.96722,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3284,3289,{"$raw":"00000000"},"110407","MJ.3.2129","INOP",3,"T",183.44744,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3285,3290,{"$raw":"00000000"},"110405","MJ.3.2130","INOP",3,"T",162.23459,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3286,3291,{"$raw":"00000000"},"110405","MJ.3.2131","INOP",3,"T",212.57946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3287,3292,{"$raw":"00000000"},"110405","MJ.3.2132","INOP",3,"T",241.14108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3288,3293,{"$raw":"00000000"},"110405","MJ.3.2133","INOP",3,"T",300.59425,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3289,3294,{"$raw":"00000000"},"110405","MJ.3.2134","INOP",3,"T",3.01684,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA QUINTA DA NORUEGA",null,"16/11/2004","ESTR",null,"110405",1,null,"ESTR DA QUINTA DA NORUEGA",3290,3295,{"$raw":"00000000"},"110405","ESTR DA QUINTA DA NORUEGA","INOP",3,"T",345.96488,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3291,3296,{"$raw":"00000000"},"110407","MJ.3.2135","INOP",3,"T",243.14255,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3292,3297,{"$raw":"00000000"},"110405","MJ.3.2136","INOP",3,"T",56.39393,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3293,3298,{"$raw":"00000000"},"110407","MJ.3.2137","INOP",3,"T",72.98308,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3294,3299,{"$raw":"00000000"},"110405","MJ.3.2138","INOP",3,"T",342.40915,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3295,3300,{"$raw":"00000000"},"110407","MJ.3.2139","INOP",3,"T",448.70749,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3296,3301,{"$raw":"00000000"},"110405","MJ.3.2140","INOP",3,"T",44.53292,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3297,3302,{"$raw":"00000000"},"110405","MJ.3.2141","INOP",3,"T",153.36526,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3298,3303,{"$raw":"00000000"},"110405","MJ.3.2142","INOP",3,"T",236.18599,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3299,3304,{"$raw":"00000000"},"110405","MJ.3.2143","INOP",3,"T",335.78109,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,3300,3305,{"$raw":"00000000"},"110405","MJ.3.2144","INOP",3,"T",392.37959,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3301,3306,{"$raw":"00000000"},"110405","MJ.3.2145","INOP",3,"T",126.26679,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3302,3307,{"$raw":"00000000"},"110407","MJ.3.2146","INOP",3,"T",106.41959,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3303,3308,{"$raw":"00000000"},"110405","MJ.3.2147","INOP",3,"T",87.47567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3304,3309,{"$raw":"00000000"},"110405","MJ.3.2148","INOP",3,"T",159.96915,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3305,3310,{"$raw":"00000000"},"110407","MJ.3.2149","INOP",3,"T",180.46529,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3306,3311,{"$raw":"00000000"},"110407","MJ.3.2150","INOP",3,"T",209.76788,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3307,3312,{"$raw":"00000000"},"110407","MJ.3.2151","INOP",3,"T",292.96089,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3308,3313,{"$raw":"00000000"},"110405","MJ.2.232","OPER",2,"A",77.57689,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3309,3314,{"$raw":"00000000"},"110405","MJ.3.2152","INOP",3,"T",31.14228,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",2,null,null,3310,3315,{"$raw":"00000000"},"110405","MJ.3.2153","INOP",3,"T",373.32855,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3311,3316,{"$raw":"00000000"},"110405","MJ.2.233","OPER",2,"T",164.95432,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3312,3317,{"$raw":"00000000"},"110405","MJ.2.234","OPER",2,"A",48.70705,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ÁGUA TINTA",null,"23 Out 2000","R",null,"110405",1,null,"R ÁGUA TINTA",3313,3318,{"$raw":"00000000"},"110405","R ÁGUA TINTA","INOP",3,"T",63.49064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SOBRAL",null,"23 Out 2000","R",null,"110405",1,null,"R DO SOBRAL",3314,3319,{"$raw":"00000000"},"110405","R DO SOBRAL","OPER",2,"A",130.13393,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3315,3320,{"$raw":"00000000"},"110405","MJ.3.2154","INOP",3,"T",5.37603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3316,3321,{"$raw":"00000000"},"110405","MJ.3.2155","INOP",3,"T",279.77620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ÁGUA TINTA",null,"23 Out 2000","R",null,"110405",1,null,"R ÁGUA TINTA",3317,3322,{"$raw":"00000000"},"110405","R ÁGUA TINTA","INOP",3,"T",35.16445,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3318,3323,{"$raw":"00000000"},"110405","MJ.3.2156","INOP",3,"T",107.49357,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3319,3324,{"$raw":"00000000"},"110405","MJ.3.2157","INOP",3,"T",299.29249,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3320,3325,{"$raw":"00000000"},"110405","MJ.3.2158","INOP",3,"T",142.54216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3321,3326,{"$raw":"00000000"},"110405","MJ.3.2159","INOP",3,"T",265.10305,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3322,3327,{"$raw":"00000000"},"110405","MJ.3.2160","INOP",3,"T",109.57675,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,3323,3328,{"$raw":"00000000"},"110405","MJ.3.2161","INOP",3,"T",173.72086,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3324,3329,{"$raw":"00000000"},"110405","MJ.3.2162","INOP",3,"T",119.23482,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,3325,3330,{"$raw":"00000000"},"110405","MJ.3.2163","INOP",3,"T",63.55347,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3326,3331,{"$raw":"00000000"},"110405","MJ.3.2164","INOP",3,"T",368.47007,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3327,3332,{"$raw":"00000000"},"110407","MJ.3.2165","INOP",3,"T",146.34059,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3328,3333,{"$raw":"00000000"},"110407","MJ.3.2166","INOP",3,"T",149.49283,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3329,3334,{"$raw":"00000000"},"110407","MJ.3.2167","INOP",3,"T",79.96198,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,3330,3335,{"$raw":"00000000"},"110407","MJ.3.2168","INOP",3,"T",197.50539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3331,3336,{"$raw":"00000000"},"110407","MJ.3.2169","INOP",3,"T",103.55462,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,3332,3337,{"$raw":"00000000"},"110407","MJ.3.2170","INOP",3,"T",197.73892,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3333,3338,{"$raw":"00000000"},"110405","MJ.3.2171","INOP",3,"T",203.86181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3334,3339,{"$raw":"00000000"},"110407","MJ.3.2172","INOP",3,"T",99.06724,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3335,3340,{"$raw":"00000000"},"110407","MJ.3.2173","INOP",3,"T",289.30547,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3336,3341,{"$raw":"00000000"},"110407","MJ.3.2174","INOP",3,"T",159.96336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3337,3342,{"$raw":"00000000"},"110405","MJ.3.2175","INOP",3,"T",158.29072,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3338,3343,{"$raw":"00000000"},"110405","MJ.3.2176","INOP",3,"T",232.99729,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3339,3344,{"$raw":"00000000"},"110405","MJ.3.2177","INOP",3,"T",376.38762,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3340,3345,{"$raw":"00000000"},"110405","MJ.3.2178","INOP",3,"T",45.90971,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3341,3346,{"$raw":"00000000"},"110405","MJ.3.2179","INOP",3,"T",258.41972,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,3342,3347,{"$raw":"00000000"},"110405","MJ.3.2180","INOP",3,"T",102.38502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3343,3348,{"$raw":"00000000"},"110407","MJ.3.2181","INOP",3,"T",233.67616,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3344,3349,{"$raw":"00000000"},"110407","MJ.3.2182","INOP",3,"T",117.63884,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3345,3350,{"$raw":"00000000"},"110405","MJ.3.2183","INOP",3,"T",174.03070,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3346,3351,{"$raw":"00000000"},"110405","MJ.3.2184","INOP",3,"T",310.30536,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3347,3352,{"$raw":"00000000"},"110407","MJ.3.2185","INOP",3,"T",179.37856,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3348,3353,{"$raw":"00000000"},"110407","MJ.3.2186","INOP",3,"T",257.83142,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3349,3354,{"$raw":"00000000"},"110405","MJ.3.2187","INOP",3,"T",244.65746,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3350,3355,{"$raw":"00000000"},"110405","MJ.3.2188","INOP",3,"T",39.84917,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM","SD",null,null,null,null,null,"110405",1,null,null,3351,3356,{"$raw":"00000000"},"110405","MJ.3.2189","INOP",3,"T",243.70568,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3352,3357,{"$raw":"00000000"},"110405","MJ.3.2190","INOP",3,"T",264.97232,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3353,3358,{"$raw":"00000000"},"110405","MJ.3.2191","INOP",3,"T",321.72542,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3354,3359,{"$raw":"00000000"},"110405","MJ.3.2192","INOP",3,"T",3.28906,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"R",null,"110405",1,null,"R DA ESCOLA",3355,3360,{"$raw":"00000000"},"110405","R DA ESCOLA","INOP",3,"A",253.47966,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE VILÃO",null,null,"TV",null,"110407",1,null,"TV DO VALE VILÃO",3356,3361,{"$raw":"00000000"},"110407","TV DO VALE VILÃO","OPER",2,"A",35.46435,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3357,3362,{"$raw":"00000000"},"110405","MJ.3.2193","INOP",3,"T",316.58118,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3358,3363,{"$raw":"00000000"},"110405","MJ.3.2194","INOP",3,"T",149.53090,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3359,3364,{"$raw":"00000000"},"110405","MJ.3.2195","INOP",3,"T",278.06991,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3360,3365,{"$raw":"00000000"},"110405","MJ.3.2196","INOP",3,"T",324.29073,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3361,3366,{"$raw":"00000000"},"110405","MJ.3.2197","INOP",3,"T",68.32305,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3362,3367,{"$raw":"00000000"},"110405","MJ.3.2198","INOP",3,"T",132.00565,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"20 DE JANEIRO",null,"23 Out 2000","R",null,"110405",1,null,"R 20 DE JANEIRO",3363,3368,{"$raw":"00000000"},"110405","R 20 DE JANEIRO","INOP",3,"T",54.80867,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3364,3369,{"$raw":"00000000"},"110405","MJ.3.2199","INOP",3,"T",95.36574,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3365,3370,{"$raw":"00000000"},"110405","MJ.3.2200","INOP",3,"T",139.04273,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"20 DE JANEIRO",null,"23 Out 2000","R",null,"110405",1,null,"R 20 DE JANEIRO",3366,3371,{"$raw":"00000000"},"110405","R 20 DE JANEIRO","INOP",3,"T",14.17285,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS","Processo nº 03/07/131, 03/07/267","23 Out 2000, 10 jul 2007","R",null,"110405",1,null,"R DOS MOINHOS",3367,3372,{"$raw":"00000000"},"110405","R DOS MOINHOS","OPER",2,"A",137.75252,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"20 DE JANEIRO",null,"23 Out 2000","R",null,"110405",1,null,"R 20 DE JANEIRO",3368,3373,{"$raw":"00000000"},"110405","R 20 DE JANEIRO","INOP",3,"T",19.34108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3369,3374,{"$raw":"00000000"},"110407","MJ.3.2201","INOP",3,"T",102.72669,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3370,3375,{"$raw":"00000000"},"110407","MJ.3.2202","INOP",3,"T",269.46952,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3371,3376,{"$raw":"00000000"},"110405","MJ.3.2203","INOP",3,"T",248.09196,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3372,3377,{"$raw":"00000000"},"110407","MJ.3.2204","INOP",3,"T",164.58586,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE",null,null,"ESTR",null,"110407",1,null,"ESTR DO VALE",3373,3378,{"$raw":"00000000"},"110407","ESTR DO VALE","INOP",3,"T",112.10578,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3374,3379,{"$raw":"00000000"},"110407","MJ.3.2205","INOP",3,"T",86.28748,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3375,3380,{"$raw":"00000000"},"110405","MJ.3.2206","INOP",3,"T",339.30079,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE",null,null,"ESTR",null,"110407",1,null,"ESTR DO VALE",3376,3381,{"$raw":"00000000"},"110407","ESTR DO VALE","INOP",3,"T",54.96467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3377,3382,{"$raw":"00000000"},"110405","MJ.3.2207","INOP",3,"T",153.50233,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS","Processo nº 03/07/131, 03/07/267, 04/2013/5","23 Out 2000, 10 jul 2007","TV",null,"110405",1,null,"TV DOS MOINHOS",3378,3383,{"$raw":"00000000"},"110405","TV DOS MOINHOS","INOP",3,"T",61.89100,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3379,3384,{"$raw":"00000000"},"110407","MJ.3.2208","INOP",3,"T",176.78568,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","SD",null,null,null,null,null,null,"110405",1,null,null,3380,3385,{"$raw":"00000000"},"110405","MJ.3.2209","INOP",3,"T",134.66111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3381,3386,{"$raw":"00000000"},"110405","MJ.3.2210","INOP",3,"T",19.24366,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3382,3387,{"$raw":"00000000"},"110407","MJ.3.2211","INOP",3,"T",320.75024,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3383,3388,{"$raw":"00000000"},"110405","MJ.3.2212","INOP",3,"T",94.06424,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","SD",null,null,null,null,null,null,"110405",1,null,null,3384,3389,{"$raw":"00000000"},"110405","MJ.3.2213","INOP",3,"T",315.19204,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3385,3390,{"$raw":"00000000"},"110405","MJ.3.2214","INOP",3,"T",39.18942,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3386,3391,{"$raw":"00000000"},"110405","MJ.3.2215","INOP",3,"T",252.27407,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3387,3392,{"$raw":"00000000"},"110405","MJ.3.2216","INOP",3,"T",1.59841,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3388,3393,{"$raw":"00000000"},"110405","MJ.3.2217","INOP",3,"T",306.69699,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3389,3394,{"$raw":"00000000"},"110407","MJ.3.2218","INOP",3,"T",213.20567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO NORTE",null,null,"R",null,"110405",1,null,"R DO NORTE",3390,3395,{"$raw":"00000000"},"110405","R DO NORTE","INOP",3,"T",89.44739,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3391,3396,{"$raw":"00000000"},"110405","MJ.3.2219","INOP",3,"T",104.26359,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3392,3397,{"$raw":"00000000"},"110405","MJ.3.2220","INOP",3,"T",83.92782,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3393,3398,{"$raw":"00000000"},"110405","MJ.3.2221","INOP",3,"T",341.01865,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3394,3399,{"$raw":"00000000"},"110405","MJ.3.2222","INOP",3,"T",84.05890,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3395,3400,{"$raw":"00000000"},"110405","MJ.3.2223","INOP",3,"T",298.83019,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3396,3401,{"$raw":"00000000"},"110405","MJ.3.2224","INOP",3,"T",143.98273,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3397,3402,{"$raw":"00000000"},"110405","MJ.3.2225","INOP",3,"T",247.04765,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3398,3403,{"$raw":"00000000"},"110405","MJ.3.2226","INOP",3,"T",74.50063,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3399,3404,{"$raw":"00000000"},"110405","MJ.3.2227","INOP",3,"T",250.83299,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3400,3405,{"$raw":"00000000"},"110405","MJ.3.2228","INOP",3,"T",5.97592,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3401,3406,{"$raw":"00000000"},"110405","MJ.3.2229","INOP",3,"T",323.81308,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3402,3407,{"$raw":"00000000"},"110405","MJ.3.2230","INOP",3,"T",147.86749,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3403,3408,{"$raw":"00000000"},"110407","MJ.3.2231","INOP",3,"T",20.38412,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3404,3409,{"$raw":"00000000"},"110407","MJ.3.2232","INOP",3,"T",204.64404,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3405,3410,{"$raw":"00000000"},"110407","MJ.3.2233","INOP",3,"T",305.13216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3406,3411,{"$raw":"00000000"},"110405","MJ.3.2234","INOP",3,"T",314.82176,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,3407,3412,{"$raw":"00000000"},"110405","MJ.3.2235","INOP",3,"T",219.56505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3408,3413,{"$raw":"00000000"},"110405","MJ.3.2236","INOP",3,"T",81.46187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3409,3414,{"$raw":"00000000"},"110405","MJ.3.2237","INOP",3,"T",342.00026,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3410,3415,{"$raw":"00000000"},"110405","MJ.3.2238","INOP",3,"T",226.01093,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3411,3416,{"$raw":"00000000"},"110407","MJ.3.2239","INOP",3,"T",60.59619,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3412,3417,{"$raw":"00000000"},"110405","MJ.3.2240","INOP",3,"T",339.19220,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3413,3418,{"$raw":"00000000"},"110405","MJ.3.2241","INOP",3,"T",192.50960,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3414,3419,{"$raw":"00000000"},"110405","MJ.3.2242","INOP",3,"T",61.69348,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3415,3420,{"$raw":"00000000"},"110405","MJ.3.2243","INOP",3,"T",51.26848,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3416,3421,{"$raw":"00000000"},"110405","MJ.3.2244","INOP",3,"T",240.76330,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3417,3422,{"$raw":"00000000"},"110405","MJ.3.2245","INOP",3,"T",63.15002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3418,3423,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,29.34765,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3419,3424,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,53.26876,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3420,3425,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,10.33590,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3421,3426,{"$raw":"00000000"},"110405","MJ.3.2246","INOP",3,"T",132.37795,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3422,3427,{"$raw":"00000000"},"110405","MJ.3.2247","INOP",3,"T",52.42744,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3423,3428,{"$raw":"00000000"},"110403","MJ.3.2248","INOP",3,"T",99.07270,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MIGUEL JOSÉ ULPIANO","Proc. nº 03/04/39",null,"TV",null,"110405",1,null,"TV MIGUEL JOSÉ ULPIANO",3424,3429,{"$raw":"00000000"},"110405","TV MIGUEL JOSÉ ULPIANO","OPER",2,"A",65.56851,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110403",1,null,"R DO OUTEIRO",3425,3430,{"$raw":"00000000"},"110403","R DO OUTEIRO","INOP",3,"T",7.46264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,"23 Out 2000","R",null,"110405",1,null,"R DO CABEÇO",3426,3431,{"$raw":"00000000"},"110405","R DO CABEÇO","INOP",3,"T",205.33452,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM","Cabeço das Pedras",null,null,null,null,null,"110403",1,null,null,3427,3432,{"$raw":"00000000"},"110403","MJ.3.2249","INOP",3,"T",188.19783,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3428,3433,{"$raw":"00000000"},"110401","MJ.3.2250","INOP",3,"T",38.74784,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3429,3434,{"$raw":"00000000"},"110405","MJ.3.2251","INOP",3,"T",39.21436,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3430,3435,{"$raw":"00000000"},"110401","MJ.3.2252","INOP",3,"T",68.81800,3.90000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3431,3436,{"$raw":"00000000"},"110403","MJ.3.2253","INOP",3,"T",108.58646,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3432,3437,{"$raw":"00000000"},"110403","MJ.3.2254","INOP",3,"T",272.87821,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3433,3438,{"$raw":"00000000"},"110405","MJ.3.2255","INOP",3,"T",11.89742,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,3434,3439,{"$raw":"00000000"},"110405","MJ.3.2256","INOP",3,"T",33.69205,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3435,3440,{"$raw":"00000000"},"110405","MJ.3.2257","INOP",3,"T",7.23117,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3436,3441,{"$raw":"00000000"},"110405","MJ.3.2258","INOP",3,"T",183.65944,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3437,3442,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3438,3443,{"$raw":"00000000"},"110403","MJ.1.69","OPER",1,"A",4.34867,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3439,3444,{"$raw":"00000000"},"110403","MJ.3.2259","INOP",3,"T",270.31647,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3440,3445,{"$raw":"00000000"},"110403","MJ.3.2260","INOP",3,"T",62.90739,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3441,3446,{"$raw":"00000000"},"110403","MJ.3.2261","INOP",3,"T",1.42042,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3442,3447,{"$raw":"00000000"},"110403","MJ.3.2262","INOP",3,"T",75.19114,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3443,3448,{"$raw":"00000000"},"110403","MJ.3.2263","INOP",3,"T",190.64351,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3444,3449,{"$raw":"00000000"},"110403","MJ.3.2264","INOP",3,"T",86.72506,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3445,3450,{"$raw":"00000000"},"110403","MJ.3.2265","INOP",3,"T",25.01220,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3446,3451,{"$raw":"00000000"},"110403","MJ.3.2266","INOP",3,"T",193.38536,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3447,3452,{"$raw":"00000000"},"110403","MJ.3.2267","INOP",3,"T",286.84249,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3448,3453,{"$raw":"00000000"},"110403","MJ.3.2268","INOP",3,"T",93.18481,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3449,3454,{"$raw":"00000000"},"110403","MJ.3.2269","INOP",3,"T",7.77841,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3450,3455,{"$raw":"00000000"},"110403","MJ.3.2270","INOP",3,"T",9.19810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3451,3456,{"$raw":"00000000"},"110403","MJ.3.2271","INOP",3,"T",36.79954,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3452,3457,{"$raw":"00000000"},"110403","MJ.3.2272","INOP",3,"T",369.05058,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3453,3458,{"$raw":"00000000"},"110403","MJ.3.2273","INOP",3,"T",5.98962,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3454,3459,{"$raw":"00000000"},"110403","MJ.3.2274","INOP",3,"T",128.73535,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3455,3460,{"$raw":"00000000"},"110403","MJ.3.2275","INOP",3,"T",148.23717,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3456,3461,{"$raw":"00000000"},"110403","MJ.3.2276","INOP",3,"T",270.99389,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3457,3462,{"$raw":"00000000"},"110403","MJ.3.2277","INOP",3,"T",112.39573,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3458,3463,{"$raw":"00000000"},"110403","MJ.3.2278","INOP",3,"T",157.40316,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3459,3464,{"$raw":"00000000"},"110403","MJ.3.2279","INOP",3,"T",99.83551,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3460,3465,{"$raw":"00000000"},"110403","MJ.3.2280","INOP",3,"T",43.01832,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3461,3466,{"$raw":"00000000"},"110403","MJ.3.2281","INOP",3,"T",155.54851,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3462,3467,{"$raw":"00000000"},"110403","MJ.3.2282","INOP",3,"T",140.16368,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3463,3468,{"$raw":"00000000"},"110403","MJ.3.2283","INOP",3,"T",63.79111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3464,3469,{"$raw":"00000000"},"110403","MJ.3.2284","INOP",3,"T",25.01325,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3465,3470,{"$raw":"00000000"},"110403","MJ.3.2285","INOP",3,"T",168.59085,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3466,3471,{"$raw":"00000000"},"110403","MJ.3.2286","INOP",3,"T",9.90680,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3467,3472,{"$raw":"00000000"},"110403","MJ.3.2287","INOP",3,"T",121.15725,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3468,3473,{"$raw":"00000000"},"110403","MJ.1.70","OPER",1,"A",3.34073,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3469,3474,{"$raw":"00000000"},"110403","MJ.3.2288","INOP",3,"T",11.99287,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3470,3475,{"$raw":"00000000"},"110403","MJ.3.2289","INOP",3,"T",10.88604,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3471,3476,{"$raw":"00000000"},"110403","MJ.3.2290","INOP",3,"T",28.50468,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3472,3477,{"$raw":"00000000"},"110403","MJ.3.2291","INOP",3,"T",27.02039,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3473,3478,{"$raw":"00000000"},"110403","MJ.3.2292","INOP",3,"T",29.38850,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3474,3479,{"$raw":"00000000"},"110403","MJ.3.2293","INOP",3,"T",241.92070,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3475,3480,{"$raw":"00000000"},"110403","MJ.3.2294","INOP",3,"T",31.08661,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110403",1,null,"R DO OUTEIRO",3476,3481,{"$raw":"00000000"},"110403","R DO OUTEIRO","INOP",3,"T",3.61448,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110403",1,null,"R DO OUTEIRO",3477,3482,{"$raw":"00000000"},"110403","R DO OUTEIRO","INOP",3,"T",40.51363,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110403",1,null,"R DO OUTEIRO",3478,3483,{"$raw":"00000000"},"110403","R DO OUTEIRO","INOP",3,"T",32.08940,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110403",1,null,"R DO OUTEIRO",3479,3484,{"$raw":"00000000"},"110403","R DO OUTEIRO","INOP",3,"T",4.66995,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110403",1,null,"R DO OUTEIRO",3480,3485,{"$raw":"00000000"},"110403","R DO OUTEIRO","INOP",3,"T",34.52283,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110403",1,null,"R DO OUTEIRO",3481,3486,{"$raw":"00000000"},"110403","R DO OUTEIRO","INOP",3,"T",27.56082,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3482,3487,{"$raw":"00000000"},"110403","MJ.3.2295","INOP",3,"T",14.96657,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3483,3488,{"$raw":"00000000"},"110403","MJ.3.2296","INOP",3,"T",20.03452,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3484,3489,{"$raw":"00000000"},"110403","MJ.3.2297","INOP",3,"T",15.73703,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3485,3490,{"$raw":"00000000"},"110403","MJ.3.2298","INOP",3,"T",7.03087,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3486,3491,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3487,3492,{"$raw":"00000000"},"110403","MJ.3.2299","INOP",3,"T",4.14121,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3488,3493,{"$raw":"00000000"},"110403","MJ.3.2300","INOP",3,"T",23.99324,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3489,3494,{"$raw":"00000000"},"110403","MJ.3.2301","INOP",3,"T",48.98964,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3490,3495,{"$raw":"00000000"},"110403","MJ.3.2302","INOP",3,"T",21.63643,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","do Alto da Ajuda",null,null,null,null,null,"110403",1,null,null,3491,3496,{"$raw":"00000000"},"110403","MJ.3.2303","INOP",3,"T",18.62026,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3492,3497,{"$raw":"00000000"},"110403","MJ.3.2304","INOP",3,"T",20.76934,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALTO DA AJUDA",null,null,"R",null,"110403",1,null,"R DO ALTO DA AJUDA",3493,3498,{"$raw":"00000000"},"110403","R DO ALTO DA AJUDA","INOP",3,"T",25.84483,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALTO DA AJUDA",null,null,"R",null,"110403",1,null,"R DO ALTO DA AJUDA",3494,3499,{"$raw":"00000000"},"110403","R DO ALTO DA AJUDA","INOP",3,"T",21.75925,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3495,3500,{"$raw":"00000000"},"110403","MJ.3.2305","INOP",3,"T",188.51826,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3496,3501,{"$raw":"00000000"},"110403","MJ.3.2306","INOP",3,"T",3.18987,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3497,3502,{"$raw":"00000000"},"110403","MJ.3.2307","INOP",3,"T",11.63906,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3498,3503,{"$raw":"00000000"},"110403","MJ.3.2308","INOP",3,"T",121.22282,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3499,3504,{"$raw":"00000000"},"110403","MJ.3.2309","INOP",3,"T",30.28264,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3500,3505,{"$raw":"00000000"},"110403","MJ.3.2310","INOP",3,"T",167.47044,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3501,3506,{"$raw":"00000000"},"110403","MJ.3.2311","INOP",3,"T",115.92274,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3502,3507,{"$raw":"00000000"},"110403","MJ.3.2312","INOP",3,"T",7.75032,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3503,3508,{"$raw":"00000000"},"110403","MJ.3.2313","INOP",3,"T",48.69451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3504,3509,{"$raw":"00000000"},"110403","MJ.3.2314","INOP",3,"T",8.56154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3505,3510,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3506,3511,{"$raw":"00000000"},"110403","MJ.3.2315","INOP",3,"T",3.21014,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3507,3512,{"$raw":"00000000"},"110403","MJ.3.2316","INOP",3,"T",213.87233,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3508,3513,{"$raw":"00000000"},"110403","MJ.3.2317","INOP",3,"T",60.11476,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3509,3514,{"$raw":"00000000"},"110403","MJ.3.2318","INOP",3,"T",41.14681,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3510,3515,{"$raw":"00000000"},"110403","MJ.3.2319","INOP",3,"T",4.41264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3511,3516,{"$raw":"00000000"},"110403","MJ.3.2320","INOP",3,"T",73.84779,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3512,3517,{"$raw":"00000000"},"110403","MJ.1.71","OPER",1,"A",2.42002,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3513,3518,{"$raw":"00000000"},"110403","MJ.3.2321","INOP",3,"T",5.76603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3514,3519,{"$raw":"00000000"},"110403","MJ.3.2322","INOP",3,"T",114.92625,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3515,3520,{"$raw":"00000000"},"110403","ACEIRO","INOP",3,"T",25.36859,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3516,3521,{"$raw":"00000000"},"110403","MJ.3.2323","INOP",3,"T",16.77276,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3517,3522,{"$raw":"00000000"},"110403","MJ.3.2324","INOP",3,"T",348.27539,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3518,3523,{"$raw":"00000000"},"110403","MJ.3.2325","INOP",3,"T",8.62496,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3519,3524,{"$raw":"00000000"},"110405","MJ.3.2326","INOP",3,"T",644.71196,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONSECA",null,null,"CSL",null,"110403",1,null,"CSL DA FONSECA",3520,3525,{"$raw":"00000000"},"110403","CSL DA FONSECA","INOP",3,"T",76.46682,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,3521,3526,{"$raw":"00000000"},"110403","MJ.3.2327","INOP",3,"T",43.46765,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"ESTR",null,"110401",1,null,"ESTR DO MOINHO",3522,3527,{"$raw":"00000000"},"110401","ESTR DO MOINHO","INOP",3,"T",461.55806,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CABEÇO BRANCO",null,null,"R",null,"110401",1,null,"R CABEÇO BRANCO",3523,3528,{"$raw":"00000000"},"110401","R CABEÇO BRANCO","INOP",3,"T",169.74747,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,3524,3529,{"$raw":"00000000"},"110401","MJ.3.2328","INOP",3,"T",16.14834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO MOGÃO",null,null,"R",null,"110401",1,null,"R DO POÇO MOGÃO",3525,3530,{"$raw":"00000000"},"110401","R DO POÇO MOGÃO","INOP",3,"T",138.36022,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO MARTINHO",null,null,"R",null,"110401",1,null,"R JOÃO MARTINHO",3526,3531,{"$raw":"00000000"},"110401","R JOÃO MARTINHO","INOP",3,"T",27.81269,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO MARTINHO",null,null,"R",null,"110401",1,null,"R JOÃO MARTINHO",3527,3532,{"$raw":"00000000"},"110401","R JOÃO MARTINHO","INOP",3,"A",7.24926,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110401",1,null,"EM 568",3528,3533,{"$raw":"00000000"},"110401","EM 568","OPER",1,"A",276.48156,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3529,3534,{"$raw":"00000000"},"110403","MJ.3.2329","INOP",3,"T",150.17604,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3530,3535,{"$raw":"00000000"},"110403","MJ.3.2330","INOP",3,"T",3.16948,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3531,3536,{"$raw":"00000000"},"110403","MJ.3.2331","INOP",3,"T",165.27687,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3532,3537,{"$raw":"00000000"},"110403","MJ.3.2332","INOP",3,"T",2.73529,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3533,3538,{"$raw":"00000000"},"110403","MJ.1.72","OPER",1,"A",2.24900,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3534,3539,{"$raw":"00000000"},"110403","MJ.3.2333","INOP",3,"T",9.62794,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3535,3540,{"$raw":"00000000"},"110403","MJ.3.2334","INOP",3,"T",66.13725,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3536,3541,{"$raw":"00000000"},"110403","MJ.3.2335","INOP",3,"T",13.65666,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3537,3542,{"$raw":"00000000"},"110403","MJ.3.2336","INOP",3,"T",2.78718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3538,3543,{"$raw":"00000000"},"110403","MJ.3.2337","INOP",3,"T",48.23803,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3539,3544,{"$raw":"00000000"},"110403","MJ.3.2338","INOP",3,"T",20.41525,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3540,3545,{"$raw":"00000000"},"110403","MJ.1.73","OPER",1,"A",3.12493,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3541,3546,{"$raw":"00000000"},"110403","MJ.3.2339","INOP",3,"T",3.29475,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3542,3547,{"$raw":"00000000"},"110403","MJ.3.2340","INOP",3,"T",25.38304,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3543,3548,{"$raw":"00000000"},"110403","MJ.3.2341","INOP",3,"T",86.98679,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3544,3549,{"$raw":"00000000"},"110403","MJ.3.2342","INOP",3,"T",12.55429,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3545,3550,{"$raw":"00000000"},"110403","MJ.3.2343","INOP",3,"T",26.64710,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3546,3551,{"$raw":"00000000"},"110403","MJ.3.2344","INOP",3,"T",3.73649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3547,3552,{"$raw":"00000000"},"110403","MJ.3.2345","INOP",3,"T",7.06733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3548,3553,{"$raw":"00000000"},"110403","MJ.3.2346","INOP",3,"T",132.16356,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3549,3554,{"$raw":"00000000"},"110403","MJ.3.2347","INOP",3,"T",18.63651,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3550,3555,{"$raw":"00000000"},"110403","MJ.3.2348","INOP",3,"T",9.76934,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3551,3556,{"$raw":"00000000"},"110403","MJ.3.2349","INOP",3,"T",31.70368,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3552,3557,{"$raw":"00000000"},"110403","MJ.3.2350","INOP",3,"T",39.99048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3553,3558,{"$raw":"00000000"},"110403","MJ.3.2351","INOP",3,"T",20.31380,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3554,3559,{"$raw":"00000000"},"110403","MJ.3.2352","INOP",3,"T",39.04461,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3555,3560,{"$raw":"00000000"},"110403","MJ.3.2353","INOP",3,"T",24.28466,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3556,3561,{"$raw":"00000000"},"110403","MJ.3.2354","INOP",3,"T",31.45541,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3557,3562,{"$raw":"00000000"},"110403","MJ.3.2355","INOP",3,"T",24.94789,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3558,3563,{"$raw":"00000000"},"110403","MJ.3.2356","INOP",3,"T",7.93522,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3559,3564,{"$raw":"00000000"},"110403","MJ.3.2357","INOP",3,"T",6.36404,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3560,3565,{"$raw":"00000000"},"110403","MJ.3.2358","INOP",3,"T",3.27866,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3561,3566,{"$raw":"00000000"},"110403","MJ.3.2359","INOP",3,"T",14.26263,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3562,3567,{"$raw":"00000000"},"110403","MJ.3.2360","INOP",3,"T",96.26275,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3563,3568,{"$raw":"00000000"},"110403","MJ.3.2361","INOP",3,"T",129.36134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3564,3569,{"$raw":"00000000"},"110403","MJ.3.2362","INOP",3,"T",81.83745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3565,3570,{"$raw":"00000000"},"110403","MJ.3.2363","INOP",3,"T",15.24852,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3566,3571,{"$raw":"00000000"},"110403","MJ.3.2364","INOP",3,"T",3.35336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3567,3572,{"$raw":"00000000"},"110403","MJ.3.2365","INOP",3,"T",124.17225,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3568,3573,{"$raw":"00000000"},"110403","MJ.3.2366","INOP",3,"T",10.52658,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3569,3574,{"$raw":"00000000"},"110403","MJ.3.2367","INOP",3,"T",127.91836,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3570,3575,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3571,3576,{"$raw":"00000000"},"110403","MJ.3.2368","INOP",3,"T",13.66920,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3572,3577,{"$raw":"00000000"},"110403","MJ.3.2369","INOP",3,"T",9.13020,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3573,3578,{"$raw":"00000000"},"110403","MJ.3.2370","INOP",3,"T",1.41152,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3574,3579,{"$raw":"00000000"},"110403","MJ.1.74","OPER",1,"A",3.21498,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3575,3580,{"$raw":"00000000"},"110403","MJ.3.2371","INOP",3,"T",8.22582,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3576,3581,{"$raw":"00000000"},"110403","MJ.3.2372","INOP",3,"T",57.90816,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3577,3582,{"$raw":"00000000"},"110403","MJ.3.2373","INOP",3,"T",389.12545,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3578,3583,{"$raw":"00000000"},"110403","MJ.3.2374","INOP",3,"T",3.37202,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3579,3584,{"$raw":"00000000"},"110403","MJ.3.2375","INOP",3,"T",39.11942,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3580,3585,{"$raw":"00000000"},"110403","MJ.3.2376","INOP",3,"T",3.16206,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3581,3586,{"$raw":"00000000"},"110403","MJ.3.2377","INOP",3,"T",92.85668,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3582,3587,{"$raw":"00000000"},"110403","MJ.3.2378","INOP",3,"T",3.04508,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3583,3588,{"$raw":"00000000"},"110403","MJ.3.2379","INOP",3,"T",156.42762,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",3584,3589,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",67.48198,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3585,3590,{"$raw":"00000000"},"110403","MJ.3.2380","INOP",3,"T",149.22045,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3586,3591,{"$raw":"00000000"},"110403","MJ.3.2381","INOP",3,"T",232.91522,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",3587,3592,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",61.04444,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110403",1,null,"R DO OUTEIRO",3588,3593,{"$raw":"00000000"},"110403","R DO OUTEIRO","INOP",3,"T",50.80855,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",3589,3594,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",37.82784,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,"26 ago 2003","R",null,"110410",1,null,"R DOS ARNEIROS",3590,3595,{"$raw":"00000000"},"110410","R DOS ARNEIROS","INOP",3,"T",112.68137,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,"26 ago 2003","R",null,"110410",1,null,"R DOS ARNEIROS",3591,3596,{"$raw":"00000000"},"110410","R DOS ARNEIROS","INOP",3,"T",219.68827,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,"26 ago 2003","R",null,"110410",1,null,"R DOS ARNEIROS",3592,3597,{"$raw":"00000000"},"110410","R DOS ARNEIROS","INOP",3,"T",27.17284,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3593,3598,{"$raw":"00000000"},"110403","MJ.3.2382","INOP",3,"T",106.53045,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3594,3599,{"$raw":"00000000"},"110403","MJ.1.75","OPER",1,"A",4.01956,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3595,3600,{"$raw":"00000000"},"110403","MJ.1.76","OPER",1,"A",3.51980,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,3596,3601,{"$raw":"00000000"},"110403","MJ.3.2383","INOP",3,"T",119.20829,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3597,3602,{"$raw":"00000000"},"110403","MJ.3.2384","INOP",3,"T",43.82505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3598,3603,{"$raw":"00000000"},"110403","MJ.3.2385","INOP",3,"T",86.54715,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3599,3604,{"$raw":"00000000"},"110403","MJ.3.2386","INOP",3,"T",208.33917,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3600,3605,{"$raw":"00000000"},"110403","MJ.3.2387","INOP",3,"T",5.71490,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3601,3606,{"$raw":"00000000"},"110403","MJ.3.2388","INOP",3,"T",21.47141,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3602,3607,{"$raw":"00000000"},"110403","MJ.3.2389","INOP",3,"T",58.17407,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3603,3608,{"$raw":"00000000"},"110403","MJ.3.2390","INOP",3,"T",31.10721,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3604,3609,{"$raw":"00000000"},"110403","MJ.3.2391","INOP",3,"T",18.02467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3605,3610,{"$raw":"00000000"},"110403","MJ.1.77","OPER",1,"A",2.78959,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3606,3611,{"$raw":"00000000"},"110403","MJ.3.2392","INOP",3,"T",7.27602,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3607,3612,{"$raw":"00000000"},"110403","MJ.3.2393","INOP",3,"T",53.85413,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3608,3613,{"$raw":"00000000"},"110403","MJ.3.2394","INOP",3,"T",82.65074,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3609,3614,{"$raw":"00000000"},"110403","MJ.3.2395","INOP",3,"T",66.87469,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3610,3615,{"$raw":"00000000"},"110403","MJ.3.2396","INOP",3,"T",145.72107,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3611,3616,{"$raw":"00000000"},"110403","MJ.3.2397","INOP",3,"T",32.61353,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3612,3617,{"$raw":"00000000"},"110403","MJ.3.2398","INOP",3,"T",149.35720,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3613,3618,{"$raw":"00000000"},"110403","MJ.3.2399","INOP",3,"T",14.09081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3614,3619,{"$raw":"00000000"},"110403","MJ.3.2400","INOP",3,"T",47.17672,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3615,3620,{"$raw":"00000000"},"110403","MJ.3.2401","INOP",3,"T",237.31327,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3616,3621,{"$raw":"00000000"},"110403","MJ.3.2402","INOP",3,"T",16.80740,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3617,3622,{"$raw":"00000000"},"110403","MJ.3.2403","INOP",3,"T",47.37616,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3618,3623,{"$raw":"00000000"},"110403","MJ.3.2404","INOP",3,"T",107.38239,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3619,3624,{"$raw":"00000000"},"110403","MJ.3.2405","INOP",3,"T",135.40596,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3620,3625,{"$raw":"00000000"},"110403","MJ.3.2406","INOP",3,"T",190.76070,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3621,3626,{"$raw":"00000000"},"110403","MJ.3.2407","INOP",3,"T",115.84604,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3622,3627,{"$raw":"00000000"},"110403","MJ.3.2408","INOP",3,"T",291.69908,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3623,3628,{"$raw":"00000000"},"110403","MJ.3.2409","INOP",3,"T",64.75300,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3624,3629,{"$raw":"00000000"},"110403","MJ.3.2410","INOP",3,"T",8.91433,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3625,3630,{"$raw":"00000000"},"110403","MJ.3.2411","INOP",3,"T",98.50073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3626,3631,{"$raw":"00000000"},"110403","MJ.3.2412","INOP",3,"T",98.16899,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3627,3632,{"$raw":"00000000"},"110403","MJ.3.2413","INOP",3,"T",67.48743,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3628,3633,{"$raw":"00000000"},"110403","MJ.3.2414","INOP",3,"T",52.44589,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3629,3634,{"$raw":"00000000"},"110403","MJ.3.2415","INOP",3,"T",73.62572,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3630,3635,{"$raw":"00000000"},"110403","MJ.3.2416","INOP",3,"T",283.10718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3631,3636,{"$raw":"00000000"},"110403","MJ.3.2417","INOP",3,"T",138.17852,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3632,3637,{"$raw":"00000000"},"110403","MJ.3.2418","INOP",3,"T",40.01422,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3633,3638,{"$raw":"00000000"},"110403","MJ.3.2419","INOP",3,"T",98.38788,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3634,3639,{"$raw":"00000000"},"110403","MJ.3.2420","INOP",3,"T",0.33015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3635,3640,{"$raw":"00000000"},"110403","MJ.3.2421","INOP",3,"T",221.84331,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3636,3641,{"$raw":"00000000"},"110403","MJ.3.2422","INOP",3,"T",49.03189,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3637,3642,{"$raw":"00000000"},"110403","MJ.3.2423","INOP",3,"T",164.65014,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3638,3643,{"$raw":"00000000"},"110403","MJ.3.2424","INOP",3,"T",74.28179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3639,3644,{"$raw":"00000000"},"110403","MJ.3.2425","INOP",3,"T",40.86121,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3640,3645,{"$raw":"00000000"},"110403","MJ.1.78","OPER",1,"A",3.11313,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3641,3646,{"$raw":"00000000"},"110403","MJ.3.2426","INOP",3,"T",22.58484,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3642,3647,{"$raw":"00000000"},"110403","MJ.3.2427","INOP",3,"T",27.95921,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3643,3648,{"$raw":"00000000"},"110403","MJ.3.2428","INOP",3,"T",55.77641,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3644,3649,{"$raw":"00000000"},"110403","MJ.3.2429","INOP",3,"T",105.85700,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3645,3650,{"$raw":"00000000"},"110403","MJ.3.2430","INOP",3,"T",3.08649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3646,3651,{"$raw":"00000000"},"110403","MJ.1.79","OPER",1,"A",2.95462,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3647,3652,{"$raw":"00000000"},"110403","MJ.3.2431","INOP",3,"T",27.26818,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3648,3653,{"$raw":"00000000"},"110403","MJ.3.2432","INOP",3,"T",61.50665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3649,3654,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,12.85252,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3650,3655,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,27.27780,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3651,3656,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,119.90722,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3652,3657,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,408.96155,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3653,3658,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,45.96855,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3654,3659,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,59.60557,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3655,3660,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,82.94880,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3656,3661,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.82079,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3657,3662,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.14568,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3658,3663,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.10098,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3659,3664,{"$raw":"00000000"},"110403","MJ.3.2433","INOP",3,"T",3.76630,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3660,3665,{"$raw":"00000000"},"110403","MJ.3.2434","INOP",3,"T",25.51863,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3661,3666,{"$raw":"00000000"},"110403","MJ.3.2435","INOP",3,"T",71.94539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3662,3667,{"$raw":"00000000"},"110403","MJ.3.2436","INOP",3,"T",3.13696,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3663,3668,{"$raw":"00000000"},"110403","MJ.1.80","OPER",1,"A",4.83141,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3664,3669,{"$raw":"00000000"},"110403","MJ.3.2437","INOP",3,"T",41.13706,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3665,3670,{"$raw":"00000000"},"110403","MJ.3.2438","INOP",3,"T",46.41835,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3666,3671,{"$raw":"00000000"},"110403","MJ.3.2439","INOP",3,"T",46.34372,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3667,3672,{"$raw":"00000000"},"110403","MJ.3.2440","INOP",3,"T",67.45339,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA SERRA",null,null,"R",null,"110403",1,null,"R DA SERRA",3668,3673,{"$raw":"00000000"},"110403","R DA SERRA","INOP",3,"T",45.05837,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CEMITÉRIO",null,"23 Out 2000","R",null,"110405",1,null,"R DO CEMITÉRIO",3669,3674,{"$raw":"00000000"},"110405","R DO CEMITÉRIO","INOP",3,"T",152.41851,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3670,3675,{"$raw":"00000000"},"110403","MJ.3.2441","INOP",3,"T",184.69728,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3671,3676,{"$raw":"00000000"},"110403","MJ.3.2442","INOP",3,"T",72.30123,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3672,3677,{"$raw":"00000000"},"110405","MJ.3.2443","INOP",3,"T",166.20758,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3673,3678,{"$raw":"00000000"},"110403","MJ.3.2444","INOP",3,"T",230.25939,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3674,3679,{"$raw":"00000000"},"110403","MJ.3.2445","INOP",3,"T",2.23143,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3675,3680,{"$raw":"00000000"},"110403","MJ.3.2446","INOP",3,"T",170.96765,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3676,3681,{"$raw":"00000000"},"110403","MJ.3.2447","INOP",3,"T",1.48071,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3677,3682,{"$raw":"00000000"},"110403","MJ.3.2448","INOP",3,"T",43.37139,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3678,3683,{"$raw":"00000000"},"110403","MJ.1.81","OPER",1,"A",3.66150,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110403",1,null,null,3679,3684,{"$raw":"00000000"},"110403","MJ.3.2449","INOP",3,"T",78.64602,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3680,3685,{"$raw":"00000000"},"110403","MJ.3.2450","INOP",3,"T",2.14832,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3681,3686,{"$raw":"00000000"},"110403","MJ.3.2451","INOP",3,"T",8.63209,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3682,3687,{"$raw":"00000000"},"110403","MJ.3.2452","INOP",3,"T",7.14857,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3683,3688,{"$raw":"00000000"},"110403","MJ.3.2453","INOP",3,"T",4.80942,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3684,3689,{"$raw":"00000000"},"110403","MJ.3.2454","INOP",3,"T",9.16417,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3685,3690,{"$raw":"00000000"},"110403","MJ.3.2455","INOP",3,"T",8.22893,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3686,3691,{"$raw":"00000000"},"110403","MJ.3.2456","INOP",3,"T",9.01205,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3687,3692,{"$raw":"00000000"},"110403","MJ.3.2457","INOP",3,"T",48.68216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3688,3693,{"$raw":"00000000"},"110403","MJ.3.2458","INOP",3,"T",97.63309,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3689,3694,{"$raw":"00000000"},"110403","MJ.3.2459","INOP",3,"T",1.52069,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3690,3695,{"$raw":"00000000"},"110403","MJ.3.2460","INOP",3,"T",88.12849,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3691,3696,{"$raw":"00000000"},"110403","MJ.3.2461","INOP",3,"T",77.69614,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3692,3697,{"$raw":"00000000"},"110403","MJ.3.2462","INOP",3,"T",26.50827,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3693,3698,{"$raw":"00000000"},"110403","MJ.3.2463","INOP",3,"T",9.41216,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3694,3699,{"$raw":"00000000"},"110403","MJ.3.2464","INOP",3,"T",145.64241,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3695,3700,{"$raw":"00000000"},"110403","MJ.3.2465","INOP",3,"T",3.10466,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3696,3701,{"$raw":"00000000"},"110403","MJ.1.82","OPER",1,"A",4.62173,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3697,3702,{"$raw":"00000000"},"110403","MJ.1.83","OPER",1,"A",3.89971,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3698,3703,{"$raw":"00000000"},"110403","MJ.3.2466","INOP",3,"T",18.86592,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3699,3704,{"$raw":"00000000"},"110403","MJ.3.2467","INOP",3,"T",69.66918,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3700,3705,{"$raw":"00000000"},"110403","MJ.3.2468","INOP",3,"T",55.33944,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3701,3706,{"$raw":"00000000"},"110403","MJ.3.2469","INOP",3,"T",106.70916,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3702,3707,{"$raw":"00000000"},"110403","MJ.3.2470","INOP",3,"T",146.09507,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3703,3708,{"$raw":"00000000"},"110403","MJ.3.2471","INOP",3,"T",116.02673,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3704,3709,{"$raw":"00000000"},"110403","MJ.3.2472","INOP",3,"T",26.61094,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3705,3710,{"$raw":"00000000"},"110403","MJ.3.2473","INOP",3,"T",6.04996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3706,3711,{"$raw":"00000000"},"110403","MJ.3.2474","INOP",3,"T",35.63377,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3707,3712,{"$raw":"00000000"},"110403","MJ.3.2475","INOP",3,"T",51.72962,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3708,3713,{"$raw":"00000000"},"110403","MJ.1.84","OPER",1,"A",3.08846,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3709,3714,{"$raw":"00000000"},"110403","MJ.1.85","OPER",1,"A",3.64967,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3710,3715,{"$raw":"00000000"},"110403","MJ.3.2476","INOP",3,"T",23.71168,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3711,3716,{"$raw":"00000000"},"110403","MJ.3.2477","INOP",3,"T",182.06171,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3712,3717,{"$raw":"00000000"},"110403","MJ.3.2478","INOP",3,"T",101.32195,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3713,3718,{"$raw":"00000000"},"110403","MJ.3.2479","INOP",3,"T",10.41117,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3714,3719,{"$raw":"00000000"},"110403","MJ.3.2480","INOP",3,"T",3.23285,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3715,3720,{"$raw":"00000000"},"110403","MJ.3.2481","INOP",3,"T",5.60616,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3716,3721,{"$raw":"00000000"},"110403","MJ.1.86","OPER",1,"A",3.13900,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3717,3722,{"$raw":"00000000"},"110403","MJ.1.87","OPER",1,"A",2.99020,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3718,3723,{"$raw":"00000000"},"110403","MJ.3.2482","INOP",3,"T",48.04802,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3719,3724,{"$raw":"00000000"},"110403","MJ.3.2483","INOP",3,"T",134.33755,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3720,3725,{"$raw":"00000000"},"110403","MJ.3.2484","INOP",3,"T",13.17782,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3721,3726,{"$raw":"00000000"},"110403","MJ.1.88","OPER",1,"A",5.57455,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3722,3727,{"$raw":"00000000"},"110403","MJ.1.89","OPER",1,"A",3.40000,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3723,3728,{"$raw":"00000000"},"110403","MJ.3.2485","INOP",3,"T",184.52106,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","da Fonte",null,null,null,null,null,"110403",1,null,null,3724,3729,{"$raw":"00000000"},"110403","MJ.3.2486","INOP",3,"T",175.93797,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3725,3730,{"$raw":"00000000"},"110403","MJ.1.90","OPER",1,"A",3.44135,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3726,3731,{"$raw":"00000000"},"110403","MJ.3.2487","INOP",3,"T",34.07327,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3727,3732,{"$raw":"00000000"},"110403","MJ.3.2488","INOP",3,"T",114.84433,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3728,3733,{"$raw":"00000000"},"110403","MJ.3.2489","INOP",3,"T",47.68103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3729,3734,{"$raw":"00000000"},"110403","MJ.3.2490","INOP",3,"T",16.66827,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3730,3735,{"$raw":"00000000"},"110403","MJ.3.2491","INOP",3,"T",223.15337,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3731,3736,{"$raw":"00000000"},"110403","MJ.3.2492","INOP",3,"T",62.74969,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3732,3737,{"$raw":"00000000"},"110403","MJ.3.2493","INOP",3,"T",57.02699,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3733,3738,{"$raw":"00000000"},"110403","MJ.3.2494","INOP",3,"T",329.42489,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3734,3739,{"$raw":"00000000"},"110403","MJ.3.2495","INOP",3,"T",55.56315,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3735,3740,{"$raw":"00000000"},"110403","MJ.3.2496","INOP",3,"T",8.74035,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3736,3741,{"$raw":"00000000"},"110403","MJ.3.2497","INOP",3,"T",136.31648,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3737,3742,{"$raw":"00000000"},"110403","MJ.3.2498","INOP",3,"T",71.67054,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3738,3743,{"$raw":"00000000"},"110403","MJ.3.2499","INOP",3,"T",6.93782,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3739,3744,{"$raw":"00000000"},"110403","MJ.3.2500","INOP",3,"T",89.64987,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3740,3745,{"$raw":"00000000"},"110403","MJ.3.2501","INOP",3,"T",0.36235,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3741,3746,{"$raw":"00000000"},"110403","MJ.3.2502","INOP",3,"T",49.91542,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3742,3747,{"$raw":"00000000"},"110403","MJ.3.2503","INOP",3,"T",208.30785,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",3743,3748,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",124.42385,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CADEIA",null,null,"LG",null,"110402",1,null,"LG DA CADEIA",3744,3749,{"$raw":"00000000"},"110402","LG DA CADEIA","INOP",3,"T",24.35714,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3745,3750,{"$raw":"00000000"},"110403","MJ.3.2504","INOP",3,"T",77.22812,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3746,3751,{"$raw":"00000000"},"110403","MJ.3.2505","INOP",3,"T",107.20294,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3747,3752,{"$raw":"00000000"},"110403","MJ.3.2506","INOP",3,"T",84.19198,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3748,3753,{"$raw":"00000000"},"110403","MJ.3.2507","INOP",3,"T",66.67907,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3749,3754,{"$raw":"00000000"},"110403","MJ.3.2508","INOP",3,"T",44.12017,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3750,3755,{"$raw":"00000000"},"110403","MJ.3.2509","INOP",3,"T",17.36903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3751,3756,{"$raw":"00000000"},"110403","MJ.3.2510","INOP",3,"T",14.53798,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3752,3757,{"$raw":"00000000"},"110403","MJ.3.2511","INOP",3,"T",143.44438,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3753,3758,{"$raw":"00000000"},"110403","MJ.3.2512","INOP",3,"T",157.63204,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3754,3759,{"$raw":"00000000"},"110403","MJ.3.2513","INOP",3,"T",14.04934,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3755,3760,{"$raw":"00000000"},"110403","MJ.3.2514","INOP",3,"T",8.18931,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3756,3761,{"$raw":"00000000"},"110403","MJ.3.2515","INOP",3,"T",128.72113,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3757,3762,{"$raw":"00000000"},"110403","MJ.3.2516","INOP",3,"T",7.23916,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3758,3763,{"$raw":"00000000"},"110403","MJ.3.2517","INOP",3,"T",5.68009,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3759,3764,{"$raw":"00000000"},"110403","MJ.3.2518","INOP",3,"T",109.97174,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3760,3765,{"$raw":"00000000"},"110403","MJ.3.2519","INOP",3,"T",364.18078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3761,3766,{"$raw":"00000000"},"110403","MJ.3.2520","INOP",3,"T",5.60191,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3762,3767,{"$raw":"00000000"},"110403","MJ.3.2521","INOP",3,"T",36.31017,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3763,3768,{"$raw":"00000000"},"110403","MJ.3.2522","INOP",3,"T",76.37164,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3764,3769,{"$raw":"00000000"},"110403","MJ.3.2523","INOP",3,"T",65.02187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3765,3770,{"$raw":"00000000"},"110403","MJ.3.2524","INOP",3,"T",49.80229,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3766,3771,{"$raw":"00000000"},"110403","MJ.3.2525","INOP",3,"T",6.92033,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3767,3772,{"$raw":"00000000"},"110403","MJ.3.2526","INOP",3,"T",20.72006,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3768,3773,{"$raw":"00000000"},"110403","MJ.3.2527","INOP",3,"T",12.94969,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3769,3774,{"$raw":"00000000"},"110403","MJ.3.2528","INOP",3,"T",15.28962,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3770,3775,{"$raw":"00000000"},"110403","MJ.1.91","OPER",1,"A",2.75617,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3771,3776,{"$raw":"00000000"},"110403","MJ.3.2529","INOP",3,"T",2.84155,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3772,3777,{"$raw":"00000000"},"110403","MJ.3.2530","INOP",3,"T",49.37823,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3773,3778,{"$raw":"00000000"},"110403","MJ.3.2531","INOP",3,"T",10.61830,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3774,3779,{"$raw":"00000000"},"110403","MJ.3.2532","INOP",3,"T",18.02458,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3775,3780,{"$raw":"00000000"},"110403","MJ.3.2533","INOP",3,"T",5.53841,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3776,3781,{"$raw":"00000000"},"110403","MJ.3.2534","INOP",3,"T",2.87814,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3777,3782,{"$raw":"00000000"},"110403","MJ.3.2535","INOP",3,"T",165.74046,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3778,3783,{"$raw":"00000000"},"110403","MJ.1.92","OPER",1,"A",5.24504,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3779,3784,{"$raw":"00000000"},"110403","MJ.3.2536","INOP",3,"T",48.22436,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3780,3785,{"$raw":"00000000"},"110403","MJ.3.2537","INOP",3,"T",107.75522,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3781,3786,{"$raw":"00000000"},"110403","MJ.3.2538","INOP",3,"T",3.13465,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3782,3787,{"$raw":"00000000"},"110403","MJ.3.2539","INOP",3,"T",191.01656,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3783,3788,{"$raw":"00000000"},"110403","MJ.3.2540","INOP",3,"T",246.39985,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3784,3789,{"$raw":"00000000"},"110403","MJ.3.2541","INOP",3,"T",49.53694,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3785,3790,{"$raw":"00000000"},"110403","MJ.3.2542","INOP",3,"T",176.75250,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3786,3791,{"$raw":"00000000"},"110403","MJ.3.2543","INOP",3,"T",14.86849,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,3787,3792,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3788,3793,{"$raw":"00000000"},"110403","MJ.3.2544","INOP",3,"T",1.45055,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3789,3794,{"$raw":"00000000"},"110403","MJ.3.2545","INOP",3,"T",146.67376,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3790,3795,{"$raw":"00000000"},"110403","MJ.3.2546","INOP",3,"T",159.02795,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3791,3796,{"$raw":"00000000"},"110403","MJ.3.2547","INOP",3,"T",133.23280,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3792,3797,{"$raw":"00000000"},"110403","MJ.3.2548","INOP",3,"T",43.56542,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3793,3798,{"$raw":"00000000"},"110403","MJ.3.2549","INOP",3,"T",301.70150,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3794,3799,{"$raw":"00000000"},"110403","MJ.3.2550","INOP",3,"T",126.22135,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3795,3800,{"$raw":"00000000"},"110403","MJ.3.2551","INOP",3,"T",17.06956,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3796,3801,{"$raw":"00000000"},"110403","MJ.3.2552","INOP",3,"T",175.11600,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3797,3802,{"$raw":"00000000"},"110403","MJ.3.2553","INOP",3,"T",51.89984,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3798,3803,{"$raw":"00000000"},"110403","MJ.3.2554","INOP",3,"T",154.21565,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110403",1,null,null,3799,3804,{"$raw":"00000000"},"110403","MJ.1.93","OPER",1,"A",3.14568,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3800,3805,{"$raw":"00000000"},"110403","MJ.3.2555","INOP",3,"T",4.21120,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3801,3806,{"$raw":"00000000"},"110403","MJ.3.2556","INOP",3,"T",12.97483,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3802,3807,{"$raw":"00000000"},"110403","MJ.3.2557","INOP",3,"T",30.36428,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3803,3808,{"$raw":"00000000"},"110403","MJ.3.2558","INOP",3,"T",3.51172,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3804,3809,{"$raw":"00000000"},"110403","MJ.3.2559","INOP",3,"T",241.94362,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3805,3810,{"$raw":"00000000"},"110403","MJ.3.2560","INOP",3,"T",3.69676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3806,3811,{"$raw":"00000000"},"110403","MJ.3.2561","INOP",3,"T",53.21681,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3807,3812,{"$raw":"00000000"},"110403","MJ.3.2562","INOP",3,"T",79.63679,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3808,3813,{"$raw":"00000000"},"110403","MJ.3.2563","INOP",3,"T",2.47073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3809,3814,{"$raw":"00000000"},"110403","MJ.3.2564","INOP",3,"T",36.71429,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3810,3815,{"$raw":"00000000"},"110403","MJ.3.2565","INOP",3,"T",33.59444,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3811,3816,{"$raw":"00000000"},"110403","MJ.3.2566","INOP",3,"T",3.64726,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3812,3817,{"$raw":"00000000"},"110403","MJ.3.2567","INOP",3,"T",106.34256,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3813,3818,{"$raw":"00000000"},"110403","MJ.3.2568","INOP",3,"T",12.87780,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,3814,3819,{"$raw":"00000000"},"110403","MJ.3.2569","INOP",3,"T",66.17786,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3815,3820,{"$raw":"00000000"},"110403","MJ.3.2570","INOP",3,"T",300.06286,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,3816,3821,{"$raw":"00000000"},"110403","MJ.3.2571","INOP",3,"T",180.75675,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3817,3822,{"$raw":"00000000"},"110403","MJ.3.2572","INOP",3,"T",168.44673,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3818,3823,{"$raw":"00000000"},"110403","MJ.3.2573","INOP",3,"T",83.38340,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3819,3824,{"$raw":"00000000"},"110403","MJ.3.2574","INOP",3,"T",58.83031,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3820,3825,{"$raw":"00000000"},"110403","MJ.3.2575","INOP",3,"T",14.37809,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3821,3826,{"$raw":"00000000"},"110403","MJ.3.2576","INOP",3,"T",62.92896,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3822,3827,{"$raw":"00000000"},"110403","MJ.3.2577","INOP",3,"T",3.43127,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3823,3828,{"$raw":"00000000"},"110403","MJ.3.2578","INOP",3,"T",206.54787,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3824,3829,{"$raw":"00000000"},"110403","MJ.3.2579","INOP",3,"T",182.84469,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3825,3830,{"$raw":"00000000"},"110403","MJ.3.2580","INOP",3,"T",19.44786,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3826,3831,{"$raw":"00000000"},"110403","MJ.3.2581","INOP",3,"T",230.39067,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3827,3832,{"$raw":"00000000"},"110403","MJ.3.2582","INOP",3,"T",97.93210,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3828,3833,{"$raw":"00000000"},"110403","MJ.3.2583","INOP",3,"T",85.45291,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3829,3834,{"$raw":"00000000"},"110403","MJ.3.2584","INOP",3,"T",51.27508,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3830,3835,{"$raw":"00000000"},"110403","MJ.3.2585","INOP",3,"T",130.06410,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3831,3836,{"$raw":"00000000"},"110403","MJ.3.2586","INOP",3,"T",32.28778,3.90000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3832,3837,{"$raw":"00000000"},"110403","MJ.3.2587","INOP",3,"T",231.72078,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3833,3838,{"$raw":"00000000"},"110403","MJ.3.2588","INOP",3,"T",58.02892,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3834,3839,{"$raw":"00000000"},"110403","MJ.3.2589","INOP",3,"T",17.56058,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3835,3840,{"$raw":"00000000"},"110403","MJ.3.2590","INOP",3,"T",142.51176,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3836,3841,{"$raw":"00000000"},"110403","MJ.3.2591","INOP",3,"T",42.10677,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3837,3842,{"$raw":"00000000"},"110403","MJ.3.2592","INOP",3,"T",66.98088,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3838,3843,{"$raw":"00000000"},"110403","MJ.3.2593","INOP",3,"T",8.72886,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3839,3844,{"$raw":"00000000"},"110403","MJ.3.2594","INOP",3,"T",80.39429,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3840,3845,{"$raw":"00000000"},"110403","MJ.3.2595","INOP",3,"T",81.12504,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3841,3846,{"$raw":"00000000"},"110403","MJ.3.2596","INOP",3,"T",123.21334,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3842,3847,{"$raw":"00000000"},"110403","MJ.3.2597","INOP",3,"T",161.40887,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3843,3848,{"$raw":"00000000"},"110403","MJ.3.2598","INOP",3,"T",17.91312,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3844,3849,{"$raw":"00000000"},"110403","MJ.3.2599","INOP",3,"T",41.10375,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3845,3850,{"$raw":"00000000"},"110403","MJ.3.2600","INOP",3,"T",51.43157,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3846,3851,{"$raw":"00000000"},"110403","MJ.3.2601","INOP",3,"T",221.98048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3847,3852,{"$raw":"00000000"},"110403","MJ.3.2602","INOP",3,"T",55.56639,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3848,3853,{"$raw":"00000000"},"110403","MJ.3.2603","INOP",3,"T",236.22400,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3849,3854,{"$raw":"00000000"},"110403","MJ.3.2604","INOP",3,"T",31.04779,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3850,3855,{"$raw":"00000000"},"110403","MJ.3.2605","INOP",3,"T",28.54031,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3851,3856,{"$raw":"00000000"},"110403","MJ.3.2606","INOP",3,"T",10.47402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3852,3857,{"$raw":"00000000"},"110403","MJ.3.2607","INOP",3,"T",13.07034,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3853,3858,{"$raw":"00000000"},"110403","MJ.3.2608","INOP",3,"T",170.09269,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3854,3859,{"$raw":"00000000"},"110403","MJ.3.2609","INOP",3,"T",2.36019,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3855,3860,{"$raw":"00000000"},"110403","MJ.3.2610","INOP",3,"T",61.50930,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3856,3861,{"$raw":"00000000"},"110403","MJ.3.2611","INOP",3,"T",90.36165,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3857,3862,{"$raw":"00000000"},"110403","MJ.3.2612","INOP",3,"T",37.57979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3858,3863,{"$raw":"00000000"},"110403","ACEIRO","INOP",3,"T",112.75036,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3859,3864,{"$raw":"00000000"},"110403","MJ.3.2613","INOP",3,"T",123.10961,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3860,3865,{"$raw":"00000000"},"110403","MJ.3.2614","INOP",3,"T",29.14334,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3861,3866,{"$raw":"00000000"},"110403","MJ.3.2615","INOP",3,"T",0.76922,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3862,3867,{"$raw":"00000000"},"110403","MJ.3.2616","INOP",3,"T",0.95525,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3863,3868,{"$raw":"00000000"},"110403","MJ.3.2617","INOP",3,"T",16.58027,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3864,3869,{"$raw":"00000000"},"110403","MJ.3.2618","INOP",3,"T",101.25060,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3865,3870,{"$raw":"00000000"},"110403","MJ.3.2619","INOP",3,"T",32.95907,3.90000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3866,3871,{"$raw":"00000000"},"110403","MJ.3.2620","INOP",3,"T",80.96295,3.90000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3867,3872,{"$raw":"00000000"},"110403","MJ.3.2621","INOP",3,"T",64.36203,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3868,3873,{"$raw":"00000000"},"110403","MJ.3.2622","INOP",3,"T",19.19204,3.90000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3869,3874,{"$raw":"00000000"},"110403","MJ.3.2623","INOP",3,"T",64.93407,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3870,3875,{"$raw":"00000000"},"110403","MJ.3.2624","INOP",3,"T",327.25653,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3871,3876,{"$raw":"00000000"},"110403","MJ.3.2625","INOP",3,"T",144.38798,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3872,3877,{"$raw":"00000000"},"110403","MJ.3.2626","INOP",3,"T",92.16644,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3873,3878,{"$raw":"00000000"},"110403","MJ.3.2627","INOP",3,"T",127.51059,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3874,3879,{"$raw":"00000000"},"110403","MJ.3.2628","INOP",3,"T",8.44815,3.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3875,3880,{"$raw":"00000000"},"110403","MJ.3.2629","INOP",3,"T",128.28086,3.90000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3876,3881,{"$raw":"00000000"},"110403","MJ.3.2630","INOP",3,"T",47.42451,3.90000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,3877,3882,{"$raw":"00000000"},"110403","MJ.3.2631","INOP",3,"T",168.66012,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3878,3883,{"$raw":"00000000"},"110403","MJ.3.2632","INOP",3,"T",300.81503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3879,3884,{"$raw":"00000000"},"110403","MJ.3.2633","INOP",3,"T",60.41851,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3880,3885,{"$raw":"00000000"},"110403","MJ.3.2634","INOP",3,"T",66.56232,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3881,3886,{"$raw":"00000000"},"110403","MJ.3.2635","INOP",3,"T",164.90977,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3882,3887,{"$raw":"00000000"},"110407","MJ.3.2636","INOP",3,"T",37.42176,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3883,3888,{"$raw":"00000000"},"110407","MJ.3.2637","INOP",3,"T",24.39791,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3884,3889,{"$raw":"00000000"},"110403","MJ.3.2638","INOP",3,"T",92.82332,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3885,3890,{"$raw":"00000000"},"110403","MJ.3.2639","INOP",3,"T",76.45451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3886,3891,{"$raw":"00000000"},"110403","MJ.3.2640","INOP",3,"T",63.33984,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3887,3892,{"$raw":"00000000"},"110403","MJ.3.2641","INOP",3,"T",74.57057,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3888,3893,{"$raw":"00000000"},"110403","MJ.3.2642","INOP",3,"T",55.86568,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,3889,3894,{"$raw":"00000000"},"110403","MJ.3.2643","INOP",3,"T",153.76527,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3890,3895,{"$raw":"00000000"},"110403","MJ.3.2644","INOP",3,"T",118.41284,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3891,3896,{"$raw":"00000000"},"110403","MJ.3.2645","INOP",3,"T",91.02917,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3892,3897,{"$raw":"00000000"},"110403","MJ.3.2646","INOP",3,"T",85.89826,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3893,3898,{"$raw":"00000000"},"110403","MJ.3.2647","INOP",3,"T",62.38759,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3894,3899,{"$raw":"00000000"},"110403","MJ.3.2648","INOP",3,"T",133.26408,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3895,3900,{"$raw":"00000000"},"110403","MJ.3.2649","INOP",3,"T",112.57412,3.90000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3896,3901,{"$raw":"00000000"},"110403","MJ.3.2650","INOP",3,"T",32.19179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3897,3902,{"$raw":"00000000"},"110403","MJ.3.2651","INOP",3,"T",93.77383,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3898,3903,{"$raw":"00000000"},"110403","MJ.3.2652","INOP",3,"T",42.40412,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3899,3904,{"$raw":"00000000"},"110403","MJ.3.2653","INOP",3,"T",36.88340,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3900,3905,{"$raw":"00000000"},"110403","MJ.3.2654","INOP",3,"T",36.05876,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3901,3906,{"$raw":"00000000"},"110403","MJ.3.2655","INOP",3,"T",83.48345,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3902,3907,{"$raw":"00000000"},"110403","MJ.3.2656","INOP",3,"T",186.11394,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3903,3908,{"$raw":"00000000"},"110403","MJ.3.2657","INOP",3,"T",141.23409,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3904,3909,{"$raw":"00000000"},"110403","MJ.3.2658","INOP",3,"T",42.63391,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3905,3910,{"$raw":"00000000"},"110403","MJ.3.2659","INOP",3,"T",373.31914,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3906,3911,{"$raw":"00000000"},"110403","MJ.3.2660","INOP",3,"T",119.12498,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,5,0,0,0,0,2,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3907,3912,{"$raw":"00000000"},"110403","MJ.3.2661","INOP",3,"T",24.20619,3.90000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,5,0,0,0,0,2,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3908,3913,{"$raw":"00000000"},"110403","MJ.1.94","OPER",1,"A",3.40544,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3909,3914,{"$raw":"00000000"},"110403","MJ.3.2662","INOP",3,"T",6.04840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3910,3915,{"$raw":"00000000"},"110403","MJ.3.2663","INOP",3,"T",62.04288,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3911,3916,{"$raw":"00000000"},"110407","MJ.3.2664","INOP",3,"T",341.88427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3912,3917,{"$raw":"00000000"},"110403","MJ.3.2665","INOP",3,"T",26.02768,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3913,3918,{"$raw":"00000000"},"110403","MJ.3.2666","INOP",3,"T",49.29942,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3914,3919,{"$raw":"00000000"},"110403","MJ.3.2667","INOP",3,"T",55.83953,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3915,3920,{"$raw":"00000000"},"110403","MJ.3.2668","INOP",3,"T",1.33544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3916,3921,{"$raw":"00000000"},"110407","MJ.3.2669","INOP",3,"T",117.20860,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3917,3922,{"$raw":"00000000"},"110407","MJ.3.2670","INOP",3,"T",249.11505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3918,3923,{"$raw":"00000000"},"110407","MJ.3.2671","INOP",3,"T",113.75417,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3919,3924,{"$raw":"00000000"},"110407","MJ.3.2672","INOP",3,"T",114.82111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3920,3925,{"$raw":"00000000"},"110407","MJ.3.2673","INOP",3,"T",37.84741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3921,3926,{"$raw":"00000000"},"110407","MJ.3.2674","INOP",3,"T",4.93952,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3922,3927,{"$raw":"00000000"},"110407","MJ.3.2675","INOP",3,"T",38.17996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3923,3928,{"$raw":"00000000"},"110407","MJ.3.2676","INOP",3,"T",119.10684,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3924,3929,{"$raw":"00000000"},"110407","MJ.3.2677","INOP",3,"T",8.84162,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3925,3930,{"$raw":"00000000"},"110407","MJ.3.2678","INOP",3,"T",2.90447,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3926,3931,{"$raw":"00000000"},"110407","MJ.3.2679","INOP",3,"T",64.25857,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3927,3932,{"$raw":"00000000"},"110407","MJ.3.2680","INOP",3,"T",131.10739,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3928,3933,{"$raw":"00000000"},"110407","MJ.3.2681","INOP",3,"T",222.76272,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3929,3934,{"$raw":"00000000"},"110407","MJ.3.2682","INOP",3,"T",35.28350,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3930,3935,{"$raw":"00000000"},"110407","MJ.3.2683","INOP",3,"T",63.96295,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3931,3936,{"$raw":"00000000"},"110407","MJ.3.2684","INOP",3,"T",14.05118,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,3932,3937,{"$raw":"00000000"},"110403","MJ.3.2685","INOP",3,"T",465.91481,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3933,3938,{"$raw":"00000000"},"110407","MJ.3.2686","INOP",3,"T",2.10761,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3934,3939,{"$raw":"00000000"},"110407","MJ.3.2687","INOP",3,"T",91.98716,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3935,3940,{"$raw":"00000000"},"110407","MJ.3.2688","INOP",3,"T",6.71110,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3936,3941,{"$raw":"00000000"},"110407","MJ.3.2689","INOP",3,"T",263.44103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3937,3942,{"$raw":"00000000"},"110407","MJ.3.2690","INOP",3,"T",261.70556,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,3938,3943,{"$raw":"00000000"},"110403","MJ.3.2691","INOP",3,"T",193.86596,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3939,3944,{"$raw":"00000000"},"110407","MJ.3.2692","INOP",3,"T",180.59391,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3940,3945,{"$raw":"00000000"},"110407","MJ.3.2693","INOP",3,"T",72.81396,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,3941,3946,{"$raw":"00000000"},"110407","MJ.3.2694","INOP",3,"T",263.63471,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3942,3947,{"$raw":"00000000"},"110405","MJ.3.2695","INOP",3,"T",90.40540,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3943,3948,{"$raw":"00000000"},"110405","MJ.3.2696","INOP",3,"T",133.02894,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3944,3949,{"$raw":"00000000"},"110405","MJ.3.2697","INOP",3,"T",310.70864,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3945,3950,{"$raw":"00000000"},"110405","MJ.3.2698","INOP",3,"T",3.14682,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3946,3951,{"$raw":"00000000"},"110405","MJ.3.2699","INOP",3,"T",2.65932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3947,3952,{"$raw":"00000000"},"110405","MJ.3.2700","INOP",3,"T",98.63235,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,3948,3953,{"$raw":"00000000"},"110403","MJ.3.2701","INOP",3,"T",68.63773,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,3949,3954,{"$raw":"00000000"},"110403","MJ.3.2702","INOP",3,"T",67.81403,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,3950,3955,{"$raw":"00000000"},"110403","MJ.3.2703","INOP",3,"T",107.50635,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3951,3956,{"$raw":"00000000"},"110405","MJ.3.2704","INOP",3,"T",3.34073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3952,3957,{"$raw":"00000000"},"110405","MJ.3.2705","INOP",3,"T",51.44100,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3953,3958,{"$raw":"00000000"},"110405","MJ.3.2706","INOP",3,"T",17.98719,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3954,3959,{"$raw":"00000000"},"110405","MJ.3.2707","INOP",3,"T",46.56717,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3955,3960,{"$raw":"00000000"},"110405","MJ.3.2708","INOP",3,"T",321.40586,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3956,3961,{"$raw":"00000000"},"110405","MJ.3.2709","INOP",3,"T",13.79784,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3957,3962,{"$raw":"00000000"},"110405","MJ.3.2710","INOP",3,"T",176.18015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3958,3963,{"$raw":"00000000"},"110405","MJ.3.2711","INOP",3,"T",26.63380,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3959,3964,{"$raw":"00000000"},"110405","MJ.3.2712","INOP",3,"T",66.41338,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3960,3965,{"$raw":"00000000"},"110405","MJ.3.2713","INOP",3,"T",54.56157,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3961,3966,{"$raw":"00000000"},"110405","MJ.3.2714","INOP",3,"T",28.52759,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3962,3967,{"$raw":"00000000"},"110405","MJ.3.2715","INOP",3,"T",127.13986,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3963,3968,{"$raw":"00000000"},"110405","MJ.3.2716","INOP",3,"T",3.05989,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3964,3969,{"$raw":"00000000"},"110405","MJ.3.2717","INOP",3,"T",37.58453,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3965,3970,{"$raw":"00000000"},"110405","MJ.3.2718","INOP",3,"T",79.16727,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3966,3971,{"$raw":"00000000"},"110405","MJ.3.2719","INOP",3,"T",106.93660,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,3967,3972,{"$raw":"00000000"},"110405","MJ.3.2720","INOP",3,"T",336.11177,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3968,3973,{"$raw":"00000000"},"110405","MJ.3.2721","INOP",3,"T",4.39884,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3969,3974,{"$raw":"00000000"},"110405","MJ.2.235","OPER",2,"A",3.88392,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3970,3975,{"$raw":"00000000"},"110405","MJ.3.2722","INOP",3,"T",63.72466,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3971,3976,{"$raw":"00000000"},"110405","MJ.3.2723","INOP",3,"T",40.53931,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3972,3977,{"$raw":"00000000"},"110405","MJ.2.236","OPER",2,"A",3.51027,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3973,3978,{"$raw":"00000000"},"110405","MJ.3.2724","INOP",3,"T",17.65587,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3974,3979,{"$raw":"00000000"},"110405","MJ.3.2725","INOP",3,"T",228.90400,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3975,3980,{"$raw":"00000000"},"110405","MJ.3.2726","INOP",3,"T",11.63291,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3976,3981,{"$raw":"00000000"},"110405","MJ.3.2727","INOP",3,"T",98.64313,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3977,3982,{"$raw":"00000000"},"110405","MJ.3.2728","INOP",3,"T",2.34866,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3978,3983,{"$raw":"00000000"},"110405","MJ.3.2729","INOP",3,"T",92.06908,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3979,3984,{"$raw":"00000000"},"110405","MJ.3.2730","INOP",3,"T",24.23771,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3980,3985,{"$raw":"00000000"},"110405","MJ.3.2731","INOP",3,"T",2.09824,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3981,3986,{"$raw":"00000000"},"110405","MJ.3.2732","INOP",3,"T",147.55337,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3982,3987,{"$raw":"00000000"},"110405","MJ.3.2733","INOP",3,"T",30.91454,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3983,3988,{"$raw":"00000000"},"110405","MJ.3.2734","INOP",3,"T",1.80424,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3984,3989,{"$raw":"00000000"},"110405","MJ.3.2735","INOP",3,"T",145.47932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3985,3990,{"$raw":"00000000"},"110405","MJ.3.2736","INOP",3,"A",2.80280,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3986,3991,{"$raw":"00000000"},"110405","MJ.3.2737","INOP",3,"T",179.57141,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3987,3992,{"$raw":"00000000"},"110405","MJ.1.95","OPER",1,"A",2.71015,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3988,3993,{"$raw":"00000000"},"110405","MJ.1.96","OPER",1,"A",2.84450,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3989,3994,{"$raw":"00000000"},"110405","MJ.3.2738","INOP",3,"T",221.86900,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3990,3995,{"$raw":"00000000"},"110405","MJ.3.2739","INOP",3,"T",184.64497,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3991,3996,{"$raw":"00000000"},"110405","MJ.3.2740","INOP",3,"T",68.57379,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3992,3997,{"$raw":"00000000"},"110405","MJ.3.2741","INOP",3,"T",42.44697,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3993,3998,{"$raw":"00000000"},"110405","MJ.3.2742","INOP",3,"T",2.91979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3994,3999,{"$raw":"00000000"},"110405","MJ.3.2743","INOP",3,"T",194.23198,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3995,4000,{"$raw":"00000000"},"110405","MJ.3.2744","INOP",3,"T",141.96681,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3996,4001,{"$raw":"00000000"},"110405","MJ.3.2745","INOP",3,"T",35.36479,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3997,4002,{"$raw":"00000000"},"110405","MJ.3.2746","INOP",3,"T",50.46784,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3998,4003,{"$raw":"00000000"},"110405","MJ.3.2747","INOP",3,"T",79.37567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,3999,4004,{"$raw":"00000000"},"110405","MJ.3.2748","INOP",3,"T",164.22575,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4000,4005,{"$raw":"00000000"},"110405","MJ.3.2749","INOP",3,"T",216.36385,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,4001,4006,{"$raw":"00000000"},"110405","MJ.3.2750","INOP",3,"T",256.42355,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL",null,null,"R",null,"110405",1,null,"R DO CASAL",4002,4007,{"$raw":"00000000"},"110405","R DO CASAL","INOP",3,"T",58.18258,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4003,4008,{"$raw":"00000000"},"110405","MJ.3.2751","INOP",3,"T",16.77463,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4004,4009,{"$raw":"00000000"},"110405","MJ.3.2752","INOP",3,"T",3.22870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4005,4010,{"$raw":"00000000"},"110405","MJ.3.2753","INOP",3,"T",37.25053,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4006,4011,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.00000,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4007,4012,{"$raw":"00000000"},"110405","MJ.3.2754","INOP",3,"T",135.95336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4008,4013,{"$raw":"00000000"},"110405","MJ.3.2755","INOP",3,"T",6.63042,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4009,4014,{"$raw":"00000000"},"110405","MJ.3.2756","INOP",3,"T",53.32583,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4010,4015,{"$raw":"00000000"},"110405","MJ.1.97","OPER",1,"A",4.89568,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4011,4016,{"$raw":"00000000"},"110405","MJ.3.2757","INOP",3,"T",18.25056,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VAIS MENINOS",null,null,"R",null,"110405",1,null,"R DOS VAIS MENINOS",4012,4017,{"$raw":"00000000"},"110405","R DOS VAIS MENINOS","INOP",3,"T",60.07172,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VAIS MENINOS",null,null,"R",null,"110405",1,null,"R DOS VAIS MENINOS",4013,4018,{"$raw":"00000000"},"110405","R DOS VAIS MENINOS","INOP",3,"T",51.71186,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4014,4019,{"$raw":"00000000"},"110405","MJ.3.2758","INOP",3,"T",16.52535,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4015,4020,{"$raw":"00000000"},"110405","MJ.3.2759","INOP",3,"T",22.21526,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4016,4021,{"$raw":"00000000"},"110405","MJ.3.2760","INOP",3,"T",35.46119,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS PEDRAS",null,null,"R",null,"110405",1,null,"R DAS PEDRAS",4017,4022,{"$raw":"00000000"},"110405","R DAS PEDRAS","INOP",3,"T",57.28564,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4018,4023,{"$raw":"00000000"},"110405","MJ.3.2761","INOP",3,"T",3.30831,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4019,4024,{"$raw":"00000000"},"110405","MJ.3.2762","INOP",3,"T",51.54406,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4020,4025,{"$raw":"00000000"},"110405","MJ.3.2763","INOP",3,"T",103.56662,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ESTREITO",null,null,"R",null,"110405",1,null,"R DO ESTREITO",4021,4026,{"$raw":"00000000"},"110405","R DO ESTREITO","INOP",3,"T",40.43349,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4022,4027,{"$raw":"00000000"},"110405","MJ.3.2764","INOP",3,"T",2.95576,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4023,4028,{"$raw":"00000000"},"110405","MJ.3.2765","INOP",3,"T",84.28944,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4024,4029,{"$raw":"00000000"},"110405","MJ.3.2766","INOP",3,"T",81.98775,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4025,4030,{"$raw":"00000000"},"110405","MJ.1.98","OPER",1,"A",2.77705,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4026,4031,{"$raw":"00000000"},"110405","MJ.3.2767","INOP",3,"T",183.60165,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4027,4032,{"$raw":"00000000"},"110405","MJ.3.2768","INOP",3,"T",4.39483,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4028,4033,{"$raw":"00000000"},"110405","MJ.3.2769","INOP",3,"T",1.89169,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4029,4034,{"$raw":"00000000"},"110405","MJ.3.2770","INOP",3,"T",28.29310,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4030,4035,{"$raw":"00000000"},"110405","MJ.3.2771","INOP",3,"T",78.28111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4031,4036,{"$raw":"00000000"},"110405","MJ.3.2772","INOP",3,"T",65.78179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4032,4037,{"$raw":"00000000"},"110405","MJ.3.2773","INOP",3,"T",1.98910,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4033,4038,{"$raw":"00000000"},"110405","MJ.3.2774","INOP",3,"T",146.02507,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4034,4039,{"$raw":"00000000"},"110405","MJ.3.2775","INOP",3,"T",2.58925,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4035,4040,{"$raw":"00000000"},"110405","MJ.3.2776","INOP",3,"T",3.64967,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4036,4041,{"$raw":"00000000"},"110405","MJ.3.2777","INOP",3,"T",53.32933,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4037,4042,{"$raw":"00000000"},"110405","MJ.3.2778","INOP",3,"T",93.96092,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4038,4043,{"$raw":"00000000"},"110405","MJ.3.2779","INOP",3,"T",18.70819,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4039,4044,{"$raw":"00000000"},"110405","MJ.3.2780","INOP",3,"T",2.80236,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4040,4045,{"$raw":"00000000"},"110405","MJ.3.2781","INOP",3,"T",120.03105,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4041,4046,{"$raw":"00000000"},"110405","MJ.3.2782","INOP",3,"T",69.76057,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4042,4047,{"$raw":"00000000"},"110405","MJ.3.2783","INOP",3,"T",223.47455,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4043,4048,{"$raw":"00000000"},"110405","MJ.2.237","OPER",2,"A",2.17610,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4044,4049,{"$raw":"00000000"},"110405","MJ.3.2784","INOP",3,"T",180.20967,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4045,4050,{"$raw":"00000000"},"110405","MJ.3.2785","INOP",3,"T",62.82133,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4046,4051,{"$raw":"00000000"},"110405","MJ.3.2786","INOP",3,"T",94.42882,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CARVALHEIRA",null,"15 Jan 2001","R",null,"110405",1,null,"R DA CARVALHEIRA",4047,4052,{"$raw":"00000000"},"110405","R DA CARVALHEIRA","INOP",3,"T",94.48695,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4048,4053,{"$raw":"00000000"},"110405","MJ.3.2787","INOP",3,"A",3.54634,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4049,4054,{"$raw":"00000000"},"110405","MJ.3.2788","INOP",3,"T",103.16519,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",4050,4055,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",384.89124,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4051,4056,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",538.58103,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1",null,null,"DOS CAETANOS",null,null,"R",null,"110405",1,null,"R DOS CAETANOS",4052,4057,{"$raw":"00000000"},"110405","R DOS CAETANOS","INOP",3,"T",63.67122,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4053,4058,{"$raw":"00000000"},"110405","MJ.3.2789","INOP",3,"T",200.94166,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4054,4059,{"$raw":"00000000"},"110405","MJ.3.2790","INOP",3,"T",256.73682,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4055,4060,{"$raw":"00000000"},"110405","MJ.3.2791","INOP",3,"T",1.77767,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4056,4061,{"$raw":"00000000"},"110405","MJ.3.2792","INOP",3,"T",125.46300,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4057,4062,{"$raw":"00000000"},"110405","MJ.3.2793","INOP",3,"T",3.41211,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4058,4063,{"$raw":"00000000"},"110405","MJ.3.2794","INOP",3,"T",127.36560,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4059,4064,{"$raw":"00000000"},"110405","MJ.3.2795","INOP",3,"T",290.63128,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA QUINTA DA NORUEGA",null,"16/11/2004","ESTR",null,"110405",1,null,"ESTR DA QUINTA DA NORUEGA",4060,4065,{"$raw":"00000000"},"110405","ESTR DA QUINTA DA NORUEGA","INOP",3,"T",144.10356,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4061,4066,{"$raw":"00000000"},"110405","MJ.3.2796","INOP",3,"T",132.91246,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4062,4067,{"$raw":"00000000"},"110405","MJ.3.2797","INOP",3,"T",74.17207,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4063,4068,{"$raw":"00000000"},"110405","MJ.3.2798","INOP",3,"T",2.63519,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4064,4069,{"$raw":"00000000"},"110405","MJ.2.238","OPER",2,"A",3.89071,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4065,4070,{"$raw":"00000000"},"110405","MJ.3.2799","INOP",3,"T",3.06620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4066,4071,{"$raw":"00000000"},"110407","MJ.3.2800","INOP",3,"T",3.43023,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4067,4072,{"$raw":"00000000"},"110405","MJ.3.2801","INOP",3,"T",3.35555,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4068,4073,{"$raw":"00000000"},"110405","MJ.3.2802","INOP",3,"T",2.84074,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4069,4074,{"$raw":"00000000"},"110407","MJ.3.2803","INOP",3,"T",83.67072,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4070,4075,{"$raw":"00000000"},"110407","MJ.3.2804","INOP",3,"T",34.83876,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4071,4076,{"$raw":"00000000"},"110407","MJ.3.2805","INOP",3,"T",2.82455,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4072,4077,{"$raw":"00000000"},"110407","MJ.3.2806","INOP",3,"T",268.71753,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4073,4078,{"$raw":"00000000"},"110407","MJ.3.2807","INOP",3,"T",2.43772,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4074,4079,{"$raw":"00000000"},"110407","MJ.3.2808","INOP",3,"T",144.74403,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4075,4080,{"$raw":"00000000"},"110407","MJ.3.2809","INOP",3,"T",11.76079,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4076,4081,{"$raw":"00000000"},"110407","MJ.3.2810","INOP",3,"T",131.55350,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4077,4082,{"$raw":"00000000"},"110407","MJ.3.2811","INOP",3,"T",439.35254,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4078,4083,{"$raw":"00000000"},"110407","MJ.3.2812","INOP",3,"T",2.16391,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4079,4084,{"$raw":"00000000"},"110407","MJ.3.2813","INOP",3,"T",2.07543,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4080,4085,{"$raw":"00000000"},"110405","MJ.3.2814","INOP",3,"T",3.32006,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4081,4086,{"$raw":"00000000"},"110405","MJ.3.2815","INOP",3,"T",87.44321,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4082,4087,{"$raw":"00000000"},"110407","MJ.3.2816","INOP",3,"T",1.99922,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4083,4088,{"$raw":"00000000"},"110407","MJ.3.2817","INOP",3,"T",34.79341,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4084,4089,{"$raw":"00000000"},"110407","MJ.2.239","OPER",2,"A",1.93437,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4085,4090,{"$raw":"00000000"},"110405","MJ.3.2818","INOP",3,"T",2.39635,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4086,4091,{"$raw":"00000000"},"110405","MJ.1.99","OPER",1,"A",2.02704,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4087,4092,{"$raw":"00000000"},"110405","MJ.3.2819","INOP",3,"T",246.58530,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4088,4093,{"$raw":"00000000"},"110405","MJ.3.2820","INOP",3,"T",96.07386,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4089,4094,{"$raw":"00000000"},"110405","MJ.1.100","OPER",1,"A",2.39767,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4090,4095,{"$raw":"00000000"},"110405","MJ.3.2821","INOP",3,"T",10.05661,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4091,4096,{"$raw":"00000000"},"110405","MJ.3.2822","INOP",3,"T",221.36810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4092,4097,{"$raw":"00000000"},"110405","MJ.3.2823","INOP",3,"T",2.02040,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4093,4098,{"$raw":"00000000"},"110405","MJ.3.2824","INOP",3,"T",18.45538,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4094,4099,{"$raw":"00000000"},"110405","MJ.3.2825","INOP",3,"T",224.11548,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4095,4100,{"$raw":"00000000"},"110405","MJ.3.2826","INOP",3,"T",2.28493,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4096,4101,{"$raw":"00000000"},"110405","MJ.3.2827","INOP",3,"T",9.18959,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4097,4102,{"$raw":"00000000"},"110405","MJ.1.101","OPER",1,"A",3.04844,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4098,4103,{"$raw":"00000000"},"110405","MJ.3.2828","INOP",3,"T",228.51347,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4099,4104,{"$raw":"00000000"},"110405","MJ.3.2829","INOP",3,"T",195.24324,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4100,4105,{"$raw":"00000000"},"110405","MJ.3.2830","INOP",3,"T",64.44932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4101,4106,{"$raw":"00000000"},"110405","MJ.3.2831","INOP",3,"T",88.45840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4102,4107,{"$raw":"00000000"},"110405","MJ.1.102","OPER",1,"A",2.72943,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4103,4108,{"$raw":"00000000"},"110405","MJ.3.2832","INOP",3,"T",35.00604,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4104,4109,{"$raw":"00000000"},"110405","MJ.3.2833","INOP",3,"T",28.46392,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4105,4110,{"$raw":"00000000"},"110405","MJ.1.103","OPER",1,"A",1.83273,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4106,4111,{"$raw":"00000000"},"110405","MJ.1.104","OPER",1,"A",1.81177,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4107,4112,{"$raw":"00000000"},"110405","MJ.3.2834","INOP",3,"T",1.30138,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4108,4113,{"$raw":"00000000"},"110405","MJ.3.2835","INOP",3,"T",28.11737,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4109,4114,{"$raw":"00000000"},"110405","MJ.3.2836","INOP",3,"T",0.77524,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4110,4115,{"$raw":"00000000"},"110405","MJ.3.2837","INOP",3,"T",28.92748,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","das Flores",null,null,null,null,null,"110405",1,null,null,4111,4116,{"$raw":"00000000"},"110405","MJ.3.2838","INOP",3,"T",292.76380,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4112,4117,{"$raw":"00000000"},"110405","MJ.3.2839","INOP",3,"T",30.05277,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"R DAS FLORES",null,null,"R",null,"110405",1,null,null,4113,4118,{"$raw":"00000000"},"110405","MJ.3.2840","INOP",3,"T",101.98769,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4114,4119,{"$raw":"00000000"},"110405","MJ.3.2841","INOP",3,"T",71.41732,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4115,4120,{"$raw":"00000000"},"110405","MJ.3.2842","INOP",3,"T",3.14479,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4116,4121,{"$raw":"00000000"},"110405","MJ.3.2843","INOP",3,"T",275.83430,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS","Processo nº 03/07/131, 03/07/267","23 Out 2000, 10 jul 2007","R",null,"110405",1,null,"R DOS MOINHOS",4117,4122,{"$raw":"00000000"},"110405","R DOS MOINHOS","INOP",3,"T",16.28244,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO RIO",null,null,"TV",null,"110405",1,null,"TV DO RIO",4118,4123,{"$raw":"00000000"},"110405","TV DO RIO","INOP",3,"T",1.64247,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO RIO",null,null,"TV",null,"110405",1,null,"TV DO RIO",4119,4124,{"$raw":"00000000"},"110405","TV DO RIO","INOP",3,"T",127.44273,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOUROS",null,null,"ESTR",null,"110404",1,null,"ESTR DOS MOUROS",4120,4125,{"$raw":"00000000"},"110404","ESTR DOS MOUROS","INOP",3,"T",70.10520,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE VILÃO",null,"25 jan 2005","TV",null,"110407",1,null,"TV DO VALE VILÃO",4121,4126,{"$raw":"00000000"},"110407","TV DO VALE VILÃO","OPER",2,"A",82.34341,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4122,4127,{"$raw":"00000000"},"110401","MJ.2.240","OPER",2,"A",53.53485,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4123,4128,{"$raw":"00000000"},"110405","MJ.3.2844","INOP",3,"T",103.90592,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,4124,4129,{"$raw":"00000000"},"110405","MJ.3.2845","INOP",3,"T",135.09213,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4125,4130,{"$raw":"00000000"},"110405","MJ.3.2846","INOP",3,"T",74.94547,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4126,4131,{"$raw":"00000000"},"110405","MJ.3.2847","INOP",3,"T",17.50678,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ÁGUA TINTA",null,"23 Out 2000","R",null,"110405",1,null,"R ÁGUA TINTA",4127,4132,{"$raw":"00000000"},"110405","R ÁGUA TINTA","INOP",3,"T",55.73340,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4128,4133,{"$raw":"00000000"},"110405","MJ.3.2848","INOP",3,"T",39.84298,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4129,4134,{"$raw":"00000000"},"110405","MJ.3.2849","INOP",3,"T",29.74021,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4130,4135,{"$raw":"00000000"},"110405","MJ.3.2850","INOP",3,"T",2.61620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4131,4136,{"$raw":"00000000"},"110405","MJ.3.2851","INOP",3,"T",2.74612,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4132,4137,{"$raw":"00000000"},"110405","MJ.3.2852","INOP",3,"T",40.60751,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4133,4138,{"$raw":"00000000"},"110405","MJ.3.2853","INOP",3,"T",2.72919,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4134,4139,{"$raw":"00000000"},"110405","MJ.3.2854","INOP",3,"T",35.00486,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","20 de Janeiro",null,null,null,null,null,"110405",1,null,null,4135,4140,{"$raw":"00000000"},"110405","MJ.3.2855","INOP",3,"T",287.41055,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA","Não se sabe onde termina o BC","23 Out 2000","BC",null,"110405",1,null,"BC DA ESCOLA",4136,4141,{"$raw":"00000000"},"110405","BC DA ESCOLA","INOP",3,"T",28.47059,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4137,4142,{"$raw":"00000000"},"110405","MJ.3.2856","INOP",3,"T",46.78582,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4138,4143,{"$raw":"00000000"},"110405","MJ.3.2857","INOP",3,"T",133.13544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4139,4144,{"$raw":"00000000"},"110405","MJ.3.2858","INOP",3,"T",2.04002,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4140,4145,{"$raw":"00000000"},"110405","MJ.3.2859","INOP",3,"T",1.99625,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4141,4146,{"$raw":"00000000"},"110405","MJ.3.2860","INOP",3,"T",55.82530,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4142,4147,{"$raw":"00000000"},"110405","MJ.2.241","OPER",2,"A",2.82639,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4143,4148,{"$raw":"00000000"},"110405","MJ.2.242","OPER",2,"A",3.25897,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4144,4149,{"$raw":"00000000"},"110405","MJ.3.2861","INOP",3,"T",2.04377,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4145,4150,{"$raw":"00000000"},"110405","MJ.3.2862","INOP",3,"T",84.98038,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4146,4151,{"$raw":"00000000"},"110405","MJ.3.2863","INOP",3,"T",53.74514,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","SD",null,null,null,null,null,null,"110405",1,null,null,4147,4152,{"$raw":"00000000"},"110405","MJ.3.2864","INOP",3,"T",99.78096,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,4148,4153,{"$raw":"00000000"},"110405","MJ.3.2865","INOP",3,"T",43.61981,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4149,4154,{"$raw":"00000000"},"110405","MJ.3.2866","INOP",3,"T",85.21314,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4150,4155,{"$raw":"00000000"},"110405","MJ.2.243","OPER",2,"A",2.95489,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4151,4156,{"$raw":"00000000"},"110405","MJ.3.2867","INOP",3,"T",131.35148,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4152,4157,{"$raw":"00000000"},"110405","MJ.2.244","OPER",2,"A",3.11307,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4153,4158,{"$raw":"00000000"},"110405","MJ.3.2868","INOP",3,"T",21.75106,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4154,4159,{"$raw":"00000000"},"110405","MJ.3.2869","INOP",3,"T",29.98414,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4155,4160,{"$raw":"00000000"},"110405","MJ.3.2870","INOP",3,"T",11.38871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4156,4161,{"$raw":"00000000"},"110405","MJ.3.2871","INOP",3,"T",3.84376,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4157,4162,{"$raw":"00000000"},"110405","MJ.3.2872","INOP",3,"T",14.54802,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4158,4163,{"$raw":"00000000"},"110405","MJ.3.2873","INOP",3,"T",78.06531,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4159,4164,{"$raw":"00000000"},"110405","MJ.3.2874","INOP",3,"T",106.01786,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4160,4165,{"$raw":"00000000"},"110405","MJ.3.2875","INOP",3,"T",3.13600,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4161,4166,{"$raw":"00000000"},"110405","MJ.3.2876","INOP",3,"T",1.75514,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4162,4167,{"$raw":"00000000"},"110405","MJ.3.2877","INOP",3,"T",2.08147,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4163,4168,{"$raw":"00000000"},"110405","MJ.3.2878","INOP",3,"T",96.99363,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4164,4169,{"$raw":"00000000"},"110405","MJ.3.2879","INOP",3,"T",10.04760,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4165,4170,{"$raw":"00000000"},"110405","MJ.3.2880","INOP",3,"T",1.76955,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4166,4171,{"$raw":"00000000"},"110405","MJ.3.2881","INOP",3,"T",1.86797,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4167,4172,{"$raw":"00000000"},"110405","MJ.3.2882","INOP",3,"T",2.88130,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4168,4173,{"$raw":"00000000"},"110407","MJ.3.2883","INOP",3,"T",1.74270,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,4169,4174,{"$raw":"00000000"},"110405","MJ.3.2884","INOP",3,"T",255.57018,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4170,4175,{"$raw":"00000000"},"110407","MJ.3.2885","INOP",3,"T",55.61224,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4171,4176,{"$raw":"00000000"},"110405","MJ.3.2886","INOP",3,"T",2.12577,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4172,4177,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.45036,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4173,4178,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1051.93334,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4174,4179,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.71017,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4175,4180,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,143.96557,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4176,4181,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.31297,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4177,4182,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,138.13784,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4178,4183,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.78514,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4179,4184,{"$raw":"00000000"},"110403","MJ.3.2887","INOP",3,"T",10.44960,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4180,4185,{"$raw":"00000000"},null,"MJ.3.2888",null,3,"T",5.92680,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,4181,4186,{"$raw":"00000000"},"110403","MJ.3.2889","INOP",3,"T",313.04583,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,4182,4187,{"$raw":"00000000"},"110403","MJ.3.2890","INOP",3,"T",215.06399,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4183,4188,{"$raw":"00000000"},"110401","MJ.3.2891","INOP",3,"T",11.84647,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4184,4189,{"$raw":"00000000"},"110401","MJ.3.2892","INOP",3,"T",206.74847,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTA ANA",null,"23 Out 2000","LG",null,"110405",1,null,"LG SANTA ANA",4185,4190,{"$raw":"00000000"},"110405","LG SANTA ANA","INOP",3,"T",40.37611,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTA ANA",null,"23 Out 2000","LG",null,"110405",1,null,"LG SANTA ANA",4186,4191,{"$raw":"00000000"},"110405","LG SANTA ANA","INOP",3,"T",9.21959,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO NORTE",null,"23 Out 2000","R",null,"110405",1,null,"R DO NORTE",4187,4192,{"$raw":"00000000"},"110405","R DO NORTE","INOP",3,"T",146.45271,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"20 DE JANEIRO",null,"23 Out 2000","R",null,"110405",1,null,"R 20 DE JANEIRO",4188,4193,{"$raw":"00000000"},"110405","R 20 DE JANEIRO","INOP",3,"T",43.15982,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CARVALHEIRA",null,"15 Jan 2001","R",null,"110405",1,null,"R DA CARVALHEIRA",4189,4194,{"$raw":"00000000"},"110405","R DA CARVALHEIRA","INOP",3,"T",128.38939,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CARVALHEIRA",null,"15 Jan 2001","R",null,"110405",1,null,"R DA CARVALHEIRA",4190,4195,{"$raw":"00000000"},"110405","R DA CARVALHEIRA","INOP",3,"T",90.77646,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MEIO",null,null,"R",null,"110405",1,null,"R DO MEIO",4191,4196,{"$raw":"00000000"},"110405","R DO MEIO","OPER",2,"A",127.61662,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4192,4197,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",63.22758,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4193,4198,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.83064,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4194,4199,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,114.97355,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4195,4200,{"$raw":"00000000"},"110401","MJ.3.2893","INOP",3,"T",20.69983,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4196,4201,{"$raw":"00000000"},"110401","MJ.3.2894","INOP",3,"T",5.22138,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4197,4202,{"$raw":"00000000"},"110401","MJ.3.2895","INOP",3,"T",9.46578,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4198,4203,{"$raw":"00000000"},"110401","MJ.3.2896","INOP",3,"T",40.15557,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4199,4204,{"$raw":"00000000"},"110401","MJ.3.2897","INOP",3,"T",5.50146,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,4200,4205,{"$raw":"00000000"},"110403","MJ.3.2898","INOP",3,"T",198.05195,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4201,4206,{"$raw":"00000000"},"110403","MJ.3.2899","INOP",3,"T",22.28822,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4202,4207,{"$raw":"00000000"},"110403","MJ.3.2900","INOP",3,"T",2.09201,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4203,4208,{"$raw":"00000000"},"110403","MJ.3.2901","INOP",3,"T",312.69369,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4204,4209,{"$raw":"00000000"},"110403","MJ.3.2902","INOP",3,"T",93.38447,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4205,4210,{"$raw":"00000000"},"110401","MJ.3.2903","INOP",3,"T",329.84197,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4206,4211,{"$raw":"00000000"},"110401","MJ.3.2904","INOP",3,"T",53.21039,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4207,4212,{"$raw":"00000000"},"110401","MJ.3.2905","INOP",3,"T",13.86232,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4208,4213,{"$raw":"00000000"},"110403","MJ.3.2906","INOP",3,"T",270.07467,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4209,4214,{"$raw":"00000000"},"110403","MJ.3.2907","INOP",3,"T",82.96512,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4210,4215,{"$raw":"00000000"},"110403","MJ.3.2908","INOP",3,"T",272.14735,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4211,4216,{"$raw":"00000000"},"110403","MJ.3.2909","INOP",3,"T",235.01535,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4212,4217,{"$raw":"00000000"},"110403","MJ.3.2910","INOP",3,"T",101.87562,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4213,4218,{"$raw":"00000000"},"110403","MJ.3.2911","INOP",3,"T",226.32043,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4214,4219,{"$raw":"00000000"},"110403","MJ.3.2912","INOP",3,"T",29.59148,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4215,4220,{"$raw":"00000000"},"110403","MJ.3.2913","INOP",3,"T",125.17144,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4216,4221,{"$raw":"00000000"},"110401","MJ.3.2914","INOP",3,"T",226.09426,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,4217,4222,{"$raw":"00000000"},"110403","MJ.3.2915","INOP",3,"T",10.43148,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4218,4223,{"$raw":"00000000"},"110401","MJ.3.2916","INOP",3,"T",128.41920,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4220,4225,{"$raw":"00000000"},"110401","MJ.3.2918","INOP",3,"T",233.35921,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4221,4226,{"$raw":"00000000"},"110401","MJ.3.2919","INOP",3,"T",6.35295,3.90000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4222,4227,{"$raw":"00000000"},"110401","MJ.3.2920","INOP",3,"T",37.99660,3.90000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4223,4228,{"$raw":"00000000"},"110401","MJ.3.2921","INOP",3,"T",17.97251,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4224,4229,{"$raw":"00000000"},"110403","MJ.3.2922","INOP",3,"T",296.04740,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4225,4230,{"$raw":"00000000"},"110403","MJ.3.2923","INOP",3,"T",219.62220,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4226,4231,{"$raw":"00000000"},"110403","MJ.3.2924","INOP",3,"T",105.78088,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4227,4232,{"$raw":"00000000"},"110403","MJ.3.2925","INOP",3,"T",43.05169,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4228,4233,{"$raw":"00000000"},"110403","MJ.3.2926","INOP",3,"T",141.58802,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4229,4234,{"$raw":"00000000"},"110403","MJ.3.2927","INOP",3,"T",126.26891,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,4230,4235,{"$raw":"00000000"},"110403","MJ.3.2928","INOP",3,"T",116.78221,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4231,4236,{"$raw":"00000000"},"110401","MJ.3.2929","INOP",3,"T",149.74970,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4232,4237,{"$raw":"00000000"},"110407","MJ.3.2930","INOP",3,"T",115.15406,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4233,4238,{"$raw":"00000000"},"110407","MJ.3.2931","INOP",3,"T",79.47050,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4234,4239,{"$raw":"00000000"},"110407","MJ.3.2932","INOP",3,"T",57.79527,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4235,4240,{"$raw":"00000000"},"110407","MJ.3.2933","INOP",3,"T",79.16476,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4236,4241,{"$raw":"00000000"},"110407","MJ.3.2934","INOP",3,"T",27.18434,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4237,4242,{"$raw":"00000000"},"110407","MJ.3.2935","INOP",3,"T",92.03911,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4238,4243,{"$raw":"00000000"},"110407","MJ.3.2936","INOP",3,"T",21.70495,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4239,4244,{"$raw":"00000000"},"110407","MJ.3.2937","INOP",3,"T",4.23416,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4240,4245,{"$raw":"00000000"},"110407","MJ.3.2938","INOP",3,"T",93.21626,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4241,4246,{"$raw":"00000000"},"110407","MJ.3.2939","INOP",3,"T",99.26608,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4242,4247,{"$raw":"00000000"},"110407","MJ.3.2940","INOP",3,"T",121.61760,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4243,4248,{"$raw":"00000000"},"110407","MJ.3.2941","INOP",3,"T",295.64753,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4244,4249,{"$raw":"00000000"},"110407","MJ.3.2942","INOP",3,"T",551.40817,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4245,4250,{"$raw":"00000000"},"110407","MJ.3.2943","INOP",3,"T",314.28779,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,4246,4251,{"$raw":"00000000"},"110407","MJ.2.245","OPER",2,"A",3.97404,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4247,4252,{"$raw":"00000000"},"110407","MJ.3.2944","INOP",3,"T",33.95328,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4248,4253,{"$raw":"00000000"},"110407","MJ.3.2945","INOP",3,"T",119.62122,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4249,4254,{"$raw":"00000000"},"110407","MJ.3.2946","INOP",3,"T",13.02947,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4250,4255,{"$raw":"00000000"},"110407","MJ.3.2947","INOP",3,"T",5.25990,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4251,4256,{"$raw":"00000000"},"110407","MJ.3.2948","INOP",3,"T",162.56325,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4252,4257,{"$raw":"00000000"},"110407","MJ.3.2949","INOP",3,"T",268.29549,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,4253,4258,{"$raw":"00000000"},"110403","MJ.3.2950","INOP",3,"T",322.48685,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4254,4259,{"$raw":"00000000"},"110401","MJ.3.2951","INOP",3,"T",63.05951,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4255,4260,{"$raw":"00000000"},"110403","MJ.3.2952","INOP",3,"T",43.42541,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4256,4261,{"$raw":"00000000"},"110403","MJ.3.2953","INOP",3,"T",95.62108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4257,4262,{"$raw":"00000000"},"110403","MJ.3.2954","INOP",3,"T",131.71161,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4258,4263,{"$raw":"00000000"},"110403","MJ.3.2955","INOP",3,"T",246.59606,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4259,4264,{"$raw":"00000000"},"110401","MJ.1.105","OPER",1,"A",6.49223,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4260,4265,{"$raw":"00000000"},"110401","MJ.3.2956","INOP",3,"T",160.83618,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4261,4266,{"$raw":"00000000"},"110401","MJ.3.2957","INOP",3,"T",54.62926,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4262,4267,{"$raw":"00000000"},"110401","MJ.3.2958","INOP",3,"T",158.36079,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4263,4268,{"$raw":"00000000"},"110401","MJ.3.2959","INOP",3,"T",0.02236,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4264,4269,{"$raw":"00000000"},"110401","MJ.3.2960","INOP",3,"T",68.65613,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4265,4270,{"$raw":"00000000"},"110403","MJ.3.2961","INOP",3,"T",80.26684,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4266,4271,{"$raw":"00000000"},"110403","MJ.3.2962","INOP",3,"T",68.20998,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4267,4272,{"$raw":"00000000"},"110401","MJ.3.2963","INOP",3,"T",4.91643,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4268,4273,{"$raw":"00000000"},"110401","MJ.3.2964","INOP",3,"T",120.57984,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4269,4274,{"$raw":"00000000"},"110401","MJ.3.2965","INOP",3,"A",145.18880,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4270,4275,{"$raw":"00000000"},"110401","MJ.3.2966","INOP",3,"T",3.23805,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4271,4276,{"$raw":"00000000"},"110401","MJ.1.106","OPER",1,"A",111.00798,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4272,4277,{"$raw":"00000000"},"110401","MJ.3.2967","INOP",3,"T",3.63369,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4273,4278,{"$raw":"00000000"},"110401","MJ.3.2968","INOP",3,"T",4.16043,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4274,4279,{"$raw":"00000000"},"110401","MJ.3.2969","INOP",3,"T",161.43268,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4275,4280,{"$raw":"00000000"},"110401","MJ.3.2970","INOP",3,"T",30.67744,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4276,4281,{"$raw":"00000000"},"110401","MJ.3.2971","INOP",3,"T",101.84353,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4277,4282,{"$raw":"00000000"},"110401","MJ.3.2972","INOP",3,"T",12.90727,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4278,4283,{"$raw":"00000000"},"110401","MJ.3.2973","INOP",3,"T",95.44603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,4279,4284,{"$raw":"00000000"},"110403","MJ.3.2974","INOP",3,"T",116.96603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4280,4285,{"$raw":"00000000"},"110403","MJ.3.2975","INOP",3,"T",51.26723,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4281,4286,{"$raw":"00000000"},"110401","MJ.3.2976","INOP",3,"T",14.33422,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4282,4287,{"$raw":"00000000"},"110401","MJ.3.2977","INOP",3,"T",152.99072,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4283,4288,{"$raw":"00000000"},"110401","MJ.3.2978","INOP",3,"T",86.37054,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4284,4289,{"$raw":"00000000"},"110401","MJ.3.2979","INOP",3,"T",33.94796,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,4285,4290,{"$raw":"00000000"},"110403","MJ.3.2980","INOP",3,"T",202.26920,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4286,4291,{"$raw":"00000000"},"110401","MJ.3.2981","INOP",3,"T",131.82765,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4287,4292,{"$raw":"00000000"},"110401","MJ.3.2982","INOP",3,"T",19.28055,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4288,4293,{"$raw":"00000000"},"110401","MJ.3.2983","INOP",3,"T",5.42208,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4289,4294,{"$raw":"00000000"},"110401","MJ.3.2984","INOP",3,"T",52.46709,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4290,4295,{"$raw":"00000000"},"110401","MJ.3.2985","INOP",3,"T",63.03219,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4291,4296,{"$raw":"00000000"},"110401","MJ.3.2986","INOP",3,"T",199.70216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4292,4297,{"$raw":"00000000"},"110401","MJ.3.2987","INOP",3,"T",12.10421,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4293,4298,{"$raw":"00000000"},"110401","MJ.3.2988","INOP",3,"T",16.72056,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4294,4299,{"$raw":"00000000"},"110401","MJ.3.2989","INOP",3,"T",205.05371,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4295,4300,{"$raw":"00000000"},"110401","MJ.3.2990","INOP",3,"T",120.33450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4296,4301,{"$raw":"00000000"},"110401","MJ.3.2991","INOP",3,"T",218.11738,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4297,4302,{"$raw":"00000000"},"110401","MJ.3.2992","INOP",3,"T",102.92782,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4298,4303,{"$raw":"00000000"},"110401","MJ.3.2993","INOP",3,"T",121.93751,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4299,4304,{"$raw":"00000000"},"110401","MJ.3.2994","INOP",3,"T",132.89920,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4300,4305,{"$raw":"00000000"},"110401","MJ.3.2995","INOP",3,"T",25.00171,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4301,4306,{"$raw":"00000000"},"110401","MJ.3.2996","INOP",3,"T",194.03369,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4302,4307,{"$raw":"00000000"},"110401","MJ.3.2997","INOP",3,"T",342.30796,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4303,4308,{"$raw":"00000000"},"110401","MJ.3.2998","INOP",3,"T",20.51571,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4304,4309,{"$raw":"00000000"},"110401","MJ.3.2999","INOP",3,"T",104.36138,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4305,4310,{"$raw":"00000000"},"110401","MJ.3.3000","INOP",3,"T",139.69383,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4306,4311,{"$raw":"00000000"},"110401","MJ.3.3001","INOP",3,"T",5.57891,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4307,4312,{"$raw":"00000000"},"110401","MJ.3.3002","INOP",3,"T",4.79930,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4308,4313,{"$raw":"00000000"},"110401","MJ.3.3003","INOP",3,"T",35.97038,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4309,4314,{"$raw":"00000000"},"110401","MJ.3.3004","INOP",3,"T",89.90517,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4310,4315,{"$raw":"00000000"},"110401","MJ.3.3005","INOP",3,"T",113.84331,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4311,4316,{"$raw":"00000000"},"110401","MJ.3.3006","INOP",3,"T",82.64862,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4312,4317,{"$raw":"00000000"},"110401","MJ.3.3007","INOP",3,"T",113.23675,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4313,4318,{"$raw":"00000000"},"110401","MJ.3.3008","INOP",3,"T",99.48142,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4314,4319,{"$raw":"00000000"},"110401","MJ.1.107","OPER",1,"A",3.15831,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4315,4320,{"$raw":"00000000"},"110407","MJ.1.108","OPER",1,"A",2.46449,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,4316,4321,{"$raw":"00000000"},"110407","MJ.3.3009","INOP",3,"T",61.73499,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4317,4322,{"$raw":"00000000"},"110407","MJ.3.3010","INOP",3,"T",28.38298,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4318,4323,{"$raw":"00000000"},"110407","MJ.3.3011","INOP",3,"T",46.90883,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4319,4324,{"$raw":"00000000"},"110407","MJ.3.3012","INOP",3,"T",106.61463,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4320,4325,{"$raw":"00000000"},"110407","MJ.3.3013","INOP",3,"T",4.62741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4321,4326,{"$raw":"00000000"},"110407","MJ.3.3014","INOP",3,"T",2.91405,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4322,4327,{"$raw":"00000000"},"110407","MJ.3.3015","INOP",3,"T",2.52723,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4323,4328,{"$raw":"00000000"},"110407","MJ.3.3016","INOP",3,"T",188.05431,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4324,4329,{"$raw":"00000000"},"110407","MJ.3.3017","INOP",3,"T",19.58510,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4325,4330,{"$raw":"00000000"},"110407","MJ.3.3018","INOP",3,"T",2.43477,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4326,4331,{"$raw":"00000000"},"110407","MJ.3.3019","INOP",3,"T",147.60547,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4327,4332,{"$raw":"00000000"},"110407","MJ.3.3020","INOP",3,"T",3.82539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4328,4333,{"$raw":"00000000"},"110407","MJ.3.3021","INOP",3,"T",13.74673,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4329,4334,{"$raw":"00000000"},"110407","MJ.3.3022","INOP",3,"T",75.67058,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4330,4335,{"$raw":"00000000"},"110407","MJ.3.3023","INOP",3,"T",253.83923,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4331,4336,{"$raw":"00000000"},"110407","MJ.3.3024","INOP",3,"T",2.46562,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4332,4337,{"$raw":"00000000"},"110407","MJ.3.3025","INOP",3,"T",7.31441,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4333,4338,{"$raw":"00000000"},"110407","MJ.3.3026","INOP",3,"T",18.90434,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4334,4339,{"$raw":"00000000"},"110407","MJ.3.3027","INOP",3,"T",151.12375,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4335,4340,{"$raw":"00000000"},"110407","MJ.3.3028","INOP",3,"T",5.37239,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4336,4341,{"$raw":"00000000"},"110407","MJ.3.3029","INOP",3,"T",2.45082,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4337,4342,{"$raw":"00000000"},"110407","MJ.3.3030","INOP",3,"T",55.37673,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4338,4343,{"$raw":"00000000"},"110407","MJ.3.3031","INOP",3,"T",88.35426,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4339,4344,{"$raw":"00000000"},"110407","MJ.3.3032","INOP",3,"T",57.64466,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4340,4345,{"$raw":"00000000"},"110407","MJ.3.3033","INOP",3,"T",140.98521,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4341,4346,{"$raw":"00000000"},"110407","MJ.3.3034","INOP",3,"T",106.21769,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4342,4347,{"$raw":"00000000"},"110407","MJ.3.3035","INOP",3,"T",161.26497,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4343,4348,{"$raw":"00000000"},"110407","MJ.3.3036","INOP",3,"T",199.33895,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,null,"TV",null,"110407",1,null,"TV DO CHAFARIZ",4344,4349,{"$raw":"00000000"},"110407","TV DO CHAFARIZ","OPER",1,"A",40.68669,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"PONTE DA MURTENHEIRA",null,null,"CAM",null,"110407",1,null,"CAM PONTE DA MURTENHEIRA",4345,4350,{"$raw":"00000000"},"110407","CAM PONTE DA MURTENHEIRA","INOP",3,"T",166.29740,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PONTE DA MURTENHEIRA",null,null,"CAM",null,"110407",1,null,"CAM PONTE DA MURTENHEIRA",4346,4351,{"$raw":"00000000"},"110407","CAM PONTE DA MURTENHEIRA","INOP",3,"A",84.08841,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"R",null,"110407",1,null,"R DO MOINHO",4347,4352,{"$raw":"00000000"},"110407","R DO