{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID_PA","type":"number","width":4,"decimals":0},{"name":"Nome","type":"character","width":50},{"name":"FREGUESIA","type":"character","width":20},{"name":"COORD_X","type":"character","width":50},{"name":"COORD_Y","type":"character","width":50},{"name":"TIPO_PA","type":"number","width":4,"decimals":0},{"name":"TIPO_PROP","type":"character","width":10},{"name":"FORMATO","type":"number","width":4,"decimals":0},{"name":"LARGURA","type":"character","width":10},{"name":"COMPRIM","type":"character","width":10},{"name":"CAPTAÇÃO","type":"number","width":4,"decimals":0},{"name":"OPERAC","type":"number","width":4,"decimals":0},{"name":"OBSERV","type":"character","width":50},{"name":"CLASS_PA","type":"character","width":10},{"name":"CATEGORIA","type":"number","width":4,"decimals":0},{"name":"ALTURA","type":"character","width":50},{"name":"COD_SINAL","type":"character","width":50},{"name":"VOL_MAX","type":"number","width":9,"decimals":0},{"name":"DESIGNA","type":"character","width":50},{"name":"COD_INE","type":"character","width":6},{"name":"DATA_ACTLZ","type":"date","width":8},{"name":"RAIO","type":"number","width":14,"decimals":3},{"name":"TIPO_VIA","type":"character","width":2},{"name":"INTER_2015","type":"character","width":3},{"name":"INTER_2016","type":"character","width":3},{"name":"INTER_2017","type":"character","width":3},{"name":"INTER_2018","type":"character","width":3},{"name":"EXEC_2015","type":"number","width":4,"decimals":0},{"name":"EXEC_2016","type":"number","width":4,"decimals":0},{"name":"EXEC_2017","type":"number","width":4,"decimals":0},{"name":"EXEC_2018","type":"number","width":4,"decimals":0},{"name":"FIN_2015","type":"number","width":4,"decimals":0},{"name":"FIN_2016","type":"number","width":4,"decimals":0},{"name":"FIN_2017","type":"number","width":4,"decimals":0},{"name":"FIN_2018","type":"number","width":4,"decimals":0},{"name":"FASE_2015","type":"number","width":4,"decimals":0},{"name":"FASE_2016","type":"number","width":4,"decimals":0},{"name":"FASE_2017","type":"number","width":4,"decimals":0},{"name":"FASE_2018","type":"number","width":4,"decimals":0},{"name":"EXEC_2019","type":"number","width":4,"decimals":0},{"name":"INTER_2019","type":"character","width":3},{"name":"FIN_2019","type":"number","width":4,"decimals":0},{"name":"FASE_2019","type":"number","width":4,"decimals":0}],"n_rows":695,"rows_kept":695,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[1,"CAMPO FUTEBOL","MACIEIRA DA LIXA","-873,403589865824","186176,398677913",111,"PUB",3,"15","28",3,1,null,"M",2,"2,5","FLG.RS.M2.001",10,"PONTO DE AGUA","130310","2014-06-01",7.000,"2","ESI","ESI","MAN","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[2,"PEDREIRA","REVINHADE","-10780,4702515961","187428,501158453",214,"PRI",4,"25","80",3,1,null,"M",2,"6","FLG.CH.M2.002",30,"PONTO DE AGUA","130319","2014-06-01",12.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[3,"GRANJA","IDÃES","-12142,7799460246","183265,603022772",111,"PUB",3,"7","7",1,1,null,"M",2,"8","FLG.OT.M2.003",5,"PONTO DE AGUA","130306","2014-06-01",2.000,"2","ESI","ESI","MAN","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[4,"TOMADA DE ÁGUA",null,"-5050,4","89217900654700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T.004",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[5,"TOMADA DE ÁGUA",null,"-4852,5","890713294200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[6,"TOMADA DE ÁGUA",null,"-5010,1","16273447759300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[7,"TOMADA DE ÁGUA",null,"-5049,5","56654477431900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[8,"TOMADA DE ÁGUA",null,"-5186,8","25274553160900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[9,"TOMADA DE ÁGUA",null,"-5118,3","20542714175600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[10,"TOMADA DE ÁGUA",null,"-5192","84618998400400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[11,"TOMADA DE ÁGUA",null,"-5071,3","65060957759900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[12,"TOMADA DE ÁGUA",null,"-8659,2","66500190773500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[13,"TOMADA DE ÁGUA",null,"-2112,6","5616539454800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[14,"TOMADA DE ÁGUA",null,"-1486,5","76781571930000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[15,"TOMADA DE ÁGUA",null,"-1421,4","733328759100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[16,"TOMADA DE ÁGUA",null,"-1118,4","81312124291400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[17,"TOMADA DE ÁGUA",null,"-1079,9","54382045671100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[18,"TOMADA DE ÁGUA",null,"-5340,5","43466560920900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[19,"TOMADA DE ÁGUA",null,"-4843,8","49572011415100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[20,"TOMADA DE ÁGUA",null,"-4764","18990481665200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[21,"TOMADA DE ÁGUA",null,"-4758,9","67511605849700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[22,"TOMADA DE ÁGUA",null,"-4780,4","48307261773200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[23,"TOMADA DE ÁGUA",null,"-4986,2","21873226400900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[24,"TOMADA DE ÁGUA",null,"-5124","40535166685000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[25,"TOMADA DE ÁGUA",null,"-5293,4","86860031556700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[26,"TOMADA DE ÁGUA",null,"-5298,2","57997203450900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[27,"TOMADA DE ÁGUA",null,"-5501,4","1787902700600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[28,"TOMADA DE ÁGUA","VILA VERDE E SANTÃO","-4172,7","74048939812900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[29,"TOMADA DE ÁGUA",null,"-4744,4","39897292447300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[30,"TOMADA DE ÁGUA",null,"-4647,1","70840027713000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[31,"TOMADA DE ÁGUA",null,"-4632,2","21441235116800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[32,"TOMADA DE ÁGUA",null,"-4589,4","22644961829100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[33,"TOMADA DE ÁGUA",null,"-4518,6","55567066090000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[34,"TOMADA DE ÁGUA",null,"-4591,9","17324935406200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[35,"TOMADA DE ÁGUA",null,"-4653,7","85283998688100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[36,"TOMADA DE ÁGUA",null,"-4708,5","29165964329000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[37,"TOMADA DE ÁGUA",null,"-4663,7","95136043595400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[38,"TOMADA DE ÁGUA",null,"-4658,1","4310253897000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[39,"TOMADA DE ÁGUA",null,"-4714","22585449481100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[40,"TOMADA DE ÁGUA",null,"-4724","84411003277600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[41,"TOMADA DE ÁGUA",null,"-4740,2","91779259991000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[42,"TOMADA DE ÁGUA",null,"-4719,3","86984060251100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[43,"TOMADA DE ÁGUA",null,"-4718,8","4673193993900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[44,"TOMADA DE ÁGUA",null,"-4718,5","93124729006400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[45,"TOMADA DE ÁGUA",null,"-4722,7","30883344676800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[46,"TOMADA DE ÁGUA",null,"-4730,8","66433934815200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[47,"TOMADA DE ÁGUA",null,"-4740,2","57834338481200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[48,"TOMADA DE ÁGUA",null,"-4719,8","99834902960700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[49,"TOMADA DE ÁGUA",null,"-4762,1","74272220188900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[50,"TOMADA DE ÁGUA",null,"-4746,9","31867082366800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[51,"TOMADA DE ÁGUA",null,"-4732,1","33061987871800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[52,"TOMADA DE ÁGUA",null,"-4574","77835844946100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[53,"TOMADA DE ÁGUA",null,"-4580,4","59221852904200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[54,"TOMADA DE ÁGUA",null,"-4419,7","19708946649900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[55,"TOMADA DE ÁGUA",null,"-4319,3","18822106986800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[56,"TOMADA DE ÁGUA",null,"-4351,1","73605545423900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[57,"TOMADA