MOINHO","INOP",3,"T",22.24279,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4348,4353,{"$raw":"00000000"},"110407","MJ.3.3037","INOP",3,"T",99.66467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4349,4354,{"$raw":"00000000"},"110407","MJ.3.3038","INOP",3,"T",28.25909,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4350,4355,{"$raw":"00000000"},"110407","MJ.3.3039","INOP",3,"T",16.07055,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4351,4356,{"$raw":"00000000"},"110407","MJ.3.3040","INOP",3,"T",22.80646,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4352,4357,{"$raw":"00000000"},"110407","MJ.3.3041","INOP",3,"T",40.69801,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4353,4358,{"$raw":"00000000"},"110407","MJ.3.3042","INOP",3,"T",9.79311,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4354,4359,{"$raw":"00000000"},"110407","MJ.3.3043","INOP",3,"T",2.96331,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4355,4360,{"$raw":"00000000"},"110407","MJ.3.3044","INOP",3,"T",34.00753,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4356,4361,{"$raw":"00000000"},"110407","MJ.3.3045","INOP",3,"T",104.61470,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4357,4362,{"$raw":"00000000"},"110407","MJ.2.246","OPER",2,"A",3.45845,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4358,4363,{"$raw":"00000000"},"110407","MJ.3.3046","INOP",3,"T",74.88594,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4359,4364,{"$raw":"00000000"},"110407","MJ.3.3047","INOP",3,"T",88.02603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4360,4365,{"$raw":"00000000"},"110407","MJ.3.3048","INOP",3,"T",59.73231,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110407",1,null,null,4361,4366,{"$raw":"00000000"},"110407","MJ.3.3049","INOP",3,"T",37.96812,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4362,4367,{"$raw":"00000000"},"110407","MJ.2.247","OPER",2,"A",3.21279,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4363,4368,{"$raw":"00000000"},"110407","MJ.3.3050","INOP",3,"T",49.48353,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4364,4369,{"$raw":"00000000"},"110401","MJ.3.3051","INOP",3,"T",90.95298,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4365,4370,{"$raw":"00000000"},"110401","MJ.3.3052","INOP",3,"T",187.71103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4366,4371,{"$raw":"00000000"},"110401","MJ.3.3053","INOP",3,"T",118.55454,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4367,4372,{"$raw":"00000000"},"110401","MJ.3.3054","INOP",3,"T",147.09620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,4368,4373,{"$raw":"00000000"},"110407","MJ.3.3055","INOP",3,"T",3.48180,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4369,4374,{"$raw":"00000000"},"110401","MJ.3.3056","INOP",3,"T",52.63847,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,4370,4375,{"$raw":"00000000"},"110407","MJ.3.3057","INOP",3,"T",6.40816,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4371,4376,{"$raw":"00000000"},"110401","MJ.3.3058","INOP",3,"T",216.22654,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4372,4377,{"$raw":"00000000"},"110407","MJ.3.3059","INOP",3,"T",5.65128,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4373,4378,{"$raw":"00000000"},"110407","MJ.2.248","OPER",2,"A",6.79512,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,4374,4379,{"$raw":"00000000"},"110407","MJ.3.3060","INOP",3,"T",67.03374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4375,4380,{"$raw":"00000000"},"110407","MJ.3.3061","INOP",3,"T",2.59384,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4376,4381,{"$raw":"00000000"},"110407","MJ.3.3062","INOP",3,"T",54.58986,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4377,4382,{"$raw":"00000000"},"110407","MJ.3.3063","INOP",3,"T",33.91729,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4378,4383,{"$raw":"00000000"},"110407","MJ.3.3064","INOP",3,"T",2.35153,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4379,4384,{"$raw":"00000000"},"110407","MJ.3.3065","INOP",3,"T",155.95526,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4380,4385,{"$raw":"00000000"},"110407","MJ.3.3066","INOP",3,"T",2.67081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4381,4386,{"$raw":"00000000"},"110407","MJ.3.3067","INOP",3,"T",67.05685,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4382,4387,{"$raw":"00000000"},"110407","MJ.3.3068","INOP",3,"T",2.99608,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4383,4388,{"$raw":"00000000"},"110407","MJ.3.3069","INOP",3,"T",163.85682,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4384,4389,{"$raw":"00000000"},"110407","MJ.3.3070","INOP",3,"T",71.76969,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4385,4390,{"$raw":"00000000"},"110407","MJ.3.3071","INOP",3,"T",2.71249,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4386,4391,{"$raw":"00000000"},"110407","MJ.3.3072","INOP",3,"T",1.47597,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4387,4392,{"$raw":"00000000"},"110407","MJ.3.3073","INOP",3,"T",115.83486,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4388,4393,{"$raw":"00000000"},"110407","MJ.2.249","OPER",2,"A",4.16617,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4389,4394,{"$raw":"00000000"},"110407","MJ.3.3074","INOP",3,"T",30.32160,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4390,4395,{"$raw":"00000000"},"110407","MJ.2.250","OPER",2,"A",1.94180,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4391,4396,{"$raw":"00000000"},"110407","MJ.3.3075","INOP",3,"T",1.89156,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4392,4397,{"$raw":"00000000"},"110407","MJ.3.3076","INOP",3,"T",111.15346,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4393,4398,{"$raw":"00000000"},"110407","MJ.3.3077","INOP",3,"T",49.51910,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4394,4399,{"$raw":"00000000"},"110407","MJ.3.3078","INOP",3,"T",96.01376,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4395,4400,{"$raw":"00000000"},"110407","MJ.3.3079","INOP",3,"T",90.16205,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4396,4401,{"$raw":"00000000"},"110407","MJ.3.3080","INOP",3,"T",106.52728,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4397,4402,{"$raw":"00000000"},"110407","MJ.3.3081","INOP",3,"T",111.68579,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4398,4403,{"$raw":"00000000"},"110407","MJ.3.3082","INOP",3,"T",4.81956,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DA LIBERDADE",null,null,"R",null,"110405",1,null,"R DA LIBERDADE",4399,4404,{"$raw":"00000000"},"110405","R DA LIBERDADE","OPER",1,"A",79.03552,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","1037",null,null,"CM",null,"110405",1,null,"CM 1037",4400,4405,{"$raw":"00000000"},"110405","CM 1037","OPER",1,"A",8.44471,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MEIO",null,null,"R",null,"110405",1,null,"R DO MEIO",4401,4406,{"$raw":"00000000"},"110405","R DO MEIO","OPER",2,"A",76.08169,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4402,4407,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,7.09549,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4403,4408,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,83.84853,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4404,4409,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,101.32613,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4405,4410,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",8.12144,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4406,4411,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",46.12445,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1037","1037",null,null,"CM",null,"110405",1,null,"CM 1037",4407,4412,{"$raw":"00000000"},"110405","CM 1037","OPER",1,"A",176.79052,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","1037",null,null,"CM",null,"110405",1,null,"CM 1037",4408,4413,{"$raw":"00000000"},"110405","CM 1037","OPER",1,"A",120.31702,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","1037",null,null,"CM",null,"110405",1,null,"CM 1037",4409,4414,{"$raw":"00000000"},"110405","CM 1037","OPER",1,"A",60.72187,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4410,4415,{"$raw":"00000000"},"110407","MJ.3.3083","INOP",3,"T",7.16789,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4411,4416,{"$raw":"00000000"},"110407","MJ.3.3084","INOP",3,"T",244.96157,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",4412,4417,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",156.28480,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",4413,4418,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",85.37282,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4414,4419,{"$raw":"00000000"},"110407","MJ.3.3085","INOP",3,"T",39.16548,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4415,4420,{"$raw":"00000000"},"110407","MJ.3.3086","INOP",3,"T",149.43451,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4416,4421,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",344.91254,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4417,4422,{"$raw":"00000000"},"110407","MJ.3.3087","INOP",3,"T",126.92168,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4418,4423,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",296.16646,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4419,4424,{"$raw":"00000000"},"110407","MJ.3.3088","INOP",3,"T",162.91121,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4420,4425,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",151.54969,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4421,4426,{"$raw":"00000000"},"110407","MJ.3.3089","INOP",3,"T",143.96480,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4422,4427,{"$raw":"00000000"},"110407","MJ.3.3090","INOP",3,"T",217.36740,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4423,4428,{"$raw":"00000000"},"110405","MJ.3.3091","INOP",3,"T",341.45207,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4424,4429,{"$raw":"00000000"},"110405","MJ.3.3092","INOP",3,"T",384.19024,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",4425,4430,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",59.41799,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MEIO",null,null,"R",null,"110405",1,null,"R DO MEIO",4426,4431,{"$raw":"00000000"},"110405","R DO MEIO","OPER",2,"A",191.24194,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",4427,4432,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",66.91511,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",4428,4433,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",94.42839,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",4429,4434,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",282.57872,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",4430,4435,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",114.72039,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DO OUTEIRO",null,null,"R",null,"110405",1,null,"R DO OUTEIRO",4431,4436,{"$raw":"00000000"},"110405","R DO OUTEIRO","OPER",1,"A",119.30225,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VELHA",null,null,"R",null,"110401",1,null,"R VELHA",4432,4437,{"$raw":"00000000"},"110401","R VELHA","INOP",3,"T",259.58240,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MEIO",null,null,"R",null,"110405",1,null,"R DO MEIO",4433,4438,{"$raw":"00000000"},"110405","R DO MEIO","OPER",2,"A",224.65629,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"R",null,"110405",1,null,"R DAS EIRAS",4434,4439,{"$raw":"00000000"},"110405","R DAS EIRAS","OPER",1,"A",27.75525,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CENTRAL",null,null,"LG",null,"110405",1,null,"LG CENTRAL",4435,4440,{"$raw":"00000000"},"110405","LG CENTRAL","OPER",1,"A",13.11872,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE DA BARBA",null,null,"R",null,"110402",1,null,"R VALE DA BARBA",4436,4441,{"$raw":"00000000"},"110402","R VALE DA BARBA","INOP",3,"T",221.04649,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",4437,4442,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",235.53351,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","1037",null,null,"CM",null,"110405",1,null,"CM 1037",4438,4443,{"$raw":"00000000"},"110405","CM 1037","OPER",1,"A",100.15462,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE DA CORÇA",null,null,"R",null,"110405",1,null,"R VALE DA CORÇA",4439,4444,{"$raw":"00000000"},"110405","R VALE DA CORÇA","INOP",3,"T",215.07809,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4440,4445,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",27.77720,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4441,4446,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",130.09237,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4442,4447,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",31.81829,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4443,4448,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",233.36445,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",4444,4449,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",170.33442,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",4445,4450,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",79.09645,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",4446,4451,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",20.03585,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",4447,4452,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",131.16719,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",4448,4453,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",20.31585,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","S VICENTE",null,null,"R",null,"110405",1,null,"R S VICENTE",4449,4454,{"$raw":"00000000"},"110405","R S VICENTE","OPER",1,"A",81.80216,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","S VICENTE",null,null,"R",null,"110405",1,null,"R S VICENTE",4450,4455,{"$raw":"00000000"},"110405","R S VICENTE","OPER",1,"A",77.93727,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DO OUTEIRO",null,null,"R",null,"110405",1,null,"R DO OUTEIRO",4451,4456,{"$raw":"00000000"},"110405","R DO OUTEIRO","OPER",1,"A",2.01911,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DA LIBERDADE",null,null,"R",null,"110405",1,null,"R DA LIBERDADE",4452,4457,{"$raw":"00000000"},"110405","R DA LIBERDADE","OPER",1,"A",30.24834,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4453,4458,{"$raw":"00000000"},"110405","MJ.3.3093","INOP",3,"T",7.86481,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110405",1,null,"R DAS FLORES",4454,4459,{"$raw":"00000000"},"110405","R DAS FLORES","INOP",3,"T",9.69298,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTA ANA",null,"23 Out 2000","LG",null,"110405",1,null,"LG SANTA ANA",4455,4460,{"$raw":"00000000"},"110405","LG SANTA ANA","INOP",3,"T",6.90038,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",4456,4461,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",20.78081,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4457,4462,{"$raw":"00000000"},"110407","MJ.3.3094","INOP",3,"T",224.12773,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4458,4463,{"$raw":"00000000"},"110407","MJ.3.3095","INOP",3,"T",91.98693,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4459,4464,{"$raw":"00000000"},"110407","MJ.3.3096","INOP",3,"T",118.71028,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4460,4465,{"$raw":"00000000"},"110407","MJ.3.3097","INOP",3,"T",62.37631,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4461,4466,{"$raw":"00000000"},"110407","MJ.3.3098","INOP",3,"T",23.37779,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",4462,4467,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",15.64259,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DO OUTEIRO",null,null,"R",null,"110405",1,null,"R DO OUTEIRO",4463,4468,{"$raw":"00000000"},"110405","R DO OUTEIRO","OPER",1,"A",0.91444,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4464,4469,{"$raw":"00000000"},"110405","MJ.3.3099","INOP",3,"T",4.63493,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4465,4470,{"$raw":"00000000"},"110405","MJ.3.3100","INOP",3,"T",130.47312,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4466,4471,{"$raw":"00000000"},"110405","MJ.3.3101","INOP",3,"T",2.96223,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4467,4472,{"$raw":"00000000"},"110405","MJ.2.251","OPER",2,"A",99.30954,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4468,4473,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",70.20700,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4469,4474,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",88.23440,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4470,4475,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",9.23279,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE DA CORÇA",null,null,"R",null,"110405",1,null,"R VALE DA CORÇA",4471,4476,{"$raw":"00000000"},"110405","R VALE DA CORÇA","INOP",3,"T",25.47019,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ZACARIAS VIVAS",null,"25 jan 2005","R",null,"110407",1,null,"R ZACARIAS VIVAS",4472,4477,{"$raw":"00000000"},"110407","R ZACARIAS VIVAS","INOP",3,"T",38.98872,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BARRAGEM",null,null,"ESTR",null,"110407",1,null,"ESTR DA BARRAGEM",4473,4478,{"$raw":"00000000"},"110407","ESTR DA BARRAGEM","INOP",3,"T",140.73605,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BARRAGEM",null,null,"ESTR",null,"110407",1,null,"ESTR DA BARRAGEM",4474,4479,{"$raw":"00000000"},"110407","ESTR DA BARRAGEM","INOP",3,"T",29.26347,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4475,4480,{"$raw":"00000000"},"110405","MJ.3.3102","INOP",3,"T",7.59912,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4476,4481,{"$raw":"00000000"},"110405","MJ.3.3103","INOP",3,"T",6.99589,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4477,4482,{"$raw":"00000000"},"110405","MJ.2.252","OPER",2,"A",25.31761,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4478,4483,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",10.65422,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4479,4484,{"$raw":"00000000"},"110405","MJ.3.3104","INOP",3,"T",5.84042,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4480,4485,{"$raw":"00000000"},"110405","MJ.3.3105","INOP",3,"T",37.49336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",4481,4486,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",50.08296,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE DA CORÇA",null,null,"R",null,"110405",1,null,"R VALE DA CORÇA",4482,4487,{"$raw":"00000000"},"110405","R VALE DA CORÇA","INOP",3,"T",96.99048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA PONTE",null,null,"R",null,"110407",1,null,"R DA PONTE",4483,4488,{"$raw":"00000000"},"110407","R DA PONTE","OPER",2,"A",114.85281,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4484,4489,{"$raw":"00000000"},"110407","EM 612","OPER",2,"A",286.48193,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO DE MENDONÇA",null,null,"R",null,"110403",1,null,"R ANTÓNIO DE MENDONÇA",4485,4490,{"$raw":"00000000"},"110403","R ANTÓNIO DE MENDONÇA","INOP",3,"T",53.85308,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110403",1,null,"R DA FONTE",4486,4491,{"$raw":"00000000"},"110403","R DA FONTE","INOP",3,"T",104.86938,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","1037",null,null,"CM",null,"110405",1,null,"CM 1037",4487,4492,{"$raw":"00000000"},"110405","CM 1037","OPER",1,"A",47.58168,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",4488,4493,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",118.45004,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4489,4494,{"$raw":"00000000"},"110405","MJ.2.253","OPER",2,"A",19.69768,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4490,4495,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,76.68730,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4491,4496,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,29.63738,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4492,4497,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,111.48790,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4493,4498,{"$raw":"00000000"},null,"MJ.3.3106",null,3,"T",54.72800,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4494,4499,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,72.89188,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4495,4500,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,749.61271,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4496,4501,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,253.30755,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4497,4502,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,203.86826,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4498,4503,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,7.97429,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4499,4504,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.93752,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4500,4505,{"$raw":"00000000"},"110403","MJ.3.3107","INOP",3,"T",1.88112,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4501,4506,{"$raw":"00000000"},"110403","MJ.3.3108","INOP",3,"T",1.76241,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4502,4507,{"$raw":"00000000"},"110403","MJ.3.3109","INOP",3,"T",6.05739,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4503,4508,{"$raw":"00000000"},"110403","MJ.3.3110","INOP",3,"T",17.13310,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4504,4509,{"$raw":"00000000"},"110403","MJ.3.3111","INOP",3,"T",16.25194,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4505,4510,{"$raw":"00000000"},"110403","MJ.3.3112","INOP",3,"T",10.57076,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4506,4511,{"$raw":"00000000"},"110403","MJ.3.3113","INOP",3,"T",7.01035,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4507,4512,{"$raw":"00000000"},"110403","MJ.3.3114","INOP",3,"T",14.39708,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4508,4513,{"$raw":"00000000"},"110403","MJ.3.3115","INOP",3,"T",29.41810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4509,4514,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,7.29391,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4510,4515,{"$raw":"00000000"},"110403","MJ.3.3116","INOP",3,"T",36.30650,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4511,4516,{"$raw":"00000000"},"110403","MJ.3.3117","INOP",3,"T",12.40919,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4512,4517,{"$raw":"00000000"},"110403","MJ.3.3118","INOP",3,"T",30.56430,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4513,4518,{"$raw":"00000000"},"110403","MJ.3.3119","INOP",3,"T",21.40028,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4514,4519,{"$raw":"00000000"},"110403","MJ.3.3120","INOP",3,"T",3.94244,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4515,4520,{"$raw":"00000000"},"110403","MJ.3.3121","INOP",3,"T",17.37537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ MARIA NOBRE JUNIOR",null,null,"R",null,"110403",1,null,"R JOSÉ MARIA NOBRE JUNIOR",4516,4521,{"$raw":"00000000"},"110403","R JOSÉ MARIA NOBRE JUNIOR","INOP",3,"T",27.54668,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ MARIA NOBRE JUNIOR",null,null,"R",null,"110403",1,null,"R JOSÉ MARIA NOBRE JUNIOR",4517,4522,{"$raw":"00000000"},"110403","R JOSÉ MARIA NOBRE JUNIOR","INOP",3,"T",8.89606,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4518,4523,{"$raw":"00000000"},"110403","MJ.3.3122","INOP",3,"T",11.08723,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4519,4524,{"$raw":"00000000"},"110403","MJ.1.109","OPER",1,"A",2.79836,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS OFICINAS",null,null,"R",null,"110403",1,null,"R DAS OFICINAS",4520,4525,{"$raw":"00000000"},"110403","R DAS OFICINAS","INOP",3,"T",5.69549,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS OFICINAS",null,null,"R",null,"110403",1,null,"R DAS OFICINAS",4521,4526,{"$raw":"00000000"},"110403","R DAS OFICINAS","INOP",3,"T",19.24896,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO DE MENDONÇA",null,null,"R",null,"110403",1,null,"R ANTÓNIO DE MENDONÇA",4522,4527,{"$raw":"00000000"},"110403","R ANTÓNIO DE MENDONÇA","INOP",3,"T",32.88476,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"T FORTUNADO",null,null,"R",null,"110403",1,null,"R T FORTUNADO",4523,4528,{"$raw":"00000000"},"110403","R T FORTUNADO","INOP",3,"T",43.20986,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4524,4529,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,305.43943,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4525,4530,{"$raw":"00000000"},"110403","MJ.3.3123","INOP",3,"T",57.72371,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4526,4531,{"$raw":"00000000"},"110403","MJ.3.3124","INOP",3,"T",20.49400,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4527,4532,{"$raw":"00000000"},"110403","MJ.3.3125","INOP",3,"T",61.19935,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ULMEIROS",null,null,"R",null,"110403",1,null,"R DOS ULMEIROS",4528,4533,{"$raw":"00000000"},"110403","R DOS ULMEIROS","INOP",3,"T",43.97790,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4529,4534,{"$raw":"00000000"},"110403","MJ.3.3126","INOP",3,"T",43.20480,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4530,4535,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",44.21809,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4531,4536,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",6.46006,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"CSL",null,"110403",1,null,"CSL DA BELA VISTA",4532,4537,{"$raw":"00000000"},"110403","CSL DA BELA VISTA","INOP",3,"T",54.05793,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",4533,4538,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",5.72411,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4534,4539,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.02555,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS","Processo nº 03/07/131, 03/07/267","23 Out 2000, 10 jul 2007","R",null,"110405",1,null,"R DOS MOINHOS",4535,4540,{"$raw":"00000000"},"110405","R DOS MOINHOS","OPER",2,"A",71.26905,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"BC",null,"110405",1,null,"BC DA ESCOLA",4536,4541,{"$raw":"00000000"},"110405","BC DA ESCOLA","INOP",3,"T",59.10290,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ESTREITO",null,null,"R",null,"110405",1,null,"R DO ESTREITO",4537,4542,{"$raw":"00000000"},"110405","R DO ESTREITO","INOP",3,"T",74.22351,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE SANTO ESTEVÃO",null,null,"R",null,"110407",1,null,"R DE SANTO ESTEVÃO",4538,4543,{"$raw":"00000000"},"110407","R DE SANTO ESTEVÃO","INOP",3,"T",73.98668,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"LG",null,"110403",1,null,"LG DO ROSSIO",4539,4544,{"$raw":"00000000"},"110403","LG DO ROSSIO","INOP",3,"T",55.57208,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"CSL",null,"110403",1,null,"CSL DA BELA VISTA",4540,4545,{"$raw":"00000000"},"110403","CSL DA BELA VISTA","INOP",3,"T",34.40574,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4541,4546,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","OPER",1,"A",60.19728,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","DO PERAL",null,null,"R",null,"110402",1,null,"R DO PERAL",4542,4547,{"$raw":"00000000"},"110402","R DO PERAL","OPER",2,"A",148.76922,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",4543,4548,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",14.39108,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4544,4549,{"$raw":"00000000"},"110403","MJ.3.3127","INOP",3,"T",38.30811,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4545,4550,{"$raw":"00000000"},"110403","MJ.1.110","OPER",1,"A",3.87125,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4546,4551,{"$raw":"00000000"},"110403","MJ.3.3128","INOP",3,"T",50.52260,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4547,4552,{"$raw":"00000000"},"110403","MJ.3.3129","INOP",3,"T",18.49893,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4548,4553,{"$raw":"00000000"},"110403","MJ.3.3130","INOP",3,"T",5.17054,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4549,4554,{"$raw":"00000000"},"110403","MJ.3.3131","INOP",3,"T",12.65698,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4550,4555,{"$raw":"00000000"},"110403","MJ.3.3132","INOP",3,"T",45.30627,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4551,4556,{"$raw":"00000000"},"110403","MJ.3.3133","INOP",3,"T",77.35724,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4552,4557,{"$raw":"00000000"},"110403","MJ.3.3134","INOP",3,"T",4.30686,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4553,4558,{"$raw":"00000000"},"110403","MJ.3.3135","INOP",3,"T",23.98068,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4554,4559,{"$raw":"00000000"},"110403","MJ.3.3136","INOP",3,"T",68.44159,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4555,4560,{"$raw":"00000000"},"110403","MJ.3.3137","INOP",3,"T",53.44903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4556,4561,{"$raw":"00000000"},"110403","MJ.1.111","OPER",1,"A",2.70823,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4557,4562,{"$raw":"00000000"},"110403","MJ.3.3138","INOP",3,"T",15.16898,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4558,4563,{"$raw":"00000000"},"110403","MJ.3.3139","INOP",3,"T",13.58370,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4559,4564,{"$raw":"00000000"},"110403","MJ.3.3140","INOP",3,"T",9.86607,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4560,4565,{"$raw":"00000000"},"110403","MJ.3.3141","INOP",3,"T",28.17590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA SERRA",null,null,"R",null,"110403",1,null,"R DA SERRA",4561,4566,{"$raw":"00000000"},"110403","R DA SERRA","INOP",3,"T",10.35434,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA SERRA",null,null,"R",null,"110403",1,null,"R DA SERRA",4562,4567,{"$raw":"00000000"},"110403","R DA SERRA","INOP",3,"T",10.09315,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4563,4568,{"$raw":"00000000"},"110403","MJ.3.3142","INOP",3,"T",50.76653,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4564,4569,{"$raw":"00000000"},"110403","MJ.3.3143","INOP",3,"T",3.99575,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4565,4570,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,70.90951,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4566,4571,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,91.60915,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4567,4572,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,29.94027,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4568,4573,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,58.18896,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4569,4574,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,9.67315,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4570,4575,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,8.39288,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4571,4576,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,39.13883,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4572,4577,{"$raw":"00000000"},"110403","MJ.3.3144","INOP",3,"T",3.06008,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4573,4578,{"$raw":"00000000"},"110403","MJ.3.3145","INOP",3,"T",28.63969,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4574,4579,{"$raw":"00000000"},"110403","MJ.3.3146","INOP",3,"T",1.01193,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4575,4580,{"$raw":"00000000"},"110403","MJ.3.3147","INOP",3,"T",16.01209,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROBERTO",null,null,"TV",null,"110403",1,null,"TV DO ROBERTO",4576,4581,{"$raw":"00000000"},"110403","TV DO ROBERTO","INOP",3,"T",37.37655,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROBERTO",null,null,"TV",null,"110403",1,null,"TV DO ROBERTO",4577,4582,{"$raw":"00000000"},"110403","TV DO ROBERTO","INOP",3,"T",15.75976,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110403",1,null,"R DA FONTE",4578,4583,{"$raw":"00000000"},"110403","R DA FONTE","INOP",3,"T",34.57102,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOS G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOS G M BARATA",4579,4584,{"$raw":"00000000"},"110403","R COMENDADOS G M BARATA","INOP",3,"T",0.38639,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",4580,4585,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",15.46577,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",4581,4586,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",46.03143,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4582,4587,{"$raw":"00000000"},"110403","MJ.3.3148","INOP",3,"T",4.94920,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FERNABDO J S CARVALHO",null,null,"R",null,"110403",1,null,"R FERNABDO J S CARVALHO",4583,4588,{"$raw":"00000000"},"110403","R FERNABDO J S CARVALHO","INOP",3,"T",65.32965,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PENÇÃO",null,null,"R",null,"110403",1,null,"R DA PENÇÃO",4584,4589,{"$raw":"00000000"},"110403","R DA PENÇÃO","INOP",3,"T",22.65179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ARVORES",null,null,"LG",null,"110403",1,null,"LG DAS ARVORES",4585,4590,{"$raw":"00000000"},"110403","LG DAS ARVORES","INOP",3,"T",23.34193,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ARVORES",null,null,"LG",null,"110403",1,null,"LG DAS ARVORES",4586,4591,{"$raw":"00000000"},"110403","LG DAS ARVORES","INOP",3,"T",21.04531,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ARVORES",null,null,"LG",null,"110403",1,null,"LG DAS ARVORES",4587,4592,{"$raw":"00000000"},"110403","LG DAS ARVORES","INOP",3,"T",22.29919,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOS G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOS G M BARATA",4588,4593,{"$raw":"00000000"},"110403","R COMENDADOS G M BARATA","INOP",3,"T",7.06994,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOS G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOS G M BARATA",4589,4594,{"$raw":"00000000"},"110403","R COMENDADOS G M BARATA","INOP",3,"T",15.59646,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ ISIDRO MARQUES",null,null,"R",null,"110401",1,null,"R JOSÉ ISIDRO MARQUES",4590,4595,{"$raw":"00000000"},"110401","R JOSÉ ISIDRO MARQUES","INOP",3,"T",285.23019,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ GREGORIO DE MOURA",null,null,"R",null,"110410",1,null,"R JOSÉ GREGORIO DE MOURA",4591,4596,{"$raw":"00000000"},"110410","R JOSÉ GREGORIO DE MOURA","OPER",2,"A",18.23727,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA MEDECINA",null,null,"R",null,"110403",1,null,"R DA MEDECINA",4592,4597,{"$raw":"00000000"},"110403","R DA MEDECINA","INOP",3,"T",43.02587,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA MEDECINA",null,null,"R",null,"110403",1,null,"R DA MEDECINA",4593,4598,{"$raw":"00000000"},"110403","R DA MEDECINA","OPER",1,"A",44.34137,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PENSÃO",null,null,"R",null,"110403",1,null,"R DA PENSÃO",4594,4599,{"$raw":"00000000"},"110403","R DA PENSÃO","INOP",3,"T",38.08355,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCA F DE SOUSA",null,null,"R",null,"110403",1,null,"R FRANCISCA F DE SOUSA",4595,4600,{"$raw":"00000000"},"110403","R FRANCISCA F DE SOUSA","OPER",1,"A",36.50721,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCA F DE SOUSA",null,null,"R",null,"110403",1,null,"R FRANCISCA F DE SOUSA",4596,4601,{"$raw":"00000000"},"110403","R FRANCISCA F DE SOUSA","INOP",3,"T",30.34907,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4597,4602,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",44.05484,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE S JOÃO",null,null,"LG",null,"110402",1,null,"LG DE S JOÃO",4598,4603,{"$raw":"00000000"},"110402","LG DE S JOÃO","OPER",2,"A",12.25673,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","558","DA FONTE",null,null,"R",null,"110401",1,null,"R DA FONTE",4599,4604,{"$raw":"00000000"},"110401","R DA FONTE","OPER",1,"A",224.48991,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFREDO RIBEIRO",null,null,"R",null,"110403",1,null,"R ALFREDO RIBEIRO",4600,4605,{"$raw":"00000000"},"110403","R ALFREDO RIBEIRO","INOP",3,"T",9.89249,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFREDO RIBEIRO",null,null,"R",null,"110403",1,null,"R ALFREDO RIBEIRO",4601,4606,{"$raw":"00000000"},"110403","R ALFREDO RIBEIRO","INOP",3,"T",1.67323,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFREDO RIBEIRO",null,null,"R",null,"110403",1,null,"R ALFREDO RIBEIRO",4602,4607,{"$raw":"00000000"},"110403","R ALFREDO RIBEIRO","INOP",3,"T",59.95625,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS BENTO",null,null,"R",null,"110403",1,null,"R LUIS BENTO",4603,4608,{"$raw":"00000000"},"110403","R LUIS BENTO","INOP",3,"T",44.48392,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"JULIO NOBRE",null,null,"TV",null,"110403",1,null,"TV JULIO NOBRE",4604,4609,{"$raw":"00000000"},"110403","TV JULIO NOBRE","INOP",3,"T",22.08384,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4605,4610,{"$raw":"00000000"},"110403","MJ.3.3149","INOP",3,"T",17.88514,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4606,4611,{"$raw":"00000000"},"110403","MJ.3.3150","INOP",3,"T",4.46365,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4607,4612,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",22.45837,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ BENTO MARQUES",null,null,"R",null,"110403",1,null,"R JOSÉ BENTO MARQUES",4608,4613,{"$raw":"00000000"},"110403","R JOSÉ BENTO MARQUES","INOP",3,"T",14.68886,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ BENTO MARQUES",null,null,"R",null,"110403",1,null,"R JOSÉ BENTO MARQUES",4609,4614,{"$raw":"00000000"},"110403","R JOSÉ BENTO MARQUES","INOP",3,"T",6.77956,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ULMEIROS",null,null,"R",null,"110403",1,null,"R DOS ULMEIROS",4610,4615,{"$raw":"00000000"},"110403","R DOS ULMEIROS","INOP",3,"T",23.50941,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4611,4616,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",29.72709,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4612,4617,{"$raw":"00000000"},"110403","MJ.3.3151","INOP",3,"T",1.86555,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110403",1,null,null,4613,4618,{"$raw":"00000000"},"110403","MJ.3.3152","INOP",3,"T",25.26218,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4614,4619,{"$raw":"00000000"},"110403","MJ.3.3153","INOP",3,"T",10.04676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AUGUSTO GREGÓRIO",null,null,"R",null,"110403",1,null,"R AUGUSTO GREGÓRIO",4615,4620,{"$raw":"00000000"},"110403","R AUGUSTO GREGÓRIO","INOP",3,"T",38.58626,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,4616,4621,{"$raw":"00000000"},"110403","MJ.3.3154","INOP",3,"T",3.04138,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOAQUIM FERREIRA",null,null,"R",null,"110403",1,null,"R JOAQUIM FERREIRA",4617,4622,{"$raw":"00000000"},"110403","R JOAQUIM FERREIRA","INOP",3,"T",48.43617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL DOS SANTOS",null,null,"R",null,"110403",1,null,"R MANUEL DOS SANTOS",4618,4623,{"$raw":"00000000"},"110403","R MANUEL DOS SANTOS","INOP",3,"T",51.41298,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL DOS SANTOS",null,null,"R",null,"110403",1,null,"R MANUEL DOS SANTOS",4619,4624,{"$raw":"00000000"},"110403","R MANUEL DOS SANTOS","INOP",3,"T",72.73156,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4620,4625,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",3.24234,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4621,4626,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",5.02800,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4622,4627,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",10.46498,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4623,4628,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",9.76721,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4624,4629,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",15.88796,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ FILIPE FARA MARQUES","Processo 03/2009/146",null,"R",null,"110403",1,null,"R JOSÉ FILIPE FARIA MARQUES",4625,4630,{"$raw":"00000000"},"110403","R JOSÉ FILIPE FARIA MARQUES","INOP",3,"T",84.42705,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4626,4631,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",84.82525,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110403",1,null,"R DAS AMOREIRAS",4627,4632,{"$raw":"00000000"},"110403","R DAS AMOREIRAS","INOP",3,"T",37.20079,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS OLIVEIRAS",null,null,"TV",null,"110406",1,null,"TV DOS OLIVEIRAS",4628,4633,{"$raw":"00000000"},"110406","TV DOS OLIVEIRAS","INOP",3,"T",92.18754,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4629,4634,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",24.88803,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE S JOÃO",null,null,"LG",null,"110402",1,null,"LG DE S JOÃO",4630,4635,{"$raw":"00000000"},"110402","LG DE S JOÃO","INOP",3,"T",27.45894,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4631,4636,{"$raw":"00000000"},"110407","MJ.3.3155","INOP",3,"T",67.07691,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4632,4637,{"$raw":"00000000"},"110407","MJ.3.3156","INOP",3,"T",158.00258,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4633,4638,{"$raw":"00000000"},"110405","MJ.3.3157","INOP",3,"T",412.77074,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4634,4639,{"$raw":"00000000"},"110405","MJ.3.3158","INOP",3,"T",179.58528,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4635,4640,{"$raw":"00000000"},"110407","MJ.3.3159","INOP",3,"T",63.57938,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,4636,4641,{"$raw":"00000000"},"110405","MJ.3.3160","INOP",3,"T",24.43736,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4637,4642,{"$raw":"00000000"},"110407","MJ.2.254","OPER",2,"A",143.12216,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4638,4643,{"$raw":"00000000"},"110407","MJ.3.3161","INOP",3,"T",23.18132,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4639,4644,{"$raw":"00000000"},"110407","MJ.3.3162","INOP",3,"T",92.39225,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4640,4645,{"$raw":"00000000"},"110405","MJ.3.3163","INOP",3,"T",220.37646,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4641,4646,{"$raw":"00000000"},"110405","MJ.3.3164","INOP",3,"T",260.15745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4642,4647,{"$raw":"00000000"},"110407","MJ.3.3165","INOP",3,"T",103.24734,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,4643,4648,{"$raw":"00000000"},"110405","MJ.3.3166","INOP",3,"T",1.01597,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA PONTE",null,null,"R",null,"110407",1,null,"R DA PONTE",4644,4649,{"$raw":"00000000"},"110407","R DA PONTE","OPER",2,"A",167.38494,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA PONTE",null,null,"R",null,"110407",1,null,"R DA PONTE",4645,4650,{"$raw":"00000000"},"110407","R DA PONTE","OPER",2,"A",35.73812,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4646,4651,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",26.18132,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4647,4652,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",50.12390,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4648,4653,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",92.97056,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4649,4654,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",270.24554,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","1038-1",null,null,"CM",null,"110405",1,null,"CM 1038-1",4650,4655,{"$raw":"00000000"},"110405","CM 1038-1","OPER",2,"A",239.33494,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1038-1","1038-1",null,null,"CM",null,"110405",1,null,"CM 1038-1",4651,4656,{"$raw":"00000000"},"110405","CM 1038-1","OPER",2,"A",295.07588,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1038-1","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4652,4657,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",168.84833,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4653,4658,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",309.85998,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4654,4659,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",378.40690,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4655,4660,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",90.20450,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4656,4661,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",34.82033,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","573","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4657,4662,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",24.74073,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","573","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4658,4663,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",30.06876,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","1038-1",null,null,"CM",null,"110405",1,null,"CM 1038-1",4659,4664,{"$raw":"00000000"},"110405","CM 1038-1","OPER",2,"A",129.12857,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","CM","1038-1","1038-1",null,null,"CM",null,"110405",1,null,"CM 1038-1",4660,4665,{"$raw":"00000000"},"110405","CM 1038-1","OPER",2,"A",14.75477,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","EM","573","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4661,4666,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",84.30130,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","573","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4662,4667,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",7.85029,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4663,4668,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",9.98211,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4664,4669,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",10.09711,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4665,4670,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",187.64297,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4666,4671,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",21.66726,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4667,4672,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",4.47404,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4668,4673,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",93.90625,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4669,4674,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",146.45034,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4670,4675,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",10.57915,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4671,4676,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",58.26733,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4672,4677,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",66.75983,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4673,4678,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",78.45450,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4674,4679,{"$raw":"00000000"},"110407","EM 612","OPER",2,"A",39.52444,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4675,4680,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",120.01085,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DA LIBERDADE",null,null,"R",null,"110405",1,null,"R DA LIBERDADE",4676,4681,{"$raw":"00000000"},"110405","R DA LIBERDADE","OPER",1,"A",230.46282,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4677,4682,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",254.75340,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4678,4683,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",194.24994,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE SANTO ESTEVÃO",null,null,"R",null,"110407",1,null,"R DE SANTO ESTEVÃO",4679,4684,{"$raw":"00000000"},"110407","R DE SANTO ESTEVÃO","INOP",3,"T",237.88079,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","1038-1",null,null,"CM",null,"110405",1,null,"CM 1038-1",4680,4685,{"$raw":"00000000"},"110405","CM 1038-1","OPER",2,"A",26.61233,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110401","EN 366",4681,4686,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",188.02289,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4682,4687,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",635.77129,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,null,0,null,"EN 366",4683,4688,{"$raw":"00000000"},null,"EN 366",null,1,"A",158.96055,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FONTAINHAS",null,null,"R",null,"110406",1,null,"R DAS FONTAINHAS",4684,4689,{"$raw":"00000000"},"110406","R DAS FONTAINHAS","INOP",3,"T",113.62423,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4685,4690,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",24.60266,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4686,4691,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",65.33541,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4687,4692,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",51.99818,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4688,4693,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",36.23194,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4689,4694,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",129.04523,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",4690,4695,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",85.59660,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","1038-1",null,null,"CM",null,"110405",1,null,"CM 1038-1",4691,4696,{"$raw":"00000000"},"110405","CM 1038-1","OPER",2,"A",83.80651,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4692,4697,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",82.95081,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",4693,4698,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",211.08306,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4694,4699,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",1.07870,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4695,4700,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",9.61905,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4696,4701,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",21.54407,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4697,4702,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",21.22937,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4698,4703,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",9.39494,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4699,4704,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",61.08968,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4700,4705,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",213.90141,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",4701,4706,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",143.31717,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4702,4707,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",234.66038,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4703,4708,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",168.02990,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110401",2,"110407","EN 366",4704,4709,{"$raw":"00000000"},"110401","EN 366","OPER",1,"A",376.45614,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",4705,4710,{"$raw":"00000000"},"110407","EM 612","OPER",2,"A",59.89119,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110401","EN 366",4706,4711,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",33.48440,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4707,4712,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",93.55255,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4708,4713,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",103.90762,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4709,4714,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",171.80103,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4710,4715,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",77.67387,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4711,4716,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",63.23910,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4712,4717,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",22.56878,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4713,4718,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",5.89404,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4714,4719,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",166.83763,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4715,4720,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",3.78360,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4716,4721,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",95.88621,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4717,4722,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",391.45221,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4718,4723,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",45.87904,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4719,4724,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",15.25638,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4720,4725,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",128.08213,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4721,4726,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",171.06052,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1035","DO MOINHO","Proc. nº 03/06/40",null,"R",null,"110405",1,null,"R DO MOINHO",4722,4727,{"$raw":"00000000"},"110405","R DO MOINHO","OPER",1,"A",253.00480,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110410",1,null,"R DA ESPERANÇA",4723,4728,{"$raw":"00000000"},"110410","R DA ESPERANÇA","INOP",3,"T",5.77307,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","DO COMÉRCIO",null,null,"R",null,"110410",1,null,"R DO COMÉRCIO",4724,4729,{"$raw":"00000000"},"110410","R DO COMÉRCIO","OPER",2,"A",48.43170,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","DO COMÉRCIO",null,null,"R",null,"110410",1,null,"R DO COMÉRCIO",4725,4730,{"$raw":"00000000"},"110410","R DO COMÉRCIO","OPER",2,"A",7.13089,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"TV",null,"110410",1,null,"TV DA BELA VISTA",4726,4731,{"$raw":"00000000"},"110410","TV DA BELA VISTA","INOP",3,"T",15.16741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,null,"TV",null,"110410",1,null,"TV DA BOAVISTA",4727,4732,{"$raw":"00000000"},"110410","TV DA BOAVISTA","INOP",3,"T",9.41629,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"R",null,"110404",1,null,"R DA BELA VISTA",4728,4733,{"$raw":"00000000"},"110404","R DA BELA VISTA","INOP",3,"T",1.02684,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4729,4734,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",15.36384,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","ESTRADA DO CADAVAL",null,null,"R",null,"110403",1,null,"R ESTRADA DO CADAVAL",4730,4735,{"$raw":"00000000"},"110403","R ESTRADA DO CADAVAL","OPER",1,"A",4.95537,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",4731,4736,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",40.19407,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",4732,4737,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",283.78253,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",4733,4738,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",81.48811,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",4734,4739,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",61.74728,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",4735,4740,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",176.46719,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",4736,4741,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",10.96059,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4737,4742,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",205.06660,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4738,4743,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",120.10063,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4739,4744,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",179.57559,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4740,4745,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",63.62311,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4741,4746,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",2.06022,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4742,4747,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",112.51939,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4743,4748,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",7.67985,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4744,4749,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",179.05809,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4745,4750,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",8.53620,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4746,4751,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",169.88312,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110401",2,"110407","EN 366",4747,4752,{"$raw":"00000000"},"110401","EN 366","OPER",1,"A",129.49273,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110401",2,"110407","EN 366",4748,4753,{"$raw":"00000000"},"110401","EN 366","OPER",1,"A",2.05626,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110401",2,"110407","EN 366",4749,4754,{"$raw":"00000000"},"110401","EN 366","OPER",1,"A",48.44099,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110401","EN 366",4750,4755,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",55.86649,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110401","EN 366",4751,4756,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",76.69903,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4752,4757,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",81.62574,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4753,4758,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",22.04213,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4754,4759,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",64.37727,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4755,4760,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",40.17860,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4756,4761,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",173.10867,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4757,4762,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",90.92719,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4758,4763,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",90.79256,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4759,4764,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",2.56462,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4760,4765,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",48.01684,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4761,4766,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",33.46213,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4762,4767,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",33.86642,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4763,4768,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",33.18936,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4764,4769,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",75.95909,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4765,4770,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",17.90881,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4766,4771,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",5.33402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4767,4772,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",72.19721,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4768,4773,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",143.72260,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",4769,4774,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",8.88338,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4770,4775,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",20.52351,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4771,4776,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",41.50374,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4772,4777,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",41.51273,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4773,4778,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",75.11883,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4774,4779,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",5.30406,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4775,4780,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",88.88450,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4776,4781,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",8.20103,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4777,4782,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",94.40777,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4778,4783,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",75.58070,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4779,4784,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",29.17945,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4780,4785,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",70.14723,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",4781,4786,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",102.26847,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110401","EN 366",4782,4787,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",135.66632,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4783,4788,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",30.24805,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4784,4789,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",10.81986,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUISA BERNARDO DA SILVA",null,null,"R",null,"110406",1,null,"R LUISA BERNARDO DA SILVA",4785,4790,{"$raw":"00000000"},"110406","R LUISA BERNARDO DA SILVA","INOP",3,"T",85.73941,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1025","1025",null,null,"CM",null,"110406",1,null,"CM 1025",4786,4791,{"$raw":"00000000"},"110406","CM 1025","OPER",2,"A",40.89963,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POVO",null,null,"LG",null,"110402",1,null,"LG DO POVO",4787,4792,{"$raw":"00000000"},"110402","LG DO POVO","INOP",3,"T",10.82276,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","MARQUESES DE RIO MAIOR",null,null,"LG",null,"110410",1,null,"LG MARQUESES DE RIO MAIOR",4788,4793,{"$raw":"00000000"},"110410","LG MARQUESES DE RIO MAIOR","OPER",2,"A",17.13058,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4789,4794,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",76.08088,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4790,4795,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",3.44528,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4791,4796,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",122.89346,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",4792,4797,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",185.66550,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4793,4798,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",58.90539,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4794,4799,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",14.99942,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4795,4800,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",102.43279,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",4796,4801,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",24.71515,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110401",2,"110407","EN 366",4797,4802,{"$raw":"00000000"},"110401","EN 366","OPER",1,"A",119.15913,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110401",2,"110407","EN 366",4798,4803,{"$raw":"00000000"},"110401","EN 366","OPER",1,"A",78.11292,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4799,4804,{"$raw":"00000000"},"110407","MJ.3.3167","INOP",3,"T",6.90922,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4800,4805,{"$raw":"00000000"},"110407","MJ.2.255","OPER",2,"A",47.02499,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4801,4806,{"$raw":"00000000"},"110407","MJ.2.256","OPER",2,"A",29.24461,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110401","EN 366",4802,4807,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",47.32030,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4803,4808,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,56.56265,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4804,4809,{"$raw":"00000000"},"110401","MJ.3.3168","INOP",3,"T",0.03162,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4805,4810,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.75327,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4806,4811,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,51.48311,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4807,4812,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.85412,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4808,4813,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,32.97982,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4809,4814,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,53.92543,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4810,4815,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,23.35541,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4811,4816,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,11.86137,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4812,4817,{"$raw":"00000000"},"110407","MJ.3.3169","INOP",3,"T",102.44487,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4813,4818,{"$raw":"00000000"},"110401","MJ.3.3170","INOP",3,"T",266.87986,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4814,4819,{"$raw":"00000000"},"110401","MJ.3.3171","INOP",3,"T",91.22667,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4815,4820,{"$raw":"00000000"},"110401","MJ.3.3172","INOP",3,"T",36.69514,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4816,4821,{"$raw":"00000000"},"110401","MJ.3.3173","INOP",3,"T",46.20429,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4817,4822,{"$raw":"00000000"},"110401","MJ.3.3174","INOP",3,"T",16.07701,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4818,4823,{"$raw":"00000000"},"110401","MJ.3.3175","INOP",3,"T",536.85702,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4819,4824,{"$raw":"00000000"},"110401","MJ.3.3176","INOP",3,"T",33.57654,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,4820,4825,{"$raw":"00000000"},"110406","MJ.3.3177","INOP",3,"T",7.08644,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4821,4826,{"$raw":"00000000"},"110401","MJ.3.3178","INOP",3,"T",3.54154,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4822,4827,{"$raw":"00000000"},"110401","MJ.3.3179","INOP",3,"T",4.88856,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4823,4828,{"$raw":"00000000"},"110401","MJ.3.3180","INOP",3,"T",4.10411,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4824,4829,{"$raw":"00000000"},"110401","MJ.3.3181","INOP",3,"T",7.54444,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Rio","Arnoia",null,null,null,null,null,"110401",1,null,null,4825,4830,{"$raw":"00000000"},"110401","MJ.3.3182","INOP",3,"T",3.82447,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4826,4831,{"$raw":"00000000"},"110401","MJ.3.3183","INOP",3,"T",6.67996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4827,4832,{"$raw":"00000000"},"110401","MJ.3.3184","INOP",3,"T",4.93275,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,4828,4833,{"$raw":"00000000"},"110406","MJ.3.3185","INOP",3,"T",3.78303,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE",null,null,"CÇ",null,"110406",1,null,"CÇ DO VALE",4829,4834,{"$raw":"00000000"},"110406","CÇ DO VALE","INOP",3,"T",213.91894,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110404",1,null,"R DO CASTELO",4830,4835,{"$raw":"00000000"},"110404","R DO CASTELO","INOP",3,"T",2.44675,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110404",1,null,"R DO CASTELO",4831,4836,{"$raw":"00000000"},"110404","R DO CASTELO","INOP",3,"T",41.17314,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4832,4837,{"$raw":"00000000"},"110401","MJ.3.3186","INOP",3,"T",146.56260,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4833,4838,{"$raw":"00000000"},"110401","MJ.3.3187","INOP",3,"T",28.45031,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,4834,4839,{"$raw":"00000000"},"110401","MJ.3.3188","INOP",3,"T",113.27907,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4835,4840,{"$raw":"00000000"},"110401","MJ.3.3189","INOP",3,"T",79.37222,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["1",null,null,"DOS MOUROS",null,null,"ESTR",null,"110404",1,null,"ESTR DOS MOUROS",4836,4841,{"$raw":"00000000"},"110404","ESTR DOS MOUROS","INOP",3,"T",185.99913,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4837,4842,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,21.02394,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GOMES DA SILVA",null,null,"R",null,"110401",1,null,"R GOMES DA SILVA",4838,4843,{"$raw":"00000000"},"110401","R GOMES DA SILVA","INOP",3,"T",65.51669,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4839,4844,{"$raw":"00000000"},"110401","MJ.3.3190","INOP",3,"T",47.17666,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4840,4845,{"$raw":"00000000"},"110401","MJ.3.3191","INOP",3,"T",80.78996,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4841,4846,{"$raw":"00000000"},"110401","MJ.3.3192","INOP",3,"T",2.75786,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","MARQUESES DE RIO MAIOR",null,null,"LG",null,"110410",1,null,"LG MARQUESES DE RIO MAIOR",4842,4847,{"$raw":"00000000"},"110410","LG MARQUESES DE RIO MAIOR","OPER",2,"A",18.05828,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA VARZEA",null,null,"R",null,"110410",1,null,"R DA VARZEA",4843,4848,{"$raw":"00000000"},"110410","R DA VARZEA","INOP",3,"T",80.68750,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA DA CRUZ",null,null,"R",null,"110410",1,null,"R MARIA DA CRUZ",4844,4849,{"$raw":"00000000"},"110410","R MARIA DA CRUZ","INOP",3,"T",35.54145,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,4845,4850,{"$raw":"00000000"},"110406","MJ.3.3193","INOP",3,"T",186.71708,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA REGUEIRA",null,null,"R",null,"110404",1,null,"R DA REGUEIRA",4846,4851,{"$raw":"00000000"},"110404","R DA REGUEIRA","INOP",3,"T",54.01758,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SAPATEIRO",null,null,"TV",null,"110404",1,null,"TV DO SAPATEIRO",4847,4852,{"$raw":"00000000"},"110404","TV DO SAPATEIRO","INOP",3,"T",32.01479,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110404",1,null,"R DO CASTELO",4848,4853,{"$raw":"00000000"},"110404","R DO CASTELO","INOP",3,"T",28.45309,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA REGUEIRA",null,null,"R",null,"110404",1,null,"R DA REGUEIRA",4849,4854,{"$raw":"00000000"},"110404","R DA REGUEIRA","INOP",3,"T",38.35978,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4850,4855,{"$raw":"00000000"},"110401","MJ.3.3194","INOP",3,"T",11.75450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4851,4856,{"$raw":"00000000"},"110401","MJ.3.3195","INOP",3,"T",17.02857,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4852,4857,{"$raw":"00000000"},"110401","MJ.3.3196","INOP",3,"T",5.62781,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4853,4858,{"$raw":"00000000"},"110401","MJ.3.3197","INOP",3,"T",47.50937,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4854,4859,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,302.22955,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4855,4860,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,137.27902,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4856,4861,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,642.27446,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE TRAVESSO",null,null,"R",null,null,0,null,"R VALE TRAVESSO",4857,4862,{"$raw":"00000000"},null,"R VALE TRAVESSO",null,{"$raw":"*****"},null,276.99750,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,null,"LG",null,"110406",1,null,"LG DO CHAFARIZ",4858,4863,{"$raw":"00000000"},"110406","LG DO CHAFARIZ","INOP",3,"T",65.45834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4859,4864,{"$raw":"00000000"},"110401","MJ.3.3198","INOP",3,"T",20.20009,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,4860,4865,{"$raw":"00000000"},"110404","MJ.3.3199","INOP",3,"T",39.73603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4861,4866,{"$raw":"00000000"},"110401","MJ.3.3200","INOP",3,"T",1095.63753,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4862,4867,{"$raw":"00000000"},"110401","MJ.3.3201","INOP",3,"T",132.30396,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL GOMES DA SILVA",null,null,"R",null,"110401",1,null,"R MANUEL GOMES DA SILVA",4863,4868,{"$raw":"00000000"},"110401","R MANUEL GOMES DA SILVA","INOP",3,"T",73.75327,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ARRIBAS",null,null,"ESTR",null,"110406",1,null,"ESTR DAS ARRIBAS",4864,4869,{"$raw":"00000000"},"110406","ESTR DAS ARRIBAS","OPER",2,"A",178.51233,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LAVADOUROS","Confirmado, Março 2007. SGD nº 9709 de 7/10/2010","21 dez 2010","R",null,"110401",1,null,"R DOS LAVADOUROS",4865,4870,{"$raw":"00000000"},"110401","R DOS LAVADOUROS","INOP",3,"T",70.13822,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","615","4 DE SETEMBRO",null,null,"R",null,"110406",1,null,"R 4 DE SETEMBRO",4866,4871,{"$raw":"00000000"},"110406","R 4 DE SETEMBRO","OPER",2,"A",142.44742,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",4867,4872,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",69.97946,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA DA CRUZ",null,null,"R",null,"110410",1,null,"R MARIA DA CRUZ",4868,4873,{"$raw":"00000000"},"110410","R MARIA DA CRUZ","INOP",3,"T",12.19343,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FIGUEIRA DO N0BRE",null,null,"R",null,"110410",1,null,"R DA FIGUEIRA DO N0BRE",4869,4874,{"$raw":"00000000"},"110410","R DA FIGUEIRA DO N0BRE","OPER",2,"A",117.66950,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4870,4875,{"$raw":"00000000"},"110401","MJ.3.3202","INOP",3,"T",533.30189,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4871,4876,{"$raw":"00000000"},null,"MJ.3.3203",null,3,"T",170.87471,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4872,4877,{"$raw":"00000000"},null,"MJ.3.3204",null,3,"T",466.40054,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4873,4878,{"$raw":"00000000"},"110401","MJ.3.3205","INOP",3,"T",661.95762,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4874,4879,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,975.02437,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4875,4880,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,791.69618,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4876,4881,{"$raw":"00000000"},"110401","MJ.3.3206","INOP",3,"T",308.41274,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4877,4882,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,129.86899,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4878,4883,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,666.00448,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4879,4884,{"$raw":"00000000"},"110401","MJ.3.3207","INOP",3,"T",887.98677,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,4880,4885,{"$raw":"00000000"},"110401","MJ.3.3208","INOP",3,"T",926.46870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4881,4886,{"$raw":"00000000"},"110401","MJ.3.3209","INOP",3,"T",190.40081,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4882,4887,{"$raw":"00000000"},"110401","MJ.3.3210","INOP",3,"T",489.22556,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4883,4888,{"$raw":"00000000"},"110401","MJ.3.3211","INOP",3,"T",681.55660,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4884,4889,{"$raw":"00000000"},"110401","MJ.3.3212","INOP",3,"T",267.44223,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4885,4890,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,222.26377,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4886,4891,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,187.30653,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4887,4892,{"$raw":"00000000"},"110401","MJ.3.3213","INOP",3,"T",7.18760,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4888,4893,{"$raw":"00000000"},"110401","MJ.3.3214","INOP",3,"T",776.71596,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4889,4894,{"$raw":"00000000"},"110401","MJ.3.3215","INOP",3,"T",237.48306,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4890,4895,{"$raw":"00000000"},"110401","MJ.3.3216","INOP",3,"T",272.68613,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4891,4896,{"$raw":"00000000"},"110401","MJ.3.3217","INOP",3,"T",131.51116,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4892,4897,{"$raw":"00000000"},"110401","MJ.3.3218","INOP",3,"T",60.74336,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4893,4898,{"$raw":"00000000"},"110401","MJ.3.3219","INOP",3,"T",250.93331,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4894,4899,{"$raw":"00000000"},"110401","MJ.3.3220","INOP",3,"T",276.55087,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4895,4900,{"$raw":"00000000"},"110401","MJ.3.3221","INOP",3,"T",134.51597,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4896,4901,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,235.23261,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TORRE",null,null,"R",null,"110401",1,null,"R DA TORRE",4897,4902,{"$raw":"00000000"},"110401","R DA TORRE","INOP",3,"T",76.81071,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4898,4903,{"$raw":"00000000"},"110401","MJ.3.3222","INOP",3,"T",163.64610,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,4899,4904,{"$raw":"00000000"},"110401","MJ.3.3223","INOP",3,"T",210.58194,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PINHEIRO",null,"05/04/2005","ESTR",null,"110401",1,null,"ESTR DO PINHEIRO",4900,4905,{"$raw":"00000000"},"110401","ESTR DO PINHEIRO","INOP",3,"T",80.16783,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TORRE",null,null,"R",null,"110401",1,null,"R DA TORRE",4901,4906,{"$raw":"00000000"},"110401","R DA TORRE","INOP",3,"T",307.19048,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4902,4907,{"$raw":"00000000"},"110401","MJ.3.3224","INOP",3,"T",414.58986,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4903,4908,{"$raw":"00000000"},"110401","MJ.3.3225","INOP",3,"T",75.97387,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4904,4909,{"$raw":"00000000"},"110401","MJ.3.3226","INOP",3,"T",368.79570,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PORTO PEDRINHO",null,null,"ESTR",null,"110401",1,null,"ESTR PORTO PEDRINHO",4905,4910,{"$raw":"00000000"},"110401","ESTR PORTO PEDRINHO","INOP",3,"T",177.99218,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4906,4911,{"$raw":"00000000"},"110401","MJ.3.3227","INOP",3,"T",255.62354,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4907,4912,{"$raw":"00000000"},"110401","MJ.3.3228","INOP",3,"T",76.94467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4908,4913,{"$raw":"00000000"},"110401","MJ.3.3229","INOP",3,"T",724.54377,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4909,4914,{"$raw":"00000000"},"110401","MJ.3.3230","INOP",3,"T",429.88703,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4910,4915,{"$raw":"00000000"},"110401","MJ.3.3231","INOP",3,"T",97.61471,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4911,4916,{"$raw":"00000000"},"110401","MJ.3.3232","INOP",3,"T",121.02903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4912,4917,{"$raw":"00000000"},"110401","MJ.3.3233","INOP",3,"T",324.31859,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4913,4918,{"$raw":"00000000"},"110401","MJ.3.3234","INOP",3,"T",111.41909,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4914,4919,{"$raw":"00000000"},"110401","MJ.3.3235","INOP",3,"T",227.55616,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4915,4920,{"$raw":"00000000"},"110401","MJ.3.3236","INOP",3,"T",105.34204,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4916,4921,{"$raw":"00000000"},"110401","MJ.3.3237","INOP",3,"T",59.21946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4917,4922,{"$raw":"00000000"},"110401","MJ.3.3238","INOP",3,"T",164.06572,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4918,4923,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,477.98687,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4919,4924,{"$raw":"00000000"},"110401","MJ.3.3239","INOP",3,"T",350.31442,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4920,4925,{"$raw":"00000000"},"110401","MJ.3.3240","INOP",3,"T",420.57821,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4921,4926,{"$raw":"00000000"},"110401","MJ.3.3241","INOP",3,"T",189.97138,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4922,4927,{"$raw":"00000000"},"110401","MJ.3.3242","INOP",3,"T",247.38998,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,4923,4928,{"$raw":"00000000"},"110401","MJ.3.3243","INOP",3,"T",441.71766,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4924,4929,{"$raw":"00000000"},"110401","MJ.3.3244","INOP",3,"T",135.33903,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4925,4930,{"$raw":"00000000"},"110401","MJ.3.3245","INOP",3,"T",120.22215,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4926,4931,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,367.33186,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4927,4932,{"$raw":"00000000"},"110401","MJ.3.3246","INOP",3,"T",345.59312,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4928,4933,{"$raw":"00000000"},"110401","MJ.3.3247","INOP",3,"T",287.60420,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4929,4934,{"$raw":"00000000"},"110401","MJ.3.3248","INOP",3,"T",221.62241,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4930,4935,{"$raw":"00000000"},"110401","MJ.3.3249","INOP",3,"T",247.71943,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4931,4936,{"$raw":"00000000"},"110401","MJ.3.3250","INOP",3,"T",131.35259,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4932,4937,{"$raw":"00000000"},"110401","MJ.3.3251","INOP",3,"T",126.43326,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4933,4938,{"$raw":"00000000"},"110401","MJ.3.3252","INOP",3,"T",663.88347,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4934,4939,{"$raw":"00000000"},"110401","MJ.3.3253","INOP",3,"T",121.20018,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4935,4940,{"$raw":"00000000"},"110401","MJ.3.3254","INOP",3,"T",292.50759,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4936,4941,{"$raw":"00000000"},"110401","MJ.3.3255","INOP",3,"T",70.81984,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4937,4942,{"$raw":"00000000"},"110401","MJ.3.3256","INOP",3,"T",500.39406,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4938,4943,{"$raw":"00000000"},"110401","MJ.3.3257","INOP",3,"T",140.64140,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE TRAVESSO",null,null,"R",null,"110401",1,null,"R VALE TRAVESSO",4939,4944,{"$raw":"00000000"},"110401","R VALE TRAVESSO","INOP",3,"T",371.17817,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE VALE SOBREIRO",null,"24 set 2002","R",null,"110408",1,null,"R DE VALE SOBREIRO",4940,4945,{"$raw":"00000000"},"110408","R DE VALE SOBREIRO","INOP",3,"A",78.52868,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA VARZEA",null,null,"ESTR",null,"110401",1,null,"ESTR DA VARZEA",4941,4946,{"$raw":"00000000"},"110401","ESTR DA VARZEA","INOP",3,"A",480.31810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",4942,4947,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",222.65621,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA REGUEIRA",null,null,"TV",null,"110404",1,null,"TV DA REGUEIRA",4943,4948,{"$raw":"00000000"},"110404","TV DA REGUEIRA","INOP",3,"T",48.28932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FIGUEIRA DO N0BRE",null,null,"R",null,"110410",1,null,"R DA FIGUEIRA DO N0BRE",4944,4949,{"$raw":"00000000"},"110410","R DA FIGUEIRA DO N0BRE","INOP",3,"T",89.01562,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4945,4950,{"$raw":"00000000"},"110401","MJ.3.3258","INOP",3,"T",445.71166,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4946,4951,{"$raw":"00000000"},"110401","MJ.3.3259","INOP",3,"T",180.74926,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4947,4952,{"$raw":"00000000"},"110401","MJ.3.3260","INOP",3,"T",198.57507,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4948,4953,{"$raw":"00000000"},"110401","MJ.3.3261","INOP",3,"T",385.85552,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4949,4954,{"$raw":"00000000"},"110401","MJ.3.3262","INOP",3,"T",180.73401,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110401",1,null,null,4950,4955,{"$raw":"00000000"},"110401","MJ.3.3263","INOP",3,"T",60.51809,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4951,4956,{"$raw":"00000000"},"110401","MJ.3.3264","INOP",3,"T",722.31326,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4952,4957,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,353.22874,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,4953,4958,{"$raw":"00000000"},"110401","MJ.3.3265","INOP",3,"T",174.11344,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4954,4959,{"$raw":"00000000"},"110401","MJ.3.3266","INOP",3,"T",45.59174,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"QTA DA BOAVISTA",null,null,"ESTR",null,"110401",1,null,"ESTR QTA DA BOAVISTA",4955,4960,{"$raw":"00000000"},"110401","ESTR QTA DA BOAVISTA","INOP",3,"T",230.42350,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4956,4961,{"$raw":"00000000"},"110401","MJ.3.3267","INOP",3,"T",404.95251,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4957,4962,{"$raw":"00000000"},"110401","MJ.3.3268","INOP",3,"T",351.71010,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4958,4963,{"$raw":"00000000"},"110401","MJ.3.3269","INOP",3,"T",659.98468,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CABEÇO BRANCO",null,null,"R",null,"110401",1,null,"R CABEÇO BRANCO",4959,4964,{"$raw":"00000000"},"110401","R CABEÇO BRANCO","INOP",3,"T",205.99840,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4960,4965,{"$raw":"00000000"},"110401","MJ.3.3270","INOP",3,"T",132.71594,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4961,4966,{"$raw":"00000000"},"110401","MJ.3.3271","INOP",3,"T",308.14299,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,4962,4967,{"$raw":"00000000"},"110401","MJ.3.3272","INOP",3,"T",419.91703,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4963,4968,{"$raw":"00000000"},"110401","MJ.3.3273","INOP",3,"T",404.85647,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"QTA DA BOAVISTA",null,null,"ESTR",null,"110401",1,null,"ESTR QTA DA BOAVISTA",4964,4969,{"$raw":"00000000"},"110401","ESTR QTA DA BOAVISTA","INOP",3,"T",298.53887,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,4965,4970,{"$raw":"00000000"},"110401","MJ.3.3274","INOP",3,"T",164.96219,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4966,4971,{"$raw":"00000000"},"110401","MJ.2.257","OPER",2,"A",193.02515,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4967,4972,{"$raw":"00000000"},"110401","MJ.3.3275","INOP",3,"T",403.19359,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CABEÇO BRANCO",null,null,"R",null,"110401",1,null,"R CABEÇO BRANCO",4968,4973,{"$raw":"00000000"},"110401","R CABEÇO BRANCO","INOP",3,"T",138.07447,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL",null,"01/06/2004","ESTR",null,"110401",1,null,"ESTR DO OLIVAL",4969,4974,{"$raw":"00000000"},"110401","ESTR DO OLIVAL","INOP",3,"T",335.12904,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4970,4975,{"$raw":"00000000"},"110401","MJ.2.258","OPER",2,"A",176.26839,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4971,4976,{"$raw":"00000000"},"110401","MJ.2.259","OPER",2,"A",216.53840,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4972,4977,{"$raw":"00000000"},"110401","MJ.3.3276","INOP",3,"T",307.11269,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4973,4978,{"$raw":"00000000"},"110401","MJ.3.3277","INOP",3,"T",480.20382,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4974,4979,{"$raw":"00000000"},"110401","MJ.2.260","OPER",2,"A",413.50398,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4975,4980,{"$raw":"00000000"},"110401","MJ.3.3278","INOP",3,"T",472.23581,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4976,4981,{"$raw":"00000000"},"110401","MJ.3.3279","INOP",3,"T",57.04449,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,4977,4982,{"$raw":"00000000"},"110401","MJ.3.3280","INOP",3,"T",478.13010,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4978,4983,{"$raw":"00000000"},"110401","MJ.3.3281","INOP",3,"T",515.50225,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SENHORA DE TODO O MUNDO",null,null,"R",null,"110401",1,null,"R SENHORA DE TODO O MUNDO",4979,4984,{"$raw":"00000000"},"110401","R SENHORA DE TODO O MUNDO","OPER",2,"A",273.20014,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4980,4985,{"$raw":"00000000"},"110401","MJ.3.3282","INOP",3,"T",406.96896,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4981,4986,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,281.97664,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4982,4987,{"$raw":"00000000"},"110401","MJ.3.3283","INOP",3,"T",248.73254,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4983,4988,{"$raw":"00000000"},"110401","MJ.3.3284","INOP",3,"T",351.44423,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4984,4989,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,340.75096,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",2,null,null,4985,4990,{"$raw":"00000000"},"110401","MJ.3.3285","INOP",3,"T",812.96432,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,4986,4991,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,456.36196,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4987,4992,{"$raw":"00000000"},"110401","MJ.2.261","OPER",2,"A",733.39409,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4988,4993,{"$raw":"00000000"},"110401","MJ.3.3286","INOP",3,"T",134.82109,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4989,4994,{"$raw":"00000000"},"110401","MJ.3.3287","INOP",3,"T",430.74967,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4990,4995,{"$raw":"00000000"},"110401","MJ.3.3288","INOP",3,"T",202.13970,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4991,4996,{"$raw":"00000000"},"110401","MJ.3.3289","INOP",3,"T",89.90264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,4992,4997,{"$raw":"00000000"},"110406","MJ.3.3290","INOP",3,"T",37.68665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,4993,4998,{"$raw":"00000000"},"110407","MJ.3.3291","INOP",3,"T",165.30567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4994,4999,{"$raw":"00000000"},"110401","MJ.3.3292","INOP",3,"T",246.73243,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4995,5000,{"$raw":"00000000"},"110401","MJ.3.3293","INOP",3,"T",42.86297,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4996,5001,{"$raw":"00000000"},"110401","MJ.1.112","OPER",1,"A",194.38360,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4997,5002,{"$raw":"00000000"},"110401","MJ.3.3294","INOP",3,"T",241.59285,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4998,5003,{"$raw":"00000000"},"110401","MJ.3.3295","INOP",3,"T",236.87144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,4999,5004,{"$raw":"00000000"},"110401","MJ.3.3296","INOP",3,"T",121.30717,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",2,null,null,5000,5005,{"$raw":"00000000"},"110404","MJ.3.3297","INOP",3,"T",165.98454,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5001,5006,{"$raw":"00000000"},"110406","MJ.3.3298","INOP",3,"T",108.69180,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SÃO SILVESTRE",null,null,"CÇ",null,"110406",1,null,"CÇ SÃO SILVESTRE",5002,5007,{"$raw":"00000000"},"110406","CÇ SÃO SILVESTRE","INOP",3,"T",100.26613,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5003,5008,{"$raw":"00000000"},"110401","MJ.3.3299","INOP",3,"T",13.37813,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5004,5009,{"$raw":"00000000"},"110401","MJ.3.3300","INOP",3,"T",79.00947,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5006,5011,{"$raw":"00000000"},"110404","MJ.3.3302","INOP",3,"T",204.74996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",2,null,null,5007,5012,{"$raw":"00000000"},"110401","MJ.3.3303","INOP",3,"T",63.65048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5008,5013,{"$raw":"00000000"},"110406","MJ.3.3304","INOP",3,"T",253.39865,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS OLIVEIRAS",null,null,"TV",null,"110406",1,null,"TV DAS OLIVEIRAS",5009,5014,{"$raw":"00000000"},"110406","TV DAS OLIVEIRAS","INOP",3,"T",114.85208,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5010,5015,{"$raw":"00000000"},"110404","MJ.3.3305","INOP",3,"T",111.93420,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5011,5016,{"$raw":"00000000"},"110406","MJ.3.3306","INOP",3,"T",143.23423,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110406",1,null,null,5012,5017,{"$raw":"00000000"},"110406","MJ.3.3307","INOP",3,"T",280.91898,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ DO NASCIMENTO PEREIRA",null,null,"R",null,"110402",1,null,"R JOSÉ DO NASCIMENTO PEREIRA",5013,5018,{"$raw":"00000000"},"110402","R JOSÉ DO NASCIMENTO PEREIRA","INOP",3,"T",107.94562,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CAVACO",null,null,"CSL",null,"110406",1,null,"CSL CAVACO",5014,5019,{"$raw":"00000000"},"110406","CSL CAVACO","INOP",3,"T",181.75640,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"TV",null,"110406",1,null,"TV DA FONTE",5015,5020,{"$raw":"00000000"},"110406","TV DA FONTE","INOP",3,"T",33.22221,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BARÇAL","SGD 9828/2010, SGD 12206/2010, proc nº 03/2011/10","29 Março 2011","ESTR",null,"110404",1,null,"Estrada do Barçal",5016,5021,{"$raw":"00000000"},"110404","Estrada do Barçal","INOP",3,"T",79.21507,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ESCARÇÃO","SGD 9828/2010, SGD 12206/2010, proc nº 03/2011/10","29 Março 2011","ESTR",null,"110404",1,null,"Estrada do Escarção",5017,5022,{"$raw":"00000000"},"110404","Estrada do Escarção","INOP",3,"T",142.08287,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5018,5023,{"$raw":"00000000"},"110404","MJ.3.3308","INOP",3,"T",36.73812,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5020,5025,{"$raw":"00000000"},"110407","MJ.3.3309","INOP",3,"T",247.77766,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5021,5026,{"$raw":"00000000"},"110407","MJ.3.3310","INOP",3,"T",86.49988,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5022,5027,{"$raw":"00000000"},"110406","MJ.3.3311","INOP",3,"T",62.94705,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5023,5028,{"$raw":"00000000"},"110406","MJ.3.3312","INOP",3,"T",381.80441,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5024,5029,{"$raw":"00000000"},"110404","MJ.3.3313","INOP",3,"T",81.32344,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5027,5032,{"$raw":"00000000"},"110406","MJ.3.3316","INOP",3,"T",141.03000,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5028,5033,{"$raw":"00000000"},"110404","MJ.3.3317","INOP",3,"T",59.65393,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5029,5034,{"$raw":"00000000"},"110407","MJ.3.3318","INOP",3,"T",186.93315,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5030,5035,{"$raw":"00000000"},"110404","MJ.3.3319","INOP",3,"T",75.51900,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5031,5036,{"$raw":"00000000"},"110406","MJ.3.3320","INOP",3,"T",85.15328,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5032,5037,{"$raw":"00000000"},"110407","MJ.3.3321","INOP",3,"T",86.39506,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5033,5038,{"$raw":"00000000"},"110404","MJ.3.3322","INOP",3,"T",120.85316,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5034,5039,{"$raw":"00000000"},"110406","MJ.3.3323","INOP",3,"T",24.74398,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5035,5040,{"$raw":"00000000"},"110406","MJ.3.3324","INOP",3,"T",327.33695,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",2,null,null,5036,5041,{"$raw":"00000000"},"110404","MJ.3.3325","INOP",3,"T",220.65452,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COQUEIRA",null,null,"CSL",null,"110404",1,null,"CSL COQUEIRA",5037,5042,{"$raw":"00000000"},"110404","CSL COQUEIRA","INOP",3,"T",181.85093,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",1,null,null,5038,5043,{"$raw":"00000000"},"110404","MJ.3.3326","INOP",3,"T",67.26079,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5039,5044,{"$raw":"00000000"},"110406","MJ.3.3327","INOP",3,"T",134.04001,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5040,5045,{"$raw":"00000000"},"110404","MJ.3.3328","INOP",3,"T",40.17223,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",2,null,null,5041,5046,{"$raw":"00000000"},"110404","MJ.3.3329","INOP",3,"T",125.60214,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5042,5047,{"$raw":"00000000"},"110407","MJ.3.3330","INOP",3,"T",190.70790,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5043,5048,{"$raw":"00000000"},"110406","MJ.3.3331","INOP",3,"T",73.46958,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5044,5049,{"$raw":"00000000"},"110407","MJ.3.3332","INOP",3,"T",66.46882,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5045,5050,{"$raw":"00000000"},"110407","MJ.3.3333","INOP",3,"T",68.77556,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5046,5051,{"$raw":"00000000"},"110404","MJ.3.3334","INOP",3,"T",214.72749,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5047,5052,{"$raw":"00000000"},"110406","MJ.3.3335","INOP",3,"T",32.45299,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ZAVIAL",null,null,"R",null,"110406",1,null,"R DO ZAVIAL",5048,5053,{"$raw":"00000000"},"110406","R DO ZAVIAL","INOP",3,"T",141.88863,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5049,5054,{"$raw":"00000000"},"110406","MJ.3.3336","INOP",3,"T",186.93902,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5050,5055,{"$raw":"00000000"},"110407","MJ.3.3337","INOP",3,"T",174.67996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5051,5056,{"$raw":"00000000"},"110404","MJ.3.3338","INOP",3,"T",244.41795,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5052,5057,{"$raw":"00000000"},"110404","MJ.3.3339","INOP",3,"T",154.47365,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5053,5058,{"$raw":"00000000"},"110407","MJ.3.3340","INOP",3,"T",154.30971,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5054,5059,{"$raw":"00000000"},"110406","MJ.3.3341","INOP",3,"T",65.00006,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,5055,5060,{"$raw":"00000000"},"110407","MJ.3.3342","INOP",3,"T",387.63743,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5056,5061,{"$raw":"00000000"},"110406","MJ.3.3343","INOP",3,"T",35.29974,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5057,5062,{"$raw":"00000000"},"110407","MJ.3.3344","INOP",3,"T",173.39217,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5058,5063,{"$raw":"00000000"},"110407","MJ.3.3345","INOP",3,"T",49.76066,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FONTE DOS CARREIROS",null,null,"R",null,"110406",1,null,"R FONTE DOS CARREIROS",5059,5064,{"$raw":"00000000"},"110406","R FONTE DOS CARREIROS","INOP",3,"T",148.26759,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5060,5065,{"$raw":"00000000"},"110404","MJ.3.3346","INOP",3,"T",53.60407,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5061,5066,{"$raw":"00000000"},"110407","MJ.3.3347","INOP",3,"T",214.77579,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5062,5067,{"$raw":"00000000"},"110406","MJ.3.3348","INOP",3,"T",78.43568,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5063,5068,{"$raw":"00000000"},"110406","MJ.3.3349","INOP",3,"T",203.41091,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5064,5069,{"$raw":"00000000"},"110404","MJ.3.3350","INOP",3,"T",26.48038,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5065,5070,{"$raw":"00000000"},"110406","MJ.3.3351","INOP",3,"T",207.43655,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5066,5071,{"$raw":"00000000"},"110404","MJ.3.3352","INOP",3,"T",197.83573,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5067,5072,{"$raw":"00000000"},"110407","MJ.3.3353","INOP",3,"T",18.39756,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5068,5073,{"$raw":"00000000"},"110406","MJ.3.3354","INOP",3,"T",30.17420,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5069,5074,{"$raw":"00000000"},"110406","MJ.3.3355","INOP",3,"T",173.28569,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VITORINO",null,null,"R",null,"110404",1,null,"R DO VITORINO",5070,5075,{"$raw":"00000000"},"110404","R DO VITORINO","INOP",3,"T",111.86555,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5071,5076,{"$raw":"00000000"},"110407","MJ.3.3356","INOP",3,"T",89.81770,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5072,5077,{"$raw":"00000000"},"110406","MJ.3.3357","INOP",3,"T",223.84219,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5073,5078,{"$raw":"00000000"},"110404","MJ.3.3358","INOP",3,"T",50.71411,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5074,5079,{"$raw":"00000000"},"110404","MJ.3.3359","INOP",3,"T",46.28291,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5075,5080,{"$raw":"00000000"},"110407","MJ.3.3360","INOP",3,"T",151.95409,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5076,5081,{"$raw":"00000000"},"110407","MJ.3.3361","INOP",3,"T",240.95767,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CAMPO DA BOLA",null,null,"TV",null,"110401",1,null,"TV CAMPO DA BOLA",5077,5082,{"$raw":"00000000"},"110401","TV CAMPO DA BOLA","INOP",3,"T",11.26261,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ZAVIAL",null,null,"R",null,"110406",1,null,"R DO ZAVIAL",5078,5083,{"$raw":"00000000"},"110406","R DO ZAVIAL","INOP",3,"T",160.63263,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FONTE DOS CARREIROS",null,null,"R",null,"110406",1,null,"R FONTE DOS CARREIROS",5079,5084,{"$raw":"00000000"},"110406","R FONTE DOS CARREIROS","OPER",2,"A",2.98309,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5080,5085,{"$raw":"00000000"},"110401","MJ.3.3362","INOP",3,"T",20.33603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5081,5086,{"$raw":"00000000"},"110401","MJ.3.3363","INOP",3,"T",14.57154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5082,5087,{"$raw":"00000000"},"110401","MJ.3.3364","INOP",3,"T",3.38142,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5083,5088,{"$raw":"00000000"},"110401","MJ.3.3365","INOP",3,"A",3.60528,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5084,5089,{"$raw":"00000000"},"110401","MJ.3.3366","INOP",3,"T",157.07329,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5085,5090,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,507.41023,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5086,5091,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,172.42848,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5087,5092,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,406.84561,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5088,5093,{"$raw":"00000000"},"110401","MJ.3.3367","INOP",3,"T",12.17832,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5089,5094,{"$raw":"00000000"},"110401","MJ.3.3368","INOP",3,"T",149.56438,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5090,5095,{"$raw":"00000000"},"110401","MJ.3.3369","INOP",3,"T",330.01628,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5091,5096,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,149.15799,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5092,5097,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,48.64827,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5093,5098,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,11.84225,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5094,5099,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,255.94513,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5095,5100,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,47.88642,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5096,5101,{"$raw":"00000000"},null,"MJ.3.3370",null,3,"T",130.17307,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5097,5102,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.65319,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5098,5103,{"$raw":"00000000"},"110401","MJ.3.3371","INOP",3,"T",405.75103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5099,5104,{"$raw":"00000000"},null,"MJ.3.3372",null,3,"T",153.74600,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5100,5105,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,209.38144,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5101,5106,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,21.30807,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5102,5107,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,126.96806,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5103,5108,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,444.47459,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5104,5109,{"$raw":"00000000"},"110401","MJ.3.3373","INOP",3,"T",219.29104,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5105,5110,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,91.42959,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5106,5111,{"$raw":"00000000"},"110401","MJ.3.3374","INOP",3,"T",666.86666,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5107,5112,{"$raw":"00000000"},"110401","MJ.3.3375","INOP",3,"T",55.47049,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5108,5113,{"$raw":"00000000"},"110401","MJ.3.3376","INOP",3,"T",6.88105,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5109,5114,{"$raw":"00000000"},"110401","MJ.3.3377","INOP",3,"T",269.85839,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5110,5115,{"$raw":"00000000"},"110401","MJ.3.3378","INOP",3,"T",589.29183,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5111,5116,{"$raw":"00000000"},"110401","MJ.3.3379","INOP",3,"T",166.49811,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5112,5117,{"$raw":"00000000"},"110401","MJ.3.3380","INOP",3,"T",334.28936,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5113,5118,{"$raw":"00000000"},"110401","MJ.3.3381","INOP",3,"T",37.53987,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5114,5119,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,345.20669,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5115,5120,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.53309,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5116,5121,{"$raw":"00000000"},"110401","MJ.3.3382","INOP",3,"T",170.28825,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5117,5122,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,498.47727,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5118,5123,{"$raw":"00000000"},"110401","MJ.3.3383","INOP",3,"T",373.24754,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5119,5124,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,25.11245,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5120,5125,{"$raw":"00000000"},"110401","MJ.3.3384","INOP",3,"T",676.31481,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5121,5126,{"$raw":"00000000"},"110401","MJ.3.3385","INOP",3,"T",162.80225,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5122,5127,{"$raw":"00000000"},"110401","MJ.3.3386","INOP",3,"T",494.96125,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5123,5128,{"$raw":"00000000"},"110401","MJ.3.3387","INOP",3,"T",334.29013,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5124,5129,{"$raw":"00000000"},"110401","MJ.3.3388","INOP",3,"T",262.57542,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5125,5130,{"$raw":"00000000"},"110401","MJ.3.3389","INOP",3,"T",373.64942,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5126,5131,{"$raw":"00000000"},"110401","MJ.3.3390","INOP",3,"T",152.20939,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5127,5132,{"$raw":"00000000"},"110401","MJ.3.3391","INOP",3,"T",281.99202,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5128,5133,{"$raw":"00000000"},"110401","MJ.3.3392","INOP",3,"T",345.52626,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5129,5134,{"$raw":"00000000"},"110401","MJ.3.3393","INOP",3,"T",132.41132,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5130,5135,{"$raw":"00000000"},"110401","MJ.3.3394","INOP",3,"T",100.56641,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5131,5136,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.85440,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,5132,5137,{"$raw":"00000000"},"110401","MJ.3.3395","INOP",3,"T",329.90567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5133,5138,{"$raw":"00000000"},"110401","MJ.3.3396","INOP",3,"T",227.81569,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5134,5139,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,44.84885,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5135,5140,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,313.74164,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5136,5141,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,47.83399,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5137,5142,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,85.47558,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5138,5143,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,200.18489,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5139,5144,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,205.67281,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5140,5145,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,34.65754,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5141,5146,{"$raw":"00000000"},"110401","MJ.3.3397","INOP",3,"T",4.22800,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5142,5147,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,172.71368,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5143,5148,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.35192,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5144,5149,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.08650,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5145,5150,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,25.01471,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5146,5151,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,9.04198,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5147,5152,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,35.05188,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5148,5153,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,33.33704,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5149,5154,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,7.35756,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5150,5155,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,35.68016,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5151,5156,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.29803,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5152,5157,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.12919,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5153,5158,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,66.39080,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5154,5159,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.75743,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5155,5160,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,34.88102,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5156,5161,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.47815,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5157,5162,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.85701,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5158,5163,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,132.80027,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5159,5164,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,146.73660,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5160,5165,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.76101,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5161,5166,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,74.61315,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5162,5167,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.75257,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5163,5168,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.92762,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5164,5169,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.03556,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5165,5170,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.90784,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5166,5171,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,52.59985,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5167,5172,{"$raw":"00000000"},"110401","MJ.3.3398","INOP",3,"T",41.47033,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5168,5173,{"$raw":"00000000"},"110401","MJ.1.113","OPER",1,"A",3.77202,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5169,5174,{"$raw":"00000000"},"110401","MJ.3.3399","INOP",3,"T",2.48284,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5170,5175,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,13.28859,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5171,5176,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,42.25363,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5172,5177,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,6.75805,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5173,5178,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,25.38354,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5174,5179,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,27.82623,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5175,5180,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.85149,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5176,5181,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.15824,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5177,5182,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,116.25471,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5178,5183,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,16.84172,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5179,5184,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,18.38172,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5180,5185,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,14.38497,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5181,5186,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.22466,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5182,5187,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,70.91407,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5183,5188,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,45.07305,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5184,5189,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,6.98756,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5185,5190,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,12.60966,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5186,5191,{"$raw":"00000000"},"110401","MJ.3.3400","INOP",3,"T",18.58997,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5187,5192,{"$raw":"00000000"},"110401","MJ.3.3401","INOP",3,"T",22.17928,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5188,5193,{"$raw":"00000000"},"110401","MJ.3.3402","INOP",3,"T",29.31923,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5189,5194,{"$raw":"00000000"},"110401","MJ.3.3403","INOP",3,"T",39.26415,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5190,5195,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.53193,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5191,5196,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.28790,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5192,5197,{"$raw":"00000000"},"110401","MJ.3.3404","INOP",3,"T",17.68676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5193,5198,{"$raw":"00000000"},"110401","MJ.3.3405","INOP",3,"T",46.19013,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5194,5199,{"$raw":"00000000"},"110401","MJ.3.3406","INOP",3,"T",14.82911,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5195,5200,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,32.49068,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5196,5201,{"$raw":"00000000"},"110401","MJ.3.3407","INOP",3,"T",47.05089,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5197,5202,{"$raw":"00000000"},"110401","MJ.1.114","OPER",1,"A",3.47667,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5198,5203,{"$raw":"00000000"},"110401","MJ.3.3408","INOP",3,"T",26.91837,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5199,5204,{"$raw":"00000000"},"110401","MJ.3.3409","INOP",3,"T",60.95150,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5200,5205,{"$raw":"00000000"},"110401","MJ.3.3410","INOP",3,"T",14.73139,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5201,5206,{"$raw":"00000000"},"110401","MJ.3.3411","INOP",3,"T",53.42527,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5202,5207,{"$raw":"00000000"},"110401","MJ.1.115","OPER",1,"A",3.73162,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5203,5208,{"$raw":"00000000"},"110401","MJ.3.3412","INOP",3,"T",18.70142,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5204,5209,{"$raw":"00000000"},"110401","MJ.3.3413","INOP",3,"T",35.33972,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5205,5210,{"$raw":"00000000"},"110401","MJ.3.3414","INOP",3,"T",4.05178,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5206,5211,{"$raw":"00000000"},"110401","MJ.3.3415","INOP",3,"T",13.10812,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5207,5212,{"$raw":"00000000"},"110401","MJ.3.3416","INOP",3,"T",37.94932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LAVADOUROS",null,"14/06/2005","ESTR",null,"110401",1,null,"ESTR DOS LAVADOUROS",5208,5213,{"$raw":"00000000"},"110401","ESTR DOS LAVADOUROS","INOP",3,"T",171.10146,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5209,5214,{"$raw":"00000000"},"110401","MJ.3.3417","INOP",3,"T",51.30178,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5210,5215,{"$raw":"00000000"},"110401","MJ.3.3418","INOP",3,"T",3.28402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5211,5216,{"$raw":"00000000"},"110401","MJ.3.3419","INOP",3,"T",2.66008,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5212,5217,{"$raw":"00000000"},"110401","MJ.3.3420","INOP",3,"T",21.33039,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5213,5218,{"$raw":"00000000"},"110401","MJ.3.3421","INOP",3,"T",16.98754,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5214,5219,{"$raw":"00000000"},"110401","MJ.3.3422","INOP",3,"T",33.10234,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5215,5220,{"$raw":"00000000"},"110401","MJ.3.3423","INOP",3,"T",54.69819,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5216,5221,{"$raw":"00000000"},"110401","MJ.3.3424","INOP",3,"T",46.33413,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5217,5222,{"$raw":"00000000"},"110401","MJ.3.3425","INOP",3,"T",41.45378,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5218,5223,{"$raw":"00000000"},"110401","MJ.3.3426","INOP",3,"T",277.72198,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5219,5224,{"$raw":"00000000"},"110401","MJ.3.3427","INOP",3,"T",61.27479,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5220,5225,{"$raw":"00000000"},"110401","MJ.3.3428","INOP",3,"A",4.12488,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5221,5226,{"$raw":"00000000"},"110401","MJ.3.3429","INOP",3,"T",37.02203,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5222,5227,{"$raw":"00000000"},"110401","MJ.3.3430","INOP",3,"T",35.53897,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5223,5228,{"$raw":"00000000"},"110401","MJ.3.3431","INOP",3,"T",97.70998,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5224,5229,{"$raw":"00000000"},"110401","MJ.3.3432","INOP",3,"T",27.68037,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5225,5230,{"$raw":"00000000"},"110401","MJ.3.3433","INOP",3,"T",56.89857,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5226,5231,{"$raw":"00000000"},"110401","MJ.3.3434","INOP",3,"T",3.45232,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5227,5232,{"$raw":"00000000"},"110401","MJ.3.3435","INOP",3,"T",6.31064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5228,5233,{"$raw":"00000000"},"110401","MJ.3.3436","INOP",3,"T",101.60997,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5229,5234,{"$raw":"00000000"},"110401","MJ.3.3437","INOP",3,"T",42.05857,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",5230,5235,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",200.68608,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",5231,5236,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",433.94741,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5232,5237,{"$raw":"00000000"},"110401","MJ.3.3438","INOP",3,"T",51.40926,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5233,5238,{"$raw":"00000000"},"110401","MJ.3.3439","INOP",3,"T",35.62099,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5234,5239,{"$raw":"00000000"},"110401","MJ.3.3440","INOP",3,"T",22.14264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5235,5240,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,8.73539,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE TRAVESSO",null,null,"R",null,null,0,null,"R VALE TRAVESSO",5236,5241,{"$raw":"00000000"},null,"R VALE TRAVESSO",null,{"$raw":"*****"},null,93.67961,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5237,5242,{"$raw":"00000000"},"110401","MJ.3.3441","INOP",3,"T",11.31836,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5238,5243,{"$raw":"00000000"},"110401","MJ.3.3442","INOP",3,"T",40.10089,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5239,5244,{"$raw":"00000000"},"110401","MJ.3.3443","INOP",3,"T",3.59234,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5240,5245,{"$raw":"00000000"},"110401","MJ.3.3444","INOP",3,"T",23.98586,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5241,5246,{"$raw":"00000000"},"110401","MJ.3.3445","INOP",3,"T",3.27758,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,5242,5247,{"$raw":"00000000"},"110401","MJ.3.3446","INOP",3,"T",18.26180,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5243,5248,{"$raw":"00000000"},"110401","MJ.3.3447","INOP",3,"T",41.64951,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,5244,5249,{"$raw":"00000000"},"110401","MJ.3.3448","INOP",3,"T",301.25583,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5245,5250,{"$raw":"00000000"},"110401","MJ.3.3449","INOP",3,"T",65.97749,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5246,5251,{"$raw":"00000000"},"110401","MJ.3.3450","INOP",3,"T",92.52784,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5247,5252,{"$raw":"00000000"},"110401","MJ.3.3451","INOP",3,"T",36.09211,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5248,5253,{"$raw":"00000000"},"110401","MJ.3.3452","INOP",3,"T",5.61459,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5249,5254,{"$raw":"00000000"},"110401","MJ.3.3453","INOP",3,"T",804.69191,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5250,5255,{"$raw":"00000000"},"110401","MJ.3.3454","INOP",3,"T",129.47669,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5251,5256,{"$raw":"00000000"},"110401","MJ.3.3455","INOP",3,"T",81.27860,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5252,5257,{"$raw":"00000000"},"110401","MJ.3.3456","INOP",3,"T",3.18014,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,5253,5258,{"$raw":"00000000"},"110401","MJ.3.3457","INOP",3,"T",71.21297,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5254,5259,{"$raw":"00000000"},"110401","MJ.3.3458","INOP",3,"T",5.22027,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5255,5260,{"$raw":"00000000"},"110401","MJ.3.3459","INOP",3,"T",82.72252,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5256,5261,{"$raw":"00000000"},"110401","MJ.1.116","OPER",1,"A",4.04802,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5257,5262,{"$raw":"00000000"},"110401","MJ.3.3460","INOP",3,"T",15.75106,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5258,5263,{"$raw":"00000000"},"110401","MJ.3.3461","INOP",3,"T",1.08908,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,5259,5264,{"$raw":"00000000"},"110401","MJ.3.3462","INOP",3,"T",119.22174,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PORTO PEDRINHO",null,null,"ESTR",null,"110401",1,null,"ESTR PORTO PEDRINHO",5260,5265,{"$raw":"00000000"},"110401","ESTR PORTO PEDRINHO","INOP",3,"T",5.20172,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5261,5266,{"$raw":"00000000"},"110401","MJ.3.3463","INOP",3,"T",60.32207,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5262,5267,{"$raw":"00000000"},"110401","MJ.3.3464","INOP",3,"T",74.00119,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5263,5268,{"$raw":"00000000"},"110401","MJ.3.3465","INOP",3,"T",17.55012,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5264,5269,{"$raw":"00000000"},"110401","MJ.3.3466","INOP",3,"T",2.93764,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5265,5270,{"$raw":"00000000"},"110401","MJ.3.3467","INOP",3,"T",13.35847,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5266,5271,{"$raw":"00000000"},"110401","MJ.3.3468","INOP",3,"T",4.51486,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5267,5272,{"$raw":"00000000"},"110401","MJ.3.3469","INOP",3,"T",9.64416,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TORRE",null,null,"ESTR",null,"110401",1,null,"ESTR DA TORRE",5268,5273,{"$raw":"00000000"},"110401","ESTR DA TORRE","INOP",3,"T",40.63814,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5269,5274,{"$raw":"00000000"},"110401","MJ.1.117","OPER",1,"A",4.02394,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5270,5275,{"$raw":"00000000"},"110401","MJ.3.3470","INOP",3,"T",73.37979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5271,5276,{"$raw":"00000000"},"110401","MJ.3.3471","INOP",3,"T",1.20266,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5272,5277,{"$raw":"00000000"},"110401","MJ.3.3472","INOP",3,"T",48.70293,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5273,5278,{"$raw":"00000000"},"110401","MJ.3.3473","INOP",3,"T",20.08211,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5274,5279,{"$raw":"00000000"},"110401","MJ.3.3474","INOP",3,"T",121.03780,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5275,5280,{"$raw":"00000000"},"110401","MJ.3.3475","INOP",3,"T",3.33662,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5276,5281,{"$raw":"00000000"},"110401","MJ.3.3476","INOP",3,"T",262.36016,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5277,5282,{"$raw":"00000000"},"110401","MJ.3.3477","INOP",3,"T",94.39991,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5278,5283,{"$raw":"00000000"},"110401","MJ.3.3478","INOP",3,"T",70.21664,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5279,5284,{"$raw":"00000000"},"110401","MJ.3.3479","INOP",3,"T",82.81401,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARRIL",null,null,"R",null,"110406",1,null,"R DO CARRIL",5280,5285,{"$raw":"00000000"},"110406","R DO CARRIL","INOP",3,"T",40.67803,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARRIL",null,null,"R",null,"110406",1,null,"R DO CARRIL",5281,5286,{"$raw":"00000000"},"110406","R DO CARRIL","INOP",3,"T",41.00018,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE MENDO",null,"04 Mai 2004","R",null,"110408",1,null,"R VALE MENDO",5282,5287,{"$raw":"00000000"},"110408","R VALE MENDO","INOP",3,"T",59.48936,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"R",null,"110404",1,null,"R DA ESCOLA",5283,5288,{"$raw":"00000000"},"110404","R DA ESCOLA","OPER",1,"A",178.60937,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",5284,5289,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",228.71290,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",5285,5290,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",101.64997,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","1-5","1-5",null,null,"EN",null,"110403",1,null,"EN 1-5",5286,5291,{"$raw":"00000000"},"110403","EN 1-5","OPER",1,"A",50.03707,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CABEÇO BRANCO",null,null,"R",null,"110401",1,null,"R CABEÇO BRANCO",5287,5292,{"$raw":"00000000"},"110401","R CABEÇO BRANCO","INOP",3,"T",122.52272,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",5288,5293,{"$raw":"00000000"},"110408","R DA LIBERDADE","OPER",1,"A",70.84320,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5289,5294,{"$raw":"00000000"},"110401","MJ.3.3480","INOP",3,"T",436.39706,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5290,5295,{"$raw":"00000000"},"110401","MJ.3.3481","INOP",3,"T",695.29111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5291,5296,{"$raw":"00000000"},"110401","MJ.3.3482","INOP",3,"T",67.12998,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5292,5297,{"$raw":"00000000"},"110401","MJ.3.3483","INOP",3,"T",68.17808,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5293,5298,{"$raw":"00000000"},"110401","MJ.3.3484","INOP",3,"T",66.16725,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5294,5299,{"$raw":"00000000"},"110401","MJ.3.3485","INOP",3,"T",256.10565,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5295,5300,{"$raw":"00000000"},"110401","MJ.3.3486","INOP",3,"T",231.03306,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5296,5301,{"$raw":"00000000"},"110401","MJ.3.3487","INOP",3,"T",25.66731,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5297,5302,{"$raw":"00000000"},"110401","MJ.3.3488","INOP",3,"T",49.23249,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5298,5303,{"$raw":"00000000"},"110401","MJ.3.3489","INOP",3,"T",154.32622,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5299,5304,{"$raw":"00000000"},"110401","MJ.3.3490","INOP",3,"T",90.05321,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,5300,5305,{"$raw":"00000000"},"110401","MJ.3.3491","INOP",3,"T",248.62221,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5301,5306,{"$raw":"00000000"},"110401","MJ.3.3492","INOP",3,"T",104.47216,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5302,5307,{"$raw":"00000000"},"110401","MJ.3.3493","INOP",3,"T",55.36053,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5303,5308,{"$raw":"00000000"},"110401","MJ.3.3494","INOP",3,"T",14.62860,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5304,5309,{"$raw":"00000000"},"110401","MJ.3.3495","INOP",3,"T",110.96861,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5305,5310,{"$raw":"00000000"},"110401","MJ.3.3496","INOP",3,"T",35.67199,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5306,5311,{"$raw":"00000000"},"110401","MJ.3.3497","INOP",3,"T",29.72591,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5307,5312,{"$raw":"00000000"},"110401","MJ.3.3498","INOP",3,"T",155.48612,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5308,5313,{"$raw":"00000000"},"110401","MJ.3.3499","INOP",3,"T",96.43897,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5309,5314,{"$raw":"00000000"},"110401","MJ.3.3500","INOP",3,"T",100.73254,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5310,5315,{"$raw":"00000000"},"110401","MJ.3.3501","INOP",3,"T",26.85355,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5311,5316,{"$raw":"00000000"},"110401","MJ.3.3502","INOP",3,"T",369.45223,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5312,5317,{"$raw":"00000000"},"110401","MJ.3.3503","INOP",3,"T",46.91152,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5313,5318,{"$raw":"00000000"},"110401","MJ.3.3504","INOP",3,"T",42.83046,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5314,5319,{"$raw":"00000000"},"110401","MJ.3.3505","INOP",3,"T",21.40445,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5315,5320,{"$raw":"00000000"},"110401","MJ.3.3506","INOP",3,"T",57.50537,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5316,5321,{"$raw":"00000000"},"110401","MJ.3.3507","INOP",3,"T",3.51070,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5317,5322,{"$raw":"00000000"},"110401","MJ.3.3508","INOP",3,"T",114.35182,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5318,5323,{"$raw":"00000000"},"110401","MJ.3.3509","INOP",3,"T",320.86467,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5319,5324,{"$raw":"00000000"},"110401","MJ.3.3510","INOP",3,"T",384.60104,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5320,5325,{"$raw":"00000000"},"110401","MJ.3.3511","INOP",3,"T",420.59834,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5321,5326,{"$raw":"00000000"},"110401","MJ.3.3512","INOP",3,"T",121.05926,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5322,5327,{"$raw":"00000000"},"110401","MJ.3.3513","INOP",3,"T",276.81807,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5323,5328,{"$raw":"00000000"},"110401","MJ.3.3514","INOP",3,"T",246.69569,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5324,5329,{"$raw":"00000000"},"110401","MJ.3.3515","INOP",3,"T",209.68427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5325,5330,{"$raw":"00000000"},"110401","MJ.3.3516","INOP",3,"T",6.33531,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5326,5331,{"$raw":"00000000"},"110401","MJ.3.3517","INOP",3,"T",91.17245,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5327,5332,{"$raw":"00000000"},"110401","MJ.3.3518","INOP",3,"T",214.31514,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5328,5333,{"$raw":"00000000"},"110401","MJ.3.3519","INOP",3,"T",98.50716,3.90000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5329,5334,{"$raw":"00000000"},"110401","MJ.3.3520","INOP",3,"T",125.95373,3.90000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5330,5335,{"$raw":"00000000"},"110401","MJ.3.3521","INOP",3,"T",20.92278,3.90000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5331,5336,{"$raw":"00000000"},"110401","MJ.3.3522","INOP",3,"T",77.90711,3.90000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,5,0,0,0,0,2,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5332,5337,{"$raw":"00000000"},"110401","MJ.3.3523","INOP",3,"T",9.92907,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5333,5338,{"$raw":"00000000"},"110401","MJ.3.3524","INOP",3,"T",7.50864,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5334,5339,{"$raw":"00000000"},"110401","MJ.3.3525","INOP",3,"T",75.62883,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5335,5340,{"$raw":"00000000"},"110401","MJ.3.3526","INOP",3,"T",49.40552,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5336,5341,{"$raw":"00000000"},"110401","MJ.3.3527","INOP",3,"T",106.17620,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5337,5342,{"$raw":"00000000"},"110401","MJ.3.3528","INOP",3,"T",48.61893,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5338,5343,{"$raw":"00000000"},"110401","MJ.3.3529","INOP",3,"T",5.53943,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5339,5344,{"$raw":"00000000"},"110401","MJ.3.3530","INOP",3,"T",67.69257,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5340,5345,{"$raw":"00000000"},"110401","MJ.3.3531","INOP",3,"T",11.46332,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5341,5346,{"$raw":"00000000"},"110401","MJ.3.3532","INOP",3,"T",6.09774,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5342,5347,{"$raw":"00000000"},"110401","MJ.3.3533","INOP",3,"T",34.17441,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5343,5348,{"$raw":"00000000"},"110401","MJ.3.3534","INOP",3,"T",6.34871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5344,5349,{"$raw":"00000000"},"110401","MJ.3.3535","INOP",3,"T",22.62337,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5345,5350,{"$raw":"00000000"},"110401","MJ.3.3536","INOP",3,"T",14.29881,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5346,5351,{"$raw":"00000000"},"110401","MJ.3.3537","INOP",3,"T",103.98296,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5347,5352,{"$raw":"00000000"},"110401","MJ.1.118","OPER",1,"A",4.30392,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5348,5353,{"$raw":"00000000"},"110401","MJ.3.3538","INOP",3,"T",38.25318,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5349,5354,{"$raw":"00000000"},"110401","MJ.3.3539","INOP",3,"T",100.99029,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5350,5355,{"$raw":"00000000"},"110401","MJ.3.3540","INOP",3,"T",184.25651,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5351,5356,{"$raw":"00000000"},"110401","MJ.3.3541","INOP",3,"T",116.26836,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5352,5357,{"$raw":"00000000"},"110401","MJ.3.3542","INOP",3,"T",56.99222,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5353,5358,{"$raw":"00000000"},"110401","MJ.3.3543","INOP",3,"T",47.70760,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5354,5359,{"$raw":"00000000"},"110401","MJ.3.3544","INOP",3,"T",74.11268,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5355,5360,{"$raw":"00000000"},"110401","MJ.3.3545","INOP",3,"T",62.46316,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5356,5361,{"$raw":"00000000"},"110401","MJ.3.3546","INOP",3,"T",63.29602,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5357,5362,{"$raw":"00000000"},"110401","MJ.3.3547","INOP",3,"T",60.18444,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5358,5363,{"$raw":"00000000"},"110401","MJ.3.3548","INOP",3,"T",128.41225,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5359,5364,{"$raw":"00000000"},"110401","MJ.3.3549","INOP",3,"T",55.19034,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110408",1,null,"R DO CAMPO DA BOLA",5360,5365,{"$raw":"00000000"},"110408","R DO CAMPO DA BOLA","OPER",1,"A",123.94184,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5361,5366,{"$raw":"00000000"},"110401","MJ.3.3550","INOP",3,"T",106.19100,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5362,5367,{"$raw":"00000000"},"110401","MJ.3.3551","INOP",3,"T",165.84561,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5363,5368,{"$raw":"00000000"},"110401","MJ.3.3552","INOP",3,"T",119.34984,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5364,5369,{"$raw":"00000000"},"110401","MJ.3.3553","INOP",3,"T",270.84265,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5365,5370,{"$raw":"00000000"},"110401","MJ.3.3554","INOP",3,"T",10.69376,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5366,5371,{"$raw":"00000000"},"110401","MJ.3.3555","INOP",3,"T",338.76255,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5367,5372,{"$raw":"00000000"},"110401","MJ.3.3556","INOP",3,"T",7.88201,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5368,5373,{"$raw":"00000000"},"110401","MJ.3.3557","INOP",3,"T",58.90207,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5369,5374,{"$raw":"00000000"},"110401","MJ.3.3558","INOP",3,"T",29.48009,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5370,5375,{"$raw":"00000000"},"110401","MJ.3.3559","INOP",3,"T",3.73430,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5371,5376,{"$raw":"00000000"},"110401","MJ.3.3560","INOP",3,"T",210.14277,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5372,5377,{"$raw":"00000000"},"110401","MJ.3.3561","INOP",3,"T",77.64814,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5373,5378,{"$raw":"00000000"},"110401","MJ.3.3562","INOP",3,"T",135.22481,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5374,5379,{"$raw":"00000000"},"110401","MJ.3.3563","INOP",3,"T",2.71671,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5375,5380,{"$raw":"00000000"},"110401","MJ.3.3564","INOP",3,"T",3.24168,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5376,5381,{"$raw":"00000000"},"110401","MJ.3.3565","INOP",3,"T",2.96387,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5377,5382,{"$raw":"00000000"},"110401","MJ.3.3566","INOP",3,"T",36.50249,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5378,5383,{"$raw":"00000000"},"110401","MJ.3.3567","INOP",3,"T",133.32737,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"ESTR",null,"110401",1,null,"ESTR