DE ÁGUA",null,"-4209,7","84096353042500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[58,"TOMADA DE ÁGUA",null,"-4192,2","39761336939400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[59,"TOMADA DE ÁGUA",null,"-4177,6","45057434041500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[60,"TOMADA DE ÁGUA",null,"-4112,8","20622597151700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[61,"TOMADA DE ÁGUA",null,"-4094,4","83589275070700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[62,"TOMADA DE ÁGUA",null,"-4109","84765676758300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[63,"TOMADA DE ÁGUA",null,"-3477,7","96023902541000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[64,"TOMADA DE ÁGUA","PINHEIRO","-2583,9","35953211970600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[65,"TOMADA DE ÁGUA",null,"-4342,1","17795741389300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[66,"TOMADA DE ÁGUA",null,"-4397,2","37672680166700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[67,"TOMADA DE ÁGUA",null,"-4625,8","26595475067700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[68,"TOMADA DE ÁGUA",null,"-4527,1","17702297619000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[69,"TOMADA DE ÁGUA",null,"-4575,7","96709790563900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[70,"TOMADA DE ÁGUA",null,"-4689,5","28267819725400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[71,"TOMADA DE ÁGUA",null,"-4676,6","95390319841900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[72,"TOMADA DE ÁGUA",null,"-4759,8","61705716059100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[73,"TOMADA DE ÁGUA",null,"-4703,3","72905078460500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[74,"TOMADA DE ÁGUA",null,"-5104,8","33511811128100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[75,"TOMADA DE ÁGUA",null,"-5223,1","25791898509300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[76,"TOMADA DE ÁGUA",null,"-5227,5","94713968526800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[77,"TOMADA DE ÁGUA",null,"-5745,2","11085124756200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[78,"TOMADA DE ÁGUA",null,"-5774,6","60206728322000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[79,"TOMADA DE ÁGUA",null,"-5876,4","12207134101700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[80,"TOMADA DE ÁGUA",null,"-5821,2","44467519707500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[81,"TOMADA DE ÁGUA",null,"-5696,1","65644079755100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[82,"TOMADA DE ÁGUA",null,"-5658,5","63065463547000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[83,"TOMADA DE ÁGUA",null,"-5403,1","12308169313100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[84,"TOMADA DE ÁGUA",null,"-5312,3","96346474150100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[85,"TOMADA DE ÁGUA",null,"-5362,1","44920200429600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[86,"TOMADA DE ÁGUA",null,"-5384,6","49165671533400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[87,"TOMADA DE ÁGUA",null,"-5244,9","68097096207200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[88,"TOMADA DE ÁGUA",null,"-5080,6","25316957230100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[89,"TOMADA DE ÁGUA",null,"-5303","26059268479000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[90,"TOMADA DE ÁGUA",null,"-5293,1","13768803785200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[91,"TOMADA DE ÁGUA",null,"-5324,9","99428240596900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[92,"TOMADA DE ÁGUA",null,"-5382,8","42814415735100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[93,"TOMADA DE ÁGUA",null,"-5487,9","18767633003900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[94,"TOMADA DE ÁGUA",null,"-5262,3","40515199099200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[95,"TOMADA DE ÁGUA",null,"-5083,7","59728945617100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[96,"TOMADA DE ÁGUA",null,"-5153,4","75544470216800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[97,"TOMADA DE ÁGUA",null,"-5531,1","77059809211600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[98,"TOMADA DE ÁGUA",null,"-5563,5","13040759484300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[99,"TOMADA DE ÁGUA",null,"-5660","10019245732100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[100,"TOMADA DE ÁGUA",null,"-5428,8","88443187235700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[101,"TOMADA DE ÁGUA",null,"-5467","26062791585000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[102,"TOMADA DE ÁGUA",null,"-5475,9","91168102264100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[103,"TOMADA DE ÁGUA",null,"-5554,9","55887287361300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[104,"TOMADA DE ÁGUA",null,"-5505,5","11652477711300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[105,"TOMADA DE ÁGUA",null,"-5464,5","92641463241300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[106,"TOMADA DE ÁGUA",null,"-5520,8","85115131297400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[107,"TOMADA DE ÁGUA",null,"-5519,7","31224150484200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[108,"TOMADA DE ÁGUA",null,"-5514,6","52028836892000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[109,"TOMADA DE ÁGUA",null,"-5534,1","76253029465400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[110,"TOMADA DE ÁGUA",null,"-5528,7","35245115967700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[111,"TOMADA DE ÁGUA",null,"-5539","31754438066900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[112,"TOMADA DE ÁGUA",null,"-5723,9","95850170409500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[113,"TOMADA DE ÁGUA",null,"-5827,1","15048202278600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[114,"TOMADA DE ÁGUA",null,"-5722,7","29525310831400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[115,"TOMADA DE ÁGUA",null,"-5680,1","61860921720300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[116,"TOMADA DE ÁGUA",null,"-5700,4","72146320622400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[117,"TOMADA DE ÁGUA",null,"-5789,8","17193271985200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[118,"TOMADA DE ÁGUA",null,"-5852,3","51787969659200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[119,"TOMADA DE ÁGUA",null,"-5567,2","43479271192000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[120,"TOMADA DE ÁGUA",null,"-5579,1","94758838513700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[121,"TOMADA DE ÁGUA",null,"-5592,8","68351724993800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[122,"TOMADA DE ÁGUA",null,"-5604,1","18332009011300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[123,"TOMADA DE ÁGUA",null,"-5620,7","48333440400500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[124,"TOMADA DE ÁGUA",null,"-5637,8","29598439222500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[125,"TOMADA DE ÁGUA",null,"-5504,4","70569490984400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[126,"TOMADA DE ÁGUA",null,"-5492,3","23686597292200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[127,"TOMADA DE ÁGUA",null,"-5520,6","85471658076500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[128,"TOMADA DE ÁGUA",null,"-5521,8","10841555887200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[129,"TOMADA DE ÁGUA",null,"-5475,5","85982478869500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[130,"TOMADA DE ÁGUA",null,"-5605,5","754656997700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[131,"TOMADA DE ÁGUA",null,"-5436,9","83708845349600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[132,"TOMADA DE ÁGUA",null,"-5472,4","31217904712000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[133,"TOMADA DE ÁGUA",null,"-5522,5","9732785987600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[134,"TOMADA DE ÁGUA",null,"-5893,8","26340424137000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[135,"TOMADA DE ÁGUA",null,"-5662,6","57728910096900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[136,"TOMADA DE ÁGUA",null,"-5634,8","17394364014000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[137,"TOMADA DE ÁGUA",null,"-5460,4","21827888378200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[138,"TOMADA DE ÁGUA",null,"-5521,6","8437900398700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[139,"TOMADA DE ÁGUA",null,"-5517,5","42688291869100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[140,"TOMADA DE