DO MOINHO",5379,5384,{"$raw":"00000000"},"110401","ESTR DO MOINHO","INOP",3,"T",200.99154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5380,5385,{"$raw":"00000000"},"110401","MJ.3.3568","INOP",3,"T",443.08788,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5381,5386,{"$raw":"00000000"},"110401","MJ.3.3569","INOP",3,"T",83.87250,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,5382,5387,{"$raw":"00000000"},"110401","MJ.3.3570","INOP",3,"T",371.61268,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"ESTR",null,"110401",1,null,"ESTR DO MOINHO",5383,5388,{"$raw":"00000000"},"110401","ESTR DO MOINHO","INOP",3,"T",488.64031,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"ESTR",null,"110401",1,null,"ESTR DO MOINHO",5384,5389,{"$raw":"00000000"},"110401","ESTR DO MOINHO","INOP",3,"T",23.41675,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5385,5390,{"$raw":"00000000"},"110401","MJ.3.3571","INOP",3,"T",248.21607,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5386,5391,{"$raw":"00000000"},"110401","MJ.3.3572","INOP",3,"T",107.34590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5387,5392,{"$raw":"00000000"},"110401","MJ.3.3573","INOP",3,"T",507.33958,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5388,5393,{"$raw":"00000000"},"110401","MJ.3.3574","INOP",3,"T",81.22454,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5389,5394,{"$raw":"00000000"},"110401","MJ.3.3575","INOP",3,"T",109.86654,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5390,5395,{"$raw":"00000000"},"110401","MJ.3.3576","INOP",3,"T",167.95126,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5391,5396,{"$raw":"00000000"},"110401","MJ.3.3577","INOP",3,"T",313.88592,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5392,5397,{"$raw":"00000000"},"110401","MJ.3.3578","INOP",3,"T",11.49979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5393,5398,{"$raw":"00000000"},"110401","MJ.3.3579","INOP",3,"T",5.50303,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5394,5399,{"$raw":"00000000"},"110401","MJ.3.3580","INOP",3,"T",13.19525,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S. SEBASTIÃO",null,null,"R",null,"110401",1,null,"R S. Sebastião",5395,5400,{"$raw":"00000000"},"110401","R S. Sebastião","INOP",3,"T",46.61371,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S. SEBASTIÃO",null,null,"RUA",null,"110401",1,null,"R S. Sebastião",5396,5401,{"$raw":"00000000"},"110401","R S. Sebastião","INOP",3,"T",183.39845,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5397,5402,{"$raw":"00000000"},"110401","MJ.3.3581","INOP",3,"T",137.54367,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5398,5403,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,180.54645,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5399,5404,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.63287,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5400,5405,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,42.36407,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5401,5406,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.61008,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5402,5407,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,38.16368,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5403,5408,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.22246,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5404,5409,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,27.22428,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5405,5410,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.04245,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5406,5411,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,26.39330,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5407,5412,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,35.70144,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5408,5413,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,17.28064,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5409,5414,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,13.78841,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5410,5415,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,11.55225,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5411,5416,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,30.88929,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5412,5417,{"$raw":"00000000"},"110401","MJ.3.3582","INOP",3,"T",84.24547,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5413,5418,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,22.33974,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5414,5419,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,140.82915,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5415,5420,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.72602,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5416,5421,{"$raw":"00000000"},"110401","MJ.2.262","OPER",2,"A",274.49915,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5417,5422,{"$raw":"00000000"},"110401","MJ.2.263","OPER",2,"A",40.33282,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5418,5423,{"$raw":"00000000"},"110406","MJ.3.3583","INOP",3,"T",1.79769,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5419,5424,{"$raw":"00000000"},"110406","MJ.3.3584","INOP",3,"T",31.42327,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5420,5425,{"$raw":"00000000"},"110406","MJ.3.3585","INOP",3,"T",174.36767,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"QTA DA BOAVISTA",null,null,"ESTR",null,"110401",1,null,"ESTR QTA DA BOAVISTA",5421,5426,{"$raw":"00000000"},"110401","ESTR QTA DA BOAVISTA","INOP",3,"T",51.81606,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"QTA DA BOAVISTA",null,null,"ESTR",null,"110401",1,null,"ESTR QTA DA BOAVISTA",5422,5427,{"$raw":"00000000"},"110401","ESTR QTA DA BOAVISTA","INOP",3,"T",84.80130,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SENHORA DE TODO O MUNDO",null,null,"R",null,"110401",1,null,"R SENHORA DE TODO O MUNDO",5423,5428,{"$raw":"00000000"},"110401","R SENHORA DE TODO O MUNDO","OPER",2,"A",106.79760,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SENHORA DE TODO O MUNDO",null,null,"R",null,"110401",1,null,"R SENHORA DE TODO O MUNDO",5424,5429,{"$raw":"00000000"},"110401","R SENHORA DE TODO O MUNDO","OPER",2,"A",59.01279,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CABEÇO BRANCO",null,null,"R",null,"110401",1,null,"R CABEÇO BRANCO",5425,5430,{"$raw":"00000000"},"110401","R CABEÇO BRANCO","INOP",3,"T",42.58176,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","LAURA SANTOS LIMA",null,null,"AV",null,"110410",1,null,"AV LAURA SANTOS LIMA",5426,5431,{"$raw":"00000000"},"110410","AV LAURA SANTOS LIMA","OPER",2,"A",10.27285,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",5427,5432,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",18.86749,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,null,"TV",null,"110408",1,null,"TV DO CHAFARIZ",5428,5433,{"$raw":"00000000"},"110408","TV DO CHAFARIZ","OPER",1,"A",31.67020,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO NOVO",null,null,"R",null,"110410",1,null,"R DO POÇO NOVO",5429,5434,{"$raw":"00000000"},"110410","R DO POÇO NOVO","INOP",3,"T",43.51820,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5430,5435,{"$raw":"00000000"},"110401","MJ.3.3586","INOP",3,"T",104.91003,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5431,5436,{"$raw":"00000000"},"110401","MJ.1.119","OPER",1,"A",16.65281,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5432,5437,{"$raw":"00000000"},"110401","MJ.2.264","OPER",2,"A",16.74461,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5433,5438,{"$raw":"00000000"},"110401","MJ.2.265","OPER",2,"A",30.11314,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CABEÇO BRANCO",null,null,"R",null,"110401",1,null,"R CABEÇO BRANCO",5434,5440,{"$raw":"00000000"},"110401","R CABEÇO BRANCO","INOP",3,"T",129.31220,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CABEÇO BRANCO",null,null,"R",null,"110401",1,null,"R CABEÇO BRANCO",5435,5441,{"$raw":"00000000"},"110401","R CABEÇO BRANCO","INOP",3,"T",114.41419,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5436,5442,{"$raw":"00000000"},"110401","MJ.3.3587","INOP",3,"T",80.68172,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"QTA DA BOAVISTA",null,null,"ESTR",null,"110401",1,null,"ESTR QTA DA BOAVISTA",5437,5443,{"$raw":"00000000"},"110401","ESTR QTA DA BOAVISTA","INOP",3,"T",84.57194,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5438,5444,{"$raw":"00000000"},"110401","MJ.3.3588","INOP",3,"T",335.27070,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MARTINS",null,null,"R",null,"110401",1,null,"R DOS MARTINS",5439,5445,{"$raw":"00000000"},"110401","R DOS MARTINS","INOP",3,"T",51.67919,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5440,5446,{"$raw":"00000000"},"110401","MJ.1.120","OPER",1,"A",4.13011,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5441,5447,{"$raw":"00000000"},"110401","MJ.3.3589","INOP",3,"T",101.40555,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5442,5448,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1","CM","1026","DAS ESCOLAS",null,null,"R",null,"110401",1,null,"R DAS ESCOLAS",5443,5449,{"$raw":"00000000"},"110401","R DAS ESCOLAS","OPER",1,null,41.78646,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","VICTOR GOMES ISIDORO",null,null,"R",null,"110401",1,null,"R VICTOR GOMES ISIDORO",5444,5450,{"$raw":"00000000"},"110401","R VICTOR GOMES ISIDORO","OPER",1,"A",76.09712,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5445,5451,{"$raw":"00000000"},"110401","MJ.3.3590","INOP",3,"T",152.32555,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"QTA DA BOAVISTA",null,null,"ESTR",null,"110401",1,null,"ESTR QTA DA BOAVISTA",5446,5452,{"$raw":"00000000"},"110401","ESTR QTA DA BOAVISTA","INOP",3,"T",90.64374,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5447,5453,{"$raw":"00000000"},"110401","MJ.3.3591","INOP",3,"T",60.44020,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5448,5454,{"$raw":"00000000"},"110401","MJ.3.3592","INOP",3,"T",104.83939,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5449,5455,{"$raw":"00000000"},"110401","MJ.3.3593","INOP",3,"T",7.85337,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110401",1,null,null,5450,5456,{"$raw":"00000000"},"110401","MJ.3.3594","INOP",3,"T",102.51339,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5451,5457,{"$raw":"00000000"},"110401","MJ.3.3595","INOP",3,"T",4.40410,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5452,5458,{"$raw":"00000000"},"110401","MJ.3.3596","INOP",3,"T",6.23501,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5453,5459,{"$raw":"00000000"},"110401","MJ.3.3597","INOP",3,"T",17.95111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5454,5460,{"$raw":"00000000"},"110401","MJ.3.3598","INOP",3,"T",24.22232,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5455,5461,{"$raw":"00000000"},"110401","MJ.3.3599","INOP",3,"T",19.15630,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5456,5462,{"$raw":"00000000"},"110401","MJ.3.3600","INOP",3,"T",4.25659,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Victor Gomes Isidro",null,null,null,null,null,"110401",1,null,null,5457,5463,{"$raw":"00000000"},"110401","MJ.3.3601","INOP",3,"T",10.57311,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"QTA DA BOAVISTA",null,null,"ESTR",null,"110401",1,null,"ESTR QTA DA BOAVISTA",5458,5464,{"$raw":"00000000"},"110401","ESTR QTA DA BOAVISTA","INOP",3,"T",187.44189,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CAMPO DA BOLA",null,null,"TV",null,"110401",1,null,"TV CAMPO DA BOLA",5459,5465,{"$raw":"00000000"},"110401","TV CAMPO DA BOLA","INOP",3,"T",131.21035,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5460,5466,{"$raw":"00000000"},"110401","MJ.3.3602","INOP",3,"T",7.14741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5461,5467,{"$raw":"00000000"},"110401","MJ.3.3603","INOP",3,"T",29.86110,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5462,5468,{"$raw":"00000000"},"110401","MJ.3.3604","INOP",3,"T",15.26992,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5463,5469,{"$raw":"00000000"},"110401","MJ.3.3605","INOP",3,"T",49.25439,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5464,5470,{"$raw":"00000000"},"110401","MJ.3.3606","INOP",3,"T",112.84196,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5465,5471,{"$raw":"00000000"},"110401","MJ.3.3607","INOP",3,"T",3.67165,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5466,5472,{"$raw":"00000000"},"110401","MJ.3.3608","INOP",3,"T",26.76929,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5467,5473,{"$raw":"00000000"},"110401","MJ.3.3609","INOP",3,"T",69.19989,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5468,5474,{"$raw":"00000000"},"110401","MJ.3.3610","INOP",3,"T",75.90997,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5469,5475,{"$raw":"00000000"},"110401","MJ.3.3611","INOP",3,"T",34.33236,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5470,5476,{"$raw":"00000000"},"110401","MJ.3.3612","INOP",3,"T",3.29201,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5471,5477,{"$raw":"00000000"},"110401","MJ.3.3613","INOP",3,"T",4.99673,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5472,5478,{"$raw":"00000000"},"110401","MJ.3.3614","INOP",3,"T",26.55858,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LAVADOUROS","Confirmado, Março 2007. SGD nº 9709 de 7/10/2010","21 dez 2010","R",null,"110401",1,null,"R DOS LAVADOUROS",5473,5479,{"$raw":"00000000"},"110401","R DOS LAVADOUROS","INOP",3,"T",33.95807,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO CABRAL",null,null,"R",null,"110404",1,null,"R DO POÇO CABRAL",5474,5480,{"$raw":"00000000"},"110404","R DO POÇO CABRAL","OPER",1,"A",177.79126,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO CABRAL",null,null,"R",null,"110404",1,null,"R DO POÇO CABRAL",5475,5481,{"$raw":"00000000"},"110404","R DO POÇO CABRAL","OPER",1,"A",25.39157,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AZINHADA DO JACINTO",null,null,"ESTR",null,"110401",1,null,"ESTR AZINHADA DO JACINTO",5476,5482,{"$raw":"00000000"},"110401","ESTR AZINHADA DO JACINTO","OPER",2,"A",327.57147,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PALMEIRA",null,null,"R",null,"110404",1,null,"R DA PALMEIRA",5477,5483,{"$raw":"00000000"},"110404","R DA PALMEIRA","INOP",3,"T",14.81361,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","DO ADRO",null,null,"R",null,"110401",1,null,"R DO ADRO",5478,5484,{"$raw":"00000000"},"110401","R DO ADRO","OPER",1,"A",151.30839,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PALMEIRA",null,null,"R",null,"110404",1,null,"R DA PALMEIRA",5479,5485,{"$raw":"00000000"},"110404","R DA PALMEIRA","OPER",1,"A",93.59319,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","VICTOR GOMES ISIDORO",null,null,"R",null,"110401",1,null,"R VICTOR GOMES ISIDORO",5480,5486,{"$raw":"00000000"},"110401","R VICTOR GOMES ISIDORO","OPER",1,"A",72.49187,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SALGUEIRAL",null,null,"ESTR",null,"110404",1,null,"ESTR DO SALGUEIRAL",5481,5487,{"$raw":"00000000"},"110404","ESTR DO SALGUEIRAL","INOP",3,"A",308.38177,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MESTRE",null,null,"R",null,"110407",1,null,"R DO MESTRE",5482,5488,{"$raw":"00000000"},"110407","R DO MESTRE","INOP",3,"T",145.53849,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5483,5489,{"$raw":"00000000"},"110401","MJ.3.3615","INOP",3,"T",10.12851,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5484,5490,{"$raw":"00000000"},"110401","MJ.3.3616","INOP",3,"T",29.48709,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5485,5491,{"$raw":"00000000"},"110401","MJ.3.3617","INOP",3,"T",16.60333,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5486,5492,{"$raw":"00000000"},"110401","MJ.3.3618","INOP",3,"T",23.56757,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5487,5493,{"$raw":"00000000"},"110401","MJ.3.3619","INOP",3,"T",43.89731,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5488,5494,{"$raw":"00000000"},"110401","MJ.3.3620","INOP",3,"T",17.58333,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5489,5495,{"$raw":"00000000"},"110401","MJ.3.3621","INOP",3,"T",20.13255,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5490,5496,{"$raw":"00000000"},"110401","MJ.3.3622","INOP",3,"T",27.43301,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5491,5497,{"$raw":"00000000"},"110401","MJ.3.3623","INOP",3,"T",2.75536,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5492,5498,{"$raw":"00000000"},"110401","MJ.1.121","OPER",1,"A",3.01166,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5493,5499,{"$raw":"00000000"},"110401","MJ.3.3624","INOP",3,"T",34.32902,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5494,5500,{"$raw":"00000000"},"110401","MJ.3.3625","INOP",3,"T",13.00844,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5495,5501,{"$raw":"00000000"},"110401","MJ.3.3626","INOP",3,"T",18.42084,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5496,5502,{"$raw":"00000000"},"110401","MJ.3.3627","INOP",3,"T",3.42243,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5497,5503,{"$raw":"00000000"},"110401","MJ.3.3628","INOP",3,"T",2.82144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5498,5504,{"$raw":"00000000"},"110401","MJ.3.3629","INOP",3,"T",25.04836,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5499,5505,{"$raw":"00000000"},"110401","MJ.3.3630","INOP",3,"T",16.86099,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5500,5506,{"$raw":"00000000"},"110401","MJ.3.3631","INOP",3,"T",22.23113,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5501,5507,{"$raw":"00000000"},"110401","MJ.3.3632","INOP",3,"T",5.63707,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5502,5508,{"$raw":"00000000"},"110401","MJ.3.3633","INOP",3,"T",19.33765,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5503,5509,{"$raw":"00000000"},"110401","MJ.3.3634","INOP",3,"T",2.93384,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5504,5510,{"$raw":"00000000"},"110401","MJ.1.122","OPER",1,"A",2.07060,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5505,5511,{"$raw":"00000000"},"110401","MJ.3.3635","INOP",3,"T",15.77413,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5506,5512,{"$raw":"00000000"},"110401","MJ.3.3636","INOP",3,"T",70.36668,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5507,5513,{"$raw":"00000000"},"110401","MJ.3.3637","INOP",3,"T",15.21352,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5508,5514,{"$raw":"00000000"},"110401","MJ.3.3638","INOP",3,"T",49.00067,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5509,5515,{"$raw":"00000000"},"110401","MJ.3.3639","INOP",3,"T",11.49900,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5510,5516,{"$raw":"00000000"},"110401","MJ.3.3640","INOP",3,"T",13.35271,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5511,5517,{"$raw":"00000000"},"110401","MJ.3.3641","INOP",3,"T",14.48652,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5512,5518,{"$raw":"00000000"},"110401","MJ.1.123","OPER",1,"A",1.99642,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5513,5519,{"$raw":"00000000"},"110401","MJ.3.3642","INOP",3,"T",0.54148,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5514,5520,{"$raw":"00000000"},"110401","MJ.3.3643","INOP",3,"T",70.87338,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5515,5521,{"$raw":"00000000"},"110401","MJ.3.3644","INOP",3,"T",24.41950,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5516,5522,{"$raw":"00000000"},"110401","MJ.3.3645","INOP",3,"T",7.19744,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5517,5523,{"$raw":"00000000"},"110401","MJ.3.3646","INOP",3,"T",3.24164,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5518,5524,{"$raw":"00000000"},"110401","MJ.3.3647","INOP",3,"T",263.85480,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5519,5525,{"$raw":"00000000"},"110401","MJ.3.3648","INOP",3,"T",96.04000,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5520,5526,{"$raw":"00000000"},"110401","MJ.3.3649","INOP",3,"A",3.59201,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5521,5527,{"$raw":"00000000"},"110401","MJ.3.3650","INOP",3,"T",4.03194,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5522,5528,{"$raw":"00000000"},"110401","MJ.3.3651","INOP",3,"T",59.98955,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5523,5529,{"$raw":"00000000"},"110401","MJ.3.3652","INOP",3,"T",305.42044,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5524,5530,{"$raw":"00000000"},"110401","MJ.3.3653","INOP",3,"T",67.54123,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5525,5531,{"$raw":"00000000"},"110401","MJ.3.3654","INOP",3,"T",3.22889,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5526,5532,{"$raw":"00000000"},"110401","MJ.3.3655","INOP",3,"T",6.92272,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5527,5533,{"$raw":"00000000"},"110401","MJ.3.3656","INOP",3,"T",80.26036,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5528,5534,{"$raw":"00000000"},"110401","MJ.3.3657","INOP",3,"T",30.67329,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5529,5535,{"$raw":"00000000"},"110401","MJ.3.3658","INOP",3,"T",125.68207,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5530,5536,{"$raw":"00000000"},"110401","MJ.3.3659","INOP",3,"T",3.05138,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5531,5537,{"$raw":"00000000"},"110401","MJ.3.3660","INOP",3,"T",172.46165,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5532,5538,{"$raw":"00000000"},"110401","MJ.3.3661","INOP",3,"T",192.50685,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5533,5539,{"$raw":"00000000"},"110401","MJ.3.3662","INOP",3,"T",207.94918,3.00000,"ESI","ESI","ESI","ESI","MAN",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5534,5540,{"$raw":"00000000"},"110401","MJ.3.3663","INOP",3,"T",10.64202,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5535,5541,{"$raw":"00000000"},"110401","MJ.3.3664","INOP",3,"T",11.05832,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5536,5542,{"$raw":"00000000"},"110401","MJ.3.3665","INOP",3,"T",26.39164,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5537,5543,{"$raw":"00000000"},"110401","MJ.3.3666","INOP",3,"T",377.66211,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5538,5544,{"$raw":"00000000"},"110401","MJ.3.3667","INOP",3,"T",272.44581,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5539,5545,{"$raw":"00000000"},"110401","MJ.3.3668","INOP",3,"T",1.10802,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5540,5546,{"$raw":"00000000"},"110401","MJ.3.3669","INOP",3,"T",138.54750,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5541,5547,{"$raw":"00000000"},"110401","MJ.3.3670","INOP",3,"T",7.16780,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5542,5548,{"$raw":"00000000"},"110401","MJ.1.124","OPER",1,"A",3.06193,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5543,5549,{"$raw":"00000000"},"110401","MJ.3.3671","INOP",3,"T",14.42285,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5544,5550,{"$raw":"00000000"},"110401","MJ.3.3672","INOP",3,"T",214.64786,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5545,5551,{"$raw":"00000000"},"110401","MJ.3.3673","INOP",3,"T",445.14534,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","S PEDRO",null,null,"BR",null,"110409",1,null,"BR S PEDRO",5546,5552,{"$raw":"00000000"},"110409","BR S PEDRO","OPER",1,"A",97.13664,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",5547,5553,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",54.18019,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE VALE SOBREIRO",null,"24 set 2002","R",null,"110408",1,null,"R DE VALE SOBREIRO",5548,5554,{"$raw":"00000000"},"110408","R DE VALE SOBREIRO","INOP",3,"T",275.56997,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5549,5555,{"$raw":"00000000"},"110401","MJ.3.3674","INOP",3,"T",108.32482,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5550,5556,{"$raw":"00000000"},"110401","MJ.3.3675","INOP",3,"T",8.33401,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5551,5557,{"$raw":"00000000"},"110401","MJ.3.3676","INOP",3,"T",2.79866,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5552,5558,{"$raw":"00000000"},"110401","MJ.3.3677","INOP",3,"T",262.24755,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5553,5559,{"$raw":"00000000"},"110401","MJ.3.3678","INOP",3,"T",2.96493,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,5554,5560,{"$raw":"00000000"},"110407","MJ.2.266","OPER",2,"A",2.78684,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5555,5561,{"$raw":"00000000"},"110401","MJ.3.3679","INOP",3,"T",22.78314,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5556,5562,{"$raw":"00000000"},"110401","MJ.3.3680","INOP",3,"T",368.01185,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5557,5563,{"$raw":"00000000"},"110401","MJ.3.3681","INOP",3,"T",155.61948,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5558,5564,{"$raw":"00000000"},"110401","MJ.3.3682","INOP",3,"T",146.11601,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5559,5565,{"$raw":"00000000"},"110401","MJ.3.3683","INOP",3,"T",11.43990,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5560,5566,{"$raw":"00000000"},"110401","MJ.3.3684","INOP",3,"T",5.66039,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5561,5567,{"$raw":"00000000"},"110401","MJ.3.3685","INOP",3,"T",33.68605,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5562,5568,{"$raw":"00000000"},"110401","MJ.3.3686","INOP",3,"T",26.74050,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5563,5569,{"$raw":"00000000"},"110401","MJ.3.3687","INOP",3,"T",26.18709,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5564,5570,{"$raw":"00000000"},"110401","MJ.3.3688","INOP",3,"T",95.94405,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5565,5571,{"$raw":"00000000"},"110401","MJ.3.3689","INOP",3,"T",334.48636,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5566,5572,{"$raw":"00000000"},"110401","MJ.3.3690","INOP",3,"T",353.98055,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5567,5573,{"$raw":"00000000"},"110401","MJ.3.3691","INOP",3,"T",90.30397,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5568,5574,{"$raw":"00000000"},"110401","MJ.3.3692","INOP",3,"T",152.08408,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5569,5575,{"$raw":"00000000"},"110401","MJ.3.3693","INOP",3,"T",90.57418,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5570,5576,{"$raw":"00000000"},"110401","MJ.2.267","OPER",2,"A",2.44573,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5571,5577,{"$raw":"00000000"},"110401","MJ.3.3694","INOP",3,"T",106.14681,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5572,5578,{"$raw":"00000000"},"110401","MJ.3.3695","INOP",3,"T",2.74855,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5573,5579,{"$raw":"00000000"},"110401","MJ.3.3696","INOP",3,"T",117.89733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5574,5580,{"$raw":"00000000"},"110401","MJ.1.125","OPER",1,"A",2.68263,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5575,5581,{"$raw":"00000000"},"110401","MJ.1.126","OPER",1,"A",2.82899,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5576,5582,{"$raw":"00000000"},"110401","MJ.3.3697","INOP",3,"T",17.08574,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5577,5583,{"$raw":"00000000"},"110401","MJ.3.3698","INOP",3,"A",2.25211,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5578,5584,{"$raw":"00000000"},"110401","MJ.3.3699","INOP",3,"T",66.78069,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5579,5585,{"$raw":"00000000"},"110401","MJ.3.3700","INOP",3,"T",216.70264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5580,5586,{"$raw":"00000000"},"110401","MJ.3.3701","INOP",3,"T",299.75779,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5581,5587,{"$raw":"00000000"},"110404","MJ.3.3702","INOP",3,"T",3.12909,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5582,5588,{"$raw":"00000000"},"110401","MJ.3.3703","INOP",3,"T",284.53562,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5583,5589,{"$raw":"00000000"},"110401","MJ.3.3704","INOP",3,"T",248.54123,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,5584,5590,{"$raw":"00000000"},"110401","MJ.3.3705","INOP",3,"T",165.53023,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5585,5591,{"$raw":"00000000"},"110401","MJ.3.3706","INOP",3,"T",22.77588,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5586,5592,{"$raw":"00000000"},"110401","MJ.3.3707","INOP",3,"T",2.23289,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5587,5593,{"$raw":"00000000"},"110401","MJ.3.3708","INOP",3,"T",96.64912,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5588,5594,{"$raw":"00000000"},"110401","MJ.3.3709","INOP",3,"T",77.15441,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5589,5595,{"$raw":"00000000"},"110401","MJ.3.3710","INOP",3,"T",150.55978,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5590,5596,{"$raw":"00000000"},"110401","MJ.3.3711","INOP",3,"A",224.81642,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5591,5597,{"$raw":"00000000"},"110401","MJ.3.3712","INOP",3,"T",2.07466,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5592,5598,{"$raw":"00000000"},"110401","MJ.3.3713","INOP",3,"T",212.37159,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5593,5599,{"$raw":"00000000"},"110401","MJ.3.3714","INOP",3,"T",1.98698,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5594,5600,{"$raw":"00000000"},"110401","MJ.3.3715","INOP",3,"T",218.84656,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5595,5601,{"$raw":"00000000"},"110401","MJ.2.268","OPER",2,"A",2.37933,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5596,5602,{"$raw":"00000000"},"110401","MJ.3.3716","INOP",3,"T",4.55040,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5597,5603,{"$raw":"00000000"},"110401","MJ.3.3717","INOP",3,"T",2.41050,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5598,5604,{"$raw":"00000000"},"110404","MJ.3.3718","INOP",3,"T",2.28090,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5599,5605,{"$raw":"00000000"},"110404","MJ.3.3719","INOP",3,"T",136.02482,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5600,5606,{"$raw":"00000000"},"110404","MJ.3.3720","INOP",3,"T",3.34083,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5601,5607,{"$raw":"00000000"},"110404","MJ.3.3721","INOP",3,"T",2.67402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",2,null,null,5602,5608,{"$raw":"00000000"},"110404","MJ.3.3722","INOP",3,"T",48.64690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5603,5609,{"$raw":"00000000"},"110404","MJ.3.3723","INOP",3,"T",34.28854,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5604,5610,{"$raw":"00000000"},"110404","MJ.3.3724","INOP",3,"T",9.31355,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5605,5611,{"$raw":"00000000"},"110404","MJ.1.127","OPER",1,"A",2.31400,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5606,5612,{"$raw":"00000000"},"110404","MJ.3.3725","INOP",3,"T",104.15138,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5607,5613,{"$raw":"00000000"},"110404","MJ.3.3726","INOP",3,"T",2.81258,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5608,5614,{"$raw":"00000000"},"110404","MJ.1.128","OPER",1,"A",2.49612,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5609,5615,{"$raw":"00000000"},"110404","MJ.3.3727","INOP",3,"T",43.74261,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5610,5616,{"$raw":"00000000"},"110404","MJ.3.3728","INOP",3,"T",2.08240,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5611,5617,{"$raw":"00000000"},"110404","MJ.3.3729","INOP",3,"T",105.55496,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5612,5618,{"$raw":"00000000"},"110404","MJ.3.3730","INOP",3,"T",3.31887,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5613,5619,{"$raw":"00000000"},"110404","MJ.3.3731","INOP",3,"T",58.73360,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5614,5620,{"$raw":"00000000"},"110404","MJ.3.3732","INOP",3,"T",2.00340,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,5615,5621,{"$raw":"00000000"},"110407","MJ.2.269","OPER",2,"A",31.83260,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PRAÇA",null,null,"LG",null,"110402",1,null,"LG DA PRAÇA",5616,5622,{"$raw":"00000000"},"110402","LG DA PRAÇA","INOP",3,"T",9.10938,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",5617,5623,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",13.29666,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5618,5624,{"$raw":"00000000"},"110401","MJ.3.3733","INOP",3,"T",2.62840,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5619,5625,{"$raw":"00000000"},"110406","MJ.3.3734","INOP",3,"T",40.14051,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5620,5626,{"$raw":"00000000"},"110406","MJ.3.3735","INOP",3,"T",66.03770,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SÃO SILVESTRE",null,null,"CÇ",null,"110406",1,null,"CÇ SÃO SILVESTRE",5621,5627,{"$raw":"00000000"},"110406","CÇ SÃO SILVESTRE","INOP",3,"T",8.77099,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5622,5628,{"$raw":"00000000"},"110406","MJ.3.3736","INOP",3,"T",82.20656,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5623,5629,{"$raw":"00000000"},"110406","MJ.3.3737","INOP",3,"T",94.29878,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5624,5630,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,26.95942,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5625,5631,{"$raw":"00000000"},"110406","MJ.3.3738","INOP",3,"T",3.45138,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5626,5632,{"$raw":"00000000"},"110406","MJ.3.3739","INOP",3,"T",33.01887,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5627,5633,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,13.18668,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5628,5634,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,28.34096,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5629,5635,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,11.57673,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5630,5636,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.30768,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5631,5637,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,71.73883,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5632,5638,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.48725,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5633,5639,{"$raw":"00000000"},"110406","MJ.3.3740","INOP",3,"T",47.62359,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS OLIVEIRAS",null,null,"TV",null,"110406",1,null,"TV DAS OLIVEIRAS",5634,5640,{"$raw":"00000000"},"110406","TV DAS OLIVEIRAS","INOP",3,"T",60.57618,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5635,5641,{"$raw":"00000000"},"110406","MJ.3.3741","INOP",3,"T",123.08588,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5636,5642,{"$raw":"00000000"},"110406","MJ.3.3742","INOP",3,"T",2.62002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5637,5643,{"$raw":"00000000"},"110406","MJ.2.270","OPER",2,"A",2.41305,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5638,5644,{"$raw":"00000000"},"110406","MJ.3.3743","INOP",3,"T",24.23255,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5639,5645,{"$raw":"00000000"},"110406","MJ.3.3744","INOP",3,"T",2.76248,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5640,5646,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,117.13821,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5641,5647,{"$raw":"00000000"},"110406","MJ.3.3745","INOP",3,"T",2.27200,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5642,5648,{"$raw":"00000000"},"110406","MJ.3.3746","INOP",3,"T",2.82526,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5643,5649,{"$raw":"00000000"},"110406","MJ.3.3747","INOP",3,"T",2.91496,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5644,5650,{"$raw":"00000000"},"110406","MJ.3.3748","INOP",3,"T",117.64447,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5645,5651,{"$raw":"00000000"},"110406","MJ.3.3749","INOP",3,"T",5.07861,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5646,5652,{"$raw":"00000000"},"110406","MJ.3.3750","INOP",3,"T",60.61280,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5647,5653,{"$raw":"00000000"},"110406","MJ.2.271","OPER",2,"A",2.77995,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5648,5654,{"$raw":"00000000"},"110406","MJ.3.3751","INOP",3,"T",27.49651,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","dos Chãos",null,null,null,null,null,"110406",1,null,null,5649,5655,{"$raw":"00000000"},"110406","MJ.3.3752","INOP",3,"T",154.31514,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5650,5656,{"$raw":"00000000"},"110406","MJ.2.272","OPER",2,"A",2.57420,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5651,5657,{"$raw":"00000000"},"110406","MJ.3.3753","INOP",3,"T",63.49935,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5652,5658,{"$raw":"00000000"},"110406","MJ.2.273","OPER",2,"A",7.31152,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARRIL",null,null,"R",null,"110406",1,null,"R DO CARRIL",5653,5659,{"$raw":"00000000"},"110406","R DO CARRIL","INOP",3,"T",64.07408,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ZAVIAL",null,null,"R",null,"110406",1,null,"R DO ZAVIAL",5654,5660,{"$raw":"00000000"},"110406","R DO ZAVIAL","INOP",3,"T",56.35215,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5655,5661,{"$raw":"00000000"},"110406","MJ.3.3754","INOP",3,"T",1.96400,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R",null,null,null,null,null,null,"110406",1,null,null,5656,5662,{"$raw":"00000000"},"110406","MJ.3.3755","INOP",3,"T",181.94697,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5657,5663,{"$raw":"00000000"},"110406","MJ.3.3756","INOP",3,"T",107.54391,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5658,5664,{"$raw":"00000000"},"110406","MJ.3.3757","INOP",3,"T",2.13974,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5659,5665,{"$raw":"00000000"},"110406","MJ.3.3758","INOP",3,"T",66.92413,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5660,5666,{"$raw":"00000000"},"110406","MJ.2.274","OPER",2,"A",2.37697,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5661,5667,{"$raw":"00000000"},"110406","MJ.3.3759","INOP",3,"T",2.20719,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5662,5668,{"$raw":"00000000"},"110406","MJ.3.3760","INOP",3,"T",55.02979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5663,5669,{"$raw":"00000000"},"110406","MJ.3.3761","INOP",3,"T",1.97990,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5664,5670,{"$raw":"00000000"},"110404","MJ.3.3762","INOP",3,"T",42.17433,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5665,5671,{"$raw":"00000000"},"110404","MJ.3.3763","INOP",3,"T",2.14895,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5667,5673,{"$raw":"00000000"},"110404","MJ.3.3764","INOP",3,"T",2.19313,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5668,5674,{"$raw":"00000000"},"110406","MJ.3.3765","INOP",3,"T",2.17954,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5669,5675,{"$raw":"00000000"},"110406","MJ.2.276","OPER",2,"A",2.29804,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5670,5676,{"$raw":"00000000"},"110404","MJ.3.3766","INOP",3,"T",66.71151,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",5671,5677,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","INOP",3,"T",19.03897,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",5672,5678,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","OPER",2,"A",206.84298,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110401",1,null,"R DO OUTEIRO",5673,5679,{"$raw":"00000000"},"110401","R DO OUTEIRO","OPER",2,"A",44.39996,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PINHEIRO",null,null,"TV",null,"110404",1,null,"TV DO PINHEIRO",5674,5680,{"$raw":"00000000"},"110404","TV DO PINHEIRO","OPER",1,"A",66.18553,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,5675,5681,{"$raw":"00000000"},"110405","MJ.2.277","OPER",2,"A",22.32119,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",5676,5682,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",45.34036,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSEFA DA SILVA",null,null,"R",null,"110405",1,null,"R JOSEFA DA SILVA",5677,5683,{"$raw":"00000000"},"110405","R JOSEFA DA SILVA","INOP",3,"T",13.57364,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSEFA DA SILVA",null,null,"R",null,"110405",1,null,"R JOSEFA DA SILVA",5678,5684,{"$raw":"00000000"},"110405","R JOSEFA DA SILVA","OPER",2,"A",138.49036,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO NOVO",null,null,"R",null,"110410",1,null,"R DO POÇO NOVO",5679,5685,{"$raw":"00000000"},"110410","R DO POÇO NOVO","INOP",3,"T",22.35620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,5680,5686,{"$raw":"00000000"},"110410","MJ.3.3767","INOP",3,"A",24.52255,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5681,5687,{"$raw":"00000000"},"110407","MJ.3.3768","INOP",3,"T",59.66155,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5682,5688,{"$raw":"00000000"},"110407","MJ.3.3769","INOP",3,"T",58.26025,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5683,5689,{"$raw":"00000000"},"110407","MJ.3.3770","INOP",3,"T",2.51629,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5684,5690,{"$raw":"00000000"},"110407","MJ.3.3771","INOP",3,"T",1.93331,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5685,5691,{"$raw":"00000000"},"110407","MJ.1.129","OPER",1,"A",1.94201,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5686,5692,{"$raw":"00000000"},"110407","MJ.3.3772","INOP",3,"T",46.64277,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5687,5693,{"$raw":"00000000"},"110407","MJ.2.278","OPER",2,"A",2.38101,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5688,5694,{"$raw":"00000000"},"110407","MJ.3.3773","INOP",3,"T",2.14478,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5689,5695,{"$raw":"00000000"},"110407","MJ.3.3774","INOP",3,"T",0.27295,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5690,5696,{"$raw":"00000000"},"110407","MJ.3.3775","INOP",3,"T",49.43272,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Principal",null,null,null,null,null,"110407",1,null,null,5691,5697,{"$raw":"00000000"},"110407","MJ.2.279","OPER",2,"A",3.80669,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5692,5698,{"$raw":"00000000"},"110407","MJ.2.280","OPER",2,"A",2.87559,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,5693,5699,{"$raw":"00000000"},"110407","MJ.3.3776","INOP",3,"T",2.97047,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,5694,5700,{"$raw":"00000000"},"110407","MJ.3.3777","INOP",3,"T",3.69789,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5695,5701,{"$raw":"00000000"},"110404","MJ.3.3778","INOP",3,"T",115.86449,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5696,5702,{"$raw":"00000000"},"110404","MJ.3.3779","INOP",3,"T",30.96135,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5697,5703,{"$raw":"00000000"},"110404","MJ.3.3780","INOP",3,"T",12.50968,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","EN","366",null,null,null,null,null,"110404",1,null,null,5698,5704,{"$raw":"00000000"},"110404","MJ.1.130","OPER",1,"A",3.10061,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5699,5705,{"$raw":"00000000"},"110404","MJ.3.3781","INOP",3,"T",46.18989,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5700,5706,{"$raw":"00000000"},"110407","MJ.2.281","OPER",2,"A",2.36647,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5701,5707,{"$raw":"00000000"},"110407","MJ.3.3782","INOP",3,"T",39.62887,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,5702,5708,{"$raw":"00000000"},"110407","MJ.3.3783","INOP",3,"T",3.53962,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5703,5709,{"$raw":"00000000"},"110404","MJ.3.3784","INOP",3,"T",33.53111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,5704,5710,{"$raw":"00000000"},"110407","MJ.3.3785","INOP",3,"T",3.20662,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5705,5711,{"$raw":"00000000"},"110404","MJ.3.3786","INOP",3,"T",89.55539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5706,5712,{"$raw":"00000000"},"110404","MJ.3.3787","INOP",3,"T",31.74111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5707,5713,{"$raw":"00000000"},"110404","MJ.3.3788","INOP",3,"T",22.95087,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5708,5714,{"$raw":"00000000"},"110404","MJ.1.131","OPER",1,"A",33.32615,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5709,5715,{"$raw":"00000000"},"110404","MJ.1.132","OPER",1,"A",54.14484,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5710,5716,{"$raw":"00000000"},"110404","MJ.1.133","OPER",1,"A",2.46714,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5711,5717,{"$raw":"00000000"},"110404","MJ.1.134","OPER",1,"A",123.43151,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5712,5718,{"$raw":"00000000"},"110404","MJ.1.135","OPER",1,"A",2.55635,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5713,5719,{"$raw":"00000000"},"110407","MJ.3.3789","INOP",3,"T",54.13871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5714,5720,{"$raw":"00000000"},"110407","MJ.2.282","OPER",2,"A",2.55556,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5715,5721,{"$raw":"00000000"},"110404","MJ.3.3790","INOP",3,"T",93.99850,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5716,5722,{"$raw":"00000000"},"110404","MJ.3.3791","INOP",3,"T",8.49003,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5717,5723,{"$raw":"00000000"},"110404","MJ.3.3792","INOP",3,"T",118.11533,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VITORINO",null,null,"ESTR",null,"110404",1,null,"ESTR DO VITORINO",5718,5724,{"$raw":"00000000"},"110404","ESTR DO VITORINO","INOP",3,"T",34.04933,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VITORINO",null,null,"ESTR",null,"110404",1,null,"ESTR DO VITORINO",5719,5725,{"$raw":"00000000"},"110404","ESTR DO VITORINO","INOP",3,"T",30.50960,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5720,5726,{"$raw":"00000000"},"110404","MJ.3.3793","INOP",3,"T",49.96404,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5721,5727,{"$raw":"00000000"},"110406","MJ.3.3794","INOP",3,"T",6.52122,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5722,5728,{"$raw":"00000000"},"110406","MJ.3.3795","INOP",3,"T",105.18416,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5723,5729,{"$raw":"00000000"},"110406","MJ.3.3796","INOP",3,"T",12.15555,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5724,5730,{"$raw":"00000000"},"110406","MJ.3.3797","INOP",3,"T",80.23825,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5725,5731,{"$raw":"00000000"},"110406","MJ.3.3798","INOP",3,"T",88.85282,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5726,5732,{"$raw":"00000000"},"110406","MJ.1.136","OPER",1,"A",2.99152,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5727,5733,{"$raw":"00000000"},"110406","MJ.3.3799","INOP",3,"T",5.75879,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5728,5734,{"$raw":"00000000"},"110406","MJ.3.3800","INOP",3,"T",179.35443,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",5729,5735,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",126.31007,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5730,5736,{"$raw":"00000000"},"110407","MJ.3.3801","INOP",3,"T",27.07177,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",5731,5737,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",300.48437,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,5732,5738,{"$raw":"00000000"},"110406","MJ.3.3802","INOP",3,"T",43.63667,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5733,5739,{"$raw":"00000000"},"110406","MJ.3.3803","INOP",3,"T",25.71192,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5734,5740,{"$raw":"00000000"},"110406","MJ.3.3804","INOP",3,"T",46.70558,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5735,5741,{"$raw":"00000000"},"110406","MJ.2.283","OPER",2,"A",1.97649,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,5736,5742,{"$raw":"00000000"},"110406","MJ.3.3805","INOP",3,"T",80.81679,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5737,5743,{"$raw":"00000000"},"110406","MJ.3.3806","INOP",3,"T",6.45625,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5738,5744,{"$raw":"00000000"},"110406","MJ.2.284","OPER",2,"A",2.89348,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5739,5745,{"$raw":"00000000"},"110406","MJ.3.3807","INOP",3,"T",2.51794,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5740,5746,{"$raw":"00000000"},"110406","MJ.2.285","OPER",2,"A",32.45390,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5741,5747,{"$raw":"00000000"},"110406","MJ.3.3808","INOP",3,"T",25.35958,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5742,5748,{"$raw":"00000000"},"110406","MJ.2.286","OPER",2,"A",27.08558,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5743,5749,{"$raw":"00000000"},"110404","MJ.3.3809","INOP",3,"T",4.78804,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5744,5750,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.00000,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5745,5751,{"$raw":"00000000"},"110401","MJ.3.3810","INOP",3,"T",6.61819,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5746,5752,{"$raw":"00000000"},"110404","MJ.3.3811","INOP",3,"T",4.15849,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,5747,5753,{"$raw":"00000000"},"110407","MJ.3.3812","INOP",3,"T",20.27969,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5748,5754,{"$raw":"00000000"},"110407","MJ.3.3813","INOP",3,"T",125.32841,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ESCARÇÃO","SGD 9828/2010, SGD 12206/2010, proc nº 03/2011/10","29 Março 2011","ESTR",null,"110401",1,null,"Estrada do Escarção",5749,5755,{"$raw":"00000000"},"110401","Estrada do Escarção","INOP",3,"T",123.87872,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ESCARÇÃO","SGD 9828/2010, SGD 12206/2010, proc nº 03/2011/10","29 Março 2011","ESTR",null,"110404",2,null,"Estrada do Escarção",5750,5756,{"$raw":"00000000"},"110404","Estrada do Escarção","INOP",3,"T",172.49948,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,null,"R",null,"110407",1,null,"R DOS ARNEIROS",5751,5757,{"$raw":"00000000"},"110407","R DOS ARNEIROS","INOP",3,"T",139.30026,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5752,5758,{"$raw":"00000000"},"110401","MJ.3.3814","INOP",3,"T",361.05827,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5753,5759,{"$raw":"00000000"},"110401","MJ.3.3815","INOP",3,"T",180.21260,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5754,5760,{"$raw":"00000000"},"110401","MJ.3.3816","INOP",3,"T",161.34740,3.90000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5755,5761,{"$raw":"00000000"},"110401","MJ.3.3817","INOP",3,"T",573.22154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5756,5762,{"$raw":"00000000"},"110401","MJ.3.3818","INOP",3,"T",4.61577,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5757,5763,{"$raw":"00000000"},"110407","MJ.3.3819","INOP",3,"T",332.13303,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,5758,5764,{"$raw":"00000000"},"110407","MJ.3.3820","INOP",3,"T",256.82358,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,5759,5765,{"$raw":"00000000"},"110407","MJ.3.3821","INOP",3,"T",236.49538,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,5760,5766,{"$raw":"00000000"},"110407","MJ.3.3822","INOP",3,"T",247.16537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5761,5767,{"$raw":"00000000"},"110407","MJ.3.3823","INOP",3,"T",289.96789,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5762,5768,{"$raw":"00000000"},"110407","MJ.3.3824","INOP",3,"T",362.38926,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5763,5769,{"$raw":"00000000"},"110407","MJ.3.3825","INOP",3,"T",313.27023,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5764,5770,{"$raw":"00000000"},"110407","MJ.3.3826","INOP",3,"T",248.10541,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5765,5771,{"$raw":"00000000"},"110407","MJ.3.3827","INOP",3,"T",168.65184,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5766,5772,{"$raw":"00000000"},"110407","MJ.3.3828","INOP",3,"T",203.02840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5767,5773,{"$raw":"00000000"},"110407","MJ.3.3829","INOP",3,"T",282.87337,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5768,5774,{"$raw":"00000000"},"110407","MJ.3.3830","INOP",3,"T",231.43451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5769,5775,{"$raw":"00000000"},"110407","MJ.3.3831","INOP",3,"T",173.33039,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5770,5776,{"$raw":"00000000"},"110407","MJ.3.3832","INOP",3,"T",179.90557,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5771,5777,{"$raw":"00000000"},"110404","MJ.3.3833","INOP",3,"T",222.56537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5772,5778,{"$raw":"00000000"},"110404","MJ.3.3834","INOP",3,"T",257.53959,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5773,5779,{"$raw":"00000000"},"110407","MJ.3.3835","INOP",3,"T",508.42517,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5774,5780,{"$raw":"00000000"},"110407","MJ.3.3836","INOP",3,"T",159.98836,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5775,5781,{"$raw":"00000000"},"110407","MJ.3.3837","INOP",3,"T",251.62700,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","SD",null,null,null,null,null,null,"110407",1,null,null,5776,5782,{"$raw":"00000000"},"110407","MJ.3.3838","INOP",3,"T",300.14965,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5777,5783,{"$raw":"00000000"},"110404","MJ.3.3839","INOP",3,"T",216.11538,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5778,5784,{"$raw":"00000000"},"110404","MJ.3.3840","INOP",3,"T",213.30983,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5779,5785,{"$raw":"00000000"},"110404","MJ.3.3841","INOP",3,"T",227.43809,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",1,null,null,5780,5786,{"$raw":"00000000"},"110404","MJ.3.3842","INOP",3,"T",259.74928,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5784,5790,{"$raw":"00000000"},"110404","MJ.3.3846","INOP",3,"T",260.98809,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5785,5791,{"$raw":"00000000"},"110404","MJ.3.3847","INOP",3,"T",342.61544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5786,5792,{"$raw":"00000000"},"110406","MJ.3.3848","INOP",3,"T",164.74124,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5787,5793,{"$raw":"00000000"},"110406","MJ.3.3849","INOP",3,"T",195.11512,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5788,5794,{"$raw":"00000000"},"110406","MJ.3.3850","INOP",3,"T",236.27600,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5789,5795,{"$raw":"00000000"},"110406","MJ.3.3851","INOP",3,"T",405.71551,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5790,5796,{"$raw":"00000000"},"110406","MJ.3.3852","INOP",3,"T",531.20678,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CIPRIANO INÁCIO",null,null,"R",null,"110406",1,null,"R CIPRIANO INÁCIO",5791,5797,{"$raw":"00000000"},"110406","R CIPRIANO INÁCIO","INOP",3,"T",67.42503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COQUEIRA",null,null,"CSL",null,"110404",1,null,"CSL COQUEIRA",5792,5798,{"$raw":"00000000"},"110404","CSL COQUEIRA","INOP",3,"T",146.94946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TORRE",null,null,"ESTR",null,"110401",1,null,"ESTR DA TORRE",5793,5799,{"$raw":"00000000"},"110401","ESTR DA TORRE","INOP",3,"T",122.93090,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COQUEIRA",null,null,"CSL",null,"110404",1,null,"CSL COQUEIRA",5794,5800,{"$raw":"00000000"},"110404","CSL COQUEIRA","INOP",3,"T",91.90915,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ELECTRICIDADE",null,null,"R",null,"110407",1,null,"R DA ELECTRICIDADE",5795,5801,{"$raw":"00000000"},"110407","R DA ELECTRICIDADE","OPER",1,"A",34.17569,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","615","4 DE SETEMBRO",null,null,"R",null,"110406",1,null,"R 4 DE SETEMBRO",5796,5802,{"$raw":"00000000"},"110406","R 4 DE SETEMBRO","OPER",2,"A",185.01420,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ROSAS",null,null,"BC",null,"110406",1,null,"BC DAS ROSAS",5797,5803,{"$raw":"00000000"},"110406","BC DAS ROSAS","INOP",3,"T",80.50502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5798,5804,{"$raw":"00000000"},"110406","MJ.3.3853","INOP",3,"T",271.62874,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5799,5805,{"$raw":"00000000"},"110406","MJ.3.3854","INOP",3,"T",225.79113,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5800,5806,{"$raw":"00000000"},"110406","MJ.3.3855","INOP",3,"T",249.45930,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5801,5807,{"$raw":"00000000"},"110406","MJ.3.3856","INOP",3,"T",242.00510,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5802,5808,{"$raw":"00000000"},"110406","MJ.3.3857","INOP",3,"T",291.40699,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5803,5809,{"$raw":"00000000"},"110406","MJ.3.3858","INOP",3,"T",211.37448,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5804,5810,{"$raw":"00000000"},"110406","MJ.3.3859","INOP",3,"T",372.26271,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5805,5811,{"$raw":"00000000"},"110406","MJ.3.3860","INOP",3,"T",286.08599,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5806,5812,{"$raw":"00000000"},"110406","MJ.3.3861","INOP",3,"T",305.85524,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5807,5813,{"$raw":"00000000"},"110406","MJ.3.3862","INOP",3,"T",291.39000,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5808,5814,{"$raw":"00000000"},"110406","MJ.3.3863","INOP",3,"T",138.02599,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5809,5815,{"$raw":"00000000"},"110406","MJ.3.3864","INOP",3,"T",203.62872,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5810,5816,{"$raw":"00000000"},"110406","MJ.3.3865","INOP",3,"T",67.16321,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,5811,5817,{"$raw":"00000000"},"110406","MJ.3.3866","INOP",3,"T",335.56634,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110404",2,null,null,5812,5818,{"$raw":"00000000"},"110404","MJ.3.3867","INOP",3,"T",232.10870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5813,5819,{"$raw":"00000000"},"110404","MJ.3.3868","INOP",3,"T",239.36410,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5814,5820,{"$raw":"00000000"},"110404","MJ.3.3869","INOP",3,"T",215.84688,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BIQUEIRINHA","processo nº 04/2012/22","15 janeiro 2013","ESTR",null,"110404",1,null,"ESTRADA DA BIQUEIRINHA",5815,5821,{"$raw":"00000000"},"110404","MJ.3.3870","INOP",3,"T",332.26949,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5816,5822,{"$raw":"00000000"},"110404","MJ.3.3871","INOP",3,"T",415.43016,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5817,5823,{"$raw":"00000000"},"110401","MJ.3.3872","INOP",3,"T",277.45968,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5818,5824,{"$raw":"00000000"},"110401","MJ.3.3873","INOP",3,"T",322.87397,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5819,5825,{"$raw":"00000000"},"110401","MJ.3.3874","INOP",3,"T",278.42637,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5820,5826,{"$raw":"00000000"},"110401","MJ.3.3875","INOP",3,"T",190.16975,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5821,5827,{"$raw":"00000000"},"110401","MJ.3.3876","INOP",3,"T",284.77179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5822,5828,{"$raw":"00000000"},"110401","MJ.3.3877","INOP",3,"T",402.79857,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5823,5829,{"$raw":"00000000"},"110401","MJ.3.3878","INOP",3,"T",523.27165,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5824,5830,{"$raw":"00000000"},"110401","MJ.3.3879","INOP",3,"T",300.64517,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5825,5831,{"$raw":"00000000"},"110401","MJ.3.3880","INOP",3,"T",307.09092,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5826,5832,{"$raw":"00000000"},"110401","MJ.3.3881","INOP",3,"T",336.84486,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5827,5833,{"$raw":"00000000"},"110401","MJ.3.3882","INOP",3,"T",331.41907,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5828,5834,{"$raw":"00000000"},"110401","MJ.3.3883","INOP",3,"T",204.88010,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5829,5835,{"$raw":"00000000"},"110404","MJ.3.3884","INOP",3,"T",245.30267,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5830,5836,{"$raw":"00000000"},"110404","MJ.3.3885","INOP",3,"T",241.75282,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTO ANTÓNIO",null,null,"CÇ",null,"110406",1,null,"CÇ SANTO ANTÓNIO",5831,5837,{"$raw":"00000000"},"110406","CÇ SANTO ANTÓNIO","INOP",3,"T",262.18544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,5832,5838,{"$raw":"00000000"},"110406","MJ.3.3886","INOP",3,"T",443.52615,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5833,5839,{"$raw":"00000000"},"110406","MJ.3.3887","INOP",3,"T",260.26712,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5834,5840,{"$raw":"00000000"},"110401","MJ.3.3888","INOP",3,"T",528.49321,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5835,5841,{"$raw":"00000000"},"110401","MJ.3.3889","INOP",3,"T",482.55835,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5836,5842,{"$raw":"00000000"},"110401","MJ.3.3890","INOP",3,"T",554.37795,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5837,5843,{"$raw":"00000000"},"110401","MJ.3.3891","INOP",3,"T",549.21787,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5838,5844,{"$raw":"00000000"},"110401","MJ.3.3892","INOP",3,"T",647.43325,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5839,5845,{"$raw":"00000000"},"110401","MJ.3.3893","INOP",3,"T",501.42453,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5840,5846,{"$raw":"00000000"},"110401","MJ.3.3894","INOP",3,"T",530.90084,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5841,5847,{"$raw":"00000000"},"110401","MJ.3.3895","INOP",3,"T",517.15065,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5842,5848,{"$raw":"00000000"},"110401","MJ.3.3896","INOP",3,"T",575.64271,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5843,5849,{"$raw":"00000000"},"110401","MJ.3.3897","INOP",3,"T",548.85886,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5844,5850,{"$raw":"00000000"},"110401","MJ.3.3898","INOP",3,"T",186.75712,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5845,5851,{"$raw":"00000000"},"110401","MJ.3.3899","INOP",3,"T",364.66085,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5846,5852,{"$raw":"00000000"},"110407","MJ.3.3900","INOP",3,"T",205.69898,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5847,5853,{"$raw":"00000000"},"110407","MJ.3.3901","INOP",3,"T",185.23294,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,5848,5854,{"$raw":"00000000"},"110407","MJ.3.3902","INOP",3,"T",199.73587,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5849,5855,{"$raw":"00000000"},"110407","MJ.3.3903","INOP",3,"T",171.30382,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5850,5856,{"$raw":"00000000"},"110407","MJ.3.3904","INOP",3,"T",231.86310,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5851,5857,{"$raw":"00000000"},"110401","MJ.3.3905","INOP",3,"T",38.19572,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5852,5858,{"$raw":"00000000"},"110401","MJ.3.3906","INOP",3,"T",8.79965,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5853,5859,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.34883,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","1032",null,null,"CM",null,"110407",1,null,"CM 1032",5854,5860,{"$raw":"00000000"},"110407","CM 1032","OPER",2,"A",276.97269,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VELHA",null,null,"R",null,"110401",1,null,"R VELHA",5855,5861,{"$raw":"00000000"},"110401","R VELHA","INOP",3,"T",41.50499,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5856,5862,{"$raw":"00000000"},"110401","MJ.3.3907","INOP",3,"T",2.96279,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LAMEIRÃO",null,null,"TV",null,"110404",1,null,"TV DO LAMEIRÃO",5857,5863,{"$raw":"00000000"},"110404","TV DO LAMEIRÃO","INOP",3,"T",305.52499,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO FUNILEIRO",null,null,"BC",null,"110406",1,null,"BC DO FUNILEIRO",5858,5864,{"$raw":"00000000"},"110406","BC DO FUNILEIRO","INOP",3,"T",164.78866,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CAETANOS",null,null,"TV",null,"110404",1,null,"TV DOS CAETANOS",5859,5865,{"$raw":"00000000"},"110404","TV DOS CAETANOS","OPER",1,"A",151.44238,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5860,5866,{"$raw":"00000000"},"110407","MJ.2.287","OPER",2,"A",3.66871,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CORUJEIRA",null,null,"R",null,"110401",1,null,"R DA CORUJEIRA",5861,5867,{"$raw":"00000000"},"110401","R DA CORUJEIRA","INOP",3,"T",2.37008,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5862,5868,{"$raw":"00000000"},"110406","MJ.2.288","OPER",2,"A",2.77996,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5863,5869,{"$raw":"00000000"},"110406","MJ.3.3908","INOP",3,"T",8.40267,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"EST DAS PEDREIRAS",null,null,null,null,"110406",1,null,null,5864,5870,{"$raw":"00000000"},"110406","MJ.3.3909","INOP",3,"T",64.33742,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5865,5871,{"$raw":"00000000"},"110407","MJ.3.3910","INOP",3,"T",64.04143,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5866,5872,{"$raw":"00000000"},"110407","MJ.3.3911","INOP",3,"T",67.28233,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5867,5873,{"$raw":"00000000"},"110407","MJ.3.3912","INOP",3,"T",74.74218,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5868,5874,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,70.85107,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5869,5875,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.76910,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VELHA",null,null,"R",null,"110401",1,null,"R VELHA",5870,5876,{"$raw":"00000000"},"110401","R VELHA","OPER",1,"A",54.26111,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VELHA",null,null,"R",null,"110401",1,null,"R VELHA",5871,5877,{"$raw":"00000000"},"110401","R VELHA","INOP",3,"T",78.80415,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110404",1,null,"EM 568",5872,5878,{"$raw":"00000000"},"110404","EM 568","OPER",2,"A",164.22034,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5873,5879,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,65.16064,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5874,5880,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,86.01408,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","615","DR ANTÓNIO JOSÉ DE ALMEIDA E SILVA",null,null,"R",null,"110406",1,null,"R DR ANTÓNIO JOSÉ DE ALMEIDA E SILVA",5875,5881,{"$raw":"00000000"},"110406","R DR ANTÓNIO JOSÉ DE ALMEIDA E SILVA","OPER",2,"A",33.96641,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5877,5883,{"$raw":"00000000"},"110404","MJ.3.3914","INOP",3,"T",181.49250,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",2,null,null,5878,5884,{"$raw":"00000000"},"110404","MJ.3.3915","INOP",3,"T",207.25436,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5879,5885,{"$raw":"00000000"},"110404","MJ.3.3916","INOP",3,"T",229.41629,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5880,5886,{"$raw":"00000000"},"110404","MJ.3.3917","INOP",3,"T",249.96985,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5881,5887,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,47.61634,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","615","DR ANTÓNIO JOSÉ DE ALMEIDA E SILVA",null,null,"R",null,"110406",1,null,"R DR ANTÓNIO JOSÉ DE ALMEIDA E SILVA",5882,5888,{"$raw":"00000000"},"110406","R DR ANTÓNIO JOSÉ DE ALMEIDA E SILVA","OPER",2,"A",30.24852,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5883,5889,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,35.15980,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5884,5890,{"$raw":"00000000"},"110401","MJ.3.3918","INOP",3,"T",81.94785,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110401",1,null,"R DO OUTEIRO",5885,5891,{"$raw":"00000000"},"110401","R DO OUTEIRO","OPER",2,"A",381.09888,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CIDRAL",null,null,"ESTR",null,"110401",1,null,"ESTR DO CIDRAL",5886,5892,{"$raw":"00000000"},"110401","ESTR DO CIDRAL","OPER",1,"A",317.82315,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5887,5893,{"$raw":"00000000"},"110406","MJ.3.3919","INOP",3,"T",104.15690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110401",1,null,"R DO OUTEIRO",5888,5894,{"$raw":"00000000"},"110401","R DO OUTEIRO","OPER",2,"A",137.85791,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CIDRAL",null,null,"ESTR",null,"110401",1,null,"ESTR DO CIDRAL",5889,5895,{"$raw":"00000000"},"110401","ESTR DO CIDRAL","OPER",1,"A",136.05717,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",2,null,null,5890,5896,{"$raw":"00000000"},"110401","MJ.3.3920","INOP",3,"T",157.54044,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,5891,5897,{"$raw":"00000000"},"110404","MJ.3.3921","INOP",3,"T",322.01707,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","da Milhã",null,null,null,null,null,"110406",1,null,null,5892,5898,{"$raw":"00000000"},"110406","MJ.3.3922","INOP",3,"T",162.19402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1025","1025",null,null,"CM",null,"110406",1,null,"CM 1025",5893,5899,{"$raw":"00000000"},"110406","CM 1025","OPER",2,"A",204.39709,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CHÃES",null,null,"CSL",null,"110406",1,null,"CSL DOS CHÃES",5894,5900,{"$raw":"00000000"},"110406","CSL DOS CHÃES","INOP",3,"T",109.56967,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5895,5901,{"$raw":"00000000"},"110407","MJ.3.3923","INOP",3,"T",75.38649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS AZEVEDOS",null,"14/06/2005","BC",null,"110410",1,null,"BC DOS AZEVEDOS",5896,5902,{"$raw":"00000000"},"110410","BC DOS AZEVEDOS","INOP",3,"T",17.08477,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CASA QUEIMADA",null,null,"R",null,"110407",1,null,"R DA CASA QUEIMADA",5897,5903,{"$raw":"00000000"},"110407","R DA CASA QUEIMADA","INOP",3,"T",160.09225,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CRUZEIRO",null,null,"R",null,"110407",1,null,"R DO CRUZEIRO",5898,5904,{"$raw":"00000000"},"110407","R DO CRUZEIRO","INOP",3,"T",19.43138,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CRUZEIRO",null,null,"R",null,"110407",1,null,"R DO CRUZEIRO",5899,5905,{"$raw":"00000000"},"110407","R DO CRUZEIRO","INOP",3,"T",18.75966,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE TRAVESSO",null,null,"R",null,"110401",1,null,"R VALE TRAVESSO",5900,5906,{"$raw":"00000000"},"110401","R VALE TRAVESSO","INOP",3,"T",358.15430,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL NICOLAU",null,null,"R",null,"110404",1,null,"R CASAL NICOLAU",5901,5907,{"$raw":"00000000"},"110404","R CASAL NICOLAU","OPER",1,"A",307.40264,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"POR DO SOL",null,"01/06/2004","TV",null,"110401",1,null,"TV POR DO SOL",5902,5908,{"$raw":"00000000"},"110401","TV POR DO SOL","OPER",2,"A",324.52852,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",5903,5909,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",387.22721,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PALMEIRA",null,null,"R",null,"110404",1,null,"R DA PALMEIRA",5904,5910,{"$raw":"00000000"},"110404","R DA PALMEIRA","INOP",3,"T",502.46828,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CASA QUEIMADA",null,null,"R",null,"110407",1,null,"R DA CASA QUEIMADA",5905,5911,{"$raw":"00000000"},"110407","R DA CASA QUEIMADA","INOP",3,"T",140.40154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,null,"R",null,"110410",1,null,"R DA CAPELA",5906,5912,{"$raw":"00000000"},"110410","R DA CAPELA","OPER",2,"A",21.65992,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE DA BOIÇA",null,null,"ESTR",null,"110404",1,null,"ESTR VALE DA BOIÇA",5907,5913,{"$raw":"00000000"},"110404","ESTR VALE DA BOIÇA","OPER",1,"A",49.99047,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",5908,5914,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",150.83495,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL NICOLAU",null,null,"R",null,"110404",1,null,"R CASAL NICOLAU",5909,5915,{"$raw":"00000000"},"110404","R CASAL NICOLAU","OPER",1,"A",61.11448,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",5910,5916,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",165.31140,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",5911,5917,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",50.53680,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",5912,5918,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",46.14068,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS PEDREIRAS",null,null,"ESTR",null,"110406",1,null,"ESTR DAS PEDREIRAS",5913,5919,{"$raw":"00000000"},"110406","ESTR DAS PEDREIRAS","INOP",3,"T",217.41502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5914,5920,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,144.72893,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5915,5921,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,31.58616,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5916,5922,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,22.71322,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1025","DA ESTEFANIA",null,null,"R",null,"110406",1,null,"R DA ESTEFANIA",5917,5923,{"$raw":"00000000"},"110406","R DA ESTEFANIA","OPER",2,"A",257.78133,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL NICOLAU",null,null,"R",null,"110404",1,null,"R CASAL NICOLAU",5918,5924,{"$raw":"00000000"},"110404","R CASAL NICOLAU","OPER",1,"A",100.12771,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110401",1,null,null,5919,5925,{"$raw":"00000000"},"110401","MJ.3.3924","INOP",3,"T",52.75985,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,5920,5926,{"$raw":"00000000"},"110407","MJ.3.3925","INOP",3,"T",239.25150,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,5921,5927,{"$raw":"00000000"},"110407","MJ.3.3926","INOP",3,"T",75.07018,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110401",1,null,"R DO OUTEIRO",5922,5928,{"$raw":"00000000"},"110401","R DO OUTEIRO","OPER",2,"A",73.89139,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110401",1,null,"R DO OUTEIRO",5923,5929,{"$raw":"00000000"},"110401","R DO OUTEIRO","OPER",2,"A",35.60483,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110401",1,null,"R DO OUTEIRO",5924,5930,{"$raw":"00000000"},"110401","R DO OUTEIRO","OPER",2,"A",67.70481,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CORUJEIRA",null,null,"R",null,"110401",1,null,"R DA CORUJEIRA",5925,5931,{"$raw":"00000000"},"110401","R DA CORUJEIRA","INOP",3,"T",9.25928,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CIDRAL",null,null,"ESTR",null,"110401",1,null,"ESTR DO CIDRAL",5926,5932,{"$raw":"00000000"},"110401","ESTR DO CIDRAL","INOP",3,"T",2.08336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,5927,5933,{"$raw":"00000000"},"110404","MJ.1.137","OPER",1,"A",62.55048,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",2,null,null,5928,5934,{"$raw":"00000000"},"110401","MJ.3.3927","INOP",3,"T",82.45221,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CIDRAL",null,null,"ESTR",null,"110404",2,"110401","ESTR DO CIDRAL",5929,5935,{"$raw":"00000000"},"110404","ESTR DO CIDRAL","OPER",1,"A",98.36433,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CIDRAL",null,null,"ESTR",null,"110404",2,"110401","ESTR DO CIDRAL",5930,5936,{"$raw":"00000000"},"110404","ESTR DO CIDRAL","OPER",1,"A",85.67540,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL NICOLAU",null,null,"R",null,"110404",1,null,"R CASAL NICOLAU",5931,5937,{"$raw":"00000000"},"110404","R CASAL NICOLAU","OPER",1,"A",6.57135,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL NICOLAU",null,null,"R",null,"110404",1,null,"R CASAL NICOLAU",5932,5938,{"$raw":"00000000"},"110404","R CASAL NICOLAU","OPER",1,"A",107.28775,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"R",null,"110404",1,null,"R DA ESCOLA",5933,5939,{"$raw":"00000000"},"110404","R DA ESCOLA","OPER",1,"A",56.70780,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,5934,5940,{"$raw":"00000000"},"110406","MJ.3.3928","INOP",3,"T",441.96567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL NICOLAU",null,null,"R",null,"110404",1,null,"R CASAL NICOLAU",5935,5941,{"$raw":"00000000"},"110404","R CASAL NICOLAU","OPER",1,"A",85.54464,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE DA BARBA",null,null,"R",null,"110402",1,null,"R VALE DA BARBA",5936,5942,{"$raw":"00000000"},"110402","R VALE DA BARBA","OPER",1,"A",154.75381,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",5937,5943,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",115.29855,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARRIL",null,null,"R",null,"110406",1,null,"R DO CARRIL",5938,5944,{"$raw":"00000000"},"110406","R DO CARRIL","INOP",3,"T",254.52240,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LAGAR","Processo n.º 01/2005/465, 04/2012/17","9 Mar 2005, 6 nov 2012","TV",null,"110401",1,null,"TV DO LAGAR",5939,5945,{"$raw":"00000000"},"110401","TV DO LAGAR DE AZEITE","INOP",3,"T",109.14741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","DA IGREJA",null,null,"LG",null,"110407",1,null,"LG DA IGREJA",5940,5946,{"$raw":"00000000"},"110407","LG DA IGREJA","OPER",1,"A",20.88865,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"LG",null,"110407",1,null,"LG DO ROSSIO",5941,5947,{"$raw":"00000000"},"110407","LG DO ROSSIO","OPER",2,"A",28.20826,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE JUNHO",null,null,"R",null,"110406",1,null,"R 25 DE JUNHO",5942,5948,{"$raw":"00000000"},"110406","R 25 DE JUNHO","INOP",3,"T",64.52904,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE JUNHO",null,null,"R",null,"110406",1,null,"R 25 DE JUNHO",5943,5949,{"$raw":"00000000"},"110406","R 25 DE JUNHO","INOP",3,"T",51.06871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5944,5950,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,155.09783,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5945,5951,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,42.69999,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5946,5952,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,141.23275,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5947,5953,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,85.20551,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5948,5954,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.87963,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5949,5955,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,94.27343,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5950,5956,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,103.70349,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5951,5957,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,94.36556,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,5952,5958,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,100.17030,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5953,5959,{"$raw":"00000000"},"110401","MJ.3.3929","INOP",3,"T",8.69605,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",5954,5960,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,4.08442,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5955,5961,{"$raw":"00000000"},"110401","MJ.3.3930","INOP",3,"T",11.14049,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5956,5962,{"$raw":"00000000"},"110401","MJ.3.3931","INOP",3,"T",5.43515,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5957,5963,{"$raw":"00000000"},"110401","MJ.3.3932","INOP",3,"T",1.45427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5958,5964,{"$raw":"00000000"},"110401","MJ.3.3933","INOP",3,"T",5.14024,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5959,5965,{"$raw":"00000000"},"110401","MJ.3.3934","INOP",3,"T",6.66012,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5960,5966,{"$raw":"00000000"},"110401","MJ.3.3935","INOP",3,"T",38.42008,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5961,5967,{"$raw":"00000000"},"110401","MJ.3.3936","INOP",3,"T",16.97100,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5962,5968,{"$raw":"00000000"},"110401","MJ.3.3937","INOP",3,"T",10.32234,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5963,5969,{"$raw":"00000000"},"110401","MJ.3.3938","INOP",3,"T",10.31257,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5964,5970,{"$raw":"00000000"},"110401","MJ.3.3939","INOP",3,"T",2.60048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5965,5971,{"$raw":"00000000"},"110401","MJ.3.3940","INOP",3,"T",4.50140,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5966,5972,{"$raw":"00000000"},"110401","MJ.3.3941","INOP",3,"T",6.03172,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5967,5973,{"$raw":"00000000"},"110401","MJ.3.3942","INOP",3,"T",19.51301,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5968,5974,{"$raw":"00000000"},"110401","MJ.3.3943","INOP",3,"T",5.70008,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5969,5975,{"$raw":"00000000"},"110401","MJ.1.138","OPER",1,"A",2.86086,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5970,5976,{"$raw":"00000000"},"110401","MJ.3.3944","INOP",3,"T",3.60089,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5971,5977,{"$raw":"00000000"},"110401","MJ.3.3945","INOP",3,"T",2.89318,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5972,5978,{"$raw":"00000000"},"110401","MJ.3.3946","INOP",3,"T",16.28703,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5973,5979,{"$raw":"00000000"},"110401","MJ.3.3947","INOP",3,"T",10.22393,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",5974,5980,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",7.32451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",5975,5981,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",5.85718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COVA DAS EIRAS",null,null,"TV",null,"110401",1,null,"TV COVA DAS EIRAS",5976,5982,{"$raw":"00000000"},"110401","TV COVA DAS EIRAS","INOP",3,"T",11.03288,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",5977,5983,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",7.79853,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",5978,5984,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",5.15154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"R",null,"110401",1,null,"R DA BELA VISTA",5979,5985,{"$raw":"00000000"},"110401","R DA BELA VISTA","INOP",3,"T",6.08451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"R",null,"110401",1,null,"R DA BELA VISTA",5980,5986,{"$raw":"00000000"},"110401","R DA BELA VISTA","INOP",3,"T",13.71761,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",5981,5987,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,11.38600,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5982,5988,{"$raw":"00000000"},"110401","MJ.3.3948","INOP",3,"T",160.86143,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",5983,5989,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,43.65215,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PINÓIA",null,null,"TV",null,"110401",1,null,"TV DA PINÓIA",5984,5990,{"$raw":"00000000"},"110401","TV DA PINÓIA","INOP",3,"T",61.91018,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS OPERÁRIOS",null,null,"R",null,"110401",1,null,"R DOS OPERÁRIOS",5985,5991,{"$raw":"00000000"},"110401","R DOS OPERÁRIOS","INOP",3,"T",46.51298,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",5986,5992,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,11.67188,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",5987,5993,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,110.77282,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO COCHO",null,null,"TV",null,"110401",1,null,"TV DO COCHO",5988,5994,{"$raw":"00000000"},"110401","TV DO COCHO","OPER",1,"A",68.89152,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5989,5995,{"$raw":"00000000"},"110401","MJ.3.3949","INOP",3,"T",11.41548,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",5990,5996,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",127.56780,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",5991,5997,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",8.96394,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5992,5998,{"$raw":"00000000"},"110401","MJ.3.3950","INOP",3,"T",30.22334,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5993,5999,{"$raw":"00000000"},"110401","MJ.3.3951","INOP",3,"T",43.68891,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5994,6000,{"$raw":"00000000"},"110401","MJ.3.3952","INOP",3,"T",41.78188,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS SERRADORES",null,null,"R",null,"110401",1,null,"R DOS SERRADORES",5995,6001,{"$raw":"00000000"},"110401","R DOS SERRADORES","INOP",3,"T",27.44143,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",5996,6002,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,14.72751,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",5997,6003,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,14.34923,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,5998,6004,{"$raw":"00000000"},"110401","MJ.1.139","OPER",1,"A",29.85374,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,5999,6005,{"$raw":"00000000"},"110401","MJ.3.3953","INOP",3,"T",9.45173,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6000,6006,{"$raw":"00000000"},"110401","MJ.3.3954","INOP",3,"T",15.32221,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DA FONTE",null,null,"R",null,"110406",1,null,"R DA FONTE",6001,6007,{"$raw":"00000000"},"110406","R DA FONTE","OPER",2,"A",152.23240,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6002,6008,{"$raw":"00000000"},"110401","R DA HEROINA","OPER",1,null,106.70537,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","DO CRUZEIRO",null,null,"LG",null,"110401",1,null,"LG DO CRUZEIRO",6003,6009,{"$raw":"00000000"},"110401","LG DO CRUZEIRO","OPER",1,"A",28.67636,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1025","1025",null,null,"CM",null,"110406",1,null,"CM 1025",6004,6010,{"$raw":"00000000"},"110406","CM 1025","OPER",2,"A",152.38292,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS OPERÁRIOS",null,null,"R",null,"110401",1,null,"R DOS OPERÁRIOS",6005,6011,{"$raw":"00000000"},"110401","R DOS OPERÁRIOS","INOP",3,"T",40.57379,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS SERRADORES",null,null,"R",null,"110401",1,null,"R DOS SERRADORES",6006,6012,{"$raw":"00000000"},"110401","R DOS SERRADORES","INOP",3,"T",69.93162,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHOS","Processo nº 03/07/131, 03/07/267, 04/2013/5","23 Out 2000, 10 jul 2007","TV",null,"110405",1,null,"TV DOS MOINHOS",6007,6013,{"$raw":"00000000"},"110405","TV DOS MOINHOS","OPER",2,"A",120.85991,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",6008,6014,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",406.98942,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6009,6015,{"$raw":"00000000"},"110401","MJ.3.3955","INOP",3,"T",18.16816,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6010,6016,{"$raw":"00000000"},"110401","MJ.3.3956","INOP",3,"T",38.94008,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6011,6017,{"$raw":"00000000"},"110401","MJ.3.3957","INOP",3,"T",67.73450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6012,6018,{"$raw":"00000000"},"110401","MJ.3.3958","INOP",3,"T",13.68672,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6013,6019,{"$raw":"00000000"},"110401","MJ.3.3959","INOP",3,"T",64.21136,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6014,6020,{"$raw":"00000000"},"110401","MJ.3.3960","INOP",3,"T",30.69234,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6015,6021,{"$raw":"00000000"},"110401","MJ.3.3961","INOP",3,"T",42.92253,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6016,6022,{"$raw":"00000000"},"110401","MJ.3.3962","INOP",3,"T",27.36739,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6017,6023,{"$raw":"00000000"},"110401","MJ.3.3963","INOP",3,"T",68.12073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6018,6024,{"$raw":"00000000"},"110401","MJ.3.3964","INOP",3,"T",68.48766,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ARRABALDE",null,null,"R",null,"110401",1,null,"R DO ARRABALDE",6019,6025,{"$raw":"00000000"},"110401","R DO ARRABALDE","INOP",3,"T",39.42268,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ARRABALDE",null,null,"R",null,"110401",1,null,"R DO ARRABALDE",6020,6026,{"$raw":"00000000"},"110401","R DO ARRABALDE","INOP",3,"T",64.09735,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110401",1,null,null,6021,6027,{"$raw":"00000000"},"110401","MJ.3.3965","INOP",3,"T",125.56828,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"LG",null,"110401",1,null,"LG DA BELA VISTA",6022,6028,{"$raw":"00000000"},"110401","LG DA BELA VISTA","INOP",3,"T",20.14833,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6023,6029,{"$raw":"00000000"},"110401","MJ.3.3966","INOP",3,"T",27.06199,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COVA DAS EIRAS",null,null,"R",null,"110401",1,null,"R COVA DAS EIRAS",6024,6030,{"$raw":"00000000"},"110401","R COVA DAS EIRAS","INOP",3,"T",36.55628,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6025,6031,{"$raw":"00000000"},"110401","MJ.3.3967","INOP",3,"T",21.86487,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6026,6032,{"$raw":"00000000"},"110401","MJ.3.3968","INOP",3,"T",22.43662,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6027,6033,{"$raw":"00000000"},"110401","MJ.3.3969","INOP",3,"T",14.36617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6028,6034,{"$raw":"00000000"},"110401","MJ.3.3970","INOP",3,"T",11.52636,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6029,6035,{"$raw":"00000000"},"110401","MJ.3.3971","INOP",3,"T",27.14649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6030,6036,{"$raw":"00000000"},"110401","MJ.3.3972","INOP",3,"T",24.66922,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6031,6037,{"$raw":"00000000"},"110401","MJ.3.3973","INOP",3,"T",27.69515,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6032,6038,{"$raw":"00000000"},"110401","MJ.3.3974","INOP",3,"T",116.42551,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6033,6039,{"$raw":"00000000"},"110401","MJ.3.3975","INOP",3,"T",39.23652,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6034,6040,{"$raw":"00000000"},"110401","MJ.3.3976","INOP",3,"T",7.05434,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6035,6041,{"$raw":"00000000"},"110401","MJ.3.3977","INOP",3,"T",24.25214,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6036,6042,{"$raw":"00000000"},"110401","MJ.3.3978","INOP",3,"T",13.05487,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6037,6043,{"$raw":"00000000"},"110401","MJ.3.3979","INOP",3,"T",10.95237,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6038,6044,{"$raw":"00000000"},"110401","MJ.3.3980","INOP",3,"T",23.91717,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6039,6045,{"$raw":"00000000"},"110401","MJ.3.3981","INOP",3,"T",252.38375,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"TV",null,"110401",1,null,"TV DO MOINHO",6040,6046,{"$raw":"00000000"},"110401","TV DO MOINHO","INOP",3,"T",118.35166,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"TV",null,"110401",1,null,"TV DAS EIRAS",6041,6047,{"$raw":"00000000"},"110401","TV DAS EIRAS","INOP",3,"A",109.53432,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6042,6048,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",10.81296,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6043,6049,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",34.04085,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6044,6050,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",32.66207,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6045,6051,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",7.75903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COVA DAS EIRAS",null,null,"R",null,"110401",1,null,"R COVA DAS EIRAS",6046,6052,{"$raw":"00000000"},"110401","R COVA DAS EIRAS","INOP",3,"T",21.74066,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COVA DAS EIRAS",null,null,"R",null,"110401",1,null,"R COVA DAS EIRAS",6047,6053,{"$raw":"00000000"},"110401","R COVA DAS EIRAS","INOP",3,"A",45.60303,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6048,6054,{"$raw":"00000000"},"110401","MJ.3.3982","INOP",3,"T",13.70501,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VIRIATO",null,null,"R",null,"110401",1,null,"R DO VIRIATO",6049,6055,{"$raw":"00000000"},"110401","R DO VIRIATO","INOP",3,"A",39.95593,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VIRIATO",null,null,"R",null,"110401",1,null,"R DO VIRIATO",6050,6056,{"$raw":"00000000"},"110401","R DO VIRIATO","INOP",3,"T",17.27656,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COVA DAS EIRAS",null,null,"TV",null,"110401",1,null,"TV COVA DAS EIRAS",6051,6057,{"$raw":"00000000"},"110401","TV COVA DAS EIRAS","INOP",3,"A",63.26383,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ ISIDRO MARQUES",null,null,"R",null,"110401",1,null,"R JOSÉ ISIDRO MARQUES",6052,6058,{"$raw":"00000000"},"110401","R JOSÉ ISIDRO MARQUES","INOP",3,"T",56.82827,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ ISIDRO MARQUES",null,null,"R",null,"110401",1,null,"R JOSÉ ISIDRO MARQUES",6053,6059,{"$raw":"00000000"},"110401","R JOSÉ ISIDRO MARQUES","INOP",3,"T",24.63434,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ ISIDRO MARQUES",null,null,"R",null,"110401",1,null,"R JOSÉ ISIDRO MARQUES",6054,6060,{"$raw":"00000000"},"110401","R JOSÉ ISIDRO MARQUES","INOP",3,"T",29.26560,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ ISIDRO MARQUES",null,null,"R",null,"110401",1,null,"R JOSÉ ISIDRO MARQUES",6055,6061,{"$raw":"00000000"},"110401","R JOSÉ ISIDRO MARQUES","INOP",3,"T",27.24040,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ ISIDRO MARQUES",null,null,"R",null,"110401",1,null,"R JOSÉ ISIDRO MARQUES",6056,6062,{"$raw":"00000000"},"110401","R JOSÉ ISIDRO MARQUES","INOP",3,"T",13.45139,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ ISIDRO MARQUES",null,null,"R",null,"110401",1,null,"R JOSÉ ISIDRO MARQUES",6057,6063,{"$raw":"00000000"},"110401","R JOSÉ ISIDRO MARQUES","INOP",3,"T",60.76213,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ ISIDRO MARQUES",null,null,"R",null,"110401",1,null,"R JOSÉ ISIDRO MARQUES",6058,6064,{"$raw":"00000000"},"110401","R JOSÉ ISIDRO MARQUES","INOP",3,"T",48.65352,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"INFANTA D MARIA",null,null,"TV",null,"110401",1,null,"TV INFANTA D MARIA",6059,6065,{"$raw":"00000000"},"110401","TV INFANTA D MARIA","INOP",3,"T",37.49651,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6060,6066,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"A",9.91105,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6061,6067,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",113.85606,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO MARTINHO",null,null,"R",null,"110401",1,null,"R JOÃO MARTINHO",6062,6068,{"$raw":"00000000"},"110401","R JOÃO MARTINHO","INOP",3,"T",104.15501,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO MARTINHO",null,null,"R",null,"110401",1,null,"R JOÃO MARTINHO",6063,6069,{"$raw":"00000000"},"110401","R JOÃO MARTINHO","INOP",3,"T",26.24746,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6064,6070,{"$raw":"00000000"},"110401","MJ.3.3983","INOP",3,"T",16.18631,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6065,6071,{"$raw":"00000000"},"110401","MJ.3.3984","INOP",3,"T",18.26598,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6066,6072,{"$raw":"00000000"},"110401","MJ.3.3985","INOP",3,"T",10.02684,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6067,6073,{"$raw":"00000000"},"110401","MJ.3.3986","INOP",3,"T",14.18495,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE SANTO ANTÓNIO",null,null,"TV",null,"110401",1,null,"TV DE SANTO ANTÓNIO",6068,6074,{"$raw":"00000000"},"110401","TV DE SANTO ANTÓNIO","INOP",3,"T",78.22385,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6069,6075,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",26.39941,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6070,6076,{"$raw":"00000000"},"110401","MJ.3.3987","INOP",3,"T",58.26807,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"R",null,"110401",1,null,"R DA BELA VISTA",6071,6077,{"$raw":"00000000"},"110401","R DA BELA VISTA","INOP",3,"T",16.78499,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"R",null,"110401",1,null,"R DA BELA VISTA",6072,6078,{"$raw":"00000000"},"110401","R DA BELA VISTA","INOP",3,"T",54.55768,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6073,6079,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",57.40456,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ BARBAS GASPAR",null,"17 Jun 2006","R",null,"110402",1,null,"R JOSÉ BARBAS GASPAR",6074,6080,{"$raw":"00000000"},"110402","R JOSÉ BARBAS GASPAR","INOP",3,"T",91.69805,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FESTAS DO MARTIR S SEBASTIÃO",null,null,"LG",null,"110404",1,null,"LG DAS FESTAS DO MARTIR S SEBASTIÃO",6075,6081,{"$raw":"00000000"},"110404","LG DAS FESTAS DO MARTIR S SEBASTIÃO","OPER",1,"A",27.53156,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CUTELARIA",null,"26 mar 2001","LG",null,"110405",1,null,"LG DA CUTELARIA",6076,6082,{"$raw":"00000000"},"110405","LG DA CUTELARIA","INOP",3,"T",57.52299,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"R",null,"110401",1,null,"R DA BELA VISTA",6077,6083,{"$raw":"00000000"},"110401","R DA BELA VISTA","INOP",3,"T",44.11311,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"LG",null,"110401",1,null,"LG DA BELA VISTA",6078,6084,{"$raw":"00000000"},"110401","LG DA BELA VISTA","INOP",3,"T",17.29011,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"LG",null,"110401",1,null,"LG DA BELA VISTA",6079,6085,{"$raw":"00000000"},"110401","LG DA BELA VISTA","INOP",3,"T",11.68881,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CAMPO DA BOLA",null,null,"TV",null,"110401",1,null,"TV CAMPO DA BOLA",6080,6086,{"$raw":"00000000"},"110401","TV CAMPO DA BOLA","INOP",3,"T",66.37860,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6081,6087,{"$raw":"00000000"},"110401","MJ.3.3988","INOP",3,"T",9.92960,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6082,6088,{"$raw":"00000000"},"110401","MJ.1.140","OPER",1,"A",30.16195,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS RATOEIRAS",null,null,"TV",null,"110401",1,null,"TV DAS RATOEIRAS",6083,6089,{"$raw":"00000000"},"110401","TV DAS RATOEIRAS","INOP",3,"T",14.29966,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS RATOEIRAS",null,null,"TV",null,"110401",1,null,"TV DAS RATOEIRAS",6084,6090,{"$raw":"00000000"},"110401","TV DAS RATOEIRAS","OPER",1,"A",34.14656,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS OPERÁRIOS",null,null,"R",null,"110401",1,null,"R DOS OPERÁRIOS",6085,6091,{"$raw":"00000000"},"110401","R DOS OPERÁRIOS","INOP",3,"A",21.93901,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PAULINO",null,null,"BC",null,"110401",1,null,"BC DO PAULINO",6086,6092,{"$raw":"00000000"},"110401","BC DO PAULINO","INOP",3,"T",44.16715,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VALENTES",null,null,"R",null,"110401",1,null,"R DOS VALENTES",6087,6093,{"$raw":"00000000"},"110401","R DOS VALENTES","INOP",3,"T",69.46345,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",6088,6094,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,10.51029,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS SERRADORES",null,null,"R",null,"110401",1,null,"R DOS SERRADORES",6089,6095,{"$raw":"00000000"},"110401","R DOS SERRADORES","INOP",3,"T",79.11410,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",6090,6096,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,8.97717,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS SERRADORES",null,null,"R",null,"110401",1,null,"R DOS SERRADORES",6091,6097,{"$raw":"00000000"},"110401","R DOS SERRADORES","OPER",1,"A",30.98136,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VALENTES",null,null,"R",null,"110401",1,null,"R DOS VALENTES",6092,6098,{"$raw":"00000000"},"110401","R DOS VALENTES","INOP",3,"T",45.92570,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6093,6099,{"$raw":"00000000"},"110401","MJ.3.3989","INOP",3,"T",12.44316,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VALENTES",null,null,"R",null,"110401",1,null,"R DOS VALENTES",6094,6100,{"$raw":"00000000"},"110401","R DOS VALENTES","INOP",3,"T",27.78661,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VALENTES",null,null,"R",null,"110401",1,null,"R DOS VALENTES",6095,6101,{"$raw":"00000000"},"110401","R DOS VALENTES","INOP",3,"T",36.59478,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6096,6102,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",47.51049,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6097,6103,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",102.43867,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6098,6104,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",3.04059,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","DO CRUZEIRO",null,null,"LG",null,"110401",1,null,"LG DO CRUZEIRO",6099,6105,{"$raw":"00000000"},"110401","LG DO CRUZEIRO","OPER",1,null,14.63305,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6100,6106,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",6.43472,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6101,6107,{"$raw":"00000000"},"110401","R DA HEROINA","OPER",1,null,56.32645,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6102,6108,{"$raw":"00000000"},"110401","R DA HEROINA","OPER",1,null,33.05109,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6103,6109,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",111.42834,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6104,6110,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",122.51313,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6105,6111,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",27.61565,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6106,6112,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",234.79836,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6107,6113,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",233.96271,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA RIBEIRA",null,null,"ESTR",null,"110401",1,null,"ESTR DA RIBEIRA",6108,6114,{"$raw":"00000000"},"110401","ESTR DA RIBEIRA","OPER",1,null,48.37715,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA RIBEIRA",null,null,"ESTR",null,"110401",1,null,"ESTR DA RIBEIRA",6109,6115,{"$raw":"00000000"},"110401","ESTR DA RIBEIRA","OPER",1,null,127.92334,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6110,6116,{"$raw":"00000000"},"110401","R DA HEROINA","OPER",1,"T",49.87928,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6111,6117,{"$raw":"00000000"},"110401","R DA HEROINA","OPER",1,null,3.14775,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6112,6118,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",243.91565,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA RIBEIRA",null,null,"ESTR",null,"110401",1,null,"ESTR DA RIBEIRA",6113,6119,{"$raw":"00000000"},"110401","ESTR DA RIBEIRA","OPER",1,null,45.36186,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",6114,6120,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",54.77218,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",6115,6121,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",153.24942,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS PATRICIOS",null,null,"R",null,"110401",1,null,"R DOS PATRICIOS",6116,6122,{"$raw":"00000000"},"110401","R DOS PATRICIOS","INOP",3,"T",454.50872,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6117,6123,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",345.75104,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO",null,null,"TV",null,"110401",1,null,"TV DO POÇO",6118,6124,{"$raw":"00000000"},"110401","TV DO POÇO","INOP",3,"A",61.54761,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TORRE",null,null,"ESTR",null,"110401",1,null,"ESTR DA TORRE",6119,6125,{"$raw":"00000000"},"110401","ESTR DA TORRE","INOP",3,"T",24.69677,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE","Já teve como designação \"R do Chafariz\", Out 2010","21 Dez 2010","R",null,"110401",1,null,"R DO VALE",6120,6126,{"$raw":"00000000"},"110401","R DO VALE","INOP",3,"T",177.56461,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",6121,6127,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",24.69731,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","FRANCISCO FILIPE",null,null,"LG",null,"110406",1,null,"LG FRANCISCO FILIPE",6122,6128,{"$raw":"00000000"},"110406","LG FRANCISCO FILIPE","OPER",2,"A",34.79375,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CAMPO DA BOLA",null,null,"TV",null,"110401",1,null,"TV CAMPO DA BOLA",6123,6129,{"$raw":"00000000"},"110401","TV CAMPO DA BOLA","INOP",3,"T",56.44929,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CASA QUEIMADA",null,null,"R",null,"110407",1,null,"R DA CASA QUEIMADA",6124,6130,{"$raw":"00000000"},"110407","R DA CASA QUEIMADA","OPER",2,"A",75.05201,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ARRABALDE",null,null,"R",null,"110401",1,null,"R DO ARRABALDE",6125,6131,{"$raw":"00000000"},"110401","R DO ARRABALDE","INOP",3,"T",19.61800,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","615","4 DE SETEMBRO",null,null,"R",null,"110406",1,null,"R 4 DE SETEMBRO",6126,6132,{"$raw":"00000000"},"110406","R 4 DE SETEMBRO","OPER",2,"A",63.28560,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA RIBEIRA",null,null,"ESTR",null,"110401",1,null,"ESTR DA RIBEIRA",6127,6133,{"$raw":"00000000"},"110401","ESTR DA RIBEIRA","OPER",1,null,15.12412,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA RIBEIRA",null,null,"ESTR",null,"110401",1,null,"ESTR DA RIBEIRA",6128,6134,{"$raw":"00000000"},"110401","ESTR DA RIBEIRA","OPER",1,"T",229.09523,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",6129,6135,{"$raw":"00000000"},"110401","R DA HEROINA","OPER",1,null,82.25619,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6130,6136,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",54.63747,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6131,6137,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",38.62479,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6132,6138,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",4.01121,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6133,6139,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",205.12651,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6134,6140,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",26.16296,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6135,6141,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",51.44311,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6136,6142,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",55.03614,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6137,6143,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",122.03219,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6138,6144,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",9.58763,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","1027",null,null,"CM",null,"110401",1,null,"CM 1027",6139,6145,{"$raw":"00000000"},"110401","CM 1027","OPER",1,"A",87.00593,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6140,6146,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.00000,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",6141,6147,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",4.26090,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","1024",null,null,"CM",null,"110404",1,null,"CM 1024",6142,6148,{"$raw":"00000000"},"110404","CM 1024","OPER",2,"A",5.78468,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",6143,6149,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",1.34164,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6144,6150,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",3.96284,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6145,6151,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.38114,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DO CASTELO",null,null,"R",null,"110404",1,null,"R DO CASTELO",6146,6152,{"$raw":"00000000"},"110404","R DO CASTELO","OPER",2,"A",60.83477,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DIREITA",null,null,"R",null,"110404",1,null,"R DIREITA",6147,6153,{"$raw":"00000000"},"110404","R DIREITA","OPER",1,"A",21.50284,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DIREITA",null,null,"R",null,"110404",1,null,"R DIREITA",6148,6154,{"$raw":"00000000"},"110404","R DIREITA","OPER",1,"A",29.17809,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110401",1,null,"EM 568",6149,6155,{"$raw":"00000000"},"110401","EM 568","OPER",1,"A",19.16579,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110401",1,null,"EM 568",6150,6156,{"$raw":"00000000"},"110401","EM 568","OPER",1,"A",51.63176,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6151,6157,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",51.89037,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6152,6158,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",64.12875,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DA BOIÇA",null,null,"ESTR",null,"110404",1,null,"ESTR DA BOIÇA",6153,6159,{"$raw":"00000000"},"110404","ESTR DA BOIÇA","OPER",2,null,33.54753,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",6154,6160,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",139.26525,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",6155,6161,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",128.66169,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",6156,6162,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",116.96550,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","DA RIBEIRA",null,null,"R",null,"110407",1,null,"R DA RIBEIRA",6157,6163,{"$raw":"00000000"},"110407","R DA RIBEIRA","OPER",1,"A",221.65210,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JULIO NOBRE",null,null,"TV",null,"110403",1,null,"TV JULIO NOBRE",6158,6164,{"$raw":"00000000"},"110403","TV JULIO NOBRE","INOP",3,"T",32.34680,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110407",2,null,"EM 568",6159,6165,{"$raw":"00000000"},"110407","EM 568","OPER",1,"A",4.72038,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110401","EN 366",6160,6166,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",283.78512,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","DIREITA",null,null,"R",null,"110404",1,null,"R DIREITA",6161,6167,{"$raw":"00000000"},"110404","R DIREITA","OPER",1,"A",116.79907,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110404",1,null,"R MAPRIL FOGAÇA",6162,6168,{"$raw":"00000000"},"110404","R MAPRIL FOGAÇA","OPER",1,"A",7.66246,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CIDRAL",null,null,"ESTR",null,"110401",1,null,"ESTR DO CIDRAL",6163,6169,{"$raw":"00000000"},"110401","ESTR DO CIDRAL","OPER",1,"A",306.64088,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110404","EN 366",6164,6170,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",127.90302,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1035","DO MOINHO",null,"26 mar 2001","R",null,"110405",1,null,"R DO MOINHO",6165,6171,{"$raw":"00000000"},"110405","R DO MOINHO","OPER",1,"A",367.27129,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6166,6172,{"$raw":"00000000"},"110405","MJ.3.3990","INOP",3,"T",63.73842,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,null,"R",null,"110410",1,null,"R DA CAPELA",6167,6173,{"$raw":"00000000"},"110410","R DA CAPELA","OPER",2,"A",12.61989,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POISIO",null,null,"TV",null,"110410",1,null,"TV DO POISIO",6168,6174,{"$raw":"00000000"},"110410","TV DO POISIO","OPER",2,"A",82.48322,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POISIO",null,null,"TV",null,"110410",1,null,"TV DO POISIO",6169,6175,{"$raw":"00000000"},"110410","TV DO POISIO","OPER",2,"A",53.78753,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA EUGÉNIA",null,null,"R",null,"110410",1,null,"R MARIA EUGÉNIA",6170,6176,{"$raw":"00000000"},"110410","R MARIA EUGÉNIA","INOP",3,"T",293.14902,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110401",1,null,"EM 568",6171,6177,{"$raw":"00000000"},"110401","EM 568","OPER",1,"A",219.91629,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6172,6178,{"$raw":"00000000"},"110401","MJ.3.3991","INOP",3,"T",194.32533,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110401",1,null,"EM 568",6173,6179,{"$raw":"00000000"},"110401","EM 568","OPER",1,"A",75.01590,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6174,6180,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,"T",107.09725,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6175,6181,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",95.25324,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6176,6182,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,null,230.61748,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6177,6183,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,null,18.20320,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6178,6184,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,null,184.35824,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6179,6185,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,null,178.48618,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","1024",null,null,"CM",null,"110404",1,null,"CM 1024",6180,6186,{"$raw":"00000000"},"110404","CM 1024","OPER",2,"A",305.06999,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6181,6187,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,null,82.84924,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",6182,6188,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",134.18215,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","PROF MARCELO CAETANO","Anteriormente teve a designação de: R 25 de Abril",null,"R",null,"110406",1,null,"R PROF MARCELO CAETANO",6183,6189,{"$raw":"00000000"},"110406","R PROF MARCELO CAETANO","OPER",2,"T",174.42411,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","PROF MARCELO CAETANO","Anteriormente teve a designação de R 25 de Abril",null,"R",null,"110406",1,null,"R PROF MARCELO CAETANO",6184,6190,{"$raw":"00000000"},"110406","R PROF MARCELO CAETANO","OPER",2,null,106.63307,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6185,6191,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",198.24949,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","PROF MARCELO CAETANO","Anteriormente teve a designação de: R 25 de Abril",null,"R",null,"110406",1,null,"R PROF MARCELO CAETANO",6186,6192,{"$raw":"00000000"},"110406","R PROF MARCELO CAETANO","OPER",2,null,129.29242,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","PROF MARCELO CAETANO","Teve a designação de: R 25 de Abril",null,"R",null,"110406",1,null,"R PROF MARCELO CAETANO",6187,6193,{"$raw":"00000000"},"110406","R PROF MARCELO CAETANO","OPER",2,null,52.55111,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","1024",null,null,"CM",null,"110406",1,null,"CM 1024",6188,6194,{"$raw":"00000000"},"110406","CM 1024","OPER",2,"A",102.72844,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","1024",null,null,"CM",null,"110406",1,null,"CM 1024",6189,6195,{"$raw":"00000000"},"110406","CM 1024","OPER",2,"A",8.98886,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",6190,6196,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",64.29731,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110404",1,null,"R DO CASTELO",6191,6197,{"$raw":"00000000"},"110404","R DO CASTELO","INOP",3,"T",15.04883,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110401",1,null,"EM 568",6192,6198,{"$raw":"00000000"},"110401","EM 568","OPER",1,"A",130.23789,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6193,6199,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",115.91646,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6194,6200,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",5.76025,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6195,6201,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",8.87978,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAJES",null,null,"R",null,"110405",1,null,"R DAS LAJES",6196,6202,{"$raw":"00000000"},"110405","R DAS LAJES","INOP",3,"T",11.39110,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAJES",null,null,"R",null,"110405",1,null,"R DAS LAJES",6197,6203,{"$raw":"00000000"},"110405","R DAS LAJES","INOP",3,"T",75.21119,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6198,6204,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",202.26541,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","568-1",null,null,"EM",null,"110407",2,null,"EM 568-1",6199,6205,{"$raw":"00000000"},"110407","EM 568-1","OPER",1,"A",32.86615,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","PRINCIPAL",null,null,"R",null,"110406",1,null,"R PRINCIPAL",6200,6206,{"$raw":"00000000"},"110406","R PRINCIPAL","OPER",2,"A",57.46227,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","PROF MARCELO CAETANO","Anteriormente teve a designação de: R 25 de Abril",null,"R",null,"110406",1,null,"R PROF MARCELO CAETANO",6201,6207,{"$raw":"00000000"},"110406","R PROF MARCELO CAETANO","OPER",2,null,91.70980,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",6202,6208,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,14.92997,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",6203,6209,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,"A",31.54824,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",6204,6210,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,42.46376,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6205,6211,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",46.88872,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POISIO",null,null,"TV",null,"110410",1,null,"TV DO POISIO",6206,6212,{"$raw":"00000000"},"110410","TV DO POISIO","OPER",2,"A",58.86684,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CALÇADA",null,null,"R",null,"110410",1,null,"R DA CALÇADA",6207,6213,{"$raw":"00000000"},"110410","R DA CALÇADA","INOP",3,"T",73.19069,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"HERMINIO VICENTE",null,null,"BC",null,"110406",1,null,"BC HERMINIO VICENTE",6208,6214,{"$raw":"00000000"},"110406","BC HERMINIO VICENTE","INOP",3,"T",114.68235,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6209,6215,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",68.45861,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6210,6216,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,170.00065,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6211,6217,{"$raw":"00000000"},"110401","MJ.3.3992","INOP",3,"T",12.12279,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,6212,6218,{"$raw":"00000000"},"110401","MJ.3.3993","INOP",3,"T",186.41709,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6213,6219,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,115.50566,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6214,6220,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,57.36938,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6215,6221,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,95.94213,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,null,0,null,"EM 568",6216,6222,{"$raw":"00000000"},null,"EM 568",null,1,"A",216.83683,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110406",1,null,"EM 568",6217,6223,{"$raw":"00000000"},"110406","EM 568","OPER",2,"A",99.70247,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6218,6224,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,"T",122.72479,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS",null,null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6219,6225,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,null,2.92660,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6220,6226,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,"T",254.32581,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6221,6227,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,null,71.50263,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","PROF MARCELO CAETANO","Anteriormente teve a designação de R 25 de Abril",null,"R",null,"110406",1,null,"R PROF MARCELO CAETANO",6222,6228,{"$raw":"00000000"},"110406","R PROF MARCELO CAETANO","OPER",2,null,88.02904,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","PROF MARCELO CAETANO","Anteriormente teve a designação de: R 25 de Abril",null,"R",null,"110406",1,null,"R PROF MARCELO CAETANO",6223,6229,{"$raw":"00000000"},"110406","R PROF MARCELO CAETANO","OPER",2,null,39.41315,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",6224,6230,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",62.33955,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",6225,6231,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",79.31410,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",6226,6232,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",37.22640,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",6227,6233,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",67.00698,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",6228,6234,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",143.02991,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,null,"EN 366",6229,6235,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",1.20241,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110406",1,null,"EN 361",6230,6236,{"$raw":"00000000"},"110406","EN 361","OPER",1,"A",3.65978,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6231,6237,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",69.61853,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110401","EN 366",6232,6238,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",79.48728,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110404","EN 366",6233,6239,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",295.08024,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110404","EN 366",6234,6240,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",159.94146,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6235,6241,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",147.72502,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110404","EN 366",6236,6242,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",143.43501,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6237,6243,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",132.50702,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110404","EN 366",6238,6244,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",112.76643,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6239,6245,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",253.96593,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110401",2,"110407","EN 366",6240,6246,{"$raw":"00000000"},"110401","EN 366","OPER",1,"A",15.65334,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6241,6247,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",282.63518,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110404","EN 366",6242,6248,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",36.01075,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6243,6249,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",90.41117,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6244,6250,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",22.30916,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6245,6251,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",244.91988,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6246,6252,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",20.24201,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110104","EN 366",6247,6253,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",131.72992,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6248,6254,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",61.83428,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6249,6255,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",57.30842,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",6250,6256,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",59.61065,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110404",1,null,"EN 366",6251,6257,{"$raw":"00000000"},"110404","EN 366","OPER",2,"A",17.57801,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110404",1,null,"EN 366",6252,6258,{"$raw":"00000000"},"110404","EN 366","OPER",2,"A",71.88351,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110404",1,null,"EN 366",6253,6259,{"$raw":"00000000"},"110404","EN 366","OPER",2,"A",27.50690,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CALÇADA",null,null,"R",null,"110410",1,null,"R DA CALÇADA",6254,6260,{"$raw":"00000000"},"110410","R DA CALÇADA","INOP",3,"T",20.69332,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CSL SIMÃO",null,null,"R",null,"110406",1,null,"R CSL SIMÃO",6255,6261,{"$raw":"00000000"},"110406","R CSL SIMÃO","INOP",3,"T",155.34385,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CANTINHO",null,null,"R",null,"110406",1,null,"R DO CANTINHO",6256,6262,{"$raw":"00000000"},"110406","R DO CANTINHO","INOP",3,"T",128.68619,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASARÃO",null,null,"R",null,"110406",1,null,"R CASARÃO",6257,6263,{"$raw":"00000000"},"110406","R CASARÃO","INOP",3,"T",295.30062,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110404",1,null,"EN 366",6258,6264,{"$raw":"00000000"},"110404","EN 366","OPER",2,"A",73.59309,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110404",1,null,"EN 366",6259,6265,{"$raw":"00000000"},"110404","EN 366","OPER",2,"A",96.14537,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110404",1,null,"EN 366",6260,6266,{"$raw":"00000000"},"110404","EN 366","OPER",2,"A",85.89455,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",6261,6267,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",54.71937,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",6262,6268,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",74.97359,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6263,6269,{"$raw":"00000000"},"110402","MJ.3.3994","INOP",3,"T",190.82374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6264,6270,{"$raw":"00000000"},"110405","MJ.3.3995","INOP",3,"T",30.59624,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6265,6271,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.00000,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",3,null,null,6266,6272,{"$raw":"00000000"},"110405","MJ.3.3996","INOP",3,"T",652.46922,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6267,6273,{"$raw":"00000000"},"110408","MJ.3.3997","INOP",3,"T",310.45297,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6268,6274,{"$raw":"00000000"},"110409","MJ.3.3998","INOP",3,"T",44.39219,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6269,6275,{"$raw":"00000000"},"110408","MJ.3.3999","INOP",3,"T",65.34156,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6270,6276,{"$raw":"00000000"},"110402","MJ.3.4000","INOP",3,"T",112.53596,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6271,6277,{"$raw":"00000000"},"110402","MJ.3.4001","INOP",3,"T",200.26802,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6272,6278,{"$raw":"00000000"},"110408","MJ.3.4002","INOP",3,"T",488.89766,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6273,6279,{"$raw":"00000000"},"110402","MJ.3.4003","INOP",3,"T",105.57903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6274,6280,{"$raw":"00000000"},"110405","MJ.3.4004","INOP",3,"T",127.60367,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,6275,6281,{"$raw":"00000000"},"110408","MJ.3.4005","INOP",3,"T",1.54013,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO RIO DE CIMA",null,null,"R",null,"110408",1,null,"R DO RIO DE CIMA",6276,6282,{"$raw":"00000000"},"110408","R DO RIO DE CIMA","INOP",3,"T",64.87101,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6277,6283,{"$raw":"00000000"},"110402","MJ.2.289","OPER",2,"A",3.06111,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6278,6284,{"$raw":"00000000"},"110402","MJ.3.4006","INOP",3,"T",5.91609,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,6279,6285,{"$raw":"00000000"},"110407","MJ.3.4007","INOP",3,"T",1.38004,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CARVALHO OLIVEIRA",null,null,"R",null,"110405",1,null,"R CARVALHO OLIVEIRA",6280,6286,{"$raw":"00000000"},"110405","R CARVALHO OLIVEIRA","INOP",3,"T",70.55324,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6281,6287,{"$raw":"00000000"},"110402","MJ.3.4008","INOP",3,"T",3.79390,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6282,6288,{"$raw":"00000000"},"110402","MJ.3.4009","INOP",3,"T",41.65935,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6283,6289,{"$raw":"00000000"},"110402","MJ.3.4010","INOP",3,"T",52.03613,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Ribeira","do Vale de Arroz",null,null,null,null,null,"110408",1,null,null,6284,6290,{"$raw":"00000000"},"110408","MJ.3.4011","INOP",3,"T",7.68123,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6285,6291,{"$raw":"00000000"},"110408","MJ.3.4012","INOP",3,"T",4.77881,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6286,6292,{"$raw":"00000000"},"110408","MJ.3.4013","INOP",3,"T",5.44878,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6287,6293,{"$raw":"00000000"},"110408","MJ.3.4014","INOP",3,"T",4.32145,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6288,6294,{"$raw":"00000000"},"110408","MJ.3.4015","INOP",3,"T",164.74048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6289,6295,{"$raw":"00000000"},"110402","MJ.3.4016","INOP",3,"T",7.54541,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6290,6296,{"$raw":"00000000"},"110402","MJ.3.4017","INOP",3,"T",51.47302,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6291,6297,{"$raw":"00000000"},"110402","MJ.3.4018","INOP",3,"T",0.60083,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6292,6298,{"$raw":"00000000"},"110402","MJ.3.4019","INOP",3,"T",9.91612,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6293,6299,{"$raw":"00000000"},"110402","MJ.3.4020","INOP",3,"T",75.20464,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","1024",null,null,"CM",null,"110406",1,null,"CM 1024",6294,6300,{"$raw":"00000000"},"110406","CM 1024","OPER",2,"A",281.98218,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110404",1,null,"EN 115",6295,6301,{"$raw":"00000000"},"110404","EN 115","OPER",1,"A",482.06508,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6296,6302,{"$raw":"00000000"},"110402","MJ.3.4021","INOP",3,"T",79.67491,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6297,6303,{"$raw":"00000000"},"110402","MJ.3.4022","INOP",3,"T",254.08874,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6298,6304,{"$raw":"00000000"},"110402","MJ.3.4023","INOP",3,"T",56.20735,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"R",null,"110402",1,null,"R DA ESCOLA",6299,6305,{"$raw":"00000000"},"110402","R DA ESCOLA","INOP",3,"T",334.12272,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"R",null,"110402",1,null,"R DA ESCOLA",6300,6306,{"$raw":"00000000"},"110402","R DA ESCOLA","INOP",3,"T",150.48590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110402",1,null,"R DO CAMPO DA BOLA",6301,6307,{"$raw":"00000000"},"110402","R DO CAMPO DA BOLA","INOP",3,"T",59.75350,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NOSSA SENHORA DA CONCEIÇÃO",null,null,"R",null,"110402",1,null,"R NOSSA SENHORA DA CONCEIÇÃO",6302,6308,{"$raw":"00000000"},"110402","R NOSSA SENHORA DA CONCEIÇÃO","INOP",3,"T",247.82110,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"R NOSSA SENHORA DA CONCEIÇÃO",null,null,"R",null,"110402",1,null,"R NOSSA SENHORA DA CONCEIÇÃO",6303,6309,{"$raw":"00000000"},"110402","R NOSSA SENHORA DA CONCEIÇÃO","INOP",3,"T",234.71239,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6304,6310,{"$raw":"00000000"},"110402","MJ.3.4024","INOP",3,"T",121.66869,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6305,6311,{"$raw":"00000000"},"110402","MJ.3.4025","INOP",3,"T",7.27863,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6306,6312,{"$raw":"00000000"},"110402","MJ.3.4026","INOP",3,"T",127.11162,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6307,6313,{"$raw":"00000000"},"110402","MJ.3.4027","INOP",3,"T",10.16341,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6308,6314,{"$raw":"00000000"},"110402","MJ.3.4028","INOP",3,"T",137.77446,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6309,6315,{"$raw":"00000000"},"110408","MJ.3.4029","INOP",3,"T",6.10082,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6310,6316,{"$raw":"00000000"},"110408","MJ.3.4030","INOP",3,"T",62.10938,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6311,6317,{"$raw":"00000000"},"110408","MJ.3.4031","INOP",3,"T",332.51019,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6312,6318,{"$raw":"00000000"},"110402","MJ.3.4032","INOP",3,"T",2.83544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",2,null,null,6313,6319,{"$raw":"00000000"},"110408","MJ.3.4033","INOP",3,"T",293.08833,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6314,6320,{"$raw":"00000000"},"110408","MJ.3.4034","INOP",3,"T",2.67187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6315,6321,{"$raw":"00000000"},"110408","MJ.3.4035","INOP",3,"T",144.08209,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","de Agua",null,null,null,null,null,"110408",1,null,null,6316,6322,{"$raw":"00000000"},"110408","MJ.3.4036","INOP",3,"T",5.59912,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6317,6323,{"$raw":"00000000"},"110408","MJ.3.4037","INOP",3,"T",166.02273,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Terra Nova",null,null,null,null,null,"110408",1,null,null,6318,6324,{"$raw":"00000000"},"110408","MJ.3.4038","INOP",3,"T",101.35836,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6319,6325,{"$raw":"00000000"},"110408","MJ.3.4039","INOP",3,"T",5.40334,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6320,6326,{"$raw":"00000000"},"110408","MJ.3.4040","INOP",3,"T",203.06582,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6321,6327,{"$raw":"00000000"},"110402","MJ.3.4041","INOP",3,"T",3.48920,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6322,6328,{"$raw":"00000000"},"110402","MJ.3.4042","INOP",3,"T",6.90018,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","de Agua",null,null,null,null,null,"110402",1,null,null,6323,6329,{"$raw":"00000000"},"110402","MJ.3.4043","INOP",3,"T",49.05120,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",2,null,null,6324,6330,{"$raw":"00000000"},"110402","MJ.3.4044","INOP",3,"T",37.45476,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6325,6331,{"$raw":"00000000"},"110402","MJ.3.4045","INOP",3,"T",33.25857,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6326,6332,{"$raw":"00000000"},"110402","MJ.3.4046","INOP",3,"T",8.93499,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6327,6333,{"$raw":"00000000"},"110402","MJ.3.4047","INOP",3,"T",2.21903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6328,6334,{"$raw":"00000000"},"110402","MJ.3.4048","INOP",3,"T",14.73520,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6329,6335,{"$raw":"00000000"},"110402","MJ.3.4049","INOP",3,"T",129.37639,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6330,6336,{"$raw":"00000000"},"110402","MJ.3.4050","INOP",3,"T",103.25781,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6331,6337,{"$raw":"00000000"},"110402","MJ.3.4051","INOP",3,"T",6.62490,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6332,6338,{"$raw":"00000000"},"110402","MJ.3.4052","INOP",3,"T",145.85190,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6333,6339,{"$raw":"00000000"},"110402","MJ.3.4053","INOP",3,"T",6.41611,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6334,6340,{"$raw":"00000000"},"110405","MJ.3.4054","INOP",3,"T",1.71266,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6335,6341,{"$raw":"00000000"},"110405","MJ.3.4055","INOP",3,"T",5.98847,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","da Felicidade",null,null,null,null,null,"110405",1,null,null,6336,6342,{"$raw":"00000000"},"110405","MJ.3.4056","INOP",3,"T",398.13793,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6337,6343,{"$raw":"00000000"},"110405","MJ.3.4057","INOP",3,"T",0.96938,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6338,6344,{"$raw":"00000000"},"110405","MJ.3.4058","INOP",3,"T",3.78350,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6339,6345,{"$raw":"00000000"},"110405","MJ.3.4059","INOP",3,"T",31.63676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6340,6346,{"$raw":"00000000"},"110405","MJ.3.4060","INOP",3,"T",218.91151,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6341,6347,{"$raw":"00000000"},"110405","MJ.3.4061","INOP",3,"T",10.66402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6342,6348,{"$raw":"00000000"},"110405","MJ.3.4062","INOP",3,"T",289.74448,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6343,6349,{"$raw":"00000000"},"110405","MJ.3.4063","INOP",3,"T",141.57503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6344,6350,{"$raw":"00000000"},"110405","MJ.3.4064","INOP",3,"T",8.40800,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6345,6351,{"$raw":"00000000"},"110405","MJ.3.4065","INOP",3,"T",96.97632,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6346,6352,{"$raw":"00000000"},"110405","MJ.3.4066","INOP",3,"T",22.44212,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","de Agua",null,null,null,null,null,"110405",1,null,null,6347,6353,{"$raw":"00000000"},"110405","MJ.3.4067","INOP",3,"T",5.76210,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","de Agua",null,null,null,null,null,"110405",1,null,null,6348,6354,{"$raw":"00000000"},"110405","MJ.3.4068","INOP",3,"T",375.29871,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6349,6355,{"$raw":"00000000"},"110405","MJ.3.4069","INOP",3,"T",88.83206,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6350,6356,{"$raw":"00000000"},"110405","MJ.3.4070","INOP",3,"T",1.09005,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6351,6357,{"$raw":"00000000"},"110405","MJ.3.4071","INOP",3,"T",198.62779,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6352,6358,{"$raw":"00000000"},"110405","MJ.3.4072","INOP",3,"T",1.16078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6353,6359,{"$raw":"00000000"},"110405","MJ.3.4073","INOP",3,"T",50.49696,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","de Agua",null,null,null,null,null,"110408",1,null,null,6354,6360,{"$raw":"00000000"},"110408","MJ.3.4074","INOP",3,"T",2.15407,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6355,6361,{"$raw":"00000000"},"110408","MJ.3.4075","INOP",3,"T",54.63900,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","de Agua",null,null,null,null,null,"110408",1,null,null,6356,6362,{"$raw":"00000000"},"110408","MJ.3.4076","INOP",3,"T",3.76624,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6357,6363,{"$raw":"00000000"},"110408","MJ.3.4077","INOP",3,"T",86.52231,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6358,6364,{"$raw":"00000000"},"110408","MJ.3.4078","INOP",3,"T",4.30238,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","de Agua",null,null,null,null,null,"110408",1,null,null,6359,6365,{"$raw":"00000000"},"110408","MJ.3.4079","INOP",3,"T",9.16833,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6360,6366,{"$raw":"00000000"},"110408","MJ.3.4080","INOP",3,"T",180.90015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6361,6367,{"$raw":"00000000"},"110408","MJ.3.4081","INOP",3,"T",128.58839,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,6362,6368,{"$raw":"00000000"},"110408","MJ.3.4082","INOP",3,"T",3.65049,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO RIO DE CIMA",null,null,"R",null,"110408",1,null,null,6363,6369,{"$raw":"00000000"},"110408","MJ.3.4083","INOP",3,"T",2.54031,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6364,6370,{"$raw":"00000000"},"110408","MJ.3.4084","INOP",3,"T",5.92014,3.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6365,6371,{"$raw":"00000000"},"110408","MJ.2.290","OPER",2,"A",37.48730,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6366,6372,{"$raw":"00000000"},"110408","MJ.2.291","OPER",2,"A",145.68923,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6367,6373,{"$raw":"00000000"},"110408","MJ.3.4085","INOP",3,"T",10.23932,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6368,6374,{"$raw":"00000000"},"110408","MJ.3.4086","INOP",3,"T",104.95568,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6369,6375,{"$raw":"00000000"},"110402","MJ.3.4087","INOP",3,"T",5.71557,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",2,null,null,6370,6376,{"$raw":"00000000"},"110408","MJ.3.4088","INOP",3,"T",576.17501,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,"26 ago 2003","R",null,"110410",1,null,"R DOS ARNEIROS",6371,6377,{"$raw":"00000000"},"110410","R DOS ARNEIROS","INOP",3,"T",58.69181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZ",null,null,"R",null,"110405",1,null,"R DA CRUZ",6372,6378,{"$raw":"00000000"},"110405","R DA CRUZ","INOP",3,"T",25.02882,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",6373,6379,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,null,11.98568,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CALÇADA",null,null,"R",null,"110410",1,null,"R DA CALÇADA",6374,6380,{"$raw":"00000000"},"110410","R DA CALÇADA","INOP",3,"T",22.85588,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6375,6381,{"$raw":"00000000"},"110402","MJ.3.4089","INOP",3,"T",39.25250,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6376,6382,{"$raw":"00000000"},"110402","MJ.3.4090","INOP",3,"T",5.02467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6377,6383,{"$raw":"00000000"},"110402","MJ.3.4091","INOP",3,"T",27.59154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6378,6384,{"$raw":"00000000"},"110402","MJ.3.4092","INOP",3,"T",9.28046,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6379,6385,{"$raw":"00000000"},"110402","MJ.3.4093","INOP",3,"T",39.97180,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,6380,6386,{"$raw":"00000000"},"110402","MJ.3.4094","INOP",3,"T",322.23284,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6381,6387,{"$raw":"00000000"},"110408","MJ.3.4095","INOP",3,"T",6.42593,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6382,6388,{"$raw":"00000000"},"110408","MJ.3.4096","INOP",3,"T",16.11191,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6383,6389,{"$raw":"00000000"},"110408","MJ.3.4097","INOP",3,"T",57.27056,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6384,6390,{"$raw":"00000000"},"110402","MJ.3.4098","INOP",3,"T",5.63261,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",2,null,null,6385,6391,{"$raw":"00000000"},"110408","MJ.3.4099","INOP",3,"T",88.52818,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6386,6392,{"$raw":"00000000"},"110408","MJ.3.4100","INOP",3,"T",3.43926,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6387,6393,{"$raw":"00000000"},"110408","MJ.3.4101","INOP",3,"T",88.12180,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6388,6394,{"$raw":"00000000"},"110408","MJ.3.4102","INOP",3,"T",30.52976,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6389,6395,{"$raw":"00000000"},"110408","MJ.3.4103","INOP",3,"T",6.68357,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6390,6396,{"$raw":"00000000"},"110408","MJ.3.4104","INOP",3,"T",113.55799,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6391,6397,{"$raw":"00000000"},"110408","MJ.3.4105","INOP",3,"T",226.00970,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6392,6398,{"$raw":"00000000"},"110402","MJ.3.4106","INOP",3,"T",5.36143,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6393,6399,{"$raw":"00000000"},"110402","MJ.3.4107","INOP",3,"T",225.61389,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6394,6400,{"$raw":"00000000"},"110402","MJ.3.4108","INOP",3,"T",63.85823,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6395,6401,{"$raw":"00000000"},"110408","MJ.3.4109","INOP",3,"T",8.12686,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6396,6402,{"$raw":"00000000"},"110408","MJ.3.4110","INOP",3,"T",189.50962,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6397,6403,{"$raw":"00000000"},"110408","MJ.3.4111","INOP",3,"T",299.05177,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6398,6404,{"$raw":"00000000"},"110402","MJ.3.4112","INOP",3,"T",6.24806,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6399,6405,{"$raw":"00000000"},"110402","MJ.3.4113","INOP",3,"T",70.32534,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6400,6406,{"$raw":"00000000"},"110402","MJ.3.4114","INOP",3,"T",198.80675,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6401,6407,{"$raw":"00000000"},"110402","MJ.3.4115","INOP",3,"T",4.54362,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6402,6408,{"$raw":"00000000"},"110402","MJ.3.4116","INOP",3,"T",171.34549,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6403,6409,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,10.56882,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6404,6410,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,75.73885,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6405,6411,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,27.29330,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6406,6412,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,10.60945,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6407,6413,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,42.29231,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6408,6414,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,71.49070,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6409,6415,{"$raw":"00000000"},"110402","MJ.3.4117","INOP",3,"T",5.54701,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6410,6416,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,6.18728,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6411,6417,{"$raw":"00000000"},"110402","MJ.3.4118","INOP",3,"T",277.79671,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6412,6418,{"$raw":"00000000"},"110402","MJ.3.4119","INOP",3,"T",73.80313,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6413,6419,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,132.66659,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6414,6420,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,8.01899,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6415,6421,{"$raw":"00000000"},"110402","MJ.3.4120","INOP",3,"T",444.15312,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6416,6422,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.35805,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6417,6423,{"$raw":"00000000"},"110402","MJ.3.4121","INOP",3,"T",7.86010,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6418,6424,{"$raw":"00000000"},"110402","MJ.3.4122","INOP",3,"T",15.55206,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6419,6425,{"$raw":"00000000"},"110402","MJ.3.4123","INOP",3,"T",3.59390,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6420,6426,{"$raw":"00000000"},"110408","MJ.3.4124","INOP",3,"T",12.46594,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","SD",null,null,null,null,null,"110408",1,null,null,6421,6427,{"$raw":"00000000"},"110408","MJ.3.4125","INOP",3,"T",190.31830,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6422,6428,{"$raw":"00000000"},"110402","MJ.3.4126","INOP",3,"T",5.29076,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6423,6429,{"$raw":"00000000"},"110402","MJ.3.4127","INOP",3,"T",10.47224,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,6424,6430,{"$raw":"00000000"},"110407","MJ.3.4128","INOP",3,"T",0.57385,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6425,6431,{"$raw":"00000000"},"110405","MJ.3.4129","INOP",3,"T",7.72678,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6426,6432,{"$raw":"00000000"},"110405","MJ.3.4130","INOP",3,"T",261.59129,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6427,6433,{"$raw":"00000000"},"110408","MJ.3.4131","INOP",3,"T",2.47202,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6428,6434,{"$raw":"00000000"},"110408","MJ.3.4132","INOP",3,"T",138.20075,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6429,6435,{"$raw":"00000000"},"110402","MJ.3.4133","INOP",3,"T",8.38650,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6430,6436,{"$raw":"00000000"},"110402","MJ.3.4134","INOP",3,"T",59.06333,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6431,6437,{"$raw":"00000000"},"110402","MJ.3.4135","INOP",3,"T",323.16961,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110405",1,null,"R DA FONTE",6432,6438,{"$raw":"00000000"},"110405","R DA FONTE","INOP",3,"T",87.24989,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6433,6439,{"$raw":"00000000"},"110405","MJ.3.4136","INOP",3,"T",33.44471,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","PROF MARCELO CAETANO","Teve a designação de: R 25 de Abril",null,"R",null,"110406",1,null,"R PROF MARCELO CAETANO",6434,6440,{"$raw":"00000000"},"110406","R PROF MARCELO CAETANO","OPER",2,"T",63.64500,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,6435,6441,{"$raw":"00000000"},"110402","MJ.3.4137","INOP",3,"T",68.05534,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO HOSPITAL",null,null,"TV",null,"110402",1,null,"TV DO HOSPITAL",6436,6442,{"$raw":"00000000"},"110402","TV DO HOSPITAL","INOP",3,"T",18.26191,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6437,6443,{"$raw":"00000000"},"110405","MJ.3.4138","INOP",3,"T",0.30871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","de Agua",null,null,null,null,null,"110408",1,null,null,6438,6444,{"$raw":"00000000"},"110408","MJ.3.4139","INOP",3,"T",268.39532,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6439,6445,{"$raw":"00000000"},"110408","MJ.3.4140","INOP",3,"T",292.89147,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6440,6446,{"$raw":"00000000"},"110408","MJ.3.4141","INOP",3,"T",2.31398,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6441,6447,{"$raw":"00000000"},"110408","MJ.3.4142","INOP",3,"T",294.14858,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6442,6448,{"$raw":"00000000"},"110408","MJ.3.4143","INOP",3,"T",30.91920,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6443,6449,{"$raw":"00000000"},"110405","MJ.3.4144","INOP",3,"T",217.22024,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6444,6450,{"$raw":"00000000"},"110405","MJ.3.4145","INOP",3,"T",145.11031,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6445,6451,{"$raw":"00000000"},"110405","MJ.3.4146","INOP",3,"T",17.20184,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,6446,6452,{"$raw":"00000000"},"110402","MJ.3.4147","INOP",3,"T",13.89052,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",2,null,null,6447,6453,{"$raw":"00000000"},"110408","MJ.3.4148","INOP",3,"T",330.52290,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6448,6454,{"$raw":"00000000"},"110402","MJ.3.4149","INOP",3,"T",1.72456,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,6449,6455,{"$raw":"00000000"},"110402","MJ.3.4150","INOP",3,"T",205.39105,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HORTA VELHA",null,"15 Mar 1999","R",null,"110402",1,null,"R DA HORTA VELHA",6450,6456,{"$raw":"00000000"},"110402","R DA HORTA VELHA","OPER",2,"A",96.56150,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6451,6457,{"$raw":"00000000"},"110402","MJ.2.292","OPER",2,"A",6.41445,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6452,6458,{"$raw":"00000000"},"110409","MJ.3.4151","INOP",3,"T",122.96840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6453,6459,{"$raw":"00000000"},"110408","MJ.3.4152","INOP",3,"T",211.63722,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6454,6460,{"$raw":"00000000"},"110408","MJ.3.4153","INOP",3,"T",2.96987,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6455,6461,{"$raw":"00000000"},"110408","MJ.3.4154","INOP",3,"T",7.23439,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6456,6462,{"$raw":"00000000"},"110402","MJ.3.4155","INOP",3,"T",3.85684,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6457,6463,{"$raw":"00000000"},"110402","MJ.3.4156","INOP",3,"T",4.72151,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6458,6464,{"$raw":"00000000"},"110402","MJ.3.4157","INOP",3,"T",21.72737,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6459,6465,{"$raw":"00000000"},"110402","MJ.3.4158","INOP",3,"T",21.03394,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6460,6466,{"$raw":"00000000"},"110408","MJ.3.4159","INOP",3,"T",53.47513,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6461,6467,{"$raw":"00000000"},"110408","MJ.3.4160","INOP",3,"T",10.15618,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6462,6468,{"$raw":"00000000"},"110408","MJ.2.293","OPER",2,"A",9.53651,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6463,6469,{"$raw":"00000000"},"110408","MJ.3.4161","INOP",3,"T",13.88954,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LOPES",null,null,"R",null,"110408",1,null,"R LOPES",6464,6470,{"$raw":"00000000"},"110408","R LOPES","INOP",3,"T",304.32693,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",6465,6471,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",143.36573,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAMEIRAS",null,null,"R",null,"110405",1,null,"R DAS LAMEIRAS",6466,6472,{"$raw":"00000000"},"110405","R DAS LAMEIRAS","INOP",3,"T",356.88616,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FELICIDADE",null,null,"R",null,"110405",1,null,"R DA FELICIDADE",6467,6473,{"$raw":"00000000"},"110405","R DA FELICIDADE","OPER",2,"A",26.42389,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6468,6474,{"$raw":"00000000"},"110402","MJ.3.4162","INOP",3,"T",36.35619,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6469,6475,{"$raw":"00000000"},"110402","MJ.3.4163","INOP",3,"T",97.96192,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6470,6476,{"$raw":"00000000"},"110402","MJ.3.4164","INOP",3,"T",55.01706,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",6471,6477,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",14.05486,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,6472,6478,{"$raw":"00000000"},"110410","MJ.2.294","OPER",2,"A",13.40770,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,"15 Mar 1999","R",null,"110402",1,null,"R DO OLIVAL DA FONTE",6473,6479,{"$raw":"00000000"},"110402","R DO OLIVAL DA FONTE","OPER",2,"A",9.68666,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6474,6480,{"$raw":"00000000"},"110405","MJ.3.4165","INOP",3,"T",2.12408,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110402",1,null,null,6475,6481,{"$raw":"00000000"},"110402","MJ.3.4166","INOP",3,"T",729.34889,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,"15 Mar 1999","R",null,"110402",1,null,"R DO OLIVAL DA FONTE",6476,6482,{"$raw":"00000000"},"110402","R DO OLIVAL DA FONTE","OPER",2,"A",43.92421,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6477,6483,{"$raw":"00000000"},"110405","MJ.3.4167","INOP",3,"T",721.02309,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6478,6484,{"$raw":"00000000"},"110405","MJ.3.4168","INOP",3,"T",189.56338,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6479,6485,{"$raw":"00000000"},"110405","MJ.3.4169","INOP",3,"T",357.04942,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6480,6486,{"$raw":"00000000"},"110405","MJ.3.4170","INOP",3,"T",379.81839,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6481,6487,{"$raw":"00000000"},"110405","MJ.3.4171","INOP",3,"T",256.92554,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6482,6488,{"$raw":"00000000"},"110405","MJ.3.4172","INOP",3,"T",58.20993,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,6483,6489,{"$raw":"00000000"},"110407","MJ.3.4173","INOP",3,"T",177.00427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6484,6490,{"$raw":"00000000"},"110405","MJ.3.4174","INOP",3,"T",344.51234,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,6485,6491,{"$raw":"00000000"},"110405","MJ.3.4175","INOP",3,"T",416.69890,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SALGUEIRAL",null,"SIM","R",null,"110407",1,null,"R DO SALGUEIRAL",6486,6492,{"$raw":"00000000"},"110407","R DO SALGUEIRAL","INOP",3,"T",905.04219,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,6487,6493,{"$raw":"00000000"},"110405","MJ.3.4176","INOP",3,"T",995.39068,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6488,6494,{"$raw":"00000000"},"110405","MJ.3.4177","INOP",3,"T",266.00199,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6489,6495,{"$raw":"00000000"},"110402","MJ.3.4178","INOP",3,"T",85.53135,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6490,6496,{"$raw":"00000000"},"110402","MJ.3.4179","INOP",3,"T",230.92502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6491,6497,{"$raw":"00000000"},"110402","MJ.3.4180","INOP",3,"T",45.71128,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6492,6498,{"$raw":"00000000"},"110402","MJ.3.4181","INOP",3,"T",245.45919,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,6493,6499,{"$raw":"00000000"},"110402","MJ.3.4182","INOP",3,"T",895.07416,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",2,null,null,6494,6500,{"$raw":"00000000"},"110408","MJ.3.4183","INOP",3,"T",558.49804,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",2,null,null,6495,6501,{"$raw":"00000000"},"110402","MJ.3.4184","INOP",3,"T",473.89379,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6496,6502,{"$raw":"00000000"},"110402","MJ.3.4185","INOP",3,"T",196.58880,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6497,6503,{"$raw":"00000000"},"110402","MJ.3.4186","INOP",3,"T",179.99632,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6498,6504,{"$raw":"00000000"},"110402","MJ.2.295","OPER",2,"A",129.43370,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6499,6505,{"$raw":"00000000"},"110402","MJ.3.4187","INOP",3,"T",177.65252,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6500,6506,{"$raw":"00000000"},"110402","MJ.3.4188","INOP",3,"T",174.77120,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6501,6507,{"$raw":"00000000"},"110402","MJ.3.4189","INOP",3,"T",140.67126,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6502,6508,{"$raw":"00000000"},"110402","MJ.3.4190","INOP",3,"T",293.85235,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,6503,6509,{"$raw":"00000000"},"110408","MJ.3.4191","INOP",3,"T",521.97213,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6504,6510,{"$raw":"00000000"},"110402","MJ.2.296","OPER",2,"A",184.68218,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",2,null,null,6505,6511,{"$raw":"00000000"},"110408","MJ.3.4192","INOP",3,"T",279.66693,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6506,6512,{"$raw":"00000000"},"110402","MJ.3.4193","INOP",3,"T",348.00447,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6507,6513,{"$raw":"00000000"},"110402","MJ.2.297","OPER",2,"A",156.87531,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6508,6514,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1",null,null,"ARISTIDES SOUSA MENDES",null,"31 Jul 2000","R",null,"110402",1,null,"R ARISTIDES SOUSA MENDES",6509,6515,{"$raw":"00000000"},"110402","R ARISTIDES SOUSA MENDES","INOP",3,"T",175.35690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6510,6516,{"$raw":"00000000"},"110408","MJ.3.4194","INOP",3,"T",126.40330,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6511,6517,{"$raw":"00000000"},"110409","MJ.3.4195","INOP",3,"T",245.46861,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6512,6518,{"$raw":"00000000"},"110408","MJ.3.4196","INOP",3,"T",142.77130,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6513,6519,{"$raw":"00000000"},"110402","MJ.3.4197","INOP",3,"T",52.69970,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6514,6520,{"$raw":"00000000"},"110402","MJ.3.4198","INOP",3,"T",228.71647,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6515,6521,{"$raw":"00000000"},"110408","MJ.3.4199","INOP",3,"T",411.66713,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6516,6522,{"$raw":"00000000"},"110408","MJ.3.4200","INOP",3,"T",260.75419,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6517,6523,{"$raw":"00000000"},"110402","MJ.3.4201","INOP",3,"T",405.56560,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6518,6524,{"$raw":"00000000"},"110408","MJ.3.4202","INOP",3,"T",159.72981,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","DA",null,null,null,null,null,"110408",1,null,null,6519,6525,{"$raw":"00000000"},"110408","MJ.3.4203","INOP",3,"T",211.97735,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6520,6526,{"$raw":"00000000"},"110408","MJ.3.4204","INOP",3,"T",145.60583,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6521,6527,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,258.22248,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6522,6528,{"$raw":"00000000"},"110408","MJ.2.298","OPER",2,"A",393.53787,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6523,6529,{"$raw":"00000000"},"110408","MJ.3.4205","INOP",3,"T",439.01979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6524,6530,{"$raw":"00000000"},"110408","MJ.3.4206","INOP",3,"T",574.35932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6525,6531,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,170.47388,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,6526,6532,{"$raw":"00000000"},"110408","MJ.3.4207","INOP",3,"T",442.52170,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6527,6533,{"$raw":"00000000"},"110408","MJ.2.299","OPER",2,"A",364.35527,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6528,6534,{"$raw":"00000000"},"110408","MJ.3.4208","INOP",3,"T",183.27739,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6529,6535,{"$raw":"00000000"},"110408","MJ.3.4209","INOP",3,"T",125.59789,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,6530,6536,{"$raw":"00000000"},"110407","MJ.3.4210","INOP",3,"T",222.68827,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,6531,6537,{"$raw":"00000000"},"110407","MJ.3.4211","INOP",3,"T",177.62555,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,6532,6538,{"$raw":"00000000"},"110407","MJ.3.4212","INOP",3,"T",216.59870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6533,6539,{"$raw":"00000000"},"110405","MJ.3.4213","INOP",3,"T",14.23393,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6534,6540,{"$raw":"00000000"},"110405","MJ.3.4214","INOP",3,"T",1.61059,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,6535,6541,{"$raw":"00000000"},"110407","MJ.3.4215","INOP",3,"T",638.71284,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6536,6542,{"$raw":"00000000"},"110405","MJ.3.4216","INOP",3,"T",466.18080,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6537,6543,{"$raw":"00000000"},"110405","MJ.3.4217","INOP",3,"T",57.78689,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6538,6544,{"$raw":"00000000"},"110405","MJ.3.4218","INOP",3,"T",1.88322,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6539,6545,{"$raw":"00000000"},"110405","MJ.3.4219","INOP",3,"T",2.17278,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6540,6546,{"$raw":"00000000"},"110405","MJ.3.4220","INOP",3,"T",481.58539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6541,6547,{"$raw":"00000000"},"110405","MJ.3.4221","INOP",3,"T",33.42683,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","SD",null,null,null,null,null,null,"110405",1,null,null,6542,6548,{"$raw":"00000000"},"110405","MJ.3.4222","INOP",3,"T",66.08699,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6543,6549,{"$raw":"00000000"},"110405","MJ.3.4223","INOP",3,"T",3.20412,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6544,6550,{"$raw":"00000000"},"110405","MJ.3.4224","INOP",3,"T",596.03141,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",2,null,null,6545,6551,{"$raw":"00000000"},"110408","MJ.3.4225","INOP",3,"T",318.17312,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,6546,6552,{"$raw":"00000000"},"110405","MJ.3.4226","INOP",3,"T",220.56441,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6547,6553,{"$raw":"00000000"},"110405","MJ.3.4227","INOP",3,"T",466.48657,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,6548,6554,{"$raw":"00000000"},"110405","MJ.3.4228","INOP",3,"T",543.72385,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S TOMÉ",null,null,"R",null,"110405",1,null,"R S TOMÉ",6549,6555,{"$raw":"00000000"},"110405","R S TOMÉ","INOP",3,"T",68.52120,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6550,6556,{"$raw":"00000000"},"110405","MJ.3.4229","INOP",3,"T",39.14240,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6551,6557,{"$raw":"00000000"},"110405","MJ.3.4230","INOP",3,"T",44.73851,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6552,6558,{"$raw":"00000000"},"110405","MJ.3.4231","INOP",3,"T",112.23341,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6553,6559,{"$raw":"00000000"},"110405","MJ.3.4232","INOP",3,"T",51.04667,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,6554,6560,{"$raw":"00000000"},"110407","MJ.2.300","OPER",2,"A",493.26478,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,6555,6561,{"$raw":"00000000"},"110407","MJ.3.4233","INOP",3,"T",3.42854,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,6556,6562,{"$raw":"00000000"},"110407","MJ.3.4234","INOP",3,"T",257.31598,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6557,6563,{"$raw":"00000000"},"110405","MJ.3.4235","INOP",3,"T",32.78067,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6558,6564,{"$raw":"00000000"},"110405","MJ.3.4236","INOP",3,"T",3.01761,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","SD",null,null,null,null,null,null,"110405",1,null,null,6559,6565,{"$raw":"00000000"},"110405","MJ.3.4237","INOP",3,"T",119.07437,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6560,6566,{"$raw":"00000000"},"110405","MJ.3.4238","INOP",3,"T",3.16834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6561,6567,{"$raw":"00000000"},"110409","MJ.3.4239","INOP",3,"T",7.72605,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",2,null,null,6562,6568,{"$raw":"00000000"},"110402","MJ.3.4240","INOP",3,"T",286.85269,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6563,6569,{"$raw":"00000000"},"110402","MJ.3.4241","INOP",3,"T",398.43222,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ÁGUA TINTA",null,"23 Out 2000","R",null,"110405",1,null,"R ÁGUA TINTA",6564,6570,{"$raw":"00000000"},"110405","R ÁGUA TINTA","OPER",2,"A",60.63668,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA SERRA",null,null,"R",null,"110403",1,null,"R DA SERRA",6565,6571,{"$raw":"00000000"},"110403","R DA SERRA","OPER",1,"A",115.38928,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6566,6572,{"$raw":"00000000"},"110402","MJ.3.4242","INOP",3,"T",594.24878,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6567,6573,{"$raw":"00000000"},"110409","MJ.3.4243","INOP",3,"T",90.46270,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6568,6574,{"$raw":"00000000"},"110409","MJ.3.4244","INOP",3,"T",361.09649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6569,6575,{"$raw":"00000000"},"110409","MJ.3.4245","INOP",3,"T",93.61384,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6570,6576,{"$raw":"00000000"},"110409","MJ.3.4246","INOP",3,"T",22.50718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6571,6577,{"$raw":"00000000"},"110409","MJ.3.4247","INOP",3,"T",10.32000,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6572,6578,{"$raw":"00000000"},"110408","MJ.3.4248","INOP",3,"T",63.17399,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6573,6579,{"$raw":"00000000"},"110408","MJ.3.4249","INOP",3,"T",118.44383,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6574,6580,{"$raw":"00000000"},"110408","MJ.3.4250","INOP",3,"T",210.88728,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6575,6581,{"$raw":"00000000"},"110408","MJ.3.4251","INOP",3,"T",302.63430,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6576,6582,{"$raw":"00000000"},"110408","MJ.3.4252","INOP",3,"T",99.48126,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6577,6583,{"$raw":"00000000"},"110408","MJ.3.4253","INOP",3,"T",83.68276,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6578,6584,{"$raw":"00000000"},"110408","MJ.3.4254","INOP",3,"T",432.94539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6579,6585,{"$raw":"00000000"},"110408","MJ.3.4255","INOP",3,"T",281.43253,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6580,6586,{"$raw":"00000000"},"110408","MJ.3.4256","INOP",3,"T",3.84775,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6581,6587,{"$raw":"00000000"},"110408","MJ.3.4257","INOP",3,"T",124.06472,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6582,6588,{"$raw":"00000000"},"110408","MJ.3.4258","INOP",3,"T",23.12167,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6583,6589,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,82.66149,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6584,6590,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,105.77981,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6585,6591,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,101.67155,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6586,6592,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,382.78361,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6587,6593,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,204.98077,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6588,6594,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.53028,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6589,6595,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.81033,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6590,6596,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,154.32613,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6591,6597,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,82.28618,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6592,6598,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.55281,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6593,6599,{"$raw":"00000000"},"110409","MJ.3.4259","INOP",3,"T",24.09529,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6594,6600,{"$raw":"00000000"},"110409","MJ.3.4260","INOP",3,"T",48.23425,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6595,6601,{"$raw":"00000000"},"110409","MJ.3.4261","INOP",3,"T",3.36828,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6596,6602,{"$raw":"00000000"},"110409","MJ.3.4262","INOP",3,"T",3.36057,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6597,6603,{"$raw":"00000000"},"110409","MJ.3.4263","INOP",3,"T",21.89402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6598,6604,{"$raw":"00000000"},"110409","MJ.3.4264","INOP",3,"T",203.44927,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6599,6605,{"$raw":"00000000"},"110409","MJ.3.4265","INOP",3,"T",36.45108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6600,6606,{"$raw":"00000000"},"110409","MJ.3.4266","INOP",3,"T",3.38209,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6601,6607,{"$raw":"00000000"},"110409","MJ.3.4267","INOP",3,"T",108.40921,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,6602,6608,{"$raw":"00000000"},"110409","MJ.3.4268","INOP",3,"T",53.84841,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",2,null,null,6603,6609,{"$raw":"00000000"},"110402","MJ.3.4269","INOP",3,"T",190.65540,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,6604,6610,{"$raw":"00000000"},"110402","MJ.3.4270","INOP",3,"T",155.32107,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",2,null,null,6605,6611,{"$raw":"00000000"},"110402","MJ.3.4271","INOP",3,"T",119.11058,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6606,6612,{"$raw":"00000000"},"110402","MJ.3.4272","INOP",3,"T",166.86126,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6607,6613,{"$raw":"00000000"},"110402","MJ.3.4273","INOP",3,"T",2.88737,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6608,6614,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,161.69750,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FALAGUEIRA",null,"SIM","R",null,"110402",2,"110405","R DA FALAGUEIRA",6609,6615,{"$raw":"00000000"},"110402","R DA FALAGUEIRA","INOP",3,"T",25.29908,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,6610,6616,{"$raw":"00000000"},"110405","MJ.3.4274","INOP",3,"T",65.18116,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6611,6617,{"$raw":"00000000"},"110405","MJ.3.4275","INOP",3,"T",12.05390,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6612,6618,{"$raw":"00000000"},"110405","MJ.3.4276","INOP",3,"T",13.68247,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6613,6619,{"$raw":"00000000"},"110402","MJ.3.4277","INOP",3,"T",11.25799,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR JOSÉ JOYCE DAMAS MORA",null,null,"R",null,"110402",1,null,"R DR JOSÉ JOYCE DAMAS MORA",6614,6620,{"$raw":"00000000"},"110402","R DR JOSÉ JOYCE DAMAS MORA","INOP",3,"T",62.27596,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS BOMBEIROS",null,null,"AV",null,"110402",1,null,"AV DOS BOMBEIROS",6615,6621,{"$raw":"00000000"},"110402","AV DOS BOMBEIROS","INOP",3,"T",18.47169,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6616,6622,{"$raw":"00000000"},"110402","MJ.3.4278","INOP",3,"T",59.70576,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6617,6623,{"$raw":"00000000"},"110402","MJ.3.4279","INOP",3,"T",2.37474,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6618,6624,{"$raw":"00000000"},"110402","MJ.3.4280","INOP",3,"T",44.79877,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6619,6625,{"$raw":"00000000"},"110402","MJ.3.4281","INOP",3,"T",44.03277,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR JOSÉ JOYCE DAMAS MORA",null,null,"R",null,"110402",1,null,"R DR JOSÉ JOYCE DAMAS MORA",6620,6626,{"$raw":"00000000"},"110402","R DR JOSÉ JOYCE DAMAS MORA","INOP",3,"T",77.12659,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CUTELARIA",null,"26 mar 2001","LG",null,"110405",1,null,"LG DA CUTELARIA",6621,6627,{"$raw":"00000000"},"110405","LG DA CUTELARIA","INOP",3,"A",71.50085,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"R",null,"110402",1,null,"R DO MOINHO",6622,6628,{"$raw":"00000000"},"110402","R DO MOINHO","INOP",3,"T",209.70305,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6623,6629,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,90.47799,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6624,6630,{"$raw":"00000000"},"110408","MJ.3.4282","INOP",3,"T",2.82379,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6625,6631,{"$raw":"00000000"},"110408","MJ.3.4283","INOP",3,"T",127.67269,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6626,6632,{"$raw":"00000000"},"110408","MJ.3.4284","INOP",3,"T",82.70701,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6627,6633,{"$raw":"00000000"},"110408","MJ.3.4285","INOP",3,"T",130.78550,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6628,6634,{"$raw":"00000000"},"110408","MJ.3.4286","INOP",3,"T",76.98366,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6629,6635,{"$raw":"00000000"},"110408","MJ.3.4287","INOP",3,"T",241.75643,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6630,6636,{"$raw":"00000000"},"110408","MJ.2.301","OPER",2,"A",88.78484,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6631,6637,{"$raw":"00000000"},"110408","MJ.3.4288","INOP",3,"T",97.77369,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6632,6638,{"$raw":"00000000"},"110408","MJ.3.4289","INOP",3,"T",7.35392,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6633,6639,{"$raw":"00000000"},"110408","MJ.3.4290","INOP",3,"T",182.89875,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6634,6640,{"$raw":"00000000"},"110408","MJ.3.4291","INOP",3,"T",64.03485,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6635,6641,{"$raw":"00000000"},"110408","MJ.3.4292","INOP",3,"T",76.17038,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6636,6642,{"$raw":"00000000"},"110408","MJ.2.302","OPER",2,"A",415.07248,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6637,6643,{"$raw":"00000000"},"110408","MJ.2.303","OPER",2,"A",237.04220,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6638,6644,{"$raw":"00000000"},"110408","MJ.3.4293","INOP",3,"T",214.14313,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6639,6645,{"$raw":"00000000"},"110408","MJ.2.304","OPER",2,"A",91.88759,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6640,6646,{"$raw":"00000000"},"110408","MJ.2.305","OPER",2,"A",41.15034,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6641,6647,{"$raw":"00000000"},"110408","MJ.3.4294","INOP",3,"T",15.02784,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6642,6648,{"$raw":"00000000"},"110408","MJ.2.306","OPER",2,"A",37.56593,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6643,6649,{"$raw":"00000000"},"110408","MJ.2.307","OPER",2,"A",149.86603,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6644,6650,{"$raw":"00000000"},"110408","MJ.3.4295","INOP",3,"T",0.15133,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6645,6651,{"$raw":"00000000"},"110408","MJ.3.4296","INOP",3,"T",9.05394,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA EIRA",null,"24 set 2002","R",null,"110408",1,null,"R DA EIRA",6646,6652,{"$raw":"00000000"},"110408","R DA EIRA","OPER",2,"A",74.60492,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"R",null,"110408",1,null,"R DA ESCOLA",6647,6653,{"$raw":"00000000"},"110408","R DA ESCOLA","INOP",3,"T",39.25095,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"R",null,"110408",1,null,"R DA ESCOLA",6648,6654,{"$raw":"00000000"},"110408","R DA ESCOLA","OPER",2,"A",30.29292,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6649,6655,{"$raw":"00000000"},"110408","MJ.3.4297","INOP",3,"T",58.55283,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6650,6656,{"$raw":"00000000"},"110408","MJ.3.4298","INOP",3,"T",11.69523,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6651,6657,{"$raw":"00000000"},"110408","MJ.3.4299","INOP",3,"T",13.96786,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6652,6658,{"$raw":"00000000"},"110408","MJ.3.4300","INOP",3,"T",58.38970,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6653,6659,{"$raw":"00000000"},"110408","MJ.3.4301","INOP",3,"T",132.53876,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6654,6660,{"$raw":"00000000"},"110408","MJ.3.4302","INOP",3,"T",7.55001,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6655,6661,{"$raw":"00000000"},"110408","MJ.3.4303","INOP",3,"T",59.27111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6656,6662,{"$raw":"00000000"},"110408","MJ.3.4304","INOP",3,"T",121.33374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6657,6663,{"$raw":"00000000"},"110408","MJ.3.4305","INOP",3,"T",45.85760,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6658,6664,{"$raw":"00000000"},"110408","MJ.3.4306","INOP",3,"T",135.29434,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6659,6665,{"$raw":"00000000"},"110408","MJ.3.4307","INOP",3,"T",43.55565,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6660,6666,{"$raw":"00000000"},"110408","MJ.3.4308","INOP",3,"T",92.11909,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6661,6667,{"$raw":"00000000"},"110408","MJ.3.4309","INOP",3,"T",65.17703,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6662,6668,{"$raw":"00000000"},"110408","MJ.2.308","OPER",2,"A",122.84775,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6663,6669,{"$raw":"00000000"},"110408","MJ.2.309","OPER",2,"A",169.75450,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6664,6670,{"$raw":"00000000"},"110408","MJ.3.4310","INOP",3,"T",91.69783,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6665,6671,{"$raw":"00000000"},"110408","MJ.3.4311","INOP",3,"T",171.09064,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6666,6672,{"$raw":"00000000"},"110408","MJ.2.310","OPER",2,"A",100.60029,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6667,6673,{"$raw":"00000000"},"110408","MJ.2.311","OPER",2,"A",143.97903,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6668,6674,{"$raw":"00000000"},"110408","MJ.2.312","OPER",2,"A",268.94483,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6669,6675,{"$raw":"00000000"},"110408","MJ.3.4312","INOP",3,"T",118.61307,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6670,6676,{"$raw":"00000000"},"110408","MJ.3.4313","INOP",3,"T",190.76780,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6671,6677,{"$raw":"00000000"},"110408","MJ.3.4314","INOP",3,"T",86.06782,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6672,6678,{"$raw":"00000000"},"110408","MJ.3.4315","INOP",3,"T",40.78275,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6673,6679,{"$raw":"00000000"},"110408","MJ.3.4316","INOP",3,"T",176.42316,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","de Agua",null,null,null,null,null,"110408",1,null,null,6674,6680,{"$raw":"00000000"},"110408","MJ.3.4317","INOP",3,"T",163.17182,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6675,6681,{"$raw":"00000000"},"110408","MJ.3.4318","INOP",3,"T",62.81504,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6676,6682,{"$raw":"00000000"},"110408","MJ.2.313","OPER",2,"A",202.49304,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6677,6683,{"$raw":"00000000"},"110408","MJ.2.314","OPER",2,"A",133.60636,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6678,6684,{"$raw":"00000000"},"110408","MJ.2.315","OPER",2,"A",129.87610,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["1",null,null,"DO RIO DE CIMA",null,null,"R",null,"110408",1,null,"R DO RIO DE CIMA",6679,6685,{"$raw":"00000000"},"110408","R DO RIO DE CIMA","INOP",3,"T",12.17369,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6680,6686,{"$raw":"00000000"},"110408","MJ.3.4319","INOP",3,"T",43.26838,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO RIO DE CIMA",null,null,"R",null,"110408",1,null,"R DO RIO DE CIMA",6681,6687,{"$raw":"00000000"},"110408","R DO RIO DE CIMA","INOP",3,"T",135.37642,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6682,6688,{"$raw":"00000000"},"110408","MJ.2.316","OPER",2,"A",200.75133,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110408",1,null,"R DO CAMPO DA BOLA",6683,6689,{"$raw":"00000000"},"110408","R DO CAMPO DA BOLA","OPER",2,"A",21.85211,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6684,6690,{"$raw":"00000000"},"110408","MJ.3.4320","INOP",3,"T",104.75773,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6685,6691,{"$raw":"00000000"},"110408","MJ.3.4321","INOP",3,"T",2.09938,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO MOURISCO",null,null,"R",null,"110410",1,null,"R DO OUTEIRO MOURISCO",6686,6692,{"$raw":"00000000"},"110410","R DO OUTEIRO MOURISCO","INOP",3,"A",101.72356,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",6687,6693,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",119.26802,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HORTA VELHA",null,"15 Mar 1999","R",null,"110402",1,null,"R DA HORTA VELHA",6688,6694,{"$raw":"00000000"},"110402","R DA HORTA VELHA","OPER",2,"A",190.78412,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MALMEQUERES",null,null,"R",null,"110405",1,null,"R DOS MALMEQUERES",6689,6695,{"$raw":"00000000"},"110405","R DOS MALMEQUERES","INOP",3,"T",286.97197,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","SÃO JOSÉ",null,null,"R",null,"110409",1,null,"R SÃO JOSÉ",6690,6696,{"$raw":"00000000"},"110409","R SÃO JOSÉ","OPER",1,"T",34.86723,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"BC",null,"110402",1,null,"BC DA LIBERDADE",6691,6697,{"$raw":"00000000"},"110402","BC DA LIBERDADE","INOP",3,"T",40.21458,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",6692,6698,{"$raw":"00000000"},"110402","R DA LIBERDADE","INOP",3,"T",25.83740,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6693,6699,{"$raw":"00000000"},"110408","MJ.3.4322","INOP",3,"T",63.53404,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6694,6700,{"$raw":"00000000"},"110408","MJ.3.4323","INOP",3,"T",1.98479,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6695,6701,{"$raw":"00000000"},"110408","MJ.3.4324","INOP",3,"T",57.43480,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6696,6702,{"$raw":"00000000"},"110408","MJ.3.4325","INOP",3,"T",2.55362,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE MENDO",null,"04 Mai 2004","R",null,"110408",1,null,"R VALE MENDO",6697,6703,{"$raw":"00000000"},"110408","R VALE MENDO","INOP",3,"T",269.09595,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6698,6704,{"$raw":"00000000"},"110408","MJ.3.4326","INOP",3,"T",36.38040,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6699,6705,{"$raw":"00000000"},"110408","MJ.3.4327","INOP",3,"T",4.65317,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6700,6706,{"$raw":"00000000"},"110408","MJ.3.4328","INOP",3,"T",80.32910,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6701,6707,{"$raw":"00000000"},"110408","MJ.3.4329","INOP",3,"T",54.19305,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,6702,6708,{"$raw":"00000000"},"110408","MJ.3.4330","INOP",3,"T",367.11381,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6703,6709,{"$raw":"00000000"},"110408","MJ.3.4331","INOP",3,"T",182.58932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6704,6710,{"$raw":"00000000"},"110408","MJ.3.4332","INOP",3,"T",112.83070,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6705,6711,{"$raw":"00000000"},"110408","MJ.3.4333","INOP",3,"T",223.00167,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6706,6712,{"$raw":"00000000"},"110408","MJ.3.4334","INOP",3,"T",140.54892,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6707,6713,{"$raw":"00000000"},"110408","MJ.3.4335","INOP",3,"T",211.80669,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6708,6714,{"$raw":"00000000"},"110408","MJ.3.4336","INOP",3,"T",410.53460,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6709,6715,{"$raw":"00000000"},"110408","MJ.2.317","OPER",2,"A",78.75199,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6710,6716,{"$raw":"00000000"},"110408","MJ.3.4337","INOP",2,"T",195.86138,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6711,6717,{"$raw":"00000000"},"110408","MJ.2.318","OPER",2,"A",164.52754,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6712,6718,{"$raw":"00000000"},"110408","MJ.2.319","OPER",2,"A",193.15337,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6713,6719,{"$raw":"00000000"},"110408","MJ.3.4338","INOP",3,"T",6.99412,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6714,6720,{"$raw":"00000000"},"110408","MJ.3.4339","INOP",3,"T",455.42190,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6715,6721,{"$raw":"00000000"},"110408","MJ.2.320","OPER",2,"A",370.39413,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6716,6722,{"$raw":"00000000"},"110408","MJ.3.4340","INOP",2,"T",163.22418,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6717,6723,{"$raw":"00000000"},"110408","MJ.3.4341","INOP",3,"T",210.02502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6718,6724,{"$raw":"00000000"},"110408","MJ.3.4342","INOP",3,"T",106.89797,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6719,6725,{"$raw":"00000000"},"110408","MJ.3.4343","INOP",3,"T",13.11281,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6720,6726,{"$raw":"00000000"},"110408","MJ.2.321","OPER",2,"A",108.27022,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6721,6727,{"$raw":"00000000"},"110408","MJ.3.4344","INOP",2,"T",35.13626,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6722,6728,{"$raw":"00000000"},"110408","MJ.2.322","OPER",2,"A",121.74585,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6723,6729,{"$raw":"00000000"},"110408","MJ.2.323","OPER",2,"A",174.87263,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6724,6730,{"$raw":"00000000"},"110408","MJ.3.4345","INOP",3,"T",2.93614,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6725,6731,{"$raw":"00000000"},"110408","MJ.3.4346","INOP",3,"T",33.24281,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6726,6732,{"$raw":"00000000"},"110408","MJ.2.324","OPER",2,"A",3.13255,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6727,6733,{"$raw":"00000000"},"110408","MJ.3.4347","INOP",3,"T",20.92200,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6728,6734,{"$raw":"00000000"},"110408","MJ.2.325","OPER",2,"A",3.57360,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6729,6735,{"$raw":"00000000"},"110408","MJ.3.4348","INOP",3,"T",127.66071,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6730,6736,{"$raw":"00000000"},"110408","MJ.3.4349","INOP",3,"T",43.12150,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6731,6737,{"$raw":"00000000"},"110408","MJ.1.141","OPER",1,"A",4.15011,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6732,6738,{"$raw":"00000000"},"110408","MJ.3.4350","INOP",3,"T",13.57493,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6733,6739,{"$raw":"00000000"},"110408","MJ.3.4351","INOP",3,"T",82.13320,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6734,6740,{"$raw":"00000000"},"110408","MJ.3.4352","INOP",3,"T",6.72646,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ARNEIRO","Dúvida na localização",null,"TV",null,"110408",1,null,"TV DO ARNEIRO",6735,6741,{"$raw":"00000000"},"110408","TV DO ARNEIRO","INOP",3,"T",102.87605,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ARNEIRO","Dúvida na localização",null,"TV",null,"110408",1,null,"TV DO ARNEIRO",6736,6742,{"$raw":"00000000"},"110408","TV DO ARNEIRO","INOP",3,"A",101.70905,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6737,6743,{"$raw":"00000000"},"110408","MJ.3.4353","INOP",3,"T",38.80597,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6738,6744,{"$raw":"00000000"},"110408","MJ.3.4354","INOP",3,"T",14.69329,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6739,6745,{"$raw":"00000000"},"110408","MJ.3.4355","INOP",3,"T",11.09047,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6740,6746,{"$raw":"00000000"},"110408","MJ.3.4356","INOP",3,"T",2.25460,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6741,6747,{"$raw":"00000000"},"110408","MJ.3.4357","INOP",3,"T",2.70431,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6742,6748,{"$raw":"00000000"},"110408","MJ.3.4358","INOP",3,"T",35.09351,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6743,6749,{"$raw":"00000000"},"110408","MJ.3.4359","INOP",3,"T",2.31251,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6744,6750,{"$raw":"00000000"},"110408","MJ.3.4360","INOP",3,"T",29.32593,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6745,6751,{"$raw":"00000000"},"110408","MJ.3.4361","INOP",3,"T",2.31683,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6746,6752,{"$raw":"00000000"},"110408","MJ.3.4362","INOP",3,"T",39.35561,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS","Dúvida na localização","2 nov 1998","TV",null,"110408",1,null,"TV DOS ARNEIROS",6747,6753,{"$raw":"00000000"},"110408","TV DOS ARNEIROS","INOP",3,"T",69.81666,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6748,6754,{"$raw":"00000000"},"110408","MJ.3.4363","INOP",3,"T",124.83187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6749,6755,{"$raw":"00000000"},"110408","MJ.3.4364","INOP",3,"T",21.47196,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6750,6756,{"$raw":"00000000"},"110408","MJ.3.4365","INOP",3,"T",84.75553,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6751,6757,{"$raw":"00000000"},"110408","MJ.3.4366","INOP",3,"T",6.13705,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6752,6758,{"$raw":"00000000"},"110408","MJ.3.4367","INOP",3,"T",7.39603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"TV",null,"110405",1,null,"TV DA FONTE",6753,6759,{"$raw":"00000000"},"110405","TV DA FONTE","OPER",1,"A",98.41418,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6754,6760,{"$raw":"00000000"},"110408","MJ.3.4368","INOP",3,"T",3.05334,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6755,6761,{"$raw":"00000000"},"110408","MJ.3.4369","INOP",3,"T",53.81842,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6756,6762,{"$raw":"00000000"},"110408","MJ.3.4370","INOP",3,"T",2.56070,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6757,6763,{"$raw":"00000000"},"110408","MJ.3.4371","INOP",3,"T",31.88473,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6758,6764,{"$raw":"00000000"},"110408","MJ.3.4372","INOP",3,"T",6.98765,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6759,6765,{"$raw":"00000000"},"110408","MJ.1.142","OPER",1,"A",3.59635,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6760,6766,{"$raw":"00000000"},"110408","MJ.3.4373","INOP",3,"T",45.66322,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6761,6767,{"$raw":"00000000"},"110408","MJ.2.326","OPER",2,"A",2.59208,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6762,6768,{"$raw":"00000000"},"110408","MJ.3.4374","INOP",3,"T",18.20927,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Terra Nova",null,null,null,null,null,"110408",1,null,null,6763,6769,{"$raw":"00000000"},"110408","MJ.3.4375","INOP",3,"T",112.56558,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6764,6770,{"$raw":"00000000"},"110408","MJ.3.4376","INOP",3,"T",17.96442,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6765,6771,{"$raw":"00000000"},"110408","MJ.3.4377","INOP",3,"T",10.92002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6766,6772,{"$raw":"00000000"},"110408","MJ.3.4378","INOP",3,"T",17.70398,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6767,6773,{"$raw":"00000000"},"110408","MJ.3.4379","INOP",3,"T",45.87505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6768,6774,{"$raw":"00000000"},"110408","MJ.3.4380","INOP",3,"T",22.70478,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","da Liberdade",null,null,null,null,null,"110408",1,null,null,6769,6775,{"$raw":"00000000"},"110408","MJ.3.4381","INOP",3,"T",163.18336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6770,6776,{"$raw":"00000000"},"110408","MJ.3.4382","INOP",3,"T",28.81708,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6771,6777,{"$raw":"00000000"},"110408","MJ.1.143","OPER",1,"A",2.80080,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6772,6778,{"$raw":"00000000"},"110408","MJ.3.4383","INOP",3,"T",111.97897,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",2,null,null,6773,6779,{"$raw":"00000000"},"110408","MJ.3.4384","INOP",3,"T",54.47587,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6774,6780,{"$raw":"00000000"},"110408","MJ.3.4385","INOP",3,"T",229.80028,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,6775,6781,{"$raw":"00000000"},"110408","MJ.3.4386","INOP",3,"T",225.16618,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6776,6782,{"$raw":"00000000"},"110408","MJ.3.4387","INOP",3,"T",32.45687,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6777,6783,{"$raw":"00000000"},"110402","MJ.3.4388","INOP",3,"T",369.46237,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6778,6784,{"$raw":"00000000"},"110402","MJ.3.4389","INOP",3,"T",27.37516,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6779,6785,{"$raw":"00000000"},"110402","MJ.3.4390","INOP",3,"T",208.34980,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6780,6786,{"$raw":"00000000"},"110402","MJ.3.4391","INOP",3,"T",85.27076,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6781,6787,{"$raw":"00000000"},"110402","MJ.3.4392","INOP",3,"T",451.05768,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6782,6788,{"$raw":"00000000"},"110408","MJ.3.4393","INOP",3,"T",254.17794,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6783,6789,{"$raw":"00000000"},"110408","MJ.3.4394","INOP",3,"T",7.15308,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6784,6790,{"$raw":"00000000"},"110408","MJ.3.4395","INOP",3,"T",2.72118,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6785,6791,{"$raw":"00000000"},"110408","MJ.3.4396","INOP",3,"T",61.47992,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6786,6792,{"$raw":"00000000"},"110408","MJ.3.4397","INOP",3,"T",236.21009,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6787,6793,{"$raw":"00000000"},"110408","MJ.3.4398","INOP",3,"T",73.58178,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6788,6794,{"$raw":"00000000"},"110408","MJ.3.4399","INOP",3,"T",144.04936,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6789,6795,{"$raw":"00000000"},"110408","MJ.3.4400","INOP",3,"T",32.05365,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6790,6796,{"$raw":"00000000"},"110408","MJ.3.4401","INOP",3,"T",176.90353,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6791,6797,{"$raw":"00000000"},"110408","MJ.1.144","OPER",1,"A",2.76132,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6792,6798,{"$raw":"00000000"},"110408","MJ.3.4402","INOP",3,"T",277.15812,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6793,6799,{"$raw":"00000000"},"110408","MJ.3.4403","INOP",3,"T",294.18887,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6794,6800,{"$raw":"00000000"},"110402","MJ.3.4404","INOP",3,"T",224.92546,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",2,null,null,6795,6801,{"$raw":"00000000"},"110408","MJ.3.4405","INOP",3,"T",241.21337,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6796,6802,{"$raw":"00000000"},"110408","MJ.3.4406","INOP",3,"T",87.61416,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6797,6803,{"$raw":"00000000"},"110408","MJ.3.4407","INOP",3,"T",119.84611,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6798,6804,{"$raw":"00000000"},"110408","MJ.3.4408","INOP",3,"T",75.37628,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6799,6805,{"$raw":"00000000"},"110408","MJ.3.4409","INOP",3,"T",155.94757,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6800,6806,{"$raw":"00000000"},"110408","MJ.3.4410","INOP",3,"T",107.82733,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6801,6807,{"$raw":"00000000"},"110408","MJ.3.4411","INOP",3,"T",406.14907,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6802,6808,{"$raw":"00000000"},"110408","MJ.3.4412","INOP",3,"T",44.95126,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6803,6809,{"$raw":"00000000"},"110408","MJ.3.4413","INOP",3,"T",171.91162,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6804,6810,{"$raw":"00000000"},"110408","MJ.3.4414","INOP",3,"T",88.38840,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6805,6811,{"$raw":"00000000"},"110408","MJ.3.4415","INOP",3,"T",2.93906,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6806,6812,{"$raw":"00000000"},"110408","MJ.3.4416","INOP",3,"T",3.29692,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6807,6813,{"$raw":"00000000"},"110408","MJ.3.4417","INOP",3,"T",138.72311,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6808,6814,{"$raw":"00000000"},"110408","MJ.3.4418","INOP",3,"T",144.98724,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6809,6815,{"$raw":"00000000"},"110408","MJ.3.4419","INOP",3,"T",221.53002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6810,6816,{"$raw":"00000000"},"110408","MJ.3.4420","INOP",3,"T",170.68100,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6811,6817,{"$raw":"00000000"},"110408","MJ.3.4421","INOP",3,"T",294.25939,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6812,6818,{"$raw":"00000000"},"110408","MJ.3.4422","INOP",3,"T",302.97126,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6813,6819,{"$raw":"00000000"},"110408","MJ.3.4423","INOP",3,"T",90.74019,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6814,6820,{"$raw":"00000000"},"110408","MJ.3.4424","INOP",3,"T",18.69028,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",2,null,null,6815,6821,{"$raw":"00000000"},"110408","MJ.3.4425","INOP",3,"T",246.85148,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","LIBERDADE",null,null,"R",null,"110408",1,null,"R LIBERDADE",6816,6822,{"$raw":"00000000"},"110408","R LIBERDADE","OPER",2,"A",67.97395,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PADARIA",null,null,"R",null,"110408",1,null,"R DA PADARIA",6817,6823,{"$raw":"00000000"},"110408","R DA PADARIA","INOP",3,"T",28.62119,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON DE MATOS",6818,6824,{"$raw":"00000000"},"110408","R NORTON DE MATOS","OPER",2,"A",54.64066,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6819,6825,{"$raw":"00000000"},"110402","MJ.3.4426","INOP",3,"T",5.37908,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6820,6826,{"$raw":"00000000"},"110402","MJ.3.4427","INOP",3,"T",82.82615,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6821,6827,{"$raw":"00000000"},"110402","MJ.3.4428","INOP",3,"T",41.67294,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6822,6828,{"$raw":"00000000"},"110405","MJ.3.4429","INOP",3,"T",134.16186,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6823,6829,{"$raw":"00000000"},"110405","MJ.3.4430","INOP",3,"T",110.29191,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6824,6830,{"$raw":"00000000"},"110405","MJ.3.4431","INOP",3,"T",57.57490,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6825,6831,{"$raw":"00000000"},"110405","MJ.3.4432","INOP",3,"T",1.82603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6826,6832,{"$raw":"00000000"},"110402","MJ.3.4433","INOP",3,"T",135.57849,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6827,6833,{"$raw":"00000000"},"110402","MJ.3.4434","INOP",3,"T",147.71681,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6828,6834,{"$raw":"00000000"},"110402","MJ.3.4435","INOP",3,"T",19.28419,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6829,6835,{"$raw":"00000000"},"110402","MJ.3.4436","INOP",3,"T",14.93484,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6830,6836,{"$raw":"00000000"},"110402","MJ.3.4437","INOP",3,"T",35.67236,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6831,6837,{"$raw":"00000000"},"110402","MJ.3.4438","INOP",3,"T",181.17109,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6832,6838,{"$raw":"00000000"},"110402","MJ.3.4439","INOP",3,"T",203.23774,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6833,6839,{"$raw":"00000000"},"110402","MJ.3.4440","INOP",3,"T",230.89855,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6834,6840,{"$raw":"00000000"},"110402","MJ.3.4441","INOP",3,"T",79.15873,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6835,6841,{"$raw":"00000000"},"110402","MJ.3.4442","INOP",3,"T",144.81568,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6836,6842,{"$raw":"00000000"},"110402","MJ.3.4443","INOP",3,"T",307.61988,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6837,6843,{"$raw":"00000000"},"110402","MJ.3.4444","INOP",3,"T",139.18675,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6838,6844,{"$raw":"00000000"},"110402","MJ.3.4445","INOP",3,"T",2.53837,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6839,6845,{"$raw":"00000000"},"110402","MJ.3.4446","INOP",3,"T",114.37361,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6840,6846,{"$raw":"00000000"},"110402","MJ.3.4447","INOP",3,"T",129.89911,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6841,6847,{"$raw":"00000000"},"110402","MJ.3.4448","INOP",3,"T",166.16591,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6842,6848,{"$raw":"00000000"},"110402","MJ.3.4449","INOP",3,"T",176.18130,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6843,6849,{"$raw":"00000000"},"110402","MJ.3.4450","INOP",3,"T",447.03834,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6844,6850,{"$raw":"00000000"},"110402","MJ.3.4451","INOP",3,"T",43.55974,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6845,6851,{"$raw":"00000000"},"110402","MJ.3.4452","INOP",3,"T",113.75028,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6846,6852,{"$raw":"00000000"},"110402","MJ.3.4453","INOP",3,"T",537.23811,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6847,6853,{"$raw":"00000000"},"110402","MJ.3.4454","INOP",3,"T",413.53329,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6848,6854,{"$raw":"00000000"},"110402","MJ.3.4455","INOP",3,"T",50.99474,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6849,6855,{"$raw":"00000000"},"110402","MJ.3.4456","INOP",3,"T",94.46779,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,6850,6856,{"$raw":"00000000"},"110402","MJ.3.4457","INOP",3,"T",59.16090,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6851,6857,{"$raw":"00000000"},"110408","MJ.3.4458","INOP",3,"T",187.79553,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6852,6858,{"$raw":"00000000"},"110408","MJ.3.4459","INOP",3,"T",63.88916,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6853,6859,{"$raw":"00000000"},"110408","MJ.3.4460","INOP",3,"T",14.37501,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6854,6860,{"$raw":"00000000"},"110408","MJ.3.4461","INOP",3,"T",27.33178,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6855,6861,{"$raw":"00000000"},"110408","MJ.3.4462","INOP",3,"T",8.82087,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6856,6862,{"$raw":"00000000"},"110408","MJ.3.4463","INOP",3,"T",25.77181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6857,6863,{"$raw":"00000000"},"110408","MJ.3.4464","INOP",3,"T",4.42143,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6858,6864,{"$raw":"00000000"},"110408","MJ.1.145","OPER",1,"A",3.74733,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6859,6865,{"$raw":"00000000"},"110408","MJ.1.146","OPER",1,"A",3.67971,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6860,6866,{"$raw":"00000000"},"110408","MJ.3.4465","INOP",3,"T",138.87142,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6861,6867,{"$raw":"00000000"},"110408","MJ.3.4466","INOP",3,"T",3.78114,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6862,6868,{"$raw":"00000000"},"110408","MJ.3.4467","INOP",3,"T",40.21350,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6863,6869,{"$raw":"00000000"},"110408","MJ.3.4468","INOP",3,"T",46.13574,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6864,6870,{"$raw":"00000000"},"110408","MJ.3.4469","INOP",3,"T",2.70148,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6865,6871,{"$raw":"00000000"},"110408","MJ.3.4470","INOP",3,"T",19.47261,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6866,6872,{"$raw":"00000000"},"110408","MJ.3.4471","INOP",3,"T",5.88328,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6867,6873,{"$raw":"00000000"},"110408","MJ.3.4472","INOP",3,"T",35.49049,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,6868,6874,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6869,6875,{"$raw":"00000000"},"110408","MJ.3.4473","INOP",3,"T",2.94328,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6870,6876,{"$raw":"00000000"},"110408","MJ.3.4474","INOP",3,"T",161.34423,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6871,6877,{"$raw":"00000000"},"110408","MJ.3.4475","INOP",3,"T",42.96684,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6872,6878,{"$raw":"00000000"},"110408","MJ.3.4476","INOP",3,"T",4.69435,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6873,6879,{"$raw":"00000000"},"110408","MJ.3.4477","INOP",3,"T",24.53474,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"CABEÇO DO MOINHO",null,null,"R",null,"110405",1,null,"R CABEÇO DO MOINHO",6874,6880,{"$raw":"00000000"},"110405","R CABEÇO DO MOINHO","INOP",3,"T",19.81073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FALAGUEIRA",null,"07 Out 2003","R",null,"110405",2,"110402","R DA FALAGUEIRA",6875,6881,{"$raw":"00000000"},"110405","R DA FALAGUEIRA","INOP",3,"T",163.66772,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"TV",null,"110402",1,null,"TV DAS FLORES",6876,6882,{"$raw":"00000000"},"110402","TV DAS FLORES","INOP",3,"T",48.59111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6877,6883,{"$raw":"00000000"},"110408","MJ.3.4478","INOP",3,"T",44.43834,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6878,6884,{"$raw":"00000000"},"110408","MJ.3.4479","INOP",3,"T",2.54002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6879,6885,{"$raw":"00000000"},"110408","MJ.1.147","OPER",1,"A",3.66879,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6880,6886,{"$raw":"00000000"},"110408","MJ.3.4480","INOP",3,"T",86.26609,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6881,6887,{"$raw":"00000000"},"110408","MJ.1.148","OPER",1,"A",3.71237,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6882,6888,{"$raw":"00000000"},"110408","MJ.3.4481","INOP",3,"T",61.01932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6883,6889,{"$raw":"00000000"},"110408","MJ.3.4482","INOP",3,"T",52.11790,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6884,6890,{"$raw":"00000000"},"110408","MJ.3.4483","INOP",3,"T",3.20656,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6885,6891,{"$raw":"00000000"},"110408","MJ.3.4484","INOP",3,"T",33.20213,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6886,6892,{"$raw":"00000000"},"110408","MJ.3.4485","INOP",3,"T",24.97768,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6887,6893,{"$raw":"00000000"},"110408","MJ.3.4486","INOP",3,"T",9.41657,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6888,6894,{"$raw":"00000000"},"110408","MJ.3.4487","INOP",3,"T",5.26165,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6889,6895,{"$raw":"00000000"},"110408","MJ.3.4488","INOP",3,"T",2.72371,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6890,6896,{"$raw":"00000000"},"110408","MJ.3.4489","INOP",3,"T",15.95962,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6891,6897,{"$raw":"00000000"},"110408","MJ.3.4490","INOP",3,"T",7.79380,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6892,6898,{"$raw":"00000000"},"110408","MJ.3.4491","INOP",3,"T",29.02331,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6893,6899,{"$raw":"00000000"},"110408","MJ.1.149","OPER",1,"A",3.78451,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6894,6900,{"$raw":"00000000"},"110408","MJ.3.4492","INOP",3,"T",140.41547,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6895,6901,{"$raw":"00000000"},"110408","MJ.3.4493","INOP",3,"T",1.60963,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6896,6902,{"$raw":"00000000"},"110408","MJ.3.4494","INOP",3,"T",29.76117,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6897,6903,{"$raw":"00000000"},"110408","MJ.3.4495","INOP",3,"T",23.35462,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"R DE VALE SOBREIRO",null,"24 set 2002","R",null,"110408",1,null,"R DE VALE SOBREIRO",6898,6904,{"$raw":"00000000"},"110408","R DE VALE SOBREIRO","INOP",3,"T",8.76817,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6899,6905,{"$raw":"00000000"},"110408","MJ.3.4496","INOP",3,"T",13.85529,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE VALE SOBREIRO",null,"24 set 2002","R",null,"110408",1,null,"R DE VALE SOBREIRO",6900,6906,{"$raw":"00000000"},"110408","R DE VALE SOBREIRO","INOP",3,"T",14.84355,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE VALE SOBREIRO",null,"24 set 2002","R",null,"110408",1,null,"R DE VALE SOBREIRO",6901,6907,{"$raw":"00000000"},"110408","R DE VALE SOBREIRO","INOP",3,"T",72.83989,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","Vale Sobreiro",null,null,null,null,null,"110408",1,null,null,6902,6908,{"$raw":"00000000"},"110408","MJ.3.4497","INOP",3,"T",94.25945,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6903,6909,{"$raw":"00000000"},"110408","MJ.3.4498","INOP",3,"T",10.15798,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6904,6910,{"$raw":"00000000"},"110408","MJ.3.4499","INOP",3,"T",2.56275,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6905,6911,{"$raw":"00000000"},"110408","MJ.3.4500","INOP",3,"T",19.20977,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6906,6912,{"$raw":"00000000"},"110408","MJ.3.4501","INOP",3,"T",21.33979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6907,6913,{"$raw":"00000000"},"110408","MJ.3.4502","INOP",3,"T",8.82842,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6908,6914,{"$raw":"00000000"},"110408","MJ.3.4503","INOP",3,"T",18.76682,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6909,6915,{"$raw":"00000000"},"110408","MJ.3.4504","INOP",3,"T",2.43590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6910,6916,{"$raw":"00000000"},"110408","MJ.3.4505","INOP",3,"T",2.65530,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6911,6917,{"$raw":"00000000"},"110408","MJ.3.4506","INOP",3,"T",5.15214,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6912,6918,{"$raw":"00000000"},"110408","MJ.3.4507","INOP",3,"T",3.63275,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6913,6919,{"$raw":"00000000"},"110408","MJ.3.4508","INOP",3,"T",16.49060,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6914,6920,{"$raw":"00000000"},"110408","MJ.3.4509","INOP",3,"T",63.41582,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,6915,6921,{"$raw":"00000000"},"110408","MJ.3.4510","INOP",3,"T",57.26164,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6916,6922,{"$raw":"00000000"},"110408","MJ.3.4511","INOP",3,"T",32.07050,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6917,6923,{"$raw":"00000000"},"110408","MJ.3.4512","INOP",3,"T",18.64762,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6918,6924,{"$raw":"00000000"},"110408","MJ.3.4513","INOP",3,"T",125.15715,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6919,6925,{"$raw":"00000000"},"110408","MJ.3.4514","INOP",3,"T",5.25864,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6920,6926,{"$raw":"00000000"},"110408","MJ.3.4515","INOP",3,"T",3.02200,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6921,6927,{"$raw":"00000000"},"110408","MJ.3.4516","INOP",3,"T",45.18236,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6922,6928,{"$raw":"00000000"},"110408","MJ.3.4517","INOP",3,"T",10.00539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6923,6929,{"$raw":"00000000"},"110408","MJ.3.4518","INOP",3,"T",19.47745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,6924,6930,{"$raw":"00000000"},"110408","MJ.3.4519","INOP",3,"T",176.51112,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6925,6931,{"$raw":"00000000"},"110408","MJ.3.4520","INOP",3,"T",83.44062,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6926,6932,{"$raw":"00000000"},"110408","MJ.3.4521","INOP",3,"T",77.33300,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6927,6933,{"$raw":"00000000"},"110402","MJ.3.4522","INOP",3,"T",31.18495,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6928,6934,{"$raw":"00000000"},"110402","MJ.3.4523","INOP",3,"T",105.36948,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6929,6935,{"$raw":"00000000"},"110402","MJ.3.4524","INOP",3,"T",56.25453,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6930,6936,{"$raw":"00000000"},"110402","MJ.3.4525","INOP",3,"T",116.97216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6931,6937,{"$raw":"00000000"},"110402","MJ.3.4526","INOP",3,"T",34.08721,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6932,6938,{"$raw":"00000000"},"110402","MJ.3.4527","INOP",3,"T",126.46408,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6933,6939,{"$raw":"00000000"},"110402","MJ.3.4528","INOP",3,"T",63.54870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6934,6940,{"$raw":"00000000"},"110402","MJ.3.4529","INOP",3,"T",320.83928,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO MOSQUEIRO",null,"Processo nº 01/2012/98","CAMINHO",null,"110408",1,null,"CAMINHO DO OUTEIRO MOSQUEIRO",6935,6941,{"$raw":"00000000"},"110408","CAMINHO DO OUTEIRO MOSQUEIRO","INOP",3,"T",80.24545,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL NICOLAU",null,null,"R",null,"110404",1,null,"R CASAL NICOLAU",6936,6944,{"$raw":"00000000"},"110404","R CASAL NICOLAU","OPER",1,"A",196.77729,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6937,6945,{"$raw":"00000000"},"110408","MJ.3.4530","INOP",3,"T",3.19395,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6938,6946,{"$raw":"00000000"},"110408","MJ.3.4531","INOP",3,"T",32.94068,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6939,6947,{"$raw":"00000000"},"110402","MJ.3.4532","INOP",3,"T",55.19763,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6940,6948,{"$raw":"00000000"},"110402","MJ.3.4533","INOP",3,"T",78.59556,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6941,6949,{"$raw":"00000000"},"110402","MJ.3.4534","INOP",3,"T",227.31278,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6942,6950,{"$raw":"00000000"},"110402","MJ.3.4535","INOP",3,"T",166.10326,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6943,6951,{"$raw":"00000000"},"110402","MJ.3.4536","INOP",3,"T",115.44122,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6944,6952,{"$raw":"00000000"},"110402","MJ.3.4537","INOP",3,"T",72.44157,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6945,6953,{"$raw":"00000000"},"110402","MJ.3.4538","INOP",3,"T",25.04666,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6946,6954,{"$raw":"00000000"},"110402","MJ.3.4539","INOP",3,"T",8.97080,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6947,6955,{"$raw":"00000000"},"110402","MJ.3.4540","INOP",3,"T",5.61385,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6948,6956,{"$raw":"00000000"},"110402","MJ.3.4541","INOP",3,"T",72.92193,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6949,6957,{"$raw":"00000000"},"110402","MJ.3.4542","INOP",3,"T",83.02086,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6950,6958,{"$raw":"00000000"},"110402","MJ.3.4543","INOP",3,"T",1.79478,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6951,6959,{"$raw":"00000000"},"110402","MJ.3.4544","INOP",3,"T",248.99175,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6952,6960,{"$raw":"00000000"},"110402","MJ.3.4545","INOP",3,"T",16.36475,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6953,6961,{"$raw":"00000000"},"110402","MJ.3.4546","INOP",3,"T",360.75756,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6954,6962,{"$raw":"00000000"},"110402","MJ.2.327","OPER",2,"A",581.51966,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6955,6963,{"$raw":"00000000"},"110408","MJ.3.4547","INOP",3,"T",78.33307,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6956,6964,{"$raw":"00000000"},"110408","MJ.3.4548","INOP",3,"T",3.02775,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6957,6965,{"$raw":"00000000"},"110408","MJ.3.4549","INOP",3,"T",2.79979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6958,6966,{"$raw":"00000000"},"110408","MJ.3.4550","INOP",3,"T",119.90778,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6959,6967,{"$raw":"00000000"},"110402","MJ.3.4551","INOP",3,"T",100.36503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6960,6968,{"$raw":"00000000"},"110402","MJ.3.4552","INOP",3,"T",3.50051,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",2,null,null,6961,6969,{"$raw":"00000000"},"110408","MJ.3.4553","INOP",3,"T",151.76990,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6962,6970,{"$raw":"00000000"},"110402","MJ.3.4554","INOP",3,"T",3.22014,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6963,6971,{"$raw":"00000000"},"110402","MJ.3.4555","INOP",3,"T",2.93906,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",2,null,null,6964,6972,{"$raw":"00000000"},"110408","MJ.3.4556","INOP",3,"T",66.25936,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6965,6973,{"$raw":"00000000"},"110402","MJ.3.4557","INOP",3,"T",107.35528,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6966,6974,{"$raw":"00000000"},"110402","MJ.3.4558","INOP",3,"T",48.16607,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6967,6975,{"$raw":"00000000"},"110402","MJ.3.4559","INOP",3,"T",86.00098,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6968,6976,{"$raw":"00000000"},"110402","MJ.3.4560","INOP",3,"T",49.98324,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6969,6977,{"$raw":"00000000"},"110402","MJ.3.4561","INOP",3,"T",3.21479,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,6970,6978,{"$raw":"00000000"},"110405","MJ.3.4562","INOP",3,"T",2.82418,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6971,6979,{"$raw":"00000000"},"110405","MJ.3.4563","INOP",3,"T",110.66196,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6972,6980,{"$raw":"00000000"},"110405","MJ.3.4564","INOP",3,"T",117.17049,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CUTELARIA",null,"26 mar 2001","LG",null,"110405",1,null,"LG DA CUTELARIA",6973,6981,{"$raw":"00000000"},"110405","LG DA CUTELARIA","INOP",3,"T",9.80855,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6974,6982,{"$raw":"00000000"},"110405","MJ.3.4565","INOP",3,"T",38.71039,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6975,6983,{"$raw":"00000000"},"110405","MJ.3.4566","INOP",3,"T",28.96259,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6976,6984,{"$raw":"00000000"},"110405","MJ.3.4567","INOP",3,"T",3.67404,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,6977,6985,{"$raw":"00000000"},"110405","MJ.3.4568","INOP",3,"T",57.67820,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","Montejunto",null,null,null,null,null,"110408",2,null,null,6978,6986,{"$raw":"00000000"},"110408","MJ.3.4569","INOP",3,"T",191.18073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",2,null,null,6979,6987,{"$raw":"00000000"},"110408","MJ.3.4570","INOP",3,"T",61.41065,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",2,null,null,6980,6988,{"$raw":"00000000"},"110408","MJ.3.4571","INOP",3,"T",67.02965,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,6981,6989,{"$raw":"00000000"},"110408","MJ.3.4572","INOP",3,"T",19.83463,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",2,null,null,6982,6990,{"$raw":"00000000"},"110408","MJ.3.4573","INOP",3,"T",365.76713,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,6983,6991,{"$raw":"00000000"},"110408","MJ.3.4574","INOP",3,"T",42.93781,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","EN","115_1",null,null,null,null,null,"110408",2,null,null,6984,6992,{"$raw":"00000000"},"110408","MJ.1.150","OPER",1,"A",3.71381,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",2,null,null,6985,6993,{"$raw":"00000000"},"110408","MJ.3.4575","INOP",3,"T",2.27035,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6986,6994,{"$raw":"00000000"},"110402","MJ.2.328","OPER",2,"A",244.38477,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6987,6995,{"$raw":"00000000"},"110402","MJ.3.4576","INOP",3,"T",29.62710,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6988,6996,{"$raw":"00000000"},"110402","MJ.2.329","OPER",2,"A",169.01276,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6989,6997,{"$raw":"00000000"},"110402","MJ.2.330","OPER",2,"A",67.12251,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CUTELARIA",null,"26 mar 2001","LG",null,"110405",1,null,"LG DA CUTELARIA",6990,6998,{"$raw":"00000000"},"110405","LG DA CUTELARIA","INOP",3,"T",19.86457,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CUTELARIA",null,"SIM","LG",null,"110405",1,null,"LG DA CUTELARIA",6991,6999,{"$raw":"00000000"},"110405","LG DA CUTELARIA","INOP",3,"T",10.45359,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS","Dúvida na localização","2 nov 1998","TV",null,"110408",1,null,"TV DOS ARNEIROS",6992,7000,{"$raw":"00000000"},"110408","TV DOS ARNEIROS","INOP",3,"T",103.64512,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CHARNECA",null,"26 mar 2001","BC",null,"110405",1,null,"BC DA CHARNECA",6993,7001,{"$raw":"00000000"},"110405","BC DA CHARNECA","INOP",3,"T",157.60845,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS PITEIROS",null,null,"R",null,"110408",1,null,"R DOS PITEIROS",6994,7002,{"$raw":"00000000"},"110408","R DOS PITEIROS","INOP",3,"T",175.71138,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110405",1,null,"R DAS FLORES",6995,7003,{"$raw":"00000000"},"110405","R DAS FLORES","INOP",3,"T",44.28181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6996,7004,{"$raw":"00000000"},"110402","MJ.3.4577","INOP",3,"T",416.72144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NOSSA SENHORA DA CONCEIÇÃO",null,null,"R",null,"110402",1,null,"R NOSSA SENHORA DA CONCEIÇÃO",6997,7005,{"$raw":"00000000"},"110402","R NOSSA SENHORA DA CONCEIÇÃO","INOP",3,"T",83.37825,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6998,7006,{"$raw":"00000000"},"110402","MJ.3.4578","INOP",3,"T",2.36478,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,6999,7007,{"$raw":"00000000"},"110402","MJ.3.4579","INOP",3,"T",121.07910,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",2,null,null,7000,7008,{"$raw":"00000000"},"110405","MJ.3.4580","INOP",3,"T",89.72544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7001,7009,{"$raw":"00000000"},"110405","MJ.3.4581","INOP",3,"T",68.34320,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7002,7010,{"$raw":"00000000"},"110405","MJ.3.4582","INOP",3,"T",3.40834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7003,7011,{"$raw":"00000000"},"110405","MJ.3.4583","INOP",3,"T",76.69197,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7004,7012,{"$raw":"00000000"},"110405","MJ.3.4584","INOP",3,"T",4.44042,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,7005,7013,{"$raw":"00000000"},"110402","MJ.3.4585","INOP",3,"T",24.25173,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",2,null,null,7006,7014,{"$raw":"00000000"},"110405","MJ.3.4586","INOP",3,"T",104.15962,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7007,7015,{"$raw":"00000000"},"110405","MJ.3.4587","INOP",3,"T",28.78026,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,"10 Set 2002","R",null,"110405",1,null,"R DA BICA",7008,7016,{"$raw":"00000000"},"110405","R DA BICA","INOP",3,"T",55.62925,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7009,7017,{"$raw":"00000000"},"110405","MJ.3.4588","INOP",3,"T",39.32103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE",null,"26 mar 2001","R",null,"110405",1,null,"R DO VALE",7010,7018,{"$raw":"00000000"},"110405","R DO VALE","INOP",3,"T",324.39758,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FALAGUEIRA",null,"07 Out 2003","R",null,"110405",2,"110402","R DA FALAGUEIRA",7011,7019,{"$raw":"00000000"},"110405","R DA FALAGUEIRA","INOP",3,"T",236.15735,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALTO DA BICA",null,"10 Set 2002","R",null,"110405",1,null,"R ALTO DA BICA",7012,7020,{"$raw":"00000000"},"110405","R ALTO DA BICA","INOP",3,"T",158.80571,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS","Dúvida na localização","2 nov 1998","TV",null,"110408",1,null,"TV DOS ARNEIROS",7013,7021,{"$raw":"00000000"},"110408","TV DOS ARNEIROS","INOP",3,"T",172.62060,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,"10 Set 2002","R",null,"110405",1,null,"R DA BICA",7014,7022,{"$raw":"00000000"},"110405","R DA BICA","INOP",3,"T",196.59851,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BORRACHO",null,"26 mar 2001","R",null,"110405",1,null,"R DO BORRACHO",7015,7023,{"$raw":"00000000"},"110405","R DO BORRACHO","OPER",1,"A",97.00396,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7016,7024,{"$raw":"00000000"},"110402","MJ.3.4589","INOP",3,"T",31.16928,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7017,7025,{"$raw":"00000000"},"110402","MJ.3.4590","INOP",3,"T",181.63427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7018,7026,{"$raw":"00000000"},"110402","MJ.3.4591","INOP",3,"T",110.78830,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7019,7027,{"$raw":"00000000"},"110405","MJ.2.331","OPER",2,"A",2.31294,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7020,7028,{"$raw":"00000000"},"110405","MJ.3.4592","INOP",3,"T",36.64838,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7021,7029,{"$raw":"00000000"},"110405","MJ.3.4593","INOP",3,"T",16.27638,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7022,7030,{"$raw":"00000000"},"110405","MJ.3.4594","INOP",3,"T",83.19589,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7023,7031,{"$raw":"00000000"},"110405","MJ.3.4595","INOP",3,"T",6.71358,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7024,7032,{"$raw":"00000000"},"110405","MJ.3.4596","INOP",3,"T",42.99504,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZ",null,null,"R",null,"110405",1,null,"R DA CRUZ",7025,7033,{"$raw":"00000000"},"110405","R DA CRUZ","INOP",3,"T",50.10052,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7026,7034,{"$raw":"00000000"},"110405","MJ.1.151","OPER",1,"A",118.82770,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7027,7035,{"$raw":"00000000"},"110405","MJ.3.4597","INOP",3,"T",213.01298,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZ",null,null,"R",null,"110405",1,null,"R DA CRUZ",7028,7036,{"$raw":"00000000"},"110405","R DA CRUZ","INOP",3,"T",33.69559,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,7029,7037,{"$raw":"00000000"},"110405","MJ.3.4598","INOP",3,"T",288.88739,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7030,7038,{"$raw":"00000000"},"110405","MJ.2.332","OPER",2,"A",3.16967,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","da Fonte",null,null,null,null,null,"110405",1,null,null,7031,7039,{"$raw":"00000000"},"110405","MJ.3.4599","INOP",3,"T",140.83520,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7032,7040,{"$raw":"00000000"},"110405","MJ.3.4600","INOP",3,"T",36.06785,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7033,7041,{"$raw":"00000000"},"110405","MJ.3.4601","INOP",3,"T",15.75664,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Fonte D. Durão",null,null,null,null,null,"110405",1,null,null,7034,7042,{"$raw":"00000000"},"110405","MJ.3.4602","INOP",3,"T",61.45614,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7035,7043,{"$raw":"00000000"},"110405","MJ.3.4603","INOP",3,"T",109.88624,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Fonte D. Durão",null,null,null,null,null,"110405",1,null,null,7036,7044,{"$raw":"00000000"},"110405","MJ.3.4604","INOP",3,"T",178.43392,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7037,7045,{"$raw":"00000000"},"110405","MJ.3.4605","INOP",3,"T",153.81986,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7038,7046,{"$raw":"00000000"},"110405","MJ.3.4606","INOP",3,"T",80.76328,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7039,7047,{"$raw":"00000000"},"110405","MJ.3.4607","INOP",3,"T",170.78515,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7040,7048,{"$raw":"00000000"},"110405","MJ.3.4608","INOP",3,"T",123.29898,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7041,7049,{"$raw":"00000000"},"110405","MJ.3.4609","INOP",3,"T",83.32573,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7042,7050,{"$raw":"00000000"},"110405","MJ.3.4610","INOP",3,"T",23.76085,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,null,"R",null,"110405",1,null,"R DA BICA",7043,7051,{"$raw":"00000000"},"110405","R DA BICA","INOP",3,"T",19.70758,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7044,7052,{"$raw":"00000000"},"110405","MJ.3.4611","INOP",3,"T",51.01241,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,null,"R",null,"110405",1,null,"R DA BICA",7045,7053,{"$raw":"00000000"},"110405","R DA BICA","INOP",3,"T",215.58393,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7046,7054,{"$raw":"00000000"},"110405","MJ.3.4612","INOP",3,"T",4.86856,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7047,7055,{"$raw":"00000000"},"110405","MJ.3.4613","INOP",3,"T",104.07732,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7048,7056,{"$raw":"00000000"},"110405","MJ.3.4614","INOP",3,"T",161.55121,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7049,7057,{"$raw":"00000000"},"110405","MJ.3.4615","INOP",3,"T",2.99808,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7050,7058,{"$raw":"00000000"},"110405","MJ.3.4616","INOP",3,"T",3.53748,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7051,7059,{"$raw":"00000000"},"110405","MJ.3.4617","INOP",3,"T",134.67776,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110405",1,null,null,7052,7060,{"$raw":"00000000"},"110405","MJ.2.333","OPER",2,"A",3.93451,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,7053,7061,{"$raw":"00000000"},"110405","MJ.3.4618","INOP",3,"T",103.97754,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7054,7062,{"$raw":"00000000"},"110405","MJ.2.334","OPER",2,"A",2.92344,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7055,7063,{"$raw":"00000000"},"110405","MJ.3.4619","INOP",3,"T",8.25981,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7056,7064,{"$raw":"00000000"},"110405","MJ.3.4620","INOP",3,"T",47.29569,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CARVALHO OLIVEIRA",null,null,"R",null,"110405",1,null,"R CARVALHO OLIVEIRA",7057,7065,{"$raw":"00000000"},"110405","R CARVALHO OLIVEIRA","INOP",3,"T",49.05022,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7058,7066,{"$raw":"00000000"},"110405","MJ.2.335","OPER",2,"A",3.17907,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7059,7067,{"$raw":"00000000"},"110405","MJ.3.4621","INOP",3,"T",124.23302,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ALMUINHA",null,null,"R",null,"110405",1,null,"R DA ALMUINHA",7060,7068,{"$raw":"00000000"},"110405","R DA ALMUINHA","INOP",3,"T",212.15522,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7061,7069,{"$raw":"00000000"},"110405","MJ.3.4622","INOP",3,"T",102.04665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7062,7070,{"$raw":"00000000"},"110405","MJ.3.4623","INOP",3,"T",61.17800,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7063,7071,{"$raw":"00000000"},"110405","MJ.3.4624","INOP",3,"T",25.27612,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO RAMEIRAL",null,null,"R",null,"110405",1,null,null,7064,7072,{"$raw":"00000000"},"110405","MJ.3.4625","INOP",3,"T",166.61515,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7065,7073,{"$raw":"00000000"},"110405","MJ.3.4626","INOP",3,"T",83.58456,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7066,7074,{"$raw":"00000000"},"110408","MJ.3.4627","INOP",3,"T",2.96220,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7067,7075,{"$raw":"00000000"},"110408","MJ.3.4628","INOP",3,"T",34.92337,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7068,7076,{"$raw":"00000000"},"110408","MJ.3.4629","INOP",3,"T",2.73657,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7069,7077,{"$raw":"00000000"},"110408","MJ.3.4630","INOP",3,"T",141.56424,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7070,7078,{"$raw":"00000000"},"110408","MJ.3.4631","INOP",3,"T",160.47633,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7071,7079,{"$raw":"00000000"},"110405","MJ.3.4632","INOP",3,"T",4.42661,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7072,7080,{"$raw":"00000000"},"110405","MJ.3.4633","INOP",3,"T",102.81764,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7073,7081,{"$raw":"00000000"},"110405","MJ.3.4634","INOP",3,"T",2.44598,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"LG",null,"110410",1,null,"LG DO ROSSIO",7074,7082,{"$raw":"00000000"},"110410","LG DO ROSSIO","INOP",3,"T",36.08106,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,null,"R",null,"110402",1,null,"R DO OLIVAL DA FONTE",7075,7083,{"$raw":"00000000"},"110402","R DO OLIVAL DA FONTE","OPER",2,"A",103.05352,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,7076,7084,{"$raw":"00000000"},"110405","MJ.3.4635","INOP",3,"T",47.06640,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS JUNQUEIRAS",null,null,"R",null,"110405",1,null,"R DAS JUNQUEIRAS",7077,7085,{"$raw":"00000000"},"110405","R DAS JUNQUEIRAS","INOP",3,"T",43.45833,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7078,7086,{"$raw":"00000000"},"110405","MJ.3.4636","INOP",3,"T",2.59856,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7079,7087,{"$raw":"00000000"},"110405","MJ.3.4637","INOP",3,"T",153.05477,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7080,7088,{"$raw":"00000000"},"110405","MJ.3.4638","INOP",3,"T",17.24107,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7081,7089,{"$raw":"00000000"},"110405","MJ.3.4639","INOP",3,"T",193.68194,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7082,7090,{"$raw":"00000000"},"110405","MJ.3.4640","INOP",3,"T",61.37917,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7083,7091,{"$raw":"00000000"},"110405","MJ.3.4641","INOP",3,"T",260.10632,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7084,7092,{"$raw":"00000000"},"110405","MJ.3.4642","INOP",3,"T",2.91076,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7085,7093,{"$raw":"00000000"},"110405","MJ.3.4643","INOP",3,"T",82.35101,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7086,7094,{"$raw":"00000000"},"110405","MJ.3.4644","INOP",3,"T",2.59048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7087,7095,{"$raw":"00000000"},"110405","MJ.3.4645","INOP",3,"T",82.43717,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7088,7096,{"$raw":"00000000"},"110405","MJ.3.4646","INOP",3,"T",3.52206,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7089,7097,{"$raw":"00000000"},"110405","MJ.3.4647","INOP",3,"T",155.07398,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7090,7098,{"$raw":"00000000"},"110405","MJ.3.4648","INOP",3,"T",1.94797,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7091,7099,{"$raw":"00000000"},"110405","MJ.3.4649","INOP",3,"T",174.74897,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7092,7100,{"$raw":"00000000"},"110405","MJ.3.4650","INOP",3,"T",512.52499,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7093,7101,{"$raw":"00000000"},"110405","MJ.3.4651","INOP",3,"T",199.92467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7094,7102,{"$raw":"00000000"},"110405","MJ.3.4652","INOP",3,"T",77.54374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7095,7103,{"$raw":"00000000"},"110405","MJ.3.4653","INOP",3,"T",3.07262,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7096,7104,{"$raw":"00000000"},"110405","MJ.3.4654","INOP",3,"T",227.11261,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7097,7105,{"$raw":"00000000"},"110405","MJ.3.4655","INOP",3,"T",42.23033,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7098,7106,{"$raw":"00000000"},"110405","MJ.3.4656","INOP",3,"T",209.54173,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7099,7107,{"$raw":"00000000"},"110405","MJ.3.4657","INOP",3,"T",20.69232,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7100,7108,{"$raw":"00000000"},"110405","MJ.3.4658","INOP",3,"T",22.05467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7101,7109,{"$raw":"00000000"},"110405","MJ.3.4659","INOP",3,"T",3.56389,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Barreiras",null,null,null,null,null,"110405",1,null,null,7102,7110,{"$raw":"00000000"},"110405","MJ.3.4660","INOP",3,"T",546.69091,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,7103,7111,{"$raw":"00000000"},"110405","MJ.3.4661","INOP",3,"T",284.61195,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7104,7112,{"$raw":"00000000"},"110405","MJ.3.4662","INOP",3,"T",664.81005,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7105,7113,{"$raw":"00000000"},"110405","MJ.3.4663","INOP",3,"T",298.06778,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7106,7114,{"$raw":"00000000"},"110405","MJ.3.4664","INOP",3,"T",9.89115,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7107,7115,{"$raw":"00000000"},"110405","MJ.3.4665","INOP",3,"T",14.71501,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7108,7116,{"$raw":"00000000"},"110405","MJ.3.4666","INOP",3,"T",58.51336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7109,7117,{"$raw":"00000000"},"110405","MJ.3.4667","INOP",3,"T",490.37187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7110,7118,{"$raw":"00000000"},"110405","MJ.3.4668","INOP",3,"T",42.15732,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7111,7119,{"$raw":"00000000"},"110405","MJ.3.4669","INOP",3,"T",109.90800,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7112,7120,{"$raw":"00000000"},"110405","MJ.3.4670","INOP",3,"T",1.32257,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7113,7121,{"$raw":"00000000"},"110405","MJ.3.4671","INOP",3,"T",1.07564,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7114,7122,{"$raw":"00000000"},"110405","MJ.3.4672","INOP",3,"T",12.43755,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7115,7123,{"$raw":"00000000"},"110405","MJ.3.4673","INOP",3,"T",10.59019,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7116,7124,{"$raw":"00000000"},"110405","MJ.3.4674","INOP",3,"T",305.96377,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7117,7125,{"$raw":"00000000"},"110405","MJ.3.4675","INOP",3,"T",151.17279,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7118,7126,{"$raw":"00000000"},"110405","MJ.3.4676","INOP",3,"T",3.53362,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7119,7127,{"$raw":"00000000"},"110405","MJ.3.4677","INOP",3,"T",117.51985,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7120,7128,{"$raw":"00000000"},"110405","MJ.3.4678","INOP",3,"T",2.33521,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7121,7129,{"$raw":"00000000"},"110405","MJ.3.4679","INOP",3,"T",2.76538,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7122,7130,{"$raw":"00000000"},"110405","MJ.3.4680","INOP",3,"T",78.59059,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7123,7131,{"$raw":"00000000"},"110405","MJ.3.4681","INOP",3,"T",287.30082,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7124,7132,{"$raw":"00000000"},"110405","MJ.3.4682","INOP",3,"T",4.20629,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7125,7133,{"$raw":"00000000"},"110405","MJ.3.4683","INOP",3,"T",6.68144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7126,7134,{"$raw":"00000000"},"110405","MJ.3.4684","INOP",3,"T",101.45742,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7127,7135,{"$raw":"00000000"},"110405","MJ.3.4685","INOP",3,"T",25.43187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7128,7136,{"$raw":"00000000"},"110405","MJ.3.4686","INOP",3,"T",69.50745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7129,7137,{"$raw":"00000000"},"110405","MJ.1.152","OPER",1,"A",3.48180,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,7130,7138,{"$raw":"00000000"},"110405","MJ.3.4687","INOP",3,"T",52.01268,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,null,"TV",null,"110405",1,null,"TV DA BICA",7131,7139,{"$raw":"00000000"},"110405","TV DA BICA","INOP",3,"T",192.80493,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAMEIRAS",null,null,"R",null,"110405",1,null,"R DAS LAMEIRAS",7132,7140,{"$raw":"00000000"},"110405","R DAS LAMEIRAS","INOP",3,"T",290.40577,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SALGUEIRAL",null,null,"R",null,"110407",1,null,"R DO SALGUEIRAL",7133,7141,{"$raw":"00000000"},"110407","R DO SALGUEIRAL","INOP",3,"T",69.94185,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7134,7142,{"$raw":"00000000"},"110407","R DA BOAVISTA","INOP",3,"T",86.10194,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7135,7143,{"$raw":"00000000"},"110405","MJ.3.4688","INOP",3,"T",29.04811,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7136,7144,{"$raw":"00000000"},"110405","MJ.3.4689","INOP",3,"T",66.68703,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7137,7145,{"$raw":"00000000"},"110405","MJ.3.4690","INOP",3,"T",169.03665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7138,7146,{"$raw":"00000000"},"110405","MJ.3.4691","INOP",3,"T",83.44303,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7139,7147,{"$raw":"00000000"},"110405","MJ.3.4692","INOP",3,"T",29.98144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7140,7148,{"$raw":"00000000"},"110405","MJ.3.4693","INOP",3,"T",71.28005,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7141,7149,{"$raw":"00000000"},"110405","MJ.3.4694","INOP",3,"T",166.17090,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110405",1,null,null,7142,7150,{"$raw":"00000000"},"110405","MJ.3.4695","INOP",3,"T",81.13893,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7143,7151,{"$raw":"00000000"},"110405","MJ.3.4696","INOP",3,"T",134.84690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7144,7152,{"$raw":"00000000"},"110405","MJ.3.4697","INOP",3,"T",34.43747,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7145,7153,{"$raw":"00000000"},"110405","MJ.3.4698","INOP",3,"T",67.09339,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7146,7154,{"$raw":"00000000"},"110405","MJ.3.4699","INOP",3,"T",33.90909,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7147,7155,{"$raw":"00000000"},"110405","MJ.3.4700","INOP",3,"T",55.80593,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7148,7156,{"$raw":"00000000"},"110405","MJ.3.4701","INOP",3,"T",57.84497,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7149,7157,{"$raw":"00000000"},"110405","MJ.3.4702","INOP",3,"T",56.99085,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7150,7158,{"$raw":"00000000"},"110405","MJ.3.4703","INOP",3,"T",148.21427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7151,7159,{"$raw":"00000000"},"110405","MJ.3.4704","INOP",3,"T",102.39349,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7152,7160,{"$raw":"00000000"},"110405","MJ.3.4705","INOP",3,"T",42.13980,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7153,7161,{"$raw":"00000000"},"110405","MJ.3.4706","INOP",3,"T",5.42129,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7154,7162,{"$raw":"00000000"},"110405","MJ.3.4707","INOP",3,"T",88.77820,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7155,7163,{"$raw":"00000000"},"110405","MJ.3.4708","INOP",3,"T",29.78246,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7156,7164,{"$raw":"00000000"},"110405","MJ.3.4709","INOP",3,"T",15.00028,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7157,7165,{"$raw":"00000000"},"110405","MJ.3.4710","INOP",3,"T",117.06668,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7158,7166,{"$raw":"00000000"},"110405","MJ.3.4711","INOP",3,"T",31.49602,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7159,7167,{"$raw":"00000000"},"110405","MJ.1.153","OPER",1,"A",3.03350,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7160,7168,{"$raw":"00000000"},"110405","MJ.1.154","OPER",1,"A",2.93920,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7161,7169,{"$raw":"00000000"},"110405","MJ.3.4712","INOP",3,"T",101.77287,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7162,7170,{"$raw":"00000000"},"110405","MJ.3.4713","INOP",3,"T",48.11864,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,7163,7171,{"$raw":"00000000"},"110405","MJ.3.4714","INOP",3,"T",188.56029,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7164,7172,{"$raw":"00000000"},"110405","MJ.3.4715","INOP",3,"T",42.47104,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,7165,7173,{"$raw":"00000000"},"110405","MJ.3.4716","INOP",3,"T",46.35112,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7166,7174,{"$raw":"00000000"},"110405","MJ.1.155","OPER",1,"A",4.84846,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110405",1,null,null,7167,7175,{"$raw":"00000000"},"110405","MJ.3.4717","INOP",3,"T",270.75249,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7168,7176,{"$raw":"00000000"},"110405","MJ.3.4718","INOP",3,"T",2.28963,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7169,7177,{"$raw":"00000000"},"110405","MJ.3.4719","INOP",3,"T",3.19002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7170,7178,{"$raw":"00000000"},"110405","MJ.3.4720","INOP",3,"T",49.50866,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7171,7179,{"$raw":"00000000"},"110405","MJ.3.4721","INOP",3,"T",187.58045,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7172,7180,{"$raw":"00000000"},"110405","MJ.3.4722","INOP",3,"T",6.00174,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7173,7181,{"$raw":"00000000"},"110405","MJ.3.4723","INOP",3,"T",4.47975,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7174,7182,{"$raw":"00000000"},"110405","MJ.1.156","OPER",1,"A",4.34514,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7175,7183,{"$raw":"00000000"},"110405","MJ.3.4724","INOP",3,"T",37.98001,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7176,7184,{"$raw":"00000000"},"110405","MJ.3.4725","INOP",3,"T",189.43107,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7177,7185,{"$raw":"00000000"},"110407","MJ.3.4726","INOP",3,"T",269.45408,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7178,7186,{"$raw":"00000000"},"110407","MJ.2.336","OPER",2,"A",3.17095,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7179,7187,{"$raw":"00000000"},"110407","MJ.3.4727","INOP",3,"T",212.08331,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7180,7188,{"$raw":"00000000"},"110407","MJ.3.4728","INOP",3,"T",422.18333,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7181,7189,{"$raw":"00000000"},"110407","MJ.3.4729","INOP",3,"T",286.02222,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7182,7190,{"$raw":"00000000"},"110405","MJ.3.4730","INOP",3,"T",1.84564,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,7183,7191,{"$raw":"00000000"},"110405","MJ.3.4731","INOP",3,"T",142.91360,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7184,7192,{"$raw":"00000000"},"110407","MJ.3.4732","INOP",3,"T",378.90159,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7185,7193,{"$raw":"00000000"},"110407","MJ.3.4733","INOP",3,"T",113.64907,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7186,7194,{"$raw":"00000000"},"110407","MJ.3.4734","INOP",3,"T",60.88450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7187,7195,{"$raw":"00000000"},"110405","MJ.3.4735","INOP",3,"T",28.75266,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS MURTEIRAS",null,null,"R",null,"110405",1,null,"R DAS MURTEIRAS",7188,7196,{"$raw":"00000000"},"110405","R DAS MURTEIRAS","INOP",3,"T",146.81681,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO FORO",null,null,"R",null,"110405",1,null,"R DO FORO",7189,7197,{"$raw":"00000000"},"110405","R DO FORO","INOP",3,"T",199.94136,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7190,7198,{"$raw":"00000000"},"110405","MJ.3.4736","INOP",3,"T",105.31102,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS MURTEIRAS",null,null,"R",null,"110405",1,null,"R DAS MURTEIRAS",7191,7199,{"$raw":"00000000"},"110405","R DAS MURTEIRAS","INOP",3,"T",57.50142,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BRAGA",null,null,"R",null,"110405",1,null,"R DO BRAGA",7192,7200,{"$raw":"00000000"},"110405","R DO BRAGA","INOP",3,"T",142.35713,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"TV",null,"110405",1,null,"TV DA ESCOLA",7193,7201,{"$raw":"00000000"},"110405","TV DA ESCOLA","INOP",3,"T",200.49497,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"5 DE AGOSTO",null,null,"TV",null,"110405",1,null,"TV 5 DE AGOSTO",7194,7202,{"$raw":"00000000"},"110405","TV 5 DE AGOSTO","INOP",3,"T",57.18968,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO PAIVA",null,null,"R",null,"110407",1,null,"R ANTÓNIO PAIVA",7195,7203,{"$raw":"00000000"},"110407","R ANTÓNIO PAIVA","INOP",3,"T",5.40372,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","D FERNANDO",null,null,"R",null,"110402",1,null,"R D FERNANDO",7196,7204,{"$raw":"00000000"},"110402","R D FERNANDO","OPER",1,"A",52.20922,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO AMEIRO",null,null,"TV",null,"110405",1,null,"TV DO AMEIRO",7197,7205,{"$raw":"00000000"},"110405","TV DO AMEIRO","INOP",3,"T",33.57307,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO AMEIRO",null,null,"TV",null,"110405",1,null,"TV DO AMEIRO",7198,7206,{"$raw":"00000000"},"110405","TV DO AMEIRO","INOP",3,"T",19.38874,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7199,7207,{"$raw":"00000000"},"110405","MJ.3.4737","INOP",3,"T",72.85242,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ARNEIRO",null,null,"TV",null,"110405",1,null,"TV DO ARNEIRO",7200,7208,{"$raw":"00000000"},"110405","TV DO ARNEIRO","INOP",3,"T",87.57914,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO AMEIRO",null,null,"TV",null,"110405",1,null,"TV DO AMEIRO",7201,7209,{"$raw":"00000000"},"110405","TV DO AMEIRO","INOP",3,"T",13.38658,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7202,7210,{"$raw":"00000000"},"110405","MJ.3.4738","INOP",3,"T",3.03000,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7203,7211,{"$raw":"00000000"},"110405","MJ.3.4739","INOP",3,"T",736.73363,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FELICIDADE",null,null,"R",null,"110405",1,null,"R DA FELICIDADE",7204,7212,{"$raw":"00000000"},"110405","R DA FELICIDADE","INOP",3,"T",10.67305,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7205,7213,{"$raw":"00000000"},"110405","MJ.3.4740","INOP",3,"T",1.87302,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7206,7214,{"$raw":"00000000"},"110405","MJ.3.4741","INOP",3,"T",602.71779,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7207,7215,{"$raw":"00000000"},"110405","MJ.3.4742","INOP",3,"T",1.67863,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7208,7216,{"$raw":"00000000"},"110405","MJ.3.4743","INOP",3,"T",145.35080,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7209,7217,{"$raw":"00000000"},"110405","MJ.3.4744","INOP",3,"T",4.77496,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7210,7218,{"$raw":"00000000"},"110405","MJ.3.4745","INOP",3,"T",119.68398,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7211,7219,{"$raw":"00000000"},"110405","MJ.2.337","OPER",2,"A",45.98013,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7212,7220,{"$raw":"00000000"},"110405","MJ.3.4746","INOP",3,"T",58.18823,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7213,7221,{"$raw":"00000000"},"110405","MJ.3.4747","INOP",3,"T",218.09317,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7214,7222,{"$raw":"00000000"},"110405","MJ.3.4748","INOP",3,"T",67.43840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7215,7223,{"$raw":"00000000"},"110405","MJ.3.4749","INOP",3,"T",311.04017,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7216,7224,{"$raw":"00000000"},"110405","MJ.3.4750","INOP",3,"T",2.25887,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7217,7225,{"$raw":"00000000"},"110405","MJ.3.4751","INOP",3,"T",182.13272,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,7218,7226,{"$raw":"00000000"},"110405","MJ.3.4752","INOP",3,"T",38.06713,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7219,7227,{"$raw":"00000000"},"110407","MJ.3.4753","INOP",3,"T",1.88367,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7220,7228,{"$raw":"00000000"},"110407","MJ.3.4754","INOP",3,"T",256.27116,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7221,7229,{"$raw":"00000000"},"110405","MJ.3.4755","INOP",3,"T",2.31657,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7222,7230,{"$raw":"00000000"},"110405","MJ.3.4756","INOP",3,"T",227.76173,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7223,7231,{"$raw":"00000000"},"110405","MJ.3.4757","INOP",3,"T",179.91587,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7224,7232,{"$raw":"00000000"},"110405","MJ.3.4758","INOP",3,"T",118.80840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7225,7233,{"$raw":"00000000"},"110405","MJ.3.4759","INOP",3,"T",18.25064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7226,7234,{"$raw":"00000000"},"110405","MJ.3.4760","INOP",3,"T",1.39807,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,7227,7235,{"$raw":"00000000"},"110405","MJ.3.4761","INOP",3,"T",100.55417,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7228,7236,{"$raw":"00000000"},"110405","MJ.3.4762","INOP",3,"T",1.30419,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110405",2,null,null,7229,7237,{"$raw":"00000000"},"110405","MJ.3.4763","INOP",3,"T",95.14624,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7230,7238,{"$raw":"00000000"},"110407","MJ.3.4764","INOP",3,"T",443.44062,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7231,7239,{"$raw":"00000000"},"110407","MJ.3.4765","INOP",3,"T",1.59154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7232,7240,{"$raw":"00000000"},"110407","R DA BOAVISTA","INOP",3,"T",19.75288,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRINCIPAL",null,"26 ago 2003","R",null,"110410",1,null,"R PRINCIPAL",7233,7241,{"$raw":"00000000"},"110410","R PRINCIPAL","INOP",3,"T",69.17063,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MATA MOREIRA",null,null,"TV",null,"110404",1,null,"TV MATA MOREIRA",7234,7242,{"$raw":"00000000"},"110404","TV MATA MOREIRA","OPER",1,"A",126.43414,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ DOS SANTOS",null,null,"R",null,"110404",1,null,"R JOSÉ DOS SANTOS",7235,7243,{"$raw":"00000000"},"110404","R JOSÉ DOS SANTOS","OPER",1,"A",120.11568,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CANTIGAS",null,null,"TV",null,"110408",1,null,"TV DAS CANTIGAS",7236,7244,{"$raw":"00000000"},"110408","TV DAS CANTIGAS","INOP",3,"T",53.53525,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROGÉRIO",null,null,"TV",null,"110407",1,null,"TV DO ROGÉRIO",7237,7245,{"$raw":"00000000"},"110407","TV DO ROGÉRIO","INOP",3,"T",72.51766,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPIGA",null,null,"TV",null,"110407",1,null,"TV DA ESPIGA",7238,7246,{"$raw":"00000000"},"110407","TV DA ESPIGA","INOP",3,"T",742.78086,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA EIRA",null,null,"TV",null,"110407",1,null,"TV DA EIRA",7239,7247,{"$raw":"00000000"},"110407","TV DA EIRA","INOP",3,"T",443.11124,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA COITADA",null,null,"TV",null,"110407",1,null,"TV DA COITADA",7240,7248,{"$raw":"00000000"},"110407","TV DA COITADA","INOP",3,"T",262.01297,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE MOINHO",null,"16 Jul 2002","R",null,"110407",1,null,"R DO VALE MOINHO",7241,7249,{"$raw":"00000000"},"110407","R DO VALE MOINHO","INOP",3,"T",131.09038,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZ",null,null,"R",null,"110405",1,null,"R DA CRUZ",7242,7250,{"$raw":"00000000"},"110405","R DA CRUZ","OPER",2,"A",75.59271,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZ",null,null,"R",null,"110405",1,null,"R DA CRUZ",7243,7251,{"$raw":"00000000"},"110405","R DA CRUZ","INOP",3,"T",146.07199,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA MURTA",null,null,"QTA",null,"110402",1,null,"QTA DA MURTA",7244,7252,{"$raw":"00000000"},"110402","QTA DA MURTA","OPER",2,"A",139.72267,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS BACELOS",null,"26/07/2004","R",null,"110402",1,null,"R DOS BACELOS",7245,7253,{"$raw":"00000000"},"110402","R DOS BACELOS","INOP",3,"T",124.10229,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110402",1,null,"R DO CAMPO DA BOLA",7246,7254,{"$raw":"00000000"},"110402","R DO CAMPO DA BOLA","INOP",3,"T",25.83909,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",7247,7255,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",27.79530,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO FORNO",null,null,"ESTR",null,"110407",1,null,"ESTR DO FORNO",7248,7256,{"$raw":"00000000"},"110407","ESTR DO FORNO","INOP",3,"T",90.71783,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110407",1,null,"R DA IGREJA",7249,7257,{"$raw":"00000000"},"110407","R DA IGREJA","INOP",3,"T",18.27055,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7250,7258,{"$raw":"00000000"},"110402","MJ.3.4766","INOP",3,"T",3.09777,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR",null,null,null,null,null,null,"110402",1,null,null,7251,7259,{"$raw":"00000000"},"110402","MJ.3.4767","INOP",3,"T",2.78259,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7252,7260,{"$raw":"00000000"},"110402","MJ.2.338","OPER",2,"A",2.09153,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7253,7261,{"$raw":"00000000"},"110402","MJ.3.4768","INOP",3,"T",76.91208,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7254,7262,{"$raw":"00000000"},"110402","MJ.3.4769","INOP",3,"T",228.60205,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",2,null,null,7255,7263,{"$raw":"00000000"},"110402","MJ.3.4770","INOP",3,"T",2.75770,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7256,7264,{"$raw":"00000000"},"110402","MJ.3.4771","INOP",3,"T",60.92492,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7257,7265,{"$raw":"00000000"},"110402","MJ.3.4772","INOP",3,"T",258.80787,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7258,7266,{"$raw":"00000000"},"110402","MJ.3.4773","INOP",3,"T",62.71710,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7259,7267,{"$raw":"00000000"},"110402","MJ.3.4774","INOP",3,"T",133.69253,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7260,7268,{"$raw":"00000000"},"110402","MJ.3.4775","INOP",3,"T",91.22349,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7261,7269,{"$raw":"00000000"},"110402","MJ.3.4776","INOP",3,"T",122.00485,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7262,7270,{"$raw":"00000000"},"110402","MJ.3.4777","INOP",3,"T",70.71046,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7263,7271,{"$raw":"00000000"},"110407","MJ.3.4778","INOP",3,"T",291.96247,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7264,7272,{"$raw":"00000000"},"110407","MJ.3.4779","INOP",3,"T",47.94411,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7265,7273,{"$raw":"00000000"},"110407","MJ.3.4780","INOP",3,"T",2.07041,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7266,7274,{"$raw":"00000000"},"110407","MJ.3.4781","INOP",3,"T",3.74833,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7267,7275,{"$raw":"00000000"},"110407","MJ.3.4782","INOP",3,"T",45.52206,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,7268,7276,{"$raw":"00000000"},"110407","MJ.3.4783","INOP",3,"T",513.22449,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7269,7277,{"$raw":"00000000"},"110402","MJ.3.4784","INOP",3,"T",24.24842,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7270,7278,{"$raw":"00000000"},"110402","MJ.3.4785","INOP",3,"T",199.38140,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7271,7279,{"$raw":"00000000"},"110402","MJ.3.4786","INOP",3,"T",30.88069,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7272,7280,{"$raw":"00000000"},"110402","MJ.3.4787","INOP",3,"T",50.55850,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7273,7281,{"$raw":"00000000"},"110402","MJ.3.4788","INOP",3,"T",261.26755,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7274,7282,{"$raw":"00000000"},"110402","MJ.3.4789","INOP",3,"T",137.38655,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7275,7283,{"$raw":"00000000"},"110402","MJ.3.4790","INOP",3,"T",39.37185,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7276,7284,{"$raw":"00000000"},"110402","MJ.3.4791","INOP",3,"T",230.87818,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7277,7285,{"$raw":"00000000"},"110402","MJ.3.4792","INOP",3,"T",138.10068,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7278,7286,{"$raw":"00000000"},"110402","MJ.3.4793","INOP",3,"T",158.05804,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7279,7287,{"$raw":"00000000"},"110402","MJ.3.4794","INOP",3,"T",257.20893,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7280,7288,{"$raw":"00000000"},"110402","MJ.3.4795","INOP",3,"T",23.29654,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7281,7289,{"$raw":"00000000"},"110402","MJ.3.4796","INOP",3,"T",32.75290,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7282,7290,{"$raw":"00000000"},"110402","MJ.3.4797","INOP",3,"T",192.93746,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7283,7291,{"$raw":"00000000"},"110402","MJ.3.4798","INOP",3,"T",158.51641,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7284,7292,{"$raw":"00000000"},"110402","MJ.3.4799","INOP",3,"T",63.82536,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7285,7293,{"$raw":"00000000"},"110402","MJ.3.4800","INOP",3,"T",59.29734,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7286,7294,{"$raw":"00000000"},"110402","MJ.3.4801","INOP",3,"T",5.70103,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7287,7295,{"$raw":"00000000"},"110402","MJ.3.4802","INOP",3,"T",61.64152,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7288,7296,{"$raw":"00000000"},"110402","MJ.3.4803","INOP",3,"T",65.27667,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7289,7297,{"$raw":"00000000"},"110402","MJ.3.4804","INOP",3,"T",148.90200,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7290,7298,{"$raw":"00000000"},"110402","MJ.3.4805","INOP",3,"T",69.58366,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7291,7299,{"$raw":"00000000"},"110402","MJ.3.4806","INOP",3,"T",30.36243,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7292,7300,{"$raw":"00000000"},"110402","MJ.3.4807","INOP",3,"T",3.10035,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7293,7301,{"$raw":"00000000"},"110402","MJ.1.157","OPER",1,"A",2.99933,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7294,7302,{"$raw":"00000000"},"110402","MJ.3.4808","INOP",3,"T",56.73935,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7295,7303,{"$raw":"00000000"},"110402","MJ.3.4809","INOP",3,"T",99.63537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7296,7304,{"$raw":"00000000"},"110402","MJ.3.4810","INOP",3,"T",2.58132,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7297,7305,{"$raw":"00000000"},"110402","MJ.3.4811","INOP",3,"T",0.08602,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7298,7306,{"$raw":"00000000"},"110402","MJ.3.4812","INOP",3,"T",3.17370,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7299,7307,{"$raw":"00000000"},"110402","MJ.3.4813","INOP",3,"T",131.17139,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110402",1,null,null,7300,7308,{"$raw":"00000000"},"110402","MJ.3.4814","INOP",3,"T",216.87765,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7301,7309,{"$raw":"00000000"},"110402","MJ.3.4815","INOP",3,"T",104.15500,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7302,7310,{"$raw":"00000000"},"110402","MJ.3.4816","INOP",3,"T",64.27374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7303,7311,{"$raw":"00000000"},"110402","MJ.3.4817","INOP",3,"T",26.68658,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7304,7312,{"$raw":"00000000"},"110402","MJ.3.4818","INOP",3,"T",7.69344,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7305,7313,{"$raw":"00000000"},"110402","MJ.3.4819","INOP",3,"T",250.64159,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7306,7314,{"$raw":"00000000"},"110402","MJ.3.4820","INOP",3,"T",59.40395,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7307,7315,{"$raw":"00000000"},"110402","MJ.3.4821","INOP",3,"T",12.36163,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7308,7316,{"$raw":"00000000"},"110402","MJ.3.4822","INOP",3,"T",3.07122,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7309,7317,{"$raw":"00000000"},"110402","MJ.3.4823","INOP",3,"T",93.60187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7310,7318,{"$raw":"00000000"},"110402","MJ.3.4824","INOP",3,"T",229.09668,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7311,7319,{"$raw":"00000000"},"110402","MJ.3.4825","INOP",3,"T",3.04041,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7312,7320,{"$raw":"00000000"},"110402","MJ.3.4826","INOP",3,"T",4.01005,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7313,7321,{"$raw":"00000000"},"110402","MJ.3.4827","INOP",3,"T",161.96601,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7314,7322,{"$raw":"00000000"},"110402","MJ.3.4828","INOP",3,"T",34.78568,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7315,7323,{"$raw":"00000000"},"110402","MJ.3.4829","INOP",3,"T",8.02378,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7316,7324,{"$raw":"00000000"},"110402","MJ.3.4830","INOP",3,"T",103.50141,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7317,7325,{"$raw":"00000000"},"110402","MJ.3.4831","INOP",3,"T",34.69891,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7318,7326,{"$raw":"00000000"},"110402","MJ.2.339","OPER",2,"A",3.13465,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7319,7327,{"$raw":"00000000"},"110402","MJ.3.4832","INOP",3,"T",77.24307,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BARROCA",null,"26 fev 2001","R",null,"110402",1,null,"R DA BARROCA",7320,7328,{"$raw":"00000000"},"110402","R DA BARROCA","INOP",3,"T",263.27261,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS COUTOS",null,null,"R",null,"110402",1,null,"R DOS COUTOS",7321,7329,{"$raw":"00000000"},"110402","R DOS COUTOS","INOP",3,"T",134.53700,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"TV",null,"110405",1,null,"TV DA FONTE",7322,7330,{"$raw":"00000000"},"110405","TV DA FONTE","INOP",3,"T",81.20042,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7323,7331,{"$raw":"00000000"},"110402","MJ.2.340","OPER",2,"A",2.75218,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7324,7332,{"$raw":"00000000"},"110402","MJ.3.4833","INOP",3,"T",74.75841,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7325,7333,{"$raw":"00000000"},"110402","MJ.3.4834","INOP",3,"T",2.93537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7326,7334,{"$raw":"00000000"},"110402","MJ.3.4835","INOP",3,"T",409.16429,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7327,7335,{"$raw":"00000000"},"110402","MJ.3.4836","INOP",3,"T",3.43890,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7328,7336,{"$raw":"00000000"},"110402","MJ.3.4837","INOP",3,"T",50.21520,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7329,7337,{"$raw":"00000000"},"110402","MJ.3.4838","INOP",3,"T",379.15640,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7330,7338,{"$raw":"00000000"},"110402","MJ.3.4839","INOP",3,"T",85.14953,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",2,null,null,7331,7339,{"$raw":"00000000"},"110402","MJ.3.4840","INOP",3,"T",279.76306,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7332,7340,{"$raw":"00000000"},"110409","MJ.3.4841","INOP",3,"T",69.70120,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7333,7341,{"$raw":"00000000"},"110409","MJ.3.4842","INOP",3,"T",174.70522,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7334,7342,{"$raw":"00000000"},"110409","MJ.3.4843","INOP",3,"T",71.68691,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7335,7343,{"$raw":"00000000"},"110402","MJ.3.4844","INOP",3,"T",48.57739,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7336,7344,{"$raw":"00000000"},"110402","MJ.3.4845","INOP",3,"T",60.19840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7337,7345,{"$raw":"00000000"},"110402","MJ.3.4846","INOP",3,"T",115.19002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7338,7346,{"$raw":"00000000"},"110402","MJ.3.4847","INOP",3,"T",263.93053,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7339,7347,{"$raw":"00000000"},"110402","MJ.3.4848","INOP",3,"T",265.39284,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7340,7348,{"$raw":"00000000"},"110402","MJ.3.4849","INOP",3,"T",133.52285,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7341,7349,{"$raw":"00000000"},"110409","MJ.3.4850","INOP",3,"T",43.00421,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7342,7350,{"$raw":"00000000"},"110409","MJ.3.4851","INOP",3,"T",260.68134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",2,null,null,7343,7351,{"$raw":"00000000"},"110402","MJ.3.4852","INOP",3,"T",524.02843,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",2,null,null,7344,7352,{"$raw":"00000000"},"110402","MJ.3.4853","INOP",3,"T",73.94719,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7345,7353,{"$raw":"00000000"},"110402","MJ.3.4854","INOP",3,"T",102.42562,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7346,7354,{"$raw":"00000000"},"110409","MJ.3.4855","INOP",3,"T",3.58156,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7347,7355,{"$raw":"00000000"},"110402","MJ.3.4856","INOP",3,"T",227.30318,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7348,7356,{"$raw":"00000000"},"110402","MJ.3.4857","INOP",3,"T",555.96257,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7349,7357,{"$raw":"00000000"},"110402","MJ.3.4858","INOP",3,"T",3.43657,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7350,7358,{"$raw":"00000000"},"110402","MJ.3.4859","INOP",3,"T",86.29639,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7351,7359,{"$raw":"00000000"},"110402","MJ.3.4860","INOP",3,"T",124.31945,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7352,7360,{"$raw":"00000000"},"110402","MJ.3.4861","INOP",3,"T",128.75725,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7353,7361,{"$raw":"00000000"},"110402","MJ.3.4862","INOP",3,"T",250.80651,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7354,7362,{"$raw":"00000000"},"110402","MJ.3.4863","INOP",3,"T",39.91216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7355,7363,{"$raw":"00000000"},"110402","MJ.3.4864","INOP",3,"T",6.60600,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOAQUIM DOMINGOS",null,"15 Mar 1999","R",null,"110402",1,null,"R JOAQUIM DOMINGOS",7356,7364,{"$raw":"00000000"},"110402","R JOAQUIM DOMINGOS","INOP",3,"T",20.41946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7357,7365,{"$raw":"00000000"},"110402","MJ.3.4865","INOP",3,"T",70.21650,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7358,7366,{"$raw":"00000000"},"110402","MJ.1.158","OPER",1,"A",2.28554,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7359,7367,{"$raw":"00000000"},"110402","MJ.3.4866","INOP",3,"T",10.10873,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7360,7368,{"$raw":"00000000"},"110402","MJ.3.4867","INOP",3,"T",228.61129,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7361,7369,{"$raw":"00000000"},"110402","MJ.3.4868","INOP",3,"T",102.36664,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7362,7370,{"$raw":"00000000"},"110402","MJ.1.159","OPER",1,"A",52.05058,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7363,7371,{"$raw":"00000000"},"110402","MJ.3.4869","INOP",3,"T",232.13941,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7364,7372,{"$raw":"00000000"},"110402","MJ.3.4870","INOP",3,"T",50.70502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7365,7373,{"$raw":"00000000"},"110402","MJ.3.4871","INOP",3,"T",200.96066,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7366,7374,{"$raw":"00000000"},"110402","MJ.3.4872","INOP",3,"T",137.25394,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7367,7375,{"$raw":"00000000"},"110402","MJ.3.4873","INOP",3,"T",34.96631,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7368,7376,{"$raw":"00000000"},"110402","MJ.3.4874","INOP",3,"T",3.14668,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7369,7377,{"$raw":"00000000"},"110402","MJ.3.4875","INOP",3,"T",56.56409,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7370,7378,{"$raw":"00000000"},"110402","MJ.3.4876","INOP",3,"T",42.01772,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7371,7379,{"$raw":"00000000"},"110402","MJ.3.4877","INOP",3,"T",28.11297,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7372,7380,{"$raw":"00000000"},"110402","MJ.3.4878","INOP",3,"T",3.16028,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7373,7381,{"$raw":"00000000"},"110402","MJ.3.4879","INOP",3,"T",48.87580,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO HOSPITAL",null,null,"TV",null,"110402",1,null,"TV DO HOSPITAL",7374,7382,{"$raw":"00000000"},"110402","TV DO HOSPITAL","INOP",3,"T",13.90554,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"TOMÁS CORRÊA",null,"28 Novembro 2006","R",null,"110402",1,null,"R TOMÁS CORRÊA",7375,7383,{"$raw":"00000000"},"110402","R TOMÁS CORRÊA","INOP",3,"T",117.63352,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",7376,7384,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",50.77485,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",7377,7385,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",87.62161,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","1043-1",null,null,"CM",null,"110410",1,null,"CM 1043-1",7378,7386,{"$raw":"00000000"},"110410","CM 1043-1","OPER",2,"A",307.81420,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,7379,7387,{"$raw":"00000000"},"110402","MJ.3.4880","INOP",3,"T",0.02236,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7380,7388,{"$raw":"00000000"},"110402","MJ.3.4881","INOP",3,"T",46.73552,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7381,7389,{"$raw":"00000000"},"110402","MJ.3.4882","INOP",3,"T",153.47125,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7382,7390,{"$raw":"00000000"},"110402","MJ.3.4883","INOP",3,"T",108.41288,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7383,7391,{"$raw":"00000000"},"110402","MJ.3.4884","INOP",3,"T",211.89114,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7384,7392,{"$raw":"00000000"},"110402","MJ.3.4885","INOP",3,"T",166.52003,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7385,7393,{"$raw":"00000000"},"110402","MJ.3.4886","INOP",3,"T",65.38621,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GUILHERME LUÍS NUNES",null,"17 Dez 2002","R",null,"110402",1,null,"R GUILHERME LUÍS NUNES",7386,7394,{"$raw":"00000000"},"110402","R GUILHERME LUÍS NUNES","INOP",3,"T",113.17768,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7387,7395,{"$raw":"00000000"},"110402","MJ.3.4887","INOP",3,"T",38.88792,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7388,7396,{"$raw":"00000000"},"110402","MJ.3.4888","INOP",3,"T",67.85367,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7389,7397,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,79.29827,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7390,7398,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,30.21883,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7391,7399,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,19.60552,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7392,7400,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,14.38812,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7393,7401,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,13.29663,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7394,7402,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,75.32161,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7395,7403,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,80.84608,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7396,7404,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,14.73853,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7397,7405,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.51334,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7398,7406,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,89.63980,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7399,7407,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.46710,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7400,7408,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.07019,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7401,7409,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,169.40347,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7402,7410,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,115.14552,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7403,7411,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,155.95504,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7404,7412,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,255.77398,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7405,7413,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,16.72197,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7406,7414,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,159.42272,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7407,7415,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.20193,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7408,7416,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,177.74995,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7409,7417,{"$raw":"00000000"},"110408","MJ.1.160","OPER",1,"A",2.52240,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7410,7418,{"$raw":"00000000"},"110408","MJ.3.4889","INOP",3,"T",82.96676,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7411,7419,{"$raw":"00000000"},"110408","MJ.3.4890","INOP",3,"T",108.06466,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7412,7420,{"$raw":"00000000"},"110408","MJ.3.4891","INOP",3,"T",78.63578,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7413,7421,{"$raw":"00000000"},"110408","MJ.3.4892","INOP",3,"T",45.21179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7414,7422,{"$raw":"00000000"},"110408","MJ.3.4893","INOP",3,"T",138.92800,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7415,7423,{"$raw":"00000000"},"110408","MJ.3.4894","INOP",3,"T",15.48365,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7416,7424,{"$raw":"00000000"},"110408","MJ.3.4895","INOP",3,"T",2.40840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7417,7425,{"$raw":"00000000"},"110408","MJ.3.4896","INOP",3,"T",188.35052,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7418,7426,{"$raw":"00000000"},"110408","MJ.1.161","OPER",1,"A",2.70159,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7419,7427,{"$raw":"00000000"},"110408","MJ.3.4897","INOP",3,"A",3.08287,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,7420,7428,{"$raw":"00000000"},"110408","MJ.3.4898","INOP",3,"T",497.99169,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7421,7429,{"$raw":"00000000"},"110408","MJ.3.4899","INOP",3,"T",169.45171,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7422,7430,{"$raw":"00000000"},"110408","MJ.2.341","OPER",2,"A",106.62518,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7423,7431,{"$raw":"00000000"},"110408","MJ.2.342","OPER",2,"A",182.42543,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7424,7432,{"$raw":"00000000"},"110408","MJ.3.4900","INOP",3,"T",109.66616,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7425,7433,{"$raw":"00000000"},"110408","MJ.3.4901","INOP",3,"T",111.70286,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7426,7434,{"$raw":"00000000"},"110408","MJ.3.4902","INOP",3,"T",20.43870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7427,7435,{"$raw":"00000000"},"110408","MJ.3.4903","INOP",3,"T",5.20794,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7428,7436,{"$raw":"00000000"},"110408","MJ.2.343","OPER",2,"A",270.63620,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7429,7437,{"$raw":"00000000"},"110408","MJ.3.4904","INOP",2,"T",37.72639,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZ",null,null,"R",null,"110405",1,null,"R DA CRUZ",7430,7438,{"$raw":"00000000"},"110405","R DA CRUZ","INOP",3,"T",33.37288,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,"15 Mar 1999","R",null,"110402",1,null,"R DO OLIVAL DA FONTE",7431,7439,{"$raw":"00000000"},"110402","R DO OLIVAL DA FONTE","OPER",2,"A",82.22745,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7432,7440,{"$raw":"00000000"},"110402","R DA LIBERDADE","INOP",3,"T",29.51685,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110402",1,null,"R DA IGREJA",7433,7441,{"$raw":"00000000"},"110402","R DA IGREJA","INOP",3,"T",55.06040,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110409",1,null,"R DAS AMOREIRAS",7434,7442,{"$raw":"00000000"},"110409","R DAS AMOREIRAS","INOP",3,"T",26.81637,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",7435,7443,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",63.42181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","13 DE JANEIRO",null,null,"R",null,"110402",1,null,"R 13 DE JANEIRO",7436,7444,{"$raw":"00000000"},"110402","R 13 DE JANEIRO","OPER",1,"A",76.22988,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",7437,7445,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",178.39089,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7438,7446,{"$raw":"00000000"},"110408","MJ.2.344","OPER",2,"A",296.86111,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7439,7447,{"$raw":"00000000"},"110408","MJ.2.345","OPER",2,"A",5.05642,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7440,7448,{"$raw":"00000000"},"110408","MJ.2.346","OPER",2,"A",212.95194,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7441,7449,{"$raw":"00000000"},"110408","MJ.2.347","OPER",2,"A",120.42834,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7442,7450,{"$raw":"00000000"},"110408","MJ.2.348","OPER",2,"A",197.28970,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7443,7451,{"$raw":"00000000"},"110408","MJ.3.4905","INOP",3,"T",639.77292,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7444,7452,{"$raw":"00000000"},"110408","MJ.3.4906","INOP",2,"T",79.56778,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7445,7453,{"$raw":"00000000"},"110408","MJ.3.4907","INOP",3,"T",6.73513,3.