ÁGUA",null,"-5496,2","56376762554300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[141,"TOMADA DE ÁGUA",null,"-5416,2","1423142396400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[142,"TOMADA DE ÁGUA",null,"-5445,5","26391176448700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[143,"TOMADA DE ÁGUA",null,"-5376,3","28778455783300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[144,"TOMADA DE ÁGUA",null,"-5237,1","65631881798600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[145,"TOMADA DE ÁGUA",null,"-5138,9","5105967760400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[146,"TOMADA DE ÁGUA",null,"-5136,3","18461899271800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[147,"TOMADA DE ÁGUA",null,"-5173,5","36821653070500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[148,"TOMADA DE ÁGUA",null,"-5188,8","70634390674200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[149,"TOMADA DE ÁGUA",null,"-4981,4","40804172416400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[150,"TOMADA DE ÁGUA",null,"-5019,5","44860891350300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[151,"TOMADA DE ÁGUA",null,"-5050,9","50678415589200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[152,"TOMADA DE ÁGUA",null,"-5092,4","40381033106000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[153,"TOMADA DE ÁGUA",null,"-4874,6","41810190256400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[154,"TOMADA DE ÁGUA",null,"-3369,3","11167668318400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[155,"TOMADA DE ÁGUA",null,"-5883,5","69735121771400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[156,"TOMADA DE ÁGUA",null,"-5591,3","45893638850600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[157,"TOMADA DE ÁGUA",null,"-5499","27688425529000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[158,"TOMADA DE ÁGUA",null,"-5676,7","41283098788700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[159,"TOMADA DE ÁGUA",null,"-5912,7","41152328875600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[160,"TOMADA DE ÁGUA",null,"-6001,3","2809894565100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[161,"TOMADA DE ÁGUA",null,"-6068,4","93463156191900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[162,"TOMADA DE ÁGUA",null,"-5994,9","35820569597100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[163,"TOMADA DE ÁGUA",null,"-5852,3","77614131488400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[164,"TOMADA DE ÁGUA",null,"-5946,3","69485056246000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[165,"TOMADA DE ÁGUA",null,"-6071,2","53572748770200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[166,"TOMADA DE ÁGUA",null,"-6323,6","58106516515500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[167,"TOMADA DE ÁGUA",null,"-6157","8022723268400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[168,"TOMADA DE ÁGUA",null,"-6034,2","68548506734100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[169,"TOMADA DE ÁGUA",null,"-5885","72989521489900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[170,"TOMADA DE ÁGUA",null,"-5913","62470759323300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[171,"TOMADA DE ÁGUA",null,"-6859,3","99782395255900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[172,"TOMADA DE ÁGUA",null,"-6275,6","80811866355700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[173,"TOMADA DE ÁGUA",null,"-6322,5","19363689712900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[174,"TOMADA DE ÁGUA",null,"-6252,6","74339941200700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[175,"TOMADA DE ÁGUA",null,"-6250,8","29896172203000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[176,"TOMADA DE ÁGUA",null,"-6105,5","4642276328000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[177,"TOMADA DE ÁGUA",null,"-4472,8","51305944117500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[178,"TOMADA DE ÁGUA",null,"-4735,6","22500578610900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[179,"TOMADA DE ÁGUA",null,"-4701,7","4560692832300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[180,"TOMADA DE ÁGUA",null,"-4465,8","41767864913000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[181,"TOMADA DE ÁGUA",null,"-4316,5","34563988578200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[182,"TOMADA DE ÁGUA",null,"-4755","87855848959400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[183,"TOMADA DE ÁGUA",null,"-4811,4","57829612132600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[184,"TOMADA DE ÁGUA",null,"-4776,8","52880762689000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[185,"TOMADA DE ÁGUA",null,"-4573,5","76953445025500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[186,"TOMADA DE ÁGUA",null,"-4424,2","80940176542600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[187,"TOMADA DE ÁGUA",null,"-4512,5","59764720586800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[188,"TOMADA DE ÁGUA",null,"-4514,1","73945133283300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[189,"TOMADA DE ÁGUA",null,"-4535,2","1206740661300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[190,"TOMADA DE ÁGUA",null,"-4898","81392809806900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[191,"TOMADA DE ÁGUA",null,"-3717,6","3276976798000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[192,"TOMADA DE ÁGUA",null,"-3738,2","67705209537800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[193,"TOMADA DE ÁGUA",null,"-3759,2","80069775631100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[194,"TOMADA DE ÁGUA",null,"-3772,9","29770550385000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[195,"TOMADA DE ÁGUA",null,"-3748,7","56337155126400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[196,"TOMADA DE ÁGUA",null,"-3731,1","11769682499000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[197,"TOMADA DE ÁGUA",null,"-3715,2","21487219096200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[198,"TOMADA DE ÁGUA",null,"-3650,8","54947868909200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[199,"TOMADA DE ÁGUA",null,"-3687,7","89734837424500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[200,"TOMADA DE ÁGUA",null,"-3692,9","35569815745100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[201,"TOMADA DE ÁGUA",null,"-3993,2","94893378071700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[202,"TOMADA DE ÁGUA",null,"-4155,5","52155488287100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[203,"TOMADA DE ÁGUA",null,"-4458,6","3000808287100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[204,"TOMADA DE ÁGUA",null,"-4465,1","77525025572300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[205,"TOMADA DE ÁGUA",null,"-4452,9","81274174962900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[206,"TOMADA DE ÁGUA",null,"-4482,9","74126213455700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[207,"TOMADA DE ÁGUA",null,"-5393,8","70540800344300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[208,"TOMADA DE ÁGUA",null,"-5463,1","79427034527200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[209,"TOMADA DE ÁGUA",null,"-5522,7","70372905979500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[210,"TOMADA DE ÁGUA",null,"-5648,6","9406369123500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[211,"TOMADA DE ÁGUA",null,"-5724,1","40868025275300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[212,"TOMADA DE ÁGUA",null,"-5702,5","22174451718500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[213,"TOMADA DE ÁGUA",null,"-5727,2","14223732684300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[214,"TOMADA DE ÁGUA",null,"-5766,7","91246231936400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[215,"TOMADA DE ÁGUA",null,"-5818,9","43744876771200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[216,"TOMADA DE ÁGUA",null,"-5928,3","48784037931200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[217,"TOMADA DE ÁGUA",null,"-5972","39777670434000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[218,"TOMADA DE ÁGUA",null,"-6126,7","46252362005200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[219,"TOMADA DE ÁGUA",null,"-6272,7","41956125362800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[220,"TOMADA DE ÁGUA",null,"-4982,1","79161856460300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[221,"TOMADA DE ÁGUA","REFONTOURA","-5749,3","41383448219900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[222,"TOMADA DE ÁGUA","REFONTOURA","-5715,2","99420457493400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[223,"TOMADA DE