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7446,7454,{"$raw":"00000000"},"110408","MJ.3.4908","INOP",3,"T",26.47913,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7447,7455,{"$raw":"00000000"},"110408","MJ.3.4909","INOP",3,"T",82.18559,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7448,7456,{"$raw":"00000000"},"110408","MJ.3.4910","INOP",3,"T",53.61867,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7449,7457,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7450,7458,{"$raw":"00000000"},"110408","MJ.3.4911","INOP",3,"T",15.07903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7451,7459,{"$raw":"00000000"},"110408","MJ.3.4912","INOP",3,"T",43.14516,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7452,7460,{"$raw":"00000000"},"110408","MJ.2.349","OPER",2,"A",2.62992,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7453,7461,{"$raw":"00000000"},"110408","MJ.3.4913","INOP",3,"T",3.26474,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7454,7462,{"$raw":"00000000"},"110408","MJ.3.4914","INOP",3,"T",367.41709,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7455,7463,{"$raw":"00000000"},"110408","MJ.3.4915","INOP",3,"T",27.20919,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7456,7464,{"$raw":"00000000"},"110408","MJ.3.4916","INOP",3,"T",5.59701,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7457,7465,{"$raw":"00000000"},"110408","MJ.3.4917","INOP",3,"T",193.82680,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7458,7466,{"$raw":"00000000"},"110408","MJ.3.4918","INOP",3,"T",177.35229,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7459,7467,{"$raw":"00000000"},"110408","MJ.3.4919","INOP",3,"T",15.66916,3.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7460,7468,{"$raw":"00000000"},"110408","MJ.3.4920","INOP",3,"T",2.35468,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7461,7469,{"$raw":"00000000"},"110408","MJ.3.4921","INOP",3,"T",2.36637,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7462,7470,{"$raw":"00000000"},"110408","MJ.3.4922","INOP",3,"T",16.31922,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7463,7471,{"$raw":"00000000"},"110408","MJ.3.4923","INOP",3,"T",233.00097,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7464,7472,{"$raw":"00000000"},"110408","MJ.3.4924","INOP",3,"T",124.59670,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7465,7473,{"$raw":"00000000"},"110408","MJ.3.4925","INOP",3,"T",176.67111,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7466,7474,{"$raw":"00000000"},"110408","MJ.3.4926","INOP",3,"T",76.40006,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7467,7475,{"$raw":"00000000"},"110408","MJ.3.4927","INOP",3,"T",74.69066,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7468,7476,{"$raw":"00000000"},"110408","MJ.3.4928","INOP",3,"T",619.77649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7469,7477,{"$raw":"00000000"},"110408","MJ.3.4929","INOP",3,"T",3.33257,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7470,7478,{"$raw":"00000000"},"110408","MJ.3.4930","INOP",3,"T",15.47712,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7471,7479,{"$raw":"00000000"},"110408","MJ.3.4931","INOP",3,"T",284.93633,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7472,7480,{"$raw":"00000000"},"110408","MJ.3.4932","INOP",3,"T",6.08363,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7473,7481,{"$raw":"00000000"},"110408","MJ.3.4933","INOP",3,"T",3.65903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7474,7482,{"$raw":"00000000"},"110408","MJ.3.4934","INOP",3,"T",440.98034,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7475,7483,{"$raw":"00000000"},"110408","MJ.3.4935","INOP",3,"T",2.80143,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7476,7484,{"$raw":"00000000"},"110408","MJ.3.4936","INOP",3,"T",6.39508,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7477,7485,{"$raw":"00000000"},"110408","MJ.3.4937","INOP",3,"T",155.15984,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7478,7486,{"$raw":"00000000"},"110408","MJ.3.4938","INOP",3,"T",3.32032,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7479,7487,{"$raw":"00000000"},"110408","MJ.3.4939","INOP",3,"T",41.99121,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7480,7488,{"$raw":"00000000"},"110408","MJ.3.4940","INOP",3,"T",45.54565,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7481,7489,{"$raw":"00000000"},"110408","MJ.3.4941","INOP",3,"T",7.82036,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7482,7490,{"$raw":"00000000"},"110408","MJ.3.4942","INOP",3,"T",129.92014,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7483,7491,{"$raw":"00000000"},"110408","MJ.3.4943","INOP",3,"T",246.24165,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7484,7492,{"$raw":"00000000"},"110408","MJ.3.4944","INOP",3,"T",24.24125,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7485,7493,{"$raw":"00000000"},"110408","MJ.3.4945","INOP",3,"T",279.83815,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7486,7494,{"$raw":"00000000"},"110408","MJ.3.4946","INOP",3,"T",3.40899,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7487,7495,{"$raw":"00000000"},"110408","MJ.3.4947","INOP",3,"T",4.20595,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7488,7496,{"$raw":"00000000"},"110408","MJ.3.4948","INOP",3,"T",216.99329,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7489,7497,{"$raw":"00000000"},"110408","MJ.3.4949","INOP",3,"T",95.89181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7490,7498,{"$raw":"00000000"},"110408","MJ.3.4950","INOP",3,"T",73.61715,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7491,7499,{"$raw":"00000000"},"110408","MJ.3.4951","INOP",3,"T",35.54103,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7492,7500,{"$raw":"00000000"},"110408","MJ.3.4952","INOP",3,"T",42.16901,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7493,7501,{"$raw":"00000000"},"110408","MJ.3.4953","INOP",3,"T",75.81570,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7494,7502,{"$raw":"00000000"},"110408","MJ.3.4954","INOP",3,"T",1.20208,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7495,7503,{"$raw":"00000000"},"110408","MJ.3.4955","INOP",3,"T",254.06210,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7496,7504,{"$raw":"00000000"},"110408","MJ.3.4956","INOP",3,"T",88.39515,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7497,7505,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.04006,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7498,7506,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.77415,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7499,7507,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,158.35339,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7500,7508,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,21.75429,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7501,7509,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,6.03160,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7502,7510,{"$raw":"00000000"},"110408","MJ.3.4957","INOP",3,"T",38.06565,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7503,7511,{"$raw":"00000000"},"110408","MJ.3.4958","INOP",3,"T",8.74442,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7504,7512,{"$raw":"00000000"},"110408","MJ.3.4959","INOP",3,"T",7.73724,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7505,7513,{"$raw":"00000000"},"110408","MJ.3.4960","INOP",3,"T",418.38465,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7506,7514,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,187.55586,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7507,7515,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.46023,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7508,7516,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,130.94096,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7509,7517,{"$raw":"00000000"},"110408","MJ.3.4961","INOP",3,"T",94.09562,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7510,7518,{"$raw":"00000000"},"110408","MJ.3.4962","INOP",3,"T",37.82282,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7511,7519,{"$raw":"00000000"},"110408","MJ.3.4963","INOP",3,"T",36.69430,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7512,7520,{"$raw":"00000000"},"110408","MJ.3.4964","INOP",3,"T",35.31893,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7513,7521,{"$raw":"00000000"},"110408","MJ.3.4965","INOP",3,"T",139.88302,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7514,7522,{"$raw":"00000000"},"110408","MJ.3.4966","INOP",3,"T",2.69119,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7515,7523,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.67113,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7516,7524,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,139.83920,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7517,7525,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.36096,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7518,7526,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,206.49694,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7519,7527,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,154.22567,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7520,7528,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.20609,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7521,7529,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,604.73733,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7522,7530,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,312.28331,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7523,7531,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,12.91670,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7524,7532,{"$raw":"00000000"},"110408","MJ.3.4967","INOP",3,"T",88.79603,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7525,7533,{"$raw":"00000000"},"110408","MJ.3.4968","INOP",3,"T",2.61840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7526,7534,{"$raw":"00000000"},"110408","MJ.3.4969","INOP",3,"T",94.17045,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7527,7535,{"$raw":"00000000"},"110408","MJ.3.4970","INOP",3,"T",38.65011,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,7528,7536,{"$raw":"00000000"},"110408","MJ.3.4971","INOP",3,"T",141.15996,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7529,7537,{"$raw":"00000000"},"110408","MJ.3.4972","INOP",3,"T",19.74484,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7530,7538,{"$raw":"00000000"},"110408","MJ.3.4973","INOP",3,"T",90.40781,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7531,7539,{"$raw":"00000000"},"110408","MJ.3.4974","INOP",3,"T",344.34352,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7532,7540,{"$raw":"00000000"},"110408","MJ.3.4975","INOP",3,"T",52.69267,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7533,7541,{"$raw":"00000000"},"110408","MJ.3.4976","INOP",3,"T",223.81072,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7534,7542,{"$raw":"00000000"},"110408","MJ.3.4977","INOP",3,"T",3.18686,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7535,7543,{"$raw":"00000000"},"110408","MJ.3.4978","INOP",3,"T",26.92843,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7536,7544,{"$raw":"00000000"},"110408","MJ.2.350","OPER",2,"A",4.18336,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7537,7545,{"$raw":"00000000"},"110408","MJ.3.4979","INOP",3,"T",143.32104,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7538,7546,{"$raw":"00000000"},"110408","MJ.3.4980","INOP",3,"T",2.32332,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7539,7547,{"$raw":"00000000"},"110408","MJ.3.4981","INOP",3,"A",2.87341,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7540,7548,{"$raw":"00000000"},"110408","MJ.3.4982","INOP",3,"T",2.30673,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7541,7549,{"$raw":"00000000"},"110408","MJ.3.4983","INOP",3,"T",299.55230,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7542,7550,{"$raw":"00000000"},"110408","MJ.3.4984","INOP",3,"T",2.73651,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7543,7551,{"$raw":"00000000"},"110408","MJ.3.4985","INOP",3,"T",172.08491,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7544,7552,{"$raw":"00000000"},"110408","MJ.3.4986","INOP",3,"T",127.30545,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,7545,7553,{"$raw":"00000000"},"110402","MJ.3.4987","INOP",3,"T",85.03561,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","da Liberdade",null,null,null,null,null,"110402",1,null,null,7546,7554,{"$raw":"00000000"},"110402","MJ.3.4988","INOP",3,"T",35.56321,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110402",1,null,"R DA IGREJA",7547,7555,{"$raw":"00000000"},"110402","R DA IGREJA","INOP",3,"T",33.48726,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7548,7556,{"$raw":"00000000"},"110402","MJ.3.4989","INOP",3,"T",8.30696,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","da Liberdade",null,null,null,null,null,"110402",1,null,null,7549,7557,{"$raw":"00000000"},"110402","MJ.3.4990","INOP",3,"T",49.00977,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7550,7558,{"$raw":"00000000"},"110402","MJ.3.4991","INOP",3,"T",6.26575,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7551,7559,{"$raw":"00000000"},"110402","MJ.1.162","OPER",1,"A",2.49467,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7552,7560,{"$raw":"00000000"},"110408","MJ.3.4992","INOP",3,"T",111.46677,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7553,7561,{"$raw":"00000000"},"110408","MJ.3.4993","INOP",3,"T",2.89007,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7554,7562,{"$raw":"00000000"},"110408","MJ.3.4994","INOP",3,"T",43.07849,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7555,7563,{"$raw":"00000000"},"110408","MJ.3.4995","INOP",3,"T",21.41925,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7556,7564,{"$raw":"00000000"},"110408","MJ.3.4996","INOP",3,"T",32.47405,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7557,7565,{"$raw":"00000000"},"110408","MJ.3.4997","INOP",3,"T",49.09363,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7558,7566,{"$raw":"00000000"},"110408","MJ.3.4998","INOP",3,"T",51.33375,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7559,7567,{"$raw":"00000000"},"110408","MJ.3.4999","INOP",3,"T",2.55853,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7560,7568,{"$raw":"00000000"},"110408","MJ.3.5000","INOP",3,"T",16.25450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7561,7569,{"$raw":"00000000"},"110408","MJ.3.5001","INOP",3,"T",8.08022,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7562,7570,{"$raw":"00000000"},"110408","MJ.3.5002","INOP",3,"T",244.21320,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7563,7571,{"$raw":"00000000"},"110402","MJ.3.5003","INOP",3,"T",262.72683,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7564,7572,{"$raw":"00000000"},"110402","MJ.3.5004","INOP",3,"T",2.75073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7565,7573,{"$raw":"00000000"},"110402","MJ.3.5005","INOP",3,"T",102.68399,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7566,7574,{"$raw":"00000000"},"110402","MJ.3.5006","INOP",3,"T",138.22262,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7567,7575,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,51.16796,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7568,7576,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,146.24877,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7569,7577,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,106.06969,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7570,7578,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,235.14811,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7571,7579,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,13.92814,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7572,7580,{"$raw":"00000000"},"110402","MJ.3.5007","INOP",3,"T",471.31871,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7573,7581,{"$raw":"00000000"},"110402","MJ.3.5008","INOP",3,"T",286.58507,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7574,7582,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,37.21012,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7575,7583,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,145.02689,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7576,7584,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,130.75391,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7577,7585,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,36.41195,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7578,7586,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,16.35580,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7579,7587,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,120.85524,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7580,7588,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,235.68929,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7581,7589,{"$raw":"00000000"},"110402","MJ.3.5009","INOP",3,"T",500.98690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7582,7590,{"$raw":"00000000"},"110402","MJ.3.5010","INOP",3,"T",216.49505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7583,7591,{"$raw":"00000000"},"110402","MJ.3.5011","INOP",3,"T",174.69243,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7584,7592,{"$raw":"00000000"},"110402","MJ.3.5012","INOP",3,"T",211.19973,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7585,7593,{"$raw":"00000000"},"110402","MJ.3.5013","INOP",3,"T",74.11738,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7586,7594,{"$raw":"00000000"},"110402","MJ.3.5014","INOP",3,"T",164.45229,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7587,7595,{"$raw":"00000000"},"110402","MJ.3.5015","INOP",3,"T",298.99689,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7588,7596,{"$raw":"00000000"},"110402","MJ.3.5016","INOP",3,"T",154.32867,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7589,7597,{"$raw":"00000000"},"110402","MJ.3.5017","INOP",3,"T",42.23806,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7590,7598,{"$raw":"00000000"},"110402","MJ.3.5018","INOP",3,"T",20.68130,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7591,7599,{"$raw":"00000000"},"110402","MJ.3.5019","INOP",3,"T",85.88338,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7592,7600,{"$raw":"00000000"},"110402","MJ.3.5020","INOP",3,"T",10.09120,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7593,7601,{"$raw":"00000000"},"110402","MJ.3.5021","INOP",3,"T",3.29621,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7594,7602,{"$raw":"00000000"},"110402","MJ.3.5022","INOP",3,"T",4.08167,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7595,7603,{"$raw":"00000000"},"110402","MJ.3.5023","INOP",3,"T",2.31311,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7596,7604,{"$raw":"00000000"},"110402","MJ.3.5024","INOP",3,"T",21.97498,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7597,7605,{"$raw":"00000000"},"110402","MJ.3.5025","INOP",3,"T",156.71411,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7598,7606,{"$raw":"00000000"},"110402","MJ.3.5026","INOP",3,"T",0.51157,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7599,7607,{"$raw":"00000000"},"110402","MJ.1.163","OPER",1,"A",2.66678,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7600,7608,{"$raw":"00000000"},"110402","MJ.1.164","OPER",1,"A",2.77894,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7601,7609,{"$raw":"00000000"},"110402","MJ.3.5027","INOP",3,"T",248.13715,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7602,7610,{"$raw":"00000000"},"110402","MJ.3.5028","INOP",3,"T",325.89534,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7603,7611,{"$raw":"00000000"},"110402","MJ.3.5029","INOP",3,"T",180.68850,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7604,7612,{"$raw":"00000000"},"110402","MJ.3.5030","INOP",3,"T",203.58271,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GUILHERME LUÍS NUNES",null,"17 Dez 2002","R",null,"110402",1,null,"R GUILHERME LUÍS NUNES",7605,7613,{"$raw":"00000000"},"110402","R GUILHERME LUÍS NUNES","INOP",3,"T",163.27494,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GUILHERME LUÍS NUNES",null,"17 Dez 2002","R",null,"110402",1,null,"R GUILHERME LUÍS NUNES",7606,7614,{"$raw":"00000000"},"110402","R GUILHERME LUÍS NUNES","INOP",3,"T",296.66159,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7607,7615,{"$raw":"00000000"},"110402","MJ.3.5031","INOP",3,"T",247.76626,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FAZENDAS DE PENICHE",null,"27 Ag  2002","R",null,"110402",1,null,"R FAZENDAS DE PENICHE",7608,7616,{"$raw":"00000000"},"110402","R FAZENDAS DE PENICHE","INOP",3,"T",143.27210,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7609,7617,{"$raw":"00000000"},"110402","MJ.3.5032","INOP",3,"T",53.87028,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7610,7618,{"$raw":"00000000"},"110402","MJ.3.5033","INOP",3,"T",169.50144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7611,7619,{"$raw":"00000000"},"110402","MJ.3.5034","INOP",3,"T",111.34523,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7612,7620,{"$raw":"00000000"},"110402","MJ.3.5035","INOP",3,"T",169.70411,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7613,7621,{"$raw":"00000000"},"110402","MJ.3.5036","INOP",3,"T",113.65871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7614,7622,{"$raw":"00000000"},"110402","MJ.3.5037","INOP",3,"T",2.04841,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7615,7623,{"$raw":"00000000"},"110402","MJ.3.5038","INOP",3,"T",300.68800,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7616,7624,{"$raw":"00000000"},"110402","MJ.3.5039","INOP",3,"T",56.65718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7617,7625,{"$raw":"00000000"},"110402","MJ.3.5040","INOP",3,"T",24.66829,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7618,7626,{"$raw":"00000000"},"110402","MJ.3.5041","INOP",3,"T",47.34331,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7619,7627,{"$raw":"00000000"},"110402","MJ.3.5042","INOP",3,"T",37.01886,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7620,7628,{"$raw":"00000000"},"110402","MJ.3.5043","INOP",3,"T",101.70421,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7621,7629,{"$raw":"00000000"},"110402","MJ.3.5044","INOP",3,"T",111.19425,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7622,7630,{"$raw":"00000000"},"110402","MJ.3.5045","INOP",3,"T",46.08099,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7623,7631,{"$raw":"00000000"},"110402","MJ.3.5046","INOP",3,"T",27.55212,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7624,7632,{"$raw":"00000000"},"110402","MJ.3.5047","INOP",3,"T",19.54307,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7625,7633,{"$raw":"00000000"},"110402","MJ.3.5048","INOP",3,"T",24.18810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7626,7634,{"$raw":"00000000"},"110402","MJ.3.5049","INOP",3,"T",13.13387,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7627,7635,{"$raw":"00000000"},"110402","MJ.3.5050","INOP",3,"T",29.54710,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7628,7636,{"$raw":"00000000"},"110402","MJ.3.5051","INOP",3,"T",0.56462,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7629,7637,{"$raw":"00000000"},"110402","MJ.3.5052","INOP",3,"T",0.34015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7630,7638,{"$raw":"00000000"},"110402","MJ.3.5053","INOP",3,"T",34.36029,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7631,7639,{"$raw":"00000000"},"110402","MJ.3.5054","INOP",3,"T",2.30827,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7632,7640,{"$raw":"00000000"},"110402","MJ.3.5055","INOP",3,"T",78.91289,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"TRAZ DA IGREJA",null,null,"R",null,"110401",1,null,"R TRAZ DA IGREJA",7633,7641,{"$raw":"00000000"},"110401","R TRAZ DA IGREJA","INOP",3,"T",13.59599,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ANDRÉS",null,null,"R",null,"110410",1,null,"R DOS ANDRÉS",7634,7642,{"$raw":"00000000"},"110410","R DOS ANDRÉS","INOP",3,"T",91.99188,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HORTA VELHA",null,"15 Mar 1999","R",null,"110402",1,null,"R DA HORTA VELHA",7635,7643,{"$raw":"00000000"},"110402","R DA HORTA VELHA","OPER",2,"A",48.71763,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","DA MURTEIRA",null,null,"R",null,"110402",1,null,"R DA MURTEIRA",7636,7644,{"$raw":"00000000"},"110402","R DA MURTEIRA","OPER",1,"A",8.21342,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO NORTE",null,null,"R",null,"110402",1,null,"R DO NORTE",7637,7645,{"$raw":"00000000"},"110402","R DO NORTE","INOP",3,"T",180.44364,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7638,7646,{"$raw":"00000000"},"110402","MJ.3.5056","INOP",3,"T",269.29051,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALBERTINA MARQUES",null,null,"R",null,"110407",1,null,"R ALBERTINA MARQUES",7639,7647,{"$raw":"00000000"},"110407","R ALBERTINA MARQUES","INOP",3,"T",18.80906,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,7640,7648,{"$raw":"00000000"},"110402","MJ.3.5057","INOP",3,"T",139.99393,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7641,7649,{"$raw":"00000000"},"110402","MJ.3.5058","INOP",3,"T",28.32664,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7642,7650,{"$raw":"00000000"},"110402","MJ.3.5059","INOP",3,"T",133.08935,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7643,7651,{"$raw":"00000000"},"110402","MJ.3.5060","INOP",3,"T",1.99459,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7644,7652,{"$raw":"00000000"},"110402","MJ.3.5061","INOP",3,"T",184.50027,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7645,7653,{"$raw":"00000000"},"110402","MJ.3.5062","INOP",3,"T",87.08549,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110402",1,null,null,7646,7654,{"$raw":"00000000"},"110402","MJ.3.5063","INOP",3,"T",387.88738,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7647,7655,{"$raw":"00000000"},"110402","MJ.3.5064","INOP",3,"T",2.17187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7648,7656,{"$raw":"00000000"},"110402","MJ.3.5065","INOP",3,"T",31.79989,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7649,7657,{"$raw":"00000000"},"110402","MJ.3.5066","INOP",3,"T",75.41871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7650,7658,{"$raw":"00000000"},"110402","MJ.3.5067","INOP",3,"T",2.53870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7651,7659,{"$raw":"00000000"},"110402","MJ.3.5068","INOP",3,"T",236.83067,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7652,7660,{"$raw":"00000000"},"110402","MJ.3.5069","INOP",3,"T",2.21903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7653,7661,{"$raw":"00000000"},"110402","MJ.1.165","OPER",1,"A",2.03600,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7654,7662,{"$raw":"00000000"},"110402","MJ.3.5070","INOP",3,"T",37.39109,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7655,7663,{"$raw":"00000000"},"110402","MJ.3.5071","INOP",3,"T",54.75074,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7656,7664,{"$raw":"00000000"},"110402","MJ.3.5072","INOP",3,"T",94.15787,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,7657,7665,{"$raw":"00000000"},"110402","MJ.3.5073","INOP",3,"T",257.62752,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7658,7666,{"$raw":"00000000"},"110402","MJ.3.5074","INOP",3,"T",467.95218,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7659,7667,{"$raw":"00000000"},"110402","MJ.3.5075","INOP",3,"T",104.00247,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7660,7668,{"$raw":"00000000"},"110402","MJ.3.5076","INOP",3,"T",156.10820,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7661,7669,{"$raw":"00000000"},"110402","MJ.3.5077","INOP",3,"T",425.21991,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7662,7670,{"$raw":"00000000"},"110402","MJ.3.5078","INOP",3,"T",55.34577,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7663,7671,{"$raw":"00000000"},"110402","MJ.3.5079","INOP",3,"T",89.05813,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7664,7672,{"$raw":"00000000"},"110402","MJ.3.5080","INOP",3,"T",199.85042,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7665,7673,{"$raw":"00000000"},"110402","MJ.3.5081","INOP",3,"T",273.41455,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7666,7674,{"$raw":"00000000"},"110402","MJ.3.5082","INOP",3,"T",269.05632,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7667,7675,{"$raw":"00000000"},"110402","MJ.3.5083","INOP",3,"T",169.22692,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7668,7676,{"$raw":"00000000"},"110402","MJ.3.5084","INOP",3,"T",186.91569,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7669,7677,{"$raw":"00000000"},"110402","MJ.3.5085","INOP",3,"T",146.36910,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7670,7678,{"$raw":"00000000"},"110402","MJ.3.5086","INOP",3,"T",68.93742,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7671,7679,{"$raw":"00000000"},"110402","MJ.3.5087","INOP",3,"T",125.51319,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7672,7680,{"$raw":"00000000"},"110409","MJ.3.5088","INOP",3,"T",32.58634,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SÃO JOSÉ",null,null,"R",null,"110409",1,null,"R SÃO JOSÉ",7673,7681,{"$raw":"00000000"},"110409","R SÃO JOSÉ","INOP",3,"T",137.03361,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ADEGA COOPERATIVA","Proc nº 03/05/397",null,"LG",null,"110402",1,null,"LG DA ADEGA COOPERATIVA",7674,7682,{"$raw":"00000000"},"110402","LG DA ADEGA COOPERATIVA","INOP",3,"T",55.42491,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS COUTOS",null,null,"R",null,"110402",1,null,"R DOS COUTOS",7675,7683,{"$raw":"00000000"},"110402","R DOS COUTOS","INOP",3,"T",31.69371,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7676,7684,{"$raw":"00000000"},"110402","MJ.3.5089","INOP",3,"T",44.22990,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"BENJAMIM DE CARVALHO",null,null,"R",null,"110402",1,null,"R BENJAMIM DE CARVALHO",7677,7685,{"$raw":"00000000"},"110402","R BENJAMIM DE CARVALHO","INOP",3,"T",88.86728,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",7678,7686,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",80.27268,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",7679,7687,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",33.68674,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7680,7688,{"$raw":"00000000"},"110402","MJ.3.5090","INOP",3,"T",102.94767,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R",null,null,"Processo nº 9/2008","Reprovado em 1 Abril 2008 a 'Rua Bernardino Ralha'",null,null,"110402",1,null,null,7681,7689,{"$raw":"00000000"},"110402","MJ.3.5091","INOP",3,"T",293.65749,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7682,7690,{"$raw":"00000000"},"110402","MJ.3.5092","INOP",3,"T",144.72374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7683,7691,{"$raw":"00000000"},"110402","MJ.3.5093","INOP",3,"T",63.02928,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7684,7692,{"$raw":"00000000"},"110402","MJ.3.5094","INOP",3,"T",11.17895,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7685,7693,{"$raw":"00000000"},"110402","MJ.3.5095","INOP",3,"T",2.16375,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7686,7694,{"$raw":"00000000"},"110402","MJ.3.5096","INOP",3,"T",51.21937,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7687,7695,{"$raw":"00000000"},"110402","MJ.3.5097","INOP",3,"T",5.01677,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7688,7696,{"$raw":"00000000"},"110402","MJ.3.5098","INOP",3,"T",20.38409,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7689,7697,{"$raw":"00000000"},"110402","MJ.3.5099","INOP",3,"T",8.43187,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7690,7698,{"$raw":"00000000"},"110402","MJ.3.5100","INOP",3,"T",8.51762,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7691,7699,{"$raw":"00000000"},"110402","MJ.3.5101","INOP",3,"T",31.43789,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,7692,7700,{"$raw":"00000000"},"110402","MJ.3.5102","INOP",3,"T",71.28252,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7693,7701,{"$raw":"00000000"},"110402","MJ.3.5103","INOP",3,"T",3.16571,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7694,7702,{"$raw":"00000000"},"110402","MJ.3.5104","INOP",3,"T",111.64414,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7695,7703,{"$raw":"00000000"},"110402","MJ.3.5105","INOP",3,"T",7.36848,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7696,7704,{"$raw":"00000000"},"110402","MJ.3.5106","INOP",3,"T",0.42544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7697,7705,{"$raw":"00000000"},"110402","MJ.3.5107","INOP",3,"T",44.41661,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7698,7706,{"$raw":"00000000"},"110402","MJ.3.5108","INOP",3,"T",2.38550,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS BOMBEIROS",null,null,"AV",null,"110402",1,null,"AV DOS BOMBEIROS",7699,7707,{"$raw":"00000000"},"110402","AV DOS BOMBEIROS","INOP",3,"T",17.17443,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS BOMBEIROS",null,null,"AV",null,"110402",1,null,"AV DOS BOMBEIROS",7700,7708,{"$raw":"00000000"},"110402","AV DOS BOMBEIROS","INOP",3,"T",4.24118,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS BOMBEIROS",null,null,"AV",null,"110402",1,null,"AV DOS BOMBEIROS",7701,7709,{"$raw":"00000000"},"110402","AV DOS BOMBEIROS","INOP",3,"T",43.22016,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7702,7710,{"$raw":"00000000"},"110402","MJ.3.5109","INOP",3,"T",97.87945,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7703,7711,{"$raw":"00000000"},"110402","MJ.3.5110","INOP",3,"T",27.60175,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7704,7712,{"$raw":"00000000"},"110402","MJ.3.5111","INOP",3,"T",119.50812,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7705,7713,{"$raw":"00000000"},"110402","MJ.3.5112","INOP",3,"T",66.91613,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AFONSO COSTA",null,null,"R",null,"110408",1,null,"R AFONSO COSTA",7706,7714,{"$raw":"00000000"},"110408","R AFONSO COSTA","OPER",2,"A",23.13530,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LADEIRA DAS COELHAS",null,null,"R",null,"110406",1,null,"R LADEIRA DAS COELHAS",7707,7715,{"$raw":"00000000"},"110406","R LADEIRA DAS COELHAS","INOP",3,"T",345.63239,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ANDRÉS",null,null,"R",null,"110410",1,null,"R DOS ANDRÉS",7708,7716,{"$raw":"00000000"},"110410","R DOS ANDRÉS","INOP",3,"T",46.17555,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7709,7717,{"$raw":"00000000"},"110402","MJ.3.5113","INOP",3,"T",57.49960,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7710,7718,{"$raw":"00000000"},"110402","MJ.3.5114","INOP",3,"T",6.99861,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7711,7719,{"$raw":"00000000"},"110402","MJ.3.5115","INOP",3,"T",88.66905,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","13 DE JANEIRO",null,null,"R",null,"110402",1,null,"R 13 DE JANEIRO",7712,7720,{"$raw":"00000000"},"110402","R 13 DE JANEIRO","OPER",1,"A",108.34324,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",7713,7721,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",313.20932,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CHIMECA",null,null,"BC",null,null,{"$raw":"*****"},null,"BC DA CHIMECA",7714,7722,{"$raw":"00000000"},null,"BC DA CHIMECA",null,{"$raw":"*****"},null,28.66736,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFREDO MARCENEIRO",null,null,"PTO",null,"110402",1,null,"PTO ALFREDO MARCENEIRO",7715,7723,{"$raw":"00000000"},"110402","PTO ALFREDO MARCENEIRO","INOP",3,"T",33.96914,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",7716,7724,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",21.34847,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MUNICÍPIO",null,null,"PTO",null,"110402",1,null,"PTO DO MUNICÍPIO",7717,7725,{"$raw":"00000000"},"110402","PTO DO MUNICÍPIO","INOP",3,"T",31.72355,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",7718,7726,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",151.24869,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7719,7727,{"$raw":"00000000"},"110402","MJ.1.166","OPER",1,"A",3.27185,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7720,7728,{"$raw":"00000000"},"110402","MJ.3.5116","INOP",3,"T",5.72339,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7721,7729,{"$raw":"00000000"},"110402","MJ.3.5117","INOP",3,"T",25.29624,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7722,7730,{"$raw":"00000000"},"110402","MJ.3.5118","INOP",3,"T",36.08459,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7723,7731,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7724,7732,{"$raw":"00000000"},"110402","MJ.3.5119","INOP",3,"T",90.83054,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7725,7733,{"$raw":"00000000"},"110402","MJ.1.167","OPER",1,"A",2.65000,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7726,7734,{"$raw":"00000000"},"110402","MJ.3.5120","INOP",3,"T",22.41129,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE ALVARES DE ABREU",null,null,"R",null,"110402",1,null,"R DR DUARTE ALVARES DE ABREU",7727,7735,{"$raw":"00000000"},"110402","R DR DUARTE ALVARES DE ABREU","INOP",3,"T",64.92921,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE ALVARES DE ABREU",null,null,"R",null,"110402",1,null,"R DR DUARTE ALVARES DE ABREU",7728,7736,{"$raw":"00000000"},"110402","R DR DUARTE ALVARES DE ABREU","INOP",3,"T",59.17874,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE ALVARES DE ABREU",null,null,"R",null,"110402",1,null,"R DR DUARTE ALVARES DE ABREU",7729,7737,{"$raw":"00000000"},"110402","R DR DUARTE ALVARES DE ABREU","INOP",3,"T",43.42857,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE ALVARES DE ABREU",null,null,"R",null,"110402",1,null,"R DR DUARTE ALVARES DE ABREU",7730,7738,{"$raw":"00000000"},"110402","R DR DUARTE ALVARES DE ABREU","INOP",3,"T",5.76823,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7731,7739,{"$raw":"00000000"},"110402","MJ.3.5121","INOP",3,"T",2.41868,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7732,7740,{"$raw":"00000000"},"110402","MJ.3.5122","INOP",3,"T",40.57286,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7733,7741,{"$raw":"00000000"},"110402","MJ.3.5123","INOP",3,"T",16.79194,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7734,7742,{"$raw":"00000000"},"110402","MJ.3.5124","INOP",3,"T",19.13656,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7735,7743,{"$raw":"00000000"},"110402","MJ.3.5125","INOP",3,"T",13.42771,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7736,7744,{"$raw":"00000000"},"110402","MJ.3.5126","INOP",3,"T",20.06159,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA SERVENTIA",null,null,"R",null,"110402",1,null,"R DA SERVENTIA",7737,7745,{"$raw":"00000000"},"110402","R DA SERVENTIA","INOP",3,"T",78.79208,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE ALVARES DE ABREU",null,null,"R",null,"110402",1,null,"R DR DUARTE ALVARES DE ABREU",7738,7746,{"$raw":"00000000"},"110402","R DR DUARTE ALVARES DE ABREU","INOP",3,"T",21.58459,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE ALVARES DE ABREU",null,null,"R",null,"110402",1,null,"R DR DUARTE ALVARES DE ABREU",7739,7747,{"$raw":"00000000"},"110402","R DR DUARTE ALVARES DE ABREU","INOP",3,"T",67.21656,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7740,7748,{"$raw":"00000000"},"110402","MJ.2.351","OPER",2,"A",5.01538,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7741,7749,{"$raw":"00000000"},"110402","MJ.2.352","OPER",2,"A",65.85068,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7742,7750,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7743,7751,{"$raw":"00000000"},"110402","MJ.3.5127","INOP",3,"T",65.03989,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7744,7752,{"$raw":"00000000"},"110402","MJ.3.5128","INOP",3,"T",3.66281,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7745,7753,{"$raw":"00000000"},"110402","MJ.3.5129","INOP",3,"T",3.26533,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7746,7754,{"$raw":"00000000"},"110402","MJ.2.353","OPER",2,"T",84.09944,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,7747,7755,{"$raw":"00000000"},"110402","MJ.2.354","OPER",2,"A",138.57818,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7748,7756,{"$raw":"00000000"},"110402","MJ.2.355","OPER",2,"A",575.00017,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7749,7757,{"$raw":"00000000"},"110402","MJ.3.5130","INOP",3,"T",3.07483,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7750,7758,{"$raw":"00000000"},"110402","MJ.3.5131","INOP",3,"T",135.35421,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7751,7759,{"$raw":"00000000"},"110402","MJ.3.5132","INOP",3,"T",0.96840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7752,7760,{"$raw":"00000000"},"110402","MJ.3.5133","INOP",3,"T",115.56847,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7753,7761,{"$raw":"00000000"},"110402","MJ.3.5134","INOP",3,"T",30.22119,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7754,7762,{"$raw":"00000000"},"110402","MJ.3.5135","INOP",3,"T",47.83647,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7755,7763,{"$raw":"00000000"},"110402","MJ.3.5136","INOP",3,"T",104.76978,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7756,7764,{"$raw":"00000000"},"110402","MJ.3.5137","INOP",3,"T",134.97416,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7757,7765,{"$raw":"00000000"},"110402","MJ.3.5138","INOP",3,"T",70.98561,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF JOSÉ MARIA PAIS MACHADO",null,null,"R",null,"110402",1,null,"R PROF JOSÉ MARIA PAIS MACHADO",7758,7766,{"$raw":"00000000"},"110402","R PROF JOSÉ MARIA PAIS MACHADO","INOP",3,"T",52.16715,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7759,7767,{"$raw":"00000000"},"110402","MJ.3.5139","INOP",3,"T",22.28636,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA EUROPA",null,null,"ROT",null,"110402",1,null,"ROT DA EUROPA",7760,7768,{"$raw":"00000000"},"110402","ROT DA EUROPA","INOP",3,"T",28.22985,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA EUROPA",null,null,"ROT",null,"110402",1,null,"ROT DA EUROPA",7761,7769,{"$raw":"00000000"},"110402","ROT DA EUROPA","INOP",3,"A",35.26221,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA ESPIGA",null,"07/02/2006","R",null,"110405",2,"110402","R DA ESPIGA",7762,7770,{"$raw":"00000000"},"110405","R DA ESPIGA","OPER",1,"A",569.86286,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7763,7771,{"$raw":"00000000"},"110402","MJ.3.5140","INOP",3,"T",129.40578,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA D DURÃO","Proc nº 03/05/452","04/04/2006","ESTR",null,"110405",1,null,"ESTR DA D DURÃO",7764,7772,{"$raw":"00000000"},"110405","ESTR DA D DURÃO","OPER",2,"A",97.13325,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JÚLIO DINIZ",null,"15 Mar 1999. \"... até ao Largo da Igreja\"","R",null,"110402",1,null,"R JÚLIO DINIZ",7765,7773,{"$raw":"00000000"},"110402","R JÚLIO DINIZ","INOP",3,"T",43.92537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7766,7774,{"$raw":"00000000"},"110402","MJ.3.5141","INOP",3,"T",289.20365,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7767,7775,{"$raw":"00000000"},"110402","MJ.3.5142","INOP",3,"T",1.23762,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7768,7776,{"$raw":"00000000"},"110402","MJ.3.5143","INOP",3,"T",26.59227,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7769,7777,{"$raw":"00000000"},"110402","MJ.3.5144","INOP",3,"T",174.00825,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7770,7778,{"$raw":"00000000"},"110402","MJ.3.5145","INOP",3,"T",117.97612,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7771,7779,{"$raw":"00000000"},"110402","MJ.3.5146","INOP",3,"T",33.34921,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7772,7780,{"$raw":"00000000"},"110402","MJ.3.5147","INOP",3,"T",63.12934,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7773,7781,{"$raw":"00000000"},"110402","MJ.3.5148","INOP",3,"T",112.45326,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7774,7782,{"$raw":"00000000"},"110402","MJ.3.5149","INOP",3,"T",18.95475,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7775,7783,{"$raw":"00000000"},"110402","MJ.3.5150","INOP",3,"T",71.80489,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7776,7784,{"$raw":"00000000"},"110402","MJ.3.5151","INOP",3,"T",31.01153,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7777,7785,{"$raw":"00000000"},"110402","MJ.3.5152","INOP",3,"T",138.78153,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7778,7786,{"$raw":"00000000"},"110402","MJ.3.5153","INOP",3,"A",2.72356,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7779,7787,{"$raw":"00000000"},"110402","MJ.3.5154","INOP",3,"T",279.78775,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7780,7788,{"$raw":"00000000"},"110402","MJ.3.5155","INOP",3,"T",2.92370,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7781,7789,{"$raw":"00000000"},"110402","MJ.3.5156","INOP",3,"T",387.83197,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7782,7790,{"$raw":"00000000"},"110402","MJ.3.5157","INOP",3,"T",3.19925,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SD","Processo nº 01/2009/113",null,null,null,"110402",1,null,"SD",7783,7791,{"$raw":"00000000"},"110402","SD","INOP",3,"T",158.51946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7784,7792,{"$raw":"00000000"},"110402","MJ.3.5158","INOP",3,"T",9.94924,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SD","Processo nº 01/2009/113",null,null,null,"110402",1,null,"SD",7785,7793,{"$raw":"00000000"},"110402","SD","INOP",3,"T",26.76053,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7786,7794,{"$raw":"00000000"},"110402","MJ.3.5159","INOP",3,"T",3.35418,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,7787,7795,{"$raw":"00000000"},"110402","MJ.3.5160","INOP",3,"T",193.98771,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7788,7796,{"$raw":"00000000"},"110402","MJ.3.5161","INOP",3,"T",3.09716,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7789,7797,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7790,7798,{"$raw":"00000000"},"110409","MJ.3.5162","INOP",3,"T",32.89130,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7791,7799,{"$raw":"00000000"},"110409","MJ.3.5163","INOP",3,"T",35.35125,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7792,7800,{"$raw":"00000000"},"110409","MJ.3.5164","INOP",3,"T",2.91781,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7793,7801,{"$raw":"00000000"},"110409","MJ.3.5165","INOP",3,"A",3.13441,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7794,7802,{"$raw":"00000000"},"110402","MJ.1.168","OPER",1,"A",2.94151,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7795,7803,{"$raw":"00000000"},"110402","MJ.3.5166","INOP",3,"T",87.75799,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7796,7804,{"$raw":"00000000"},"110402","MJ.3.5167","INOP",3,"T",143.60499,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7797,7805,{"$raw":"00000000"},"110402","MJ.3.5168","INOP",3,"T",76.06366,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7798,7806,{"$raw":"00000000"},"110402","MJ.3.5169","INOP",3,"T",189.40276,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7799,7807,{"$raw":"00000000"},"110402","MJ.3.5170","INOP",3,"T",68.05312,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7800,7808,{"$raw":"00000000"},"110402","MJ.3.5171","INOP",3,"T",74.88593,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7801,7809,{"$raw":"00000000"},"110402","MJ.3.5172","INOP",3,"T",49.18825,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7802,7810,{"$raw":"00000000"},"110402","MJ.3.5173","INOP",3,"T",126.20270,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7803,7811,{"$raw":"00000000"},"110402","MJ.3.5174","INOP",3,"T",10.21925,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7804,7812,{"$raw":"00000000"},"110402","MJ.3.5175","INOP",3,"T",131.11562,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7805,7813,{"$raw":"00000000"},"110402","MJ.3.5176","INOP",3,"T",63.67016,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7806,7814,{"$raw":"00000000"},"110402","MJ.3.5177","INOP",3,"T",258.43767,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7807,7815,{"$raw":"00000000"},"110402","MJ.3.5178","INOP",3,"T",117.74198,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7808,7816,{"$raw":"00000000"},"110402","MJ.3.5179","INOP",3,"T",17.29258,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7809,7817,{"$raw":"00000000"},"110402","MJ.3.5180","INOP",3,"T",270.71365,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7810,7818,{"$raw":"00000000"},"110402","MJ.3.5181","INOP",3,"T",2.53160,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7811,7819,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,269.18708,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7812,7820,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,35.25041,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7813,7821,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,89.91921,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7814,7822,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,391.57243,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7815,7823,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,220.55102,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7816,7824,{"$raw":"00000000"},"110402","MJ.3.5182","INOP",3,"T",97.78816,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7817,7825,{"$raw":"00000000"},"110402","MJ.3.5183","INOP",3,"T",126.60971,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7818,7826,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,16.04741,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7819,7827,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,75.59253,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7820,7828,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,99.34587,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","1029",null,null,"CM",null,"110405",1,null,"CM 1029",7821,7829,{"$raw":"00000000"},"110405","CM 1029","OPER",1,"A",14.23779,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","574",null,null,"EM",null,"110405",1,null,"EM 574",7822,7830,{"$raw":"00000000"},"110405","EM 574","OPER",2,"A",388.87677,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,7823,7831,{"$raw":"00000000"},"110409","MJ.3.5184","INOP",3,"T",324.45150,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO COMÉRCIO",null,null,"R",null,"110407",1,null,"R DO COMÉRCIO",7824,7832,{"$raw":"00000000"},"110407","R DO COMÉRCIO","OPER",1,"A",22.89902,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO COMÉRCIO",null,null,"R",null,"110407",1,null,"R DO COMÉRCIO",7825,7833,{"$raw":"00000000"},"110407","R DO COMÉRCIO","OPER",1,"A",29.00208,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FLORESTAL",null,null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",7826,7834,{"$raw":"00000000"},"110405","ESTR FLORESTAL","INOP",3,"T",10.86802,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL VALE CARROTO",null,"26 ago 2003","R",null,"110410",1,null,"R CASAL VALE CARROTO",7827,7835,{"$raw":"00000000"},"110410","R CASAL VALE CARROTO","INOP",3,"T",26.32531,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","8","8",null,null,"EN",null,"110408",1,null,"IC 1",7828,7836,{"$raw":"00000000"},"110408","IC 1","OPER",2,"A",1055.01364,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","8","8",null,null,"EN",null,"110408",1,null,"IC 1",7829,7837,{"$raw":"00000000"},"110408","IC 1","OPER",1,"A",625.36546,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA FONTE",null,null,"R",null,"110410",1,null,"R DA FONTE",7830,7838,{"$raw":"00000000"},"110410","R DA FONTE","OPER",1,"A",230.65136,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",7831,7839,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",95.72658,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",7832,7840,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",23.74739,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","1038-1",null,null,"CM",null,"110405",1,null,"CM 1038-1",7833,7841,{"$raw":"00000000"},"110405","CM 1038-1","OPER",2,"A",742.05130,5.00000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1",null,null,"DA VARZEA",null,null,"R",null,"110403",1,null,"R DA VARZEA",7834,7842,{"$raw":"00000000"},"110403","R DA VARZEA","INOP",3,"T",108.49692,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CARVALHEIRA",null,"15 Jan 2001","R",null,"110405",1,null,"R DA CARVALHEIRA",7835,7843,{"$raw":"00000000"},"110405","R DA CARVALHEIRA","INOP",3,"T",65.23661,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,"23 Out 2000","R",null,"110405",1,null,"R DO CABEÇO",7836,7844,{"$raw":"00000000"},"110405","R DO CABEÇO","INOP",3,"T",314.51103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7837,7845,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",99.10261,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7838,7846,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",505.49484,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1",null,null,"DA GALÉ",null,null,"R",null,"110405",1,null,"R DA GALÉ",7839,7847,{"$raw":"00000000"},"110405","R DA GALÉ","INOP",3,"T",170.09490,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",7840,7848,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",318.30568,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1035","DA CUTELARIA",null,"26 mar 2001","LG",null,"110405",1,null,"LG DA CUTELARIA",7841,7849,{"$raw":"00000000"},"110405","LG DA CUTELARIA","OPER",1,"A",79.35177,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","1029",null,null,"CM",null,"110402",1,null,"CM 1029",7842,7850,{"$raw":"00000000"},"110402","CM 1029","OPER",1,"A",297.10343,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7843,7851,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",296.33269,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1",null,null,"DR DUARTE ALVARES DE ABREU",null,null,"R",null,"110402",1,null,"R DR DUARTE ALVARES DE ABREU",7844,7852,{"$raw":"00000000"},"110402","R DR DUARTE ALVARES DE ABREU","INOP",3,"T",23.39629,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",7845,7853,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",397.53999,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7846,7854,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",395.31529,5.50000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","EM","570","570",null,null,"EM",null,null,0,null,"EM 570",7847,7855,{"$raw":"00000000"},null,"EM 570",null,1,"A",29.00278,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,null,0,null,"EM 570",7848,7856,{"$raw":"00000000"},null,"EM 570",null,1,"A",76.94577,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",7849,7857,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",199.11499,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7850,7858,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",232.52994,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7851,7859,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",202.59166,5.50000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7852,7860,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",141.91663,5.50000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1",null,null,"DA SERVENTIA",null,null,"R",null,"110402",1,null,"R DA SERVENTIA",7853,7861,{"$raw":"00000000"},"110402","R DA SERVENTIA","INOP",3,"T",50.77442,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7854,7862,{"$raw":"00000000"},"110405","MJ.3.5185","INOP",3,"T",6.24432,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7855,7863,{"$raw":"00000000"},"110405","MJ.3.5186","INOP",3,"T",118.00854,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",7856,7864,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",42.55789,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",7857,7865,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",77.42555,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",7858,7866,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",44.12352,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",7859,7867,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",18.44832,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7860,7868,{"$raw":"00000000"},"110405","MJ.1.169","OPER",1,"A",2.74345,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7861,7869,{"$raw":"00000000"},"110405","MJ.3.5187","INOP",3,"T",1.65148,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7862,7870,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",16.11278,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7863,7871,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",19.75511,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",2,null,null,7864,7872,{"$raw":"00000000"},"110405","MJ.3.5188","INOP",3,"T",2.02388,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7865,7873,{"$raw":"00000000"},"110405","MJ.3.5189","INOP",3,"T",93.17362,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","DA ESPERANÇA",null,null,"R",null,"110408",1,null,"R DA ESPERANÇA",7866,7874,{"$raw":"00000000"},"110408","R DA ESPERANÇA","OPER",2,"A",168.32086,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","DA ESPERANÇA",null,null,"R",null,"110408",1,null,"R DA ESPERANÇA",7867,7875,{"$raw":"00000000"},"110408","R DA ESPERANÇA","OPER",2,"A",46.50381,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","1029",null,null,"CM",null,"110402",1,null,"CM 1029",7868,7876,{"$raw":"00000000"},"110402","CM 1029","OPER",1,"A",22.16285,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",7869,7877,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",59.12367,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7870,7878,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",141.03460,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7871,7879,{"$raw":"00000000"},"110405","MJ.3.5190","INOP",3,"T",173.81949,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRINCIPAL",null,"18 Jun 2002","R",null,"110405",1,null,"R PRINCIPAL",7872,7880,{"$raw":"00000000"},"110405","R PRINCIPAL","INOP",3,"T",351.98444,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7873,7881,{"$raw":"00000000"},"110405","MJ.3.5191","INOP",3,"T",251.70177,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",1,null,"EN 361",7874,7882,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",14.81831,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SOBRAL",null,"23 Out 2000","R",null,"110405",1,null,"R DO SOBRAL",7875,7883,{"$raw":"00000000"},"110405","R DO SOBRAL","OPER",2,"T",36.94249,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CENTRAL",null,null,"LG",null,"110405",1,null,"LG CENTRAL",7876,7884,{"$raw":"00000000"},"110405","LG CENTRAL","INOP",3,"T",9.86108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,null,"TV",null,"110405",1,null,"TV DOS ARNEIROS",7877,7885,{"$raw":"00000000"},"110405","TV DOS ARNEIROS","INOP",3,"T",154.25810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO AMEIRO",null,null,"TV",null,"110405",1,null,"TV DO AMEIRO",7878,7886,{"$raw":"00000000"},"110405","TV DO AMEIRO","INOP",3,"T",8.57696,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",7879,7887,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",229.01257,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1035","DAS JUNQUEIRAS",null,null,"R",null,"110405",1,null,"R DAS JUNQUEIRAS",7880,7888,{"$raw":"00000000"},"110405","R DAS JUNQUEIRAS","OPER",1,"A",75.08074,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS JUNQUEIRAS",null,null,"R",null,"110405",1,null,"R DAS JUNQUEIRAS",7881,7889,{"$raw":"00000000"},"110405","R DAS JUNQUEIRAS","INOP",3,"T",175.08616,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7882,7890,{"$raw":"00000000"},"110407","R DA BOAVISTA","OPER",2,"A",298.31338,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",7883,7891,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",75.60301,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7884,7892,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",29.59863,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",7885,7893,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",135.23555,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DO PICOTO",null,"SIM","R",null,"110407",1,null,"R DO PICOTO",7886,7894,{"$raw":"00000000"},"110407","R DO PICOTO","OPER",2,"A",69.46581,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA AZINHAGA",null,null,"TV",null,"110407",1,null,"TV DA AZINHAGA",7887,7895,{"$raw":"00000000"},"110407","TV DA AZINHAGA","INOP",3,"T",14.78767,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DA COLECTIVIDADE",null,null,"R",null,"110407",1,null,"R DA COLECTIVIDADE",7888,7896,{"$raw":"00000000"},"110407","R DA COLECTIVIDADE","OPER",2,"A",26.17486,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CSL DO INEIXA",null,null,"R",null,"110407",1,null,"R DO CSL DO INEIXA",7889,7897,{"$raw":"00000000"},"110407","R DO CSL DO INEIXA","INOP",3,"T",489.56520,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7890,7898,{"$raw":"00000000"},"110405","MJ.3.5192","INOP",3,"T",325.91336,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7891,7899,{"$raw":"00000000"},"110407","R DA BOAVISTA","OPER",2,"A",12.01810,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7892,7900,{"$raw":"00000000"},"110407","R DA BOAVISTA","INOP",3,"T",95.50954,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",7893,7901,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",43.40368,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",7894,7902,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",45.15410,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",7895,7903,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",41.43172,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7896,7904,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",22.92090,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7897,7905,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",49.03040,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",7898,7906,{"$raw":"00000000"},"110408","R DA LIBERDADE","INOP",3,"T",52.88803,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","LIBERDADE",null,null,"R",null,"110408",1,null,"R LIBERDADE",7899,7907,{"$raw":"00000000"},"110408","R LIBERDADE","OPER",2,"A",53.91443,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","LIBERDADE",null,null,"R",null,"110408",1,null,"R LIBERDADE",7900,7908,{"$raw":"00000000"},"110408","R LIBERDADE","OPER",2,"A",139.73730,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","LIBERDADE",null,null,"R",null,"110408",1,null,"R LIBERDADE",7901,7909,{"$raw":"00000000"},"110408","R LIBERDADE","OPER",2,"A",23.74338,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7902,7910,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",22.48346,5.50000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7903,7911,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",75.30280,5.50000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7904,7912,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",39.16270,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7905,7913,{"$raw":"00000000"},"110408","MJ.3.5193","INOP",3,"T",153.84639,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7906,7914,{"$raw":"00000000"},"110408","MJ.3.5194","INOP",3,"T",118.29973,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7907,7915,{"$raw":"00000000"},"110408","MJ.3.5195","INOP",3,"T",38.89674,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE DA CORÇA",null,null,"R",null,"110405",1,null,"R VALE DA CORÇA",7908,7916,{"$raw":"00000000"},"110405","R VALE DA CORÇA","INOP",3,"T",91.92957,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7909,7917,{"$raw":"00000000"},"110405","MJ.3.5196","INOP",3,"T",147.38327,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE DA CORÇA",null,null,"R",null,"110405",1,null,"R VALE DA CORÇA",7910,7918,{"$raw":"00000000"},"110405","R VALE DA CORÇA","INOP",3,"T",235.21404,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",7911,7919,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",32.75477,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ESTR","Casalinho",null,null,null,null,null,"110405",1,null,null,7912,7920,{"$raw":"00000000"},"110405","MJ.3.5197","INOP",3,"T",118.08354,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRINCIPAL",null,"18 Jun 2002","R",null,"110405",1,null,"R PRINCIPAL",7913,7921,{"$raw":"00000000"},"110405","R PRINCIPAL","INOP",3,"T",119.36438,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS JUNQUEIRAS",null,null,"R",null,"110405",1,null,"R DAS JUNQUEIRAS",7914,7922,{"$raw":"00000000"},"110405","R DAS JUNQUEIRAS","INOP",3,"T",28.81034,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",7915,7923,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",37.19977,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7916,7924,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",50.02568,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA ATAFANA",null,null,"R",null,"110402",1,null,"R DA ATAFANA",7917,7925,{"$raw":"00000000"},"110402","R DA ATAFANA","OPER",1,"A",43.24876,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7918,7926,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",11.85400,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7919,7927,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",166.46264,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",7920,7928,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",41.75212,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",7921,7929,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",81.79320,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7922,7930,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",61.06327,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7923,7931,{"$raw":"00000000"},"110408","MJ.3.5198","INOP",3,"T",102.55466,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","PRINCIPAL",null,null,"R",null,"110405",1,null,"R PRINCIPAL",7924,7932,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",2,"A",7.83855,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","PRINCIPAL",null,null,"R",null,"110405",1,null,"R PRINCIPAL",7925,7933,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",2,"A",11.00530,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","PRINCIPAL",null,null,"R",null,"110405",1,null,"R PRINCIPAL",7926,7934,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",2,"A",28.88634,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7927,7935,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",99.00728,5.50000,"ESI","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["1","CM","1035","PRINCIPAL",null,"26 mar 2001","R",null,"110405",1,null,"R PRINCIPAL",7928,7936,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",1,"A",17.41887,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA QUINTA",null,"26 mar 2001","R",null,"110405",1,null,"R DA QUINTA",7929,7937,{"$raw":"00000000"},"110405","R DA QUINTA","INOP",3,"T",24.00185,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1035","DO MOINHO","Proc. nº 03/06/40","26 mar 2001","R",null,"110405",1,null,"R DO MOINHO",7930,7938,{"$raw":"00000000"},"110405","R DO MOINHO","OPER",1,"A",38.70326,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1035","DO MOINHO",null,"26 mar 2001","R",null,"110405",1,null,"R DO MOINHO",7931,7939,{"$raw":"00000000"},"110405","R DO MOINHO","OPER",1,"A",7.22075,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS JUNQUEIRAS",null,null,"R",null,"110405",1,null,"R DAS JUNQUEIRAS",7932,7940,{"$raw":"00000000"},"110405","R DAS JUNQUEIRAS","INOP",3,"T",183.24181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS JUNQUEIRAS",null,null,"R",null,"110405",1,null,"R DAS JUNQUEIRAS",7933,7941,{"$raw":"00000000"},"110405","R DAS JUNQUEIRAS","INOP",3,"T",103.67042,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS JUNQUEIRAS",null,null,"R",null,"110405",1,null,"R DAS JUNQUEIRAS",7934,7942,{"$raw":"00000000"},"110405","R DAS JUNQUEIRAS","INOP",3,"T",33.03330,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS JUNQUEIRAS",null,null,"R",null,"110405",1,null,"R DAS JUNQUEIRAS",7935,7943,{"$raw":"00000000"},"110405","R DAS JUNQUEIRAS","INOP",3,"T",48.18054,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS JUNQUEIRAS",null,null,"R",null,"110405",1,null,"R DAS JUNQUEIRAS",7936,7944,{"$raw":"00000000"},"110405","R DAS JUNQUEIRAS","INOP",3,"T",49.07235,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PORTELA",null,null,"R",null,"110405",1,null,"R DA PORTELA",7937,7945,{"$raw":"00000000"},"110405","R DA PORTELA","OPER",1,"A",6.81136,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"QTA DA BOAVISTA",null,null,"R",null,"110401",1,null,"R QTA DA BOAVISTA",7938,7946,{"$raw":"00000000"},"110401","R QTA DA BOAVISTA","INOP",3,"T",263.74434,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",7939,7947,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","OPER",1,"A",61.48434,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,null,0,null,"EM 570",7940,7948,{"$raw":"00000000"},null,"EM 570",null,1,"A",108.37789,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR RUI SOARES BRANCO",null,null,"R",null,"110402",1,null,"R DR RUI SOARES BRANCO",7941,7949,{"$raw":"00000000"},"110402","R DR RUI SOARES BRANCO","OPER",2,"A",98.31476,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA AZINHAGA",null,null,"TV",null,"110407",1,null,"TV DA AZINHAGA",7942,7950,{"$raw":"00000000"},"110407","TV DA AZINHAGA","INOP",3,"T",22.86314,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MIGUEL LEITE",null,null,"LG",null,"110407",1,null,"LG MIGUEL LEITE",7943,7951,{"$raw":"00000000"},"110407","LG MIGUEL LEITE","INOP",3,"T",14.08330,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO FAROL",null,null,"TV",null,"110407",1,null,"TV DO FAROL",7944,7952,{"$raw":"00000000"},"110407","TV DO FAROL","INOP",3,"T",64.07215,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE",null,null,"ESTR",null,"110407",1,null,"ESTR DO VALE",7945,7953,{"$raw":"00000000"},"110407","ESTR DO VALE","INOP",3,"A",305.89049,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7946,7954,{"$raw":"00000000"},"110405","MJ.3.5199","INOP",3,"T",19.99665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA MURTA",null,null,"QTA",null,"110402",2,"110407","QTA DA MURTA",7947,7955,{"$raw":"00000000"},"110402","QTA DA MURTA","OPER",2,"A",230.97136,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7948,7956,{"$raw":"00000000"},"110407","R DA BOAVISTA","OPER",2,"A",160.15668,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7949,7957,{"$raw":"00000000"},"110407","R DA BOAVISTA","OPER",2,"A",94.50790,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7950,7958,{"$raw":"00000000"},"110407","R DA BOAVISTA","OPER",2,"A",70.19896,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7951,7959,{"$raw":"00000000"},"110407","R DA BOAVISTA","OPER",2,"A",27.97348,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7952,7960,{"$raw":"00000000"},"110407","R DA BOAVISTA","OPER",2,"A",3.46831,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7953,7961,{"$raw":"00000000"},"110407","R DA BOAVISTA","INOP",3,"T",109.08315,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7954,7962,{"$raw":"00000000"},"110407","R DA BOAVISTA","INOP",3,"T",172.35625,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,7955,7963,{"$raw":"00000000"},"110405","MJ.3.5200","INOP",3,"T",299.88294,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRINCIPAL",null,"18 Jun 2002","R",null,"110405",1,null,"R PRINCIPAL",7956,7964,{"$raw":"00000000"},"110405","R PRINCIPAL","INOP",3,"T",93.10552,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ADEGA COOPERATIVA","Proc nº 03/05/397",null,"LG",null,"110402",1,null,"LG DA ADEGA COOPERATIVA",7957,7965,{"$raw":"00000000"},"110402","LG DA ADEGA COOPERATIVA","INOP",3,"T",21.14905,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7958,7966,{"$raw":"00000000"},"110402","MJ.3.5201","INOP",3,"T",79.47299,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,7959,7967,{"$raw":"00000000"},"110402","MJ.3.5202","INOP",3,"T",9.45880,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7960,7968,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",49.13260,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7961,7969,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",68.87992,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7962,7970,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",7.02319,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7963,7971,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",18.88365,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7964,7972,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",19.66441,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"R",null,"110402",1,null,"R DA ESCOLA",7965,7973,{"$raw":"00000000"},"110402","R DA ESCOLA","INOP",3,"T",37.57202,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7966,7974,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",8.12222,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7967,7975,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",64.47235,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7968,7976,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",87.40981,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7969,7977,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",29.23269,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA ATAFANA",null,null,"R",null,"110402",1,null,"R DA ATAFANA",7970,7978,{"$raw":"00000000"},"110402","R DA ATAFANA","OPER",1,"A",11.30949,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA ATAFANA",null,null,"R",null,"110402",1,null,"R DA ATAFANA",7971,7979,{"$raw":"00000000"},"110402","R DA ATAFANA","OPER",1,"A",5.95477,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA ATAFANA",null,null,"R",null,"110402",1,null,"R DA ATAFANA",7972,7980,{"$raw":"00000000"},"110402","R DA ATAFANA","OPER",1,"A",102.40797,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA ATAFANA",null,null,"R",null,"110402",1,null,"R DA ATAFANA",7973,7981,{"$raw":"00000000"},"110402","R DA ATAFANA","OPER",1,"A",15.91990,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7974,7982,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",20.74166,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7975,7983,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",128.67076,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7976,7984,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",8.58326,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7977,7985,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,12.55822,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7978,7986,{"$raw":"00000000"},"110408","MJ.3.5203","INOP",3,"T",107.25570,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7979,7987,{"$raw":"00000000"},"110408","MJ.3.5204","INOP",3,"T",55.75829,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7980,7988,{"$raw":"00000000"},"110408","MJ.3.5205","INOP",3,"T",15.63682,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7981,7989,{"$raw":"00000000"},"110408","MJ.3.5206","INOP",3,"T",144.79549,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,7982,7990,{"$raw":"00000000"},"110408","MJ.3.5207","INOP",3,"T",184.38990,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7983,7991,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,247.43218,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7984,7992,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,105.72201,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7985,7993,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,111.14296,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,7986,7994,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,99.43681,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO CRUZEIRO",null,null,"R",null,"110405",1,null,"R DO CRUZEIRO",7987,7995,{"$raw":"00000000"},"110405","R DO CRUZEIRO","OPER",2,"A",24.29508,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,"16 Jul 2002","R",null,"110407",1,null,"R DA BOAVISTA",7988,7996,{"$raw":"00000000"},"110407","R DA BOAVISTA","OPER",2,"A",12.25418,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","1029",null,null,"CM",null,"110402",1,null,"CM 1029",7989,7997,{"$raw":"00000000"},"110402","CM 1029","OPER",1,"A",288.98152,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DO CARAPUÇO",null,null,"QTA",null,"110407",1,null,"QTA DA MURTA",7990,7998,{"$raw":"00000000"},"110407","QTA DA MURTA","OPER",2,"A",434.84378,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE",null,null,"ESTR",null,"110407",1,null,"ESTR DO VALE",7991,7999,{"$raw":"00000000"},"110407","ESTR DO VALE","INOP",3,"T",253.66174,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO VALE VILÃO",null,"6/12/2003, 25/01/2005","ESTR",null,"110407",1,null,"ESTR DO VALE VILÃO",7992,8000,{"$raw":"00000000"},"110407","ESTR DO VALE VILÃO","OPER",2,"A",374.85131,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CRUZEIRO",null,null,"R",null,"110407",1,null,"R DO CRUZEIRO",7993,8001,{"$raw":"00000000"},"110407","R DO CRUZEIRO","INOP",3,"T",57.93710,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",7994,8002,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",73.89029,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",7995,8003,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",162.37589,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",7996,8004,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",318.77512,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110407",1,null,"EM 612-1",7997,8005,{"$raw":"00000000"},"110407","EM 612-1","OPER",2,"A",192.80044,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7998,8006,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",4.26011,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",7999,8007,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",176.40901,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",8000,8008,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",9.00811,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",8001,8009,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",18.11269,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",8002,8010,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",327.59031,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",8003,8011,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",79.34795,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",8004,8012,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",90.01527,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8005,8013,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",30.73137,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8006,8014,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",32.50766,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8007,8015,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",49.47263,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8008,8016,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",22.98434,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8009,8017,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",23.65471,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8010,8018,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",4.99497,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",8011,8019,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",8.08259,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8012,8020,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",23.94310,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8013,8021,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",18.13446,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8014,8022,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",10.53799,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8015,8023,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",38.34839,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","DA ESPERANÇA",null,null,"R",null,"110408",1,null,"R DA ESPERANÇA",8016,8024,{"$raw":"00000000"},"110408","R DA ESPERANÇA","OPER",2,"A",31.94153,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","DA ESPERANÇA",null,null,"R",null,"110408",1,null,"R DA ESPERANÇA",8017,8025,{"$raw":"00000000"},"110408","R DA ESPERANÇA","OPER",2,"A",8.66616,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","DA ESPERANÇA",null,null,"R",null,"110408",1,null,"R DA ESPERANÇA",8018,8026,{"$raw":"00000000"},"110408","R DA ESPERANÇA","OPER",2,"A",10.65421,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","DA ESPERANÇA",null,null,"R",null,"110408",1,null,"R DA ESPERANÇA",8019,8027,{"$raw":"00000000"},"110408","R DA ESPERANÇA","OPER",2,"A",25.59465,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",8020,8028,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",7.96544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",8021,8029,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",28.91412,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",8022,8030,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",40.33389,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",8023,8031,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",38.64985,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",8024,8032,{"$raw":"00000000"},"110408","R DA LIBERDADE","OPER",1,"A",24.42162,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",8025,8033,{"$raw":"00000000"},"110408","R DA LIBERDADE","OPER",1,"A",52.90235,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"TERRA NOVA",null,null,"R",null,"110408",1,null,"R TERRA NOVA",8026,8034,{"$raw":"00000000"},"110408","R TERRA NOVA","OPER",1,"A",55.44222,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",8027,8035,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",50.66902,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",8028,8036,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",32.94231,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",8029,8037,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",14.43410,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","1029",null,null,"CM",null,"110405",1,null,"CM 1029",8030,8038,{"$raw":"00000000"},"110405","CM 1029","OPER",1,"A",126.52768,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","1029",null,null,"CM",null,"110402",1,null,"CM 1029",8031,8039,{"$raw":"00000000"},"110402","CM 1029","OPER",1,"A",562.78477,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","1029",null,null,"CM",null,"110402",1,null,"CM 1029",8032,8040,{"$raw":"00000000"},"110402","CM 1029","OPER",1,"A",143.64653,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA QUINTA",null,"26 mar 2001","R",null,"110405",1,null,"R DA QUINTA",8033,8041,{"$raw":"00000000"},"110405","R DA QUINTA","INOP",3,"T",101.15508,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DO CARAPUÇO",null,null,"QTA",null,"110407",1,null,"QTA DO CARAPUÇO",8034,8042,{"$raw":"00000000"},"110407","QTA DO CARAPUÇO","OPER",2,"A",147.22319,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110402",1,null,"R 1º DE DEZEMBRO",8035,8043,{"$raw":"00000000"},"110402","R 1º DE DEZEMBRO","INOP",3,"T",18.04031,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",8036,8044,{"$raw":"00000000"},"110408","R DA LIBERDADE","INOP",3,"T",28.47806,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA REPÚBLICA",null,null,"PC",null,"110402",1,null,"PC DA REPÚBLICA",8037,8045,{"$raw":"00000000"},"110402","PC DA REPÚBLICA","INOP",3,"T",61.64407,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8038,8046,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",355.42952,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1034","LIBERDADE",null,null,"R",null,"110408",1,null,"R LIBERDADE",8039,8047,{"$raw":"00000000"},"110408","R LIBERDADE","OPER",2,"A",305.87612,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AVELINO NETO","Informação da JF- Set 2006",null,"BR",null,"110408",1,null,"BR AVELINO NETO",8040,8048,{"$raw":"00000000"},"110408","BR AVELINO NETO","INOP",3,"T",83.92121,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",8041,8049,{"$raw":"00000000"},"110408","R DA LIBERDADE","OPER",2,"A",9.14348,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",8042,8050,{"$raw":"00000000"},"110408","R DA LIBERDADE","OPER",2,"A",38.98303,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",8043,8051,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",29.59139,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",8044,8052,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",34.44234,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",8045,8053,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",27.42927,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA EUROPA",null,null,"ROT",null,"110402",1,null,"ROT DA EUROPA",8046,8054,{"$raw":"00000000"},"110402","ROT DA EUROPA","INOP",3,"T",26.67989,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",8047,8055,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",92.41734,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,8048,8056,{"$raw":"00000000"},"110405","MJ.3.5208","INOP",3,"T",125.27095,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,8049,8057,{"$raw":"00000000"},"110405","MJ.3.5209","INOP",3,"T",44.28505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CANTIGAS",null,null,"R",null,"110408",1,null,"R DAS CANTIGAS",8050,8058,{"$raw":"00000000"},"110408","R DAS CANTIGAS","INOP",3,"T",46.60847,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CANTIGAS",null,null,"R",null,"110408",1,null,"R DAS CANTIGAS",8051,8059,{"$raw":"00000000"},"110408","R DAS CANTIGAS","INOP",3,"T",33.86724,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CANTIGAS",null,null,"R",null,"110408",1,null,"R DAS CANTIGAS",8052,8060,{"$raw":"00000000"},"110408","R DAS CANTIGAS","INOP",3,"T",80.01263,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CANTIGAS",null,null,"R",null,"110408",1,null,"R DAS CANTIGAS",8053,8061,{"$raw":"00000000"},"110408","R DAS CANTIGAS","INOP",3,"T",103.80023,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CANTIGAS",null,null,"R",null,"110408",1,null,"R DAS CANTIGAS",8054,8062,{"$raw":"00000000"},"110408","R DAS CANTIGAS","INOP",3,"T",83.94671,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8055,8063,{"$raw":"00000000"},"110402","MJ.3.5210","INOP",3,"T",13.06770,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8056,8064,{"$raw":"00000000"},"110402","MJ.3.5211","INOP",3,"T",0.38762,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8057,8065,{"$raw":"00000000"},"110402","MJ.3.5212","INOP",3,"T",0.43437,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,8058,8066,{"$raw":"00000000"},"110405","MJ.3.5213","INOP",3,"T",81.27224,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",8059,8067,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",12.87016,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",8060,8068,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",45.96058,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DA SAUDE",null,null,"R",null,"110407",1,null,"R Nª SENHORA DA SAUDE",8061,8069,{"$raw":"00000000"},"110407","R Nª SENHORA DA SAUDE","INOP",3,"T",16.21631,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"LG",null,"110407",1,null,"LG DA IGREJA",8062,8070,{"$raw":"00000000"},"110407","LG DA IGREJA","INOP",3,"T",11.79226,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CANTO",null,null,"R",null,"110407",1,null,"R DO CANTO",8063,8071,{"$raw":"00000000"},"110407","R DO CANTO","OPER",1,"A",12.76972,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CANTO",null,null,"R",null,"110407",1,null,"R DO CANTO",8064,8072,{"$raw":"00000000"},"110407","R DO CANTO","INOP",3,"T",49.64805,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","DO ROSSIO",null,null,"LG",null,"110407",1,null,"LG DO ROSSIO",8065,8073,{"$raw":"00000000"},"110407","LG DO ROSSIO","OPER",2,"A",20.04264,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","8 DE SETEMBRO",null,null,"R",null,"110407",1,null,"R 8 DE SETEMBRO",8066,8074,{"$raw":"00000000"},"110407","R 8 DE SETEMBRO","OPER",2,"A",286.68857,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","DO ROSSIO",null,null,"LG",null,"110407",1,null,"LG DO ROSSIO",8067,8075,{"$raw":"00000000"},"110407","LG DO ROSSIO","OPER",2,"A",14.24674,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","DA IGREIJA",null,null,"R",null,"110407",1,null,"R DA IGREIJA",8068,8076,{"$raw":"00000000"},"110407","R DA RIBEIRA","OPER",1,"A",21.81873,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CUCOS",null,null,"LG",null,"110407",1,null,"LG DOS CUCOS",8069,8077,{"$raw":"00000000"},"110407","LG DOS CUCOS","INOP",3,"T",27.82958,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO JAPÃO",null,null,"R",null,"110407",1,null,"R DO JAPÃO",8070,8078,{"$raw":"00000000"},"110407","R DO JAPÃO","INOP",3,"T",520.72043,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110407",1,null,"R DA IGREJA",8071,8079,{"$raw":"00000000"},"110407","R DA IGREJA","INOP",3,"A",51.32009,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,"26 mar 2001","CARREIRO",null,"110402",1,null,"CARREIRO DAS FLORES",8072,8080,{"$raw":"00000000"},"110402","CARREIRO DAS FLORES","INOP",3,"T",78.87078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE ALVARES DE ABREU",null,null,"R",null,"110402",1,null,"R DR DUARTE ALVARES DE ABREU",8073,8081,{"$raw":"00000000"},"110402","R DR DUARTE ALVARES DE ABREU","INOP",3,"T",62.64390,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8074,8082,{"$raw":"00000000"},"110408","MJ.3.5214","INOP",3,"T",1.42056,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8075,8083,{"$raw":"00000000"},"110408","MJ.3.5215","INOP",3,"T",18.50745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8076,8084,{"$raw":"00000000"},"110402","MJ.3.5216","INOP",3,"T",10.03795,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8077,8085,{"$raw":"00000000"},"110402","MJ.3.5217","INOP",3,"T",42.30527,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,null,"R",null,"110402",1,null,"R DO CABEÇO",8078,8086,{"$raw":"00000000"},"110402","R DO CABEÇO","INOP",3,"T",26.57645,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"CC",null,"110402",1,null,"CC DAS EIRAS",8079,8087,{"$raw":"00000000"},"110402","CC DAS EIRAS","OPER",1,"A",30.23538,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110402",1,null,"R DAS FLORES",8080,8088,{"$raw":"00000000"},"110402","R DAS FLORES","INOP",3,"T",11.49125,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110402",1,null,"R DAS FLORES",8081,8089,{"$raw":"00000000"},"110402","R DAS FLORES","INOP",3,"T",7.45944,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110402",1,null,"R DA ESPERANÇA",8082,8090,{"$raw":"00000000"},"110402","R DA ESPERANÇA","INOP",3,"T",40.77070,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8083,8091,{"$raw":"00000000"},"110402","MJ.1.170","OPER",1,"A",1.87361,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,8084,8092,{"$raw":"00000000"},"110402","MJ.3.5218","INOP",3,"T",129.28051,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LOUREIRO",null,null,"TV",null,"110410",1,null,"TV DO LOUREIRO",8085,8093,{"$raw":"00000000"},"110410","TV DO LOUREIRO","OPER",2,"A",78.72914,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8086,8094,{"$raw":"00000000"},"110402","MJ.3.5219","INOP",3,"T",4.80393,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8087,8095,{"$raw":"00000000"},"110402","MJ.3.5220","INOP",3,"T",10.59168,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8088,8096,{"$raw":"00000000"},"110402","MJ.3.5221","INOP",3,"T",3.69221,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8089,8097,{"$raw":"00000000"},"110402","MJ.3.5222","INOP",3,"T",6.06178,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110405",1,null,"R DAS AMOREIRAS",8090,8098,{"$raw":"00000000"},"110405","R DAS AMOREIRAS","INOP",3,"T",69.06246,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110405",1,null,"R DAS AMOREIRAS",8091,8099,{"$raw":"00000000"},"110405","R DAS AMOREIRAS","INOP",3,"T",145.56144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF JOSÉ MARIA PAIS MACHADO",null,null,"R",null,"110402",1,null,"R PROF JOSÉ MARIA PAIS MACHADO",8092,8100,{"$raw":"00000000"},"110402","R PROF JOSÉ MARIA PAIS MACHADO","INOP",3,"T",106.17583,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA HORA",null,null,"R",null,"110402",1,null,"R DA BOA HORA",8093,8101,{"$raw":"00000000"},"110402","R DA BOA HORA","INOP",3,"T",66.54606,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO NORTE",null,null,"R",null,"110402",1,null,"R DO NORTE",8094,8102,{"$raw":"00000000"},"110402","R DO NORTE","INOP",3,"T",8.02733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8095,8103,{"$raw":"00000000"},"110402","MJ.3.5223","INOP",3,"T",19.72345,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8096,8104,{"$raw":"00000000"},"110402","MJ.2.356","OPER",2,"A",23.56395,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,null,"R",null,"110402",1,null,"R DO CABEÇO",8097,8105,{"$raw":"00000000"},"110402","R DO CABEÇO","INOP",3,"T",44.03626,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,null,"R",null,"110402",1,null,"R DO CABEÇO",8098,8106,{"$raw":"00000000"},"110402","R DO CABEÇO","INOP",3,"T",2.37118,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"5 DE AGOSTO",null,null,"R",null,"110405",1,null,"R 5 DE AGOSTO",8099,8107,{"$raw":"00000000"},"110405","R 5 DE AGOSTO","INOP",3,"T",34.35183,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"5 DE AGOSTO",null,null,"R",null,"110405",1,null,"R 5 DE AGOSTO",8100,8108,{"$raw":"00000000"},"110405","R 5 DE AGOSTO","INOP",3,"T",70.83390,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PASTOR",null,null,"R",null,"110405",1,null,"R DO PASTOR",8101,8109,{"$raw":"00000000"},"110405","R DO PASTOR","INOP",3,"T",119.60535,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8102,8110,{"$raw":"00000000"},"110402","MJ.3.5224","INOP",3,"T",9.89754,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS MERCES",null,null,"TV",null,"110405",1,null,"TV DAS MERCES",8103,8111,{"$raw":"00000000"},"110405","TV DAS MERCES","INOP",3,"T",51.21088,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"CC",null,"110402",1,null,"CC DAS EIRAS",8104,8112,{"$raw":"00000000"},"110402","CC DAS EIRAS","INOP",3,"T",47.88336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,"15 Mar 1999","PCT",null,"110402",1,null,"PCT DAS EIRAS",8105,8113,{"$raw":"00000000"},"110402","PCT DAS EIRAS","INOP",3,"T",62.37511,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR JOÃO PASCOAL COELHO DUARTE","Processo nº 03/2010/119","15 Mar 1999","R",null,"110402",1,null,"R DR JOÃO PASCOAL COELHO DUARTE COELHO",8106,8114,{"$raw":"00000000"},"110402","R DR JOÃO PASCOAL COELHO DUARTE COELHO","INOP",3,"T",54.55043,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LARANJEIRAS",null,null,"R",null,"110402",1,null,"R DAS LARANJEIRAS",8107,8115,{"$raw":"00000000"},"110402","R DAS LARANJEIRAS","INOP",3,"T",82.70659,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PAZ",null,null,"R",null,"110402",1,null,"R DA PAZ",8108,8116,{"$raw":"00000000"},"110402","R DA PAZ","INOP",3,"T",81.30784,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8109,8117,{"$raw":"00000000"},"110402","MJ.1.171","OPER",1,"A",2.72531,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8110,8118,{"$raw":"00000000"},"110402","MJ.3.5225","INOP",3,"T",17.35733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8111,8119,{"$raw":"00000000"},"110402","MJ.3.5226","INOP",3,"T",32.93649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8112,8120,{"$raw":"00000000"},"110402","MJ.3.5227","INOP",3,"T",1.70038,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8113,8121,{"$raw":"00000000"},"110402","MJ.1.172","OPER",1,"A",2.77200,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8114,8122,{"$raw":"00000000"},"110402","MJ.3.5228","INOP",3,"T",33.58349,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8115,8123,{"$raw":"00000000"},"110402","MJ.3.5229","INOP",3,"T",11.71837,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE ALVARES DE ABREU",null,null,"R",null,"110402",1,null,"R DR DUARTE ALVARES DE ABREU",8116,8124,{"$raw":"00000000"},"110402","R DR DUARTE ALVARES DE ABREU","INOP",3,"T",6.65354,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE ALVARES DE ABREU",null,null,"R",null,"110402",1,null,"R DR DUARTE ALVARES DE ABREU",8117,8125,{"$raw":"00000000"},"110402","R DR DUARTE ALVARES DE ABREU","INOP",3,"T",18.75836,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO SANTA BÁRBARA",null,null,"R",null,"110402",1,null,"R JOÃO SANTA BÁRBARA",8118,8126,{"$raw":"00000000"},"110402","R JOÃO SANTA BÁRBARA","INOP",3,"T",24.63108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO SANTA BÁRBARA",null,null,"R",null,"110402",1,null,"R JOÃO SANTA BÁRBARA",8119,8127,{"$raw":"00000000"},"110402","R JOÃO SANTA BÁRBARA","INOP",3,"T",18.98903,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALTO",null,"23 Out 2000","R",null,"110405",1,null,"R DO ALTO",8120,8128,{"$raw":"00000000"},"110405","R DO ALTO","INOP",3,"T",454.06615,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,"15 Mar 1999","R",null,"110402",1,null,"R DO CHAFARIZ",8121,8129,{"$raw":"00000000"},"110402","R DO CHAFARIZ","INOP",3,"T",31.19907,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"5 DE AGOSTO",null,null,"R",null,"110405",1,null,"R 5 DE AGOSTO",8122,8130,{"$raw":"00000000"},"110405","R 5 DE AGOSTO","OPER",2,"A",70.93135,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","D FERNANDO",null,null,"R",null,"110402",1,null,"R D FERNANDO",8123,8131,{"$raw":"00000000"},"110402","R D FERNANDO","OPER",1,"A",42.53364,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8124,8132,{"$raw":"00000000"},"110402","MJ.3.5230","INOP",3,"T",41.09583,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8125,8133,{"$raw":"00000000"},"110402","MJ.3.5231","INOP",3,"T",45.35329,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"EUGÉNIO PEREIRA DA SILVA",null,null,"R",null,"110402",1,null,"R EUGÉNIO PEREIRA DA SILVA",8126,8134,{"$raw":"00000000"},"110402","R EUGÉNIO PEREIRA DA SILVA","INOP",3,"T",78.56272,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"R",null,"110402",1,null,"R DO ROSSIO",8127,8135,{"$raw":"00000000"},"110402","R DO ROSSIO","OPER",2,"A",35.11800,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"R",null,"110402",1,null,"R DO ROSSIO",8128,8136,{"$raw":"00000000"},"110402","R DO ROSSIO","OPER",2,"A",26.33249,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCO HENRIQUES CORREIA",null,null,"R",null,"110402",1,null,"R FRANCISCO HENRIQUES CORREIA",8129,8137,{"$raw":"00000000"},"110402","R FRANCISCO HENRIQUES CORREIA","INOP",3,"T",46.97736,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"EUGÉNIO PEREIRA DA SILVA",null,null,"R",null,"110402",1,null,"R EUGÉNIO PEREIRA DA SILVA",8130,8138,{"$raw":"00000000"},"110402","R EUGÉNIO PEREIRA DA SILVA","INOP",3,"T",36.90456,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,"15 Mar 1999","R",null,"110402",1,null,"R DO CHAFARIZ",8131,8139,{"$raw":"00000000"},"110402","R DO CHAFARIZ","INOP",3,"T",34.30398,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,null,"LG",null,"110402",1,null,"LG DO CHAFARIZ",8132,8140,{"$raw":"00000000"},"110402","LG DO CHAFARIZ","INOP",3,"T",33.32905,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"EUGÉNIO PEREIRA DA SILVA",null,null,"R",null,"110402",1,null,"R EUGÉNIO PEREIRA DA SILVA",8133,8141,{"$raw":"00000000"},"110402","R EUGÉNIO PEREIRA DA SILVA","INOP",3,"T",15.22141,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"R",null,"110402",1,null,"R DO ROSSIO",8134,8142,{"$raw":"00000000"},"110402","R DO ROSSIO","OPER",2,"A",32.23343,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"R",null,"110402",1,null,"R DO ROSSIO",8135,8143,{"$raw":"00000000"},"110402","R DO ROSSIO","INOP",3,"T",14.98413,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"R",null,"110402",1,null,"R DO ROSSIO",8136,8144,{"$raw":"00000000"},"110402","R DO ROSSIO","INOP",3,"T",15.66254,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8137,8145,{"$raw":"00000000"},"110402","MJ.3.5232","INOP",3,"T",64.69712,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8138,8146,{"$raw":"00000000"},"110402","MJ.3.5233","INOP",3,"T",15.39334,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"BOA VENTURA DUARTE",null,null,"R",null,"110402",1,null,"R BOA VENTURA DUARTE",8139,8147,{"$raw":"00000000"},"110402","R BOA VENTURA DUARTE","INOP",3,"T",117.30254,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR LEITE DE VASCONCELOS",null,null,"PCT",null,"110402",1,null,"PCT DR LEITE DE VASCONCELOS",8140,8148,{"$raw":"00000000"},"110402","PCT DR LEITE DE VASCONCELOS","INOP",3,"T",33.91317,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA HORA",null,null,"R",null,"110402",1,null,"R DA BOA HORA",8141,8149,{"$raw":"00000000"},"110402","R DA BOA HORA","INOP",3,"T",20.43884,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","D FERNANDO",null,null,"R",null,"110402",1,null,"R D FERNANDO",8142,8150,{"$raw":"00000000"},"110402","R D FERNANDO","OPER",1,"A",24.23338,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,"15 Mar 1999","TV",null,"110402",1,null,"TV DO OLIVAL DA FONTE",8143,8151,{"$raw":"00000000"},"110402","TV DO OLIVAL DA FONTE","OPER",2,"A",53.25854,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"R",null,"110402",1,null,"R DO ROSSIO",8144,8152,{"$raw":"00000000"},"110402","R DO ROSSIO","OPER",2,"A",53.37449,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110405",1,null,"R DAS AMOREIRAS",8145,8153,{"$raw":"00000000"},"110405","R DAS AMOREIRAS","OPER",2,"A",56.61577,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NOSSA SENHORA DA CONCEIÇÃO",null,null,"R",null,"110402",1,null,"R NOSSA SENHORA DA CONCEIÇÃO",8146,8154,{"$raw":"00000000"},"110402","R NOSSA SENHORA DA CONCEIÇÃO","INOP",3,"T",45.95401,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PAZ",null,null,"R",null,"110402",1,null,"R DA PAZ",8147,8155,{"$raw":"00000000"},"110402","R DA PAZ","INOP",3,"T",7.50921,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR JOSÉ JOYCE DAMAS MORA",null,null,"R",null,"110402",1,null,"R DR JOSÉ JOYCE DAMAS MORA",8148,8156,{"$raw":"00000000"},"110402","R DR JOSÉ JOYCE DAMAS MORA","INOP",3,"T",39.53714,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CARREIRO DO MOINHO",null,null,"R",null,"110402",1,null,"R CARREIRO DO MOINHO",8149,8157,{"$raw":"00000000"},"110402","R CARREIRO DO MOINHO","INOP",3,"T",72.79345,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8150,8158,{"$raw":"00000000"},"110402","MJ.3.5234","INOP",3,"T",3.17101,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8151,8159,{"$raw":"00000000"},"110402","MJ.3.5235","INOP",3,"T",6.96233,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CASA DO POVO","PEDONAL","11/10/2005","CC",null,"110402",1,null,"CC DA CASA DO POVO",8152,8160,{"$raw":"00000000"},"110402","CC DA CASA DO POVO","INOP",3,"T",79.73290,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8153,8161,{"$raw":"00000000"},"110402","MJ.3.5236","INOP",3,"T",3.68306,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8154,8162,{"$raw":"00000000"},"110402","MJ.3.5237","INOP",3,"T",30.95525,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CASA DO POVO","PEDONAL","11/10/2005","CC",null,"110402",1,null,"CC DA CASA DO POVO",8155,8163,{"$raw":"00000000"},"110402","CC DA CASA DO POVO","INOP",3,"T",3.73101,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CASA DO POVO","PEDONAL","11/10/2005","CC",null,"110402",1,null,"CC DA CASA DO POVO",8156,8164,{"$raw":"00000000"},"110402","CC DA CASA DO POVO","INOP",3,"T",66.28856,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR JOSÉ JOYCE DAMAS MORA",null,null,"R",null,"110402",1,null,"R DR JOSÉ JOYCE DAMAS MORA",8157,8165,{"$raw":"00000000"},"110402","R DR JOSÉ JOYCE DAMAS MORA","INOP",3,"T",34.89816,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8158,8166,{"$raw":"00000000"},"110402","MJ.3.5238","INOP",3,"T",0.72090,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8159,8167,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1","CM","1044","DA MISERICÓRDIA",null,null,"LG",null,"110405",1,null,"LG DA MISERICÓRDIA",8160,8168,{"$raw":"00000000"},"110405","LG DA MISERICÓRDIA","OPER",2,"A",25.60608,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DA MISERICÓRDIA",null,null,"LG",null,"110405",1,null,"LG DA MISERICÓRDIA",8161,8169,{"$raw":"00000000"},"110405","LG DA MISERICÓRDIA","OPER",2,"A",13.28225,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8162,8170,{"$raw":"00000000"},"110402","MJ.3.5239","INOP",3,"T",3.71469,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8163,8171,{"$raw":"00000000"},"110402","MJ.3.5240","INOP",3,"T",46.76007,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8164,8172,{"$raw":"00000000"},"110402","MJ.3.5241","INOP",3,"T",33.08085,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8165,8173,{"$raw":"00000000"},"110402","MJ.3.5242","INOP",3,"T",9.33794,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8166,8174,{"$raw":"00000000"},"110402","MJ.3.5243","INOP",3,"T",5.30905,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8167,8175,{"$raw":"00000000"},"110402","MJ.3.5244","INOP",3,"T",23.00050,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8168,8176,{"$raw":"00000000"},"110402","MJ.3.5245","INOP",3,"T",23.59703,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8169,8177,{"$raw":"00000000"},"110402","MJ.3.5246","INOP",3,"T",1.08908,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8170,8178,{"$raw":"00000000"},"110402","MJ.3.5247","INOP",3,"T",2.22050,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8171,8179,{"$raw":"00000000"},"110402","MJ.3.5248","INOP",3,"T",38.55753,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,null,"R",null,"110402",1,null,"R DO CABEÇO",8172,8180,{"$raw":"00000000"},"110402","R DO CABEÇO","INOP",3,"T",80.08365,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,null,"R",null,"110402",1,null,"R DO CABEÇO",8173,8181,{"$raw":"00000000"},"110402","R DO CABEÇO","INOP",3,"T",32.27670,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,null,"R",null,"110402",1,null,"R DO CABEÇO",8174,8182,{"$raw":"00000000"},"110402","R DO CABEÇO","INOP",3,"T",3.61707,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,null,"R",null,"110402",1,null,"R DO CABEÇO",8175,8183,{"$raw":"00000000"},"110402","R DO CABEÇO","INOP",3,"T",5.71832,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,null,"R",null,"110402",1,null,"R DO CABEÇO",8176,8184,{"$raw":"00000000"},"110402","R DO CABEÇO","INOP",3,"T",37.61651,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CABEÇO",null,null,"R",null,"110402",1,null,"R DO CABEÇO",8177,8185,{"$raw":"00000000"},"110402","R DO CABEÇO","INOP",3,"T",40.13010,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA HORA",null,null,"R",null,"110402",1,null,"R DA BOA HORA",8178,8186,{"$raw":"00000000"},"110402","R DA BOA HORA","INOP",3,"T",11.95428,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110402",1,null,"R DA IGREJA",8179,8187,{"$raw":"00000000"},"110402","R DA IGREJA","OPER",1,"A",26.35048,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110402",1,null,"R DA IGREJA",8180,8188,{"$raw":"00000000"},"110402","R DA IGREJA","OPER",1,"A",26.98283,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LUSIADAS",null,null,"R",null,"110409",1,null,"R DOS LUSIADAS",8181,8189,{"$raw":"00000000"},"110409","R DOS LUSIADAS","INOP",3,"T",41.52091,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LUSIADAS",null,null,"R",null,"110409",1,null,"R DOS LUSIADAS",8182,8190,{"$raw":"00000000"},"110409","R DOS LUSIADAS","INOP",3,"T",12.16082,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D NUNO ÁLVARES PEREIRA",null,null,"R",null,"110409",1,null,"R D NUNO ÁLVARES PEREIRA",8183,8191,{"$raw":"00000000"},"110409","R D NUNO ÁLVARES PEREIRA","INOP",3,"T",7.78486,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D NUNO ÁLVARES PEREIRA",null,null,"R",null,"110409",1,null,"R D NUNO ÁLVARES PEREIRA",8184,8192,{"$raw":"00000000"},"110409","R D NUNO ÁLVARES PEREIRA","INOP",3,"T",32.97895,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR MÁRIO MADEIRA",null,null,"R",null,"110409",1,null,"R DR MÁRIO MADEIRA",8185,8193,{"$raw":"00000000"},"110409","R DR MÁRIO MADEIRA","INOP",3,"T",43.11332,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",8186,8194,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",4.48720,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",8187,8195,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",3.04498,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF FRANCISCO ALEXANDRE DA SILVA",null,null,"LG",null,"110409",1,null,"LG PROF FRANCISCO ALEXANDRE DA SILVA",8188,8196,{"$raw":"00000000"},"110409","LG PROF FRANCISCO ALEXANDRE DA SILVA","INOP",3,"T",48.47393,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUÍS DE CAMÕES",null,null,"R",null,"110409",1,null,"R LUÍS DE CAMÕES",8189,8197,{"$raw":"00000000"},"110409","R LUÍS DE CAMÕES","INOP",3,"T",153.26184,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8190,8198,{"$raw":"00000000"},"110409","MJ.3.5249","INOP",3,"T",24.90559,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DA MISERICÓRDIA",null,null,"LG",null,"110405",1,null,"LG DA MISERICÓRDIA",8191,8199,{"$raw":"00000000"},"110405","LG DA MISERICÓRDIA","OPER",2,"A",10.69798,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DA MISERICÓRDIA",null,null,"LG",null,"110405",1,null,"LG DA MISERICÓRDIA",8192,8200,{"$raw":"00000000"},"110405","LG DA MISERICÓRDIA","OPER",2,"A",9.47820,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8193,8201,{"$raw":"00000000"},"110402","MJ.1.173","OPER",1,"A",2.29837,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8194,8202,{"$raw":"00000000"},"110402","MJ.3.5250","INOP",3,"T",69.49620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8195,8203,{"$raw":"00000000"},"110402","MJ.3.5251","INOP",3,"T",3.45064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8196,8204,{"$raw":"00000000"},"110402","MJ.3.5252","INOP",3,"T",36.52685,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8197,8205,{"$raw":"00000000"},"110402","MJ.3.5253","INOP",3,"T",2.81357,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110402",1,null,null,8198,8206,{"$raw":"00000000"},"110402","MJ.3.5254","INOP",3,"T",61.07097,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8199,8207,{"$raw":"00000000"},"110402","MJ.3.5255","INOP",3,"T",2.55697,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PAZ",null,null,"R",null,"110402",1,null,"R DA PAZ",8200,8208,{"$raw":"00000000"},"110402","R DA PAZ","INOP",3,"T",40.16030,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110402",1,null,"R DAS FLORES",8201,8209,{"$raw":"00000000"},"110402","R DAS FLORES","INOP",3,"T",1.74748,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110402",1,null,"R DAS FLORES",8202,8210,{"$raw":"00000000"},"110402","R DAS FLORES","INOP",3,"T",19.20026,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110402",1,null,"R DAS FLORES",8203,8211,{"$raw":"00000000"},"110402","R DAS FLORES","INOP",3,"T",33.50641,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"TV",null,"110402",1,null,"TV DAS FLORES",8204,8212,{"$raw":"00000000"},"110402","TV DAS FLORES","INOP",3,"T",37.69881,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110402",1,null,"R DAS FLORES",8205,8213,{"$raw":"00000000"},"110402","R DAS FLORES","INOP",3,"T",70.10151,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110402",1,null,"R DA ESPERANÇA",8206,8214,{"$raw":"00000000"},"110402","R DA ESPERANÇA","INOP",3,"T",35.83692,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110402",1,null,"R DAS FLORES",8207,8215,{"$raw":"00000000"},"110402","R DAS FLORES","INOP",3,"T",107.14666,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PARQUE",null,null,"R",null,"110408",1,null,"R DO PARQUE",8208,8216,{"$raw":"00000000"},"110408","R DO PARQUE","OPER",1,"A",24.80993,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110402",1,null,"R DA ESPERANÇA",8209,8217,{"$raw":"00000000"},"110402","R DA ESPERANÇA","INOP",3,"T",4.50006,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO SANTA BÁRBARA",null,null,"R",null,"110402",1,null,"R JOÃO SANTA BÁRBARA",8210,8218,{"$raw":"00000000"},"110402","R JOÃO SANTA BÁRBARA","INOP",3,"T",65.70729,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR LEONEL RIBEIRO",null,null,"R",null,"110402",1,null,"R DR LEONEL RIBEIRO",8211,8219,{"$raw":"00000000"},"110402","R DR LEONEL RIBEIRO","INOP",3,"T",48.20707,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GAGO COUTINHO",null,null,"R",null,"110409",1,null,"R GAGO COUTINHO",8212,8220,{"$raw":"00000000"},"110409","R GAGO COUTINHO","INOP",3,"T",101.75994,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8213,8221,{"$raw":"00000000"},"110408","MJ.3.5256","INOP",3,"T",92.00889,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8214,8222,{"$raw":"00000000"},"110402","MJ.3.5257","INOP",3,"T",37.13091,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8216,8224,{"$raw":"00000000"},"110402","MJ.3.5258","INOP",3,"T",6.31253,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8217,8225,{"$raw":"00000000"},"110402","MJ.3.5259","INOP",3,"T",23.33711,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8218,8226,{"$raw":"00000000"},"110402","MJ.3.5260","INOP",3,"T",29.22337,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8219,8227,{"$raw":"00000000"},"110402","MJ.3.5261","INOP",3,"T",14.68230,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110402",1,null,"R DA ESPERANÇA",8220,8228,{"$raw":"00000000"},"110402","R DA ESPERANÇA","INOP",3,"T",14.12000,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PAZ",null,null,"R",null,"110402",1,null,"R DA PAZ",8221,8229,{"$raw":"00000000"},"110402","R DA PAZ","INOP",3,"T",17.52054,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PAZ",null,null,"R",null,"110402",1,null,"R DA PAZ",8222,8230,{"$raw":"00000000"},"110402","R DA PAZ","INOP",3,"T",51.47750,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",8223,8231,{"$raw":"00000000"},"110402","R DA LIBERDADE","INOP",3,"T",10.12437,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",8224,8232,{"$raw":"00000000"},"110402","R DA LIBERDADE","INOP",3,"T",30.68796,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POVO",null,null,"TV",null,"110402",1,null,"TV DO POVO",8225,8233,{"$raw":"00000000"},"110402","TV DO POVO","INOP",3,"T",43.37537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110402",1,null,"R DA ESPERANÇA",8226,8234,{"$raw":"00000000"},"110402","R DA ESPERANÇA","INOP",3,"T",15.45477,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110402",1,null,"R DA ESPERANÇA",8227,8235,{"$raw":"00000000"},"110402","R DA ESPERANÇA","INOP",3,"T",27.10104,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",8228,8236,{"$raw":"00000000"},"110402","R DA LIBERDADE","INOP",3,"T",16.98922,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"TV",null,"110402",1,null,"TV DA ESPERANÇA",8229,8237,{"$raw":"00000000"},"110402","TV DA ESPERANÇA","INOP",3,"T",24.38309,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"TV",null,"110402",1,null,"TV DA ESPERANÇA",8230,8238,{"$raw":"00000000"},"110402","TV DA ESPERANÇA","INOP",3,"T",4.47219,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8231,8239,{"$raw":"00000000"},"110402","MJ.3.5262","INOP",3,"T",35.29154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110402",1,null,"R DA IGREJA",8232,8240,{"$raw":"00000000"},"110402","R DA IGREJA","INOP",3,"T",11.52660,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8233,8241,{"$raw":"00000000"},"110402","MJ.3.5263","INOP",3,"T",13.26156,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8234,8242,{"$raw":"00000000"},"110402","MJ.3.5264","INOP",3,"T",5.61032,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8235,8243,{"$raw":"00000000"},"110402","MJ.3.5265","INOP",3,"T",12.32834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8236,8244,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8237,8245,{"$raw":"00000000"},"110402","MJ.3.5266","INOP",3,"T",39.24021,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8238,8246,{"$raw":"00000000"},"110402","MJ.3.5267","INOP",3,"T",43.32023,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"5 DE AGOSTO",null,null,"R",null,"110405",1,null,"R 5 DE AGOSTO",8239,8247,{"$raw":"00000000"},"110405","R 5 DE AGOSTO","OPER",2,"A",45.00519,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA MURTEIRA",null,null,"ESTR",null,"110405",1,null,"ESTR DA MURTEIRA",8240,8248,{"$raw":"00000000"},"110405","ESTR DA MURTEIRA","OPER",2,"A",215.98341,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MONSENHOR PEREIRA DOS REIS",null,null,"LG",null,"110409",1,null,"LG MONSENHOR PEREIRA DOS REIS",8241,8249,{"$raw":"00000000"},"110409","LG MONSENHOR PEREIRA DOS REIS","INOP",3,"T",5.59558,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ENG DUARTE PACHECO",null,null,"R",null,"110409",1,null,"R ENG DUARTE PACHECO",8242,8250,{"$raw":"00000000"},"110409","R ENG DUARTE PACHECO","OPER",1,"A",70.60199,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ENG DUARTE PACHECO",null,null,"R",null,"110409",1,null,"R ENG DUARTE PACHECO",8243,8251,{"$raw":"00000000"},"110409","R ENG DUARTE PACHECO","INOP",3,"T",44.31087,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GUERRA JUNQUEIRO","Na MNT existia \"R Guerreiro Junqueiro\", Nov 2009.",null,"R",null,"110409",1,null,"R GUERRA JUNQUEIRO",8244,8252,{"$raw":"00000000"},"110409","R GUERRA JUNQUEIRO","INOP",3,"T",80.04916,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8245,8253,{"$raw":"00000000"},"110408","MJ.3.5268","INOP",3,"T",28.42004,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8246,8254,{"$raw":"00000000"},"110408","MJ.3.5269","INOP",3,"T",42.71110,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8247,8255,{"$raw":"00000000"},"110408","MJ.3.5270","INOP",3,"T",16.54544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8248,8256,{"$raw":"00000000"},"110408","MJ.3.5271","INOP",3,"T",8.76541,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8249,8257,{"$raw":"00000000"},"110408","MJ.3.5272","INOP",3,"T",35.17198,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8250,8258,{"$raw":"00000000"},"110408","MJ.3.5273","INOP",3,"T",15.41992,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8251,8259,{"$raw":"00000000"},"110408","MJ.3.5274","INOP",3,"T",31.58748,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8252,8260,{"$raw":"00000000"},"110408","MJ.1.174","OPER",1,"A",3.61637,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8253,8261,{"$raw":"00000000"},"110408","MJ.3.5275","INOP",3,"T",27.10431,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8254,8262,{"$raw":"00000000"},"110408","MJ.3.5276","INOP",3,"T",11.65048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8255,8263,{"$raw":"00000000"},"110408","MJ.3.5277","INOP",3,"T",18.00900,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8256,8264,{"$raw":"00000000"},"110408","MJ.3.5278","INOP",3,"T",3.39012,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8257,8265,{"$raw":"00000000"},"110408","MJ.3.5279","INOP",3,"T",11.96835,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8258,8266,{"$raw":"00000000"},"110408","MJ.3.5280","INOP",3,"T",5.89021,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8259,8267,{"$raw":"00000000"},"110408","MJ.3.5281","INOP",3,"T",2.73016,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8260,8268,{"$raw":"00000000"},"110408","MJ.3.5282","INOP",3,"T",16.22336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8261,8269,{"$raw":"00000000"},"110408","MJ.2.357","OPER",2,"A",2.17037,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8262,8270,{"$raw":"00000000"},"110408","MJ.3.5283","INOP",3,"T",11.23722,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8263,8271,{"$raw":"00000000"},"110408","MJ.3.5284","INOP",3,"T",26.62046,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8264,8272,{"$raw":"00000000"},"110408","MJ.3.5285","INOP",3,"T",1.74451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8265,8273,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1",null,null,"DO ALECRIM",null,null,"R",null,"110408",1,null,"R DO ALECRIM",8266,8274,{"$raw":"00000000"},"110408","R DO ALECRIM","INOP",3,"T",143.37498,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110408",1,null,"R DA IGREJA",8267,8275,{"$raw":"00000000"},"110408","R DA IGREJA","INOP",3,"T",23.85560,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110408",1,null,"R DA IGREJA",8268,8276,{"$raw":"00000000"},"110408","R DA IGREJA","INOP",3,"T",22.02762,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"TV",null,"110408",1,null,"TV DAS FLORES",8269,8277,{"$raw":"00000000"},"110408","TV DAS FLORES","OPER",2,"A",35.99514,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALECRIM",null,null,"R",null,"110408",1,null,"R DO ALECRIM",8270,8278,{"$raw":"00000000"},"110408","R DO ALECRIM","OPER",2,"A",41.03694,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALECRIM",null,null,"TV",null,"110408",1,null,"TV DO ALECRIM",8271,8279,{"$raw":"00000000"},"110408","TV DO ALECRIM","INOP",3,"T",46.72019,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8272,8280,{"$raw":"00000000"},"110408","MJ.1.175","OPER",1,"A",3.33002,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8273,8281,{"$raw":"00000000"},"110408","MJ.3.5286","INOP",3,"T",9.12177,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8274,8282,{"$raw":"00000000"},"110408","MJ.3.5287","INOP",3,"T",19.74901,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D GREGORIA",null,null,"BC",null,"110408",1,null,"BC D GREGORIA",8275,8283,{"$raw":"00000000"},"110408","BC D GREGORIA","INOP",3,"T",18.25989,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110408",1,null,"R DA IGREJA",8276,8284,{"$raw":"00000000"},"110408","R DA IGREJA","INOP",3,"T",3.29528,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"POÇO NOVO","?",null,"LG",null,"110408",1,null,"LG POÇO NOVO",8277,8285,{"$raw":"00000000"},"110408","LG POÇO NOVO","INOP",3,"T",12.77173,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON DE MATOS",8278,8286,{"$raw":"00000000"},"110408","R NORTON DE MATOS","OPER",1,"A",29.37499,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110408",1,null,"R DA IGREJA",8279,8287,{"$raw":"00000000"},"110408","R DA IGREJA","INOP",3,"T",33.52436,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PARQUE",null,null,"R",null,"110408",1,null,"R DO PARQUE",8280,8288,{"$raw":"00000000"},"110408","R DO PARQUE","INOP",3,"T",27.06382,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PARQUE",null,null,"R",null,"110408",1,null,"R DO PARQUE",8281,8289,{"$raw":"00000000"},"110408","R DO PARQUE","INOP",3,"T",5.94445,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8282,8290,{"$raw":"00000000"},"110408","MJ.3.5288","INOP",3,"T",6.78325,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GENERAL SEM MEDO",null,null,"BR",null,"110408",1,null,"BR GENERAL SEM MEDO",8283,8291,{"$raw":"00000000"},"110408","BR GENERAL SEM MEDO","INOP",3,"T",51.00220,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8284,8292,{"$raw":"00000000"},"110408","MJ.3.5289","INOP",3,"T",18.64056,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8285,8293,{"$raw":"00000000"},"110408","MJ.3.5290","INOP",3,"T",24.88303,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",8286,8294,{"$raw":"00000000"},"110408","R DA LIBERDADE","OPER",2,"A",17.50996,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8287,8295,{"$raw":"00000000"},"110408","MJ.1.176","OPER",1,"A",3.40566,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8288,8296,{"$raw":"00000000"},"110408","MJ.3.5291","INOP",3,"T",33.43145,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PADARIA","R DO CAMPO DA BOLA?",null,"R",null,"110408",1,null,"R DA PADARIA",8289,8297,{"$raw":"00000000"},"110408","R DA PADARIA","OPER",2,"A",18.94771,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PADARIA",null,null,"R",null,"110408",1,null,"R DA PADARIA",8290,8298,{"$raw":"00000000"},"110408","R DA PADARIA","INOP",3,"T",18.34290,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PARQUE INFANTIL",null,null,"R",null,"110408",1,null,"R DO PARQUE INFANTIL",8291,8299,{"$raw":"00000000"},"110408","R DO PARQUE INFANTIL","INOP",3,"T",43.78933,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON DE MATOS",8292,8300,{"$raw":"00000000"},"110408","R NORTON DE MATOS","INOP",3,"T",39.11448,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ALEGRIA","Levantamento de Nov 2006",null,"R",null,"110408",1,null,"R DA ALEGRIA",8293,8301,{"$raw":"00000000"},"110408","R DA ALEGRIA","INOP",3,"T",24.28352,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON DE MATOS",8294,8302,{"$raw":"00000000"},"110408","R NORTON DE MATOS","INOP",3,"T",18.05942,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ANDORINHAS",null,null,"TV",null,"110408",1,null,"TV DAS ANDORINHAS",8295,8303,{"$raw":"00000000"},"110408","TV DAS ANDORINHAS","INOP",3,"T",19.93382,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"GENERAL SEM MEDO",null,null,"BR",null,"110408",1,null,"BR GENERAL SEM MEDO",8296,8304,{"$raw":"00000000"},"110408","BR GENERAL SEM MEDO","INOP",3,"T",29.85300,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8297,8305,{"$raw":"00000000"},"110408","MJ.3.5292","INOP",3,"T",4.04031,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8298,8306,{"$raw":"00000000"},"110408","MJ.3.5293","INOP",3,"T",18.71771,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8299,8307,{"$raw":"00000000"},"110408","MJ.3.5294","INOP",3,"T",25.33885,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8300,8308,{"$raw":"00000000"},"110408","MJ.3.5295","INOP",3,"T",18.84512,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8301,8309,{"$raw":"00000000"},"110408","MJ.3.5296","INOP",3,"T",27.13289,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8302,8310,{"$raw":"00000000"},"110408","MJ.3.5297","INOP",3,"T",9.13267,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8303,8311,{"$raw":"00000000"},"110408","MJ.1.177","OPER",1,"A",2.79113,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8304,8312,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8305,8313,{"$raw":"00000000"},"110408","MJ.3.5298","INOP",3,"T",128.61217,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8306,8314,{"$raw":"00000000"},"110408","MJ.3.5299","INOP",3,"T",2.94292,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8307,8315,{"$raw":"00000000"},"110408","MJ.1.178","OPER",1,"A",4.65639,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110405",1,null,"R PE JOSÉ INÁCIO PEREIRA",8308,8316,{"$raw":"00000000"},"110405","R PE JOSÉ INÁCIO PEREIRA","INOP",3,"T",17.37576,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",1,null,"EN 361",8309,8317,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",27.89666,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA MURTEIRA",null,null,"ESTR",null,"110405",1,null,"ESTR DA MURTEIRA",8310,8318,{"$raw":"00000000"},"110405","ESTR DA MURTEIRA","OPER",2,"A",220.55046,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA MURTEIRA",null,null,"ESTR",null,"110405",1,null,"ESTR DA MURTEIRA",8311,8319,{"$raw":"00000000"},"110405","ESTR DA MURTEIRA","OPER",2,"A",168.51982,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",2,"110409","EN 115",8312,8320,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",7.38022,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",8313,8321,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",144.51415,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ALEGRIA",null,null,"R",null,"110408",1,null,"R DA ALEGRIA",8314,8322,{"$raw":"00000000"},"110408","R DA ALEGRIA","OPER",1,"A",26.52147,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ALEGRIA",null,null,"R",null,"110408",1,null,"R DA ALEGRIA",8315,8323,{"$raw":"00000000"},"110408","R DA ALEGRIA","INOP",3,"T",2.58062,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ALEGRIA",null,null,"R",null,"110408",1,null,"R DA ALEGRIA",8316,8324,{"$raw":"00000000"},"110408","R DA ALEGRIA","INOP",3,"T",35.04167,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","MARGINAL",null,null,"R",null,"110408",1,null,"R MARGINAL",8317,8325,{"$raw":"00000000"},"110408","R MARGINAL","OPER",1,"A",43.84608,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8318,8326,{"$raw":"00000000"},"110408","MJ.3.5300","INOP",3,"T",55.24432,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110405",1,null,"R PE JOSÉ INÁCIO PEREIRA",8319,8327,{"$raw":"00000000"},"110405","R PE JOSÉ INÁCIO PEREIRA","INOP",3,"T",37.42955,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110405",1,null,"R PE JOSÉ INÁCIO PEREIRA",8320,8328,{"$raw":"00000000"},"110405","R PE JOSÉ INÁCIO PEREIRA","INOP",3,"T",75.09469,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"5 DE AGOSTO",null,null,"R",null,"110405",1,null,"R 5 DE AGOSTO",8321,8329,{"$raw":"00000000"},"110405","R 5 DE AGOSTO","INOP",3,"T",57.39103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8322,8330,{"$raw":"00000000"},"110402","MJ.3.5301","INOP",3,"T",0.62201,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR LEONEL RIBEIRO",null,null,"R",null,"110402",1,null,"R DR LEONEL RIBEIRO",8323,8331,{"$raw":"00000000"},"110402","R DR LEONEL RIBEIRO","INOP",3,"T",40.43645,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"5 DE AGOSTO",null,null,"R",null,"110405",1,null,"R 5 DE AGOSTO",8324,8332,{"$raw":"00000000"},"110405","R 5 DE AGOSTO","INOP",3,"T",68.56669,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","25 DE ABRIL",null,null,"R",null,"110405",1,null,"R 25 DE ABRIL",8325,8333,{"$raw":"00000000"},"110405","R 25 DE ABRIL","OPER",2,"A",200.58883,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA MURTEIRA",null,null,"ESTR",null,"110405",1,null,"ESTR DA MURTEIRA",8326,8334,{"$raw":"00000000"},"110405","ESTR DA MURTEIRA","OPER",2,"A",172.38621,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","25 DE ABRIL",null,null,"R",null,"110405",1,null,"R 25 DE ABRIL",8327,8335,{"$raw":"00000000"},"110405","R 25 DE ABRIL","OPER",2,"A",50.53359,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA LIBERDADE",null,null,"R",null,"110405",1,null,"R DA LIBERDADE",8328,8336,{"$raw":"00000000"},"110405","R DA LIBERDADE","OPER",2,"A",32.64201,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","25 DE ABRIL",null,null,"R",null,"110405",1,null,"R 25 DE ABRIL",8329,8337,{"$raw":"00000000"},"110405","R 25 DE ABRIL","OPER",2,"A",48.83702,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8330,8338,{"$raw":"00000000"},"110407","MJ.3.5302","INOP",3,"T",93.08312,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","573","ESTRADA DA PÓVOA",null,"02 Dez 2003","R",null,"110405",1,null,"R ESTRADA DA PÓVOA",8331,8339,{"$raw":"00000000"},"110405","R ESTRADA DA PÓVOA","OPER",2,"A",32.39023,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",8332,8340,{"$raw":"00000000"},"110408","R DA LIBERDADE","OPER",1,"A",12.66417,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",2,"110405","EN 115",8333,8341,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",33.40680,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8334,8342,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",136.73909,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",8335,8343,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",298.79343,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8336,8344,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",27.79772,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",2,"110408","EN 