ÁGUA",null,"-6531,3","67336514231300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[224,"TOMADA DE ÁGUA",null,"-6572,8","27490100229600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[225,"TOMADA DE ÁGUA",null,"-6587,1","56882835493900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[226,"TOMADA DE ÁGUA",null,"538,5","23190452717700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[227,"TOMADA DE ÁGUA",null,"-7123","44792305576300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[228,"TOMADA DE ÁGUA",null,"-6951,9","40857743987200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[229,"TOMADA DE ÁGUA",null,"-6936,5","20829846456800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[230,"TOMADA DE ÁGUA",null,"-6776,7","82603329571400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[231,"TOMADA DE ÁGUA",null,"-6829,8","36966342772900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[232,"TOMADA DE ÁGUA",null,"-7490,3","32768306892800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[233,"TOMADA DE ÁGUA",null,"-7835,1","54577071745700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[234,"TOMADA DE ÁGUA",null,"-7851,1","54916828469100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[235,"TOMADA DE ÁGUA",null,"-7461,1","73666086891900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[236,"TOMADA DE ÁGUA",null,"-6821,2","57816287958100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[237,"TOMADA DE ÁGUA",null,"-7155,2","31727564472700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[238,"TOMADA DE ÁGUA",null,"-7134,4","33091751590800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[239,"TOMADA DE ÁGUA",null,"-7029,3","16864879510800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[240,"TOMADA DE ÁGUA",null,"-7034,1","13566770858600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[241,"TOMADA DE ÁGUA",null,"-6931,1","71413534873900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[242,"TOMADA DE ÁGUA",null,"-6831","45832510986700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[243,"TOMADA DE ÁGUA",null,"-6792,6","93955901981100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[244,"TOMADA DE ÁGUA",null,"-6786,9","43512351106600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[245,"TOMADA DE ÁGUA",null,"-6906,1","27329138893400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[246,"TOMADA DE ÁGUA",null,"-6955,6","61429143213400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[247,"TOMADA DE ÁGUA",null,"-7044,6","30818447694800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[248,"TOMADA DE ÁGUA",null,"-7178,6","67980665748500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[249,"TOMADA DE ÁGUA",null,"-7067,9","73955623165200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[250,"TOMADA DE ÁGUA",null,"-7255,4","25303534051600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[251,"TOMADA DE ÁGUA",null,"-7221,7","64808253035900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[252,"TOMADA DE ÁGUA",null,"-7188,2","42762989227200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[253,"TOMADA DE ÁGUA",null,"-7247,6","49054848319800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[254,"TOMADA DE ÁGUA",null,"-7297,6","94176995391900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[255,"TOMADA DE ÁGUA",null,"-7592,6","55034151539400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[256,"TOMADA DE ÁGUA",null,"-7584,2","43451322428900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[257,"TOMADA DE ÁGUA",null,"-7421,5","86115809681400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[258,"TOMADA DE ÁGUA",null,"-7390,8","63849770614300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[259,"TOMADA DE ÁGUA",null,"-7541,4","70658209505900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[260,"TOMADA DE ÁGUA",null,"-7427,3","15158640138200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[261,"TOMADA DE ÁGUA",null,"-7950,7","83449693350100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[262,"TOMADA DE ÁGUA",null,"-8186,6","70046607469000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[263,"TOMADA DE ÁGUA",null,"-8539,2","81631491205200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[264,"TOMADA DE ÁGUA",null,"-8567","88558037470600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[265,"TOMADA DE ÁGUA",null,"-8652,7","90543927869300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[266,"TOMADA DE ÁGUA",null,"-8792,5","54612363979700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[267,"TOMADA DE ÁGUA",null,"-8849,9","23501496905400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[268,"TOMADA DE ÁGUA",null,"-8829,3","21942388312900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[269,"TOMADA DE ÁGUA",null,"-6639,7","15562952071200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[270,"TOMADA DE ÁGUA",null,"-6579,1","7044518590600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[271,"TOMADA DE ÁGUA",null,"-6599,3","25434889542500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[272,"TOMADA DE ÁGUA",null,"-7094","4800787894100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[273,"TOMADA DE ÁGUA",null,"-7191,1","45976494415700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[274,"TOMADA DE ÁGUA",null,"-8067,7","24054465197700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[275,"TOMADA DE ÁGUA",null,"-8251,1","95060366320800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[276,"TOMADA DE ÁGUA",null,"-8125,9","77892754890500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[277,"TOMADA DE ÁGUA",null,"-8391","46868389337800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[278,"TOMADA DE ÁGUA",null,"-8352,6","18641334858700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[279,"TOMADA DE ÁGUA",null,"-8602,8","25063376052600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[280,"TOMADA DE ÁGUA",null,"-8362,7","16467167716500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[281,"TOMADA DE ÁGUA",null,"-6355","88040911312400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[282,"TOMADA DE ÁGUA",null,"-6875,4","45573646608000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[283,"TOMADA DE ÁGUA",null,"-6801","17545785322000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[284,"TOMADA DE ÁGUA",null,"-6784,2","63107042959700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[285,"TOMADA DE ÁGUA",null,"-6495,2","85846678918500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[286,"TOMADA DE ÁGUA",null,"-6585,1","72039196535500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[287,"TOMADA DE ÁGUA",null,"-7731,6","85248418216400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[288,"TOMADA DE ÁGUA",null,"-7213,1","46450608572200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[289,"TOMADA DE ÁGUA",null,"-7361,6","50301997928200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[290,"TOMADA DE ÁGUA",null,"-7476,8","86081831442400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[291,"TOMADA DE ÁGUA",null,"-6949,5","29544492441300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[292,"TOMADA DE ÁGUA",null,"-6579,2","53461805085000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[293,"TOMADA DE ÁGUA",null,"-6402,3","55114369798700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[294,"TOMADA DE ÁGUA",null,"-6421,4","41604603547600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[295,"TOMADA DE ÁGUA",null,"-6206,4","49423417361700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[296,"TOMADA DE ÁGUA",null,"-1577,5","88177535479200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[297,"TOMADA DE ÁGUA",null,"-1546,1","48382185780100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[298,"TOMADA DE ÁGUA",null,"-1730,6","5206317730300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[299,"TOMADA DE ÁGUA",null,"-1327,7","44982884250900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[300,"TOMADA DE ÁGUA",null,"-1297,8","44308136911400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[301,"TOMADA DE ÁGUA",null,"-2708,5","56623962482300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[302,"TOMADA DE ÁGUA",null,"-2127,9","84953106567000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[303,"TOMADA DE ÁGUA",null,"-674,5","22691466407200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[304,"TOMADA DE ÁGUA",null,"-733,5","10776920607900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[305,"TOMADA DE ÁGUA",null,"-834,7","76459684966500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[306,"TOMADA DE ÁGUA",null,"-840,4","48280066673800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[307,"TOMADA DE ÁGUA",null,"-839,4","30625189212200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[308,"TOMADA DE ÁGUA",null,"-1207,4","71272177850600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[309,"TOMADA DE ÁGUA",null,"-1103","94734618964100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[310,"TOMADA DE ÁGUA",null,"-1462,4","511792104200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[311,"TOMADA DE ÁGUA",null,"-1331,7","75137768909200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[312,"TOMADA DE ÁGUA",null,"-1265,1","8410254877500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[313,"TOMADA DE ÁGUA",null,"-1432,1","61437534594400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[314,"TOMADA DE ÁGUA",null,"-462,3","69705928380400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[315,"TOMADA DE ÁGUA",null,"-282,8","85058730928000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[316,"TOMADA DE ÁGUA",null,"-390,8","97177656297600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[317,"TOMADA DE ÁGUA",null,"-614,5","31550067531500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[318,"TOMADA DE ÁGUA",null,"-681,2","48218116172200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[319,"TOMADA DE ÁGUA",null,"-2970,7","76256989847800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[320,"TOMADA DE ÁGUA",null,"-2918,6","9886391612200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[321,"TOMADA DE ÁGUA",null,"-2345","67175254924200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[322,"TOMADA DE ÁGUA",null,"-2467,8","3665518818900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[323,"TOMADA DE ÁGUA",null,"-1547,8","77015203528600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[324,"TOMADA DE ÁGUA",null,"-1161,9","34282141388400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[325,"TOMADA DE ÁGUA",null,"-1108,1","91654474532700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[326,"TOMADA DE ÁGUA",null,"-1520,1","24348542100100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[327,"TOMADA DE ÁGUA",null,"-1375,4","39918697142300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[328,"TOMADA DE ÁGUA",null,"-1381,6","1872103812600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[329,"TOMADA DE ÁGUA",null,"-3110,5","29353445585000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[330,"TOMADA DE ÁGUA",null,"-2731,9","84450116899100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[331,"TOMADA DE ÁGUA",null,"-1322,5","26585330226200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[332,"TOMADA DE ÁGUA","VILA VERDE E SANTÃO","-4052,2","33096750365800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[333,"TOMADA DE ÁGUA","VILA VERDE E SANTÃO","-4099,9","43057784723400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[334,"TOMADA DE ÁGUA","VILA VERDE E SANTÃO","-4067,3","78040764830100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[335,"TOMADA DE ÁGUA","AIÃO","-6108","14943103116800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[336,"TOMADA DE ÁGUA",null,"-4917,6","2352662026500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[337,"TOMADA DE ÁGUA",null,"-1165,7","39914180943700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[338,"TOMADA DE ÁGUA",null,"-1346,3","3479031274000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[339,"TOMADA DE ÁGUA",null,"-1340,7","64735569850000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[340,"TOMADA DE ÁGUA",null,"-1335,4","4393687342200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[341,"TOMADA DE ÁGUA",null,"-1330,6","49505059431200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[342,"TOMADA DE ÁGUA",null,"-1325,2","93333603382100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[343,"TOMADA DE ÁGUA",null,"-1319,5","63260240851400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[344,"TOMADA DE ÁGUA",null,"-1253,9","30619963939500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[345,"TOMADA DE ÁGUA",null,"-1250,8","93483681633400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[346,"TOMADA DE ÁGUA",null,"-1178,7","50428756990000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[347,"TOMADA DE ÁGUA",null,"-1150,3","25430467462900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[348,"TOMADA DE ÁGUA",null,"-1140,9","99528403313900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[349,"TOMADA DE ÁGUA",null,"-1070,5","33404365094600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[350,"TOMADA DE ÁGUA",null,"-994,7","90576188592200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[351,"TOMADA DE ÁGUA",null,"-992,2","78317019001400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[352,"TOMADA DE ÁGUA",null,"-996,7","94981616498300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[353,"TOMADA DE ÁGUA",null,"-997,2","65764974188600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[354,"TOMADA DE ÁGUA",null,"-1053","22081321803900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[355,"TOMADA DE ÁGUA",null,"-979,4","70069302013100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[356,"TOMADA DE ÁGUA",null,"-1369","12874821259200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[357,"TOMADA DE ÁGUA",null,"-872,4","39668956729300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[358,"TOMADA DE ÁGUA",null,"-970,3","50110160885400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[359,"TOMADA DE ÁGUA",null,"-1007,3","78732064968100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[360,"TOMADA DE ÁGUA",null,"-1062","8670235372800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[361,"TOMADA DE ÁGUA",null,"-1117","10949781426500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[362,"TOMADA DE ÁGUA","PINHEIRO","-1836,5","93683771352500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[363,"TOMADA DE ÁGUA",null,"-1457,6","17132312996500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[364,"TOMADA DE ÁGUA",null,"-1000,2","96272372972500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[365,"TOMADA DE ÁGUA",null,"-1271,3","29596677620400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[366,"TOMADA DE ÁGUA",null,"-928,9","44646932148300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[367,"TOMADA DE ÁGUA",null,"-1378,9","15135556577300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[368,"TOMADA DE ÁGUA",null,"-1433,7","81637560496200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[369,"TOMADA DE ÁGUA",null,"-1490,9","5895797768600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[370,"TOMADA DE ÁGUA",null,"-1340,6","76750297076100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[371,"TOMADA DE ÁGUA",null,"-1379,4","44581054240200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[372,"TOMADA DE ÁGUA",null,"-1263,9","14933531079400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[373,"TOMADA DE ÁGUA",null,"-1309,6","17129916499800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[374,"TOMADA DE ÁGUA",null,"-1369,4","57224644924300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[375,"TOMADA DE ÁGUA",null,"-1721,2","14098590193300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[376,"TOMADA DE ÁGUA",null,"-1927,5","11368296309200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[377,"TOMADA DE ÁGUA",null,"-1915,9","23143138901700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[378,"TOMADA DE ÁGUA",null,"-1963,1","72310843161500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[379,"TOMADA DE ÁGUA",null,"-1973,1","3115825302700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[380,"TOMADA DE ÁGUA",null,"-1984,8","28687029396000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[381,"TOMADA DE ÁGUA",null,"-1991,7","75092378167800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[382,"TOMADA DE ÁGUA","REFONTOURA","-4987,2","85128660150800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[383,"TOMADA DE ÁGUA",null,"-4872,5","45418228604800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[384,"TOMADA DE ÁGUA",null,"-4741,1","26548471133000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[385,"TOMADA DE ÁGUA",null,"-4576","96179405882100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[386,"TOMADA DE ÁGUA","REFONTOURA","-4317,8","31153379695000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[387,"TOMADA DE ÁGUA","REFONTOURA","-4233","35450651441400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[388,"TOMADA DE ÁGUA","REFONTOURA","-4071,3","97786281144400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[389,"TOMADA DE