115",8337,8345,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",114.36247,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8338,8346,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",98.84235,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",8339,8347,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",130.21410,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",8340,8348,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",128.94742,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",8341,8349,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",53.54715,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","JOSÉ DUARTE",null,null,"R",null,"110408",1,null,"R JOSÉ DUARTE",8342,8350,{"$raw":"00000000"},"110408","R JOSÉ DUARTE","OPER",2,"A",279.38859,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","JOSÉ DUARTE",null,null,"R",null,"110408",1,null,"R JOSÉ DUARTE",8343,8351,{"$raw":"00000000"},"110408","R JOSÉ DUARTE","OPER",2,"A",116.41677,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",8344,8352,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",32.41335,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",2,"110407","EM 612-1",8345,8353,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",130.82359,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8346,8354,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",73.89432,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","D NUNO ÁLVARES DE PEREIRA MELLO",null,null,"LG",null,"110402",1,null,"LG D NUNO ÁLVARES DE PEREIRA MELLO",8347,8355,{"$raw":"00000000"},"110402","LG D NUNO ÁLVARES DE PEREIRA MELLO","OPER",1,"A",26.95799,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8348,8356,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",232.02878,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",1,null,"EN 361",8349,8357,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",14.57944,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",1,null,"EN 361",8350,8358,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",124.82750,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",1,null,"EN 361",8351,8359,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",172.05236,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",8352,8360,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",115.09603,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA EUROPA",null,null,"ROT",null,"110402",1,null,"ROT DA EUROPA",8353,8361,{"$raw":"00000000"},"110402","ROT DA EUROPA","OPER",1,"A",44.73775,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",1,null,"EN 361",8354,8362,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",103.00598,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8355,8363,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",24.12032,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",8356,8364,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",192.45201,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8357,8365,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",284.25926,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8358,8366,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",85.78925,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8359,8367,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",100.34664,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8360,8368,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",34.96238,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8361,8369,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",62.22968,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110407",1,null,"EM 612-1",8362,8370,{"$raw":"00000000"},"110407","EM 612-1","OPER",2,"A",335.50860,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110407",1,null,"EM 612-1",8363,8371,{"$raw":"00000000"},"110407","EM 612-1","OPER",2,"A",311.11994,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8364,8372,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",383.34811,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8365,8373,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",123.97753,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LAVADOUROS",null,null,"R",null,"110408",1,null,"R DOS LAVADOUROS",8366,8374,{"$raw":"00000000"},"110408","R DOS LAVADOUROS","INOP",3,"T",78.41559,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","573","ESTRADA DA PÓVOA",null,"02 Dez 2003","R",null,"110405",1,null,"R ESTRADA DA PÓVOA",8367,8375,{"$raw":"00000000"},"110405","R ESTRADA DA PÓVOA","OPER",2,"A",1078.09783,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA ESPIGA",null,"07/02/2006","R",null,"110402",2,"110405","R DA ESPIGA",8368,8376,{"$raw":"00000000"},"110402","R DA ESPIGA","OPER",1,"A",59.55473,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8369,8377,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",64.92486,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8370,8378,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",174.73007,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8371,8379,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",449.76137,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8372,8380,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",128.82756,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8373,8381,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",131.25438,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8374,8382,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",51.54537,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110402",1,null,"EM 612-1",8375,8383,{"$raw":"00000000"},"110402","EM 612-1","OPER",2,"A",10.15091,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110407",1,null,"EM 612-1",8376,8384,{"$raw":"00000000"},"110407","EM 612-1","OPER",2,"A",62.40780,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110407",1,null,"EM 612-1",8377,8385,{"$raw":"00000000"},"110407","EM 612-1","OPER",2,"A",37.74190,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110407",1,null,"EM 612-1",8378,8386,{"$raw":"00000000"},"110407","EM 612-1","OPER",2,"A",30.86911,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110407",1,null,"EM 612-1",8379,8387,{"$raw":"00000000"},"110407","EM 612-1","OPER",2,"A",120.56728,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",8380,8388,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",15.49708,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038-1","1038-1",null,null,"CM",null,"110405",1,null,"CM 1038-1",8381,8389,{"$raw":"00000000"},"110405","CM 1038-1","OPER",2,"A",109.22367,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["1","EM","615","DR ANTÓNIO JOSÉ DE ALMEIDA E SILVA",null,null,"R",null,"110406",1,null,"R DR ANTÓNIO JOSÉ DE ALMEIDA E SILVA",8382,8390,{"$raw":"00000000"},"110406","R DR ANTÓNIO JOSÉ DE ALMEIDA E SILVA","OPER",2,"A",167.42248,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",8383,8391,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",131.82302,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",8384,8392,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",98.10300,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PALMIRA CALISTO",null,null,"R",null,"110407",1,null,"R PALMIRA CALISTO",8385,8393,{"$raw":"00000000"},"110407","R PALMIRA CALISTO","OPER",2,"A",50.53628,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110407",1,null,"EM 612-1",8386,8394,{"$raw":"00000000"},"110407","EM 612-1","OPER",2,"A",184.70369,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",8387,8395,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",165.16921,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"20 DE JANEIRO",null,null,"R",null,"110407",1,null,"R 20 DE JANEIRO",8388,8396,{"$raw":"00000000"},"110407","R 20 DE JANEIRO","OPER",2,"A",90.47406,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8389,8397,{"$raw":"00000000"},"110409","MJ.3.5303","INOP",3,"T",0.01000,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","S PEDRO",null,null,"BR",null,"110409",1,null,"BR S PEDRO",8390,8398,{"$raw":"00000000"},"110409","BR S PEDRO","OPER",1,"A",7.77073,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","569",null,null,"EM",null,"110409",1,null,"EM 569",8391,8399,{"$raw":"00000000"},"110409","EM 569","OPER",1,"A",33.94764,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",8392,8400,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",7.58895,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",8393,8401,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",58.65014,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","612-1",null,null,"EM",null,"110407",1,null,"EM 612-1",8394,8402,{"$raw":"00000000"},"110407","EM 612-1","OPER",2,"A",14.23241,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DR OLIVEIRA DE SALAZAR",null,null,"R",null,"110409",1,null,"R DR OLIVEIRA DE SALAZAR",8395,8403,{"$raw":"00000000"},"110409","R DR OLIVEIRA DE SALAZAR","OPER",1,"A",65.30053,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DR OLIVEIRA DE SALAZAR",null,null,"R",null,"110409",1,null,"R DR OLIVEIRA DE SALAZAR",8396,8404,{"$raw":"00000000"},"110409","R DR OLIVEIRA DE SALAZAR","OPER",1,"A",198.72771,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1023","1023",null,null,"CM",null,"110409",1,null,"CM 1023",8397,8405,{"$raw":"00000000"},"110409","CM 1023","OPER",2,"A",1434.17287,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","569",null,null,"EM",null,"110409",1,null,"EM 569",8398,8406,{"$raw":"00000000"},"110409","EM 569","OPER",1,"A",83.87000,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","S PEDRO",null,null,"BR",null,"110409",1,null,"BR S PEDRO",8399,8407,{"$raw":"00000000"},"110409","BR S PEDRO","OPER",1,"A",84.15171,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",8400,8408,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",17.79801,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",8401,8409,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",426.71663,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS POLOMES",null,null,"R",null,"110409",1,null,"R DOS POLOMES",8402,8410,{"$raw":"00000000"},"110409","R DOS POLOMES","OPER",1,"A",107.81548,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110409",1,null,"R 1º DE DEZEMBRO",8403,8411,{"$raw":"00000000"},"110409","R 1º DE DEZEMBRO","INOP",3,"T",63.14395,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",8404,8412,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",34.06566,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",8405,8413,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",8.41869,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",8406,8414,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",97.57488,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ARRIBAS",null,null,"ESTR",null,"110406",1,null,"ESTR DAS ARRIBAS",8407,8415,{"$raw":"00000000"},"110406","ESTR DAS ARRIBAS","OPER",2,"A",160.30455,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8408,8416,{"$raw":"00000000"},"110409","MJ.3.5304","INOP",3,"T",0.03606,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"TERRA DA EIRA",null,null,"TV",null,"110404",1,null,"TV TERRA DA EIRA",8409,8417,{"$raw":"00000000"},"110404","TV TERRA DA EIRA","OPER",1,"A",45.37511,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CARVALHOS",null,null,"TV",null,"110404",1,null,"TV DOS CARVALHOS",8410,8418,{"$raw":"00000000"},"110404","TV DOS CARVALHOS","OPER",1,"A",41.11124,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CALÇADA",null,null,"BC",null,"110404",1,null,"BC DA CALÇADA",8411,8419,{"$raw":"00000000"},"110404","BC DA CALÇADA","OPER",1,"A",47.73983,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSEIRAL",null,null,"TV",null,"110404",1,null,"TV DO ROSEIRAL",8412,8420,{"$raw":"00000000"},"110404","TV DO ROSEIRAL","INOP",3,"T",43.91294,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA VARZEA",null,null,"R",null,"110404",1,null,"R DA VARZEA",8413,8421,{"$raw":"00000000"},"110404","R DA VARZEA","INOP",3,"T",76.29840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SERRADO",null,null,"BC",null,"110406",1,null,"BC DO SERRADO",8414,8422,{"$raw":"00000000"},"110406","BC DO SERRADO","OPER",2,"A",52.33412,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PE PRATA",null,null,"TV",null,"110407",1,null,"TV DO PE PRATA",8415,8423,{"$raw":"00000000"},"110407","TV DO PE PRATA","OPER",2,"A",45.07998,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FAZENDAS DE PENICHE",null,"27 Ag de 2002","R",null,"110402",1,null,"R FAZENDAS DE PENICHE",8416,8424,{"$raw":"00000000"},"110402","R FAZENDAS DE PENICHE","INOP",3,"T",176.45835,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO REIS",null,null,"R",null,"110409",1,null,"R ANTÓNIO REIS",8417,8425,{"$raw":"00000000"},"110409","R ANTÓNIO REIS","OPER",1,"A",37.19287,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FAIA",null,null,"TV",null,"110409",1,null,"TV DA FAIA",8418,8426,{"$raw":"00000000"},"110409","TV DA FAIA","INOP",3,"T",67.23090,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","JOSÉ DUARTE",null,null,"R",null,"110408",1,null,"R JOSÉ DUARTE",8419,8427,{"$raw":"00000000"},"110408","R JOSÉ DUARTE","OPER",2,"A",51.20309,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA REPÚBLICA",null,null,"PC",null,"110409",1,null,"PC DA REPÚBLICA",8420,8428,{"$raw":"00000000"},"110409","PC DA REPÚBLICA","INOP",3,"T",23.90888,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"TV",null,"110409",1,null,"TV DA ESPERANÇA",8421,8429,{"$raw":"00000000"},"110409","TV DA ESPERANÇA","INOP",3,"T",53.20430,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"CC",null,"110409",1,null,"CC DA FONTE",8422,8430,{"$raw":"00000000"},"110409","CC DA FONTE","INOP",3,"T",57.08801,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"ANTÓNIO GOMES GAIO",null,null,"R",null,"110409",1,null,"R ANTÓNIO GOMES GAIO",8423,8431,{"$raw":"00000000"},"110409","R ANTÓNIO GOMES GAIO","INOP",3,"A",87.71017,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO VICENTE",null,null,"TV",null,"110409",1,null,"TV ANTÓNIO VICENTE",8424,8432,{"$raw":"00000000"},"110409","TV ANTÓNIO VICENTE","INOP",3,"T",25.93729,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO JANUÁRIO",null,null,"TV",null,"110409",1,null,"TV ANTÓNIO JANUÁRIO",8425,8433,{"$raw":"00000000"},"110409","TV ANTÓNIO JANUÁRIO","INOP",3,"T",34.52538,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"TV",null,"110402",1,null,"TV DA ESPERANÇA",8426,8434,{"$raw":"00000000"},"110402","TV DA ESPERANÇA","INOP",3,"T",18.74871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S JOSÉ",null,null,"TV",null,"110402",1,null,"TV S JOSÉ",8427,8435,{"$raw":"00000000"},"110402","TV S JOSÉ","INOP",3,"T",26.67428,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"ESCNH",null,"110402",1,null,"ESCNH DA IGREJA",8428,8436,{"$raw":"00000000"},"110402","ESCNH DA IGREJA","INOP",3,"T",48.56897,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CARVALHAS",null,null,"TV",null,"110402",1,null,"TV DAS CARVALHAS",8429,8437,{"$raw":"00000000"},"110402","TV DAS CARVALHAS","OPER",2,"A",43.72362,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"TEATRO VELHO",null,null,"BC",null,"110402",1,null,"BC TEATRO VELHO",8430,8438,{"$raw":"00000000"},"110402","BC TEATRO VELHO","OPER",2,"A",27.75457,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SOFIA DA CONCEIÇÃO QUINTINO",null,"SIM","R",null,"110402",1,null,"R SOFIA DA CONCEIÇÃO QUINTINO",8431,8439,{"$raw":"00000000"},"110402","R SOFIA DA CONCEIÇÃO QUINTINO","INOP",3,"T",37.98259,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANSELMO CARNEIRO DA SILVA",null,null,"R",null,"110402",1,null,"R ANSELMO CARNEIRO DA SILVA",8432,8440,{"$raw":"00000000"},"110402","R ANSELMO CARNEIRO DA SILVA","INOP",3,"T",58.60524,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ FERREIRA",null,null,"TV",null,"110405",1,null,"TV JOSÉ FERREIRA",8433,8441,{"$raw":"00000000"},"110405","TV JOSÉ FERREIRA","INOP",3,"A",36.00862,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GENERAL SPINOLA",null,null,"R",null,"110405",1,null,"R GENERAL SPINOLA",8434,8442,{"$raw":"00000000"},"110405","R GENERAL SPINOLA","INOP",3,"T",50.67728,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GENERAL SPINOLA",null,null,"R",null,"110405",1,null,"R GENERAL SPINOLA",8435,8443,{"$raw":"00000000"},"110405","R GENERAL SPINOLA","INOP",3,"A",26.48682,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS PACATOS",null,null,"R",null,"110405",1,null,"R DOS PACATOS",8436,8444,{"$raw":"00000000"},"110405","R DOS PACATOS","INOP",3,"T",34.71749,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,null,"R",null,null,{"$raw":"*****"},null,"R 25 DE ABRIL",8437,8445,{"$raw":"00000000"},null,"R 25 DE ABRIL",null,{"$raw":"*****"},null,45.12415,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MALMEQUERES",null,null,"R",null,"110405",1,null,"R DOS MALMEQUERES",8438,8446,{"$raw":"00000000"},"110405","R DOS MALMEQUERES","INOP",3,"T",45.66081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"LG",null,"110405",1,null,"LG DA IGREJA",8439,8447,{"$raw":"00000000"},"110405","LG DA IGREJA","INOP",3,"T",24.55408,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESTRADA FUNDA",null,null,"R",null,"110405",1,null,"R DA ESTRADA FUNDA",8440,8448,{"$raw":"00000000"},"110405","R DA ESTRADA FUNDA","INOP",3,"T",29.94225,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1031","1031",null,null,"CM",null,"110405",1,null,"CM 1031",8441,8449,{"$raw":"00000000"},"110405","CM 1031","OPER",1,"A",333.31401,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1031","1031",null,null,"CM",null,"110405",1,null,"CM 1031",8442,8450,{"$raw":"00000000"},"110405","CM 1031","OPER",1,"A",92.94146,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1031","1031",null,null,"CM",null,"110405",1,null,"CM 1031",8443,8451,{"$raw":"00000000"},"110405","CM 1031","OPER",1,"A",28.74650,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POVO",null,null,"LG",null,"110405",1,null,"LG DO POVO",8444,8452,{"$raw":"00000000"},"110405","LG DO POVO","INOP",3,"T",13.32003,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POVO",null,null,"LG",null,"110405",1,null,"LG DO POVO",8445,8453,{"$raw":"00000000"},"110405","LG DO POVO","INOP",3,"T",31.52648,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POVO",null,null,"LG",null,"110405",1,null,"LG DO POVO",8446,8454,{"$raw":"00000000"},"110405","LG DO POVO","INOP",3,"T",13.32003,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1031","DA LIBERDADE",null,null,"R",null,"110405",1,null,"R DA LIBERDADE",8447,8455,{"$raw":"00000000"},"110405","R DA LIBERDADE","OPER",1,"A",8.67050,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1031","1031",null,null,"CM",null,"110405",1,null,"CM 1031",8448,8456,{"$raw":"00000000"},"110405","CM 1031","OPER",1,"A",336.37789,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1031","1031",null,null,"CM",null,"110405",1,null,"CM 1031",8449,8457,{"$raw":"00000000"},"110405","CM 1031","OPER",1,"A",22.36037,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8450,8458,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,564.05424,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8451,8459,{"$raw":"00000000"},"110402","MJ.3.5305","INOP",3,"T",98.91825,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8452,8460,{"$raw":"00000000"},"110402","MJ.3.5306","INOP",3,"T",71.84131,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8453,8461,{"$raw":"00000000"},"110402","MJ.3.5307","INOP",3,"T",438.82507,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTO ANTÓNIO",null,null,"LG",null,"110409",1,null,"LG SANTO ANTÓNIO",8454,8462,{"$raw":"00000000"},"110409","LG SANTO ANTÓNIO","INOP",3,"T",20.79551,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTO ANTÓNIO",null,null,"LG",null,"110409",1,null,"LG SANTO ANTÓNIO",8455,8463,{"$raw":"00000000"},"110409","LG SANTO ANTÓNIO","INOP",3,"T",2.33561,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,null,"TV",null,"110405",1,null,"TV DA BOAVISTA",8458,8466,{"$raw":"00000000"},"110405","TV DA BOAVISTA","INOP",3,"T",63.35821,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL",null,null,"R",null,"110405",1,null,"R DO CASAL",8459,8467,{"$raw":"00000000"},"110405","R DO CASAL","INOP",3,"A",118.76919,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","13 DE JANEIRO",null,null,"R",null,"110402",1,null,"R 13 DE JANEIRO",8460,8468,{"$raw":"00000000"},"110402","R 13 DE JANEIRO","OPER",1,"A",34.43113,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","13 DE JANEIRO",null,null,"R",null,"110402",1,null,"R 13 DE JANEIRO",8461,8469,{"$raw":"00000000"},"110402","R 13 DE JANEIRO","OPER",1,"A",16.84868,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","13 DE JANEIRO",null,null,"R",null,"110402",1,null,"R 13 DE JANEIRO",8462,8470,{"$raw":"00000000"},"110402","R 13 DE JANEIRO","OPER",1,"A",51.52376,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",8463,8471,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",10.62512,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",8464,8472,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",25.44511,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,8465,8473,{"$raw":"00000000"},"110402","MJ.3.5308","INOP",3,"T",0.80006,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",8466,8474,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",29.81697,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",8467,8475,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",40.88681,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",8468,8476,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",43.28906,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",8469,8477,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",12.67259,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",8470,8478,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",154.91316,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",1,null,"EN 361",8471,8479,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",150.82598,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",1,null,"EN 361",8472,8480,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",97.37722,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",1,null,"EN 361",8473,8481,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",8.52790,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8474,8482,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",172.95719,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8475,8483,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",10.41532,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8476,8484,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",178.58476,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110405",2,"110402","EN 115",8477,8485,{"$raw":"00000000"},"110405","EN 115","OPER",1,"A",89.73366,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",2,"110402","EN 115",8478,8486,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",130.54236,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8479,8487,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",64.11337,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8480,8488,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",92.15853,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8481,8489,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",107.43517,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8482,8490,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",7.67626,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","1032",null,null,"CM",null,"110407",1,null,"CM 1032",8483,8491,{"$raw":"00000000"},"110407","CM 1032","OPER",2,"A",374.37963,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","DO ROSSIO",null,null,"LG",null,"110407",1,null,"LG DO ROSSIO",8484,8492,{"$raw":"00000000"},"110407","LG DO ROSSIO","OPER",2,"A",11.26108,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8485,8493,{"$raw":"00000000"},"110408","MJ.2.358","OPER",2,"A",42.34120,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",8486,8494,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",50.06688,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",8487,8495,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",165.95170,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",8488,8496,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",502.51182,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8489,8497,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",142.57620,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8490,8498,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",49.11505,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8491,8499,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",218.30456,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8492,8500,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",194.24893,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8493,8501,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",50.23391,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8494,8502,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",47.75393,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8495,8503,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",15.64807,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8496,8504,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",42.92335,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8497,8505,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",9.22858,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8498,8506,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",4.69320,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8499,8507,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",50.51540,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8500,8508,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",68.95502,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8501,8509,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",34.15754,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8502,8510,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",73.23077,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8503,8511,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",32.64160,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8504,8512,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",4.11597,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8505,8513,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",15.76477,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8506,8514,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",74.18977,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8507,8515,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",48.67389,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8508,8516,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",10.79114,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8509,8517,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",69.40390,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",8510,8518,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",31.56412,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",8511,8519,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",97.16750,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110405",1,null,"EN 115",8512,8520,{"$raw":"00000000"},"110405","EN 115","OPER",1,"A",2.80872,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8513,8521,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",90.45098,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8514,8522,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",42.43383,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8515,8523,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",87.21202,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8516,8524,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",53.09064,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8517,8525,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",3.37049,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8518,8526,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",139.61190,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8519,8527,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",224.33956,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8520,8528,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",25.35811,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8521,8529,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",74.97174,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",8522,8530,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",83.11413,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",8523,8531,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",9.06581,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110405",2,"110402","EN 115",8524,8532,{"$raw":"00000000"},"110405","EN 115","OPER",1,"A",111.46950,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",8525,8533,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",173.25614,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",8526,8534,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",19.82001,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",8527,8535,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",14.31096,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",8528,8536,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",76.32264,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA ESPIGA",null,"07/02/2006","R",null,"110402",2,"110405","R DA ESPIGA",8529,8537,{"$raw":"00000000"},"110402","R DA ESPIGA","OPER",1,"A",8.91898,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8530,8538,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,370.97763,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8531,8539,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,133.14325,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8532,8540,{"$raw":"00000000"},"110408","MJ.2.359","OPER",2,"A",84.39289,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8533,8541,{"$raw":"00000000"},"110408","MJ.2.360","OPER",2,"A",139.87495,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8534,8542,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,28.21647,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8535,8543,{"$raw":"00000000"},"110408","MJ.3.5309","INOP",3,"T",21.78315,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8536,8544,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,14.74915,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8537,8545,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,82.28703,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8538,8546,{"$raw":"00000000"},"110408","MJ.3.5310","INOP",3,"T",97.42915,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8539,8547,{"$raw":"00000000"},"110408","MJ.3.5311","INOP",3,"T",110.72665,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8540,8548,{"$raw":"00000000"},"110408","MJ.3.5312","INOP",3,"T",14.44528,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8541,8549,{"$raw":"00000000"},"110408","MJ.3.5313","INOP",3,"T",2.91446,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8542,8550,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,83.63032,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8543,8551,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,54.07380,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8544,8552,{"$raw":"00000000"},"110408","MJ.3.5314","INOP",3,"T",114.34911,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8545,8553,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,380.07566,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8546,8554,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,284.10377,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8547,8555,{"$raw":"00000000"},"110408","MJ.2.361","OPER",2,"A",215.96766,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8548,8556,{"$raw":"00000000"},"110408","MJ.3.5315","INOP",3,"T",397.54425,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8549,8557,{"$raw":"00000000"},"110408","MJ.3.5316","INOP",3,"T",105.29243,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8550,8558,{"$raw":"00000000"},"110408","MJ.2.362","OPER",2,"A",229.69631,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8551,8559,{"$raw":"00000000"},"110408","MJ.3.5317","INOP",3,"T",133.13682,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8552,8560,{"$raw":"00000000"},"110408","MJ.3.5318","INOP",3,"T",224.88177,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,8553,8561,{"$raw":"00000000"},"110408","MJ.3.5319","INOP",3,"T",260.77502,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8554,8562,{"$raw":"00000000"},"110408","MJ.3.5320","INOP",3,"T",77.26851,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8555,8563,{"$raw":"00000000"},"110408","MJ.3.5321","INOP",3,"T",456.61023,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"do Emigrante",null,null,"R",null,"110408",1,null,"R do Emigrante",8556,8564,{"$raw":"00000000"},"110408","R do Emigrante","INOP",3,"T",152.29099,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8557,8565,{"$raw":"00000000"},"110408","MJ.3.5322","INOP",3,"T",214.03798,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8558,8566,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,311.74025,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8559,8567,{"$raw":"00000000"},"110408","MJ.3.5323","INOP",3,"T",509.90996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8560,8568,{"$raw":"00000000"},"110408","MJ.3.5324","INOP",3,"T",197.61690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8561,8569,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,171.94511,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,8562,8570,{"$raw":"00000000"},"110408","MJ.3.5325","INOP",3,"T",168.50515,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8563,8571,{"$raw":"00000000"},"110408","MJ.3.5326","INOP",3,"T",273.93727,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8564,8572,{"$raw":"00000000"},"110408","MJ.3.5327","INOP",3,"T",115.06698,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8565,8573,{"$raw":"00000000"},"110408","MJ.3.5328","INOP",3,"T",206.11117,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8566,8574,{"$raw":"00000000"},"110408","MJ.3.5329","INOP",3,"T",184.04700,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8567,8575,{"$raw":"00000000"},"110408","MJ.3.5330","INOP",3,"T",118.48808,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8568,8576,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,96.66519,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8569,8577,{"$raw":"00000000"},"110408","MJ.3.5331","INOP",3,"T",461.28575,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,null,null,null,null,null,"110408",1,null,null,8570,8578,{"$raw":"00000000"},"110408","MJ.3.5332","INOP",3,"T",202.92099,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8571,8579,{"$raw":"00000000"},"110408","MJ.3.5333","INOP",3,"T",241.61651,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8572,8580,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,199.94038,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8573,8581,{"$raw":"00000000"},"110408","MJ.3.5334","INOP",3,"T",303.52367,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8574,8582,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,216.27891,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8575,8583,{"$raw":"00000000"},"110408","MJ.3.5335","INOP",3,"T",386.75453,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110408",1,null,null,8576,8584,{"$raw":"00000000"},"110408","MJ.3.5336","INOP",3,"T",281.64203,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8577,8585,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,134.28548,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8578,8586,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,203.99755,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8579,8587,{"$raw":"00000000"},"110408","MJ.3.5337","INOP",3,"T",1.35440,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8580,8588,{"$raw":"00000000"},"110408","MJ.3.5338","INOP",3,"T",326.48658,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8581,8589,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,35.79960,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8582,8590,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,47.98188,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8583,8591,{"$raw":"00000000"},"110408","MJ.2.363","OPER",2,"A",152.64491,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8584,8592,{"$raw":"00000000"},"110408","MJ.2.364","OPER",2,"A",12.82113,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8585,8593,{"$raw":"00000000"},"110408","MJ.2.365","OPER",2,"A",1.99023,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8586,8594,{"$raw":"00000000"},"110408","MJ.3.5339","INOP",3,"T",21.14959,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8587,8595,{"$raw":"00000000"},"110408","MJ.3.5340","INOP",3,"T",26.19834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8588,8596,{"$raw":"00000000"},"110408","MJ.3.5341","INOP",3,"T",63.47821,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8589,8597,{"$raw":"00000000"},"110408","MJ.2.366","OPER",2,"A",330.76127,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8590,8598,{"$raw":"00000000"},"110408","MJ.3.5342","INOP",3,"T",250.53774,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8591,8599,{"$raw":"00000000"},"110408","MJ.3.5343","INOP",3,"T",45.02566,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8592,8600,{"$raw":"00000000"},"110408","MJ.3.5344","INOP",3,"T",113.56813,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8593,8601,{"$raw":"00000000"},"110408","MJ.3.5345","INOP",3,"T",38.70649,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8594,8602,{"$raw":"00000000"},"110408","MJ.3.5346","INOP",3,"T",137.65725,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8595,8603,{"$raw":"00000000"},"110408","MJ.2.367","OPER",2,"A",2.15615,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8596,8604,{"$raw":"00000000"},"110408","MJ.3.5347","INOP",3,"T",106.64804,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8597,8605,{"$raw":"00000000"},"110408","MJ.3.5348","INOP",3,"T",132.44775,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8598,8606,{"$raw":"00000000"},"110408","MJ.3.5349","INOP",3,"T",164.77805,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8599,8607,{"$raw":"00000000"},"110408","MJ.3.5350","INOP",3,"T",6.15666,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8600,8608,{"$raw":"00000000"},"110408","MJ.3.5351","INOP",3,"T",2.47873,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8601,8609,{"$raw":"00000000"},"110408","MJ.3.5352","INOP",3,"T",168.68763,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8602,8610,{"$raw":"00000000"},"110408","MJ.3.5353","INOP",3,"T",10.30578,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8603,8611,{"$raw":"00000000"},"110408","MJ.3.5354","INOP",3,"T",63.80951,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8604,8612,{"$raw":"00000000"},"110408","MJ.3.5355","INOP",3,"T",15.54586,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8605,8613,{"$raw":"00000000"},"110408","MJ.2.368","OPER",2,"A",3.46448,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8606,8614,{"$raw":"00000000"},"110408","MJ.3.5356","INOP",3,"T",55.50087,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8607,8615,{"$raw":"00000000"},"110408","MJ.3.5357","INOP",3,"T",4.77896,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8608,8616,{"$raw":"00000000"},"110408","MJ.3.5358","INOP",3,"T",3.85253,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8609,8617,{"$raw":"00000000"},"110408","MJ.3.5359","INOP",3,"T",42.02437,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8610,8618,{"$raw":"00000000"},"110408","MJ.3.5360","INOP",2,"T",82.59233,4.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8611,8619,{"$raw":"00000000"},"110408","MJ.3.5361","INOP",3,"T",217.76064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8612,8620,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,120.96330,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8613,8621,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,42.48269,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8614,8622,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,243.59662,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8615,8623,{"$raw":"00000000"},"110408","MJ.3.5362","INOP",3,"T",471.22895,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8616,8624,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,206.37704,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8617,8625,{"$raw":"00000000"},"110408","MJ.3.5363","INOP",3,"T",296.68708,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8618,8626,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,106.92612,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8619,8627,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,120.72644,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8620,8628,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,31.53459,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8621,8629,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,149.57066,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8622,8630,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,39.89299,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8623,8631,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,129.91477,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8624,8632,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.83356,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8625,8633,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,9.66240,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8626,8634,{"$raw":"00000000"},"110408","MJ.3.5364","INOP",3,"T",42.10564,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8627,8635,{"$raw":"00000000"},"110408","MJ.3.5365","INOP",3,"T",4.54050,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8628,8636,{"$raw":"00000000"},"110408","MJ.3.5366","INOP",3,"T",5.84371,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8629,8637,{"$raw":"00000000"},"110408","MJ.3.5367","INOP",3,"T",123.78627,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8630,8638,{"$raw":"00000000"},"110408","MJ.3.5368","INOP",3,"T",60.38171,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8631,8639,{"$raw":"00000000"},"110408","MJ.3.5369","INOP",3,"T",51.49031,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8632,8640,{"$raw":"00000000"},"110408","MJ.3.5370","INOP",3,"T",62.92849,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8633,8641,{"$raw":"00000000"},"110408","MJ.3.5371","INOP",3,"T",138.38216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8634,8642,{"$raw":"00000000"},"110408","MJ.1.179","OPER",1,"A",5.13966,14.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8635,8643,{"$raw":"00000000"},"110408","MJ.3.5372","INOP",3,"T",50.48916,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8636,8644,{"$raw":"00000000"},"110408","MJ.2.369","OPER",2,"A",3.36109,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8637,8645,{"$raw":"00000000"},"110408","MJ.3.5373","INOP",3,"T",120.84384,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8638,8646,{"$raw":"00000000"},"110408","MJ.3.5374","INOP",3,"T",43.68673,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8639,8647,{"$raw":"00000000"},"110408","MJ.3.5375","INOP",3,"T",3.91414,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8640,8648,{"$raw":"00000000"},"110408","MJ.3.5376","INOP",3,"T",5.29295,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8641,8649,{"$raw":"00000000"},"110408","MJ.3.5377","INOP",3,"T",130.26229,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8642,8650,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,19.01879,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8643,8651,{"$raw":"00000000"},"110408","MJ.3.5378","INOP",3,"T",14.24376,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8644,8652,{"$raw":"00000000"},"110408","MJ.3.5379","INOP",3,"T",75.39117,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8645,8653,{"$raw":"00000000"},"110408","MJ.3.5380","INOP",3,"T",225.19427,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8646,8654,{"$raw":"00000000"},"110408","MJ.3.5381","INOP",3,"T",203.62371,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8647,8655,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,60.56205,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8648,8656,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,130.76143,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8649,8657,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,176.47101,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8650,8658,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,80.30955,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8651,8659,{"$raw":"00000000"},"110408","MJ.3.5382","INOP",3,"T",5.93809,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8652,8660,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,263.29258,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8653,8661,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,17.82461,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8654,8662,{"$raw":"00000000"},"110408","MJ.3.5383","INOP",3,"T",243.41397,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",8655,8663,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",1.45424,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO LOPES JÚNIOR",null,null,"R",null,"110408",1,null,"R ANTÓNIO LOPES JÚNIOR",8656,8664,{"$raw":"00000000"},"110408","R ANTÓNIO LOPES JÚNIOR","INOP",3,"T",41.70078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO LOPES JÚNIOR",null,null,"R",null,"110408",1,null,"R ANTÓNIO LOPES JÚNIOR",8657,8665,{"$raw":"00000000"},"110408","R ANTÓNIO LOPES JÚNIOR","INOP",3,"T",111.87754,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS EMIGRANTES",null,null,"R",null,"110408",1,null,"R DOS EMIGRANTES",8658,8666,{"$raw":"00000000"},"110408","R DOS EMIGRANTES","OPER",2,"A",82.52807,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","JULIO BERNARDO DA SILVA",null,null,"R",null,"110406",1,null,"R JULIO BERNARDO DA SILVA",8659,8667,{"$raw":"00000000"},"110406","R JULIO BERNARDO DA SILVA","OPER",2,"A",70.17102,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PRAÇA",null,null,"LG",null,"110402",1,null,"LG DA PRAÇA",8660,8668,{"$raw":"00000000"},"110402","LG DA PRAÇA","INOP",3,"T",7.48982,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",8661,8669,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",391.37275,5.50000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",8662,8670,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",85.15176,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","1033",null,null,"CM",null,"110408",1,null,"CM 1033",8663,8671,{"$raw":"00000000"},"110408","CM 1033","OPER",2,"A",22.76525,5.50000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,1,0,1,0,null,null]
["1","CM","1033","JOSÉ DUARTE",null,null,"R",null,"110408",1,null,"R JOSÉ DUARTE",8664,8672,{"$raw":"00000000"},"110408","R JOSÉ DUARTE","OPER",2,"A",34.18028,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8665,8673,{"$raw":"00000000"},"110408","MJ.3.5384","INOP",3,"T",92.27503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110408",1,null,null,8666,8674,{"$raw":"00000000"},"110408","MJ.3.5385","INOP",3,"T",8.59168,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LOPES",null,null,"R",null,"110408",1,null,"R LOPES",8667,8675,{"$raw":"00000000"},"110408","R LOPES","INOP",3,"T",28.31102,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","8","8",null,null,"EN",null,"110408",1,null,"IC 1",8668,8676,{"$raw":"00000000"},"110408","IC 1","OPER",1,"A",95.47225,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","8","8",null,null,"EN",null,"110408",1,null,"IC 1",8669,8677,{"$raw":"00000000"},"110408","IC 1","OPER",2,"A",61.57400,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8670,8678,{"$raw":"00000000"},"110409","MJ.3.5386","INOP",3,"T",48.16144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8671,8679,{"$raw":"00000000"},"110409","MJ.3.5387","INOP",3,"T",16.72227,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Rio","SD",null,null,null,null,null,"110409",1,null,null,8672,8680,{"$raw":"00000000"},"110409","MJ.3.5388","INOP",3,"T",4.93594,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8673,8681,{"$raw":"00000000"},"110409","MJ.3.5389","INOP",3,"T",1.55013,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8674,8682,{"$raw":"00000000"},"110407","MJ.3.5390","INOP",3,"T",2.14516,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8675,8683,{"$raw":"00000000"},"110409","MJ.1.180","OPER",1,"A",1.42302,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8676,8684,{"$raw":"00000000"},"110409","MJ.3.5391","INOP",3,"T",115.60518,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8677,8685,{"$raw":"00000000"},"110409","MJ.3.5392","INOP",3,"T",49.72661,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8678,8686,{"$raw":"00000000"},"110409","MJ.3.5393","INOP",3,"T",3.08016,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8679,8687,{"$raw":"00000000"},"110409","MJ.3.5394","INOP",3,"T",6.53508,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8680,8688,{"$raw":"00000000"},"110409","MJ.3.5395","INOP",3,"T",0.47518,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8681,8689,{"$raw":"00000000"},"110409","MJ.3.5396","INOP",3,"T",2.22009,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8682,8690,{"$raw":"00000000"},"110409","MJ.3.5397","INOP",3,"T",2.72017,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8683,8691,{"$raw":"00000000"},"110409","MJ.3.5398","INOP",3,"T",2.14009,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8684,8692,{"$raw":"00000000"},"110409","MJ.3.5399","INOP",3,"T",2.44002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8685,8693,{"$raw":"00000000"},"110409","MJ.3.5400","INOP",3,"T",4.40001,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8686,8694,{"$raw":"00000000"},"110409","MJ.3.5401","INOP",3,"T",2.31002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,"15/3/1999","R",null,"110402",1,null,"R 25 DE ABRIL",8687,8695,{"$raw":"00000000"},"110402","R 25 DE ABRIL","INOP",3,"T",140.59872,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MEIO",null,null,"R",null,"110405",1,null,"R DO MEIO",8688,8696,{"$raw":"00000000"},"110405","R DO MEIO","OPER",2,"A",29.37591,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",8689,8697,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",167.40779,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DA LIBERDADE",null,null,"R",null,"110405",1,null,"R DA LIBERDADE",8690,8698,{"$raw":"00000000"},"110405","R DA LIBERDADE","OPER",1,"A",62.82727,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCA F DE SOUSA",null,null,"R",null,"110403",1,null,"R FRANCISCA F DE SOUSA",8691,8699,{"$raw":"00000000"},"110403","R FRANCISCA F DE SOUSA","INOP",3,"T",16.16011,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS OFICINAS",null,null,"R",null,"110403",1,null,"R DAS OFICINAS",8692,8700,{"$raw":"00000000"},"110403","R DAS OFICINAS","INOP",3,"T",26.02909,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",8693,8701,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",211.21950,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAMEIRAS",null,null,"ESTR",null,"110409",1,null,"ESTR DAS LAMEIRAS",8694,8702,{"$raw":"00000000"},"110409","ESTR DAS LAMEIRAS","INOP",3,"T",302.41245,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS EUCALIPTOS",null,null,"R",null,null,0,null,"R DOS EUCALIPTOS",8695,8703,{"$raw":"00000000"},null,"R DOS EUCALIPTOS",null,{"$raw":"*****"},null,463.94126,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CONCELHO",null,null,"CSL",null,"110406",1,null,"CSL CONCELHO",8696,8704,{"$raw":"00000000"},"110406","CSL CONCELHO","INOP",3,"T",854.35828,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASARÃO",null,null,"R",null,"110406",1,null,"R CASARÃO",8697,8705,{"$raw":"00000000"},"110406","R CASARÃO","INOP",3,"A",168.04725,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE ANDRÉ",null,null,"R",null,"110404",1,null,"R DO VALE ANDRÉ",8698,8706,{"$raw":"00000000"},"110404","R DO VALE ANDRÉ","OPER",1,"A",114.10209,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS DE VENTO",null,null,"R",null,"110409",1,null,"R DOS MOINHOS DE VENTO",8699,8707,{"$raw":"00000000"},"110409","R DOS MOINHOS DE VENTO","INOP",3,"T",145.38496,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8700,8708,{"$raw":"00000000"},"110409","MJ.3.5402","INOP",3,"T",3.73086,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8701,8709,{"$raw":"00000000"},"110409","MJ.3.5403","INOP",3,"T",3.03059,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8702,8710,{"$raw":"00000000"},"110409","MJ.3.5404","INOP",3,"T",3.36073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8703,8711,{"$raw":"00000000"},"110409","MJ.3.5405","INOP",3,"T",2.73265,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8704,8712,{"$raw":"00000000"},"110409","MJ.3.5406","INOP",3,"T",268.12761,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8705,8713,{"$raw":"00000000"},"110409","MJ.3.5407","INOP",3,"T",56.31888,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8706,8714,{"$raw":"00000000"},"110406","MJ.3.5408","INOP",3,"T",6.47575,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8707,8715,{"$raw":"00000000"},"110406","MJ.3.5409","INOP",3,"T",55.20408,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Casarão",null,null,null,null,null,"110406",1,null,null,8708,8716,{"$raw":"00000000"},"110406","MJ.3.5410","INOP",3,"T",65.38360,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8709,8717,{"$raw":"00000000"},"110406","MJ.3.5411","INOP",3,"T",4.83576,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8710,8718,{"$raw":"00000000"},"110406","MJ.3.5412","INOP",3,"T",9.56128,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8711,8719,{"$raw":"00000000"},"110406","MJ.3.5413","INOP",3,"T",139.55841,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8712,8720,{"$raw":"00000000"},"110409","MJ.3.5414","INOP",3,"T",3.67404,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8713,8721,{"$raw":"00000000"},"110409","MJ.3.5415","INOP",3,"T",34.17161,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8714,8722,{"$raw":"00000000"},"110409","MJ.3.5416","INOP",3,"T",5.55296,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8715,8723,{"$raw":"00000000"},"110409","MJ.3.5417","INOP",3,"T",79.63735,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8716,8724,{"$raw":"00000000"},"110409","MJ.3.5418","INOP",3,"T",4.41698,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8717,8725,{"$raw":"00000000"},"110409","MJ.3.5419","INOP",3,"T",1.39667,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8718,8726,{"$raw":"00000000"},"110409","MJ.3.5420","INOP",3,"T",135.03380,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8719,8727,{"$raw":"00000000"},"110409","MJ.3.5421","INOP",3,"T",4.30202,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8720,8728,{"$raw":"00000000"},"110409","MJ.3.5422","INOP",3,"T",176.14989,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8721,8729,{"$raw":"00000000"},"110409","MJ.3.5423","INOP",3,"T",37.07494,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8722,8730,{"$raw":"00000000"},"110409","MJ.3.5424","INOP",3,"T",13.75832,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8723,8731,{"$raw":"00000000"},"110409","MJ.3.5425","INOP",3,"T",5.99801,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8724,8732,{"$raw":"00000000"},"110409","MJ.3.5426","INOP",3,"T",69.63725,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8725,8733,{"$raw":"00000000"},"110407","MJ.3.5427","INOP",3,"T",0.92022,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8726,8734,{"$raw":"00000000"},"110406","MJ.3.5428","INOP",3,"T",7.22250,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8727,8735,{"$raw":"00000000"},"110406","MJ.3.5429","INOP",3,"T",36.50849,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,8728,8736,{"$raw":"00000000"},"110406","MJ.3.5430","INOP",3,"T",56.36221,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,8729,8737,{"$raw":"00000000"},"110407","MJ.3.5431","INOP",3,"T",12.50521,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",2,null,null,8730,8738,{"$raw":"00000000"},"110407","MJ.3.5432","INOP",3,"T",183.59688,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",2,null,null,8731,8739,{"$raw":"00000000"},"110409","MJ.3.5433","INOP",3,"T",208.00200,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8732,8740,{"$raw":"00000000"},"110409","MJ.3.5434","INOP",3,"T",6.95208,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8733,8741,{"$raw":"00000000"},"110409","MJ.3.5435","INOP",3,"T",255.19797,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8734,8742,{"$raw":"00000000"},"110409","MJ.3.5436","INOP",3,"T",30.13559,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8735,8743,{"$raw":"00000000"},"110409","MJ.1.181","OPER",1,"A",3.40701,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8736,8744,{"$raw":"00000000"},"110409","MJ.1.182","OPER",1,"A",65.53339,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8737,8745,{"$raw":"00000000"},"110409","MJ.1.183","OPER",1,"A",58.98896,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8738,8746,{"$raw":"00000000"},"110409","MJ.3.5437","INOP",3,"T",8.34246,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8739,8747,{"$raw":"00000000"},"110409","MJ.3.5438","INOP",3,"T",0.38013,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8740,8748,{"$raw":"00000000"},"110409","MJ.3.5439","INOP",3,"T",89.26124,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8741,8749,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,293.34671,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8742,8750,{"$raw":"00000000"},"110409","MJ.3.5440","INOP",3,"T",2.44844,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8743,8751,{"$raw":"00000000"},"110409","MJ.3.5441","INOP",3,"T",0.36688,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8744,8752,{"$raw":"00000000"},"110409","MJ.3.5442","INOP",3,"T",4.67270,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8745,8753,{"$raw":"00000000"},"110409","MJ.3.5443","INOP",3,"T",307.63816,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8746,8754,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,23.91697,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8747,8755,{"$raw":"00000000"},"110407","MJ.3.5444","INOP",3,"T",10.59972,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8748,8756,{"$raw":"00000000"},"110407","MJ.3.5445","INOP",3,"T",25.29703,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8749,8757,{"$raw":"00000000"},"110407","MJ.3.5446","INOP",3,"T",4.39119,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8750,8758,{"$raw":"00000000"},"110409","MJ.3.5447","INOP",3,"T",1.37306,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8751,8759,{"$raw":"00000000"},"110407","MJ.3.5448","INOP",3,"T",22.30601,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALBERTINA MARQUES",null,null,"R",null,"110407",1,null,"R ALBERTINA MARQUES",8752,8760,{"$raw":"00000000"},"110407","R ALBERTINA MARQUES","INOP",3,"T",50.47095,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALBERTINA MARQUES",null,null,"R",null,"110407",1,null,"R ALBERTINA MARQUES",8753,8761,{"$raw":"00000000"},"110407","R ALBERTINA MARQUES","INOP",3,"T",11.52994,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS CAMÕES",null,null,"R",null,"110407",1,null,"R LUIS CAMÕES",8754,8762,{"$raw":"00000000"},"110407","R LUIS CAMÕES","INOP",3,"T",33.99639,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110407",1,null,"R DA ESPERANÇA",8755,8763,{"$raw":"00000000"},"110407","R DA ESPERANÇA","INOP",3,"T",40.29495,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110407",1,null,"R 1º DE DEZEMBRO",8756,8764,{"$raw":"00000000"},"110407","R 1º DE DEZEMBRO","INOP",3,"T",9.89177,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8757,8765,{"$raw":"00000000"},"110409","MJ.1.184","OPER",1,"A",131.64417,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8758,8766,{"$raw":"00000000"},"110409","MJ.3.5449","INOP",3,"T",219.87699,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8759,8767,{"$raw":"00000000"},"110409","MJ.3.5450","INOP",3,"T",265.39636,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8760,8768,{"$raw":"00000000"},"110409","MJ.3.5451","INOP",3,"T",7.42082,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8761,8769,{"$raw":"00000000"},"110409","MJ.3.5452","INOP",3,"T",93.47559,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8762,8770,{"$raw":"00000000"},"110409","MJ.3.5453","INOP",3,"T",1.09165,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8763,8771,{"$raw":"00000000"},"110409","MJ.3.5454","INOP",3,"T",57.31636,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110407",1,null,"R 1º DE DEZEMBRO",8764,8772,{"$raw":"00000000"},"110407","R 1º DE DEZEMBRO","INOP",3,"T",220.67300,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1021","1021",null,null,"CM",null,null,0,null,"CM 1021",8765,8773,{"$raw":"00000000"},null,"CM 1021",null,1,"A",63.90597,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8766,8774,{"$raw":"00000000"},"110409","MJ.3.5455","INOP",3,"T",310.98310,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"CASAL NOVO",null,null,"R",null,"110409",1,null,"R CASAL NOVO",8767,8775,{"$raw":"00000000"},"110409","R CASAL NOVO","INOP",3,"T",186.94234,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8768,8776,{"$raw":"00000000"},"110409","MJ.3.5456","INOP",3,"T",26.96405,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PEDRA",null,null,"ESTR",null,"110409",1,null,"ESTR DA PEDRA",8769,8777,{"$raw":"00000000"},"110409","ESTR DA PEDRA","OPER",1,"A",35.86294,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8770,8778,{"$raw":"00000000"},"110409","MJ.3.5457","INOP",3,"T",5.14493,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8771,8779,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,22.64816,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8772,8780,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,27.87866,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8773,8781,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,6.38001,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8774,8782,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,9.09950,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8775,8783,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.45734,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8776,8784,{"$raw":"00000000"},"110407","MJ.3.5458","INOP",3,"T",2.85701,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8777,8785,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.99722,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8778,8786,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,88.32896,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8779,8787,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,39.17585,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8780,8788,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.43938,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8781,8789,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,244.15849,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8782,8790,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.82099,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8783,8791,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,109.17010,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8784,8792,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,20.02653,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8785,8793,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.10813,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8786,8794,{"$raw":"00000000"},"110409","MJ.3.5459","INOP",3,"T",0.80505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8787,8795,{"$raw":"00000000"},"110409","MJ.1.185","OPER",1,"T",1.94250,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8788,8796,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.77582,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8789,8797,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.05682,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8790,8798,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,20.71795,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8791,8799,{"$raw":"00000000"},"110409","MJ.3.5460","INOP",3,"T",1.93039,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8792,8800,{"$raw":"00000000"},"110409","MJ.3.5461","INOP",3,"T",320.21791,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8793,8801,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.98346,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8794,8802,{"$raw":"00000000"},"110409","MJ.3.5462","INOP",3,"T",3.59084,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8795,8803,{"$raw":"00000000"},"110409","MJ.3.5463","INOP",3,"T",139.30279,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8796,8804,{"$raw":"00000000"},"110409","MJ.3.5464","INOP",3,"T",145.96172,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8797,8805,{"$raw":"00000000"},"110409","MJ.3.5465","INOP",3,"T",2.62427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8798,8806,{"$raw":"00000000"},"110409","MJ.1.186","OPER",1,"T",2.15615,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8799,8807,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.43695,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8800,8808,{"$raw":"00000000"},"110407","MJ.3.5466","INOP",3,"T",3.41248,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8801,8809,{"$raw":"00000000"},"110407","MJ.3.5467","INOP",3,"T",577.40341,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"EMILIA CONCEIÇÃO PEREIRA",null,null,"R",null,"110409",1,null,"R EMILIA CONCEIÇÃO PEREIRA",8802,8810,{"$raw":"00000000"},"110409","R EMILIA CONCEIÇÃO PEREIRA","INOP",3,"T",29.02087,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8803,8811,{"$raw":"00000000"},"110409","MJ.3.5468","INOP",3,"T",28.96659,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8804,8812,{"$raw":"00000000"},"110409","MJ.3.5469","INOP",3,"T",14.40217,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8805,8813,{"$raw":"00000000"},"110407","MJ.3.5470","INOP",3,"T",132.21137,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8806,8814,{"$raw":"00000000"},"110407","MJ.3.5471","INOP",3,"T",291.59714,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8807,8815,{"$raw":"00000000"},"110407","MJ.3.5472","INOP",3,"A",3.31187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8808,8816,{"$raw":"00000000"},"110409","MJ.3.5473","INOP",3,"T",370.46859,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",2,null,null,8809,8817,{"$raw":"00000000"},"110409","MJ.3.5474","INOP",3,"T",359.86625,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8810,8818,{"$raw":"00000000"},"110409","MJ.3.5475","INOP",3,"T",302.84744,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8811,8819,{"$raw":"00000000"},"110409","MJ.3.5476","INOP",3,"T",1005.29387,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","SÃO JOSÉ",null,null,"R",null,"110409",1,null,"R SÃO JOSÉ",8812,8820,{"$raw":"00000000"},"110409","R SÃO JOSÉ","OPER",1,"T",46.15195,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","SÃO JOSÉ",null,null,"R",null,"110409",1,null,"R SÃO JOSÉ",8813,8821,{"$raw":"00000000"},"110409","R SÃO JOSÉ","OPER",1,"T",100.88970,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SÃO JOSÉ",null,null,"R",null,"110409",1,null,"R SÃO JOSÉ",8814,8822,{"$raw":"00000000"},"110409","R SÃO JOSÉ","INOP",3,"T",12.01918,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",2,null,null,8815,8823,{"$raw":"00000000"},"110409","MJ.3.5477","INOP",3,"T",193.81948,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",2,null,null,8816,8824,{"$raw":"00000000"},"110409","MJ.3.5478","INOP",3,"T",330.80107,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",3,null,null,8817,8825,{"$raw":"00000000"},"110409","MJ.3.5479","INOP",3,"T",408.77109,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8818,8826,{"$raw":"00000000"},"110406","MJ.3.5480","INOP",3,"T",11.25991,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA GAGA",null,"SIM","ESTR",null,"110407",1,null,"ESTR DA GAGA",8819,8827,{"$raw":"00000000"},"110407","ESTR DA GAGA","INOP",3,"T",362.41005,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","S PEDRO",null,null,"BR",null,"110409",1,null,"BR S PEDRO",8820,8828,{"$raw":"00000000"},"110409","BR S PEDRO","OPER",1,"A",86.18574,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8821,8829,{"$raw":"00000000"},"110406","MJ.3.5481","INOP",3,"T",158.32899,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8822,8830,{"$raw":"00000000"},"110406","MJ.3.5482","INOP",3,"T",24.26420,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CONCELHO",null,null,"CSL",null,"110406",1,null,"CSL CONCELHO",8823,8831,{"$raw":"00000000"},"110406","CSL CONCELHO","INOP",3,"T",323.33218,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8824,8832,{"$raw":"00000000"},"110406","MJ.3.5483","INOP",3,"T",63.98665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1023","DAS LAMEIRAS",null,null,"ESTR",null,"110409",1,null,"ESTR DAS LAMEIRAS",8825,8833,{"$raw":"00000000"},"110409","ESTR DAS LAMEIRAS","OPER",2,"T",6.67205,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8826,8834,{"$raw":"00000000"},"110409","MJ.3.5484","INOP",3,"T",52.96666,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8827,8835,{"$raw":"00000000"},"110409","MJ.3.5485","INOP",3,"T",58.53788,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8828,8836,{"$raw":"00000000"},"110409","MJ.3.5486","INOP",3,"T",152.32169,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8829,8837,{"$raw":"00000000"},"110407","MJ.3.5487","INOP",3,"T",154.68726,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8830,8838,{"$raw":"00000000"},"110407","MJ.3.5488","INOP",3,"T",14.33128,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8831,8839,{"$raw":"00000000"},"110407","MJ.3.5489","INOP",3,"A",1.69012,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8832,8840,{"$raw":"00000000"},"110407","MJ.3.5490","INOP",3,"T",120.87780,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,8833,8841,{"$raw":"00000000"},"110407","MJ.3.5491","INOP",3,"T",3.12360,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8834,8842,{"$raw":"00000000"},"110409","MJ.3.5492","INOP",3,"T",203.88696,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE MACEIRA",null,"14/06/2005","R",null,"110409",1,null,"R DO VALE MACEIRA",8835,8843,{"$raw":"00000000"},"110409","R DO VALE MACEIRA","INOP",3,"T",48.32179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8836,8844,{"$raw":"00000000"},"110409","MJ.3.5493","INOP",3,"T",39.49302,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8837,8845,{"$raw":"00000000"},"110409","MJ.3.5494","INOP",3,"T",82.05666,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8838,8846,{"$raw":"00000000"},"110409","MJ.3.5495","INOP",3,"T",85.34566,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8839,8847,{"$raw":"00000000"},"110407","MJ.3.5496","INOP",3,"T",115.46171,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",1,null,null,8840,8848,{"$raw":"00000000"},"110404","MJ.3.5497","INOP",3,"T",148.45865,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8841,8849,{"$raw":"00000000"},"110407","MJ.3.5498","INOP",3,"T",63.67970,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",1,null,null,8842,8850,{"$raw":"00000000"},"110404","MJ.3.5499","INOP",3,"T",195.54661,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8843,8851,{"$raw":"00000000"},"110407","MJ.3.5500","INOP",3,"T",241.65433,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8844,8852,{"$raw":"00000000"},"110407","MJ.3.5501","INOP",3,"T",436.88114,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8845,8853,{"$raw":"00000000"},"110407","MJ.3.5502","INOP",3,"T",116.73141,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,8846,8854,{"$raw":"00000000"},"110404","MJ.3.5503","INOP",3,"T",235.78275,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110406",1,null,null,8847,8855,{"$raw":"00000000"},"110406","MJ.3.5504","INOP",3,"T",144.80918,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8848,8856,{"$raw":"00000000"},"110407","MJ.3.5505","INOP",3,"T",171.46340,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8849,8857,{"$raw":"00000000"},"110407","MJ.3.5506","INOP",3,"T",7.31840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8850,8858,{"$raw":"00000000"},"110407","MJ.3.5507","INOP",3,"T",259.29682,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8851,8859,{"$raw":"00000000"},"110407","MJ.3.5508","INOP",3,"T",167.38034,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,8852,8860,{"$raw":"00000000"},"110407","MJ.3.5509","INOP",3,"T",345.16355,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8853,8861,{"$raw":"00000000"},"110406","MJ.3.5510","INOP",3,"T",125.75844,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,8854,8862,{"$raw":"00000000"},"110404","MJ.3.5511","INOP",3,"T",35.88113,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8855,8863,{"$raw":"00000000"},"110407","MJ.3.5512","INOP",3,"T",226.88873,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8856,8864,{"$raw":"00000000"},"110407","MJ.3.5513","INOP",3,"T",43.04767,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",2,null,null,8857,8865,{"$raw":"00000000"},"110407","MJ.3.5514","INOP",3,"T",319.97428,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,8858,8866,{"$raw":"00000000"},"110404","MJ.3.5515","INOP",3,"T",75.13428,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8859,8867,{"$raw":"00000000"},"110407","MJ.3.5516","INOP",3,"T",97.63502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8860,8868,{"$raw":"00000000"},"110407","MJ.3.5517","INOP",3,"T",155.18749,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","Concelho",null,null,null,null,null,"110406",1,null,null,8861,8869,{"$raw":"00000000"},"110406","MJ.3.5518","INOP",3,"T",289.96158,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8862,8870,{"$raw":"00000000"},"110407","MJ.3.5519","INOP",3,"T",299.11227,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8863,8871,{"$raw":"00000000"},"110406","MJ.3.5520","INOP",3,"T",173.23701,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",2,null,null,8864,8872,{"$raw":"00000000"},"110404","MJ.3.5521","INOP",3,"T",494.08224,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8865,8873,{"$raw":"00000000"},"110407","MJ.3.5522","INOP",3,"T",234.81190,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8866,8874,{"$raw":"00000000"},"110406","MJ.3.5523","INOP",3,"T",284.98996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8867,8875,{"$raw":"00000000"},"110407","MJ.3.5524","INOP",3,"T",321.63051,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8868,8876,{"$raw":"00000000"},"110407","MJ.3.5525","INOP",3,"T",761.23193,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8869,8877,{"$raw":"00000000"},"110406","MJ.3.5526","INOP",3,"T",502.19195,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CONCELHO",null,null,"CSL",null,"110406",1,null,"CSL CONCELHO",8870,8878,{"$raw":"00000000"},"110406","CSL CONCELHO","INOP",3,"T",215.03046,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8871,8879,{"$raw":"00000000"},"110407","MJ.3.5527","INOP",3,"T",314.74615,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8872,8880,{"$raw":"00000000"},"110407","MJ.3.5528","INOP",3,"T",166.72619,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,8873,8881,{"$raw":"00000000"},"110406","MJ.3.5529","INOP",3,"T",548.94910,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"PRINCIPAL","SGD nº 6395/2009 - R DA ABOBOREIRA","21 Julho 2009","R",null,"110406",1,null,"R PRINCIPAL",8874,8882,{"$raw":"00000000"},"110406","R PRINCIPAL","INOP",3,"T",367.41979,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8875,8883,{"$raw":"00000000"},"110407","MJ.3.5530","INOP",3,"T",322.54301,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8876,8884,{"$raw":"00000000"},"110406","MJ.3.5531","INOP",3,"T",552.44579,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,8877,8885,{"$raw":"00000000"},"110407","MJ.3.5532","INOP",3,"T",778.72867,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8878,8886,{"$raw":"00000000"},"110409","MJ.3.5533","INOP",3,"T",306.08758,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,8879,8887,{"$raw":"00000000"},"110406","MJ.3.5534","INOP",3,"T",273.32050,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8880,8888,{"$raw":"00000000"},"110406","MJ.3.5535","INOP",3,"T",534.44870,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8881,8889,{"$raw":"00000000"},"110409","MJ.3.5536","INOP",3,"T",163.95352,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8882,8890,{"$raw":"00000000"},"110409","MJ.3.5537","INOP",3,"T",526.53671,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8883,8891,{"$raw":"00000000"},"110407","MJ.3.5538","INOP",3,"T",192.42761,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",2,null,null,8884,8892,{"$raw":"00000000"},"110409","MJ.3.5539","INOP",3,"T",135.35569,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8885,8893,{"$raw":"00000000"},"110409","MJ.3.5540","INOP",3,"T",308.06221,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8886,8894,{"$raw":"00000000"},"110407","MJ.3.5541","INOP",3,"T",495.17665,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE SANTO ESTEVÃO",null,null,"R",null,"110407",1,null,"R DE SANTO ESTEVÃO",8887,8895,{"$raw":"00000000"},"110407","R DE SANTO ESTEVÃO","INOP",3,"T",46.83300,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CANCELEIRO",null,null,"TV",null,"110409",1,null,"TV CANCELEIRO",8888,8896,{"$raw":"00000000"},"110409","TV CANCELEIRO","INOP",3,"T",247.84932,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS COMBATENTES DA GUERRA DO ULTRAMAR",null,null,"R",null,"110409",1,null,"R DOS COMBATENTES DA GUERRA DO ULTRAMAR",8889,8897,{"$raw":"00000000"},"110409","R DOS COMBATENTES DA GUERRA DO ULTRAMAR","INOP",3,"T",34.58243,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8890,8898,{"$raw":"00000000"},"110407","MJ.3.5542","INOP",3,"T",312.20880,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8891,8899,{"$raw":"00000000"},"110406","MJ.3.5543","INOP",3,"T",301.08849,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,8892,8900,{"$raw":"00000000"},"110406","MJ.3.5544","INOP",3,"T",565.63462,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8893,8901,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,619.48911,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8894,8902,{"$raw":"00000000"},"110409","MJ.3.5545","INOP",3,"T",209.69567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8895,8903,{"$raw":"00000000"},"110409","MJ.3.5546","INOP",3,"T",580.83104,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",2,null,null,8896,8904,{"$raw":"00000000"},"110409","MJ.3.5547","INOP",3,"T",453.48659,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8897,8905,{"$raw":"00000000"},"110407","MJ.3.5548","INOP",3,"T",111.53929,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,8898,8906,{"$raw":"00000000"},"110407","MJ.3.5549","INOP",3,"T",176.87999,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8899,8907,{"$raw":"00000000"},"110409","MJ.3.5550","INOP",3,"T",112.23747,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS COMBATENTES DA GUERRA DE 1914",null,null,"R",null,"110409",1,null,"R DOS COMBATENTES DA GUERRA DE 1914",8900,8908,{"$raw":"00000000"},"110409","R DOS COMBATENTES DA GUERRA DE 1914","INOP",3,"T",182.91298,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8901,8909,{"$raw":"00000000"},"110409","MJ.3.5551","INOP",3,"T",222.31975,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8902,8910,{"$raw":"00000000"},"110409","MJ.3.5552","INOP",3,"T",233.87462,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8903,8911,{"$raw":"00000000"},"110409","MJ.3.5553","INOP",3,"T",411.56564,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,8904,8912,{"$raw":"00000000"},"110407","MJ.3.5554","INOP",3,"T",85.59497,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8905,8913,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,242.87505,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8906,8914,{"$raw":"00000000"},"110409","MJ.3.5555","INOP",3,"T",40.31532,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8907,8915,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,91.61817,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8908,8916,{"$raw":"00000000"},"110409","MJ.3.5556","INOP",3,"T",316.78189,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8909,8917,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,246.86577,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8910,8918,{"$raw":"00000000"},"110409","MJ.3.5557","INOP",3,"T",131.63352,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8911,8919,{"$raw":"00000000"},"110409","MJ.3.5558","INOP",3,"T",8.84686,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8912,8920,{"$raw":"00000000"},"110409","MJ.3.5559","INOP",3,"T",582.87533,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8913,8921,{"$raw":"00000000"},"110409","MJ.3.5560","INOP",3,"T",118.94410,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE DE CAVALOS",null,null,"R",null,"110409",1,null,"R VALE DE CAVALOS",8914,8922,{"$raw":"00000000"},"110409","R VALE DE CAVALOS","INOP",3,"T",327.44764,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8915,8923,{"$raw":"00000000"},"110409","MJ.3.5561","INOP",3,"T",50.84177,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8916,8924,{"$raw":"00000000"},"110409","MJ.3.5562","INOP",3,"T",929.71745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110409",1,null,"R DA FONTE",8917,8925,{"$raw":"00000000"},"110409","R DA FONTE","INOP",3,"T",267.75823,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8918,8926,{"$raw":"00000000"},"110409","MJ.3.5563","INOP",3,"T",339.55468,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8919,8927,{"$raw":"00000000"},"110409","MJ.3.5564","INOP",3,"A",340.16058,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8920,8928,{"$raw":"00000000"},"110409","MJ.3.5565","INOP",3,"T",390.24462,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8921,8929,{"$raw":"00000000"},"110409","MJ.3.5566","INOP",3,"T",212.87217,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8922,8930,{"$raw":"00000000"},"110409","MJ.3.5567","INOP",3,"T",521.08247,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8923,8931,{"$raw":"00000000"},"110409","MJ.3.5568","INOP",3,"T",721.40784,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CSL DO ROQUE",null,null,"R",null,"110409",1,null,"R CSL DO ROQUE",8924,8932,{"$raw":"00000000"},"110409","R CSL DO ROQUE","INOP",3,"T",148.06263,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8925,8933,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,384.37212,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8926,8934,{"$raw":"00000000"},"110409","MJ.3.5569","INOP",3,"T",282.86938,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8927,8935,{"$raw":"00000000"},"110409","MJ.3.5570","INOP",3,"T",163.04285,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8928,8936,{"$raw":"00000000"},"110409","MJ.3.5571","INOP",3,"T",217.27581,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8929,8937,{"$raw":"00000000"},"110409","MJ.3.5572","INOP",3,"T",56.50716,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8930,8938,{"$raw":"00000000"},"110409","MJ.3.5573","INOP",3,"T",218.16189,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8931,8939,{"$raw":"00000000"},"110409","MJ.3.5574","INOP",3,"T",278.94920,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8932,8940,{"$raw":"00000000"},"110409","MJ.3.5575","INOP",3,"T",216.64257,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8933,8941,{"$raw":"00000000"},"110409","MJ.3.5576","INOP",3,"T",126.49335,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8934,8942,{"$raw":"00000000"},"110409","MJ.2.370","OPER",2,"A",355.15267,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8935,8943,{"$raw":"00000000"},"110409","MJ.3.5577","INOP",3,"T",87.44843,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8936,8944,{"$raw":"00000000"},"110409","MJ.3.5578","INOP",3,"T",89.18775,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8937,8945,{"$raw":"00000000"},"110409","MJ.3.5579","INOP",3,"T",109.27526,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8938,8946,{"$raw":"00000000"},"110409","MJ.3.5580","INOP",3,"T",243.03843,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8939,8947,{"$raw":"00000000"},"110409","MJ.3.5581","INOP",3,"T",343.22223,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8940,8948,{"$raw":"00000000"},"110409","MJ.3.5582","INOP",3,"T",373.60744,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8941,8949,{"$raw":"00000000"},"110409","MJ.3.5583","INOP",3,"T",296.76543,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8942,8950,{"$raw":"00000000"},"110409","MJ.3.5584","INOP",3,"T",253.86632,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8943,8951,{"$raw":"00000000"},"110409","MJ.3.5585","INOP",3,"T",85.33237,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8944,8952,{"$raw":"00000000"},"110409","MJ.3.5586","INOP",3,"T",263.11538,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8945,8953,{"$raw":"00000000"},"110409","MJ.3.5587","INOP",3,"T",75.36665,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8946,8954,{"$raw":"00000000"},"110409","MJ.3.5588","INOP",3,"T",159.86298,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8947,8955,{"$raw":"00000000"},"110409","MJ.3.5589","INOP",3,"T",362.89610,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8948,8956,{"$raw":"00000000"},"110409","MJ.3.5590","INOP",3,"T",182.47215,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8949,8957,{"$raw":"00000000"},"110409","MJ.3.5591","INOP",3,"T",78.14749,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8950,8958,{"$raw":"00000000"},"110409","MJ.3.5592","INOP",3,"T",158.00201,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8951,8959,{"$raw":"00000000"},"110409","MJ.3.5593","INOP",3,"T",579.80465,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8952,8960,{"$raw":"00000000"},"110409","MJ.3.5594","INOP",3,"T",173.26675,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8953,8961,{"$raw":"00000000"},"110409","MJ.3.5595","INOP",3,"T",426.38384,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8954,8962,{"$raw":"00000000"},"110409","MJ.3.5596","INOP",3,"T",229.00848,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8955,8963,{"$raw":"00000000"},"110409","MJ.3.5597","INOP",3,"T",188.60242,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8956,8964,{"$raw":"00000000"},"110409","MJ.3.5598","INOP",3,"T",225.64738,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8957,8965,{"$raw":"00000000"},"110409","MJ.3.5599","INOP",3,"T",222.75524,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8958,8966,{"$raw":"00000000"},"110409","MJ.3.5600","INOP",3,"T",137.57811,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8959,8967,{"$raw":"00000000"},"110409","MJ.3.5601","INOP",3,"T",483.71061,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8960,8968,{"$raw":"00000000"},"110409","MJ.3.5602","INOP",3,"T",89.91393,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8961,8969,{"$raw":"00000000"},"110409","MJ.3.5603","INOP",3,"T",106.46211,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCO NUNES DA COSTA",null,null,"R",null,"110409",1,null,"R FRANCISCO NUNES DA COSTA",8962,8970,{"$raw":"00000000"},"110409","R FRANCISCO NUNES DA COSTA","INOP",3,"T",119.11757,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8963,8971,{"$raw":"00000000"},"110409","MJ.3.5604","INOP",3,"T",240.15434,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8964,8972,{"$raw":"00000000"},"110409","MJ.3.5605","INOP",3,"T",126.08592,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8965,8973,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,220.76797,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,8966,8974,{"$raw":"00000000"},"110409","MJ.3.5606","INOP",3,"T",152.16081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8967,8975,{"$raw":"00000000"},"110409","MJ.3.5607","INOP",3,"T",235.96893,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8968,8976,{"$raw":"00000000"},"110409","MJ.3.5608","INOP",3,"T",506.45853,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8969,8977,{"$raw":"00000000"},"110409","MJ.3.5609","INOP",3,"T",276.86818,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8970,8978,{"$raw":"00000000"},"110409","MJ.3.5610","INOP",3,"T",394.99049,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8971,8979,{"$raw":"00000000"},"110409","MJ.1.187","OPER",1,"T",211.91796,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8972,8980,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,383.21870,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","Pinheiro",null,null,null,null,null,"110409",1,null,null,8973,8981,{"$raw":"00000000"},"110409","MJ.3.5611","INOP",3,"T",196.98979,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8974,8982,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,297.04529,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8975,8983,{"$raw":"00000000"},"110409","MJ.3.5612","INOP",3,"T",195.63914,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8976,8984,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,479.65939,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8977,8985,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,221.61811,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8978,8986,{"$raw":"00000000"},"110409","MJ.3.5613","INOP",3,"T",133.34773,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8979,8987,{"$raw":"00000000"},"110409","MJ.3.5614","INOP",3,"T",73.22745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8980,8988,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,286.41526,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8981,8989,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,159.46227,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8982,8990,{"$raw":"00000000"},"110409","MJ.3.5615","INOP",3,"T",239.25623,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8983,8991,{"$raw":"00000000"},"110409","MJ.3.5616","INOP",3,"T",231.28067,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8984,8992,{"$raw":"00000000"},"110409","MJ.3.5617","INOP",3,"T",250.25157,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8985,8993,{"$raw":"00000000"},"110409","MJ.3.5618","INOP",3,"T",236.45824,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8986,8994,{"$raw":"00000000"},"110409","MJ.3.5619","INOP",3,"T",182.79080,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8987,8995,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,427.06639,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA COSTA","Dúvidas se poderá ser Estrada em vez de Rua","14/06/2005","R",null,"110409",1,null,"R DA COSTA",8988,8996,{"$raw":"00000000"},"110409","R DA COSTA","INOP",3,"T",118.46425,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8989,8997,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,120.76139,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8990,8998,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,65.60058,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,8991,8999,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.38708,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8992,9000,{"$raw":"00000000"},"110409","MJ.3.5620","INOP",3,"T",113.96598,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8993,9001,{"$raw":"00000000"},"110409","MJ.3.5621","INOP",3,"T",83.60746,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8994,9002,{"$raw":"00000000"},"110409","MJ.3.5622","INOP",3,"T",576.23548,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8995,9003,{"$raw":"00000000"},"110409","MJ.1.188","OPER",1,"A",117.47653,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8996,9004,{"$raw":"00000000"},"110409","MJ.3.5623","INOP",3,"T",399.73676,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8997,9005,{"$raw":"00000000"},"110409","MJ.3.5624","INOP",3,"T",232.46898,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8998,9006,{"$raw":"00000000"},"110409","MJ.3.5625","INOP",3,"T",59.55523,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,8999,9007,{"$raw":"00000000"},"110409","MJ.3.5626","INOP",3,"T",122.30671,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9000,9008,{"$raw":"00000000"},"110409","MJ.3.5627","INOP",3,"T",224.71561,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9001,9009,{"$raw":"00000000"},"110409","MJ.3.5628","INOP",3,"T",195.27148,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9002,9010,{"$raw":"00000000"},"110409","MJ.3.5629","INOP",3,"T",262.02484,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9003,9011,{"$raw":"00000000"},"110409","MJ.1.189","OPER",1,"A",49.78575,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9004,9012,{"$raw":"00000000"},"110409","MJ.3.5630","INOP",3,"T",207.12696,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9005,9013,{"$raw":"00000000"},"110409","MJ.3.5631","INOP",3,"T",86.53308,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9006,9014,{"$raw":"00000000"},"110409","MJ.3.5632","INOP",3,"T",239.54281,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9007,9015,{"$raw":"00000000"},null,"MJ.3.5633",null,3,"T",38.29387,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
[null,"R","DO LAGAR",null,null,null,null,null,"110409",1,null,"R DO LAGAR",9008,9016,{"$raw":"00000000"},"110409","R DO LAGAR","INOP",3,"T",147.84193,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,9009,9017,{"$raw":"00000000"},"110402","MJ.3.5634","INOP",3,"T",239.67216,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9010,9018,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,577.00378,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9011,9019,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,478.43377,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9012,9020,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,408.68103,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9013,9021,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,530.73125,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9014,9022,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,300.90674,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9015,9023,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,6.94119,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9016,9024,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,658.79120,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9017,9025,{"$raw":"00000000"},"110406","MJ.3.5635","INOP",3,"T",117.10860,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9018,9026,{"$raw":"00000000"},"110406","MJ.3.5636","INOP",3,"T",14.94201,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9019,9027,{"$raw":"00000000"},"110409","MJ.3.5637","INOP",3,"T",69.61661,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9020,9028,{"$raw":"00000000"},"110409","MJ.3.5638","INOP",3,"T",88.35103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",2,null,null,9021,9029,{"$raw":"00000000"},"110407","MJ.3.5639","INOP",3,"T",70.88910,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9022,9030,{"$raw":"00000000"},"110407","MJ.3.5640","INOP",3,"T",67.09553,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,9023,9031,{"$raw":"00000000"},"110407","MJ.3.5641","INOP",3,"T",62.40361,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9024,9032,{"$raw":"00000000"},"110409","MJ.3.5642","INOP",3,"T",176.68190,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9025,9033,{"$raw":"00000000"},"110409","MJ.1.190","OPER",1,"A",4.16310,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9026,9034,{"$raw":"00000000"},"110409","MJ.3.5643","INOP",3,"T",291.05942,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,9027,9035,{"$raw":"00000000"},"110402","MJ.3.5644","INOP",3,"T",60.77781,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,9028,9036,{"$raw":"00000000"},"110402","MJ.3.5645","INOP",3,"T",15.03537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS COMBATENTES DA GUERRA DE 1914",null,null,"R",null,"110409",1,null,"R DOS COMBATENTES DA GUERRA DE 1914",9029,9037,{"$raw":"00000000"},"110409","R DOS COMBATENTES DA GUERRA DE 1914","INOP",3,"T",11.95060,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS COMBATENTES DA GUERRA DE 1914",null,null,"R",null,"110409",1,null,"R DOS COMBATENTES DA GUERRA DE 1914",9030,9038,{"$raw":"00000000"},"110409","R DOS COMBATENTES DA GUERRA DE 1914","INOP",3,"T",29.05513,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9031,9039,{"$raw":"00000000"},"110409","MJ.3.5646","INOP",3,"T",117.34354,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9032,9040,{"$raw":"00000000"},"110409","MJ.3.5647","INOP",3,"T",103.77675,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9033,9041,{"$raw":"00000000"},"110409","MJ.3.5648","INOP",3,"T",26.16263,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9034,9042,{"$raw":"00000000"},"110409","MJ.3.5649","INOP",3,"T",19.88158,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9035,9043,{"$raw":"00000000"},"110407","MJ.3.5650","INOP",3,"T",2.17083,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9036,9044,{"$raw":"00000000"},"110407","MJ.3.5651","INOP",3,"T",375.52372,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9037,9045,{"$raw":"00000000"},"110407","MJ.1.191","OPER",1,"A",2.84524,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9038,9046,{"$raw":"00000000"},"110407","MJ.3.5652","INOP",3,"T",30.68063,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9039,9047,{"$raw":"00000000"},"110407","MJ.1.192","OPER",1,"A",2.41448,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9040,9048,{"$raw":"00000000"},"110407","MJ.1.193","OPER",1,"A",2.21775,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9041,9049,{"$raw":"00000000"},"110407","MJ.3.5653","INOP",3,"T",49.93330,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9042,9050,{"$raw":"00000000"},"110407","MJ.3.5654","INOP",3,"T",3.62105,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9043,9051,{"$raw":"00000000"},"110407","MJ.3.5655","INOP",3,"T",2.00422,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9044,9052,{"$raw":"00000000"},"110407","MJ.3.5656","INOP",3,"T",71.34161,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9045,9053,{"$raw":"00000000"},"110407","MJ.3.5657","INOP",3,"T",2.21145,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9046,9054,{"$raw":"00000000"},"110407","MJ.3.5658","INOP",3,"T",2.30341,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9047,9055,{"$raw":"00000000"},"110407","MJ.3.5659","INOP",3,"T",3.48168,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9048,9056,{"$raw":"00000000"},"110407","MJ.3.5660","INOP",3,"T",153.74009,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAIS DO ENTRUDO","SGD nº 1728, 28 fev 2011","29 Março 2011","ESTR",null,"110407",1,null,"ESTR CASAIS DO ENTRUDO",9049,9057,{"$raw":"00000000"},"110407","ESTR CASAIS DO ENTRUDO","INOP",3,"T",21.88245,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9050,9058,{"$raw":"00000000"},"110404","MJ.3.5661","INOP",3,"T",22.75503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9051,9059,{"$raw":"00000000"},"110404","MJ.3.5662","INOP",3,"T",10.48961,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9052,9060,{"$raw":"00000000"},"110404","MJ.3.5663","INOP",3,"T",20.35683,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE ANDRÉ",null,null,"R",null,"110404",1,null,"R DO VALE ANDRÉ",9053,9061,{"$raw":"00000000"},"110404","R DO VALE ANDRÉ","INOP",3,"T",80.40834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R","Vale Andre",null,null,null,null,null,"110404",1,null,null,9054,9062,{"$raw":"00000000"},"110404","MJ.3.5664","INOP",3,"T",52.54896,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9055,9063,{"$raw":"00000000"},"110404","MJ.3.5665","INOP",3,"T",44.93774,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9056,9064,{"$raw":"00000000"},"110404","MJ.3.5666","INOP",3,"T",113.95368,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9057,9065,{"$raw":"00000000"},"110404","MJ.3.5667","INOP",3,"T",81.88118,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9058,9066,{"$raw":"00000000"},"110404","MJ.3.5668","INOP",3,"T",72.38881,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9059,9067,{"$raw":"00000000"},"110407","MJ.3.5669","INOP",3,"T",19.03067,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9060,9068,{"$raw":"00000000"},"110407","MJ.3.5670","INOP",3,"T",12.41714,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9061,9069,{"$raw":"00000000"},"110407","MJ.3.5671","INOP",3,"T",28.11808,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9062,9070,{"$raw":"00000000"},"110407","MJ.2.371","OPER",2,"A",2.62122,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9063,9071,{"$raw":"00000000"},"110407","MJ.3.5672","INOP",3,"T",50.36463,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,9064,9072,{"$raw":"00000000"},"110407","MJ.3.5673","INOP",3,"T",2.73695,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9065,9073,{"$raw":"00000000"},"110404","MJ.3.5674","INOP",3,"T",3.62012,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9066,9074,{"$raw":"00000000"},"110406","MJ.3.5675","INOP",3,"T",1.17175,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","SD",null,null,null,null,null,null,"110406",1,null,null,9067,9075,{"$raw":"00000000"},"110406","MJ.3.5676","INOP",3,"T",276.72174,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9068,9076,{"$raw":"00000000"},"110406","MJ.3.5677","INOP",3,"T",198.24248,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9069,9077,{"$raw":"00000000"},"110406","MJ.3.5678","INOP",3,"T",141.57964,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9070,9078,{"$raw":"00000000"},"110406","MJ.3.5679","INOP",3,"T",83.09844,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9071,9079,{"$raw":"00000000"},"110409","MJ.3.5680","INOP",3,"T",3.31803,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",3,null,null,9072,9080,{"$raw":"00000000"},"110409","MJ.3.5681","INOP",3,"T",240.41094,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",2,null,null,9073,9081,{"$raw":"00000000"},"110404","MJ.3.5682","INOP",3,"T",45.13481,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,9074,9082,{"$raw":"00000000"},"110406","MJ.3.5683","INOP",3,"T",47.37889,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9075,9083,{"$raw":"00000000"},"110404","MJ.3.5684","INOP",3,"T",61.33812,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9076,9084,{"$raw":"00000000"},"110404","MJ.3.5685","INOP",3,"T",4.08179,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9077,9085,{"$raw":"00000000"},"110404","MJ.3.5686","INOP",3,"T",54.15971,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",1,null,null,9078,9086,{"$raw":"00000000"},"110404","MJ.3.5687","INOP",3,"T",83.55123,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",1,null,null,9079,9087,{"$raw":"00000000"},"110404","MJ.3.5688","INOP",3,"T",69.36063,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9080,9088,{"$raw":"00000000"},"110404","MJ.3.5689","INOP",3,"T",64.00127,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110404",1,null,null,9081,9089,{"$raw":"00000000"},"110404","MJ.3.5690","INOP",3,"T",190.32740,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9082,9090,{"$raw":"00000000"},"110404","MJ.1.194","OPER",1,"A",3.01325,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9083,9091,{"$raw":"00000000"},"110404","MJ.3.5691","INOP",3,"T",50.99015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110404",1,null,null,9084,9092,{"$raw":"00000000"},"110404","MJ.1.195","OPER",1,"A",3.94143,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CONCELHO",null,null,"CSL",null,"110406",1,null,"CSL CONCELHO",9085,9093,{"$raw":"00000000"},"110406","CSL CONCELHO","INOP",3,"T",243.21995,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",9086,9094,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",92.33442,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE ANDRÉ",null,null,"R",null,"110404",1,null,"R DO VALE ANDRÉ",9087,9095,{"$raw":"00000000"},"110404","R DO VALE ANDRÉ","OPER",2,"A",70.85790,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE QUINTA S LOURENÇO",null,null,"TV",null,"110409",1,null,"TV DE QUINTA S LOURENÇO",9088,9096,{"$raw":"00000000"},"110409","TV DE QUINTA S LOURENÇO","INOP",3,"T",417.16308,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9089,9097,{"$raw":"00000000"},"110407","MJ.3.5692","INOP",3,"A",136.50275,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BAIRRO DA EIRA",null,null,"R",null,"110407",1,null,"R DO BAIRRO DA EIRA",9090,9098,{"$raw":"00000000"},"110407","R DO BAIRRO DA EIRA","INOP",3,"T",84.79568,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9091,9099,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",313.66243,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9092,9100,{"$raw":"00000000"},"110406","MJ.3.5693","INOP",3,"T",54.87163,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9093,9101,{"$raw":"00000000"},"110406","MJ.3.5694","INOP",3,"T",2.58436,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9094,9102,{"$raw":"00000000"},"110406","MJ.3.5695","INOP",3,"T",47.88146,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9095,9103,{"$raw":"00000000"},"110406","MJ.1.196","OPER",1,"A",3.49857,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9096,9104,{"$raw":"00000000"},"110406","MJ.3.5696","INOP",3,"T",21.84559,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9097,9105,{"$raw":"00000000"},"110406","MJ.3.5697","INOP",3,"T",46.23634,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9098,9106,{"$raw":"00000000"},"110406","MJ.3.5698","INOP",3,"T",2.68002,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9099,9107,{"$raw":"00000000"},"110406","MJ.3.5699","INOP",3,"T",71.92884,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9100,9108,{"$raw":"00000000"},"110406","MJ.3.5700","INOP",3,"T",84.03015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9101,9109,{"$raw":"00000000"},"110406","MJ.1.197","OPER",1,"A",3.88068,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9102,9110,{"$raw":"00000000"},"110406","MJ.3.5701","INOP",3,"T",22.89094,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9103,9111,{"$raw":"00000000"},"110406","MJ.3.5702","INOP",3,"T",115.21694,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9104,9112,{"$raw":"00000000"},"110406","MJ.3.5703","INOP",3,"T",75.30476,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9105,9113,{"$raw":"00000000"},"110406","MJ.1.198","OPER",1,"A",3.28842,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,9106,9114,{"$raw":"00000000"},"110406","MJ.3.5704","INOP",3,"T",138.87433,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9107,9115,{"$raw":"00000000"},"110406","MJ.3.5705","INOP",3,"A",3.32519,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9108,9116,{"$raw":"00000000"},"110406","MJ.3.5706","INOP",3,"T",164.25589,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9109,9117,{"$raw":"00000000"},"110406","MJ.3.5707","INOP",3,"T",30.82363,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,9110,9118,{"$raw":"00000000"},"110406","MJ.3.5708","INOP",3,"T",145.28066,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9111,9119,{"$raw":"00000000"},"110406","MJ.3.5709","INOP",3,"T",68.16527,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9112,9120,{"$raw":"00000000"},"110407","MJ.3.5710","INOP",3,"T",0.72062,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9113,9121,{"$raw":"00000000"},"110407","MJ.3.5711","INOP",3,"T",53.01182,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110407",1,null,"R DO CAMPO DA BOLA",9114,9122,{"$raw":"00000000"},"110407","R DO CAMPO DA BOLA","INOP",3,"T",32.28742,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",1,null,null,9115,9123,{"$raw":"00000000"},"110407","MJ.3.5712","INOP",3,"T",140.84816,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9116,9124,{"$raw":"00000000"},"110407","MJ.3.5713","INOP",3,"T",137.78557,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9117,9125,{"$raw":"00000000"},"110407","MJ.3.5714","INOP",3,"T",4.06503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA QUINTA DE S. LOURENÇO",null,null,"ESTR",null,"110407",1,null,null,9118,9126,{"$raw":"00000000"},"110407","MJ.1.199","OPER",1,"A",65.14289,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9119,9127,{"$raw":"00000000"},"110407","MJ.3.5715","INOP",3,"T",58.12494,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9120,9128,{"$raw":"00000000"},"110407","MJ.3.5716","INOP",3,"T",226.59424,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9121,9129,{"$raw":"00000000"},"110407","MJ.3.5717","INOP",3,"T",3.47121,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9122,9130,{"$raw":"00000000"},"110407","MJ.3.5718","INOP",3,"T",3.11747,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9123,9131,{"$raw":"00000000"},"110407","MJ.3.5719","INOP",3,"A",2.93552,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9124,9132,{"$raw":"00000000"},"110407","MJ.3.5720","INOP",3,"T",101.81266,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9125,9133,{"$raw":"00000000"},"110409","MJ.3.5721","INOP",3,"T",48.26349,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9126,9134,{"$raw":"00000000"},"110409","MJ.3.5722","INOP",3,"T",2.15727,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9127,9135,{"$raw":"00000000"},"110409","MJ.3.5723","INOP",3,"T",2.51938,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9128,9136,{"$raw":"00000000"},"110409","MJ.3.5724","INOP",3,"T",304.30056,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9129,9137,{"$raw":"00000000"},"110409","MJ.3.5725","INOP",3,"T",1.44014,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9130,9138,{"$raw":"00000000"},"110409","MJ.3.5726","INOP",3,"T",0.14036,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9131,9139,{"$raw":"00000000"},"110409","MJ.3.5727","INOP",3,"T",39.45861,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9132,9140,{"$raw":"00000000"},"110409","MJ.3.5728","INOP",3,"T",148.45631,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9133,9141,{"$raw":"00000000"},"110409","MJ.3.5729","INOP",3,"T",1.21758,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,9134,9142,{"$raw":"00000000"},"110409","MJ.3.5730","INOP",3,"T",293.46799,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,9135,9143,{"$raw":"00000000"},"110406","MJ.3.5731","INOP",3,"T",284.49201,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9136,9144,{"$raw":"00000000"},"110406","MJ.3.5732","INOP",3,"T",10.89151,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA QUINTA",null,"26 mar 2001","R",null,"110405",1,null,"R DA QUINTA",9137,9145,{"$raw":"00000000"},"110405","R DA QUINTA","INOP",3,"T",93.09801,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALTO DAS EIRAS",null,null,"R",null,"110409",1,null,"R ALTO DAS EIRAS",9138,9146,{"$raw":"00000000"},"110409","R ALTO DAS EIRAS","INOP",3,"T",84.76632,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1023","DAS LAMEIRAS",null,null,"ESTR",null,"110409",1,null,"ESTR DAS LAMEIRAS",9139,9147,{"$raw":"00000000"},"110409","ESTR DAS LAMEIRAS","OPER",2,null,52.50782,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAMEIRAS",null,null,"R",null,"110409",1,null,"R DAS LAMEIRAS",9140,9148,{"$raw":"00000000"},"110409","R DAS LAMEIRAS","INOP",3,"T",120.33847,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9141,9149,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",61.60824,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",2,null,null,9142,9150,{"$raw":"00000000"},"110409","MJ.3.5733","INOP",3,"T",436.83587,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",2,null,null,9143,9151,{"$raw":"00000000"},"110409","MJ.3.5734","INOP",3,"T",38.81550,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9144,9152,{"$raw":"00000000"},"110406","MJ.3.5735","INOP",3,"T",8.82001,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9145,9153,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,40.76436,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9146,9154,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.67047,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,9147,9155,{"$raw":"00000000"},"110407","MJ.3.5736","INOP",3,"T",212.52142,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9148,9156,{"$raw":"00000000"},"110409","MJ.3.5737","INOP",3,"T",354.08488,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9149,9157,{"$raw":"00000000"},"110409","MJ.3.5738","INOP",3,"T",81.61786,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9150,9158,{"$raw":"00000000"},"110409","MJ.3.5739","INOP",3,"T",40.40803,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9151,9159,{"$raw":"00000000"},"110409","MJ.3.5740","INOP",3,"T",97.36675,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,9152,9160,{"$raw":"00000000"},"110407","MJ.3.5741","INOP",3,"T",60.09299,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9153,9161,{"$raw":"00000000"},"110409","MJ.3.5742","INOP",3,"T",127.12005,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9154,9162,{"$raw":"00000000"},"110409","MJ.3.5743","INOP",3,"T",36.98109,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",2,null,null,9155,9163,{"$raw":"00000000"},"110407","MJ.3.5744","INOP",3,"T",128.98587,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9156,9164,{"$raw":"00000000"},"110407","MJ.3.5745","INOP",3,"T",83.28181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9157,9165,{"$raw":"00000000"},"110407","MJ.3.5746","INOP",3,"T",28.95853,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,9158,9166,{"$raw":"00000000"},"110407","MJ.3.5747","INOP",3,"T",75.55104,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9159,9167,{"$raw":"00000000"},"110409","MJ.3.5748","INOP",3,"T",187.59222,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110407",2,null,null,9160,9168,{"$raw":"00000000"},"110407","MJ.3.5749","INOP",3,"T",249.33648,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9161,9169,{"$raw":"00000000"},"110409","MJ.3.5750","INOP",3,"T",3.17605,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9162,9170,{"$raw":"00000000"},"110409","MJ.3.5751","INOP",3,"T",45.84210,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9163,9171,{"$raw":"00000000"},"110409","MJ.3.5752","INOP",3,"T",298.79963,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9164,9172,{"$raw":"00000000"},"110409","MJ.3.5753","INOP",3,"T",164.73915,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9165,9173,{"$raw":"00000000"},"110409","MJ.3.5754","INOP",3,"T",173.21698,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9166,9174,{"$raw":"00000000"},"110409","MJ.3.5755","INOP",3,"T",191.43745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",2,null,null,9167,9175,{"$raw":"00000000"},"110402","MJ.3.5756","INOP",3,"T",194.57866,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9168,9176,{"$raw":"00000000"},"110409","MJ.3.5757","INOP",3,"T",241.45547,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9169,9177,{"$raw":"00000000"},"110409","MJ.3.5758","INOP",3,"T",8.44009,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9170,9178,{"$raw":"00000000"},"110409","MJ.3.5759","INOP",3,"T",17.84063,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9171,9179,{"$raw":"00000000"},"110409","MJ.3.5760","INOP",3,"T",140.77562,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9172,9180,{"$raw":"00000000"},"110409","MJ.3.5761","INOP",3,"T",167.18248,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9173,9181,{"$raw":"00000000"},"110409","MJ.3.5762","INOP",3,"T",41.63299,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9174,9182,{"$raw":"00000000"},"110409","MJ.3.5763","INOP",3,"T",111.32540,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9175,9183,{"$raw":"00000000"},"110409","MJ.3.5764","INOP",3,"T",26.95014,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9176,9184,{"$raw":"00000000"},"110409","MJ.3.5765","INOP",3,"T",29.31723,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9177,9185,{"$raw":"00000000"},"110409","MJ.3.5766","INOP",3,"T",121.12595,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9178,9186,{"$raw":"00000000"},"110409","MJ.3.5767","INOP",3,"T",37.30867,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9179,9187,{"$raw":"00000000"},"110409","MJ.3.5768","INOP",3,"T",117.15521,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9180,9188,{"$raw":"00000000"},"110409","MJ.3.5769","INOP",3,"T",106.56494,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9181,9189,{"$raw":"00000000"},"110409","MJ.3.5770","INOP",3,"T",165.75775,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9182,9190,{"$raw":"00000000"},"110409","MJ.3.5771","INOP",3,"T",400.93777,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9183,9191,{"$raw":"00000000"},"110409","MJ.3.5772","INOP",3,"T",44.32995,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9184,9192,{"$raw":"00000000"},"110409","MJ.3.5773","INOP",3,"T",308.58865,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9185,9193,{"$raw":"00000000"},"110409","MJ.3.5774","INOP",3,"T",3.20576,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9186,9194,{"$raw":"00000000"},"110409","MJ.3.5775","INOP",3,"T",14.09683,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9187,9195,{"$raw":"00000000"},"110409","MJ.3.5776","INOP",3,"T",39.37488,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9188,9196,{"$raw":"00000000"},"110409","MJ.3.5777","INOP",3,"T",322.17941,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9189,9197,{"$raw":"00000000"},"110409","MJ.3.5778","INOP",3,"T",83.74762,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1023","DAS LAMEIRAS",null,null,"ESTR",null,"110409",1,null,"ESTR DAS LAMEIRAS",9190,9198,{"$raw":"00000000"},"110409","ESTR DAS LAMEIRAS","OPER",2,null,68.28205,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9191,9199,{"$raw":"00000000"},"110409","MJ.3.5779","INOP",3,"T",60.82701,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CSL DO ROQUE",null,null,"R",null,"110409",1,null,"R CSL DO ROQUE",9192,9200,{"$raw":"00000000"},"110409","R CSL DO ROQUE","INOP",3,"T",108.08833,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CSL MAXIMILIANO PEREIRA",null,null,"R",null,"110409",1,null,"R CSL MAXIMILIANO PEREIRA",9193,9201,{"$raw":"00000000"},"110409","R CSL MAXIMILIANO PEREIRA","INOP",3,"T",144.68491,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9194,9202,{"$raw":"00000000"},"110409","MJ.3.5780","INOP",3,"T",42.16242,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAMEIRAS",null,null,"R",null,"110409",1,null,"R DAS LAMEIRAS",9195,9203,{"$raw":"00000000"},"110409","R DAS LAMEIRAS","INOP",3,"T",52.84142,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9196,9204,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.15748,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9197,9205,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.56205,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9198,9206,{"$raw":"00000000"},"110406","MJ.3.5781","INOP",3,"T",2.93293,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAMEIRAS",null,null,"ESTR",null,"110409",1,null,"ESTR DAS LAMEIRAS",9199,9207,{"$raw":"00000000"},"110409","ESTR DAS LAMEIRAS","INOP",3,"T",72.10595,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PEDRA",null,null,"ESTR",null,"110409",1,null,"ESTR DA PEDRA",9200,9208,{"$raw":"00000000"},"110409","ESTR DA PEDRA","INOP",3,"T",127.27380,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA REPÚBLICA",null,null,"LG",null,"110409",1,null,"LG DA REPÚBLICA",9201,9209,{"$raw":"00000000"},"110409","LG DA REPÚBLICA","INOP",3,"T",12.84558,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LAVADOUROS",null,"14/06/2005","ESTR",null,"110401",1,null,"ESTR DOS LAVADOUROS",9202,9210,{"$raw":"00000000"},"110401","ESTR DOS LAVADOUROS","INOP",3,"A",127.39679,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9203,9211,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",187.34031,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","1º MAIO",null,null,"R",null,"110406",1,null,"R 1º MAIO",9204,9212,{"$raw":"00000000"},"110406","R 1º MAIO","OPER",1,"A",442.00599,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9205,9213,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,23.96641,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9206,9214,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,12.74480,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9207,9215,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,59.86709,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9208,9216,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,116.68719,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9209,9217,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,281.66404,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9210,9218,{"$raw":"00000000"},"110409","MJ.3.5782","INOP",3,"T",2.71155,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9211,9219,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,266.57318,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9212,9220,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,269.19838,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9213,9221,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,19.31331,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9214,9222,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,24.56127,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9215,9223,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.73591,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9216,9224,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,36.77290,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9217,9225,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,123.32852,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9218,9226,{"$raw":"00000000"},"110409","MJ.3.5783","INOP",3,"T",26.22227,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9219,9227,{"$raw":"00000000"},"110409","MJ.3.5784","INOP",3,"T",12.44822,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9220,9228,{"$raw":"00000000"},"110409","MJ.3.5785","INOP",3,"T",139.18490,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9221,9229,{"$raw":"00000000"},"110409","MJ.3.5786","INOP",3,"T",93.10912,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9222,9230,{"$raw":"00000000"},"110409","MJ.3.5787","INOP",3,"T",9.94786,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9223,9231,{"$raw":"00000000"},"110409","MJ.3.5788","INOP",3,"T",33.39635,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9224,9232,{"$raw":"00000000"},"110409","MJ.3.5789","INOP",3,"T",147.31738,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9225,9233,{"$raw":"00000000"},"110409","MJ.3.5790","INOP",3,"T",38.31202,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9226,9234,{"$raw":"00000000"},"110409","MJ.3.5791","INOP",3,"T",146.12716,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9227,9235,{"$raw":"00000000"},"110409","MJ.3.5792","INOP",3,"T",225.76135,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9228,9236,{"$raw":"00000000"},"110409","MJ.3.5793","INOP",3,"T",89.31010,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9229,9237,{"$raw":"00000000"},"110409","MJ.3.5794","INOP",3,"T",165.16907,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9230,9238,{"$raw":"00000000"},"110409","MJ.3.5795","INOP",3,"T",20.82557,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9231,9239,{"$raw":"00000000"},"110409","MJ.1.200","OPER",1,"T",74.39889,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9232,9240,{"$raw":"00000000"},"110409","MJ.3.5796","INOP",3,"T",65.43964,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9233,9241,{"$raw":"00000000"},"110409","MJ.3.5797","INOP",3,"T",136.10961,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9234,9242,{"$raw":"00000000"},"110409","MJ.3.5798","INOP",3,"T",28.60016,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SÃO JOSÉ",null,null,"R",null,"110409",1,null,"R SÃO JOSÉ",9235,9243,{"$raw":"00000000"},"110409","R SÃO JOSÉ","INOP",3,"T",61.33603,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AZINHAGA SILVA",null,null,"R",null,"110409",1,null,"R AZINHAGA SILVA",9236,9244,{"$raw":"00000000"},"110409","R AZINHAGA SILVA","OPER",1,"T",201.05326,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9237,9245,{"$raw":"00000000"},"110409","MJ.1.201","OPER",1,"T",60.41412,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9238,9246,{"$raw":"00000000"},"110409","MJ.3.5799","INOP",3,"T",19.88503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9239,9247,{"$raw":"00000000"},"110409","MJ.3.5800","INOP",3,"T",32.14206,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9240,9248,{"$raw":"00000000"},"110409","MJ.3.5801","INOP",3,"T",2.59731,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9241,9249,{"$raw":"00000000"},"110409","MJ.3.5802","INOP",3,"T",13.57336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,9242,9250,{"$raw":"00000000"},"110409","MJ.3.5803","INOP",3,"T",194.64669,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9243,9251,{"$raw":"00000000"},"110409","MJ.3.5804","INOP",3,"T",97.70975,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9244,9252,{"$raw":"00000000"},"110409","MJ.3.5805","INOP",3,"T",78.07534,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9245,9253,{"$raw":"00000000"},"110409","MJ.3.5806","INOP",3,"T",123.06467,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9246,9254,{"$raw":"00000000"},"110409","MJ.3.5807","INOP",3,"T",4.42676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9247,9255,{"$raw":"00000000"},"110409","MJ.3.5808","INOP",3,"T",223.02166,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9248,9256,{"$raw":"00000000"},"110409","MJ.3.5809","INOP",3,"T",2.67541,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9249,9257,{"$raw":"00000000"},"110409","MJ.3.5810","INOP",3,"A",128.42884,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9250,9258,{"$raw":"00000000"},"110409","MJ.3.5811","INOP",3,"T",30.96301,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9251,9259,{"$raw":"00000000"},"110409","MJ.3.5812","INOP",3,"T",224.17827,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9252,9260,{"$raw":"00000000"},"110409","MJ.3.5813","INOP",3,"T",45.00932,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9253,9261,{"$raw":"00000000"},"110409","MJ.3.5814","INOP",3,"T",112.45198,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9254,9262,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",163.02014,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9255,9263,{"$raw":"00000000"},"110409","MJ.3.5815","INOP",3,"T",33.66155,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"EMILIA CONCEIÇÃO PEREIRA",null,null,"R",null,"110409",1,null,"R EMILIA CONCEIÇÃO PEREIRA",9256,9264,{"$raw":"00000000"},"110409","R EMILIA CONCEIÇÃO PEREIRA","INOP",3,"T",344.85739,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GUERRA JUNQUEIRO","Na MNT existia \"R Guerreiro Junqueiro\", Nov 2009.",null,"R",null,"110409",1,null,"R GUERRA JUNQUEIRO",9257,9265,{"$raw":"00000000"},"110409","R GUERRA JUNQUEIRO","INOP",3,"T",73.70332,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9258,9266,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",297.07310,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9259,9267,{"$raw":"00000000"},"110407","MJ.3.5816","INOP",3,"T",25.04919,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110407",1,null,"R DO CAMPO DA BOLA",9260,9268,{"$raw":"00000000"},"110407","R DO CAMPO DA BOLA","INOP",3,"T",28.76178,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9261,9269,{"$raw":"00000000"},"110409","MJ.3.5817","INOP",3,"T",15.60780,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9262,9270,{"$raw":"00000000"},"110409","MJ.3.5818","INOP",3,"T",11.64577,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARACOL",null,"14/06/2005","R",null,"110409",1,null,"R DO CARACOL",9263,9271,{"$raw":"00000000"},"110409","R DO CARACOL","INOP",3,"T",128.72230,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE VERDE",null,"14/06/2005","R",null,"110409",1,null,"R DO VALE VERDE",9264,9272,{"$raw":"00000000"},"110409","R DO VALE VERDE","INOP",3,"T",51.90513,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE VERDE",null,"14/06/2005","R",null,"110409",1,null,"R DO VALE VERDE",9265,9273,{"$raw":"00000000"},"110409","R DO VALE VERDE","INOP",3,"T",13.97856,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9266,9274,{"$raw":"00000000"},"110409","MJ.3.5819","INOP",3,"T",34.21344,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9267,9275,{"$raw":"00000000"},"110409","MJ.3.5820","INOP",3,"T",4.89166,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE MACEIRA",null,"14/06/2005","R",null,"110409",1,null,"R DO VALE MACEIRA",9268,9276,{"$raw":"00000000"},"110409","R DO VALE MACEIRA","INOP",3,"T",106.82924,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,"14/06/2005","R",null,"110409",1,null,"R 25 DE ABRIL",9269,9277,{"$raw":"00000000"},"110409","R 25 DE ABRIL","INOP",3,"T",57.79612,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9270,9278,{"$raw":"00000000"},"110409","MJ.3.5821","INOP",3,"T",135.44160,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9271,9279,{"$raw":"00000000"},"110409","MJ.3.5822","INOP",3,"T",153.33640,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE VERDE",null,"14/06/2005","R",null,"110409",1,null,"R DO VALE VERDE",9272,9280,{"$raw":"00000000"},"110409","R DO VALE VERDE","INOP",3,"T",42.56284,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9273,9281,{"$raw":"00000000"},"110409","MJ.3.5823","INOP",3,"T",129.60308,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9274,9282,{"$raw":"00000000"},"110409","MJ.3.5824","INOP",3,"T",29.21911,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9275,9283,{"$raw":"00000000"},"110409","MJ.3.5825","INOP",3,"T",85.67735,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9276,9284,{"$raw":"00000000"},"110409","MJ.3.5826","INOP",3,"T",105.29140,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9277,9285,{"$raw":"00000000"},"110409","MJ.3.5827","INOP",3,"T",15.88986,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9278,9286,{"$raw":"00000000"},"110409","MJ.3.5828","INOP",3,"T",163.42881,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9279,9287,{"$raw":"00000000"},"110409","MJ.3.5829","INOP",3,"T",181.79208,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9280,9288,{"$raw":"00000000"},"110409","MJ.3.5830","INOP",3,"T",72.11199,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9281,9289,{"$raw":"00000000"},"110409","MJ.3.5831","INOP",3,"T",129.98454,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9282,9290,{"$raw":"00000000"},"110409","MJ.3.5832","INOP",3,"T",120.05656,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9283,9291,{"$raw":"00000000"},"110409","MJ.3.5833","INOP",3,"T",25.58325,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9284,9292,{"$raw":"00000000"},"110409","MJ.3.5834","INOP",3,"T",88.78820,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9285,9293,{"$raw":"00000000"},"110409","MJ.3.5835","INOP",3,"T",43.97815,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9286,9294,{"$raw":"00000000"},"110409","MJ.3.5836","INOP",3,"T",10.67494,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9287,9295,{"$raw":"00000000"},"110409","MJ.3.5837","INOP",3,"T",82.07780,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9288,9296,{"$raw":"00000000"},"110409","MJ.3.5838","INOP",3,"T",52.23188,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9289,9297,{"$raw":"00000000"},"110409","MJ.3.5839","INOP",3,"T",2.08634,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,null,"R",null,"110409",1,null,"R DAS AMOREIRAS",9290,9298,{"$raw":"00000000"},"110409","R DAS AMOREIRAS","INOP",3,"T",215.69744,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9291,9299,{"$raw":"00000000"},"110409","MJ.1.202","OPER",1,"A",2.42157,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9292,9300,{"$raw":"00000000"},"110409","MJ.3.5840","INOP",3,"T",22.86873,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,"14/06/2005","R",null,"110409",1,null,"R 25 DE ABRIL",9293,9301,{"$raw":"00000000"},"110409","R 25 DE ABRIL","INOP",3,"T",227.21929,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9294,9302,{"$raw":"00000000"},"110409","MJ.3.5841","INOP",3,"T",2.63510,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","S PEDRO",null,null,"BR",null,"110409",1,null,"BR S PEDRO",9295,9303,{"$raw":"00000000"},"110409","BR S PEDRO","OPER",1,"A",87.79486,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,9296,9304,{"$raw":"00000000"},"110402","MJ.3.5842","INOP",3,"T",306.23073,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110407",1,null,"R DO CAMPO DA BOLA",9297,9305,{"$raw":"00000000"},"110407","R DO CAMPO DA BOLA","INOP",3,"T",24.06813,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","DE SANTA CATARINA",null,null,"R",null,"110407",1,null,"R DE SANTA CATARINA",9298,9306,{"$raw":"00000000"},"110407","R DE SANTA CATARINA","OPER",1,"A",30.42767,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","DE SANTA CATARINA",null,null,"R",null,"110407",1,null,"R DE SANTA CATARINA",9299,9307,{"$raw":"00000000"},"110407","R DE SANTA CATARINA","OPER",1,"A",254.02975,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9300,9308,{"$raw":"00000000"},"110409","MJ.3.5843","INOP",3,"T",14.01892,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9301,9309,{"$raw":"00000000"},"110409","MJ.3.5844","INOP",3,"T",10.08812,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9302,9310,{"$raw":"00000000"},"110409","MJ.3.5845","INOP",3,"A",3.27153,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9303,9311,{"$raw":"00000000"},"110409","MJ.3.5846","INOP",3,"T",262.48055,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9304,9312,{"$raw":"00000000"},"110409","MJ.3.5847","INOP",3,"T",130.68270,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9305,9313,{"$raw":"00000000"},"110409","MJ.3.5848","INOP",3,"T",2.94839,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9306,9314,{"$raw":"00000000"},"110409","MJ.3.5849","INOP",3,"T",3.12194,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9307,9315,{"$raw":"00000000"},"110409","MJ.3.5850","INOP",3,"T",66.21452,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9308,9316,{"$raw":"00000000"},"110409","MJ.1.203","OPER",1,"A",2.88402,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9309,9317,{"$raw":"00000000"},"110409","MJ.3.5851","INOP",3,"T",23.83884,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9310,9318,{"$raw":"00000000"},"110409","MJ.3.5852","INOP",3,"T",198.83399,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9311,9319,{"$raw":"00000000"},"110409","MJ.3.5853","INOP",3,"T",251.80071,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9312,9320,{"$raw":"00000000"},"110409","MJ.3.5854","INOP",3,"T",374.12024,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,9313,9321,{"$raw":"00000000"},"110409","MJ.3.5855","INOP",3,"T",185.78995,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",2,null,null,9314,9322,{"$raw":"00000000"},"110402","MJ.3.5856","INOP",3,"T",3.23670,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9315,9323,{"$raw":"00000000"},"110409","MJ.3.5857","INOP",3,"T",34.21081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",2,null,null,9316,9324,{"$raw":"00000000"},"110402","MJ.3.5858","INOP",3,"T",62.38596,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,9317,9325,{"$raw":"00000000"},"110402","MJ.3.5859","INOP",3,"T",18.18378,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9318,9326,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,10.80336,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9319,9327,{"$raw":"00000000"},"110409","MJ.3.5860","INOP",3,"T",2.00609,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9320,9328,{"$raw":"00000000"},"110409","MJ.3.5861","INOP",3,"T",82.06029,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9321,9329,{"$raw":"00000000"},"110409","MJ.3.5862","INOP",3,"T",4.75119,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9322,9330,{"$raw":"00000000"},"110409","MJ.1.204","OPER",1,"A",2.47194,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9323,9331,{"$raw":"00000000"},"110409","MJ.3.5863","INOP",3,"T",44.13480,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9324,9332,{"$raw":"00000000"},"110409","MJ.3.5864","INOP",3,"T",44.28425,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9325,9333,{"$raw":"00000000"},"110409","MJ.3.5865","INOP",3,"T",95.66153,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9326,9334,{"$raw":"00000000"},"110409","MJ.3.5866","INOP",3,"T",2.65241,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9327,9335,{"$raw":"00000000"},"110409","MJ.3.5867","INOP",3,"T",126.37576,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9328,9336,{"$raw":"00000000"},"110409","MJ.3.5868","INOP",3,"T",10.43134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA PONTE",null,null,"R",null,"110407",1,null,"R DA PONTE",9329,9337,{"$raw":"00000000"},"110407","R DA PONTE","OPER",2,"A",40.96832,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1038","1038",null,null,"CM",null,"110405",1,null,"CM 1038",9330,9338,{"$raw":"00000000"},"110405","CM 