ÁGUA","REFONTOURA","-3959,9","49609445917300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[390,"TOMADA DE ÁGUA","REFONTOURA","-3858,4","27879587718100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[391,"TOMADA DE ÁGUA",null,"-2339,5","10718819539800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[392,"TOMADA DE ÁGUA",null,"-2383,3","29289258043000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[393,"TOMADA DE ÁGUA",null,"-2351,8","41687310370600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[394,"TOMADA DE ÁGUA",null,"-2077,9","69126128737100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[395,"TOMADA DE ÁGUA",null,"-2164,7","84836652381300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[396,"TOMADA DE ÁGUA","REFONTOURA","-4169,7","69601090491100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[397,"TOMADA DE ÁGUA",null,"-3246,7","7085522590200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[398,"TOMADA DE ÁGUA",null,"-3291,2","23817191930700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[399,"TOMADA DE ÁGUA",null,"-2871,8","9324911708200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[400,"TOMADA DE ÁGUA",null,"-3028","99396806821500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[401,"TOMADA DE ÁGUA",null,"-2902","85994238965200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[402,"TOMADA DE ÁGUA",null,"-3027,3","19045208249000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[403,"TOMADA DE ÁGUA",null,"-2223,7","21048215524200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[404,"TOMADA DE ÁGUA",null,"-2236,1","37148103502100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[405,"TOMADA DE ÁGUA",null,"-3533,3","22046171262600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[406,"TOMADA DE ÁGUA",null,"-3500,6","17100672854600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[407,"TOMADA DE ÁGUA",null,"-391,7","77978249825500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[408,"TOMADA DE ÁGUA",null,"-698,2","99772354017500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[409,"TOMADA DE ÁGUA",null,"-718,2","12907759720100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[410,"TOMADA DE ÁGUA",null,"-752,1","90933016869400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[411,"TOMADA DE ÁGUA",null,"-695,8","39259021784500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[412,"TOMADA DE ÁGUA",null,"-1785,8","33315613672300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[413,"TOMADA DE ÁGUA",null,"-1254,1","89085842575900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[414,"TOMADA DE ÁGUA",null,"-1659","47296680211700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[415,"TOMADA DE ÁGUA",null,"-1070,5","34282219654400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[416,"TOMADA DE ÁGUA",null,"-1118,9","5545320711100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[417,"TOMADA DE ÁGUA",null,"-1001,3","98565670020600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[418,"TOMADA DE ÁGUA",null,"-430,8","25555740171700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[419,"TOMADA DE ÁGUA",null,"46,2","64114370278500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[420,"TOMADA DE ÁGUA",null,"-53","21542966394900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[421,"TOMADA DE ÁGUA",null,"-73,2","24617612082500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[422,"TOMADA DE ÁGUA",null,"-277,3","17225393835000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[423,"TOMADA DE ÁGUA",null,"-111,1","85569442401200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[424,"TOMADA DE ÁGUA",null,"1053,9","81416497903400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[425,"TOMADA DE ÁGUA",null,"1467,4","30480605642500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[426,"TOMADA DE ÁGUA",null,"-5005,8","79450696156700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[427,"TOMADA DE ÁGUA",null,"-4825,1","94573754037300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[428,"TOMADA DE ÁGUA",null,"-5881,5","9701607785200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[429,"TOMADA DE ÁGUA",null,"-5809,2","42004180829100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[430,"TOMADA DE ÁGUA",null,"-5753,8","71940702021700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[431,"TOMADA DE ÁGUA",null,"-5470,7","17739823870900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[432,"TOMADA DE ÁGUA","VILA VERDE E SANTÃO","-4747,4","25055447107300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[433,"TOMADA DE ÁGUA","AIÃO","-5915,4","10239136281200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[434,"TOMADA DE ÁGUA","AIÃO","-6005,3","88814015936100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[435,"TOMADA DE ÁGUA","AIÃO","-5966","78920859097700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[436,"TOMADA DE ÁGUA",null,"-6902,7","83726796657000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[437,"TOMADA DE ÁGUA",null,"-6775,5","52427369242700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[438,"TOMADA DE ÁGUA",null,"-6119,9","28992089713600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[439,"TOMADA DE ÁGUA",null,"-6296,6","70848362642600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[440,"TOMADA DE ÁGUA",null,"-6418","54903447395200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[441,"TOMADA DE ÁGUA",null,"-6433,9","64278441497300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[442,"TOMADA DE ÁGUA",null,"-7072,8","98099957334100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[443,"TOMADA DE ÁGUA",null,"-7423,3","94413348318300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[444,"TOMADA DE ÁGUA",null,"-7460,8","30358627179500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[445,"TOMADA DE ÁGUA",null,"-7464,1","81196063465900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[446,"TOMADA DE ÁGUA",null,"-7430,4","29481249113500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[447,"TOMADA DE ÁGUA",null,"-7578,6","69697699995600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[448,"TOMADA DE ÁGUA",null,"-7999","48804432139100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[449,"TOMADA DE ÁGUA",null,"-9169,8","90290619539900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[450,"TOMADA DE ÁGUA",null,"-8678,8","79830449892300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[451,"TOMADA DE ÁGUA",null,"-8104,6","50020502544100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[452,"TOMADA DE ÁGUA",null,"-8009,8","78394636158200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[453,"TOMADA DE ÁGUA",null,"-8383,6","63798270470600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[454,"TOMADA DE ÁGUA",null,"-8173,8","69706099838400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[455,"TOMADA DE ÁGUA",null,"-8046,4","52532579816800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[456,"TOMADA DE ÁGUA",null,"-7176","92778599937400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[457,"TOMADA DE ÁGUA",null,"-6980,5","35449624760100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[458,"TOMADA DE ÁGUA",null,"-7269","25541146416800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[459,"TOMADA DE ÁGUA",null,"-7404,9","95742252660400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[460,"TOMADA DE ÁGUA",null,"-7433,6","9767413661800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[461,"TOMADA DE ÁGUA",null,"-7350,1","38518175277600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[462,"TOMADA DE ÁGUA",null,"-8529,1","17567601642800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[463,"TOMADA DE ÁGUA",null,"-8408,1","48156871146100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[464,"TOMADA DE ÁGUA",null,"-8449,4","45269460382400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[465,"TOMADA DE ÁGUA",null,"-8476,5","14313855499500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[466,"TOMADA DE ÁGUA",null,"-8728,9","67511637485600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[467,"TOMADA DE ÁGUA",null,"-8553,8","52385138307000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[468,"TOMADA DE ÁGUA",null,"-8412,3","28971619223000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[469,"TOMADA DE ÁGUA",null,"-8398,9","80629359342900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[470,"TOMADA DE ÁGUA",null,"-8559,9","54880666620700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[471,"TOMADA DE ÁGUA",null,"-8176,2","94708591856800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[472,"TOMADA DE ÁGUA",null,"-8083,9","15639352991100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[473,"TOMADA DE ÁGUA",null,"-7550,2","16932351788300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[474,"TOMADA DE ÁGUA",null,"-7290,9","44406426031500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[475,"TOMADA DE ÁGUA",null,"-7323,2","3548394324600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[476,"TOMADA DE ÁGUA",null,"-7110,9","7875724064100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[477,"TOMADA DE ÁGUA",null,"-6722,3","90031408576800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[478,"TOMADA DE ÁGUA",null,"-6653,8","71652734435000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[479,"TOMADA DE ÁGUA",null,"-6445,7","817142072100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[480,"TOMADA DE ÁGUA",null,"-5831,3","97538552992000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[481,"TOMADA DE ÁGUA",null,"-6301,9","47967688975000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[482,"TOMADA DE ÁGUA","PINHEIRO","-1396,9","98459305265000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[483,"TOMADA DE ÁGUA","PINHEIRO","-1589,6","99348063251800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[484,"TOMADA DE ÁGUA",null,"-3617,9","51840953639500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[485,"TOMADA DE ÁGUA",null,"-3310,4","80785400985000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[486,"TOMADA DE ÁGUA",null,"-3347,7","92388278932800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[487,"TOMADA DE ÁGUA",null,"-2838,9","9170778759300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[488,"TOMADA DE ÁGUA",null,"-2169,8","61444572583400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[489,"TOMADA DE ÁGUA",null,"-2169,9","40870605423700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[490,"TOMADA DE ÁGUA",null,"-2137,7","48036142887900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[491,"TOMADA DE ÁGUA",null,"-2155,2","92623850849800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[492,"TOMADA DE ÁGUA",null,"-1870,1","12454957852600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[493,"TOMADA DE ÁGUA",null,"-2037,5","55968855209400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[494,"TOMADA DE ÁGUA",null,"-1587,2","48835806589300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[495,"TOMADA DE ÁGUA",null,"-2683,6","37569752652800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[496,"TOMADA DE ÁGUA",null,"-2329,7","57524130334800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[497,"TOMADA DE ÁGUA",null,"-1915,4","37173072801700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[498,"TOMADA DE ÁGUA",null,"-1781","34599053764600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[499,"TOMADA DE ÁGUA",null,"-1439,3","73465370008500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[500,"TOMADA DE ÁGUA",null,"-1417,2","27813389472400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[501,"TOMADA DE ÁGUA",null,"-1620,8","36089269592800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[502,"TOMADA DE ÁGUA","JUGUEIROS","-6299,3","90333439325300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[503,"TOMADA DE ÁGUA","JUGUEIROS","-6256,2","95243849366700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[504,"TOMADA DE ÁGUA","JUGUEIROS","-4895,4","58813726887500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[505,"TOMADA DE ÁGUA","JUGUEIROS","-5122","62509073206500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[506,"TOMADA DE ÁGUA","JUGUEIROS","-5766,6","37210761882700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[507,"TOMADA DE ÁGUA","JUGUEIROS","-5364","27090707086200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[508,"TOMADA DE ÁGUA","SENDIM","-4869,1","46538967361300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[509,"TOMADA DE ÁGUA",null,"-3239,4","53000438341400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[510,"TOMADA DE ÁGUA",null,"-3519,4","62146044184900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[511,"TOMADA DE ÁGUA",null,"-4167","53799087239900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[512,"TOMADA DE ÁGUA",null,"-4305,1","24345781543500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[513,"TOMADA DE ÁGUA",null,"-4397,7","7211487554600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[514,"TOMADA DE ÁGUA",null,"-4937,5","86606623808600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[515,"TOMADA DE ÁGUA","SENDIM","-5312,5","35987094743200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[516,"TOMADA DE ÁGUA","SENDIM","-3896,8","30423325662200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[517,"TOMADA DE ÁGUA","SENDIM","-5008,9","59364414273300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[518,"TOMADA DE ÁGUA","SENDIM","-4691,3","96577209277900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[519,"TOMADA DE ÁGUA","SENDIM","-3913,8","48530582268700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[520,"TOMADA DE ÁGUA","SENDIM","-3975,7","5720275746000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[521,"TOMADA DE ÁGUA","SENDIM","-3375,1","17530278876100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[522,"TOMADA DE ÁGUA","SENDIM","-2938,9","4358939107600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[523,"TOMADA DE ÁGUA","SENDIM","-2968,9","34970925262400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[524,"TOMADA DE ÁGUA","SENDIM","-2691","8753239992100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[525,"TOMADA DE ÁGUA","SENDIM","-2874,6","84878521770300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[526,"TOMADA DE ÁGUA","PINHEIRO","-2274,5","31184325373000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[527,"TOMADA DE ÁGUA","PINHEIRO","-2436,9","20010296156800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[528,"TOMADA DE ÁGUA","PINHEIRO","-1643,9","56993062718500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[529,"TOMADA DE ÁGUA","PINHEIRO","-1684,8","41631058254300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[530,"TOMADA DE ÁGUA","PINHEIRO","-1984","54352600236600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[531,"TOMADA DE ÁGUA","PINHEIRO","-1687,6","90721610240900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[532,"TOMADA DE ÁGUA","PINHEIRO","-1551,3","78821332873500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[533,"TOMADA DE ÁGUA","PINHEIRO","-1253,5","64588348977800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[534,"TOMADA DE ÁGUA","PINHEIRO","-1424,8","11229553932200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[535,"TOMADA DE ÁGUA","PINHEIRO","-1464,3","44305584534600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[536,"TOMADA DE ÁGUA","PINHEIRO","-1933,2","53943616269700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[537,"TOMADA DE ÁGUA",null,"-11228,4","67201473113000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[538,"TOMADA DE ÁGUA",null,"-10793,1","46895495302000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[539,"TOMADA DE ÁGUA",null,"-10826,3","53990176896000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[540,"TOMADA DE ÁGUA",null,"-11159,2","71365785622000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[541,"TOMADA DE ÁGUA",null,"-11130,2","81578258320000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[542,"TOMADA DE ÁGUA",null,"-11110","96623297432000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[543,"TOMADA DE ÁGUA",null,"-11080,5","80258625676000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[544,"TOMADA DE ÁGUA",null,"-10019,5","94472796474000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[545,"TOMADA DE ÁGUA",null,"-10916,5","34000039275000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[546,"TOMADA DE ÁGUA",null,"-10612,2","36374943634000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[547,"TOMADA DE ÁGUA",null,"-10805","17908189038000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[548,"TOMADA DE ÁGUA",null,"-10614,4","65996165578000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[549,"TOMADA DE ÁGUA",null,"-10405,2","93685100220000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[550,"TOMADA DE ÁGUA",null,"-10644,3","48809170915000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[551,"TOMADA DE ÁGUA",null,"-11124,9","98795368418000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[552,"TOMADA DE ÁGUA",null,"-11003","55311591626000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[553,"TOMADA DE ÁGUA",null,"-10995,2","56369307201000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[554,"TOMADA