1038","OPER",2,"A",23.15758,5.50000,"ESI","MAN","ESI","ESI","ESI",0,5,0,0,0,0,2,0,0,0,1,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9331,9339,{"$raw":"00000000"},"110409","MJ.3.5869","INOP",3,"T",190.26308,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9332,9340,{"$raw":"00000000"},"110409","MJ.3.5870","INOP",3,"T",101.39078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9333,9341,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",108.75981,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",9334,9342,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",25.54586,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9335,9343,{"$raw":"00000000"},"110409","MJ.3.5871","INOP",3,"T",3.04239,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9336,9344,{"$raw":"00000000"},"110409","MJ.3.5872","INOP",3,"T",66.51834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9337,9345,{"$raw":"00000000"},"110409","MJ.3.5873","INOP",3,"T",7.94943,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9338,9346,{"$raw":"00000000"},"110409","MJ.3.5874","INOP",3,"T",84.80700,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9339,9347,{"$raw":"00000000"},"110409","MJ.3.5875","INOP",3,"T",248.65548,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9340,9348,{"$raw":"00000000"},"110409","MJ.3.5876","INOP",3,"T",113.67492,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9341,9349,{"$raw":"00000000"},"110409","MJ.1.205","OPER",1,"A",94.18699,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9342,9350,{"$raw":"00000000"},"110409","MJ.1.206","OPER",1,"A",55.07801,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9343,9351,{"$raw":"00000000"},"110409","MJ.3.5877","INOP",3,"T",18.03759,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9344,9352,{"$raw":"00000000"},"110409","MJ.3.5878","INOP",3,"T",126.98834,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9345,9353,{"$raw":"00000000"},"110409","MJ.3.5879","INOP",3,"T",92.61642,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9346,9354,{"$raw":"00000000"},"110409","MJ.3.5880","INOP",3,"T",153.40407,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9347,9355,{"$raw":"00000000"},"110409","MJ.3.5881","INOP",3,"T",29.72987,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9348,9356,{"$raw":"00000000"},"110409","MJ.3.5882","INOP",3,"T",3.17674,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9349,9357,{"$raw":"00000000"},"110409","MJ.3.5883","INOP",3,"T",36.90669,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9350,9358,{"$raw":"00000000"},"110409","MJ.3.5884","INOP",3,"T",121.79957,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9351,9359,{"$raw":"00000000"},"110409","MJ.3.5885","INOP",3,"T",221.33317,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9352,9360,{"$raw":"00000000"},"110409","MJ.3.5886","INOP",3,"T",58.35496,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9353,9361,{"$raw":"00000000"},"110409","MJ.3.5887","INOP",3,"T",3.77584,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9354,9362,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.98412,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9355,9363,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,75.12621,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9356,9364,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,57.35643,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9357,9365,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,17.82366,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9358,9366,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.28736,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9359,9367,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.19710,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9360,9368,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.17929,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9361,9369,{"$raw":"00000000"},"110409","MJ.3.5888","INOP",3,"T",16.84504,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9362,9370,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,203.34433,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9363,9371,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,184.38523,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9364,9372,{"$raw":"00000000"},"110409","MJ.3.5889","INOP",3,"T",65.56227,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9365,9373,{"$raw":"00000000"},"110409","MJ.3.5890","INOP",3,"T",14.19650,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,null,0,null,null,9366,9374,{"$raw":"00000000"},null,"MJ.3.5891",null,3,"T",94.45123,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9367,9375,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,31.83071,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9368,9376,{"$raw":"00000000"},"110409","MJ.3.5892","INOP",3,"T",25.63183,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9369,9377,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.11752,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DAS MERCÊS",null,null,"R",null,"110409",1,null,"R Nª SENHORA DAS MERCÊS",9370,9378,{"$raw":"00000000"},"110409","R Nª SENHORA DAS MERCÊS","OPER",1,"A",21.97773,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9371,9379,{"$raw":"00000000"},"110409","MJ.1.207","OPER",1,"A",44.09561,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9372,9380,{"$raw":"00000000"},"110409","MJ.3.5893","INOP",3,"T",155.44477,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9373,9381,{"$raw":"00000000"},"110409","MJ.3.5894","INOP",3,"T",57.28614,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9374,9382,{"$raw":"00000000"},"110409","MJ.3.5895","INOP",3,"T",0.23537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9375,9383,{"$raw":"00000000"},"110409","MJ.3.5896","INOP",3,"T",35.67674,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9376,9384,{"$raw":"00000000"},"110409","MJ.3.5897","INOP",3,"T",48.05364,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9377,9385,{"$raw":"00000000"},"110409","MJ.3.5898","INOP",3,"T",98.83402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9378,9386,{"$raw":"00000000"},"110409","MJ.3.5899","INOP",3,"T",14.77881,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9379,9387,{"$raw":"00000000"},"110409","MJ.3.5900","INOP",3,"A",40.60617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9380,9388,{"$raw":"00000000"},"110409","MJ.3.5901","INOP",3,"T",96.28274,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9381,9389,{"$raw":"00000000"},"110409","MJ.3.5902","INOP",3,"T",229.67016,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9382,9390,{"$raw":"00000000"},"110409","MJ.1.208","OPER",1,"A",50.48594,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9383,9391,{"$raw":"00000000"},"110409","MJ.1.209","OPER",1,"A",105.54518,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9384,9392,{"$raw":"00000000"},"110409","MJ.3.5903","INOP",3,"T",23.47646,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9385,9393,{"$raw":"00000000"},"110409","MJ.1.210","OPER",1,"A",108.77907,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9386,9394,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,32.60415,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9387,9395,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,137.07389,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9388,9396,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,12.27319,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9389,9397,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.81240,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9390,9398,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,97.55111,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9391,9399,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,6.08153,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9392,9400,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,126.03529,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9393,9401,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,14.14945,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9394,9402,{"$raw":"00000000"},null,"MJ.1.211",null,1,null,2.47859,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9395,9403,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,5.75051,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9396,9404,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.86947,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9397,9405,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,94.81366,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9398,9406,{"$raw":"00000000"},"110409","MJ.3.5904","INOP",3,"T",71.35961,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"R DA BOA ESPERANÇA",null,null,null,null,"110409",1,null,null,9399,9407,{"$raw":"00000000"},"110409","MJ.3.5905","INOP",3,"T",214.48327,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9400,9408,{"$raw":"00000000"},"110409","MJ.3.5906","INOP",3,"T",74.75809,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DA AJUDA",null,null,"TV",null,"110410",1,null,"TV Nª SENHORA DA AJUDA",9401,9409,{"$raw":"00000000"},"110410","TV Nª SENHORA DA AJUDA","OPER",2,"A",47.82136,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,9402,9410,{"$raw":"00000000"},"110409","MJ.3.5907","INOP",3,"T",131.40919,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,9403,9411,{"$raw":"00000000"},"110409","MJ.3.5908","INOP",3,"T",14.32471,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9404,9412,{"$raw":"00000000"},"110409","MJ.3.5909","INOP",3,"T",20.50172,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,9405,9413,{"$raw":"00000000"},"110409","MJ.3.5910","INOP",3,"T",90.88592,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,9406,9414,{"$raw":"00000000"},"110409","MJ.3.5911","INOP",3,"T",2.80503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA ESPERANÇA",null,null,"R",null,"110409",1,null,"R DA BOA ESPERANÇA",9407,9415,{"$raw":"00000000"},"110409","R DA BOA ESPERANÇA","INOP",3,"T",142.48512,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9408,9416,{"$raw":"00000000"},"110409","MJ.3.5912","INOP",3,"T",2.64320,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9409,9417,{"$raw":"00000000"},"110409","MJ.3.5913","INOP",3,"T",131.37424,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9410,9418,{"$raw":"00000000"},"110409","MJ.3.5914","INOP",3,"T",3.35181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",2,null,null,9411,9419,{"$raw":"00000000"},"110402","MJ.3.5915","INOP",3,"T",3.09181,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,9412,9420,{"$raw":"00000000"},"110402","MJ.3.5916","INOP",3,"T",11.50141,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,9413,9421,{"$raw":"00000000"},"110402","MJ.3.5917","INOP",3,"T",64.77556,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9414,9422,{"$raw":"00000000"},null,"MJ.1.212",null,1,null,2.59700,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9415,9423,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,157.99101,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9416,9424,{"$raw":"00000000"},"110407","MJ.3.5918","INOP",3,"T",11.50624,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9417,9425,{"$raw":"00000000"},"110407","MJ.3.5919","INOP",3,"T",199.32794,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9418,9426,{"$raw":"00000000"},"110407","MJ.3.5920","INOP",3,"T",45.13676,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",2,null,null,9419,9427,{"$raw":"00000000"},"110407","MJ.3.5921","INOP",3,"T",8.32139,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9420,9428,{"$raw":"00000000"},"110407","MJ.3.5922","INOP",3,"T",20.82552,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9421,9429,{"$raw":"00000000"},"110409","MJ.3.5923","INOP",3,"T",240.89240,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9422,9430,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,64.11428,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9423,9431,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,46.66267,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9424,9432,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,30.79741,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9425,9433,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,39.97998,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9426,9434,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,49.72417,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9427,9435,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,37.55826,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9428,9436,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,7.44310,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9429,9437,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,21.72638,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9430,9438,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,22.77188,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9431,9439,{"$raw":"00000000"},"110409","MJ.3.5924","INOP",3,"T",49.91300,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9432,9440,{"$raw":"00000000"},"110407","MJ.3.5925","INOP",3,"T",26.83712,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9433,9441,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",302.79518,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9434,9442,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",86.62447,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9435,9443,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",47.68448,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9436,9444,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",89.26318,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9437,9445,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,191.44754,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9438,9446,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,34.18405,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9439,9447,{"$raw":"00000000"},"110409","MJ.3.5926","INOP",3,"T",131.80281,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9440,9448,{"$raw":"00000000"},"110409","MJ.3.5927","INOP",3,"T",220.87733,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9441,9449,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,77.12718,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9442,9450,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,38.87362,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9443,9451,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,17.57604,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9444,9452,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,67.00809,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9445,9453,{"$raw":"00000000"},"110407","MJ.3.5928","INOP",3,"T",49.87800,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",9446,9454,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",87.14607,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9447,9455,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",241.72132,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALMIRANTE AMÉRICO TOMÁS",null,null,"R",null,"110409",1,null,"R ALMIRANTE AMÉRICO TOMÁS",9448,9456,{"$raw":"00000000"},"110409","R ALMIRANTE AMÉRICO TOMÁS","INOP",3,"T",161.53462,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9449,9457,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,21.72816,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9450,9458,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,63.74202,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9451,9459,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,19.95913,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9452,9460,{"$raw":"00000000"},"110409","MJ.1.213","OPER",1,"T",324.36511,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9453,9461,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,69.94779,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9454,9462,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,64.58477,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,null,0,null,null,9455,9463,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,82.13330,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9456,9464,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,1.81431,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9457,9465,{"$raw":"00000000"},"110409","MJ.3.5929","INOP",3,"T",72.56384,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9458,9466,{"$raw":"00000000"},"110409","MJ.3.5930","INOP",3,"T",246.76259,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","das Lameiras",null,null,null,null,null,null,0,null,null,9459,9467,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,155.61446,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALTO DA AJUDA",null,null,"R",null,"110403",1,null,"R DO ALTO DA AJUDA",9460,9468,{"$raw":"00000000"},"110403","R DO ALTO DA AJUDA","INOP",3,"T",74.80475,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D ANTÓNIO JOSÉ DE ALMEIDA","Exite uma placa sem a designação D.",null,"R",null,"110409",1,null,"R D ANTÓNIO JOSÉ DE ALMEIDA",9461,9469,{"$raw":"00000000"},"110409","R D ANTÓNIO JOSÉ DE ALMEIDA","INOP",3,"T",84.84676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","569",null,null,"EM",null,"110409",1,null,"EM 569",9462,9470,{"$raw":"00000000"},"110409","EM 569","OPER",1,"A",192.02551,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9463,9471,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,6.08342,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","das Lameiras",null,null,null,null,null,null,0,null,null,9464,9472,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,27.22192,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9465,9473,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.01414,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9466,9474,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,22.69609,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9467,9475,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,103.25994,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9468,9476,{"$raw":"00000000"},"110409","MJ.3.5931","INOP",3,"T",6.07200,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",9469,9477,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",214.47496,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",9470,9478,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",37.69529,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9471,9479,{"$raw":"00000000"},"110409","MJ.3.5932","INOP",3,"T",1.21127,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9472,9480,{"$raw":"00000000"},"110407","MJ.3.5933","INOP",3,"T",28.99466,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9473,9481,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",139.74197,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9474,9482,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",23.35525,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9475,9483,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",239.09442,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,9476,9484,{"$raw":"00000000"},"110407","MJ.3.5934","INOP",3,"T",54.28218,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALMIRANTE AMÉRICO TOMÁS",null,null,"R",null,"110409",1,null,"R ALMIRANTE AMÉRICO TOMÁS",9477,9485,{"$raw":"00000000"},"110409","R ALMIRANTE AMÉRICO TOMÁS","INOP",3,"T",62.19887,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9478,9486,{"$raw":"00000000"},"110409","MJ.1.214","OPER",1,"T",83.01379,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9479,9487,{"$raw":"00000000"},"110409","MJ.3.5935","INOP",3,"T",107.85474,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9480,9488,{"$raw":"00000000"},"110409","MJ.3.5936","INOP",3,"T",30.32938,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9481,9489,{"$raw":"00000000"},"110409","MJ.1.215","OPER",1,"T",173.30034,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9482,9490,{"$raw":"00000000"},"110409","MJ.3.5937","INOP",3,"T",0.17000,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9483,9491,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,0.74404,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","Linha","Imaginaria",null,null,null,null,null,"110409",1,null,null,9484,9492,{"$raw":"00000000"},"110409","MJ.3.5938","INOP",3,"T",125.38819,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","LG","Alexandre Herculano",null,null,null,null,null,"110409",1,null,null,9485,9493,{"$raw":"00000000"},"110409","MJ.3.5939","INOP",3,"T",62.23329,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"AV",null,"110409",1,null,"AV D AFONSO HENRIQUES",9486,9494,{"$raw":"00000000"},"110409","AV D AFONSO HENRIQUES","INOP",3,"T",2.97871,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","DE SANTA CATARINA",null,null,"R",null,"110407",1,null,"R DE SANTA CATARINA",9487,9495,{"$raw":"00000000"},"110407","R DE SANTA CATARINA","OPER",1,"A",29.93998,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","DE SANTA CATARINA",null,null,"R",null,"110407",1,null,"R DE SANTA CATARINA",9488,9496,{"$raw":"00000000"},"110407","R DE SANTA CATARINA","OPER",1,"A",50.10511,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALEXANDRE HERCULANO",null,null,"LG",null,"110409",1,null,"LG ALEXANDRE HERCULANO",9489,9497,{"$raw":"00000000"},"110409","LG ALEXANDRE HERCULANO","INOP",3,"T",58.09583,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALEXANDRE HERCULANO",null,null,"LG",null,"110409",1,null,"LG ALEXANDRE HERCULANO",9490,9498,{"$raw":"00000000"},"110409","LG ALEXANDRE HERCULANO","INOP",3,"T",2.67134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO DOMINGOS MARQUES",null,null,"R",null,"110409",1,null,"R ANTÓNIO DOMINGOS MARQUES",9491,9499,{"$raw":"00000000"},"110409","R ANTÓNIO DOMINGOS MARQUES","INOP",3,"T",9.90571,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO DOMINGOS MARQUES","Anteriormente \"Rua Garret\"",null,"R",null,"110409",1,null,"R ANTÓNIO DOMINGOS MARQUES",9492,9500,{"$raw":"00000000"},"110409","R ANTÓNIO DOMINGOS MARQUES","INOP",3,"T",42.04608,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MONSENHOR PEREIRA DOS REIS",null,null,"LG",null,"110409",1,null,"LG MONSENHOR PEREIRA DOS REIS",9493,9501,{"$raw":"00000000"},"110409","LG MONSENHOR PEREIRA DOS REIS","INOP",3,"T",14.33455,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PEDRA",null,null,"ESTR",null,"110409",1,null,"ESTR DA PEDRA",9494,9502,{"$raw":"00000000"},"110409","ESTR DA PEDRA","INOP",3,"T",1.22090,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"R",null,"110409",1,null,"R D AFONSO HENRIQUES",9495,9503,{"$raw":"00000000"},"110409","R D AFONSO HENRIQUES","INOP",3,"T",44.94872,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"R",null,"110409",1,null,"R D AFONSO HENRIQUES",9496,9504,{"$raw":"00000000"},"110409","R D AFONSO HENRIQUES","INOP",3,"T",18.14842,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SENHORA DE TODO O MUNDO",null,null,"R",null,"110401",1,null,"R SENHORA DE TODO O MUNDO",9497,9505,{"$raw":"00000000"},"110401","R SENHORA DE TODO O MUNDO","OPER",2,"A",42.47072,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SÃO JOSÉ",null,null,"R",null,"110409",1,null,"R SÃO JOSÉ",9498,9506,{"$raw":"00000000"},"110409","R SÃO JOSÉ","OPER",1,"T",138.20685,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110401","EN 366",9499,9507,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",36.23783,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",9500,9508,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",30.26844,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",9501,9509,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",160.13565,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALMIRANTE AMÉRICO TOMÁS",null,null,"R",null,"110409",1,null,"R ALMIRANTE AMÉRICO TOMÁS",9502,9510,{"$raw":"00000000"},"110409","R ALMIRANTE AMÉRICO TOMÁS","INOP",3,"T",121.87689,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA ESPERANÇA",null,null,"R",null,"110409",1,null,"R DA BOA ESPERANÇA",9503,9511,{"$raw":"00000000"},"110409","R DA BOA ESPERANÇA","INOP",3,"T",175.65741,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FRUTEIRAS",null,null,"R",null,"110409",1,null,"R DAS FRUTEIRAS",9504,9512,{"$raw":"00000000"},"110409","R DAS FRUTEIRAS","INOP",3,"T",20.94878,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA PRIMÁRIA",null,null,"R",null,"110409",1,null,"R DA ESCOLA PRIMÁRIA",9505,9513,{"$raw":"00000000"},"110409","R DA ESCOLA PRIMÁRIA","OPER",1,"A",72.79149,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","20 DE JANEIRO",null,null,"R",null,"110407",1,null,"R 20 DE JANEIRO",9506,9514,{"$raw":"00000000"},"110407","R 20 DE JANEIRO","OPER",1,"A",203.40743,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9507,9515,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",14.61008,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ESCOLAS VELHAS",null,null,"R",null,"110409",1,null,"R DAS ESCOLAS VELHAS",9508,9516,{"$raw":"00000000"},"110409","R DAS ESCOLAS VELHAS","OPER",1,"A",42.45415,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9509,9517,{"$raw":"00000000"},"110409","MJ.3.5940","INOP",3,"T",1.15434,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9510,9518,{"$raw":"00000000"},"110409","MJ.3.5941","INOP",3,"T",2.74492,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"AV",null,"110409",1,null,"AV D AFONSO HENRIQUES",9511,9519,{"$raw":"00000000"},"110409","AV D AFONSO HENRIQUES","INOP",3,"T",66.75929,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA ESPERANÇA",null,null,"R",null,"110409",1,null,"R DA BOA ESPERANÇA",9512,9520,{"$raw":"00000000"},"110409","R DA BOA ESPERANÇA","INOP",3,"T",22.48771,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA ESPERANÇA",null,null,"R",null,"110409",1,null,"R DA BOA ESPERANÇA",9513,9521,{"$raw":"00000000"},"110409","R DA BOA ESPERANÇA","INOP",3,"T",63.85661,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GAGO COUTINHO",null,null,"R",null,"110409",1,null,"R GAGO COUTINHO",9514,9522,{"$raw":"00000000"},"110409","R GAGO COUTINHO","INOP",3,"T",25.80853,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GAGO COUTINHO",null,null,"R",null,"110409",1,null,"R GAGO COUTINHO",9515,9523,{"$raw":"00000000"},"110409","R GAGO COUTINHO","INOP",3,"T",1.48260,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FRUTEIRAS",null,null,"R",null,"110409",1,null,"R DAS FRUTEIRAS",9516,9524,{"$raw":"00000000"},"110409","R DAS FRUTEIRAS","INOP",3,"T",18.80280,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF JULIA CHAVEIRO SOUSA SOARES",null,null,"R",null,"110409",1,null,"R PROF JULIA CHAVEIRO SOUSA SOARES",9517,9525,{"$raw":"00000000"},"110409","R PROF JULIA CHAVEIRO SOUSA SOARES","INOP",3,"T",5.41134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ADELIDIA DE JESUS SOUSA SOARES",null,null,"R",null,"110409",1,null,"R ADELIDIA DE JESUS SOUSA SOARES",9518,9526,{"$raw":"00000000"},"110409","R ADELIDIA DE JESUS SOUSA SOARES","INOP",3,"T",16.69463,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ADELIDIA DE JESUS SOUSA SOARES",null,null,"R",null,"110409",1,null,"R ADELIDIA DE JESUS SOUSA SOARES",9519,9527,{"$raw":"00000000"},"110409","R ADELIDIA DE JESUS SOUSA SOARES","INOP",3,"T",87.93741,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR. AFONSO DE MARCHUETA",null,null,"R",null,"110409",1,null,"R DR. AFONSO DE MARCHUETA",9520,9528,{"$raw":"00000000"},"110409","R DR. AFONSO DE MARCHUETA","INOP",3,"T",69.60373,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF. NATIVIDADE FIGUEIREDO",null,null,"R",null,"110409",1,null,"R PROF. NATIVIDADE FIGUEIREDO",9521,9529,{"$raw":"00000000"},"110409","R PROF. NATIVIDADE FIGUEIREDO","INOP",3,"T",17.98603,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9522,9530,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1",null,null,"DOS COMBATENTES",null,null,"R",null,"110409",1,null,"R DOS COMBATENTES",9523,9531,{"$raw":"00000000"},"110409","R DOS COMBATENTES","INOP",3,"T",61.72078,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9524,9532,{"$raw":"00000000"},"110409","MJ.3.5942","INOP",3,"T",141.25965,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,null,"TV",null,"110409",1,null,"TV DA CAPELA",9525,9533,{"$raw":"00000000"},"110409","TV DA CAPELA","INOP",3,"T",50.59203,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF. NATIVIDADE FIGUEIREDO",null,null,"R",null,"110409",1,null,"R PROF. NATIVIDADE FIGUEIREDO",9526,9534,{"$raw":"00000000"},"110409","R PROF. NATIVIDADE FIGUEIREDO","INOP",3,"T",103.13115,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF. NATIVIDADE FIGUEIREDO",null,null,"R",null,"110409",1,null,"R PROF. NATIVIDADE FIGUEIREDO",9527,9535,{"$raw":"00000000"},"110409","R PROF. NATIVIDADE FIGUEIREDO","INOP",3,"T",30.61386,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF. NATIVIDADE FIGUEIREDO",null,null,"R",null,"110409",1,null,"R PROF. NATIVIDADE FIGUEIREDO",9528,9536,{"$raw":"00000000"},"110409","R PROF. NATIVIDADE FIGUEIREDO","INOP",3,"T",85.39082,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9529,9537,{"$raw":"00000000"},"110409","MJ.3.5943","INOP",3,"T",26.35486,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9530,9538,{"$raw":"00000000"},"110409","MJ.3.5944","INOP",3,"T",44.50081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9531,9539,{"$raw":"00000000"},"110409","MJ.3.5945","INOP",3,"T",44.63091,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA PRIMÁRIA",null,null,"R",null,"110409",1,null,"R DA ESCOLA PRIMÁRIA",9532,9540,{"$raw":"00000000"},"110409","R DA ESCOLA PRIMÁRIA","INOP",3,"T",49.65036,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA PRIMÁRIA",null,null,"R",null,"110409",1,null,"R DA ESCOLA PRIMÁRIA",9533,9541,{"$raw":"00000000"},"110409","R DA ESCOLA PRIMÁRIA","INOP",3,"T",85.54369,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF. NATIVIDADE FIGUEIREDO",null,null,"R",null,"110409",1,null,"R PROF. NATIVIDADE FIGUEIREDO",9534,9542,{"$raw":"00000000"},"110409","R PROF. NATIVIDADE FIGUEIREDO","INOP",3,"T",9.23580,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA PRIMÁRIA",null,null,"R",null,"110409",1,null,"R DA ESCOLA PRIMÁRIA",9535,9543,{"$raw":"00000000"},"110409","R DA ESCOLA PRIMÁRIA","INOP",3,"T",30.57294,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CEMITÉRIO",null,null,"TV",null,"110409",1,null,"TV DO CEMITÉRIO",9536,9544,{"$raw":"00000000"},"110409","TV DO CEMITÉRIO","INOP",3,"T",43.21367,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF. NATIVIDADE FIGUEIREDO",null,null,"R",null,"110409",1,null,"R PROF. NATIVIDADE FIGUEIREDO",9537,9545,{"$raw":"00000000"},"110409","R PROF. NATIVIDADE FIGUEIREDO","INOP",3,"T",29.28744,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"24 DE OUTUBRO",null,null,"R",null,"110409",1,null,"R 24 DE OUTUBRO",9538,9546,{"$raw":"00000000"},"110409","R 24 DE OUTUBRO","INOP",3,"T",29.34913,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FUNDAÇÃO CALOUSTE GULBENKIAN",null,null,"LG",null,"110409",1,null,"LG FUNDAÇÃO CALOUSTE GULBENKIAN",9539,9547,{"$raw":"00000000"},"110409","LG FUNDAÇÃO CALOUSTE GULBENKIAN","INOP",3,"T",22.97687,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FUNDAÇÃO CALOUSTE GULBENKIAN",null,null,"LG",null,"110409",1,null,"LG FUNDAÇÃO CALOUSTE GULBENKIAN",9540,9548,{"$raw":"00000000"},"110409","LG FUNDAÇÃO CALOUSTE GULBENKIAN","INOP",3,"T",19.42578,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS COMBATENTES DA GUERRA DO ULTRAMAR",null,null,"R",null,"110409",1,null,"R DOS COMBATENTES DA GUERRA DO ULTRAMAR",9541,9549,{"$raw":"00000000"},"110409","R DOS COMBATENTES DA GUERRA DO ULTRAMAR","INOP",3,"T",123.61192,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DEZEMBRO",null,null,"R",null,"110409",1,null,"R 1º DEZEMBRO",9542,9550,{"$raw":"00000000"},"110409","R 1º DEZEMBRO","INOP",3,"T",95.79620,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS",null,null,"R",null,"110409",1,null,"R DOS MOINHOS",9543,9551,{"$raw":"00000000"},"110409","R DOS MOINHOS","INOP",3,"T",22.68314,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS",null,null,"R",null,"110409",1,null,"R DOS MOINHOS",9544,9552,{"$raw":"00000000"},"110409","R DOS MOINHOS","INOP",3,"T",155.06389,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"8 DE NOVEMBRO",null,null,"R",null,"110409",1,null,"R 8 DE NOVEMBRO",9545,9553,{"$raw":"00000000"},"110409","R 8 DE NOVEMBRO","INOP",3,"T",78.53517,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9546,9554,{"$raw":"00000000"},"110409","MJ.3.5946","INOP",3,"T",1.09115,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO COMÉRCIO",null,null,"R",null,"110407",1,null,"R DO COMÉRCIO",9547,9555,{"$raw":"00000000"},"110407","R DO COMÉRCIO","OPER",1,"A",13.25753,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,9548,9556,{"$raw":"00000000"},"110402","MJ.3.5947","INOP",3,"T",145.48484,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9549,9557,{"$raw":"00000000"},"110409","MJ.3.5948","INOP",3,"T",25.18918,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,"14/06/2005","R",null,"110409",1,null,"R 25 DE ABRIL",9550,9558,{"$raw":"00000000"},"110409","R 25 DE ABRIL","INOP",3,"T",55.02435,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9551,9559,{"$raw":"00000000"},"110409","MJ.3.5949","INOP",3,"T",76.16890,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S SIMÃO",null,null,"TV",null,"110409",1,null,"TV S SIMÃO",9552,9560,{"$raw":"00000000"},"110409","TV S SIMÃO","INOP",3,"T",33.17454,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALEXANDRE HERCULANO",null,null,"LG",null,"110409",1,null,"LG ALEXANDRE HERCULANO",9553,9561,{"$raw":"00000000"},"110409","LG ALEXANDRE HERCULANO","INOP",3,"T",21.58456,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PIRIÇA",null,null,"TV",null,"110409",1,null,"TV DO PIRIÇA",9554,9562,{"$raw":"00000000"},"110409","TV DO PIRIÇA","INOP",3,"T",43.49856,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,"14/06/2005","R",null,"110409",1,null,"R 25 DE ABRIL",9555,9563,{"$raw":"00000000"},"110409","R 25 DE ABRIL","INOP",3,"T",6.41325,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALEXANDRE HERCULANO",null,null,"LG",null,"110409",1,null,"LG ALEXANDRE HERCULANO",9556,9564,{"$raw":"00000000"},"110409","LG ALEXANDRE HERCULANO","INOP",3,"T",20.11693,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9557,9565,{"$raw":"00000000"},"110409","MJ.3.5950","INOP",3,"T",70.81540,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9558,9566,{"$raw":"00000000"},"110409","MJ.1.216","OPER",1,"T",5.67274,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9559,9567,{"$raw":"00000000"},"110409","MJ.3.5951","INOP",3,"T",34.07155,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9560,9568,{"$raw":"00000000"},"110409","MJ.3.5952","INOP",3,"T",36.06878,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FÉ",null,null,"TV",null,"110409",1,null,"TV DA FÉ",9561,9569,{"$raw":"00000000"},"110409","TV DA FÉ","INOP",3,"T",18.57561,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CARIDADE",null,null,"TV",null,"110409",1,null,"TV DA CARIDADE",9562,9570,{"$raw":"00000000"},"110409","TV DA CARIDADE","INOP",3,"T",44.88749,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FÉ",null,null,"TV",null,"110409",1,null,"TV DA FÉ",9563,9571,{"$raw":"00000000"},"110409","TV DA FÉ","INOP",3,"T",35.14080,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DA PAZ",null,null,"TV",null,"110409",1,null,"TV DA PAZ",9564,9572,{"$raw":"00000000"},"110409","TV DA PAZ","INOP",3,"T",51.67378,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO DOMINGOS MARQUES",null,null,"R",null,"110409",1,null,"R ANTÓNIO DOMINGOS MARQUES",9565,9573,{"$raw":"00000000"},"110409","R ANTÓNIO DOMINGOS MARQUES","INOP",3,"T",7.84700,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO DOMINGOS MARQUES",null,null,"R",null,"110409",1,null,"R ANTÓNIO DOMINGOS MARQUES",9566,9574,{"$raw":"00000000"},"110409","R ANTÓNIO DOMINGOS MARQUES","INOP",3,"T",20.09335,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MONSENHOR PEREIRA DOS REIS",null,null,"LG",null,"110409",1,null,"LG MONSENHOR PEREIRA DOS REIS",9567,9575,{"$raw":"00000000"},"110409","LG MONSENHOR PEREIRA DOS REIS","INOP",3,"T",6.87327,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,"14/06/2005","R",null,"110409",1,null,"R 25 DE ABRIL",9568,9576,{"$raw":"00000000"},"110409","R 25 DE ABRIL","INOP",3,"T",59.00539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUÍS DE CAMÕES",null,null,"R",null,"110409",1,null,"R LUÍS DE CAMÕES",9569,9577,{"$raw":"00000000"},"110409","R LUÍS DE CAMÕES","INOP",3,"T",44.54134,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"LG",null,"110409",1,null,"LG 1º DE MAIO",9570,9578,{"$raw":"00000000"},"110409","LG 1º DE MAIO","INOP",3,"T",16.47506,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D NUNO ÁLVARES PEREIRA",null,null,"R",null,"110409",1,null,"R D NUNO ÁLVARES PEREIRA",9571,9579,{"$raw":"00000000"},"110409","R D NUNO ÁLVARES PEREIRA","INOP",3,"T",31.91175,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9572,9580,{"$raw":"00000000"},"110409","MJ.3.5953","INOP",3,"T",31.00313,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MÃE DA ÁGUA",null,null,"TV",null,"110409",1,null,"TV MÃE DA ÁGUA",9573,9581,{"$raw":"00000000"},"110409","TV MÃE DA ÁGUA","INOP",3,"T",56.98753,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ENG DUARTE PACHECO",null,null,"R",null,"110409",1,null,"R ENG DUARTE PACHECO",9574,9582,{"$raw":"00000000"},"110409","R ENG DUARTE PACHECO","INOP",3,"T",58.38223,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110409",1,null,"R 1º DE DEZEMBRO",9575,9583,{"$raw":"00000000"},"110409","R 1º DE DEZEMBRO","INOP",3,"T",9.87373,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"AV",null,"110409",1,null,"AV D AFONSO HENRIQUES",9576,9584,{"$raw":"00000000"},"110409","AV D AFONSO HENRIQUES","INOP",3,"T",12.82236,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"AV",null,"110409",1,null,"AV D AFONSO HENRIQUES",9577,9585,{"$raw":"00000000"},"110409","AV D AFONSO HENRIQUES","INOP",3,"T",15.86810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ENG DUARTE PACHECO",null,null,"R",null,"110409",1,null,"R ENG DUARTE PACHECO",9578,9586,{"$raw":"00000000"},"110409","R ENG DUARTE PACHECO","INOP",3,"T",11.67722,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ABEL SIMÕES",null,null,"LG",null,"110408",1,null,"LG ABEL SIMÕES",9579,9587,{"$raw":"00000000"},"110408","LG ABEL SIMÕES","INOP",3,"T",10.73096,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"COMENDADOR G M BARATA",null,null,"R",null,"110403",1,null,"R COMENDADOR G M BARATA",9580,9588,{"$raw":"00000000"},"110403","R COMENDADOR G M BARATA","INOP",3,"T",111.64059,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","1037",null,null,"CM",null,"110405",1,null,"CM 1037",9581,9589,{"$raw":"00000000"},"110405","CM 1037","OPER",1,"A",400.54566,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",2,"110404","R CASAIS DO ENTRUDO",9582,9590,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",183.72237,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110409",1,null,"EN 361",9583,9591,{"$raw":"00000000"},"110409","EN 361","OPER",1,"A",23.01438,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","569",null,null,"EM",null,"110409",1,null,"EM 569",9584,9592,{"$raw":"00000000"},"110409","EM 569","OPER",1,"A",34.18924,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9585,9593,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",124.12052,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9586,9594,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",451.39419,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO GOMES GAIO",null,null,"R",null,"110409",1,null,"R ANTÓNIO GOMES GAIO",9587,9595,{"$raw":"00000000"},"110409","R ANTÓNIO GOMES GAIO","INOP",3,"T",98.87015,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO DA REGUEIRA",null,"14/06/2005","BC",null,"110410",1,null,"BC DO POÇO DA REGUEIRA",9588,9596,{"$raw":"00000000"},"110410","BC DO POÇO DA REGUEIRA","INOP",3,"T",77.84734,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9589,9597,{"$raw":"00000000"},"110409","MJ.1.217","OPER",1,"A",26.06377,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,9590,9598,{"$raw":"00000000"},"110402","MJ.3.5954","INOP",3,"T",0.04944,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PEDRO ALVARES CABRAL",null,null,"R",null,"110409",1,null,"R PEDRO ALVARES CABRAL",9591,9599,{"$raw":"00000000"},"110409","R PEDRO ALVARES CABRAL","INOP",3,"T",84.57737,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF MARIA BARBARA DE AGUIAR",null,null,"LG",null,"110409",1,null,"LG PROF MARIA BARBARA DE AGUIAR",9592,9600,{"$raw":"00000000"},"110409","LG PROF MARIA BARBARA DE AGUIAR","INOP",3,"T",47.45054,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF MARIA BARBARA DE AGUIAR",null,null,"LG",null,"110409",1,null,"LG PROF MARIA BARBARA DE AGUIAR",9593,9601,{"$raw":"00000000"},"110409","LG PROF MARIA BARBARA DE AGUIAR","INOP",3,"T",40.07373,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO DA ÁGUA",null,null,"TV",null,"110409",1,null,"TV DO POÇO DA ÁGUA",9594,9602,{"$raw":"00000000"},"110409","TV DO POÇO DA ÁGUA","INOP",3,"T",67.66390,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR MÁRIO MADEIRA",null,null,"R",null,"110409",1,null,"R DR MÁRIO MADEIRA",9595,9603,{"$raw":"00000000"},"110409","R DR MÁRIO MADEIRA","INOP",3,"T",28.95033,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR MÁRIO MADEIRA",null,null,"R",null,"110409",1,null,"R DR MÁRIO MADEIRA",9596,9604,{"$raw":"00000000"},"110409","R DR MÁRIO MADEIRA","INOP",3,"T",29.69319,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR MÁRIO MADEIRA",null,null,"R",null,"110409",1,null,"R DR MÁRIO MADEIRA",9597,9605,{"$raw":"00000000"},"110409","R DR MÁRIO MADEIRA","INOP",3,"T",18.00024,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR MÁRIO MADEIRA",null,null,"R",null,"110409",1,null,"R DR MÁRIO MADEIRA",9598,9606,{"$raw":"00000000"},"110409","R DR MÁRIO MADEIRA","INOP",3,"T",11.58395,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9599,9607,{"$raw":"00000000"},"110409","MJ.3.5955","INOP",3,"T",37.02602,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ CARTAXAO",null,null,"BC",null,"110409",1,null,"BC JOSÉ CARTAXO",9600,9608,{"$raw":"00000000"},"110409","BC JOSÉ CARTAXO","INOP",3,"T",60.35152,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"R",null,"110409",1,null,"R D AFONSO HENRIQUES",9601,9609,{"$raw":"00000000"},"110409","R D AFONSO HENRIQUES","INOP",3,"T",67.80462,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"R",null,"110409",1,null,"R D AFONSO HENRIQUES",9602,9610,{"$raw":"00000000"},"110409","R D AFONSO HENRIQUES","INOP",3,"T",49.62457,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VASCO DA GAMA",null,null,"R",null,"110409",1,null,"R VASCO DA GAMA",9603,9611,{"$raw":"00000000"},"110409","R VASCO DA GAMA","INOP",3,"T",130.06633,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS DE VENTO",null,null,"R",null,"110409",1,null,"R DOS MOINHOS DE VENTO",9604,9612,{"$raw":"00000000"},"110409","R DOS MOINHOS DE VENTO","INOP",3,"T",44.52278,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS DE VENTO",null,null,"R",null,"110409",1,null,"R DOS MOINHOS DE VENTO",9605,9613,{"$raw":"00000000"},"110409","R DOS MOINHOS DE VENTO","INOP",3,"T",47.70404,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA EIRA",null,"7/03/2006","TV",null,"110409",1,null,"TV DA EIRA",9606,9614,{"$raw":"00000000"},"110409","TV DA EIRA","INOP",3,"T",73.26342,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,null,"R",null,"110409",1,null,"R 25 DE ABRIL",9607,9615,{"$raw":"00000000"},"110409","R 25 DE ABRIL","OPER",1,"A",43.89196,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DAS MERCÊS",null,null,"R",null,"110409",1,null,"R Nª SENHORA DAS MERCÊS",9608,9616,{"$raw":"00000000"},"110409","R Nª SENHORA DAS MERCÊS","INOP",3,"T",30.52311,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"24 DE OUTUBRO",null,null,"R",null,"110409",1,null,"R 24 DE OUTUBRO",9609,9617,{"$raw":"00000000"},"110409","R 24 DE OUTUBRO","INOP",3,"T",29.64270,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"24 DE OUTUBRO",null,null,"R",null,"110409",1,null,"R 24 DE OUTUBRO",9610,9618,{"$raw":"00000000"},"110409","R 24 DE OUTUBRO","INOP",3,"T",104.17378,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS",null,null,"R",null,"110409",1,null,"R DOS MOINHOS",9611,9619,{"$raw":"00000000"},"110409","R DOS MOINHOS","INOP",3,"T",41.75718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,9612,9620,{"$raw":"00000000"},"110409","MJ.3.5956","INOP",3,"T",0.10440,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF JULIA CHAVEIRO SOUSA SOARES",null,null,"R",null,"110409",1,null,"R PROF JULIA CHAVEIRO SOUSA SOARES",9613,9621,{"$raw":"00000000"},"110409","R PROF JULIA CHAVEIRO SOUSA SOARES","INOP",3,"T",60.09161,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110409",1,null,"R 1º DE DEZEMBRO",9614,9622,{"$raw":"00000000"},"110409","R 1º DE DEZEMBRO","INOP",3,"T",27.76186,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110409",1,null,"R 1º DE DEZEMBRO",9615,9623,{"$raw":"00000000"},"110409","R 1º DE DEZEMBRO","INOP",3,"T",56.26548,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF MARIA BARBARA DE AGUIAR",null,null,"LG",null,"110409",1,null,"LG PROF MARIA BARBARA DE AGUIAR",9616,9624,{"$raw":"00000000"},"110409","LG PROF MARIA BARBARA DE AGUIAR","INOP",3,"T",32.44629,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D JOÃO I",null,null,"R",null,"110409",1,null,"R D JOÃO I",9617,9625,{"$raw":"00000000"},"110409","R D JOÃO I","INOP",3,"T",55.77598,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"R",null,"110409",1,null,"R D AFONSO HENRIQUES",9618,9626,{"$raw":"00000000"},"110409","R D AFONSO HENRIQUES","INOP",3,"T",23.91511,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"D JOÃO I",null,null,"R",null,"110409",1,null,"R D JOÃO I",9619,9627,{"$raw":"00000000"},"110409","R D JOÃO I","INOP",3,"T",36.82231,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"R",null,"110409",1,null,"R D AFONSO HENRIQUES",9620,9628,{"$raw":"00000000"},"110409","R D AFONSO HENRIQUES","INOP",3,"T",61.45895,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SERPA PINTO",null,null,"R",null,"110409",1,null,"R SERPA PINTO",9621,9629,{"$raw":"00000000"},"110409","R SERPA PINTO","OPER",1,"A",70.06324,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARQUESES DE RIO MAIOR",null,null,"LG",null,"110410",1,null,"LG MARQUESES DE RIO MAIOR",9622,9630,{"$raw":"00000000"},"110410","LG MARQUESES DE RIO MAIOR","OPER",2,"A",38.16295,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"D JOÃO I",null,null,"R",null,"110409",1,null,"R D JOÃO I",9623,9631,{"$raw":"00000000"},"110409","R D JOÃO I","OPER",1,"A",44.80198,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,null,"TV",null,"110409",1,null,"TV DA CAPELA",9624,9632,{"$raw":"00000000"},"110409","TV DA CAPELA","INOP",3,"A",94.10110,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FRUTEIRAS",null,null,"R",null,"110409",1,null,"R DAS FRUTEIRAS",9625,9633,{"$raw":"00000000"},"110409","R DAS FRUTEIRAS","INOP",3,"T",128.44588,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FRUTEIRAS",null,null,"R",null,"110409",1,null,"R DAS FRUTEIRAS",9626,9634,{"$raw":"00000000"},"110409","R DAS FRUTEIRAS","INOP",3,"A",109.89889,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS COMBATENTES",null,null,"R",null,"110409",1,null,"R DOS COMBATENTES",9627,9635,{"$raw":"00000000"},"110409","R DOS COMBATENTES","INOP",3,"T",42.10662,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR. AFONSO DE MARCHUETA",null,null,"R",null,"110409",1,null,"R DR. AFONSO DE MARCHUETA",9628,9636,{"$raw":"00000000"},"110409","R DR. AFONSO DE MARCHUETA","INOP",3,"T",21.43864,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR. AFONSO DE MARCHUETA",null,null,"R",null,"110409",1,null,"R DR. AFONSO DE MARCHUETA",9629,9637,{"$raw":"00000000"},"110409","R DR. AFONSO DE MARCHUETA","INOP",3,"T",77.58895,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9630,9638,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.04498,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9631,9639,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,262.53514,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9632,9640,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,215.46770,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",9633,9641,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",17.35018,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",9634,9642,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",8.15437,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",9635,9643,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",50.57099,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",9636,9644,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",181.77138,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",9637,9645,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",205.38977,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",9638,9646,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",551.12807,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",9639,9647,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",19.72353,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALBERTINA MARQUES",null,null,"R",null,"110407",1,null,"R ALBERTINA MARQUES",9640,9648,{"$raw":"00000000"},"110407","R ALBERTINA MARQUES","OPER",2,"A",18.51566,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",9641,9649,{"$raw":"00000000"},"110410","R DAS FLORES","OPER",2,"A",20.89276,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","S PEDRO",null,null,"BR",null,"110409",1,null,"BR S PEDRO",9642,9650,{"$raw":"00000000"},"110409","BR S PEDRO","OPER",1,"A",3.61448,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","612",null,null,"EM",null,"110407",1,null,"EM 612",9643,9651,{"$raw":"00000000"},"110407","EM 612","OPER",1,"A",4.38901,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110409",1,null,"EN 361",9644,9652,{"$raw":"00000000"},"110409","EN 361","OPER",1,"A",52.31324,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110409",1,null,"EN 361",9645,9653,{"$raw":"00000000"},"110409","EN 361","OPER",1,"A",5.19986,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9646,9654,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",23.25768,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9647,9655,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",51.54886,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110404",1,null,"EN 115",9648,9656,{"$raw":"00000000"},"110404","EN 115","OPER",1,"A",262.55332,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9649,9657,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",34.10534,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9650,9658,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",40.07425,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9651,9659,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",26.76194,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DR OLIVEIRA DE SALAZAR",null,null,"R",null,"110409",1,null,"R DR OLIVEIRA DE SALAZAR",9652,9660,{"$raw":"00000000"},"110409","R DR OLIVEIRA DE SALAZAR","OPER",1,"A",11.83219,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9653,9661,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",159.90420,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",2,"110409","EN 361",9654,9662,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",30.91611,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110409",1,null,"EN 361",9655,9663,{"$raw":"00000000"},"110409","EN 361","OPER",1,"A",9.26110,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9656,9664,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",224.30439,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110404",1,null,"EN 115",9657,9665,{"$raw":"00000000"},"110404","EN 115","OPER",1,"A",99.87289,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110404",1,null,"EN 115",9658,9666,{"$raw":"00000000"},"110404","EN 115","OPER",1,"A",4.45313,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110404",1,null,"EN 115",9659,9667,{"$raw":"00000000"},"110404","EN 115","OPER",1,"A",57.70435,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110404",1,null,"EN 115",9660,9668,{"$raw":"00000000"},"110404","EN 115","OPER",1,"A",133.82103,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9661,9669,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",13.10762,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110404",1,null,"EN 115",9662,9670,{"$raw":"00000000"},"110404","EN 115","OPER",1,"A",138.45098,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110401",1,null,"EM 568",9663,9671,{"$raw":"00000000"},"110401","EM 568","OPER",1,"A",532.02860,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9664,9672,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",209.33741,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA RESTAURAÇÃO",null,null,"R",null,"110409",1,null,"R DA RESTAURAÇÃO",9665,9673,{"$raw":"00000000"},"110409","R DA RESTAURAÇÃO","INOP",3,"A",80.99199,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9666,9674,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",221.27533,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA AZINHAGA","Anteriormente \"R DA MADALENA\", Processo 03/2010/38",null,"R",null,"110406",1,null,"R DA AZINHAGA",9667,9675,{"$raw":"00000000"},"110406","R DA AZINHAGA","INOP",3,"T",125.03296,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL CESTEIRO",null,null,"R",null,"110406",1,null,"R DO CASAL CESTEIRO",9668,9676,{"$raw":"00000000"},"110406","R DO CASAL CESTEIRO","INOP",3,"T",530.86550,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110409",1,null,"EN 361",9669,9677,{"$raw":"00000000"},"110409","EN 361","OPER",1,"A",355.59410,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,null,0,null,"EN 361",9670,9678,{"$raw":"00000000"},null,"EN 361",null,1,"A",174.82986,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9671,9679,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",57.83806,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1021","1021",null,null,"CM",null,"110409",1,null,"CM 1021",9672,9680,{"$raw":"00000000"},"110409","CM 1021","OPER",1,"A",191.54462,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110407",1,null,"R DA ESPERANÇA",9673,9681,{"$raw":"00000000"},"110407","R DA ESPERANÇA","INOP",3,"T",52.79095,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9674,9682,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",383.53874,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS",null,null,"R",null,"110406",1,null,"R DOS MOINHOS",9675,9683,{"$raw":"00000000"},"110406","R DOS MOINHOS","INOP",3,"T",216.72537,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9676,9684,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",36.89640,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110404",1,null,"EN 115",9677,9685,{"$raw":"00000000"},"110404","EN 115","OPER",1,"A",16.11550,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9678,9686,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",29.26447,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9679,9687,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",84.79921,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DR OLIVEIRA DE SALAZAR",null,null,"R",null,"110409",1,null,"R DR OLIVEIRA DE SALAZAR",9680,9688,{"$raw":"00000000"},"110409","R DR OLIVEIRA DE SALAZAR","OPER",1,"A",255.70079,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DR OLIVEIRA DE SALAZAR",null,null,"R",null,"110409",1,null,"R DR OLIVEIRA DE SALAZAR",9681,9689,{"$raw":"00000000"},"110409","R DR OLIVEIRA DE SALAZAR","OPER",1,"A",1609.59158,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9682,9690,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",7.29000,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9683,9691,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",32.29449,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9684,9692,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",69.87207,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9685,9693,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",67.44586,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9686,9694,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",30.18059,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9687,9695,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",93.39253,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DR OLIVEIRA DE SALAZAR",null,null,"R",null,"110409",1,null,"R DR OLIVEIRA DE SALAZAR",9688,9696,{"$raw":"00000000"},"110409","R DR OLIVEIRA DE SALAZAR","OPER",1,"A",77.27713,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DR OLIVEIRA DE SALAZAR",null,null,"R",null,"110409",1,null,"R DR OLIVEIRA DE SALAZAR",9689,9697,{"$raw":"00000000"},"110409","R DR OLIVEIRA DE SALAZAR","OPER",1,"A",21.03157,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9690,9698,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",47.64247,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9691,9699,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",6.32418,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9692,9700,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",47.52723,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,null,"R",null,"110409",1,null,"R DA LIBERDADE",9693,9701,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",1.49202,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9694,9702,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",103.94250,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9695,9703,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",5.66153,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9696,9704,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",44.52633,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9697,9705,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",11.32831,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9698,9706,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",74.50855,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9699,9707,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",191.96498,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",2,"110409","EN 361",9700,9708,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",221.68623,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",2,"110409","EN 361",9701,9709,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",18.90097,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",2,"110409","EN 361",9702,9710,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",50.59043,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110409",1,null,"EN 361",9703,9711,{"$raw":"00000000"},"110409","EN 361","OPER",1,"A",42.12193,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110409",1,null,"EN 361",9704,9712,{"$raw":"00000000"},"110409","EN 361","OPER",1,"A",26.11020,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9705,9713,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,321.85102,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9706,9714,{"$raw":"00000000"},"110406","MJ.3.5957","INOP",3,"T",198.18166,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","do Cesteiro",null,null,null,null,null,"110406",1,null,null,9707,9715,{"$raw":"00000000"},"110406","MJ.3.5958","INOP",3,"T",77.13440,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ROGERIO CORREIA FRANCISCO",null,null,"R",null,"110406",1,null,"R ROGERIO CORREIA FRANCISCO",9708,9716,{"$raw":"00000000"},"110406","R ROGERIO CORREIA FRANCISCO","INOP",3,"T",33.65539,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JULIO VICENTE FERREIRA",null,null,"R",null,"110406",1,null,"R JULIO VICENTE FERREIRA",9709,9717,{"$raw":"00000000"},"110406","R JULIO VICENTE FERREIRA","OPER",2,"A",91.82367,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFERES JOSÉ VENTURA RODRIGUES",null,null,"R",null,"110406",1,null,"R ALFERES JOSÉ VENTURA RODRIGUES",9710,9718,{"$raw":"00000000"},"110406","R ALFERES JOSÉ VENTURA RODRIGUES","INOP",3,"T",75.17725,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFERES JOSÉ VENTURA RODRIGUES",null,null,"R",null,"110406",1,null,"R ALFERES JOSÉ VENTURA RODRIGUES",9711,9719,{"$raw":"00000000"},"110406","R ALFERES JOSÉ VENTURA RODRIGUES","INOP",3,"T",21.31062,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFERES JOSÉ VENTURA RODRIGUES",null,null,"R",null,"110406",1,null,"R ALFERES JOSÉ VENTURA RODRIGUES",9712,9720,{"$raw":"00000000"},"110406","R ALFERES JOSÉ VENTURA RODRIGUES","INOP",3,"T",43.41687,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFERES JOSÉ VENTURA RODRIGUES",null,null,"R",null,"110406",1,null,"R ALFERES JOSÉ VENTURA RODRIGUES",9713,9721,{"$raw":"00000000"},"110406","R ALFERES JOSÉ VENTURA RODRIGUES","INOP",3,"T",32.86427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","ANTÓNIO INÁCIO LOPES DA SILVA",null,null,"R",null,"110406",1,null,"R ANTÓNIO INÁCIO LOPES DA SILVA",9714,9722,{"$raw":"00000000"},"110406","R ANTÓNIO INÁCIO LOPES DA SILVA","OPER",2,null,157.50533,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","ANTÓNIO INÁCIO LOPES DA SILVA",null,null,"R",null,"110406",1,null,"R ANTÓNIO INÁCIO LOPES DA SILVA",9715,9723,{"$raw":"00000000"},"110406","R ANTÓNIO INÁCIO LOPES DA SILVA","OPER",2,null,45.39259,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CARLOS MANUEL DOS SANTOS PINTO",null,null,"R",null,"110406",1,null,"R CARLOS MANUEL DOS SANTOS PINTO",9716,9724,{"$raw":"00000000"},"110406","R CARLOS MANUEL DOS SANTOS PINTO","INOP",3,"T",82.29059,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CARLOS MANUEL DOS SANTOS PINTO",null,null,"R",null,"110406",1,null,"R CARLOS MANUEL DOS SANTOS PINTO",9717,9725,{"$raw":"00000000"},"110406","R CARLOS MANUEL DOS SANTOS PINTO","INOP",3,"T",42.95396,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CARLOS MANUEL DOS SANTOS PINTO",null,null,"R",null,"110406",1,null,"R CARLOS MANUEL DOS SANTOS PINTO",9718,9726,{"$raw":"00000000"},"110406","R CARLOS MANUEL DOS SANTOS PINTO","INOP",3,"T",62.79886,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFERES JOSÉ VENTURA RODRIGUES",null,null,"R",null,"110406",1,null,"R ALFERES JOSÉ VENTURA RODRIGUES",9719,9727,{"$raw":"00000000"},"110406","R ALFERES JOSÉ VENTURA RODRIGUES","INOP",3,"T",29.79171,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9720,9728,{"$raw":"00000000"},"110406","MJ.3.5959","INOP",3,"T",24.38981,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,9721,9729,{"$raw":"00000000"},"110406","MJ.3.5960","INOP",3,"T",217.29782,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9722,9730,{"$raw":"00000000"},"110406","MJ.3.5961","INOP",3,"T",173.56501,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9723,9731,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,155.55720,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",9724,9732,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",25.60655,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",9725,9733,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",361.70442,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CIPRIANO INÁCIO",null,null,"R",null,"110406",1,null,"R CIPRIANO INÁCIO",9726,9734,{"$raw":"00000000"},"110406","R CIPRIANO INÁCIO","INOP",3,"T",36.71879,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DA PONTE",null,null,"R",null,"110401",1,null,"R DA PONTE",9727,9735,{"$raw":"00000000"},"110401","R DA PONTE","OPER",1,"A",133.01216,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",9728,9736,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",143.64762,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL FECHADO",null,null,"TV",null,"110406",1,null,"TV DO OLIVAL FECHADO",9729,9737,{"$raw":"00000000"},"110406","TV DO OLIVAL FECHADO","INOP",3,"T",11.60048,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PAULITO",null,null,"TV",null,"110406",1,null,"TV DO PAULITO",9730,9738,{"$raw":"00000000"},"110406","TV DO PAULITO","INOP",3,"T",103.11826,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"BC",null,"110406",1,null,"BC DA FONTE",9731,9739,{"$raw":"00000000"},"110406","BC DA FONTE","INOP",3,"T",103.12774,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA MADALENA",null,null,"R",null,"110406",1,null,"R DA MADALENA",9732,9740,{"$raw":"00000000"},"110406","R DA MADALENA","INOP",3,"T",18.94637,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA AZINHAGA","Anteriormente \"R DA MADALENA\", Processo 03/2010/38",null,"R",null,"110406",1,null,"R DA AZINHAGA",9733,9741,{"$raw":"00000000"},"110406","R DA AZINHAGA","INOP",3,"T",8.62017,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DA IGREJA",null,null,"R",null,"110406",1,null,"R DA IGREJA",9734,9742,{"$raw":"00000000"},"110406","R DA IGREJA","OPER",2,"A",113.18513,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CSL DA PORTELA",null,null,"R",null,"110406",1,null,"R DO CSL DA PORTELA",9735,9743,{"$raw":"00000000"},"110406","R DO CSL DA PORTELA","INOP",3,"T",190.83395,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,9736,9744,{"$raw":"00000000"},"110406","MJ.3.5962","INOP",3,"T",86.12306,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9737,9745,{"$raw":"00000000"},"110406","MJ.3.5963","INOP",3,"T",459.44276,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AMADEU VENTURA",null,null,"R",null,"110406",1,null,"R AMADEU VENTURA",9738,9746,{"$raw":"00000000"},"110406","R AMADEU VENTURA","INOP",3,"T",33.74103,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9739,9747,{"$raw":"00000000"},"110406","MJ.3.5964","INOP",3,"T",193.06392,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9740,9748,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,299.65066,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL CESTEIRO",null,null,"R",null,"110406",1,null,"R DO CASAL CESTEIRO",9741,9749,{"$raw":"00000000"},"110406","R DO CASAL CESTEIRO","INOP",3,"T",50.61298,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CESTEIRO",null,null,"CC",null,"110406",1,null,"CC DO CESTEIRO",9742,9750,{"$raw":"00000000"},"110406","CC DO CESTEIRO","INOP",3,"T",24.14876,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9743,9751,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,206.96564,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9744,9752,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,315.36564,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL CESTEIRO",null,null,"R",null,"110406",1,null,"R DO CASAL CESTEIRO",9745,9753,{"$raw":"00000000"},"110406","R DO CASAL CESTEIRO","INOP",3,"T",69.88202,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL CESTEIRO",null,null,"R",null,"110406",1,null,"R DO CASAL CESTEIRO",9746,9754,{"$raw":"00000000"},"110406","R DO CASAL CESTEIRO","INOP",3,"T",23.15968,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL CESTEIRO",null,null,"R",null,"110406",1,null,"R DO CASAL CESTEIRO",9747,9755,{"$raw":"00000000"},"110406","R DO CASAL CESTEIRO","INOP",3,"T",199.20217,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9748,9756,{"$raw":"00000000"},"110406","MJ.3.5965","INOP",3,"T",360.94291,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CSL DA PORTELA",null,null,"R",null,"110406",1,null,"R DO CSL DA PORTELA",9749,9757,{"$raw":"00000000"},"110406","R DO CSL DA PORTELA","INOP",3,"T",72.60847,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CSL DA PORTELA",null,null,"R",null,"110406",1,null,"R DO CSL DA PORTELA",9750,9758,{"$raw":"00000000"},"110406","R DO CSL DA PORTELA","INOP",3,"T",100.15867,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9751,9759,{"$raw":"00000000"},"110406","MJ.3.5966","INOP",3,"T",6.91610,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9752,9760,{"$raw":"00000000"},"110406","MJ.1.218","OPER",1,"A",3.05262,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9753,9761,{"$raw":"00000000"},"110406","MJ.1.219","OPER",1,"A",3.33793,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9754,9762,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.34521,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9755,9763,{"$raw":"00000000"},"110406","MJ.3.5967","INOP",3,"T",197.83752,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9756,9764,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.67696,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9757,9765,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,65.19130,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9758,9766,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.92857,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9759,9767,{"$raw":"00000000"},"110406","MJ.3.5968","INOP",3,"T",3.06111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9760,9768,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.95959,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9761,9769,{"$raw":"00000000"},"110406","MJ.3.5969","INOP",3,"T",2.26636,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9762,9770,{"$raw":"00000000"},"110406","MJ.3.5970","INOP",3,"T",2.25435,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"CSL DA PORTELA",null,null,"R",null,"110406",1,null,"R Alferes José Ventura Rodrigues",9763,9771,{"$raw":"00000000"},"110406","R Alferes José Ventura Rodrigues","INOP",3,"T",117.92787,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9764,9772,{"$raw":"00000000"},"110406","MJ.3.5971","INOP",3,"T",43.65556,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9765,9773,{"$raw":"00000000"},"110406","MJ.3.5972","INOP",3,"T",2.59538,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,9766,9774,{"$raw":"00000000"},"110406","MJ.3.5973","INOP",3,"T",2.70091,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9767,9775,{"$raw":"00000000"},"110406","MJ.3.5974","INOP",3,"T",107.70707,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LADEIRA DAS COELHAS",null,null,"R",null,"110406",1,null,"R LADEIRA DAS COELHAS",9768,9776,{"$raw":"00000000"},"110406","R LADEIRA DAS COELHAS","INOP",3,"T",49.22729,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9769,9777,{"$raw":"00000000"},"110406","MJ.3.5975","INOP",3,"T",72.71050,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9770,9778,{"$raw":"00000000"},"110406","MJ.3.5976","INOP",3,"T",194.58755,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9771,9779,{"$raw":"00000000"},"110406","MJ.3.5977","INOP",3,"T",62.32403,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9772,9780,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,233.95749,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9773,9781,{"$raw":"00000000"},"110406","MJ.3.5978","INOP",3,"T",19.84686,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9774,9782,{"$raw":"00000000"},"110406","MJ.3.5979","INOP",3,"T",2.13265,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9775,9783,{"$raw":"00000000"},"110406","MJ.3.5980","INOP",3,"T",87.27414,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9776,9784,{"$raw":"00000000"},"110406","MJ.3.5981","INOP",3,"T",1.96657,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9777,9785,{"$raw":"00000000"},"110406","MJ.3.5982","INOP",3,"T",4.27276,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9778,9786,{"$raw":"00000000"},"110406","MJ.3.5983","INOP",3,"T",26.75061,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9779,9787,{"$raw":"00000000"},"110406","MJ.3.5984","INOP",3,"T",3.35006,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9780,9788,{"$raw":"00000000"},"110406","MJ.3.5985","INOP",3,"T",76.74739,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9781,9789,{"$raw":"00000000"},"110406","MJ.3.5986","INOP",3,"T",3.47135,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9782,9790,{"$raw":"00000000"},"110406","MJ.3.5987","INOP",3,"T",2.74651,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9783,9791,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.50599,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9784,9792,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,104.92183,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9785,9793,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,6.45392,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9786,9794,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,149.84330,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9787,9795,{"$raw":"00000000"},"110406","MJ.3.5988","INOP",3,"T",20.69612,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9788,9796,{"$raw":"00000000"},"110406","MJ.3.5989","INOP",3,"T",60.69658,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BARROCA",null,null,"R",null,"110402",1,null,"R DA BARROCA",9789,9797,{"$raw":"00000000"},"110402","R DA BARROCA","INOP",3,"T",25.12299,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BARROCA",null,null,"R",null,"110402",1,null,"R DA BARROCA",9790,9798,{"$raw":"00000000"},"110402","R DA BARROCA","INOP",3,"T",8.67842,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,9791,9799,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,33.96184,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFERES JOSÉ VENTURA RODRIGUES",null,null,"R",null,"110406",1,null,"R ALFERES JOSÉ VENTURA RODRIGUES",9792,9800,{"$raw":"00000000"},"110406","R ALFERES JOSÉ VENTURA RODRIGUES","INOP",3,"T",2.71840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9793,9801,{"$raw":"00000000"},"110406","MJ.3.5990","INOP",3,"T",2.28790,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9794,9802,{"$raw":"00000000"},"110406","MJ.3.5991","INOP",3,"T",140.88933,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","do Cesteiro",null,null,null,null,null,"110406",1,null,null,9795,9803,{"$raw":"00000000"},"110406","MJ.3.5992","INOP",3,"T",47.48989,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL","do Cesteiro",null,null,null,null,null,"110406",1,null,null,9796,9804,{"$raw":"00000000"},"110406","MJ.3.5993","INOP",3,"T",47.14477,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9797,9805,{"$raw":"00000000"},"110406","MJ.3.5994","INOP",3,"T",1.78011,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9798,9806,{"$raw":"00000000"},"110406","MJ.3.5995","INOP",3,"T",0.01414,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9799,9807,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,69.62349,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9800,9808,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,2.43130,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9801,9809,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,207.10994,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CSL",null,"DA PORTELA",null,null,"R",null,"110406",1,null,"CSL DA PORTELA",9802,9810,{"$raw":"00000000"},"110406","CSL DA PORTELA","INOP",3,"T",200.97942,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9803,9811,{"$raw":"00000000"},"110406","MJ.3.5996","INOP",3,"T",195.68582,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,9804,9812,{"$raw":"00000000"},"110406","MJ.3.5997","INOP",3,"T",119.09494,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9805,9813,{"$raw":"00000000"},"110406","MJ.3.5998","INOP",3,"T",217.05914,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9806,9814,{"$raw":"00000000"},"110406","MJ.3.5999","INOP",3,"T",244.36500,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9807,9815,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,173.42553,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9808,9816,{"$raw":"00000000"},"110406","MJ.3.6000","INOP",3,"T",116.39451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9809,9817,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,242.12761,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9810,9818,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,143.63715,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9811,9819,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,224.99799,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9812,9820,{"$raw":"00000000"},"110406","MJ.3.6001","INOP",3,"T",171.12866,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9813,9821,{"$raw":"00000000"},"110406","MJ.3.6002","INOP",3,"T",265.37427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9814,9822,{"$raw":"00000000"},"110406","MJ.3.6003","INOP",3,"T",158.86158,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9815,9823,{"$raw":"00000000"},"110406","MJ.3.6004","INOP",3,"T",22.62876,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110406",1,null,null,9816,9824,{"$raw":"00000000"},"110406","MJ.3.6005","INOP",3,"T",166.64699,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9817,9825,{"$raw":"00000000"},"110406","MJ.3.6006","INOP",3,"T",269.55645,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9818,9826,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,15.82239,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9819,9827,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,259.88615,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9820,9828,{"$raw":"00000000"},"110406","MJ.3.6007","INOP",3,"T",145.04688,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9821,9829,{"$raw":"00000000"},"110406","MJ.3.6008","INOP",3,"T",76.44733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9822,9830,{"$raw":"00000000"},"110406","MJ.3.6009","INOP",3,"T",203.94034,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9823,9831,{"$raw":"00000000"},"110406","MJ.3.6010","INOP",3,"T",149.51570,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9824,9832,{"$raw":"00000000"},"110406","MJ.3.6011","INOP",3,"T",181.08306,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CESTEIRO",null,null,"CC",null,"110406",1,null,"CC DO CESTEIRO",9825,9833,{"$raw":"00000000"},"110406","CC DO CESTEIRO","INOP",3,"T",56.30056,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9826,9834,{"$raw":"00000000"},"110406","MJ.3.6012","INOP",3,"T",67.09413,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9827,9835,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,137.78773,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9828,9836,{"$raw":"00000000"},"110406","MJ.3.6013","INOP",3,"T",342.99572,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110406",1,null,"EN 361",9829,9837,{"$raw":"00000000"},"110406","EN 361","OPER",1,"A",3.06726,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110406",1,null,"EN 361",9830,9838,{"$raw":"00000000"},"110406","EN 361","OPER",1,"A",5.81509,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110406",1,null,"EN 361",9831,9839,{"$raw":"00000000"},"110406","EN 361","OPER",1,"A",46.06131,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,null,0,null,"EN 361",9832,9840,{"$raw":"00000000"},null,"EN 361",null,1,"A",31.04157,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,null,0,null,"EN 361",9833,9841,{"$raw":"00000000"},null,"EN 361",null,1,"A",212.22501,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9834,9842,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",59.65590,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9835,9843,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",3.61581,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,null,0,null,"EN 115",9836,9844,{"$raw":"00000000"},null,"EN 115",null,1,"A",90.65440,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9837,9845,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,772.05928,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9838,9846,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,190.21341,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9839,9847,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,3.44420,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,null,0,null,"EN 115",9840,9848,{"$raw":"00000000"},null,"EN 115",null,1,"A",220.14412,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9841,9849,{"$raw":"00000000"},"110406","MJ.3.6014","INOP",3,"T",30.76584,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9842,9850,{"$raw":"00000000"},"110406","MJ.3.6015","INOP",3,"T",243.73031,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9843,9851,{"$raw":"00000000"},"110406","MJ.3.6016","INOP",3,"T",80.80264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9844,9852,{"$raw":"00000000"},"110406","MJ.3.6017","INOP",3,"T",91.60974,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA EIRA",null,"24 set 2002","R",null,"110408",1,null,"R DA EIRA",9845,9853,{"$raw":"00000000"},"110408","R DA EIRA","OPER",1,"A",10.82104,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",9846,9854,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",16.52090,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110406",1,null,"EN 115",9847,9855,{"$raw":"00000000"},"110406","EN 115","OPER",1,"A",370.84812,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL FECHADO",null,null,"TV",null,"110406",1,null,"TV DO OLIVAL FECHADO",9848,9856,{"$raw":"00000000"},"110406","TV DO OLIVAL FECHADO","OPER",2,"A",71.19533,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,9849,9857,{"$raw":"00000000"},null,"MJ.3.6018",null,3,"T",27.78196,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,9850,9858,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,31.14662,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9851,9859,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,4.91935,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,9852,9860,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,96.88842,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9853,9861,{"$raw":"00000000"},"110406","MJ.1.220","OPER",1,"A",2.49018,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9854,9862,{"$raw":"00000000"},"110406","MJ.3.6019","INOP",3,"T",119.39451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9855,9863,{"$raw":"00000000"},"110406","MJ.3.6020","INOP",3,"T",259.00325,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9856,9864,{"$raw":"00000000"},"110406","MJ.3.6021","INOP",3,"T",59.53438,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9857,9865,{"$raw":"00000000"},"110406","MJ.3.6022","INOP",3,"T",280.21266,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,9858,9866,{"$raw":"00000000"},"110406","MJ.3.6023","INOP",3,"T",137.72822,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","ESTRADA DO CADAVAL",null,null,"R",null,"110403",1,null,"R ESTRADA DO CADAVAL",9859,9867,{"$raw":"00000000"},"110403","R ESTRADA DO CADAVAL","OPER",1,"A",98.82415,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TORRE",null,null,"R",null,"110401",1,null,"R DA TORRE",9860,9868,{"$raw":"00000000"},"110401","R DA TORRE","INOP",3,"T",181.86962,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TORRE",null,null,"R",null,"110401",1,null,"R DA TORRE",9861,9869,{"$raw":"00000000"},"110401","R DA TORRE","INOP",3,"T",13.93224,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TORRE",null,null,"ESTR",null,"110401",1,null,"ESTR DA TORRE",9862,9870,{"$raw":"00000000"},"110401","ESTR DA TORRE","INOP",3,"T",399.32263,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GOMES DA SILVA",null,null,"R",null,"110401",1,null,"R GOMES DA SILVA",9863,9871,{"$raw":"00000000"},"110401","R GOMES DA SILVA","INOP",3,"T",4.41953,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA REGUEIRA",null,null,"R",null,"110404",1,null,"R DA REGUEIRA",9864,9872,{"$raw":"00000000"},"110404","R DA REGUEIRA","INOP",3,"T",46.17600,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",9865,9873,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",53.72006,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BRÁZ",null,null,"CSL",null,"110404",1,null,"CSL DO BRÁZ",9866,9874,{"$raw":"00000000"},"110404","CSL DO BRÁZ","OPER",1,"A",283.17699,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA AZINHAGA",null,null,"R",null,"110404",1,null,"R DA AZINHAGA",9867,9875,{"$raw":"00000000"},"110404","R DA AZINHAGA","INOP",3,"T",217.99814,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MARTINS",null,null,"R",null,"110401",1,null,"R DOS MARTINS",9868,9876,{"$raw":"00000000"},"110401","R DOS MARTINS","INOP",3,"A",222.39018,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","615","4 DE SETEMBRO",null,null,"R",null,"110406",1,null,"R 4 DE SETEMBRO",9870,9878,{"$raw":"00000000"},"110406","R 4 DE SETEMBRO","OPER",2,"A",164.96823,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110406",1,null,"EN 361",9871,9879,{"$raw":"00000000"},"110406","EN 361","OPER",1,"A",401.89644,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HELENA",null,null,"RAMPA",null,"110410",1,null,"RAMPA DA HELENA",9872,9880,{"$raw":"00000000"},"110410","RAMPA DA HELENA","OPER",1,"A",90.97271,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",9873,9881,{"$raw":"00000000"},"110410","R DAS FLORES","INOP",3,"T",57.78217,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE","EM ACTA CONSTA BC DA ESCOLA","23 Out 2000","R",null,"110405",1,null,"R DA ESCOLA",9874,9882,{"$raw":"00000000"},"110405","R DA ESCOLA","INOP",3,"T",27.01056,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",1,null,"R CASAIS DO ENTRUDO",9875,9883,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",1,"A",151.76148,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"R",null,"110409",1,null,"R D AFONSO HENRIQUES",9876,9884,{"$raw":"00000000"},"110409","R D AFONSO HENRIQUES","INOP",3,"T",43.17775,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",9877,9885,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",199.47461,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTO ANTONIO",null,null,"LG",null,"110410",1,null,"LG SANTO ANTONIO",9878,9886,{"$raw":"00000000"},"110410","LG SANTO ANTONIO","INOP",3,"T",30.07590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ARNEIROS",null,null,"R",null,"110410",1,null,"R DOS ARNEIROS",9879,9887,{"$raw":"00000000"},"110410","R DOS ARNEIROS","INOP",3,"T",53.64184,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AMADEU VENTURA",null,null,"R",null,"110406",1,null,"R AMADEU VENTURA",9880,9888,{"$raw":"00000000"},"110406","R AMADEU VENTURA","INOP",3,"T",42.64407,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S SIMÃO",null,null,"TV",null,"110409",1,null,"TV S SIMÃO",9881,9889,{"$raw":"00000000"},"110409","TV S SIMÃO","INOP",3,"T",21.21439,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","1024",null,null,"CM",null,"110406",1,null,"CM 1024",9882,9890,{"$raw":"00000000"},"110406","CM 1024","OPER",2,"A",86.59499,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",9883,9891,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",196.85122,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",9884,9892,{"$raw":"00000000"},"110410","R DAS FLORES","INOP",3,"T",78.79988,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",9885,9893,{"$raw":"00000000"},"110410","R DAS FLORES","OPER",2,"A",115.59303,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON DE MATOS",9886,9894,{"$raw":"00000000"},"110408","R NORTON DE MATOS","OPER",1,"A",32.29066,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA ANTÓNIA BORGES DE CASTRO",null,null,"R",null,"110405",1,null,"R MARIA ANTÓNIA BORGES DE CASTRO",9887,9895,{"$raw":"00000000"},"110405","R MARIA ANTÓNIA BORGES DE CASTRO","OPER",2,"A",83.47535,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AMADEU VENTURA",null,null,"R",null,"110406",1,null,"R AMADEU VENTURA",9888,9896,{"$raw":"00000000"},"110406","R AMADEU VENTURA","INOP",3,"T",88.17410,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AMADEU VENTURA",null,null,"R",null,"110406",1,null,"R AMADEU VENTURA",9889,9897,{"$raw":"00000000"},"110406","R AMADEU VENTURA","INOP",3,"T",127.88908,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS PEDREIRAS",null,null,"ESTR",null,"110406",1,null,"ESTR DAS PEDREIRAS",9890,9898,{"$raw":"00000000"},"110406","ESTR DAS PEDREIRAS","INOP",3,"T",322.60650,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ COELHO",null,"18 Jun 2002","R",null,"110405",1,null,"R JOSÉ COELHO",9891,9899,{"$raw":"00000000"},"110405","R JOSÉ COELHO","INOP",3,"T",124.87737,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CANTINANAS",null,"18 Jun 2002","R",null,"110405",1,null,"R DAS CANTINANAS",9892,9900,{"$raw":"00000000"},"110405","R DAS CANTINANAS","INOP",3,"T",557.66440,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,"26 ago 2003","R",null,"110410",1,null,"R DA CAPELA",9893,9901,{"$raw":"00000000"},"110410","R DA CAPELA","INOP",3,"T",20.49925,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA MURTA",null,null,"QTA",null,"110402",1,null,"QTA DA MURTA",9894,9902,{"$raw":"00000000"},"110402","QTA DA MURTA","OPER",2,"A",450.01501,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","DA RIBEIRA",null,"07 Set 2004","ESTR",null,"110405",1,null,"ESTR DA RIBEIRA",9895,9903,{"$raw":"00000000"},"110405","ESTR DA RIBEIRA","OPER",1,"A",433.93054,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE RIBEIRA",null,"14/06/2005","TV",null,"110410",1,null,"TV DA FONTE RIBEIRA",9896,9904,{"$raw":"00000000"},"110410","TV DA FONTE RIBEIRA","INOP",3,"T",77.33169,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"TV",null,"110407",1,null,"TV DA IGREJA",9897,9905,{"$raw":"00000000"},"110407","TV DA IGREJA","INOP",3,"T",12.21089,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"TV",null,"110407",1,null,"TV DA IGREJA",9898,9906,{"$raw":"00000000"},"110407","TV DA IGREJA","OPER",2,"A",57.56036,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CHÃES",null,null,"CSL",null,"110406",1,null,"CSL DOS CHÃES",9899,9907,{"$raw":"00000000"},"110406","CSL DOS CHÃES","INOP",3,"T",2.84791,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA AZENHA",null,null,"R",null,"110405",1,null,"R DA AZENHA",9900,9908,{"$raw":"00000000"},"110405","R DA AZENHA","INOP",3,"T",421.44349,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CASTANHOLAS",null,"27 Jan 2004","R",null,"110402",1,null,"R DAS CASTANHOLAS",9901,9909,{"$raw":"00000000"},"110402","R DAS CASTANHOLAS","INOP",3,"T",82.78030,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CHÃES",null,null,"CSL",null,"110406",1,null,"CSL DOS CHÃES",9902,9910,{"$raw":"00000000"},"110406","CSL DOS CHÃES","INOP",3,"T",174.19459,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS BOMBEIROS",null,null,"AV",null,"110402",1,null,"AV DOS BOMBEIROS",9903,9911,{"$raw":"00000000"},"110402","AV DOS BOMBEIROS","INOP",3,"T",97.19630,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO RAMEIRAL",null,null,"R",null,"110405",1,null,"R DO RAMEIRAL",9904,9912,{"$raw":"00000000"},"110405","R DO RAMEIRAL","OPER",2,"A",51.57617,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ADELIDIA DE JESUS SOUSA SOARES",null,null,"R",null,"110409",1,null,"R ADELIDIA DE JESUS SOUSA SOARES",9905,9913,{"$raw":"00000000"},"110409","R ADELIDIA DE JESUS SOUSA SOARES","INOP",3,"T",40.12528,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"20 DE JANEIRO",null,null,"R",null,"110407",1,null,"R 20 DE JANEIRO",9906,9914,{"$raw":"00000000"},"110407","R 20 DE JANEIRO","OPER",2,"A",192.86962,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","569",null,null,"EM",null,null,0,null,"EM 569",9907,9915,{"$raw":"00000000"},null,"EM 569",null,1,"A",186.86108,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",9908,9916,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",255.99629,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,"R",null,"110402",1,null,"R",9909,9917,{"$raw":"00000000"},"110402","R","INOP",3,"T",75.68411,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO HOSPITAL",null,null,"TV",null,"110402",1,null,"TV DO HOSPITAL",9910,9918,{"$raw":"00000000"},"110402","TV DO HOSPITAL","INOP",3,"T",30.16356,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,9911,9919,{"$raw":"00000000"},"110410","MJ.2.372","OPER",2,"A",25.46527,5.00000,"MAN","ESI","ESI","ESI","ESI",5,0,0,0,0,2,0,0,0,0,1,0,0,0,0,null,null]
["1",null,null,"JOAQUIM DOMINGOS",null,"15 Mar 1999","R",null,"110402",1,null,"R JOAQUIM DOMINGOS",9912,9920,{"$raw":"00000000"},"110402","R JOAQUIM DOMINGOS","INOP",3,"T",217.72393,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",9913,9921,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",6.20435,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","DA CARRASQUEIRA",null,null,"R",null,"110410",1,null,"R DA CARRASQUEIRA",9914,9922,{"$raw":"00000000"},"110410","R DA CARRASQUEIRA","OPER",2,"A",356.71758,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO HENRIQUES",null,null,"LG",null,"110410",1,null,"LG JOÃO HENRIQUES",9915,9923,{"$raw":"00000000"},"110410","LG JOÃO HENRIQUES","INOP",3,"T",26.07104,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,"26 ago 2003","R",null,"110410",1,null,"R DA CAPELA",9916,9924,{"$raw":"00000000"},"110410","R DA CAPELA","INOP",3,"T",26.17387,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,"26 ago 2003","R",null,"110410",1,null,"R DA CAPELA",9917,9925,{"$raw":"00000000"},"110410","R DA CAPELA","INOP",3,"T",119.06233,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRINCIPAL",null,"SIM","R",null,"110410",1,null,"R PRINCIPAL",9918,9926,{"$raw":"00000000"},"110410","R PRINCIPAL","INOP",3,"T",10.43586,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,"26 ago 2003","R",null,"110410",1,null,"R DO OUTEIRO",9919,9927,{"$raw":"00000000"},"110410","R DO OUTEIRO","INOP",3,"T",187.41973,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA AZENHA",null,"26 ago 2003","R",null,"110410",1,null,"R DA AZENHA",9920,9928,{"$raw":"00000000"},"110410","R DA AZENHA","INOP",3,"T",75.43823,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRIMAVERA",null,null,"R",null,"110410",1,null,"R PRIMAVERA",9921,9929,{"$raw":"00000000"},"110410","R PRIMAVERA","INOP",3,"T",642.17419,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA ANTÓNIA BORGES DO CASTRO",null,null,"R",null,"110405",1,null,"R MARIA ANTÓNIA BORGES DE CASTRO",9922,9930,{"$raw":"00000000"},"110405","R MARIA ANTÓNIA BORGES DE CASTRO","OPER",1,"A",26.86838,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL B. VIVAS",null,null,"R",null,"110407",1,null,"R MANUEL B. VIVAS",9923,9931,{"$raw":"00000000"},"110407","R MANUEL B. VIVAS","INOP",3,"T",54.00339,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ BENTO MARQUES",null,null,"R",null,"110403",1,null,"R JOSÉ BENTO MARQUES",9924,9932,{"$raw":"00000000"},"110403","R JOSÉ BENTO MARQUES","INOP",3,"T",22.66373,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOAQUIM FERREIRA",null,null,"R",null,"110403",1,null,"R JOAQUIM FERREIRA",9925,9933,{"$raw":"00000000"},"110403","R JOAQUIM FERREIRA","INOP",3,"T",17.64194,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PALMIRA CALISTO",null,null,"R",null,"110407",1,null,"R PALMIRA CALISTO",9926,9934,{"$raw":"00000000"},"110407","R PALMIRA CALISTO","OPER",2,"A",224.97007,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",9927,9935,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",17.84690,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110409",1,null,"EN 361",9928,9936,{"$raw":"00000000"},"110409","EN 361","OPER",1,"A",282.58358,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"TV",null,"110409",1,null,"TV DA FONTE",9929,9937,{"$raw":"00000000"},"110409","TV DA FONTE","OPER",1,"A",31.14706,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110409",1,null,"EN 115",9930,9938,{"$raw":"00000000"},"110409","EN 115","OPER",1,"A",242.32669,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","570-1",null,null,"EM",null,"110402",1,null,"EM 570-1",9931,9939,{"$raw":"00000000"},"110402","EM 570-1","OPER",1,"A",12.13095,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE AGOSTO",null,null,"LG",null,"110405",1,null,"LG 15 DE AGOSTO",9932,9940,{"$raw":"00000000"},"110405","LG 15 DE AGOSTO","OPER",2,"A",10.40812,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS BOMBEIROS",null,null,"AV",null,"110402",1,null,"AV DOS BOMBEIROS",9933,9941,{"$raw":"00000000"},"110402","AV DOS BOMBEIROS","OPER",1,"A",92.27858,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL DA LAGOA",null,"10 Set 2002","R",null,"110405",1,null,"R CASAL DA LAGOA",9934,9942,{"$raw":"00000000"},"110405","R CASAL DA LAGOA","INOP",3,"T",195.31187,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",9935,9943,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",83.31510,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SIDONIO PAIS",null,null,"R",null,"110409",1,null,"R SIDONIO PAIS",9936,9944,{"$raw":"00000000"},"110409","R SIDONIO PAIS","OPER",1,"A",121.35492,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PORTO NOGUEIRA",null,null,"QTA",null,"110401",1,null,"QTA PORTO NOGUEIRA",9937,9945,{"$raw":"00000000"},"110401","QTA PORTO NOGUEIRA","INOP",3,"T",393.10348,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",9938,9946,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",128.21583,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","ESTRADA DO CADAVAL",null,null,"R",null,"110403",1,null,"R ESTRADA DO CADAVAL",9939,9947,{"$raw":"00000000"},"110403","R ESTRADA DO CADAVAL","OPER",1,"A",76.91529,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",9940,9948,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","OPER",1,"A",56.67357,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",9941,9949,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",56.93718,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO COMÉRCIO",null,null,"R",null,"110407",1,null,"R DO COMÉRCIO",9942,9950,{"$raw":"00000000"},"110407","R DO COMÉRCIO","OPER",1,"A",11.45858,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"LG",null,"110402",1,null,"LG DA IGREJA",9943,9951,{"$raw":"00000000"},"110402","LG DA IGREJA","INOP",3,"T",5.85433,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"LG",null,"110402",1,null,"LG DA IGREJA",9944,9952,{"$raw":"00000000"},"110402","LG DA IGREJA","INOP",3,"T",14.32548,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FRANCISCO HENRIQUES CORREIA",null,null,"R",null,"110402",1,null,"R FRANCISCO HENRIQUES CORREIA",9945,9953,{"$raw":"00000000"},"110402","R FRANCISCO HENRIQUES CORREIA","INOP",3,"T",70.92896,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110402",1,null,"R DO CAMPO DA BOLA",9946,9954,{"$raw":"00000000"},"110402","R DO CAMPO DA BOLA","INOP",3,"T",358.10044,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO PAULO II",null,"22/03/2005, 05/04/2005","R",null,"110402",1,null,"R JOÃO PAULO II",9947,9955,{"$raw":"00000000"},"110402","R JOÃO PAULO II","INOP",3,"T",112.48387,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,9948,9956,{"$raw":"00000000"},"110410","MJ.3.6024","INOP",3,"T",17.82687,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,9949,9957,{"$raw":"00000000"},"110410","MJ.3.6025","INOP",3,"T",264.36774,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,9950,9958,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,44.90950,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE R. DE MACEDO",null,null,"R",null,"110402",1,null,"R DR DUARTE R. DE MACEDO",9951,9959,{"$raw":"00000000"},"110402","R DR DUARTE R. DE MACEDO","OPER",1,"A",91.34124,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",9952,9960,{"$raw":"00000000"},"110410","R DAS FLORES","INOP",3,"T",39.51283,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ARRABALDE",null,null,"TV",null,"110401",1,null,"TV DO ARRABALDE",9953,9961,{"$raw":"00000000"},"110401","TV DO ARRABALDE","INOP",3,"T",83.78293,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110410",1,null,"R DA FONTE",9954,9962,{"$raw":"00000000"},"110410","R DA FONTE","INOP",3,"T",118.08375,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",9955,9963,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",25.77663,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DAS MERCÊS",null,null,"R",null,"110409",1,null,"R Nª SENHORA DAS MERCÊS",9956,9964,{"$raw":"00000000"},"110409","R Nª SENHORA DAS MERCÊS","OPER",1,"A",78.43063,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALBERDEIRO",null,"15 Mar 1999. \"TV do Albardeiro\"","TV",null,"110402",1,null,"TV DO ALBERDEIRO",9957,9965,{"$raw":"00000000"},"110402","TV DO ALBERDEIRO","INOP",3,"T",28.85746,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FERNANDO ABREU E FARIA",null,null,"TV",null,"110402",1,null,"TV DR FERNANDO ABREU E FARIA",9958,9966,{"$raw":"00000000"},"110402","TV DR FERNANDO ABREU E FARIA","OPER",2,"A",39.04001,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO LEAL DUARTE",null,null,"R",null,"110402",1,null,"R ANTÓNIO LEAL DUARTE",9959,9967,{"$raw":"00000000"},"110402","R ANTÓNIO LEAL DUARTE","INOP",3,"T",79.67040,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL B. VIVAS",null,null,"R",null,"110407",1,null,"R MANUEL B. VIVAS",9960,9968,{"$raw":"00000000"},"110407","R MANUEL B. VIVAS","INOP",3,"T",26.93154,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,9961,9969,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,56.68716,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ MARIA NOBRE JUNIOR",null,null,"R",null,"110403",1,null,"R JOSÉ MARIA NOBRE JUNIOR",9962,9970,{"$raw":"00000000"},"110403","R JOSÉ MARIA NOBRE JUNIOR","INOP",3,"T",18.55782,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZINHA",null,null,"TV",null,"110405",1,null,"TV DA CRUZINHA",9963,9971,{"$raw":"00000000"},"110405","TV DA CRUZINHA","INOP",3,"T",256.97318,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","CASAIS DO ENTRUDO",null,null,"R",null,"110407",2,"110404","R CASAIS DO ENTRUDO",9964,9972,{"$raw":"00000000"},"110407","R CASAIS DO ENTRUDO","OPER",2,"A",128.88502,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110404",1,null,"EM 568",9965,9973,{"$raw":"00000000"},"110404","EM 568","OPER",2,"A",139.06756,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS PEDREIRAS",null,null,"ESTR",null,"110406",1,null,"ESTR DAS PEDREIRAS",9966,9974,{"$raw":"00000000"},"110406","ESTR DAS PEDREIRAS","INOP",3,"T",323.79685,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S JOÃO",null,null,"LG",null,"110406",1,null,"LG S JOÃO",9969,9977,{"$raw":"00000000"},"110406","LG S JOÃO","OPER",2,"A",38.50923,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","PRINCIPAL",null,null,"R",null,"110405",1,null,"R PRINCIPAL",9970,9978,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",2,"A",11.27789,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,null,"LG",null,"110408",1,null,"LG 25 DE ABRIL",9971,9979,{"$raw":"00000000"},"110408","LG 25 DE ABRIL","INOP",3,"T",27.21886,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CORUJEIRA",null,null,"R",null,"110401",1,null,"R DA CORUJEIRA",9972,9980,{"$raw":"00000000"},"110401","R DA CORUJEIRA","INOP",3,"A",181.43848,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS PEDREIRAS",null,null,"ESTR",null,"110406",1,null,"ESTR DAS PEDREIRAS",9973,9981,{"$raw":"00000000"},"110406","ESTR DAS PEDREIRAS","INOP",3,"T",91.81364,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",9974,9982,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",27.34115,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CIDRAL",null,null,"ESTR",null,"110401",1,null,"ESTR DO CIDRAL",9975,9983,{"$raw":"00000000"},"110401","ESTR DO CIDRAL","OPER",2,"A",128.96074,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110404","EN 366",9976,9984,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",55.83950,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",1,"110404","EN 366",9977,9985,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",152.34962,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110404",1,null,"EN 366",9978,9986,{"$raw":"00000000"},"110404","EN 366","OPER",2,"A",98.74473,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CESTEIRO",null,null,"CC",null,"110406",1,null,"CC DO CESTEIRO",9979,9987,{"$raw":"00000000"},"110406","CC DO CESTEIRO","INOP",3,"T",61.58204,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL CESTEIRO",null,null,"R",null,"110406",1,null,"R DO CASAL CESTEIRO",9980,9988,{"$raw":"00000000"},"110406","R DO CASAL CESTEIRO","INOP",3,"T",113.77592,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","568",null,null,"EM",null,"110401",1,null,"EM 568",9981,9989,{"$raw":"00000000"},"110401","EM 568","OPER",1,"A",610.46288,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",9982,9990,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,null,305.67530,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LAGAR",null,null,"TV",null,"110406",1,null,"TV DO LAGAR",9983,9991,{"$raw":"00000000"},"110406","TV DO LAGAR","INOP",3,"T",97.97649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AMADEU VENTURA",null,null,"R",null,"110406",1,null,"R AMADEU VENTURA",9984,9992,{"$raw":"00000000"},"110406","R AMADEU VENTURA","INOP",3,"T",64.81038,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","PROF MARCELO CAETANO","Anteriormente teve a designação de: R 25 de Abril",null,"R",null,"110406",1,null,"R PROF MARCELO CAETANO",9985,9993,{"$raw":"00000000"},"110406","R PROF MARCELO CAETANO","OPER",2,null,272.32174,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",9986,9994,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",245.69729,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110406",1,null,"EN 361",9987,9995,{"$raw":"00000000"},"110406","EN 361","OPER",1,"A",425.64521,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"R",null,"110408",1,null,"R DA ESCOLA",9988,9996,{"$raw":"00000000"},"110408","R DA ESCOLA","OPER",2,"A",104.43930,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PINHAL NOVO",null,"24 set 2002","R",null,"110408",1,null,"R DO PINHAL NOVO",9989,9997,{"$raw":"00000000"},"110408","R DO PINHAL NOVO","OPER",2,"A",99.56298,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",9990,9998,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",720.24840,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110401",2,"110107","EN 366",9991,9999,{"$raw":"00000000"},"110401","EN 366","OPER",1,"A",92.90392,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",9992,10000,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",27.04003,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,9993,10001,{"$raw":"00000000"},"110402","MJ.3.6026","INOP",3,"T",692.82532,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NOSSA SENHORA DA CONCEIÇÃO",null,null,"R",null,"110402",1,null,"R NOSSA SENHORA DA CONCEIÇÃO",9994,10002,{"$raw":"00000000"},"110402","R NOSSA SENHORA DA CONCEIÇÃO","INOP",3,"T",12.07681,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","13 DE JANEIRO",null,null,"R",null,"110402",1,null,"R 13 DE JANEIRO",9995,10003,{"$raw":"00000000"},"110402","R 13 DE JANEIRO","OPER",1,"A",483.97533,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LAGARÃO",null,null,"B",null,null,{"$raw":"*****"},null,null,9996,10004,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,72.79028,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"HUMBERTO DELGADO",null,null,"TV",null,"110408",1,null,"TV HUMBERTO DELGADO",9997,10005,{"$raw":"00000000"},"110408","TV HUMBERTO DELGADO","INOP",3,"T",22.61427,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",9998,10006,{"$raw":"00000000"},"110408","R DA LIBERDADE","OPER",2,"A",21.57756,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CUTELARIA",null,"26 mar 2001","LG",null,"110405",1,null,"LG DA CUTELARIA",9999,10007,{"$raw":"00000000"},"110405","LG DA CUTELARIA","INOP",3,"A",20.26912,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALMIRANTE AMÉRICO TOMÁS",null,null,"R",null,"110409",1,null,"R ALMIRANTE AMÉRICO TOMÁS",10000,10008,{"$raw":"00000000"},"110409","R ALMIRANTE AMÉRICO TOMÁS","INOP",3,"T",10.19137,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO NORTE",null,null,null,null,"110402",1,null,null,10001,10009,{"$raw":"00000000"},"110402","MJ.3.6027","INOP",3,"T",66.71634,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO NORTE",null,null,null,null,"110402",1,null,null,10002,10010,{"$raw":"00000000"},"110402","MJ.3.6028","INOP",3,"T",150.90197,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS RESTAURADORES DO CONCELHO",null,"27 Jan 2004","R",null,"110402",1,null,"R DOS RESTAURADORES DO CONCELHO",10003,10011,{"$raw":"00000000"},"110402","R DOS RESTAURADORES DO CONCELHO","INOP",3,"T",7.15280,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",10004,10012,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",13.63683,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110402",1,null,null,10005,10013,{"$raw":"00000000"},"110402","MJ.3.6029","INOP",3,"T",179.66849,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,10006,10014,{"$raw":"00000000"},"110403","MJ.3.6030","INOP",3,"T",29.45905,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",10007,10015,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",38.98549,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ESCOLAS VELHAS",null,null,"R",null,"110409",1,null,"R DAS ESCOLAS VELHAS",10008,10016,{"$raw":"00000000"},"110409","R DAS ESCOLAS VELHAS","INOP",3,"T",79.29568,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ESCOLAS VELHAS",null,null,"R",null,"110409",1,null,"R DAS ESCOLAS VELHAS",10009,10017,{"$raw":"00000000"},"110409","R DAS ESCOLAS VELHAS","INOP",3,"T",33.44329,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,10010,10018,{"$raw":"00000000"},"110409","MJ.3.6031","INOP",3,"T",175.95316,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,10011,10019,{"$raw":"00000000"},"110409","MJ.3.6032","INOP",3,"T",55.57575,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES","Tem PL","20 Jul 1998","R",null,"110410",1,null,"R DAS FLORES",10012,10020,{"$raw":"00000000"},"110410","R DAS FLORES","INOP",3,"T",11.86241,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","1º MAIO",null,null,"R",null,"110406",1,null,"R 1º MAIO",10013,10021,{"$raw":"00000000"},"110406","R 1º MAIO","OPER",1,"A",263.64765,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS OURIVAS",null,null,"ESTR",null,"110406",1,null,"ESTR DAS OURIVAS",10014,10022,{"$raw":"00000000"},"110406","ESTR DAS OURIVAS","INOP",3,"T",327.26828,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA MADALENA",null,null,"R",null,"110406",1,null,"R DA MADALENA",10015,10023,{"$raw":"00000000"},"110406","R DA MADALENA","INOP",3,"T",80.24037,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",10016,10024,{"$raw":"00000000"},"110408","R DA LIBERDADE","INOP",3,"T",4.21617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO GOMES GAIO",null,null,"R",null,"110409",1,null,"R ANTÓNIO GOMES GAIO",10017,10025,{"$raw":"00000000"},"110409","R ANTÓNIO GOMES GAIO","INOP",3,"T",379.41058,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO GOMES GAIO",null,null,"R",null,"110409",1,null,"R ANTÓNIO GOMES GAIO",10018,10026,{"$raw":"00000000"},"110409","R ANTÓNIO GOMES GAIO","INOP",3,"T",251.40571,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR. AFONSO DE MARCHUETA",null,null,"R",null,"110409",1,null,"R DR. AFONSO DE MARCHUETA",10019,10027,{"$raw":"00000000"},"110409","R DR. AFONSO DE MARCHUETA","INOP",3,"T",63.22497,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR AFONSO DE MARCHUETA",null,null,"R",null,"110409",1,null,"R DR AFONSO DE MARCHUETA",10020,10028,{"$raw":"00000000"},"110409","R DR AFONSO DE MARCHUETA","INOP",3,"T",234.75845,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"RURAL VALE MADEIRO",null,null,"CAM",null,"110407",1,null,"CAM RURAL VALE MADEIRO",10021,10029,{"$raw":"00000000"},"110407","CAM RURAL VALE MADEIRO","INOP",3,"T",64.68125,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","CAM",null,null,null,null,null,null,"110409",1,null,null,10022,10030,{"$raw":"00000000"},"110409","MJ.3.6033","INOP",3,"T",252.81692,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA VISTA",null,null,"R",null,"110409",1,null,"R DA BOA VISTA",10023,10031,{"$raw":"00000000"},"110409","R DA BOA VISTA","INOP",3,"T",327.09443,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"RURAL VALE MADEIRO",null,null,"ESTR",null,"110407",1,null,"ESTR RURAL VALE MADEIRO",10024,10032,{"$raw":"00000000"},"110407","ESTR RURAL VALE MADEIRO","INOP",3,"T",154.36072,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALTO VERDE",null,null,"R",null,"110410",1,null,"R ALTO VERDE",10025,10033,{"$raw":"00000000"},"110410","R ALTO VERDE","INOP",3,"T",201.98051,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110410",1,null,"R DA IGREJA",10026,10034,{"$raw":"00000000"},"110410","R DA IGREJA","INOP",3,"T",35.60974,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ANDORINHAS",null,null,"TV",null,"110408",1,null,"TV DAS ANDORINHAS",10027,10035,{"$raw":"00000000"},"110408","TV DAS ANDORINHAS","OPER",2,"A",69.97164,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","DO EMIGRANTE","Tem PL","20 Jul 1998","LG",null,"110410",1,null,"LG DO EMIGRANTE",10028,10036,{"$raw":"00000000"},"110410","LG DO EMIGRANTE","OPER",2,"A",7.43187,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE AGOSTO",null,null,"LG",null,"110405",1,null,"LG 15 DE AGOSTO",10029,10037,{"$raw":"00000000"},"110405","LG 15 DE AGOSTO","OPER",2,"A",27.08147,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CERRADINHO",null,null,"R",null,"110405",1,null,"R CERRADINHO",10030,10038,{"$raw":"00000000"},"110405","R CERRADINHO","INOP",3,"T",52.86641,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ROMEIRA",null,null,"R",null,"110405",1,null,"R DA ROMEIRA",10031,10039,{"$raw":"00000000"},"110405","R DA ROMEIRA","INOP",3,"T",400.89676,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,10032,10040,{"$raw":"00000000"},"110409","MJ.3.6034","INOP",3,"T",116.12471,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,10033,10041,{"$raw":"00000000"},"110409","MJ.3.6035","INOP",3,"T",37.03779,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DA FONTE",null,null,"BC",null,"110406",1,null,"BC DA FONTE",10034,10042,{"$raw":"00000000"},"110406","BC DA FONTE","INOP",3,"T",18.33816,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ROGERIO CORREIA FRANCISCO",null,null,"R",null,"110406",1,null,"R ROGERIO CORREIA FRANCISCO",10035,10043,{"$raw":"00000000"},"110406","R ROGERIO CORREIA FRANCISCO","INOP",3,"T",34.51649,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S JOÃO DE BRITO",null,null,"CC",null,"110410",1,null,"CC S JOÃO DE BRITO",10036,10044,{"$raw":"00000000"},"110410","CC S JOÃO DE BRITO","INOP",3,"T",65.85225,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,10037,10045,{"$raw":"00000000"},"110409","MJ.3.6036","INOP",3,"T",419.92961,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,10038,10046,{"$raw":"00000000"},"110409","MJ.3.6037","INOP",3,"T",120.64526,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,10039,10047,{"$raw":"00000000"},"110409","MJ.3.6038","INOP",3,"T",253.79272,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DAS MERCÊS",null,null,"R",null,"110409",1,null,"R Nª SENHORA DAS MERCÊS",10040,10048,{"$raw":"00000000"},"110409","R Nª SENHORA DAS MERCÊS","INOP",3,"A",17.42712,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF MARCELO CAETANO",null,null,"LG",null,"110409",1,null,"LG PROF MARCELO CAETANO",10041,10049,{"$raw":"00000000"},"110409","LG PROF MARCELO CAETANO","INOP",3,"T",4.35740,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALVERDE",null,null,"TV",null,"110410",1,null,"TV DO VALVERDE",10042,10050,{"$raw":"00000000"},"110410","TV DO VALVERDE","INOP",3,"T",36.72841,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALVERDE",null,null,"TV",null,"110410",1,null,"TV DO VALVERDE",10043,10051,{"$raw":"00000000"},"110410","TV DO VALVERDE","INOP",3,"T",115.84316,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LUSIADAS",null,null,"LG",null,"110408",1,null,"LG DOS LUSIADAS",10044,10052,{"$raw":"00000000"},"110408","LG DOS LUSIADAS","INOP",3,"T",8.11168,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1021","PRINCIPAL",null,null,"R",null,"110409",1,null,"R PRINCIPAL",10045,10053,{"$raw":"00000000"},"110409","R PRINCIPAL","OPER",1,"A",132.05637,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1021","PRINCIPAL",null,null,"R",null,"110409",1,null,"R PRINCIPAL",10046,10054,{"$raw":"00000000"},"110409","R PRINCIPAL","OPER",1,"A",13.52749,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","20 DE JANEIRO",null,null,"R",null,"110407",1,null,"R 20 DE JANEIRO",10047,10055,{"$raw":"00000000"},"110407","R 20 DE JANEIRO","OPER",1,"A",13.37551,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA AZINHAGA","Anteriormente \"R DA MADALENA\", Processo 03/2010/38",null,"R",null,"110406",1,null,"R DA AZINHAGA",10048,10056,{"$raw":"00000000"},"110406","R DA AZINHAGA","INOP",3,"T",26.42946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CORREIAS",null,null,"R",null,"110406",1,null,"R DOS CORREIAS",10049,10057,{"$raw":"00000000"},"110406","R DOS CORREIAS","INOP",3,"T",403.12160,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ROGERIO CORREIA FRANCISCO",null,null,"R",null,"110406",1,null,"R ROGERIO CORREIA FRANCISCO",10050,10058,{"$raw":"00000000"},"110406","R ROGERIO CORREIA FRANCISCO","INOP",3,"T",30.91272,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DA FONTE",null,null,"BC",null,"110406",1,null,"BC DA FONTE",10051,10059,{"$raw":"00000000"},"110406","BC DA FONTE","INOP",3,"T",19.31278,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DA FONTE",null,null,"BC",null,"110406",1,null,"BC DA FONTE",10052,10060,{"$raw":"00000000"},"110406","BC DA FONTE","INOP",3,"T",15.57151,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"R",null,"110407",1,null,"R DE TRÁS",10053,10061,{"$raw":"00000000"},"110407","R DE TRÁS","OPER",2,"A",82.10028,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"R",null,"110405",1,null,"R DO ROSSIO",10054,10062,{"$raw":"00000000"},"110405","R DO ROSSIO","OPER",2,"A",218.39127,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ALEGRIA",null,null,"R",null,"110410",1,null,"R DA ALEGRIA",10055,10063,{"$raw":"00000000"},"110410","R DA ALEGRIA","INOP",3,"T",11.22424,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRINCIPAL",null,"SIM","R",null,"110410",1,null,"R PRINCIPAL",10056,10064,{"$raw":"00000000"},"110410","R PRINCIPAL","INOP",3,"T",133.22258,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","DAS ROSAS",null,null,"R",null,"110410",1,null,"R DAS ROSAS",10057,10065,{"$raw":"00000000"},"110410","R DAS ROSAS","OPER",2,"A",36.05516,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","DAS ROSAS",null,null,"R",null,"110410",1,null,"R DAS ROSAS",10058,10066,{"$raw":"00000000"},"110410","R DAS ROSAS","OPER",2,"A",9.80976,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",10059,10067,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","INOP",3,"T",33.98418,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","PRINCIPAL",null,null,"R",null,"110405",1,null,"R PRINCIPAL",10060,10068,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",2,"A",22.78025,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DA LIBERDADE",null,null,"R",null,"110405",1,null,"R DA LIBERDADE",10061,10069,{"$raw":"00000000"},"110405","R DA LIBERDADE","OPER",2,"A",75.42008,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"R",null,"110405",1,null,"R DO ROSSIO",10062,10070,{"$raw":"00000000"},"110405","R DO ROSSIO","INOP",3,"T",33.64438,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",10063,10071,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",41.38931,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAJES",null,null,"TV",null,"110410",1,null,"TV DAS LAJES",10064,10072,{"$raw":"00000000"},"110410","TV DAS LAJES","INOP",3,"T",48.93133,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","PRINCIPAL",null,null,"R",null,"110405",1,null,"R PRINCIPAL",10065,10073,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",2,"A",49.26233,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO CRUZEIRO",null,null,"R",null,"110405",1,null,"R DO CRUZEIRO",10066,10074,{"$raw":"00000000"},"110405","R DO CRUZEIRO","OPER",2,"A",102.30587,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRINCIPAL",null,"18 Jun 2002","R",null,"110405",1,null,"R PRINCIPAL",10067,10075,{"$raw":"00000000"},"110405","R PRINCIPAL","INOP",3,"T",111.21504,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRINCIPAL",null,"18 Jun 2002","R",null,"110405",1,null,"R PRINCIPAL",10068,10076,{"$raw":"00000000"},"110405","R PRINCIPAL","INOP",3,"T",13.30850,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ANDORINHAS",null,null,"TV",null,"110408",1,null,"TV DAS ANDORINHAS",10069,10077,{"$raw":"00000000"},"110408","TV DAS ANDORINHAS","INOP",3,"T",17.78883,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS","ST ANTÓNIO?",null,"R",null,"110408",1,null,"R NORTON DE MATOS",10070,10078,{"$raw":"00000000"},"110408","R NORTON DE MATOS","INOP",3,"T",16.83945,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110405",1,null,"R PE JOSÉ INÁCIO PEREIRA",10071,10079,{"$raw":"00000000"},"110405","R PE JOSÉ INÁCIO PEREIRA","INOP",3,"A",67.18983,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PE JOSÉ RIBEIRO DUARTE",null,null,"R",null,"110402",1,null,"R PE JOSÉ RIBEIRO DUARTE",10072,10080,{"$raw":"00000000"},"110402","R PE JOSÉ RIBEIRO DUARTE","INOP",3,"T",26.82120,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","DE SANTA CATARINA",null,null,"R",null,"110407",1,null,"R DE SANTA CATARINA",10073,10081,{"$raw":"00000000"},"110407","R DE SANTA CATARINA","OPER",1,"A",18.79469,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ALEGRIA",null,null,"R",null,"110410",1,null,"R DA ALEGRIA",10074,10082,{"$raw":"00000000"},"110410","R DA ALEGRIA","INOP",3,"T",164.25931,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DA FONTE",null,null,"R",null,"110406",1,null,"R DA FONTE",10075,10083,{"$raw":"00000000"},"110406","R DA FONTE","OPER",2,"A",32.87944,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,10076,10084,{"$raw":"00000000"},"110410","MJ.3.6039","INOP",3,"T",80.48945,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"13 DE JANEIRO",null,null,"R",null,"110407",1,null,"R 13 DE JANEIRO",10077,10085,{"$raw":"00000000"},"110407","R 13 DE JANEIRO","INOP",3,"T",101.89475,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"TV",null,"110407",1,null,"TV DA IGREJA",10078,10086,{"$raw":"00000000"},"110407","TV DA IGREJA","OPER",2,"A",34.14702,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO GARANHÃO",null,null,"R",null,"110405",1,null,"R DO GARANHÃO",10079,10087,{"$raw":"00000000"},"110405","R DO GARANHÃO","INOP",3,"T",167.80571,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",10080,10088,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",147.75460,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO GARANHÃO",null,null,"R",null,"110405",1,null,"R DO GARANHÃO",10081,10089,{"$raw":"00000000"},"110405","R DO GARANHÃO","INOP",3,"T",25.38146,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10082,10090,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",29.22482,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FONTE D`ALÉM",null,null,"R",null,"110410",1,null,"R FONTE D`ALÉM",10083,10091,{"$raw":"00000000"},"110410","R FONTE D`ALÉM","INOP",3,"T",247.29688,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FONTE D`ALÉM",null,null,"R",null,"110410",1,null,"R FONTE D`ALÉM",10084,10092,{"$raw":"00000000"},"110410","R FONTE D`ALÉM","INOP",3,"T",33.42504,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"MARIA DA CONCEIÇÃO",null,null,"BC",null,"110406",1,null,"BC MARIA DA CONCEIÇÃO",10085,10093,{"$raw":"00000000"},"110406","BC MARIA DA CONCEIÇÃO","INOP",3,"T",36.24728,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LADEIRA DAS COELHAS",null,null,"R",null,"110406",1,null,"R LADEIRA DAS COELHAS",10086,10094,{"$raw":"00000000"},"110406","R LADEIRA DAS COELHAS","INOP",3,"T",19.48343,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LUSIADAS",null,null,"LG",null,"110408",1,null,"LG DOS LUSIADAS",10087,10095,{"$raw":"00000000"},"110408","LG DOS LUSIADAS","INOP",3,"T",14.42822,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CAPITÕES",null,"24 set 2002 e 05 nov 2002","R",null,"110402",1,null,"R DOS CAPITÕES",10088,10096,{"$raw":"00000000"},"110402","R DOS CAPITÕES","INOP",3,"T",129.93686,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","DO EMIGRANTE","Tem PL",null,"LG",null,"110410",1,null,"LG DO EMIGRANTE",10089,10097,{"$raw":"00000000"},"110410","LG DO EMIGRANTE","OPER",2,"A",8.58702,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES","Tem PL","20 Jul 1998","R",null,"110410",1,null,"R DAS FLORES",10090,10098,{"$raw":"00000000"},"110410","R DAS FLORES","OPER",2,"A",21.31697,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO GUILHERMINO",null,null,"R",null,"110410",1,null,"R DO GUILHERMINO",10091,10099,{"$raw":"00000000"},"110410","R DO GUILHERMINO","INOP",3,"T",69.59311,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZ",null,null,"LG",null,"110410",1,null,"LG DA CRUZ",10092,10100,{"$raw":"00000000"},"110410","LG DA CRUZ","OPER",2,"A",26.45211,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARRIL",null,null,"TV",null,"110410",1,null,"TV DO CARRIL",10093,10101,{"$raw":"00000000"},"110410","TV DO CARRIL","OPER",2,"A",24.92446,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",10094,10102,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",225.41065,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ARROZ","Dúvidas se é Estrada Vale de Arroz",null,"R",null,"110402",1,null,"R DO VALE DE ARROZ",10095,10103,{"$raw":"00000000"},"110402","R DO VALE DE ARROZ","OPER",2,"A",180.98828,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BARROCA",null,null,"R",null,"110402",1,null,"R DA BARROCA",10096,10104,{"$raw":"00000000"},"110402","R DA BARROCA","INOP",3,"T",53.64739,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ST ANTÓNIO",null,null,"R",null,"110408",1,null,"R ST ANTÓNIO",10097,10105,{"$raw":"00000000"},"110408","R ST ANTÓNIO","INOP",3,"T",32.16823,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DOS GAIOLAS","Já teve como designação R PRINCIPAL",null,"ESTR",null,"110406",1,null,"ESTR DOS GAIOLAS",10098,10106,{"$raw":"00000000"},"110406","ESTR DOS GAIOLAS","OPER",2,"T",62.40445,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS AMAROS",null,null,"R",null,"110410",2,"110405","R DOS AMAROS",10099,10107,{"$raw":"00000000"},"110410","R DOS AMAROS","OPER",2,"A",144.75807,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DA BICA",null,null,"R",null,"110405",1,null,"R DA BICA",10100,10108,{"$raw":"00000000"},"110405","R DA BICA","OPER",2,"A",323.53782,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARRIL",null,null,"R",null,"110410",1,null,"R DO CARRIL",10101,10109,{"$raw":"00000000"},"110410","R DO CARRIL","OPER",2,"A",80.32832,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO QUEIMADO",null,null,"R",null,"110406",1,null,"R DO QUEIMADO",10102,10110,{"$raw":"00000000"},"110406","R DO QUEIMADO","INOP",3,"T",183.03436,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA HORA",null,"26 mar 2001","CARREIRO",null,"110402",1,null,"CARREIRO DA BOA HORA",10103,10111,{"$raw":"00000000"},"110402","CARREIRO DA BOA HORA","INOP",3,"T",63.21335,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PE JOSÉ RIBEIRO DUARTE",null,null,"R",null,"110402",1,null,"R PE JOSÉ RIBEIRO DUARTE",10104,10112,{"$raw":"00000000"},"110402","R PE JOSÉ RIBEIRO DUARTE","INOP",3,"T",118.68450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARRIL",null,null,"R",null,"110410",1,null,"R DO CARRIL",10105,10113,{"$raw":"00000000"},"110410","R DO CARRIL","INOP",3,"T",140.47735,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"R",null,"110410",1,null,"R DAS EIRAS",10106,10114,{"$raw":"00000000"},"110410","R DAS EIRAS","INOP",3,"T",2.77455,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALMIRANTE AMÉRICO TOMÁS",null,null,"R",null,"110409",1,null,"R ALMIRANTE AMÉRICO TOMÁS",10107,10115,{"$raw":"00000000"},"110409","R ALMIRANTE AMÉRICO TOMÁS","INOP",3,"T",33.80609,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF MARCELO CAETANO",null,null,"LG",null,"110409",1,null,"LG PROF MARCELO CAETANO",10108,10116,{"$raw":"00000000"},"110409","LG PROF MARCELO CAETANO","INOP",3,"T",10.95848,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF MARCELO CAETANO",null,null,"LG",null,"110409",1,null,"LG PROF MARCELO CAETANO",10109,10117,{"$raw":"00000000"},"110409","LG PROF MARCELO CAETANO","INOP",3,"T",12.05706,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PAZ",null,null,"R",null,"110402",1,null,"R DA PAZ",10110,10118,{"$raw":"00000000"},"110402","R DA PAZ","INOP",3,"T",27.19760,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,null,null,null,"ESC",null,"110402",1,null,"ESC",10111,10119,{"$raw":"00000000"},"110402","ESC","INOP",3,"T",6.74027,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF EGAS MONIZ",null,null,"R",null,"110408",1,null,"R PROF EGAS MONIZ",10112,10120,{"$raw":"00000000"},"110408","R PROF EGAS MONIZ","INOP",3,"T",25.99349,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",10113,10121,{"$raw":"00000000"},"110408","R DA LIBERDADE","OPER",2,"A",16.27440,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO HENRIQUES DOS SANTOS",null,null,"LG",null,"110410",1,null,"LG JOÃO HENRIQUES DOS SANTOS",10114,10122,{"$raw":"00000000"},"110410","LG JOÃO HENRIQUES DOS SANTOS","INOP",3,"T",20.55752,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL","Dúvidas se é Estrada Militar",null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",10115,10123,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",179.51538,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110410",1,null,"ESTR FLORESTAL",10116,10124,{"$raw":"00000000"},"110410","ESTR FLORESTAL","OPER",2,"A",21.06019,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR DUARTE R. DE MACEDO",null,null,"R",null,"110402",1,null,"R DR DUARTE R. DE MACEDO",10117,10125,{"$raw":"00000000"},"110402","R DR DUARTE R. DE MACEDO","INOP",3,"T",75.05437,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOISÉS",null,null,"R",null,"110405",1,null,"R DO MOISÉS",10118,10126,{"$raw":"00000000"},"110405","R DO MOISÉS","INOP",3,"T",192.46742,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110410",1,null,"R DAS FLORES",10119,10127,{"$raw":"00000000"},"110410","R DAS FLORES","OPER",2,"A",4.30298,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POVO",null,null,"LG",null,"110402",1,null,"LG DO POVO",10120,10128,{"$raw":"00000000"},"110402","LG DO POVO","INOP",3,"T",8.69840,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DR OLIVEIRA DE SALAZAR",null,null,"R",null,"110409",1,null,"R DR OLIVEIRA DE SALAZAR",10121,10129,{"$raw":"00000000"},"110409","R DR OLIVEIRA DE SALAZAR","OPER",1,"A",10.57269,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ SOARES SIOPA",null,null,"LG e JDR",null,"110402",1,null,"LG JOSÉ SOARES SIOPA",10122,10130,{"$raw":"00000000"},"110402","LG JOSÉ SOARES SIOPA","INOP",3,"T",17.96901,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110409",1,null,null,10123,10131,{"$raw":"00000000"},"110409","MJ.3.6040","INOP",3,"T",14.15848,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DO POÇO",null,null,"R",null,"110405",1,null,"R DO POÇO",10124,10132,{"$raw":"00000000"},"110405","R DO POÇO","OPER",2,"A",32.53130,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",10125,10133,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",8.43557,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARVALHEIRO",null,null,"R",null,"110405",1,null,"R DO CARVALHEIRO",10126,10134,{"$raw":"00000000"},"110405","R DO CARVALHEIRO","INOP",3,"T",74.25759,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL DE SANTA MARIA",null,null,"R",null,"110407",1,null,"R CASAL DE SANTA MARIA",10127,10135,{"$raw":"00000000"},"110407","R CASAL DE SANTA MARIA","INOP",3,"T",292.31608,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS RESTAURADORES DO CONCELHO",null,"27 Jan 2004","R",null,"110402",1,null,"R DOS RESTAURADORES DO CONCELHO",10128,10136,{"$raw":"00000000"},"110402","R DOS RESTAURADORES DO CONCELHO","INOP",3,"T",204.81000,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110410",1,null,"ESTR FLORESTAL",10129,10137,{"$raw":"00000000"},"110410","ESTR FLORESTAL","OPER",1,"A",24.07467,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",10130,10138,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",18.39394,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALTA VISTA",null,"5 Nov 2002","R",null,"110402",1,null,"R ALTA VISTA",10131,10139,{"$raw":"00000000"},"110402","R ALTA VISTA","INOP",3,"T",263.43618,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ LOPES RITA",null,null,"LG",null,"110408",1,null,"LG JOSÉ LOPES RITA",10132,10140,{"$raw":"00000000"},"110408","LG JOSÉ LOPES RITA","INOP",3,"T",6.32505,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",10133,10141,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",3.04810,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PE JOSÉ RIBEIRO DUARTE",null,null,"R",null,"110402",1,null,"R PE JOSÉ RIBEIRO DUARTE",10134,10142,{"$raw":"00000000"},"110402","R PE JOSÉ RIBEIRO DUARTE","INOP",3,"T",27.64291,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO DE MENDONÇA",null,null,"R",null,"110403",1,null,"R ANTÓNIO DE MENDONÇA",10135,10143,{"$raw":"00000000"},"110403","R ANTÓNIO DE MENDONÇA","INOP",3,"T",31.38768,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE S JOÃO",null,"15 Mar 1999","TV",null,"110402",1,null,"TV DE S JOÃO",10136,10144,{"$raw":"00000000"},"110402","TV DE S JOÃO","INOP",3,"T",54.28901,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALEXANDRE HERCULANO",null,null,"LG",null,"110409",1,null,"LG ALEXANDRE HERCULANO",10137,10145,{"$raw":"00000000"},"110409","LG ALEXANDRE HERCULANO","INOP",3,"T",83.90914,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",10138,10146,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",48.67408,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",10139,10147,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",78.14896,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO GOMES GAIO",null,null,"R",null,"110409",1,null,"R ANTÓNIO GOMES GAIO",10140,10148,{"$raw":"00000000"},"110409","R ANTÓNIO GOMES GAIO","INOP",3,"T",39.79934,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE DE ABRIGO","?",null,"TV",null,"110402",1,null,"TV VALE DE ABRIGO",10141,10149,{"$raw":"00000000"},"110402","TV VALE DE ABRIGO","INOP",3,"T",177.03240,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ESCOLAS VELHAS",null,null,"R",null,"110409",1,null,"R DAS ESCOLAS VELHAS",10142,10150,{"$raw":"00000000"},"110409","R DAS ESCOLAS VELHAS","INOP",3,"T",29.18770,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","DE SANTA CATARINA",null,null,"R",null,"110407",1,null,"R DE SANTA CATARINA",10143,10151,{"$raw":"00000000"},"110407","R DE SANTA CATARINA","OPER",1,"A",23.31272,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,null,"R",null,"110410",1,null,"R DA BICA",10144,10152,{"$raw":"00000000"},"110410","R DA BICA","INOP",3,"T",41.93482,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",10145,10153,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",154.01413,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","D NUNO ÁLVARES PEREIRA DE MELLO",null,null,"LG",null,"110402",1,null,"LG D NUNO ÁLVARES PEREIRA DE MELLO",10146,10154,{"$raw":"00000000"},"110402","LG D NUNO ÁLVARES PEREIRA DE MELLO","OPER",2,"A",23.25916,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO NOVO",null,null,"R",null,"110410",1,null,"R DO POÇO NOVO",10147,10155,{"$raw":"00000000"},"110410","R DO POÇO NOVO","INOP",3,"T",57.57497,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,0,null,null,10148,10156,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,24.66191,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA HORA",null,null,"TV",null,"110405",1,null,"TV DA BOA HORA",10149,10157,{"$raw":"00000000"},"110405","TV DA BOA HORA","INOP",3,"T",28.27007,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ANDORINHAS",null,null,"R",null,"110405",1,null,"R DAS ANDORINHAS",10150,10158,{"$raw":"00000000"},"110405","R DAS ANDORINHAS","OPER",1,"A",48.72813,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FESTA",null,null,"LG",null,"110401",1,null,"LG DA FESTA",10151,10159,{"$raw":"00000000"},"110401","LG DA FESTA","INOP",3,"T",25.43780,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","ANTÓNIO MARTINS REGO",null,null,"R",null,"110404",1,null,"R ANTÓNIO MARTINS REGO",10152,10160,{"$raw":"00000000"},"110404","R ANTÓNIO MARTINS REGO","OPER",1,"A",29.82999,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALVERDE",null,null,"R",null,"110410",1,null,"R DO VALVERDE",10153,10161,{"$raw":"00000000"},"110410","R DO VALVERDE","INOP",3,"T",20.95578,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110402",1,null,"R 1º DE DEZEMBRO",10154,10162,{"$raw":"00000000"},"110402","R 1º DE DEZEMBRO","INOP",3,"T",5.41156,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"VALE TAGARRO",null,null,"ESTR",null,"110401",1,null,"ESTR VALE TAGARRO",10155,10163,{"$raw":"00000000"},"110401","ESTR VALE TAGARRO","INOP",3,"T",131.19781,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON DE MATOS",10156,10164,{"$raw":"00000000"},"110408","R NORTON DE MATOS","INOP",3,"T",3.53646,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DR OLIVEIRA DE SALAZAR",null,null,"R",null,"110409",1,null,"R DR OLIVEIRA DE SALAZAR",10157,10165,{"$raw":"00000000"},"110409","R DR OLIVEIRA DE SALAZAR","OPER",1,"A",263.91260,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ADELIDIA DE JESUS SOUSA SOARES",null,null,"R",null,"110409",1,null,"R ADELIDIA DE JESUS SOUSA SOARES",10158,10166,{"$raw":"00000000"},"110409","R ADELIDIA DE JESUS SOUSA SOARES","INOP",3,"T",62.96357,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LEAIS",null,"14/06/2005","TV",null,"110409",1,null,"TV DOS LEAIS",10159,10167,{"$raw":"00000000"},"110409","TV DOS LEAIS","OPER",1,"A",92.29508,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",10160,10168,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",22.38402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FESTA",null,null,"LG",null,"110401",1,null,"LG DA FESTA",10161,10169,{"$raw":"00000000"},"110401","LG DA FESTA","OPER",1,"A",16.80014,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FESTA",null,null,"LG",null,"110401",1,null,"LG DA FESTA",10162,10170,{"$raw":"00000000"},"110401","LG DA FESTA","INOP",3,"T",20.21345,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE CAL",null,null,"TV",null,"110407",1,null,"TV DA FONTE CAL",10163,10171,{"$raw":"00000000"},"110407","TV DA FONTE CAL","OPER",2,"A",52.34175,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S SEBASTIÃO",null,null,"LG",null,"110407",1,null,"LG S SEBASTIÃO",10164,10172,{"$raw":"00000000"},"110407","LG S SEBASTIÃO","INOP",3,"T",34.82981,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D AFONSO HENRIQUES",null,null,"R",null,"110407",1,null,"R D AFONSO HENRIQUES",10165,10173,{"$raw":"00000000"},"110407","R D AFONSO HENRIQUES","OPER",1,"A",69.94129,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"TV",null,"110407",1,null,"TV DA IGREJA",10166,10174,{"$raw":"00000000"},"110407","TV DA IGREJA","OPER",1,"A",21.62373,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CANIÇO",null,null,"BC",null,"110407",1,null,"BC DO CANIÇO",10167,10175,{"$raw":"00000000"},"110407","BC DO CANIÇO","OPER",2,"A",67.49306,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS EMIGRANTES",null,null,"R",null,"110407",1,null,"R DOS EMIGRANTES",10168,10176,{"$raw":"00000000"},"110407","R DOS EMIGRANTES","INOP",3,"T",228.27520,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CRUZEIRO",null,null,"TV",null,"110407",1,null,"TV DO CRUZEIRO",10169,10177,{"$raw":"00000000"},"110407","TV DO CRUZEIRO","INOP",3,"T",30.81450,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"BC",null,"110407",1,null,"BC DA IGREJA",10170,10178,{"$raw":"00000000"},"110407","BC DA IGREJA","INOP",3,"T",29.91567,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA EIRA",null,null,"TV",null,"110407",1,null,"TV DA EIRA",10171,10179,{"$raw":"00000000"},"110407","TV DA EIRA","INOP",3,"T",30.43402,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF MARCELO CAETANO",null,null,"LG",null,"110409",1,null,"LG PROF MARCELO CAETANO",10172,10180,{"$raw":"00000000"},"110409","LG PROF MARCELO CAETANO","INOP",3,"T",25.03208,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POVO",null,null,"LG",null,"110402",1,null,"LG DO POVO",10173,10181,{"$raw":"00000000"},"110402","LG DO POVO","INOP",3,"T",8.78559,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO FAIA",null,null,"BC",null,"110405",1,null,"BC DO FAIA",10174,10182,{"$raw":"00000000"},"110405","BC DO FAIA","INOP",3,"T",33.45808,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"R",null,"110401",1,null,"R DA BELA VISTA",10175,10183,{"$raw":"00000000"},"110401","R DA BELA VISTA","INOP",3,"T",38.59640,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL","Dúvidas se é Estrada Militar",null,"ESTR",null,"110405",1,null,"ESTR FLORESTAL",10176,10184,{"$raw":"00000000"},"110405","ESTR FLORESTAL","OPER",1,"A",962.49183,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1",null,null,"DR FRANCISCO SÁ CARNEIRO",null,null,"AV",null,"110402",1,null,"AV DR FRANCISCO SÁ CARNEIRO",10177,10185,{"$raw":"00000000"},"110402","AV DR FRANCISCO SÁ CARNEIRO","INOP",3,"T",31.99635,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CAPITÕES",null,"24 set 2002 e 05 nov 2002","R",null,"110402",1,null,"R DOS CAPITÕES",10178,10186,{"$raw":"00000000"},"110402","R DOS CAPITÕES","OPER",1,"A",71.41461,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LOUREIRO",null,null,"R",null,"110405",1,null,"R DO LOUREIRO",10179,10187,{"$raw":"00000000"},"110405","R DO LOUREIRO","OPER",2,"A",122.90877,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",10180,10188,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",207.80985,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTO ANTONIO",null,null,"R",null,"110410",1,null,"R SANTO ANTONIO",10181,10189,{"$raw":"00000000"},"110410","R SANTO ANTONIO","INOP",3,"T",47.77363,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","BERNARDO MARTINS",null,null,"R",null,"110405",1,null,"R BERNARDO MARTINS",10182,10190,{"$raw":"00000000"},"110405","R BERNARDO MARTINS","OPER",2,"A",120.57335,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",10183,10191,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",37.13309,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,10184,10192,{"$raw":"00000000"},"110405","MJ.1.221","OPER",1,"A",19.87285,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,10185,10193,{"$raw":"00000000"},"110405","MJ.1.222","OPER",1,"A",21.59104,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HORTA VELHA",null,"15 Mar 1999","R",null,"110402",1,null,"R DA HORTA VELHA",10186,10194,{"$raw":"00000000"},"110402","R DA HORTA VELHA","OPER",2,"A",45.61482,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ GREGORIO DE MOURA",null,null,"R",null,"110410",1,null,"R JOSÉ GREGORIO DE MOURA",10187,10195,{"$raw":"00000000"},"110410","R JOSÉ GREGORIO DE MOURA","OPER",2,"A",17.37336,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"R",null,"110405",1,null,"R 1º DE MAIO",10188,10196,{"$raw":"00000000"},"110405","R 1º DE MAIO","INOP",3,"T",43.33657,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10189,10197,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",146.36173,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10190,10198,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",104.02899,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DO PICOTO",null,"16 Jul 2002","R",null,"110407",1,null,"R DO PICOTO",10191,10199,{"$raw":"00000000"},"110407","R DO PICOTO","OPER",2,"A",14.50894,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","PRINCIPAL",null,null,"R",null,"110405",1,null,"R PRINCIPAL",10192,10200,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",2,"A",3.45689,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PORTELA",null,null,"R",null,"110405",1,null,"R DA PORTELA",10193,10201,{"$raw":"00000000"},"110405","R DA PORTELA","OPER",1,"A",61.79015,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","PRINCIPAL",null,null,"R",null,"110405",1,null,"R PRINCIPAL",10194,10202,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",2,"A",35.72487,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DO CRUZEIRO",null,null,"R",null,"110405",1,null,"R DO CRUZEIRO",10195,10203,{"$raw":"00000000"},"110405","R DO CRUZEIRO","OPER",2,"A",40.01137,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DO PICOTO",null,"SIM","R",null,"110407",1,null,"R DO PICOTO",10196,10204,{"$raw":"00000000"},"110407","R DO PICOTO","OPER",2,"A",14.28622,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DO PICOTO",null,"SIM","R",null,"110407",1,null,"R DO PICOTO",10197,10205,{"$raw":"00000000"},"110407","R DO PICOTO","OPER",2,"A",107.60766,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE AGOSTO",null,null,"R",null,"110410",1,null,"R 15 DE AGOSTO",10198,10206,{"$raw":"00000000"},"110410","R 15 DE AGOSTO","INOP",3,"T",111.62589,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CASINHAS",null,null,"R",null,"110410",1,null,"R DAS CASINHAS",10199,10207,{"$raw":"00000000"},"110410","R DAS CASINHAS","INOP",3,"T",7.23382,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF EGAS MONIZ",null,null,"R",null,"110408",1,null,"R PROF EGAS MONIZ",10200,10208,{"$raw":"00000000"},"110408","R PROF EGAS MONIZ","INOP",3,"T",31.97672,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S JOÃO DE BRITO",null,null,"CC",null,"110410",1,null,"CC S JOÃO DE BRITO",10201,10209,{"$raw":"00000000"},"110410","CC S JOÃO DE BRITO","INOP",3,"T",19.52463,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110402",1,null,"R 1º DE DEZEMBRO",10202,10210,{"$raw":"00000000"},"110402","R 1º DE DEZEMBRO","INOP",3,"T",27.69183,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALMEIDA GARRETE",null,null,"TV",null,"110408",1,null,"TV ALMEIDA GARRETE",10203,10211,{"$raw":"00000000"},"110408","TV ALMEIDA GARRETE","OPER",2,"A",33.02994,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS BATISTAS",null,"SIM","R",null,"110407",1,null,"R DOS BATISTAS",10204,10212,{"$raw":"00000000"},"110407","R DOS BATISTAS","INOP",3,"T",53.44315,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","D FERNANDO",null,null,"R",null,"110402",1,null,"R D FERNANDO",10205,10213,{"$raw":"00000000"},"110402","R D FERNANDO","OPER",1,"A",50.74623,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",10206,10214,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",237.54917,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","IC","2","2",null,null,"IC",null,"110403",1,null,"IC 2",10207,10215,{"$raw":"00000000"},"110403","IC 2","OPER",1,"A",188.66860,7.50000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,10208,10216,{"$raw":"00000000"},"110401","MJ.3.6041","INOP",3,"T",3.09729,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DAS FESTAS DO MARTIR S SEBASTIÃO",null,null,"LG",null,"110404",1,null,"LG DAS FESTAS DO MARTIR S SEBASTIÃO",10209,10217,{"$raw":"00000000"},"110404","R DIREITA","OPER",1,"A",27.29420,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA HORA",null,null,"R",null,"110402",1,null,"R DA BOA HORA",10210,10218,{"$raw":"00000000"},"110402","R DA BOA HORA","INOP",3,"T",86.38414,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",10211,10219,{"$raw":"00000000"},"110402","R DA LIBERDADE","INOP",3,"T",67.52863,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",10212,10220,{"$raw":"00000000"},"110402","R DA LIBERDADE","INOP",3,"T",39.04855,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",10213,10221,{"$raw":"00000000"},"110408","R DA LIBERDADE","OPER",2,"A",15.33690,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON DE MATOS",10214,10222,{"$raw":"00000000"},"110408","R NORTON DE MATOS","INOP",3,"T",24.20619,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"5 DE AGOSTO",null,null,"R",null,"110405",1,null,"R 5 DE AGOSTO",10215,10223,{"$raw":"00000000"},"110405","R 5 DE AGOSTO","INOP",3,"T",13.66928,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JÚLIO M. PEREIRA DA SILVA",null,null,"LG",null,"110402",1,null,"LG JÚLIO M. PEREIRA DA SILVA",10216,10224,{"$raw":"00000000"},"110402","LG JÚLIO M. PEREIRA DA SILVA","OPER",2,"A",15.98845,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA VELHA",null,null,"R",null,"110403",1,null,"R DA ESCOLA VELHA",10217,10225,{"$raw":"00000000"},"110403","R DA ESCOLA VELHA","INOP",3,"T",11.15820,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA VELHA",null,null,"R",null,"110403",1,null,"R DA ESCOLA VELHA",10218,10226,{"$raw":"00000000"},"110403","R DA ESCOLA VELHA","OPER",1,"A",50.82295,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA VELHA",null,null,"R",null,"110403",1,null,"R DA ESCOLA VELHA",10219,10227,{"$raw":"00000000"},"110403","R DA ESCOLA VELHA","INOP",3,"T",6.87449,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",10220,10228,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",27.10607,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL FERREIRA",null,null,"R",null,"110403",1,null,"R MANUEL FERREIRA",10221,10229,{"$raw":"00000000"},"110403","R MANUEL FERREIRA","INOP",3,"T",15.11996,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DO OUTEIRO",null,null,"R",null,"110405",1,null,"R DO OUTEIRO",10222,10230,{"$raw":"00000000"},"110405","R DO OUTEIRO","OPER",1,"A",8.52657,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","S VICENTE",null,null,"R",null,"110405",1,null,"R S VICENTE",10223,10231,{"$raw":"00000000"},"110405","R S VICENTE","OPER",1,"A",15.22698,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",10224,10232,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",38.99126,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",10225,10233,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",30.60395,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CUTELARIA",null,"26 mar 2001","LG",null,"110405",1,null,"LG DA CUTELARIA",10226,10234,{"$raw":"00000000"},"110405","LG DA CUTELARIA","INOP",3,"T",6.26332,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ LOPES RITA",null,null,"LG",null,"110408",1,null,"LG JOSÉ LOPES RITA",10227,10235,{"$raw":"00000000"},"110408","LG JOSÉ LOPES RITA","INOP",3,"T",10.97148,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",10228,10236,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",59.83688,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110403",1,null,"EN 366",10229,10237,{"$raw":"00000000"},"110403","EN 366","OPER",1,"A",48.56996,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE ALCÂNTARA",null,"27/07/2004","BC",null,"110410",1,null,"BC DE ALCÂNTARA",10230,10238,{"$raw":"00000000"},"110410","BC DE ALCÂNTARA","INOP",3,"T",43.63934,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","DE SANTA CATARINA",null,null,"R",null,"110407",1,null,"R DE SANTA CATARINA",10231,10239,{"$raw":"00000000"},"110407","R DE SANTA CATARINA","OPER",1,"A",6.02064,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF MARCELO CAETANO",null,null,"LG",null,"110409",1,null,"LG PROF MARCELO CAETANO",10232,10240,{"$raw":"00000000"},"110409","LG PROF MARCELO CAETANO","INOP",3,"T",21.14059,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DAS MERCÊS",null,null,"R",null,"110409",1,null,"R Nª SENHORA DAS MERCÊS",10233,10241,{"$raw":"00000000"},"110409","R Nª SENHORA DAS MERCÊS","INOP",3,"T",24.36074,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO COMÉRCIO",null,null,"R",null,"110407",1,null,"R DO COMÉRCIO",10234,10242,{"$raw":"00000000"},"110407","R DO COMÉRCIO","OPER",1,"A",39.73469,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CAPITÃO BRAVO",null,null,"LG",null,"110406",1,null,"LG CAPITÃO BRAVO",10235,10243,{"$raw":"00000000"},"110406","LG CAPITÃO BRAVO","OPER",2,"A",4.15844,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CAPITÃO BRAVO",null,null,"LG",null,"110406",1,null,"LG CAPITÃO BRAVO",10236,10244,{"$raw":"00000000"},"110406","LG CAPITÃO BRAVO","INOP",3,"T",15.95498,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUISA BERNARDO DA SILVA",null,null,"R",null,"110406",1,null,"R LUISA BERNARDO DA SILVA",10237,10245,{"$raw":"00000000"},"110406","R LUISA BERNARDO DA SILVA","INOP",3,"T",10.30238,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUISA BERNARDO DA SILVA",null,null,"R",null,"110406",1,null,"R LUISA BERNARDO DA SILVA",10238,10246,{"$raw":"00000000"},"110406","R LUISA BERNARDO DA SILVA","INOP",3,"T",67.31061,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TORRE",null,null,"R",null,"110401",1,null,"R DA TORRE",10239,10247,{"$raw":"00000000"},"110401","R DA TORRE","INOP",3,"T",9.28144,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO PAIVA",null,null,"R",null,"110407",1,null,"R ANTÓNIO PAIVA",10240,10248,{"$raw":"00000000"},"110407","R ANTÓNIO PAIVA","OPER",1,"A",15.19410,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VALENTES",null,null,"R",null,"110401",1,null,"R DOS VALENTES",10241,10249,{"$raw":"00000000"},"110401","R DOS VALENTES","OPER",1,"A",5.90130,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","PALMIRA CALISTO",null,null,"R",null,"110407",1,null,"R PALMIRA CALISTO",10242,10250,{"$raw":"00000000"},"110407","R PALMIRA CALISTO","OPER",1,"A",77.72038,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","PALMIRA CALISTO",null,null,"R",null,"110407",1,null,"R PALMIRA CALISTO",10243,10251,{"$raw":"00000000"},"110407","R PALMIRA CALISTO","OPER",1,"A",16.19986,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1028","DE SANTA CATARINA",null,null,"R",null,"110407",1,null,"R DE SANTA CATARINA",10244,10252,{"$raw":"00000000"},"110407","R DE SANTA CATARINA","OPER",1,"A",20.32480,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO PAIVA",null,null,"R",null,"110407",1,null,"R ANTÓNIO PAIVA",10245,10253,{"$raw":"00000000"},"110407","R ANTÓNIO PAIVA","INOP",3,"T",29.60830,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO PAIVA",null,null,"R",null,"110407",1,null,"R ANTÓNIO PAIVA",10246,10254,{"$raw":"00000000"},"110407","R ANTÓNIO PAIVA","INOP",3,"T",16.59486,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","20 DE JANEIRO",null,null,"R",null,"110407",1,null,"R 20 DE JANEIRO",10247,10255,{"$raw":"00000000"},"110407","R 20 DE JANEIRO","OPER",1,"A",73.70801,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","20 DE JANEIRO",null,null,"R",null,"110407",1,null,"R 20 DE JANEIRO",10248,10256,{"$raw":"00000000"},"110407","R 20 DE JANEIRO","OPER",2,"A",0.59678,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","TODO O MUNDO",null,null,"TV",null,"110401",1,null,"TV TODO O MUNDO",10249,10257,{"$raw":"00000000"},"110401","TV TODO O MUNDO","OPER",1,"A",106.18770,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","TODO O MUNDO",null,null,"TV",null,"110401",1,null,"TV TODO O MUNDO",10250,10258,{"$raw":"00000000"},"110401","TV TODO O MUNDO","OPER",1,null,155.10495,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","LAURA SANTOS LIMA",null,null,"AV",null,"110410",1,null,"AV LAURA SANTOS LIMA",10251,10259,{"$raw":"00000000"},"110410","AV LAURA SANTOS LIMA","OPER",2,"A",12.43479,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","LAURA SANTOS LIMA",null,null,"AV",null,"110410",1,null,"AV LAURA SANTOS LIMA",10252,10260,{"$raw":"00000000"},"110410","AV LAURA SANTOS LIMA","OPER",2,"A",71.08778,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","LAURA SANTOS LIMA",null,null,"AV",null,"110410",1,null,"AV LAURA SANTOS LIMA",10253,10261,{"$raw":"00000000"},"110410","AV LAURA SANTOS LIMA","OPER",2,"A",30.47968,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DA CONCEIÇÃO",null,null,"LG",null,"110410",1,null,"LG Nª SENHORA DA CONCEIÇÃO",10254,10262,{"$raw":"00000000"},"110410","LG Nª SENHORA DA CONCEIÇÃO","INOP",3,"T",27.11256,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DA CONCEIÇÃO",null,null,"LG",null,"110410",1,null,"LG Nª SENHORA DA CONCEIÇÃO",10255,10263,{"$raw":"00000000"},"110410","LG Nª SENHORA DA CONCEIÇÃO","INOP",3,"T",17.91374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DA CONCEIÇÃO",null,null,"LG",null,"110410",1,null,"LG Nª SENHORA DA CONCEIÇÃO",10256,10264,{"$raw":"00000000"},"110410","LG Nª SENHORA DA CONCEIÇÃO","INOP",3,"T",13.12629,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DA LIBERDADE",null,"14/06/2005","R",null,"110409",1,null,"R DA LIBERDADE",10257,10265,{"$raw":"00000000"},"110409","R DA LIBERDADE","OPER",1,"A",13.18988,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA AZINHAGA","Anteriormente \"R DA MADALENA\", Processo 03/2010/38",null,"R",null,"110406",1,null,"R DA AZINHAGA",10258,10266,{"$raw":"00000000"},"110406","R DA AZINHAGA","INOP",3,"T",14.49953,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFERES JOSÉ VENTURA RODRIGUES",null,null,"R",null,"110406",1,null,"R ALFERES JOSÉ VENTURA RODRIGUES",10259,10267,{"$raw":"00000000"},"110406","R ALFERES JOSÉ VENTURA RODRIGUES","INOP",3,"T",47.80993,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFERES JOSÉ VENTURA RODRIGUES",null,null,"R",null,"110406",1,null,"R ALFERES JOSÉ VENTURA RODRIGUES",10260,10268,{"$raw":"00000000"},"110406","R ALFERES JOSÉ VENTURA RODRIGUES","INOP",3,"T",38.00081,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TORRE",null,null,"ESTR",null,"110401",1,null,"ESTR DA TORRE",10261,10269,{"$raw":"00000000"},"110401","ESTR DA TORRE","INOP",3,"T",6.71336,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"TRAZ DA IGREJA",null,null,"R",null,"110401",1,null,"R TRAZ DA IGREJA",10262,10270,{"$raw":"00000000"},"110401","R TRAZ DA IGREJA","INOP",3,"T",74.30836,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"TRAZ DA IGREJA",null,null,"R",null,"110401",1,null,"R TRAZ DA IGREJA",10263,10271,{"$raw":"00000000"},"110401","R TRAZ DA IGREJA","INOP",3,"T",7.55265,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","DA IGREJA",null,null,"LG",null,"110407",1,null,"LG DA IGREJA",10264,10272,{"$raw":"00000000"},"110407","LG DA IGREJA","OPER",1,"A",14.01286,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"LG",null,"110407",1,null,"LG DO ROSSIO",10265,10273,{"$raw":"00000000"},"110407","LG DO ROSSIO","OPER",2,"A",19.75974,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"22 DE AGOSTO",null,null,"R",null,"110409",1,null,"R 22 DE AGOSTO",10266,10274,{"$raw":"00000000"},"110409","R 22 DE AGOSTO","INOP",3,"T",24.19562,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"22 DE AGOSTO",null,null,"R",null,"110409",1,null,"R 22 DE AGOSTO",10267,10275,{"$raw":"00000000"},"110409","R 22 DE AGOSTO","INOP",3,"T",24.67300,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"CC",null,"110402",1,null,"CC DA FONTE",10268,10276,{"$raw":"00000000"},"110402","CC DA FONTE","INOP",3,"T",30.36815,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",10269,10277,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,23.44865,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",10270,10278,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,null,32.78567,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"R",null,"110401",1,null,"R DA BELA VISTA",10271,10279,{"$raw":"00000000"},"110401","R DA BELA VISTA","INOP",3,"T",103.29525,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ BARBAS GASPAR",null,"17 Jun 2003","R",null,"110402",1,null,"R JOSÉ BARBAS GASPAR",10272,10280,{"$raw":"00000000"},"110402","R JOSÉ BARBAS GASPAR","INOP",3,"T",85.02617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",10273,10281,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","INOP",3,"T",4.28692,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",10274,10282,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","INOP",3,"T",72.26451,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"LG",null,"110408",1,null,"LG 1º DE MAIO",10275,10283,{"$raw":"00000000"},"110408","LG 1º DE MAIO","OPER",2,"A",18.74225,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"LG",null,"110408",1,null,"LG 1º DE MAIO",10276,10284,{"$raw":"00000000"},"110408","LG 1º DE MAIO","OPER",2,"A",15.53809,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"LG",null,"110408",1,null,"LG 1º DE MAIO",10277,10285,{"$raw":"00000000"},"110408","LG 1º DE MAIO","INOP",3,"T",10.93098,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PROF EGAS MONIZ",null,null,"R",null,"110408",1,null,"R PROF EGAS MONIZ",10278,10286,{"$raw":"00000000"},"110408","R PROF EGAS MONIZ","OPER",2,"A",8.54843,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",10279,10287,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","INOP",3,"T",12.24951,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1032","PRINCIPAL",null,null,"R",null,"110407",1,null,"R PRINCIPAL",10280,10288,{"$raw":"00000000"},"110407","R PRINCIPAL","OPER",2,"A",36.31116,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"LG",null,"110402",1,null,"LG DA FONTE",10281,10289,{"$raw":"00000000"},"110402","LG DA FONTE","OPER",2,"A",13.37687,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",10282,10290,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","INOP",3,"T",31.83289,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",10283,10291,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","INOP",3,"T",23.37039,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DIREITA",null,null,"R",null,"110404",1,null,"R DIREITA",10284,10292,{"$raw":"00000000"},"110404","R DIREITA","OPER",1,"A",122.97037,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DIREITA",null,null,"R",null,"110404",1,null,"R DIREITA",10285,10293,{"$raw":"00000000"},"110404","R DIREITA","OPER",1,"A",3.97209,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DAS FESTAS DO MARTIR S SEBASTIÃO",null,null,"LG",null,"110404",1,null,"LG DAS FESTAS DO MARTIR S SEBASTIÃO",10286,10294,{"$raw":"00000000"},"110404","R ANTÓNIO MARTINS REGO","OPER",1,"A",16.49444,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","ANTÓNIO MARTINS REGO",null,null,"R",null,"110404",1,null,"R ANTÓNIO MARTINS REGO",10287,10295,{"$raw":"00000000"},"110404","R ANTÓNIO MARTINS REGO","OPER",1,"A",33.42918,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CENTRAL",null,null,"LG",null,"110405",1,null,"LG CENTRAL",10288,10296,{"$raw":"00000000"},"110405","LG CENTRAL","OPER",1,"A",19.07841,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DO OUTEIRO",null,null,"R",null,"110405",1,null,"R DO OUTEIRO",10289,10297,{"$raw":"00000000"},"110405","R DO OUTEIRO","OPER",1,"A",23.59230,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"R",null,"110405",1,null,"R DAS EIRAS",10290,10298,{"$raw":"00000000"},"110405","R DAS EIRAS","INOP",3,"T",37.80212,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","S VICENTE",null,null,"R",null,"110405",1,null,"R S VICENTE",10291,10299,{"$raw":"00000000"},"110405","R S VICENTE","OPER",1,"A",73.86980,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","S VICENTE",null,null,"R",null,"110405",1,null,"R S VICENTE",10292,10300,{"$raw":"00000000"},"110405","R S VICENTE","OPER",1,"A",21.24671,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568-1","PRINCIPAL",null,null,"R",null,"110404",1,null,"R PRINCIPAL",10293,10301,{"$raw":"00000000"},"110404","R PRINCIPAL","OPER",1,"A",72.65933,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",10294,10302,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",23.35122,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",10295,10303,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",13.01897,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POISIO",null,null,"TV",null,"110410",1,null,"TV DO POISIO",10296,10304,{"$raw":"00000000"},"110410","TV DO POISIO","OPER",2,"A",12.20668,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S JOÃO DE BRITO",null,null,"CC",null,"110410",1,null,"CC S JOÃO DE BRITO",10297,10305,{"$raw":"00000000"},"110410","CC S JOÃO DE BRITO","INOP",3,"T",42.53295,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"S JOÃO DE BRITO",null,null,"CC",null,"110410",1,null,"CC S JOÃO DE BRITO",10298,10306,{"$raw":"00000000"},"110410","CC S JOÃO DE BRITO","INOP",3,"T",45.64426,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,10299,10307,{"$raw":"00000000"},"110410","MJ.3.6042","INOP",3,"T",22.18410,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,10300,10308,{"$raw":"00000000"},"110410","MJ.3.6043","INOP",3,"T",24.96102,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,10301,10309,{"$raw":"00000000"},"110410","MJ.3.6044","INOP",3,"T",17.55724,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO TEATRO",null,null,"R",null,"110410",1,null,"R DO TEATRO",10302,10310,{"$raw":"00000000"},"110410","R DO TEATRO","INOP",3,"T",53.29787,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO TEATRO",null,null,"R",null,"110410",1,null,"R DO TEATRO",10303,10311,{"$raw":"00000000"},"110410","R DO TEATRO","INOP",3,"T",21.40985,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTO ANTÓNIO",null,null,"LG",null,"110409",1,null,"LG SANTO ANTÓNIO",10304,10312,{"$raw":"00000000"},"110409","LG SANTO ANTÓNIO","INOP",3,"T",13.64453,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"IGREJA",null,null,"LG",null,"110405",1,null,"LG IGREJA",10305,10313,{"$raw":"00000000"},"110405","LG IGREJA","OPER",1,"A",16.26675,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AFONSO COSTA",null,null,"R",null,"110408",1,null,"R AFONSO COSTA",10306,10314,{"$raw":"00000000"},"110408","R AFONSO COSTA","OPER",2,"A",83.00167,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,"20 Jul 1998","R",null,"110410",1,null,"R PRINCIPAL",10307,10315,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",14.01405,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"R",null,"110410",1,null,"R 1º DE MAIO",10308,10316,{"$raw":"00000000"},"110410","R 1º DE MAIO","INOP",3,"T",5.90089,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,"20 Jul 1998","R",null,"110410",1,null,"R 1º DE MAIO",10309,10317,{"$raw":"00000000"},"110410","R 1º DE MAIO","INOP",3,"T",32.04370,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,"20 Jul 1998","R",null,"110410",1,null,"R 1º DE MAIO",10310,10318,{"$raw":"00000000"},"110410","R 1º DE MAIO","INOP",3,"T",8.67277,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,"20 Jul 1998","R",null,"110410",1,null,"R 1º DE MAIO",10311,10319,{"$raw":"00000000"},"110410","R 1º DE MAIO","INOP",3,"T",47.47317,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,null,"R",null,"110410",1,null,"R 1º DE MAIO",10312,10320,{"$raw":"00000000"},"110410","R 1º DE MAIO","INOP",3,"T",2.80957,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO LOPES LEAL",null,null,"TV",null,"110405",1,null,"TV ANTÓNIO LOPES LEAL",10313,10321,{"$raw":"00000000"},"110405","TV ANTÓNIO LOPES LEAL","INOP",3,"T",56.12448,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO LOPES LEAL",null,null,"TV",null,"110405",1,null,"TV ANTÓNIO LOPES LEAL",10314,10322,{"$raw":"00000000"},"110405","TV ANTÓNIO LOPES LEAL","OPER",1,"A",16.99956,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110405",1,null,"R DAS FLORES",10315,10323,{"$raw":"00000000"},"110405","R DAS FLORES","INOP",3,"T",7.11605,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ROSSIO",null,null,"LG",null,"110410",1,null,"LG DO ROSSIO",10316,10324,{"$raw":"00000000"},"110410","LG DO ROSSIO","INOP",3,"T",14.49816,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"R DOS CAPITÕES",null,"24 set 2002 e 05 nov 2002","R",null,"110402",1,null,"R DOS CAPITÕES",10317,10325,{"$raw":"00000000"},"110402","R DOS CAPITÕES","INOP",3,"T",80.58893,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,10318,10326,{"$raw":"00000000"},"110402","MJ.3.6045","INOP",3,"T",47.58391,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZ",null,null,"LG",null,"110410",1,null,"LG DA CRUZ",10319,10327,{"$raw":"00000000"},"110410","LG DA CRUZ","OPER",2,"A",20.69928,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","26 DE DEZEMBRO",null,null,"R",null,"110410",1,null,"R 26 DE DEZEMBRO",10320,10328,{"$raw":"00000000"},"110410","R 26 DE DEZEMBRO","OPER",2,"A",13.71584,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,"20 Jul 1998","R",null,"110410",1,null,"R 1º DE MAIO",10321,10329,{"$raw":"00000000"},"110410","R 1º DE MAIO","INOP",3,"T",142.12617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,"20 Jul 1998","R",null,"110410",1,null,"R 1º DE MAIO",10322,10330,{"$raw":"00000000"},"110410","R 1º DE MAIO","INOP",3,"T",19.07991,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GENERAL COSTA GOMES",null,null,"LG",null,"110405",1,null,"LG GENERAL COSTA GOMES",10323,10331,{"$raw":"00000000"},"110405","LG GENERAL COSTA GOMES","OPER",2,"A",11.41281,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GENERAL COSTA GOMES",null,null,"LG",null,"110405",1,null,"LG GENERAL COSTA GOMES",10324,10332,{"$raw":"00000000"},"110405","LG GENERAL COSTA GOMES","OPER",2,"A",20.49798,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GENERAL COSTA GOMES",null,null,"LG",null,"110405",1,null,"LG GENERAL COSTA GOMES",10325,10333,{"$raw":"00000000"},"110405","LG GENERAL COSTA GOMES","OPER",2,"A",14.54973,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FIGUEIRA DO N0BRE",null,null,"R",null,"110410",1,null,"R DA FIGUEIRA DO N0BRE",10326,10334,{"$raw":"00000000"},"110410","R DA FIGUEIRA DO N0BRE","INOP",3,"T",2.71842,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,"R",null,"110402",1,null,null,10327,10335,{"$raw":"00000000"},"110402","MJ.1.223","OPER",1,"A",235.04906,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,"15 Mar 1999","R",null,"110402",1,null,"R DO OLIVAL DA FONTE",10328,10336,{"$raw":"00000000"},"110402","R DO OLIVAL DA FONTE","OPER",2,"A",84.32027,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ANJOS",null,null,"TV",null,"110405",1,null,"TV DOS ANJOS",10329,10337,{"$raw":"00000000"},"110405","TV DOS ANJOS","INOP",3,"T",67.05898,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE MAIO",null,"20 Jul 1998","R",null,"110410",1,null,"R 1º DE MAIO",10330,10338,{"$raw":"00000000"},"110410","R 1º DE MAIO","INOP",3,"T",37.17579,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA RAPOSEIRA","O local assinalado na PL da acta está incorrecto","14/06/2005","TV",null,"110410",1,null,"TV DA RAPOSEIRA",10331,10339,{"$raw":"00000000"},"110410","TV DA RAPOSEIRA","INOP",3,"T",25.26774,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS CASTANHOLAS",null,"27 Jan 2004","R",null,"110402",1,null,"R DAS CASTANHOLAS",10332,10340,{"$raw":"00000000"},"110402","R DAS CASTANHOLAS","INOP",3,"T",153.70215,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NOSSA SENHORA DA CONCEIÇÃO",null,null,"R",null,"110402",1,null,"R NOSSA SENHORA DA CONCEIÇÃO",10333,10341,{"$raw":"00000000"},"110402","R NOSSA SENHORA DA CONCEIÇÃO","INOP",3,"T",99.21460,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","13 DE JANEIRO",null,null,"R",null,"110402",1,null,"R 13 DE JANEIRO",10334,10342,{"$raw":"00000000"},"110402","R 13 DE JANEIRO","OPER",1,"A",162.28932,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DE ALCÂNTARA",null,null,"R",null,"110410",1,null,"R DE ALCÂNTARA",10335,10343,{"$raw":"00000000"},"110410","R DE ALCÂNTARA","OPER",1,"A",93.64908,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NOSSA SENHORA DA CONCEIÇÃO",null,null,"R",null,"110402",1,null,"R NOSSA SENHORA DA CONCEIÇÃO",10336,10344,{"$raw":"00000000"},"110402","R NOSSA SENHORA DA CONCEIÇÃO","INOP",3,"T",43.37022,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",10337,10345,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",41.17700,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",2,"110403","EN 115-1",10338,10346,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",49.74719,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",10339,10347,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",57.71890,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HORTA VELHA",null,"15 Mar 1999","R",null,"110402",1,null,"R DA HORTA VELHA",10340,10348,{"$raw":"00000000"},"110402","R DA HORTA VELHA","OPER",2,"A",141.41274,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PINHEIRO",null,"03 Out 2006","R",null,"110409",1,null,"R DO PINHEIRO",10341,10349,{"$raw":"00000000"},"110409","R DO PINHEIRO","INOP",3,"T",109.69368,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110402",1,null,"R DO CAMPO DA BOLA",10342,10350,{"$raw":"00000000"},"110402","R DO CAMPO DA BOLA","INOP",3,"T",76.98522,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110410",1,null,"ESTR FLORESTAL",10343,10351,{"$raw":"00000000"},"110410","ESTR FLORESTAL","OPER",1,"A",459.99739,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1","EM","568","DAS FESTAS DO MARTIR S SEBASTIÃO",null,null,"LG",null,"110404",1,null,"LG DAS FESTAS DO MARTIR S SEBASTIÃO",10344,10352,{"$raw":"00000000"},"110404","R DIREITA","OPER",1,"A",2.89197,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",10345,10353,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",190.71702,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GUILHERME LUÍS NUNES",null,"17 Dez 2002","R",null,"110402",1,null,"R GUILHERME LUÍS NUNES",10346,10354,{"$raw":"00000000"},"110402","R GUILHERME LUÍS NUNES","OPER",1,"A",135.83917,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ÂNGELOS",null,null,"BC",null,"110406",1,null,"BC DOS ÂNGELOS",10347,10355,{"$raw":"00000000"},"110406","BC DOS ÂNGELOS","INOP",3,"T",77.69590,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,null,"BC",null,"110406",1,null,"BC DO MOINHO",10348,10356,{"$raw":"00000000"},"110406","BC DO MOINHO","INOP",3,"T",79.77437,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS PIÇARRAS",null,null,"BC",null,"110406",1,null,"BC DAS PIÇARRAS",10349,10357,{"$raw":"00000000"},"110406","BC DAS PIÇARRAS","INOP",3,"T",46.71108,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ LOPES RITA",null,null,"LG",null,"110408",1,null,"LG JOSÉ LOPES RITA",10350,10358,{"$raw":"00000000"},"110408","LG JOSÉ LOPES RITA","INOP",3,"T",13.28472,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA",null,null,"TV",null,"110401",1,null,"TV DA BELA VISTA",10351,10359,{"$raw":"00000000"},"110401","TV DA BELA VISTA","INOP",3,"T",68.79197,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"TRAZ DA IGREJA",null,null,"TV",null,"110401",1,null,"TV  TRAZ DA IGREJA",10352,10360,{"$raw":"00000000"},"110401","TV  TRAZ DA IGREJA","INOP",3,"T",58.91308,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VICENTES",null,null,"BC",null,"110404",1,null,"BC DOS VICENTES",10353,10361,{"$raw":"00000000"},"110404","BC DOS VICENTES","OPER",2,"A",17.55919,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CAPADORES",null,null,"TV",null,"110404",1,null,"TV DOS CAPADORES",10354,10362,{"$raw":"00000000"},"110404","TV DOS CAPADORES","INOP",3,"T",70.55538,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JERÓNIMO RIBEIRO",null,"15 Mar 1999","R",null,"110402",1,null,"R JERÓNIMO RIBEIRO",10355,10363,{"$raw":"00000000"},"110402","R JERÓNIMO RIBEIRO","INOP",3,"T",51.79673,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","D FERNANDO",null,null,"R",null,"110402",1,null,"R D FERNANDO",10356,10364,{"$raw":"00000000"},"110402","R D FERNANDO","OPER",1,"A",12.92273,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",10357,10365,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",70.49093,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","JOSÉ DUARTE",null,null,"R",null,"110408",1,null,"R JOSÉ DUARTE",10358,10366,{"$raw":"00000000"},"110408","R JOSÉ DUARTE","OPER",2,"A",25.08562,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,"17 Jun 2003","PCT",null,"110402",1,null,"PCT DO OLIVAL DA FONTE",10359,10367,{"$raw":"00000000"},"110402","PCT DO OLIVAL DA FONTE","INOP",3,"T",75.21532,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS IRMÃOS",null,null,"R",null,"110408",1,null,"R DOS IRMÃOS",10360,10368,{"$raw":"00000000"},"110408","R DOS IRMÃOS","OPER",2,"A",66.38399,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PAZ",null,null,"BC",null,"110408",1,null,"BC DA PAZ",10361,10369,{"$raw":"00000000"},"110408","BC DA PAZ","OPER",2,"A",18.90873,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,null,"R",null,"110408",1,null,"R DA IGREJA",10362,10370,{"$raw":"00000000"},"110408","R DA IGREJA","INOP",3,"T",30.52914,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570-1","DA LIBERDADE",null,null,"R",null,"110402",1,null,"R DA LIBERDADE",10363,10371,{"$raw":"00000000"},"110402","R DA LIBERDADE","OPER",1,"A",158.52976,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",10364,10372,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",21.42398,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"TV",null,"110408",1,null,"TV DA FONTE",10365,10373,{"$raw":"00000000"},"110408","TV DA FONTE","OPER",2,"A",32.89534,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"FORJA",null,null,"TV",null,"110408",1,null,"TV FORJA",10366,10374,{"$raw":"00000000"},"110408","TV FORJA","INOP",3,"T",22.52808,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS QUINTAIS",null,null,"AZ",null,"110408",1,null,"AZ DOS QUINTAIS",10367,10375,{"$raw":"00000000"},"110408","AZ DOS QUINTAIS","INOP",3,"T",83.36716,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTO ANTÓNIO",null,null,"LG",null,"110409",1,null,"LG SANTO ANTÓNIO",10369,10377,{"$raw":"00000000"},"110409","LG SANTO ANTÓNIO","INOP",3,"T",9.44027,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PAZ",null,null,"TV",null,"110405",1,null,"TV DA PAZ",10370,10378,{"$raw":"00000000"},"110405","TV DA PAZ","INOP",3,"T",23.40493,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CAPELA",null,null,"R",null,"110405",1,null,"R DA CAPELA",10371,10379,{"$raw":"00000000"},"110405","R DA CAPELA","INOP",3,"T",199.54096,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,null,"TV",null,"110405",1,null,"TV DA BICA",10372,10380,{"$raw":"00000000"},"110405","TV DA BICA","OPER",1,"A",43.80614,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FESTA",null,null,"LG",null,"110405",1,null,"LG DA FESTA",10373,10381,{"$raw":"00000000"},"110405","LG DA FESTA","INOP",3,"T",22.13506,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO JARDIM",null,null,"LG",null,"110405",1,null,"LG DO JARDIM",10374,10382,{"$raw":"00000000"},"110405","LG DO JARDIM","OPER",2,"A",58.30911,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FESTA",null,null,"LG",null,"110405",1,null,"LG DA FESTA",10375,10383,{"$raw":"00000000"},"110405","LG DA FESTA","INOP",3,"T",59.47951,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,null,"TV",null,"110405",1,null,"TV 25 DE ABRIL",10376,10384,{"$raw":"00000000"},"110405","TV 25 DE ABRIL","INOP",3,"T",61.89495,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ MIGUEL",null,null,"TV",null,"110405",1,null,"TV JOSÉ MIGUEL",10377,10385,{"$raw":"00000000"},"110405","TV JOSÉ MIGUEL","INOP",3,"T",95.59344,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"PC",null,"110405",1,null,"PC DA LIBERDADE",10378,10386,{"$raw":"00000000"},"110405","PC DA LIBERDADE","INOP",3,"T",54.87217,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS AMAROS",null,null,"R",null,"110410",2,"110405","R DOS AMAROS",10379,10387,{"$raw":"00000000"},"110410","R DOS AMAROS","OPER",2,"A",25.37896,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTO ANTÓNIO",null,null,"LG",null,"110409",1,null,"LG SANTO ANTÓNIO",10380,10388,{"$raw":"00000000"},"110409","LG SANTO ANTÓNIO","INOP",3,"T",22.04945,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTO ANTONIO",null,null,"R",null,"110410",1,null,"R SANTO ANTONIO",10381,10389,{"$raw":"00000000"},"110410","R SANTO ANTONIO","INOP",3,"T",61.81160,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"TEODORO LOPES",null,null,"R",null,"110403",1,null,"R TEODORO LOPES",10382,10390,{"$raw":"00000000"},"110403","R TEODORO LOPES","INOP",3,"T",39.55362,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA VELHA",null,null,"TV",null,"110403",1,null,"TV DA ESCOLA VELHA",10383,10391,{"$raw":"00000000"},"110403","TV DA ESCOLA VELHA","INOP",3,"T",53.67324,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ AMILCAR",null,null,"TV",null,"110403",1,null,"TV JOSÉ AMILCAR",10384,10392,{"$raw":"00000000"},"110403","TV JOSÉ AMILCAR","INOP",3,"T",35.19549,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CRISPIANO",null,null,"TV",null,"110403",1,null,"TV DO CRISPIANO",10385,10393,{"$raw":"00000000"},"110403","TV DO CRISPIANO","INOP",3,"T",34.99822,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS CRISTOS",null,null,"BC",null,"110401",1,null,"BC DOS CRISTOS",10386,10394,{"$raw":"00000000"},"110401","BC DOS CRISTOS","INOP",3,"T",36.08183,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"10 DE JUNHO",null,null,"R",null,"110405",1,null,"R 10 DE JUNHO",10387,10395,{"$raw":"00000000"},"110405","R 10 DE JUNHO","INOP",3,"T",43.12311,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOSÉ LOPES RITA",null,null,"LG",null,"110408",1,null,"LG JOSÉ LOPES RITA",10388,10396,{"$raw":"00000000"},"110408","LG JOSÉ LOPES RITA","INOP",3,"T",10.00582,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO HENRIQUES",null,null,"BC",null,"110405",1,null,"BC JOÃO HENRIQUES",10389,10397,{"$raw":"00000000"},"110405","BC JOÃO HENRIQUES","INOP",3,"T",33.59768,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA MARUJA",null,null,"BC",null,"110405",1,null,"BC DA MARUJA",10390,10398,{"$raw":"00000000"},"110405","BC DA MARUJA","INOP",3,"T",41.11540,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO M SILVERIO",null,null,"R",null,"110410",1,null,"R ANTÓNIO M SILVERIO",10391,10399,{"$raw":"00000000"},"110410","R ANTÓNIO M SILVERIO","INOP",3,"T",35.88381,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CRUZ",null,null,"TV",null,"110410",1,null,"TV DA CRUZ",10392,10400,{"$raw":"00000000"},"110410","TV DA CRUZ","OPER",2,"A",27.81375,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS PAULINOS",null,null,"BC",null,"110410",1,null,"BC DOS PAULINOS",10393,10401,{"$raw":"00000000"},"110410","BC DOS PAULINOS","INOP",3,"T",47.40032,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TIA ANA",null,null,"TV",null,"110410",1,null,"TV DA TIA ANA",10394,10402,{"$raw":"00000000"},"110410","TV DA TIA ANA","INOP",3,"A",38.12352,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,null,"TV",null,"110410",1,null,"TV DO CHAFARIZ",10395,10403,{"$raw":"00000000"},"110410","TV DO CHAFARIZ","INOP",3,"A",26.35984,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"Nª SENHORA DA SAÚDE",null,null,"R",null,"110407",1,null,"R Nª SENHORA DA SAÚDE",10396,10404,{"$raw":"00000000"},"110407","R Nª SENHORA DA SAÚDE","OPER",2,"A",117.93618,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"24 DE MAIO",null,null,"LG",null,"110410",1,null,"LG 24 DE MAIO",10397,10405,{"$raw":"00000000"},"110410","LG 24 DE MAIO","OPER",2,"A",36.34917,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALTO DO JOGO",null,null,"R",null,"110410",1,null,"R ALTO DO JOGO",10398,10406,{"$raw":"00000000"},"110410","R ALTO DO JOGO","OPER",2,"A",20.93564,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CEDRO",null,null,"BR",null,"110410",1,null,"BR DO CEDRO",10399,10407,{"$raw":"00000000"},"110410","BR DO CEDRO","INOP",3,"T",50.30282,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,null,"TV",null,"110410",1,null,"TV DA BICA",10400,10408,{"$raw":"00000000"},"110410","TV DA BICA","INOP",3,"T",33.26393,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA SEDE",null,null,"TV",null,"110410",1,null,"TV DA SEDE",10401,10409,{"$raw":"00000000"},"110410","TV DA SEDE","INOP",3,"T",53.46288,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MONTEJUNTO",null,null,"TV",null,"110410",1,null,"TV MONTEJUNTO",10402,10410,{"$raw":"00000000"},"110410","TV MONTEJUNTO","OPER",2,"A",59.22980,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ESCADINHAS",null,null,"R",null,"110410",1,null,"R DAS ESCADINHAS",10403,10411,{"$raw":"00000000"},"110410","R DAS ESCADINHAS","INOP",3,"T",123.93409,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE SANTO ANTÓNIO",null,null,"R",null,"110410",1,null,"R DE SANTO ANTÓNIO",10404,10412,{"$raw":"00000000"},"110410","R DE SANTO ANTÓNIO","INOP",3,"T",73.91828,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",10405,10413,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",51.84442,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","8","8",null,null,"EN",null,"110408",1,null,"IC 1",10406,10414,{"$raw":"00000000"},"110408","IC 1","OPER",2,"A",271.05934,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","8","8",null,null,"EN",null,"110408",1,null,"IC 1",10407,10415,{"$raw":"00000000"},"110408","IC 1","OPER",2,"A",496.53856,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO COMERCIO",null,null,"LG",null,"110410",1,null,"LG DO COMERCIO",10408,10416,{"$raw":"00000000"},"110410","LG DO COMERCIO","OPER",2,"A",32.89308,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"TV",null,"110410",1,null,"TV DAS FLORES",10409,10417,{"$raw":"00000000"},"110410","TV DAS FLORES","OPER",2,"A",54.84063,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CABINE",null,null,"TV",null,"110410",1,null,"TV DA CABINE",10410,10418,{"$raw":"00000000"},"110410","TV DA CABINE","INOP",3,"T",112.51519,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DE ALCÂNTARA",null,null,"R",null,"110410",1,null,"R DE ALCÂNTARA",10411,10419,{"$raw":"00000000"},"110410","R DE ALCÂNTARA","OPER",1,"A",50.79627,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ADRO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO ADRO",10412,10420,{"$raw":"00000000"},"110402","R DO ADRO","INOP",3,"T",38.31334,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE AGOSTO",null,null,"TV",null,"110410",1,null,"TV 15 DE AGOSTO",10413,10421,{"$raw":"00000000"},"110410","TV 15 DE AGOSTO","INOP",3,"T",31.46278,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PRIOR",null,null,"TV",null,"110410",1,null,"TV DO PRIOR",10414,10422,{"$raw":"00000000"},"110410","TV DO PRIOR","INOP",3,"T",102.15499,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ROSA",null,null,"TV",null,"110410",1,null,"TV DA ROSA",10415,10423,{"$raw":"00000000"},"110410","TV DA ROSA","INOP",3,"T",39.61914,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ARNEIRO",null,null,"R",null,"110409",1,null,"R DO ARNEIRO",10416,10424,{"$raw":"00000000"},"110409","R DO ARNEIRO","OPER",1,"A",88.48402,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110409",1,null,"R DA FONTE",10417,10425,{"$raw":"00000000"},"110409","R DA FONTE","OPER",1,"A",112.00392,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ADRO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO ADRO",10418,10426,{"$raw":"00000000"},"110402","R DO ADRO","INOP",3,"T",44.83796,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","PRINCIPAL",null,null,"R",null,"110401",1,null,"R PRINCIPAL",10419,10427,{"$raw":"00000000"},"110401","R PRINCIPAL","OPER",1,"T",6.28358,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CANTINHO",null,null,"LG",null,"110405",1,null,"LG CANTINHO",10420,10428,{"$raw":"00000000"},"110405","LG CANTINHO","OPER",1,"A",11.59552,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL",null,null,"ESTR",null,"110410",1,null,"ESTR FLORESTAL",10421,10429,{"$raw":"00000000"},"110410","ESTR FLORESTAL","OPER",1,"A",255.22061,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1",null,null,"DOS JORÓNIMOS",null,null,"TV",null,"110405",1,null,"TV DOS JORÓNIMOS",10422,10430,{"$raw":"00000000"},"110405","TV DOS JORÓNIMOS","INOP",3,"T",41.65670,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALECRIM",null,null,"TV",null,"110405",1,null,"TV DO ALECRIM",10423,10431,{"$raw":"00000000"},"110405","TV DO ALECRIM","INOP",3,"T",53.25260,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO FERREIRO",null,null,"TV",null,"110405",1,null,"TV DO FERREIRO",10424,10432,{"$raw":"00000000"},"110405","TV DO FERREIRO","OPER",2,"A",89.37594,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PAZ",null,"SIM","BC",null,"110407",1,null,"BC DA PAZ",10425,10433,{"$raw":"00000000"},"110407","BC DA PAZ","INOP",3,"T",23.32157,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHOUPO",null,"03 Out 2006","R",null,"110409",1,null,"R DO CHOUPO",10426,10434,{"$raw":"00000000"},"110409","R DO CHOUPO","INOP",3,"T",55.15686,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHOUPO",null,"03 Out 2006","R",null,"110409",1,null,"R DO CHOUPO",10427,10435,{"$raw":"00000000"},"110409","R DO CHOUPO","INOP",3,"T",42.46004,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AUGUSTO BARRETO","Existiram bases com 'Afonso' em vez de 'Augusto'",null,"R",null,"110408",1,null,"R AUGUSTO BARRETO",10428,10436,{"$raw":"00000000"},"110408","R AUGUSTO BARRETO","INOP",3,"T",111.58502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"BELA VISTA",null,null,"R",null,"110408",1,null,"R BELA VISTA",10429,10437,{"$raw":"00000000"},"110408","R BELA VISTA","INOP",3,"T",43.71453,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS FERNANDES",null,null,"TV",null,"110408",1,null,"TV DOS FERNANDES",10430,10438,{"$raw":"00000000"},"110408","TV DOS FERNANDES","INOP",3,"T",40.37762,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MELHOR",null,"26 ago 2003","R",null,"110410",1,null,"R MELHOR",10431,10439,{"$raw":"00000000"},"110410","R MELHOR","INOP",3,"T",123.58763,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DE SANTO ANTÓNIO",null,null,"CC",null,"110405",1,null,"CC DE SANTO ANTÓNIO",10432,10440,{"$raw":"00000000"},"110405","CC DE SANTO ANTÓNIO","OPER",1,"A",68.66653,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SANTO ANTÓNIO",null,null,"TV",null,"110405",1,null,"TV SANTO ANTÓNIO",10433,10441,{"$raw":"00000000"},"110405","TV SANTO ANTÓNIO","OPER",1,"A",65.39822,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS LAJES",null,null,"R",null,"110405",1,null,"R DAS LAJES",10434,10442,{"$raw":"00000000"},"110405","R DAS LAJES","OPER",1,"A",22.79584,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS PINTEUS",null,null,"RAMPA",null,"110405",1,null,"RAMPA DOS PINTEUS",10435,10443,{"$raw":"00000000"},"110405","RAMPA DOS PINTEUS","OPER",2,"A",44.72917,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOLEIRO",null,null,"TV",null,"110405",1,null,"TV DO MOLEIRO",10436,10444,{"$raw":"00000000"},"110405","TV DO MOLEIRO","OPER",1,"A",53.96236,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110405",1,null,"R DAS FLORES",10437,10445,{"$raw":"00000000"},"110405","R DAS FLORES","INOP",3,"T",26.27006,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS RESTAURADORES DO CONCELHO",null,"27 Jan 2004","R",null,"110402",1,null,"R DOS RESTAURADORES DO CONCELHO",10438,10446,{"$raw":"00000000"},"110402","R DOS RESTAURADORES DO CONCELHO","INOP",3,"T",85.91692,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CANTINHO",null,null,"TV",null,"110408",1,null,"TV DO CANTINHO",10439,10447,{"$raw":"00000000"},"110408","TV DO CANTINHO","INOP",3,"T",34.83351,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,"26 ago 2003","TV",null,"110410",1,null,"TV DAS FLORES",10440,10448,{"$raw":"00000000"},"110410","TV DAS FLORES","INOP",3,"T",33.32098,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA TIA SOFIA","Aprovado na acta de 20 Jul 1998 - TV DOS GARCIAS",null,"R",null,"110410",1,null,"R DA TIA SOFIA",10441,10449,{"$raw":"00000000"},"110410","R DA TIA SOFIA","INOP",3,"T",40.42264,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE","Tem PL","20 JUL 1998","R",null,"110410",1,null,"R DA FONTE",10442,10450,{"$raw":"00000000"},"110410","R DA FONTE","INOP",3,"T",92.39623,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE","Tem PL","20 Jul 1998","TV",null,"110410",1,null,"TV DA FONTE",10443,10451,{"$raw":"00000000"},"110410","TV DA FONTE","INOP",3,"T",53.72323,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POÇO","Tem PL","20 Jul 1997","ESCNH",null,"110410",1,null,"ESCNH DO POÇO",10444,10452,{"$raw":"00000000"},"110410","ESCNH DO POÇO","INOP",3,"T",6.56491,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE","Com PL","20 jul 1998","ESCNH",null,"110410",1,null,"ESCNH DA LIBERDADE",10445,10453,{"$raw":"00000000"},"110410","ESCNH DA LIBERDADE","INOP",3,"T",27.15860,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOLEIRO","Tem PL","20 Jul 1998","LG",null,"110410",1,null,"LG DO MOLEIRO",10446,10454,{"$raw":"00000000"},"110410","LG DO MOLEIRO","INOP",3,"T",16.98125,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BELA VISTA","Tem PL","20 Jul 1998","TV",null,"110410",1,null,"TV DA BELA VISTA",10447,10455,{"$raw":"00000000"},"110410","TV DA BELA VISTA","INOP",3,"T",28.56484,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS JARDINS",null,null,"R",null,"110410",1,null,"R DOS JARDINS",10448,10456,{"$raw":"00000000"},"110410","R DOS JARDINS","INOP",3,"T",62.74677,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","MARQUESES DE RIO MAIOR",null,null,"LG",null,"110410",1,null,"LG MARQUESES DE RIO MAIOR",10449,10457,{"$raw":"00000000"},"110410","LG MARQUESES DE RIO MAIOR","OPER",2,"A",18.72920,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PERDIGÃO",null,null,"BC",null,"110404",1,null,"BC DO PERDIGÃO",10450,10458,{"$raw":"00000000"},"110404","BC DO PERDIGÃO","INOP",3,"T",65.83087,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS COELHOS",null,"18 Jun 2002","TV",null,"110405",1,null,"TV DOS COELHOS",10451,10459,{"$raw":"00000000"},"110405","TV DOS COELHOS","INOP",3,"T",46.30038,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CHARNECA",null,"26 mar 2001","BC",null,"110405",1,null,"BC DA CHARNECA",10452,10460,{"$raw":"00000000"},"110405","BC DA CHARNECA","INOP",3,"T",8.26143,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL MOURO",null,null,"R",null,"110404",1,null,"R CASAL MOURO",10453,10461,{"$raw":"00000000"},"110404","R CASAL MOURO","INOP",3,"T",203.19967,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL MOURO",null,null,"R",null,"110406",1,null,"R CASAL MOURO",10454,10462,{"$raw":"00000000"},"110406","R CASAL MOURO","INOP",3,"T",382.74732,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA DA CONCEIÇÃO",null,null,"BC",null,"110406",1,null,"BC MARIA DA CONCEIÇÃO",10455,10463,{"$raw":"00000000"},"110406","BC MARIA DA CONCEIÇÃO","INOP",3,"T",42.17946,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"GUILHERME LUÍS NUNES",null,"17 Dez 2002","R",null,"110402",1,null,"R GUILHERME LUÍS NUNES",10456,10464,{"$raw":"00000000"},"110402","R GUILHERME LUÍS NUNES","INOP",3,"T",562.00703,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE PISCO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE PISCO",10457,10465,{"$raw":"00000000"},"110402","R DO VALE PISCO","OPER",1,"A",196.06836,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,"15 Mar 1999","R",null,"110402",1,null,"R DO OLIVAL DA FONTE",10458,10466,{"$raw":"00000000"},"110402","R DO OLIVAL DA FONTE","OPER",2,"A",57.66613,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA IGREJA",null,"SIM","LG",null,"110402",1,null,"LG DA IGREJA",10459,10467,{"$raw":"00000000"},"110402","LG DA IGREJA","INOP",3,"T",27.86671,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ADRO",null,"15 Mar 1999","TV",null,"110402",1,null,"TV DO ADRO",10460,10468,{"$raw":"00000000"},"110402","TV DO ADRO","INOP",3,"T",63.80637,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALMEIDA GARRETE","Dados JF - Set 2006",null,"TV",null,"110408",1,null,"TV ALMEIDA GARRETE",10461,10469,{"$raw":"00000000"},"110408","TV ALMEIDA GARRETE","INOP",3,"T",19.48748,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110405",1,null,"R DAS FLORES",10462,10470,{"$raw":"00000000"},"110405","R DAS FLORES","INOP",3,"T",113.11649,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1033","JOSÉ DUARTE",null,null,"R",null,"110408",1,null,"R JOSÉ DUARTE",10463,10471,{"$raw":"00000000"},"110408","R JOSÉ DUARTE","OPER",2,"A",3.98075,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,"15 Mar 1999","R",null,"110402",1,null,"R DO OLIVAL DA FONTE",10464,10472,{"$raw":"00000000"},"110402","R DO OLIVAL DA FONTE","OPER",2,"A",184.02600,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",10465,10473,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",36.45311,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",10466,10474,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",11.73566,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BICA",null,null,"R",null,"110410",1,null,"R DA BICA",10467,10475,{"$raw":"00000000"},"110410","R DA BICA","INOP",3,"T",119.64317,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",10468,10476,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",57.92375,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",10469,10477,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",29.11919,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",10470,10478,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",84.45494,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"PRINCIPAL",null,"26 ago 2003","R",null,"110410",1,null,"R PRINCIPAL",10471,10479,{"$raw":"00000000"},"110410","R PRINCIPAL","INOP",3,"T",25.84781,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,"26 ago 2003","LG",null,"110410",1,null,"LG DO CHAFARIZ",10472,10480,{"$raw":"00000000"},"110410","LG DO CHAFARIZ","INOP",3,"T",20.54502,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,"SIM","LG",null,"110410",1,null,"LG DO CHAFARIZ",10473,10481,{"$raw":"00000000"},"110410","LG DO CHAFARIZ","INOP",3,"T",11.81064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1042","MARQUESES DE RIO MAIOR",null,null,"LG",null,"110410",1,null,"LG MARQUESES DE RIO MAIOR",10474,10482,{"$raw":"00000000"},"110410","LG MARQUESES DE RIO MAIOR","OPER",2,"A",3.08015,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",10475,10483,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",12.41693,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,"20 Jul 1998","R",null,"110410",1,null,"R DAS FLORES",10476,10484,{"$raw":"00000000"},"110410","R DAS FLORES","INOP",3,"T",46.42745,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MANUEL DUARTE",null,"20 Jul 1998","R",null,"110410",1,null,"R MANUEL DUARTE",10477,10485,{"$raw":"00000000"},"110410","R MANUEL DUARTE","INOP",3,"T",61.94967,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",10478,10486,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",34.84300,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO POVO",null,null,"LG",null,"110402",1,null,"LG DO POVO",10479,10487,{"$raw":"00000000"},"110402","LG DO POVO","INOP",3,"T",10.59252,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO GOMES GAIO",null,null,"R",null,"110409",1,null,"R ANTÓNIO GOMES GAIO",10480,10488,{"$raw":"00000000"},"110409","R ANTÓNIO GOMES GAIO","INOP",3,"T",23.83150,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VALENTES",null,null,"R",null,"110401",1,null,"R DOS VALENTES",10481,10489,{"$raw":"00000000"},"110401","R DOS VALENTES","INOP",3,"T",12.21202,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",10482,10490,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",39.99770,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","ANTÓNIO HENRIQUES",null,null,"R",null,"110407",1,null,"R ANTÓNIO HENRIQUES",10483,10491,{"$raw":"00000000"},"110407","R ANTÓNIO HENRIQUES","OPER",1,"A",19.79982,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",10484,10492,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",33.33873,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",10485,10493,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",5.37188,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,"SIM","R",null,"110402",1,null,"R DO OLIVAL DA FONTE",10486,10494,{"$raw":"00000000"},"110402","R DO OLIVAL DA FONTE","INOP",3,"T",1.96425,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"IGREJA",null,null,"LG",null,"110405",1,null,"LG IGREJA",10487,10495,{"$raw":"00000000"},"110405","LG IGREJA","OPER",1,"A",51.21144,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"IGREJA",null,null,"LG",null,"110405",1,null,"LG IGREJA",10488,10496,{"$raw":"00000000"},"110405","LG IGREJA","OPER",1,"A",2.35689,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CANTINHO",null,null,"LG",null,"110405",1,null,"LG CANTINHO",10489,10497,{"$raw":"00000000"},"110405","LG CANTINHO","OPER",1,"A",14.78804,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",10490,10498,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",130.03312,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",10491,10499,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",14.44490,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","8","8",null,null,"EN",null,"110408",1,null,"IC 1",10492,10500,{"$raw":"00000000"},"110408","IC 1","OPER",2,"A",584.62851,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JÚLIO DINIZ",null,"15 Mar 1999 \"... até ao Largo da Igreja\"","R",null,"110402",1,null,"R JÚLIO DINIZ",10493,10501,{"$raw":"00000000"},"110402","R JÚLIO DINIZ","INOP",3,"T",19.93155,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PERDIGOTA",null,"SIM","R",null,"110408",1,null,"R DA PERDIGOTA",10494,10502,{"$raw":"00000000"},"110408","R DA PERDIGOTA","INOP",3,"T",1.87155,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA COSTA","Dúvidas se poderá ser Estrada em vez de Rua","14/06/2005","R",null,"110409",1,null,"R DA COSTA",10495,10503,{"$raw":"00000000"},"110409","R DA COSTA","INOP",3,"T",688.55294,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA GNR",null,null,"PTO",null,"110402",1,null,"PTO DA GNR",10496,10504,{"$raw":"00000000"},"110402","PTO DA GNR","OPER",2,"A",27.51177,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",10497,10505,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",36.25971,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","ALTO DO BACALHAU",null,"8 Out 2002","R",null,"110402",1,null,"R ALTO DO BACALHAU",10498,10506,{"$raw":"00000000"},"110402","R ALTO DO BACALHAU","OPER",1,"A",13.54422,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110410",1,null,"CM 1043",10499,10507,{"$raw":"00000000"},"110410","CM 1043","OPER",2,"A",7.69926,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","1043",null,null,"CM",null,"110405",1,null,"CM 1043",10500,10508,{"$raw":"00000000"},"110405","CM 1043","OPER",2,"A",6.73000,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DA FONTE",null,null,"R",null,"110410",2,"110405","R DA FONTE",10501,10509,{"$raw":"00000000"},"110410","R DA FONTE","OPER",2,"A",67.10160,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"EIRA DA MARQUESA",null,"5 Abr 2005","R",null,"110408",1,null,"R EIRA DA MARQUESA",10502,10510,{"$raw":"00000000"},"110408","R EIRA DA MARQUESA","OPER",2,"A",214.21074,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",10503,10511,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","OPER",2,"A",53.20801,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LUIS DE CAMÕES",null,null,"R",null,"110408",1,null,"R LUIS DE CAMÕES",10504,10512,{"$raw":"00000000"},"110408","R LUIS DE CAMÕES","OPER",2,"A",192.86043,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",10505,10513,{"$raw":"00000000"},"110408","EM 570","OPER",1,"A",346.89440,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","570","570",null,null,"EM",null,"110408",1,null,"EM 570",10506,10514,{"$raw":"00000000"},"110408","EM 570","OPER",2,"A",154.05652,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DA MURTA",null,null,"QTA",null,"110402",1,null,"QTA DA MURTA",10507,10515,{"$raw":"00000000"},"110402","QTA DA MURTA","OPER",2,"A",113.41105,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1030","DO CARAPUÇO",null,null,"QTA",null,"110407",1,null,"QTA DO CARAPUÇO",10508,10516,{"$raw":"00000000"},"110407","QTA DO CARAPUÇO","OPER",2,"A",403.17811,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE",null,null,"AZ",null,"110408",1,null,"AZ DO VALE",10509,10517,{"$raw":"00000000"},"110408","AZ DO VALE","INOP",3,"T",42.25682,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA QUINTA",null,"26 mar 2001","R",null,"110405",1,null,"R DA QUINTA",10510,10518,{"$raw":"00000000"},"110405","R DA QUINTA","INOP",3,"T",300.54321,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JÚLIO DINIZ",null,"15 Mar 1999 \"... até ao Largo da Igreja\"","R",null,"110402",1,null,"R JÚLIO DINIZ",10511,10519,{"$raw":"00000000"},"110402","R JÚLIO DINIZ","INOP",3,"T",28.42399,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PAZ",null,null,"R",null,"110402",1,null,"R DA PAZ",10512,10520,{"$raw":"00000000"},"110402","R DA PAZ","INOP",3,"T",14.55937,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARVALHEIRO",null,null,"R",null,"110405",1,null,"R DO CARVALHEIRO",10513,10521,{"$raw":"00000000"},"110405","R DO CARVALHEIRO","OPER",2,"A",82.46212,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARVALHEIRO",null,null,"R",null,"110405",1,null,"R DO CARVALHEIRO",10514,10522,{"$raw":"00000000"},"110405","R DO CARVALHEIRO","INOP",3,"T",13.20140,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"CC",null,"110402",1,null,"CC DA FONTE",10515,10523,{"$raw":"00000000"},"110402","CC DA FONTE","OPER",2,"A",51.09528,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DA FONTE",null,null,"R",null,"110405",1,null,"R DA FONTE",10516,10524,{"$raw":"00000000"},"110405","R DA FONTE","OPER",2,"A",74.10227,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"TV",null,"110405",1,null,"TV DA FONTE",10517,10525,{"$raw":"00000000"},"110405","TV DA FONTE","INOP",3,"T",100.35519,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AUGUSTO BARRETO","Existiram bases com 'Afonso' em vez de 'Augusto'",null,"R",null,"110408",1,null,"R AUGUSTO BARRETO",10518,10526,{"$raw":"00000000"},"110408","R AUGUSTO BARRETO","INOP",3,"T",71.41575,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL DA FONTE",null,"15 Mar 1999","R",null,"110402",1,null,"R DO OLIVAL DA FONTE",10519,10527,{"$raw":"00000000"},"110402","R DO OLIVAL DA FONTE","OPER",2,"A",66.75690,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALFERES JOSÉ VENTURA RODRIGUES",null,null,"R",null,"110406",1,null,"R ALFERES JOSÉ VENTURA RODRIGUES",10520,10528,{"$raw":"00000000"},"110406","R ALFERES JOSÉ VENTURA RODRIGUES","INOP",3,"T",64.97999,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","573","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",10521,10529,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",258.75437,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"JOÃO SANTA BÁRBARA",null,null,"R",null,"110402",1,null,"R JOÃO SANTA BÁRBARA",10522,10530,{"$raw":"00000000"},"110402","R JOÃO SANTA BÁRBARA","INOP",3,"T",158.89971,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","D FERNANDO",null,null,"R",null,"110402",1,null,"R D FERNANDO",10523,10531,{"$raw":"00000000"},"110402","R D FERNANDO","OPER",1,"A",67.96906,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","D FERNANDO",null,null,"R",null,"110402",1,null,"R D FERNANDO",10524,10532,{"$raw":"00000000"},"110402","R D FERNANDO","OPER",1,"A",6.86223,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA OLIVENZA",null,"9 Jan 2007","R",null,"110402",1,null,"R DA OLIVEZA",10525,10533,{"$raw":"00000000"},"110402","R DA OLIVEZA","INOP",3,"T",92.08825,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA OLIVENZA",null,"9 Jan 2007","R",null,"110402",1,null,"R DA OLIVEZA",10526,10534,{"$raw":"00000000"},"110402","R DA OLIVEZA","INOP",3,"T",79.61475,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA OLIVENZA",null,"9 Jan 2007","R",null,"110402",1,null,"R DA OLIVEZA",10527,10535,{"$raw":"00000000"},"110402","R DA OLIVEZA","INOP",3,"T",89.63848,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA OLIVENZA",null,"9 Jan 2007","R",null,"110402",1,null,"R DA OLIVEZA",10528,10536,{"$raw":"00000000"},"110402","R DA OLIVEZA","OPER",2,"A",22.24937,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,10529,10537,{"$raw":"00000000"},"110402","MJ.3.6046","INOP",3,"T",61.55050,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CALVÁRIO","Levantamento a Nov 2006",null,"R",null,"110408",1,null,"R DO CALVÁRIO",10530,10538,{"$raw":"00000000"},"110408","R DO CALVÁRIO","OPER",2,"A",23.26126,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","PRINCIPAL",null,null,"R",null,"110410",1,null,"R PRINCIPAL",10531,10539,{"$raw":"00000000"},"110410","R PRINCIPAL","OPER",2,"A",203.02495,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",10532,10540,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",11.25281,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",1,null,"EN 115",10533,10541,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",212.43819,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO DESVIO",null,null,"R",null,"110408",1,null,"R DO DESVIO",10534,10542,{"$raw":"00000000"},"110408","R DO DESVIO","INOP",3,"T",153.69339,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612-1","PE JOSÉ INÁCIO PEREIRA",null,null,"R",null,"110402",1,null,"R PE JOSÉ INÁCIO PEREIRA",10535,10543,{"$raw":"00000000"},"110402","R PE JOSÉ INÁCIO PEREIRA","OPER",2,"A",34.31549,4.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO LOUREIRO",null,null,"TV",null,"110405",1,null,"TV DO LOUREIRO",10536,10544,{"$raw":"00000000"},"110405","TV DO LOUREIRO","OPER",2,"A",38.46111,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AFONSO COSTA",null,null,"R",null,"110408",1,null,"R AFONSO COSTA",10537,10545,{"$raw":"00000000"},"110408","R AFONSO COSTA","OPER",2,"A",18.05031,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AFONSO COSTA",null,null,"R",null,"110408",1,null,"R AFONSO COSTA",10538,10546,{"$raw":"00000000"},"110408","R AFONSO COSTA","OPER",2,"A",61.56029,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON DE MATOS",10539,10547,{"$raw":"00000000"},"110408","R NORTON DE MATOS","INOP",3,"T",29.23274,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110408",1,null,"R DA LIBERDADE",10540,10548,{"$raw":"00000000"},"110408","R DA LIBERDADE","INOP",3,"T",8.52908,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"AFONSO COSTA",null,null,"R",null,"110408",1,null,"R AFONSO COSTA",10541,10549,{"$raw":"00000000"},"110408","R AFONSO COSTA","INOP",3,"T",34.42310,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ROGERIO CORREIA FRANCISCO",null,null,"R",null,"110406",1,null,"R ROGERIO CORREIA FRANCISCO",10542,10550,{"$raw":"00000000"},"110406","R ROGERIO CORREIA FRANCISCO","INOP",3,"T",20.22456,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON DE MATOS",10543,10551,{"$raw":"00000000"},"110408","R NORTON DE MATOS","OPER",2,"A",23.71052,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON DE MATOS",10544,10552,{"$raw":"00000000"},"110408","R NORTON DE MATOS","INOP",3,"T",51.24466,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361-1","361-1",null,null,"EN",null,"110408",1,null,"EN 361-1",10545,10553,{"$raw":"00000000"},"110408","EN 361-1","OPER",1,"A",8.46070,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ALMEIDA GARRETE","Dados JF - Set 2006",null,"TV",null,"110408",1,null,"TV ALMEIDA GARRETE",10546,10554,{"$raw":"00000000"},"110408","TV ALMEIDA GARRETE","INOP",3,"T",14.48676,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CALVÁRIO","Levantamento a Nov 2006",null,"R",null,"110408",1,null,"R DO CALVÁRIO",10547,10555,{"$raw":"00000000"},"110408","R DO CALVÁRIO","OPER",2,"A",65.60391,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",10548,10556,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",71.78313,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PERDIGOTA",null,"26 mar 2001","R",null,"110408",1,null,"R DA PERDIGOTA",10549,10557,{"$raw":"00000000"},"110408","R DA PERDIGOTA","INOP",3,"T",321.73116,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CARVALHEIRO",null,null,"R",null,"110405",1,null,"R DO CARVALHEIRO",10550,10558,{"$raw":"00000000"},"110405","R DO CARVALHEIRO","INOP",3,"T",206.72062,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","1024",null,null,"CM",null,"110404",1,null,"CM 1024",10551,10559,{"$raw":"00000000"},"110404","CM 1024","OPER",2,"A",20.75792,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110404",2,"110406","EN 115",10552,10560,{"$raw":"00000000"},"110404","EN 115","OPER",1,"A",338.10311,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1044","DO POÇO",null,null,"R",null,"110405",1,null,"R DO POÇO",10553,10561,{"$raw":"00000000"},"110405","R DO POÇO","OPER",2,"A",46.25978,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","JULIO BERNARDO DA SILVA",null,null,"R",null,"110406",1,null,"R JULIO BERNARDO DA SILVA",10554,10562,{"$raw":"00000000"},"110406","R JULIO BERNARDO DA SILVA","OPER",2,"A",105.80950,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","JULIO BERNARDO DA SILVA",null,null,"R",null,"110406",1,null,"R JULIO BERNARDO DA SILVA",10555,10563,{"$raw":"00000000"},"110406","R JULIO BERNARDO DA SILVA","OPER",2,"A",102.37956,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","JULIO BERNARDO DA SILVA",null,null,"R",null,"110406",2,"110404","R JULIO BERNARDO DA SILVA",10556,10564,{"$raw":"00000000"},"110406","R JULIO BERNARDO DA SILVA","OPER",2,"A",35.01696,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110407",1,null,"ESTR DO PERAL",10557,10565,{"$raw":"00000000"},"110407","ESTR DO PERAL","OPER",1,"A",607.51426,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","DE ALCÂNTARA",null,null,"R",null,"110410",1,null,"R DE ALCÂNTARA",10558,10566,{"$raw":"00000000"},"110410","R DE ALCÂNTARA","OPER",1,"A",48.99994,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE",null,null,"TV",null,"110405",1,null,"TV DO VALE",10559,10567,{"$raw":"00000000"},"110405","TV DO VALE","INOP",3,"T",480.14544,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110404",1,null,"EN 115",10560,10568,{"$raw":"00000000"},"110404","EN 115","OPER",1,"A",169.80619,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110401","EN 366",10561,10569,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",663.12617,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","366","366",null,null,"EN",null,"110407",2,"110404","EN 366",10562,10570,{"$raw":"00000000"},"110407","EN 366","OPER",1,"A",100.25817,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","BERNARDO MARTINS",null,null,"R",null,"110405",1,null,"R BERNARDO MARTINS",10563,10571,{"$raw":"00000000"},"110405","R BERNARDO MARTINS","OPER",2,"A",2.77597,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",1,null,"EN 115-1",10564,10572,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",106.30864,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110403",2,"110405","EN 115-1",10565,10573,{"$raw":"00000000"},"110403","EN 115-1","OPER",1,"A",152.28497,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"25 DE ABRIL",null,"14/06/2005","R",null,"110409",1,null,"R 25 DE ABRIL",10566,10574,{"$raw":"00000000"},"110409","R 25 DE ABRIL","INOP",3,"T",51.09195,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS RIBEIROS",null,"14/06/2005","BC",null,"110409",1,null,"BC DOS RIBEIROS",10567,10575,{"$raw":"00000000"},"110409","BC DOS RIBEIROS","INOP",3,"T",40.31843,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PEDREIRA",null,"14/06/2005","R",null,"110409",1,null,"R DA PEDREIRA",10568,10576,{"$raw":"00000000"},"110409","R DA PEDREIRA","INOP",3,"T",81.01896,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ADEGAS",null,"14/06/2005","BC",null,"110410",1,null,"BC DAS ADEGAS",10569,10577,{"$raw":"00000000"},"110410","BC DAS ADEGAS","INOP",3,"T",59.41838,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE AGOSTO",null,null,"R",null,"110410",1,null,"R 15 DE AGOSTO",10570,10578,{"$raw":"00000000"},"110410","R 15 DE AGOSTO","INOP",3,"T",21.09064,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"15 DE AGOSTO",null,null,"R",null,"110410",1,null,"R 15 DE AGOSTO",10571,10579,{"$raw":"00000000"},"110410","R 15 DE AGOSTO","INOP",3,"T",80.84894,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",2,"110409","EN 361",10572,10580,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",69.70744,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","361","361",null,null,"EN",null,"110402",1,null,"EN 361",10573,10581,{"$raw":"00000000"},"110402","EN 361","OPER",1,"A",106.66554,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO PINHEIRO",null,"05/04/2005","ESTR",null,"110401",1,null,"ESTR DO PINHEIRO",10574,10582,{"$raw":"00000000"},"110401","ESTR DO PINHEIRO","INOP",3,"A",347.55992,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110409",1,null,"ESTR DO PERAL",10575,10583,{"$raw":"00000000"},"110409","ESTR DO PERAL","OPER",1,"A",144.39917,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DO PERAL",null,null,"ESTR",null,"110407",2,"110409","ESTR DO PERAL",10576,10584,{"$raw":"00000000"},"110407","ESTR DO PERAL","OPER",1,"A",24.19616,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","1029",null,null,"CM",null,"110405",1,null,"CM 1029",10577,10585,{"$raw":"00000000"},"110405","CM 1029","OPER",1,"A",252.64803,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","1029",null,null,"CM",null,"110402",1,null,"CM 1029",10578,10586,{"$raw":"00000000"},"110402","CM 1029","OPER",1,"A",156.61100,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS RESTAURADORES DO CONCELHO",null,"SIM","R",null,"110402",1,null,"R DOS RESTAURADORES DO CONCELHO",10579,10587,{"$raw":"00000000"},"110402","R DOS RESTAURADORES DO CONCELHO","INOP",3,"T",7.15280,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","FLORESTAL","Dúvidas se é Estrada Militar",null,"ESTR",null,"110410",1,null,"ESTR FLORESTAL",10580,10588,{"$raw":"00000000"},"110410","ESTR FLORESTAL","OPER",1,"A",217.54344,6.00000,"ESI","ESI","MAN","ESI","ESI",0,0,5,0,0,0,0,2,0,0,0,1,1,1,1,null,null]
["1",null,null,"DAS ARRIBAS",null,null,"ESTR",null,"110406",1,null,"ESTR DAS ARRIBAS",10581,10589,{"$raw":"00000000"},"110406","ESTR DAS ARRIBAS","OPER",2,"A",148.41760,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043-1","LAURA SANTOS LIMA",null,null,"AV",null,"110410",1,null,"AV LAURA SANTOS LIMA",10582,10590,{"$raw":"00000000"},"110410","AV LAURA SANTOS LIMA","OPER",2,"A",20.76308,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"LADEIRA DAS COELHAS",null,null,"R",null,"110406",1,null,"R LADEIRA DAS COELHAS",10583,10591,{"$raw":"00000000"},"110406","R LADEIRA DAS COELHAS","INOP",3,"T",148.47483,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10584,10592,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",220.53202,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10585,10593,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",16.53216,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LAVADOUROS",null,"14/06/2005","ESTR",null,"110401",1,null,"ESTR DOS LAVADOUROS",10586,10594,{"$raw":"00000000"},"110401","ESTR DOS LAVADOUROS","INOP",3,"T",269.54683,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","PROF MARCELO CAETANO","Anteriormente teve a designação de R 25 de Abril",null,"R",null,"110406",1,null,"R PROF MARCELO CAETANO",10587,10595,{"$raw":"00000000"},"110406","R PROF MARCELO CAETANO","OPER",2,"A",46.30412,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO INÁCIO LOPES DA SILVA",null,null,"R",null,"110406",1,null,"R ANTÓNIO INÁCIO LOPES DA SILVA",10588,10596,{"$raw":"00000000"},"110406","R ANTÓNIO INÁCIO LOPES DA SILVA","INOP",3,"T",10.13040,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO INÁCIO LOPES DA SILVA",null,null,"R",null,"110406",1,null,"R ANTÓNIO INÁCIO LOPES DA SILVA",10589,10597,{"$raw":"00000000"},"110406","R ANTÓNIO INÁCIO LOPES DA SILVA","INOP",3,"T",86.40412,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DA AZINHEIRA",null,"07/01/2007","R",null,"110405",1,null,"R DO VALE DA AZINHEIRA",10590,10598,{"$raw":"00000000"},"110405","R DO VALE DA AZINHEIRA","INOP",3,"T",168.98524,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL DO BRAVO",null,"07/01/2007","R",null,"110405",1,null,"R CASAL DO BRAVO",10591,10599,{"$raw":"00000000"},"110405","R CASAL DO BRAVO","INOP",3,"T",203.04196,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,10592,10600,{"$raw":"00000000"},"110405","MJ.3.6047","INOP",3,"T",19.71404,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110405",1,null,null,10593,10601,{"$raw":"00000000"},"110405","MJ.3.6048","INOP",3,"T",44.92183,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10594,10602,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",21.73190,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10595,10603,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",92.03220,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SERRADO",null,"07/01/2007","TV",null,"110405",1,null,"TV DO SERRADO",10596,10604,{"$raw":"00000000"},"110405","TV DO SERRADO","INOP",3,"A",151.73669,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SERRADO",null,null,"R",null,"110405",1,null,"R DO SERRADO",10597,10605,{"$raw":"00000000"},"110405","R DO SERRADO","INOP",3,"A",141.87560,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SERRADO",null,null,"R",null,"110405",1,null,"R DO SERRADO",10598,10606,{"$raw":"00000000"},"110405","R DO SERRADO","INOP",3,"A",297.19814,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ARROZ","Dúvidas se é Estrada Vale de Arroz",null,"R",null,"110402",1,null,"R DO VALE DE ARROZ",10599,10607,{"$raw":"00000000"},"110402","R DO VALE DE ARROZ","OPER",2,"A",611.20428,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"CC",null,"110402",1,null,"CC DA FONTE",10600,10608,{"$raw":"00000000"},"110402","CC DA FONTE","INOP",3,"T",89.38585,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,"26 mar 2001","TV",null,"110402",1,null,"TV DAS EIRAS",10601,10609,{"$raw":"00000000"},"110402","TV DAS EIRAS","INOP",3,"T",29.50917,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"CC",null,"110402",1,null,"CC DAS EIRAS",10602,10610,{"$raw":"00000000"},"110402","CC DAS EIRAS","INOP",3,"T",65.47906,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"CC",null,"110402",1,null,"CC DAS EIRAS",10603,10611,{"$raw":"00000000"},"110402","CC DAS EIRAS","INOP",3,"T",30.25225,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,"15 Mar 1999","R",null,"110402",1,null,"R DO VALE DE ABRIGO",10604,10612,{"$raw":"00000000"},"110402","R DO VALE DE ABRIGO","INOP",3,"T",13.76056,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,null,"TV",null,"110402",1,null,"TV DO VALE DE ABRIGO",10605,10613,{"$raw":"00000000"},"110402","TV DO VALE DE ABRIGO","INOP",3,"T",24.24807,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,null,"TV",null,"110402",1,null,"TV DO VALE DE ABRIGO",10606,10614,{"$raw":"00000000"},"110402","TV DO VALE DE ABRIGO","INOP",3,"T",27.88938,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,null,"TV",null,"110402",1,null,"TV DO VALE DE ABRIGO",10607,10615,{"$raw":"00000000"},"110402","TV DO VALE DE ABRIGO","INOP",3,"T",50.09288,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE DE ABRIGO",null,null,"TV",null,"110402",1,null,"TV DO VALE DE ABRIGO",10608,10616,{"$raw":"00000000"},"110402","TV DO VALE DE ABRIGO","INOP",3,"T",19.67067,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,10609,10617,{"$raw":"00000000"},"110402","MJ.3.6049","INOP",3,"T",38.53698,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS BOMBEIROS",null,null,"AV",null,"110402",1,null,"AV DOS BOMBEIROS",10610,10618,{"$raw":"00000000"},"110402","AV DOS BOMBEIROS","INOP",3,"T",59.63769,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110402",1,null,null,10611,10619,{"$raw":"00000000"},"110402","MJ.3.6050","INOP",3,"T",83.63049,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,10612,10620,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,37.23410,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"ESCADINHAS",null,null,null,null,null,{"$raw":"*****"},null,"ESCADINHAS",10613,10621,{"$raw":"00000000"},null,"ESCADINHAS",null,{"$raw":"*****"},null,32.61231,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110402",1,null,"R DO CAMPO DA BOLA",10614,10622,{"$raw":"00000000"},"110402","R DO CAMPO DA BOLA","INOP",3,"A",253.26111,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110407",1,null,"R DO CAMPO DA BOLA",10615,10623,{"$raw":"00000000"},"110407","R DO CAMPO DA BOLA","INOP",3,"T",54.43357,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CAMPO DA BOLA",null,null,"R",null,"110407",1,null,"R DO CAMPO DA BOLA",10616,10624,{"$raw":"00000000"},"110407","R DO CAMPO DA BOLA","INOP",3,"T",83.70531,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MATICOS",null,"Inf JF em Dez 2008","R",null,null,{"$raw":"*****"},null,"R DOS MATICOS",10617,10625,{"$raw":"00000000"},null,"R DOS MATICOS",null,{"$raw":"*****"},null,200.74638,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LIBERDADE",null,null,"R",null,"110409",1,null,"R DA LIBERDADE",10618,10626,{"$raw":"00000000"},"110409","R DA LIBERDADE","INOP",3,"T",37.35913,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"TV",null,"110409",1,null,"TV DAS FLORES",10619,10627,{"$raw":"00000000"},"110409","TV DAS FLORES","OPER",1,"A",10.84546,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS LAVADOUROS","Confirmado, Março 2007. SGD nº 9709 de 7/10/2010","21 dez 2010","R",null,"110401",1,null,"R DOS LAVADOUROS",10620,10628,{"$raw":"00000000"},"110401","R DOS LAVADOUROS","INOP",3,"T",148.29093,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MARCO GEODÉSICO","Processo nº 03/06/320","3 Out 2006","R",null,"110402",1,null,"R DO MARCO GEODÉSICO",10621,10629,{"$raw":"00000000"},"110402","R DO MARCO GEODÉSICO","INOP",3,"T",69.46281,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MARCO GEODÉSICO","Processo nº 03/06/320","3 Out 2006","R",null,"110402",1,null,"R DO MARCO GEODÉSICO",10622,10630,{"$raw":"00000000"},"110402","R DO MARCO GEODÉSICO","INOP",3,"T",39.29773,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MARCO GEODÉSICO","Processo nº 03/06/320","3 Out 2006","R",null,"110402",1,null,"R DO MARCO GEODÉSICO",10623,10631,{"$raw":"00000000"},"110402","R DO MARCO GEODÉSICO","INOP",3,"T",13.05733,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA AZINHAGA",null,null,"R",null,null,{"$raw":"*****"},null,null,10624,10632,{"$raw":"00000000"},null,"MJ.3.6051",null,3,"T",84.42146,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1036","CASAL VIMEIRO",null,null,"R",null,"110405",1,null,"R CASAL VIMEIRO",10625,10633,{"$raw":"00000000"},"110405","R CASAL VIMEIRO","OPER",2,"A",462.78312,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA SERRA",null,null,"BC",null,null,{"$raw":"*****"},null,"BC DA SERRA",10626,10634,{"$raw":"00000000"},null,"BC DA SERRA",null,{"$raw":"*****"},null,16.39655,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"LG",null,null,{"$raw":"*****"},null,"LG DAS FLORES",10627,10635,{"$raw":"00000000"},null,"LG DAS FLORES",null,2,null,24.82562,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"TV",null,null,1,null,"DAS EIRAS",10628,10636,{"$raw":"00000000"},null,"DAS EIRAS",null,{"$raw":"*****"},null,47.67363,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DA FONTE",null,null,"R",null,null,{"$raw":"*****"},null,"R DA FONTE",10629,10637,{"$raw":"00000000"},null,"R DA FONTE",null,{"$raw":"*****"},null,23.48383,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","573","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",10630,10638,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",84.78478,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","573","SANTA ANA",null,"23 Out 2000","R",null,"110405",1,null,"R SANTA ANA",10631,10639,{"$raw":"00000000"},"110405","R SANTA ANA","OPER",2,"A",43.45355,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DA FONTE",null,null,"TV",null,null,{"$raw":"*****"},null,"TV DA FONTE",10632,10640,{"$raw":"00000000"},null,"TV DA FONTE",null,{"$raw":"*****"},null,55.15869,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO","Processo nº 03/07/267",null,"BC",null,"110405",1,null,"BC DO MOINHO",10633,10641,{"$raw":"00000000"},"110405","BC DO MOINHO","OPER",2,"A",166.40229,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","ND",null,"19 DE MARÇO","Com placa toponimica afixada",null,"R",null,"110405",1,null,"R 19 DE MARÇO",10634,10642,{"$raw":"00000000"},"110405","R 19 DE MARÇO","OPER",2,"A",155.32742,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,"23 Out 2000","R",null,"110405",1,null,"R DA FONTE",10635,10643,{"$raw":"00000000"},"110405","R DA FONTE","INOP",3,"T",35.58940,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,"23 Out 2000","R",null,"110405",1,null,"R DA FONTE",10636,10644,{"$raw":"00000000"},"110405","R DA FONTE","INOP",3,"T",172.69093,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESCOLA",null,null,"TV",null,"110405",1,null,"TV DA ESCOLA",10637,10645,{"$raw":"00000000"},"110405","TV DA ESCOLA","INOP",3,"T",46.81622,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"R",null,"110405",1,null,"R DAS EIRAS",10638,10646,{"$raw":"00000000"},"110405","R DAS EIRAS","INOP",3,"T",46.47666,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"R",null,"110405",1,null,"R DAS EIRAS",10639,10647,{"$raw":"00000000"},"110405","R DAS EIRAS","INOP",3,"T",62.90762,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"TV",null,"110405",1,null,"TV DA FONTE",10640,10648,{"$raw":"00000000"},"110405","TV DA FONTE","INOP",3,"T",27.23368,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"R",null,"110405",1,null,"R DAS EIRAS",10641,10649,{"$raw":"00000000"},"110405","R DAS EIRAS","INOP",3,"T",3.33215,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS EIRAS",null,null,"R",null,"110405",1,null,"R DAS EIRAS",10642,10650,{"$raw":"00000000"},"110405","R DAS EIRAS","INOP",3,"T",18.01352,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1031","DA LIBERDADE",null,null,"R",null,"110405",1,null,"R DA LIBERDADE",10643,10651,{"$raw":"00000000"},"110405","R DA LIBERDADE","OPER",1,"A",21.73645,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1031","DA LIBERDADE",null,null,"R",null,"110405",1,null,"R DA LIBERDADE",10644,10652,{"$raw":"00000000"},"110405","R DA LIBERDADE","OPER",1,"A",45.90797,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHOUPO",null,null,"BC",null,"110405",1,null,"BC DO CHOUPO",10645,10653,{"$raw":"00000000"},"110405","BC DO CHOUPO","OPER",2,"A",45.70645,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO JACINTO",null,null,"BC",null,"110405",1,null,"BC DO JACINTO",10646,10654,{"$raw":"00000000"},"110405","BC DO JACINTO","OPER",2,"A",55.57286,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10647,10655,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",32.11044,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10648,10656,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",85.02688,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10649,10657,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",21.20002,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CHÃ",null,null,"BC",null,"110405",1,null,"BC DA CHÃ",10650,10658,{"$raw":"00000000"},"110405","BC DA CHÃ","OPER",2,"A",33.24356,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110405",1,null,"R DA FONTE",10651,10659,{"$raw":"00000000"},"110405","R DA FONTE","INOP",3,"T",29.48849,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE",null,null,"R",null,"110405",1,null,"R DA FONTE",10652,10660,{"$raw":"00000000"},"110405","R DA FONTE","INOP",3,"T",30.43366,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10653,10661,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",63.81807,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10654,10662,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",14.65583,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10655,10663,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",62.38021,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CABEÇO DO MOINHO",null,null,"R",null,"110405",1,null,"R CABEÇO DO MOINHO",10656,10664,{"$raw":"00000000"},"110405","R CABEÇO DO MOINHO","INOP",3,"T",56.94655,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10657,10665,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",32.29527,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10658,10666,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",12.51881,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BORRACHO",null,"26 mar 2001","R",null,"110405",1,null,"R DO BORRACHO",10659,10667,{"$raw":"00000000"},"110405","R DO BORRACHO","INOP",3,"T",148.85259,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1035","PRINCIPAL",null,"26 mar 2001","R",null,"110405",1,null,"R PRINCIPAL",10660,10668,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",1,"A",425.16985,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL NICOLAU",null,null,"R",null,"110404",1,null,"R CASAL NICOLAU",10661,10669,{"$raw":"00000000"},"110404","R CASAL NICOLAU","OPER",1,"A",202.85797,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PORTELA",null,null,"R",null,"110405",1,null,"R DA PORTELA",10662,10670,{"$raw":"00000000"},"110405","R DA PORTELA","OPER",2,"A",63.60154,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOA UNIÃO",null,null,"R",null,"110405",1,null,"R DA BOA UNIÃO",10663,10671,{"$raw":"00000000"},"110405","R DA BOA UNIÃO","OPER",2,"A",142.45418,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PORTELA",null,null,"R",null,"110405",1,null,"R DA PORTELA",10664,10672,{"$raw":"00000000"},"110405","R DA PORTELA","OPER",2,"A",74.80160,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",10665,10673,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",311.63901,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110405",1,null,"R 1º DE DEZEMBRO",10666,10674,{"$raw":"00000000"},"110405","R 1º DE DEZEMBRO","OPER",1,"A",62.20568,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CALDEIRA",null,null,"BC",null,"110404",1,null,"BC DA CALDEIRA",10667,10675,{"$raw":"00000000"},"110404","BC DA CALDEIRA","INOP",3,"T",58.55662,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DO CASTELO",null,null,"R",null,"110404",1,null,"R DO CASTELO",10668,10676,{"$raw":"00000000"},"110404","R DO CASTELO","OPER",2,"A",46.17699,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","DO CASTELO",null,null,"R",null,"110404",1,null,"R DO CASTELO",10669,10677,{"$raw":"00000000"},"110404","R DO CASTELO","OPER",2,"A",13.63179,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MAWLIO??",null,null,"BC",null,"110404",1,null,"BC MAWLIO??",10670,10678,{"$raw":"00000000"},"110404","BC MAWLIO??","INOP",3,"T",18.81290,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110404",1,null,"R DO CASTELO",10671,10679,{"$raw":"00000000"},"110404","R DO CASTELO","INOP",3,"T",25.81607,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASTELO",null,null,"R",null,"110404",1,null,"R DO CASTELO",10672,10680,{"$raw":"00000000"},"110404","R DO CASTELO","INOP",3,"T",57.14707,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DR MANUEL PACHECO BOTELHO JR",null,null,"R",null,"110404",1,null,"R DR MANUEL PACHECO BOTELHO JR",10673,10681,{"$raw":"00000000"},"110404","R DR MANUEL PACHECO BOTELHO JR","OPER",1,"A",302.05154,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DR MANUEL PACHECO BOTELHO JR",null,null,"R",null,"110404",1,null,"R DR MANUEL PACHECO BOTELHO JR",10674,10682,{"$raw":"00000000"},"110404","R DR MANUEL PACHECO BOTELHO JR","OPER",1,"A",55.87948,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DR MANUEL PACHECO BOTELHO JR",null,null,"R",null,"110404",1,null,"R DR MANUEL PACHECO BOTELHO JR",10675,10683,{"$raw":"00000000"},"110404","R DR MANUEL PACHECO BOTELHO JR","OPER",1,"A",75.41073,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","DR MANUEL PACHECO BOTELHO JR",null,null,"R",null,"110404",1,null,"R DR MANUEL PACHECO BOTELHO JR",10676,10684,{"$raw":"00000000"},"110404","R DR MANUEL PACHECO BOTELHO JR","OPER",1,"A",25.23700,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO AUGUSTO AZINHEIRA REGO",null,null,"R",null,"110404",1,null,"R ANTÓNIO AUGUSTO AZINHEIRA REGO",10677,10685,{"$raw":"00000000"},"110404","R ANTÓNIO AUGUSTO AZINHEIRA REGO","INOP",3,"T",122.46400,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,null,null,null,null,null,"110404",1,null,null,10678,10686,{"$raw":"00000000"},"110404","MJ.3.6052","INOP",3,"T",21.04723,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,null,"R ANTÓNIO AUGUSTO AZINHEIRA REGO ?",null,null,null,"110404",1,null,null,10679,10687,{"$raw":"00000000"},"110404","MJ.1.224","OPER",1,"A",53.56057,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","RUA",null,"DAS MAIAS",null,null,"R",null,null,{"$raw":"*****"},null,"RUA DAS MAIAS",10680,10688,{"$raw":"00000000"},null,"RUA DAS MAIAS",null,3,"T",344.80491,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","SÃO JOSÉ",null,null,"R",null,"110409",1,null,"R SÃO JOSÉ",10681,10689,{"$raw":"00000000"},"110409","R SÃO JOSÉ","OPER",1,"T",149.67550,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110408",2,"110402","EN 115",10682,10690,{"$raw":"00000000"},"110408","EN 115","OPER",1,"A",53.34776,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALE","Oficio 38 - 15/04/2008 ; Proc nº 02/2007/2","19 FEVEREIRO 2008 ; 27 MAIO 2008","R",null,"110405",1,null,"R DO VALE",10683,10691,{"$raw":"00000000"},"110405","R DO VALE","INOP",3,"T",130.95881,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,"ALTO DO MOINHO",null,null,null,"R",null,"110405",1,null,"R ALTO DO MOINHO",10684,10692,{"$raw":"00000000"},"110405","R ALTO DO MOINHO","INOP",3,"A",181.02343,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,"ALTO DO MOINHO",null,null,null,"R",null,"110405",1,null,"R ALTO DO MOINHO",10685,10693,{"$raw":"00000000"},"110405","R ALTO DO MOINHO","INOP",3,"T",42.67238,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","CAPITÃO BRAVO",null,null,"LG",null,"110406",1,null,"LG CAPITÃO BRAVO",10686,10694,{"$raw":"00000000"},"110406","LG CAPITÃO BRAVO","OPER",2,null,3.47379,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1024","CAPITÃO BRAVO",null,null,"LG",null,"110406",1,null,"LG CAPITÃO BRAVO",10687,10695,{"$raw":"00000000"},"110406","LG CAPITÃO BRAVO","OPER",2,null,12.97971,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO",null,"4 Março 2008","R",null,"110403",1,null,"R DO MOINHO",10688,10696,{"$raw":"00000000"},"110403","R DO MOINHO","OPER",1,"A",183.65640,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,"Centro Popular","R","Retiraram a placa toponimica",null,null,null,"110405",1,null,null,10689,10697,{"$raw":"00000000"},"110405","MJ.3.6053","INOP",3,"T",108.10966,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS PLAINOS","Acta 18 Março 2008 - Rua do Vale","27 Maio 2008","R",null,"010405",1,null,"R DOS PLAINOS",10690,10698,{"$raw":"00000000"},null,"R DOS PLAINOS",null,{"$raw":"*****"},null,104.29751,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",10691,10699,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",154.82484,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",10692,10700,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",158.12305,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OLIVAL",null,"18 Março 2008","R",null,"010405",1,null,"R DO OLIVAL",10693,10701,{"$raw":"00000000"},null,"R DO OLIVAL",null,1,null,111.34350,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS PALMEIROS",null,"15/04/2008","R",null,"110406",1,null,"R DOS PALMEIROS",10694,10702,{"$raw":"00000000"},"110406","R DOS PALMEIROS","INOP",3,"T",154.96498,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS SESMARIAS","Alteração da acta de 16 Out 2007 ; Proc 02/2007/3","27 Maio 2008","R",null,"110405",1,null,"R DAS SESMARIAS",10695,10703,{"$raw":"00000000"},"110405","R DAS SESMARIAS","INOP",3,"T",133.03716,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",10696,10704,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",286.84415,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",10697,10705,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",78.54791,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO ÁLVARO DA VEIGA TROÇOLO",null,"17 Dez 2002","R",null,"110402",1,null,"R DR FRANCISCO ÁLVARO DA VEIGA TROÇOLO",10698,10706,{"$raw":"00000000"},"110402","R DR FRANCISCO ÁLVARO DA VEIGA TROÇOLO","INOP",3,"T",83.36479,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DR FRANCISCO ÁLVARO DA VEIGA TROÇOLO",null,"17 Dez 2002","R",null,"110402",1,null,"R DR FRANCISCO ÁLVARO DA VEIGA TROÇOLO",10699,10707,{"$raw":"00000000"},"110402","R DR FRANCISCO ÁLVARO DA VEIGA TROÇOLO","INOP",3,"T",135.69038,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA MATA REDONDA",null,"15/04/2008","ESTR",null,"110401",1,null,"ESTR DA MATA REDONDA",10700,10708,{"$raw":"00000000"},"110401","ESTR DA MATA REDONDA","INOP",3,"A",397.12269,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MELOS",null,"15/04/2008","TV",null,"110401",1,null,"TV DOS MELOS",10701,10709,{"$raw":"00000000"},"110401","TV DOS MELOS","OPER",1,"A",112.39197,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","DAS ESCOLAS",null,null,"R",null,"110401",1,null,"R DAS ESCOLAS",10702,10710,{"$raw":"00000000"},"110401","R DAS ESCOLAS","OPER",1,"A",60.39949,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1026","DAS ESCOLAS",null,null,"R",null,"110401",1,null,"R DAS ESCOLAS",10703,10711,{"$raw":"00000000"},"110401","R DAS ESCOLAS","OPER",1,null,137.68602,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CSL DA PORTELA",null,null,"R",null,"110406",1,null,"R DO CSL DA PORTELA",10704,10712,{"$raw":"00000000"},"110406","R DO CSL DA PORTELA","INOP",3,"T",117.39994,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CSL DA PORTELA",null,null,"R",null,"110406",1,null,"R DO CSL DA PORTELA",10705,10713,{"$raw":"00000000"},"110406","R DO CSL DA PORTELA","INOP",3,"T",169.28760,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,10706,10714,{"$raw":"00000000"},null,"MJ.1.225",null,1,null,159.35530,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CASIMIRA","processo nº 01/2007/404",null,"BC",null,"110401",1,null,"BC DA CASIMIRA",10707,10715,{"$raw":"00000000"},"110401","BC DA CASIMIRA","INOP",3,"T",14.43699,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",10708,10716,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",30.87763,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,10709,10717,{"$raw":"00000000"},null,"MJ.3.6054",null,3,"T",346.04294,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",10710,10718,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",678.83194,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",10711,10719,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",297.70076,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"BOA VENTURA DUARTE",null,null,"R",null,"110402",1,null,"R BOA VENTURA DUARTE",10712,10720,{"$raw":"00000000"},"110402","R BOA VENTURA DUARTE","INOP",3,"T",91.79446,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"INFANTE D HENRIQUE",null,null,"JRD",null,"110402",1,null,"JRD INFANTE D HENRIQUE",10713,10721,{"$raw":"00000000"},"110402","JRD INFANTE D HENRIQUE","INOP",3,"T",52.52298,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"TV",null,"110405",1,null,"TV 1º DE DEZEMBRO",10714,10722,{"$raw":"00000000"},"110405","TV 1º DE DEZEMBRO","OPER",1,"A",60.98001,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","LG","das Festas",null,null,null,null,null,"110405",1,null,null,10715,10723,{"$raw":"00000000"},"110405","MJ.3.6055","INOP",3,"T",41.02832,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO PEREIRA DA SILVA",null,null,"R",null,"110405",1,null,"R ANTÓNIO PEREIRA DA SILVA",10716,10724,{"$raw":"00000000"},"110405","R ANTÓNIO PEREIRA DA SILVA","INOP",3,"T",392.84127,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO PEREIRA DA SILVA",null,null,"R",null,"110405",1,null,"R ANTÓNIO PEREIRA DA SILVA",10717,10725,{"$raw":"00000000"},"110405","R ANTÓNIO PEREIRA DA SILVA","INOP",3,"T",52.56717,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ANDRÉS",null,null,"R",null,"110410",1,null,"R DOS ANDRÉS",10718,10726,{"$raw":"00000000"},"110410","R DOS ANDRÉS","INOP",3,"T",71.26048,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,null,"R",null,"110410",1,null,"R DA BOAVISTA",10719,10727,{"$raw":"00000000"},"110410","R DA BOAVISTA","INOP",3,"T",47.55617,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,null,"R",null,"110410",1,null,"R DA BOAVISTA",10720,10728,{"$raw":"00000000"},"110410","R DA BOAVISTA","INOP",3,"T",29.20949,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,null,"R",null,"110410",1,null,"R DA BOAVISTA",10721,10729,{"$raw":"00000000"},"110410","R DA BOAVISTA","INOP",3,"T",25.25643,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA BOAVISTA",null,null,"R",null,"110410",1,null,"R DA BOAVISTA",10722,10730,{"$raw":"00000000"},"110410","R DA BOAVISTA","INOP",3,"T",22.83097,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DA ARROTEIAS",null,"16 Set 2008","R",null,"110408",1,null,"R DAS ARROTEIAS",10723,10731,{"$raw":"00000000"},"110408","R DAS ARROTEIAS","INOP",3,"T",171.24266,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ARROTEIAS",null,"16 Set 2008","R",null,"110408",1,null,"R DAS ARROTEIAS",10724,10732,{"$raw":"00000000"},"110408","R DAS ARROTEIAS","INOP",3,"A",354.73205,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D. EMILÍA FRANCA","Acta 12/05/2009; Acta 07/07/2009",null,"BC",null,null,{"$raw":"*****"},null,"BC D. EMILÍA FRANCA",10725,10733,{"$raw":"00000000"},null,"BC D. EMILÍA FRANCA",null,{"$raw":"*****"},null,27.04361,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110409",1,null,"R 1º DE DEZEMBRO",10726,10734,{"$raw":"00000000"},"110409","R 1º DE DEZEMBRO","INOP",3,"T",74.44053,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"1º DE DEZEMBRO",null,null,"R",null,"110409",1,null,"R 1º DE DEZEMBRO",10727,10735,{"$raw":"00000000"},"110409","R 1º DE DEZEMBRO","INOP",3,"T",31.58016,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO BAIRRO NOVO","Proposta JF, SGD nº5560",null,"R",null,null,1,"110403","R DO BAIRRO NOVO",10728,10736,{"$raw":"00000000"},null,"R DO BAIRRO NOVO",null,{"$raw":"*****"},null,68.09928,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALTO DA BELA VISTA",null,null,"TV",null,"110403",1,null,"TV DO ALTO DA BELA VISTA",10729,10737,{"$raw":"00000000"},"110403","TV DO ALTO DA BELA VISTA","INOP",3,"T",76.59421,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ALTO DA BELA VISTA",null,null,"TV",null,"110403",1,null,"TV DO ALTO DA BELA VISTA",10730,10738,{"$raw":"00000000"},"110403","TV DO ALTO DA BELA VISTA","INOP",3,"T",28.61421,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO BAIRRO NOVO","Proposta JF, SGD nº5560",null,"PCT",null,null,1,"110403","PCT DO BAIRRO NOVO",10731,10739,{"$raw":"00000000"},null,"PCT DO BAIRRO NOVO",null,{"$raw":"*****"},null,11.57156,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS NOGUEIRAS","Processo nº 03/2007/187; LOCALIZAÇÃO SEM RIGOR","24 jul 2007","R",null,"110409",1,null,"R DAS NOGUEIRAS",10732,10740,{"$raw":"00000000"},"110409","R DAS NOGUEIRAS","OPER",1,"A",176.31834,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","569",null,null,"EM",null,"110409",1,null,"EM 569",10733,10741,{"$raw":"00000000"},"110409","EM 569","OPER",1,"A",315.45270,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","569","569",null,null,"EM",null,"110409",1,null,"EM 569",10734,10742,{"$raw":"00000000"},"110409","EM 569","OPER",1,"A",53.48250,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","13 DE JANEIRO",null,null,"R",null,"110402",1,null,"R 13 DE JANEIRO",10735,10743,{"$raw":"00000000"},"110402","R 13 DE JANEIRO","OPER",1,"A",20.49289,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","13 DE JANEIRO",null,null,"R",null,"110402",1,null,"R 13 DE JANEIRO",10736,10744,{"$raw":"00000000"},"110402","R 13 DE JANEIRO","OPER",1,"A",112.61919,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",10737,10745,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",152.45799,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115","115",null,null,"EN",null,"110402",1,null,"EN 115",10738,10746,{"$raw":"00000000"},"110402","EN 115","OPER",1,"A",21.68276,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CANTAR E PINTAR DOS REIS","Inaugurada a 21 Maio 2009",null,"ROT",null,"110402",1,null,"ROT PINTAR E CANTAR DOS REIS",10739,10747,{"$raw":"00000000"},"110402","ROT PINTAR E CANTAR DOS REIS","INOP",3,"T",68.47547,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CANTAR E PINTAR DOS REIS","Inaugurada a 21 Maio 2009",null,"ROT",null,"110402",1,null,"ROT PINTAR E CANTAR DOS REIS",10740,10748,{"$raw":"00000000"},"110402","ROT PINTAR E CANTAR DOS REIS","OPER",1,"A",32.48119,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CANTAR E PINTAR DOS REIS","Inaugurada a 21 Maio 2009",null,"ROT",null,"110402",1,null,"ROT PINTAR E CANTAR DOS REIS",10741,10749,{"$raw":"00000000"},"110402","ROT PINTAR E CANTAR DOS REIS","OPER",1,"A",30.07417,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO NORTE",null,null,"R",null,"110402",1,null,"R DO NORTE",10742,10750,{"$raw":"00000000"},"110402","R DO NORTE","INOP",3,"T",240.22048,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO NORTE",null,null,"R",null,"110402",1,null,"R DO NORTE",10743,10751,{"$raw":"00000000"},"110402","R DO NORTE","INOP",3,"T",312.67921,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO NORTE",null,null,"R",null,"110402",1,null,"R DO NORTE",10744,10752,{"$raw":"00000000"},"110402","R DO NORTE","INOP",3,"T",97.69896,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO GRILO","SGD nº 9499 de 2009","29 Setembro 2009",null,null,"110405",1,null,"R DO GRILO",10745,10753,{"$raw":"00000000"},"110405","R DO GRILO","OPER",2,"A",36.80377,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS","Processo nº 03/07/131, 03/07/267","23 Out 2000, 10 jul 2007","R",null,"110405",1,null,"R DOS MOINHOS",10746,10754,{"$raw":"00000000"},"110405","R DOS MOINHOS","INOP",3,"T",96.82839,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS","Processo nº 03/07/131, 03/07/267","23 Out 2000, 10 jul 2007","R",null,"110405",1,null,"R DOS MOINHOS",10747,10755,{"$raw":"00000000"},"110405","R DOS MOINHOS","OPER",2,"A",293.83365,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MARRECOS",null,null,"BC",null,"110401",1,null,"BC DOS MARRECOS",10748,10756,{"$raw":"00000000"},"110401","BC DOS MARRECOS","OPER",2,"A",20.19421,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SENHORA DE TODO O MUNDO",null,null,"R",null,"110401",1,null,"R SENHORA DE TODO O MUNDO",10749,10757,{"$raw":"00000000"},"110401","R SENHORA DE TODO O MUNDO","OPER",2,"A",53.77505,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SENHORA DE TODO O MUNDO",null,null,"R",null,"110401",1,null,"R SENHORA DE TODO O MUNDO",10750,10758,{"$raw":"00000000"},"110401","R SENHORA DE TODO O MUNDO","OPER",2,"A",26.37458,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ESCOLAS","SGD nº 9579 de 2009","29 Setembro 2009","R",null,"110406",1,null,"R DAS ESCOLAS",10751,10759,{"$raw":"00000000"},"110406","R DAS ESCOLAS","INOP",3,"T",66.41156,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"D. LUCÍLIA","SGD nº 9579 de 2009","29 Setembro 2009","TV",null,"110406",1,null,"TV D LUCÍLIA",10752,10760,{"$raw":"00000000"},"110406","TV D LUCÍLIA","INOP",3,"T",38.11656,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ESCOLAS","SGD nº 9579 de 2009","29 Setembro 2009","R",null,"110406",1,null,"R DAS ESCOLAS",10753,10761,{"$raw":"00000000"},"110406","R DAS ESCOLAS","INOP",3,"T",51.80503,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS CAPITÃES",null,null,"R",null,"110405",1,null,"R DOS CAPITÃES",10754,10762,{"$raw":"00000000"},"110405","R DOS CAPITÃES","OPER",2,"A",194.38792,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","PRINCIPAL",null,null,"R",null,"110405",1,null,"R PRINCIPAL",10755,10763,{"$raw":"00000000"},"110405","R PRINCIPAL","OPER",2,"A",89.98675,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DA GRANDE GUERRA","Limite confirmado pela J.F.",null,"R",null,"110405",1,null,"R DOS COMBATENTES DA GRANDE GUERRA",10756,10764,{"$raw":"00000000"},"110405","R DOS COMBATENTES DA GRANDE GUERRA","OPER",2,"A",89.40094,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS CAPITÃES","Limite confirmado pela J.F. Lamas",null,"R",null,"110405",1,null,"R DOS CAPITÃES",10757,10765,{"$raw":"00000000"},"110405","R DOS CAPITÃES","OPER",2,"A",53.19389,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS",null,null,"R",null,"110408",1,null,"R NORTON MATOS",10758,10766,{"$raw":"00000000"},"110408","R NORTON MATOS","INOP",3,"T",13.69285,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"NORTON DE MATOS","Parecer da JF, processo 03/2009/346",null,"R",null,"110408",1,null,"R NORTON MATOS",10759,10767,{"$raw":"00000000"},"110408","R NORTON MATOS","INOP",3,"T",17.19062,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110401",1,null,"R DO OUTEIRO",10760,10768,{"$raw":"00000000"},"110401","R DO OUTEIRO","OPER",2,"A",75.04641,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BOLOTA",null,null,"BC",null,"110401",1,null,"R DO OUTEIRO",10761,10769,{"$raw":"00000000"},"110401","R DO OUTEIRO","OPER",2,"A",46.12147,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO",null,null,"R",null,"110401",1,null,"R DO OUTEIRO",10762,10770,{"$raw":"00000000"},"110401","R DO OUTEIRO","OPER",2,"A",74.33914,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALVERDE",null,null,"R",null,"110410",1,null,"R DO VALVERDE",10763,10771,{"$raw":"00000000"},"110410","R DO VALVERDE","INOP",3,"T",32.14030,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DOS POMBAIS","SGD 4946 de 3/5/2010","8 Junho 2010","TV",null,"110410",1,null,"TV DOS POMBAIS",10764,10772,{"$raw":"00000000"},"110410","TV DOS POMBAIS","INOP",3,"T",71.96334,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO VALVERDE",null,null,"R",null,"110410",1,null,"R DO VALVERDE",10765,10773,{"$raw":"00000000"},"110410","R DO VALVERDE","INOP",3,"T",13.80196,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110410",1,null,"R DA ESPERANÇA",10766,10774,{"$raw":"00000000"},"110410","R DA ESPERANÇA","INOP",3,"T",26.47357,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ESPERANÇA",null,null,"R",null,"110410",1,null,"R DA ESPERANÇA",10767,10775,{"$raw":"00000000"},"110410","R DA ESPERANÇA","INOP",3,"T",57.04649,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MARIA ROSA","SGD 3629, SGD 5749","8 Junho 2010","R",null,"110408",1,null,"RUA MARIA ROSA",10768,10776,{"$raw":"00000000"},"110408","RUA MARIA ROSA","INOP",3,"T",267.61407,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"MARIA ROSA",null,null,"R",null,"110408",1,null,null,10769,10777,{"$raw":"00000000"},"110408","MJ.3.6056","INOP",3,"T",62.13555,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","VENDA DO MARCO","Processo 01/2006/514",null,"R",null,"110401",1,null,"R VENDA DO MARCO",10770,10778,{"$raw":"00000000"},"110401","R VENDA DO MARCO","OPER",1,"A",85.70039,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","VENDA DO MARCO","Processo 01/2006/514",null,"R",null,"110401",1,null,"R VENDA DO MARCO",10771,10779,{"$raw":"00000000"},"110401","R VENDA DO MARCO","OPER",1,null,16.95827,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","VENDA DO MARCO","Processo 01/2006/514",null,"R",null,"110401",1,null,"R VENDA DO MARCO",10772,10780,{"$raw":"00000000"},"110401","R VENDA DO MARCO","OPER",1,null,148.60972,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","VENDA DO MARCO","Processo 01/2006/514",null,"R",null,"110401",1,null,"R VENDA DO MARCO",10773,10781,{"$raw":"00000000"},"110401","R VENDA DO MARCO","OPER",1,null,18.54800,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","VENDA DO MARCO","Processo 01/2006/514",null,"R",null,"110401",1,null,"R VENDA DO MARCO",10774,10782,{"$raw":"00000000"},"110401","R VENDA DO MARCO","OPER",1,null,115.54272,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1027","VENDA DO MARCO","Processo 01/2006/514",null,"R",null,"110401",1,null,"R VENDA DO MARCO",10775,10783,{"$raw":"00000000"},"110401","R VENDA DO MARCO","OPER",1,null,43.48242,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO SOL NASCENTE",null,null,"R",null,"110410",1,null,"R DO SOL NASCENTE",10776,10784,{"$raw":"00000000"},"110410","R DO SOL NASCENTE","OPER",2,"A",582.52977,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CABINE","Processo nº 01/2010/237",null,"LG",null,"110405",1,null,"LG DA CABINE",10777,10785,{"$raw":"00000000"},"110405","LG DA CABINE","OPER",1,"A",13.87328,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DO OUTEIRO",null,null,"R",null,"110405",1,null,"R DO OUTEIRO",10778,10786,{"$raw":"00000000"},"110405","R DO OUTEIRO","OPER",1,"A",77.95067,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DO OUTEIRO",null,null,"R",null,"110405",1,null,"R DO OUTEIRO",10779,10787,{"$raw":"00000000"},"110405","R DO OUTEIRO","OPER",1,"A",20.82756,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ENCOSTA DO MOINHO","processos nº 03/2010/156 e 03/2010/160","28 Setembro 2010","RUA",null,"110402",1,null,"RUA ENCOSTA DO MOINHO",10780,10788,{"$raw":"00000000"},"110402","RUA ENCOSTA DO MOINHO","INOP",3,"T",240.34059,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO DA AMÉLIA","processo nº 01/2010/246","4 jan 2011","R",null,"110410",1,null,"R DO MOINHO DA AMÉLIA",10781,10789,{"$raw":"00000000"},"110410","R DO MOINHO DA AMÉLIA","INOP",3,"T",332.82003,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS MOINHOS",null,null,"R",null,"110407",1,null,"R DOS MOINHOS",10782,10790,{"$raw":"00000000"},"110407","R DOS MOINHOS","INOP",3,"T",123.74570,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",10783,10791,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",219.20824,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1022","1022","SGD nº 11570, 26/11/2010","1 Fev 2011","CM",null,"110407",1,null,"CM 1022",10784,10792,{"$raw":"00000000"},"110407","CM 1022","OPER",1,"A",36.19166,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DA SOBRENA",null,null,"R",null,"110407",1,null,"R DA SOBRENA",10785,10793,{"$raw":"00000000"},"110407","R DA SOBRENA","OPER",1,"A",253.85647,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS AMOREIRAS",null,"Processo nº 01/2010/289","R",null,"110407",1,null,"R DA SOBRENA",10786,10794,{"$raw":"00000000"},"110407","R DA SOBRENA","INOP",3,"T",388.47659,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","612","DA SOBRENA",null,null,"R",null,"110407",1,null,"R DA SOBRENA",10787,10795,{"$raw":"00000000"},"110407","R DA SOBRENA","OPER",1,"A",134.80332,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO MOINHO DA AMÉLIA","processo nº 01/2010/246","4 jan 2011","R",null,"110410",1,null,"R DO MOINHO DA AMÉLIA",10788,10796,{"$raw":"00000000"},"110410","R DO MOINHO DA AMÉLIA","INOP",3,"T",83.62374,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ESCARÇÃO","SGD 9828/2010, SGD 12206/2010, proc nº 03/2011/10","29 Março 2011","ESTR",null,"110404",1,null,"Estrada do Escarção",10789,10797,{"$raw":"00000000"},"110404","Estrada do Escarção","INOP",3,"T",689.50941,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BARÇAL","SGD 9828/2010, SGD 12206/2010, proc nº 03/2011/10","29 Março 2011","ESTR",null,"110404",1,null,"Estrada do Barçal",10790,10798,{"$raw":"00000000"},"110404","Estrada do Barçal","INOP",3,"A",887.50953,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","ANTÓNIO MARTINS REGO",null,null,"R",null,"110404",1,null,"R ANTÓNIO MARTINS REGO",10791,10799,{"$raw":"00000000"},"110404","R ANTÓNIO MARTINS REGO","OPER",1,"A",42.15424,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LEZÍRIA","Processo nº 03/2011/10; 04/2012/20","29 Março 2011 (Estr da Várzea)","ESTR",null,"110404",1,null,"ESTR DA LEZÍRIA",10793,10801,{"$raw":"00000000"},"110404","ESTR DA VÁRZEA","INOP",3,"T",99.44011,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,"ROT",null,null,{"$raw":"*****"},null,null,10794,10802,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,49.22132,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,"ROT",null,null,{"$raw":"*****"},null,null,10795,10803,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,56.20133,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,"ROT",null,null,{"$raw":"*****"},null,null,10796,10804,{"$raw":"00000000"},null,"MJ.1.226",null,1,null,3.62296,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,"ROT",null,null,{"$raw":"*****"},null,null,10797,10805,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,24.22707,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,"ROT",null,null,{"$raw":"*****"},null,null,10798,10806,{"$raw":"00000000"},null,"MJ.1.227",null,1,null,13.57404,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES","SGD nº 645, 27 jan 2011","29 Março 2011","BC",null,"110410",1,null,"BECO DAS FLORES",10799,10807,{"$raw":"00000000"},"110410","BECO DAS FLORES","INOP",3,"T",27.92133,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAIS DO ENTRUDO","SGD nº 1728, 28 fev 2011","29 Março 2011","ESTR",null,"110407",1,null,"ESTR CASAIS DO ENTRUDO",10800,10808,{"$raw":"00000000"},"110407","ESTR CASAIS DO ENTRUDO","INOP",3,"T",227.66974,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,10801,10809,{"$raw":"00000000"},"110407","MJ.3.6057","INOP",3,"T",197.28467,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAIS DO ENTRUDO","SGD nº 1728, 28 fev 2011","29 Março 2011","ESTR",null,"110407",1,null,"ESTR CASAIS DO ENTRUDO",10802,10810,{"$raw":"00000000"},"110407","ESTR CASAIS DO ENTRUDO","INOP",3,"T",644.57846,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO RIO",null,null,"TV",null,"110405",1,null,"TV DO RIO",10803,10811,{"$raw":"00000000"},"110405","TV DO RIO","INOP",3,"T",9.71201,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO RIO",null,null,"TV",null,"110405",1,null,"TV DO RIO",10804,10812,{"$raw":"00000000"},"110405","TV DO RIO","INOP",3,"T",9.59598,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA OFICINA",null,null,"TV",null,"110405",1,null,"TV DA OFICINA",10805,10813,{"$raw":"00000000"},"110405","TV DA OFICINA","INOP",3,"T",28.08215,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA OFICINA",null,null,"TV",null,"110405",1,null,"TV DA OFICINA",10806,10814,{"$raw":"00000000"},"110405","TV DA OFICINA","INOP",3,"T",3.63216,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS FLORES",null,null,"R",null,"110405",1,null,"R DAS FLORES",10807,10815,{"$raw":"00000000"},"110405","R DAS FLORES","INOP",3,"T",7.94597,3.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE DA CORTIÇA","SGD 2313, 21 Mar 2011",null,"ESTR",null,"110403",1,null,"ESTR DA FONTE DA CORTIÇA",10808,10816,{"$raw":"00000000"},"110403","ESTR DA FONTE DA CORTIÇA","INOP",3,"T",20.34059,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA FONTE DA CORTIÇA","SGD 2313, 21 Mar 2011",null,"ESTR",null,"110403",1,null,"ESTR DA FONTE DA CORTIÇA",10809,10817,{"$raw":"00000000"},"110403","ESTR DA FONTE DA CORTIÇA","INOP",3,"T",191.82297,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO JUNCAL","Processo nº 01/2011/20","12 Abril 2011","R",null,"110405",1,null,"R DO JUNCAL",10810,10818,{"$raw":"00000000"},"110405","R DO JUNCAL","INOP",3,"T",443.74823,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",10811,10819,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",41.24180,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA HEROINA",null,null,"R",null,"110401",1,null,"R DA HEROINA",10812,10820,{"$raw":"00000000"},"110401","R DA HEROINA","INOP",3,"T",24.10206,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,10813,10821,{"$raw":"00000000"},null,"MJ.3.6058",null,3,"T",458.25732,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,10814,10822,{"$raw":"00000000"},null,"MJ.3.6059",null,3,"T",461.70485,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,10815,10823,{"$raw":"00000000"},null,"MJ.3.6060",null,3,"T",461.70485,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MADRE TERESA DE CALCUTÁ","Processo nº 01/2007/377","2 Agosto 2011","R",null,"110405",1,null,"R MADRE TERESA DE CALCUTÁ",10816,10824,{"$raw":"00000000"},"110405","R MADRE TERESA DE CALCUTÁ","INOP",3,"T",51.39902,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1037","DA LIBERDADE",null,null,"R",null,"110405",1,null,"R DA LIBERDADE",10817,10825,{"$raw":"00000000"},"110405","R DA LIBERDADE","OPER",1,"A",30.77804,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MADRE TERESA DE CALCUTÁ","Proceso nº 01/2007/377","2 Agosto 2011","R",null,"110405",1,null,"R MADRE TERESA DE CALCUTÁ",10818,10826,{"$raw":"00000000"},"110405","R MADRE TERESA DE CALCUTÁ","INOP",3,"T",201.50356,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","DA ASCENSÃO","processo 03/2011/110, SGD 6372, 20 jul 2011","22 nov 2011","R",null,"110405",1,null,"R DA ASCENSÃO",10819,10827,{"$raw":"00000000"},"110405","R DA ASCENSÃO","OPER",1,"A",159.64747,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EN","115-1","115-1",null,null,"EN",null,"110405",1,null,"EN 115-1",10820,10828,{"$raw":"00000000"},"110405","EN 115-1","OPER",1,"A",896.68443,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,10821,10829,{"$raw":"00000000"},"110403","MJ.3.6061","INOP",3,"T",307.14718,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",1,null,null,10822,10830,{"$raw":"00000000"},"110403","MJ.3.6062","INOP",3,"T",90.08652,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO FURADOURO","processo 02/2002/16 - requerimento 12/2002",null,"RUA",null,null,{"$raw":"*****"},null,"RUA DO FURADOURO",10823,10831,{"$raw":"00000000"},null,"RUA DO FURADOURO",null,1,null,84.64962,7.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO BOUCO","processo 02/2002/16 - requerimento 12/2002",null,"RUA",null,null,{"$raw":"*****"},null,"RUA DO BOUCO",10824,10832,{"$raw":"00000000"},null,"RUA DO BOUCO",null,{"$raw":"*****"},null,125.52216,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,"DO BOUCO","processo 02/2002/16 - requerimento 12/2002",null,"RUA",null,null,{"$raw":"*****"},null,"RUA DO BOUCO",10825,10833,{"$raw":"00000000"},null,"RUA DO BOUCO",null,{"$raw":"*****"},null,34.81738,{"$raw":"************************"},"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","DO MONTEJUNTO",null,null,"R",null,"110403",1,null,"ESTR FLORESTAL",10826,10834,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",88.07165,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","DO MONTEJUNTO",null,null,"R",null,"110403",1,null,"ESTR FLORESTAL",10827,10835,{"$raw":"00000000"},"110403","ESTR FLORESTAL","OPER",1,"A",59.86659,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA ROSA","Aprovado em Reunião de Câmara. existe 1 processo X",null,"TV",null,"110405",1,null,"TV DA ROSA",10828,10836,{"$raw":"00000000"},"110405","TV DA ROSA","INOP",3,"T",22.13632,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS GAIVOTAS",null,null,"TV",null,"110405",1,null,"TV DAS GAIVOTAS",10829,10837,{"$raw":"00000000"},"110405","TV DAS GAIVOTAS","INOP",3,"T",21.93545,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS GAIVOTAS",null,null,"TV",null,"110405",1,null,"TV DAS GAIVOTAS",10830,10838,{"$raw":"00000000"},"110405","TV DAS GAIVOTAS","INOP",3,"T",20.83842,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"MADRE TERESA DE CALCUTÁ","Processo nº 01/2007/377","2 Agosto 2011","R",null,"110405",1,null,"R MADRE TERESA DE CALCUTÁ",10831,10839,{"$raw":"00000000"},"110405","R MADRE TERESA DE CALCUTÁ","INOP",3,"T",283.83399,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,"Processo nº 04/2011/20",null,null,null,null,{"$raw":"*****"},null,null,10832,10840,{"$raw":"00000000"},null,"MJ.3.6063",null,3,"T",90.30418,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","DO MONTEJUNTO",null,null,"R",null,"110403",1,null,"R DO MONTEJUNTO",10833,10841,{"$raw":"00000000"},"110403","R DO MONTEJUNTO","OPER",1,"A",57.73151,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","ESTR","FLORESTAL","DO MONTEJUNTO",null,null,"R",null,"110403",1,null,"R DO MONTEJUNTO",10834,10842,{"$raw":"00000000"},"110403","R DO MONTEJUNTO","OPER",1,"A",119.38525,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","MAPRIL FOGAÇA",null,"18/06/2002","R",null,"110401",1,null,"R MAPRIL FOGAÇA",10835,10843,{"$raw":"00000000"},"110401","R MAPRIL FOGAÇA","OPER",1,"A",33.99410,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,10836,10844,{"$raw":"00000000"},null,"MJ.3.6064",null,3,"T",208.99658,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","DA MURTEIRA",null,null,"R",null,"110402",1,null,"R DA MURTEIRA",10837,10845,{"$raw":"00000000"},"110402","R DA MURTEIRA","OPER",1,"A",364.96427,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1029","DA MURTEIRA",null,null,"R",null,"110402",1,null,"R DA MURTEIRA",10838,10846,{"$raw":"00000000"},"110402","R DA MURTEIRA","OPER",1,"A",121.62943,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"ANTÓNIO HENRIQUES MANECA","Processo nº 01/2011/49","22 maio 2012","BC",null,"110402",1,null,"BC ANTÓNIO HENRIQUES MANECA",10839,10847,{"$raw":"00000000"},"110402","BC ANTÓNIO HENRIQUES MANECA","INOP",3,"A",40.07198,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL RIBEIRO","Processo nº 01/2011/307",null,"BECO",null,"110407",1,null,"BECO DO CASAL RIBEIRO",10840,10848,{"$raw":"00000000"},"110407","BECO DO CASAL RIBEIRO","OPER",1,"A",106.52099,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,10841,10849,{"$raw":"00000000"},"110406","MJ.3.6065","INOP",3,"T",20.59579,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0","R",null,null,null,null,null,null,"110406",1,null,null,10842,10850,{"$raw":"00000000"},"110406","MJ.3.6066","INOP",3,"T",95.44995,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110406",1,null,null,10843,10851,{"$raw":"00000000"},"110406","MJ.2.373","OPER",2,"A",57.69364,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,"SGD nº 2968, 13 abril 2012. Serventia pública.",null,null,null,"110404",1,null,null,10844,10852,{"$raw":"00000000"},"110404","MJ.1.228","OPER",1,"A",59.27160,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ANACLETO","Processo nº 01/2011/285","23 out 2012","BC",null,"110401",1,null,"BC DO ANACLETO",10845,10853,{"$raw":"00000000"},"110401","BC DO ANACLETO","OPER",2,"A",23.93113,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA PIEDADE",null,null,"TV",null,"110409",1,null,"TV DA PIEDADE",10846,10854,{"$raw":"00000000"},"110409","TV DA PIEDADE","INOP",3,"T",31.70995,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA VENDA D' ÁGUA","processo nº 01/2009/190 - reqº 477/2012","23 out 2012","TV",null,"110401",1,null,"TV DA VENDA D' ÁGUA",10847,10855,{"$raw":"00000000"},"110401","TV DA VENDA D' ÁGUA","INOP",3,"T",202.88900,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA VENDA D' ÁGUA","processo nº 01/2009/190 - reqº 477/2012","23 out 2012","RUA",null,"110401",1,null,"RUA DA VENDA D' ÁGUA",10848,10856,{"$raw":"00000000"},"110401","RUA DA VENDA D' ÁGUA","INOP",3,"T",288.33455,3.90000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10849,10857,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",65.43865,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","574","DOS COMBATENTES DO ULTRAMAR",null,null,"R",null,"110405",1,null,"R DOS COMBATENTES DO ULTRAMAR",10850,10858,{"$raw":"00000000"},"110405","R DOS COMBATENTES DO ULTRAMAR","OPER",2,"A",283.18329,5.50000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CIDRAL",null,null,"ESTR",null,"110404",1,null,"ESTR DO CIDRAL",10851,10859,{"$raw":"00000000"},"110404","ESTR DO CIDRAL","OPER",1,"A",258.22695,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ADRO",null,null,"R",null,"110404",1,null,"R DO ADRO",10852,10860,{"$raw":"00000000"},"110404","R DO ADRO","OPER",1,"A",129.64503,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO ADRO",null,null,"R",null,"110404",1,null,"R DO ADRO",10853,10861,{"$raw":"00000000"},"110404","R DO ADRO","OPER",1,"A",26.73585,6.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS VALCÃES","Processo nº 04/2012/6","23 out 2012","ESTRADA",null,"110404",1,null,"ESTR DOS VALCÃES",10854,10862,{"$raw":"00000000"},"110404","ESTR DOS VALCÃES","INOP",3,"A",661.97207,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"BEM SE VÊ","Processo nº 04/2012/06","23 out 2012","TV",null,"110404",1,null,"TV BEM SE VÊ",10855,10863,{"$raw":"00000000"},"110404","TV BEM SE VÊ","INOP",3,"T",91.86483,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"BEM SE VÊ",null,null,"R",null,"110404",1,null,"R BEM SE VÊ",10857,10865,{"$raw":"00000000"},"110404","R DO BEM SE VÊ","INOP",3,"T",156.27033,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS PARDAIS","Processo nº 04/2012/06","23 out 2012","BC",null,"110404",1,null,"BC DOS PARDAIS",10858,10866,{"$raw":"00000000"},"110404","BC DOS PARDAIS","INOP",3,"T",23.98161,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS PEDREIRAS","Processo nº 04/2012/23","15 janeiro 2013","ESTR",null,"110404",1,null,"ESTR DAS PEDREIRAS",10859,10867,{"$raw":"00000000"},"110404","R CASAL DO SEIXO","INOP",3,"T",499.42824,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ALMOINHAS","Processo nº 04/2012/06","23 out 2012","BC",null,"110404",1,null,"BC DAS ALMOINHAS",10860,10868,{"$raw":"00000000"},"110404","BC DAS ALMOINHAS","INOP",3,"T",23.15686,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ALMÓINHAS",null,null,"R",null,"110404",1,null,"R DAS ALMÓINHAS",10861,10869,{"$raw":"00000000"},"110404","R DAS ALMÓINHAS","INOP",3,"T",82.48782,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DAS ALMÓINHAS",null,null,"R",null,"110404",1,null,"R DAS ALMÓINHAS",10862,10870,{"$raw":"00000000"},"110404","R DAS ALMÓINHAS","INOP",3,"T",96.96576,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CHEIRA","Proc. nº 04/2012/06","23 out 2012","ESTR",null,"110404",1,null,"ESTR DA CHEIRA",10863,10871,{"$raw":"00000000"},"110404","ESTR DA CHEIRA","INOP",3,"T",539.02511,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA CHEIRA","Proc nº 04/2012/06","23 out 2012","ESTR",null,"110404",1,null,"ESTR DA CHEIRA",10864,10872,{"$raw":"00000000"},"110404","ESTR DA CHEIRA","INOP",3,"A",296.39556,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL DO SEIXO","Processo nº 04/2012/06","23 out 2012","BC",null,"110404",1,null,"BC CASAL DO SEIXO",10865,10873,{"$raw":"00000000"},"110404","BC CASAL DO SEIXO","INOP",3,"T",18.74553,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL DO SEIXO",null,null,"R",null,"110404",1,null,"R CASAL DO SEIXO",10866,10874,{"$raw":"00000000"},"110404","R CASAL DO SEIXO","INOP",3,"T",60.44819,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"CASAL DO SEIXO",null,null,"R",null,"110404",1,null,"R CASAL DO SEIXO",10867,10875,{"$raw":"00000000"},"110404","R CASAL DO SEIXO","INOP",3,"T",39.45841,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO OUTEIRO MOSQUEIRO","Processo nº 01/2012/98",null,"CAMINHO",null,"110408",1,null,"CAMINHO DO OUTEIRO MOSQUEIRO",10868,10876,{"$raw":"00000000"},"110408","CAMINHO DO OUTEIRO MOSQUEIRO","INOP",3,"T",249.98868,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110410",1,null,null,10869,10877,{"$raw":"00000000"},"110410","MJ.3.680","INOP",3,"T",201.19241,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SENHORA DE TODO O MUNDO",null,null,"R",null,"110401",1,null,"R SENHORA DE TODO O MUNDO",10870,10878,{"$raw":"00000000"},"110401","R SENHORA DE TODO O MUNDO","OPER",2,"A",20.28905,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"SENHORA DE TODO O MUNDO",null,null,"R",null,"110401",1,null,"R SENHORA DE TODO O MUNDO",10871,10879,{"$raw":"00000000"},"110401","R SENHORA DE TODO O MUNDO","INOP",3,"A",5.46539,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,10872,10880,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,10873,10881,{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,null,{"$raw":"*****"},null,null,10874,{"$raw":"*****"},{"$raw":"00000000"},null,"MJ..",null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1",null,null,"DO BEM SE VÊ","Processo nº 04/2012/24",null,"ESTR",null,"110404",2,"110404","ESTR DO BEM SE VÊ",10875,5024,{"$raw":"00000000"},"110404","R DO BEM SE VÊ","INOP",3,"T",163.30394,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","EM","568","JULIO BERNARDO DA SILVA",null,null,"R",null,"110406",1,null,"R JULIO BERNARDO DA SILVA",10876,9976,{"$raw":"00000000"},"110406","R JULIO BERNARDO DA SILVA","OPER",2,"A",11.96850,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"BEM SE VÊ",null,"Processo nº 04/2012/24","ESTR",null,"110404",1,null,"ESTR BEM SE VÊ",10877,10864,{"$raw":"00000000"},"110404","R DO BEM SE VÊ","INOP",3,"T",698.25214,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"BEM SE VÊ",null,null,"R",null,"110404",1,null,"R BEM SE VÊ",10878,10864,{"$raw":"00000000"},"110404","R DO BEM SE VÊ","INOP",3,"T",698.25214,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA VÁRZEA","Processo nº 04/2012/21",null,"ESTR",null,"110404",1,null,"ESTRADA DA VÁRZEA",10880,728,{"$raw":"00000000"},"110404","MJ.3.412","INOP",3,"T",2.48709,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA VÁRZEA","Processo nº 04/2012/21",null,"ESTR",null,"110404",1,null,"ESTR DA VÁRZEA",10882,5787,{"$raw":"00000000"},"110404","MJ.3.3843","INOP",3,"T",196.56785,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CHAFARIZ",null,null,"TV",null,"110404",1,null,"TV DO CHAFARIZ",10884,{"$raw":"*****"},{"$raw":"00000000"},null,null,null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1",null,null,"DO CHAFARIZ",null,null,"R",null,"110404",1,null,"R DO CHAFARIZ",10885,{"$raw":"*****"},{"$raw":"00000000"},null,null,null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1",null,null,"DO CHAFARIZ",null,null,"R",null,"110404",1,null,"R DO CHAFARIZ",10886,{"$raw":"*****"},{"$raw":"00000000"},null,null,null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1",null,null,"DA EIRA",null,null,"LG",null,"110407",1,null,"LG DA EIRA",10887,{"$raw":"*****"},{"$raw":"00000000"},null,null,null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,null,null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["1",null,null,"DO CASAL DA CRUZ",null,null,"R",null,"110407",1,null,"R DO CASAL DA CRUZ",10888,9877,{"$raw":"00000000"},"110407","R DO CASAL DA CRUZ","INOP",3,"T",150.12741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO CASAL DA CRUZ",null,null,"R",null,"110407",1,null,"R DO CASAL DA CRUZ",10889,9877,{"$raw":"00000000"},"110407","R DO CASAL DA CRUZ","INOP",3,"T",150.12741,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ROSÁRIOS","Confirmado, jan 2013",null,"TV",null,"110408",1,null,"TV DOS ROSÁRIOS",10890,8223,{"$raw":"00000000"},"110408","R DOS ROSÁRIOS","INOP",3,"T",165.73428,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ROSÁRIOS","Confirmado, jan 2013",null,"TV",null,"110408",1,null,"TV DOS ROSÁRIOS",10891,8223,{"$raw":"00000000"},"110408","R DOS ROSÁRIOS","INOP",3,"T",165.73428,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,null,1,null,null,10892,{"$raw":"*****"},{"$raw":"00000000"},null,null,null,{"$raw":"*****"},null,{"$raw":"************************"},{"$raw":"************************"},null,null,null,"MAN",null,{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},{"$raw":"*****"},null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,10893,2994,{"$raw":"00000000"},"110401","MJ.3.1847","INOP",3,"T",533.36495,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110401",1,null,null,10894,2994,{"$raw":"00000000"},"110401","MJ.3.1847","INOP",3,"T",533.36495,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,10895,4224,{"$raw":"00000000"},"110403","MJ.3.2917","INOP",3,"T",347.54383,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["0",null,null,null,null,null,null,null,"110403",2,null,null,10896,4224,{"$raw":"00000000"},"110403","MJ.3.2917","INOP",3,"T",347.54383,3.00000,"ESI","ESI","ESI","MAN","ESI",0,0,0,5,0,0,0,0,2,0,0,1,1,1,1,null,null]
["1",null,null,"DA LEZÍRIA","Processo nº 03/2011/10; 04/2012/20","29 Março 2011 (Estr da Várzea)","ESTR",null,"110404",1,null,"ESTR DA LEZÍRIA",10897,10800,{"$raw":"00000000"},"110404","ESTR DA VÁRZEA","INOP",3,"A",638.54507,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LEZÍRIA","Processo nº 03/2011/10; 04/2012/20","29 Março 2011 (Estr da Várzea)","ESTR",null,"110404",1,null,"ESTR DA LEZÍRIA",10899,10800,{"$raw":"00000000"},"110404","ESTR DA VÁRZEA","INOP",3,"A",638.54507,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DA LEZÍRIA","Processo nº 03/2011/10; 04/2012/20","29 Março 2011 (Estr da Várzea)","ESTR",null,"110404",1,null,"ESTR DA LEZÍRIA",10900,10800,{"$raw":"00000000"},"110404","ESTR DA VÁRZEA","INOP",3,"A",638.54507,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DOS ROSÁRIOS","Confirmado, jan 2013",null,"TV",null,"110408",1,null,"TV DOS ROSÁRIOS",10902,10376,{"$raw":"00000000"},"110408","TV DO BOCAGE","INOP",3,"T",21.60550,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1",null,null,"DO BOCAGE","Confirmado, jan 2013",null,"TV",null,"110408",1,null,"TV DO BOCAGE",10903,10376,{"$raw":"00000000"},"110408","TV DO BOCAGE","INOP",3,"T",21.60550,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["1","CM","1043","DA EIRINHA",null,null,"R",null,"110405",1,null,"R DA EIRINHA",10904,8464,{"$raw":"00000000"},"110405","CM 1043","OPER",2,"A",116.26739,5.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,10908,5882,{"$raw":"00000000"},"110407","MJ.3.3913","INOP",3,"T",490.43690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]
["0",null,null,null,null,null,null,null,"110407",1,null,null,10909,5882,{"$raw":"00000000"},"110407","MJ.3.3913","INOP",3,"T",490.43690,3.00000,"ESI","ESI","ESI","ESI","ESI",0,0,0,0,0,0,0,0,0,0,0,0,0,0,0,null,null]