DE ÁGUA",null,"-10913","10688552633000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[555,"TOMADA DE ÁGUA",null,"-11208,7","95479972074000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[556,"TOMADA DE ÁGUA",null,"-10351,5","67603902862000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[557,"TOMADA DE ÁGUA",null,"-11022,5","37949132937000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[558,"TOMADA DE ÁGUA",null,"-11280,1","65526085824000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[559,"TOMADA DE ÁGUA",null,"-11362,4","53693818912000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[560,"TOMADA DE ÁGUA",null,"-11364,4","58784777984000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[561,"TOMADA DE ÁGUA",null,"-11642,4","8236203039000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[562,"TOMADA DE ÁGUA",null,"-11636,3","33257682942000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[563,"TOMADA DE ÁGUA",null,"-11837,4","24823437239000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[564,"TOMADA DE ÁGUA",null,"-12071,4","60551330558000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[565,"TOMADA DE ÁGUA",null,"-11680,8","59724699636000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[566,"TOMADA DE ÁGUA",null,"-11707,9","6391652446000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[567,"TOMADA DE ÁGUA",null,"-11169,5","56743847355000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[568,"TOMADA DE ÁGUA",null,"-10829,9","37187388452000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[569,"TOMADA DE ÁGUA",null,"-11371,2","85216290446000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[570,"TOMADA DE ÁGUA",null,"-12023,2","79424608598000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[571,"TOMADA DE ÁGUA",null,"-12049,4","38991777104000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[572,"TOMADA DE ÁGUA",null,"-11751","69720277228000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[573,"TOMADA DE ÁGUA",null,"-11049","34908589849000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[574,"TOMADA DE ÁGUA",null,"-10515,8","77931445313000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[575,"TOMADA DE ÁGUA",null,"-10296,2","15787225665000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[576,"TOMADA DE ÁGUA",null,"-10263","10359423211000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[577,"TOMADA DE ÁGUA",null,"-10116,2","13534193201000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[578,"TOMADA DE ÁGUA",null,"-9857,1","45698804755700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[579,"TOMADA DE ÁGUA",null,"-8144,8","68586078126100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[580,"TOMADA DE ÁGUA",null,"-8526,8","3420896758300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[581,"TOMADA DE ÁGUA",null,"-8826,1","46676406177000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[582,"TOMADA DE ÁGUA",null,"-9964","73485417844500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[583,"TOMADA DE ÁGUA",null,"-9762,3","17238736432000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[584,"TOMADA DE ÁGUA",null,"-9700,2","49094021568500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[585,"TOMADA DE ÁGUA",null,"-9532,4","16848047138000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[586,"TOMADA DE ÁGUA",null,"-8993,1","71713714342300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[587,"TOMADA DE ÁGUA",null,"-8802,2","17475270124900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[588,"TOMADA DE ÁGUA",null,"-8824,2","50893899152300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[589,"TOMADA DE ÁGUA",null,"-8520,8","59314826389900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[590,"TOMADA DE ÁGUA",null,"-8545,4","56835135682900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[591,"TOMADA DE ÁGUA",null,"-8933,1","66979406538300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[592,"TOMADA DE ÁGUA",null,"-9571,9","11526672032800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[593,"TOMADA DE ÁGUA",null,"-9237,5","30047415493800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[594,"TOMADA DE ÁGUA",null,"-9273,5","44191761990100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[595,"TOMADA DE ÁGUA",null,"-9832,8","33014017232900",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[596,"TOMADA DE ÁGUA",null,"-9755,5","26956652058300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[597,"TOMADA DE ÁGUA",null,"-9596,1","55208187439700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[598,"TOMADA DE ÁGUA",null,"-9249,7","97141656599700",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[599,"TOMADA DE ÁGUA",null,"-8579,2","7917102685300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[600,"TOMADA DE ÁGUA",null,"-8714,7","91183210552800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[601,"TOMADA DE ÁGUA",null,"-8345,3","38560886157200",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[602,"TOMADA DE ÁGUA",null,"-11768,8","49082618359000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[603,"TOMADA DE ÁGUA",null,"-11798,1","14864509727000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[604,"TOMADA DE ÁGUA",null,"-11041,4","89817953348000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[605,"TOMADA DE ÁGUA",null,"-11488,4","19228981104000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[606,"TOMADA DE ÁGUA",null,"-11608,3","28089028713000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[607,"TOMADA DE ÁGUA",null,"-11682,8","48014681018000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[608,"TOMADA DE ÁGUA",null,"-11505,3","21770126466000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[609,"TOMADA DE ÁGUA",null,"-10776,6","5580201373000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[610,"TOMADA DE ÁGUA",null,"-10625,7","82683852289000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[611,"TOMADA DE ÁGUA",null,"-10130,9","41010912517000",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[612,"TOMADA DE ÁGUA",null,"-8143,3","31311022397100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[613,"TOMADA DE ÁGUA",null,"-7954","13538516417600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[614,"TOMADA DE ÁGUA",null,"-8207,2","74698364286500",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[615,"TOMADA DE ÁGUA",null,"-9447,4","41664957354100",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[616,"TOMADA DE ÁGUA",null,"-9569,5","35593344160600",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[617,"TOMADA DE ÁGUA",null,"-9573,2","57068690858400",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[618,"TOMADA DE ÁGUA",null,"-9645,7","48730950552300",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[619,"TOMADA DE ÁGUA",null,"-8459,9","74334352256800",310,"PUB",4,null,null,2,1,null,"T",2,null,"FLG.RP.T.619",0,"MARCO DE INCENDIO",null,"2014-06-01",0.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[620,"BARRA","PEDREIRA","-6957,89969999994","-6957,89969999994",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T.620",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[621,"MOGOS","PEDREIRA","-6273,4726","-6273,4726",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[622,"CABO","MARGARIDE","-6724,29040000023","-6724,29040000023",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[623,"PORTINHO","MARGARIDE","-6256,4155999999","-6256,4155999999",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[624,"FONTE DA SANTA","MARGARIDE","-5018,10290000034","-5018,10290000034",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[625,"AGUA NOVA","MARGARIDE","-5332,18379999975","-5332,18379999975",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[626,"BARROCO","LAGARES","-7649,34300000035","-7649,34300000035",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[627,"GOZENDE","LAGARES","-7886,15149999973","-7886,15149999973",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[628,"IGREJA","LAGARES","-8387,73319999961","-8387,73319999961",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[629,"SEM","LAGARES","-8167,19249999989","-8167,19249999989",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[630,"SANATORIO","POMBEIRO","-6243,75250000035","-6243,75250000035",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[631,"OUTEIRO","POMBEIRO","-6410,96490000006","-6410,96490000006",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[632,"CASINHAS","POMBEIRO","-6586,22960000017","-6586,22960000017",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[633,"BOUCA","POMBEIRO","-6737,93709999977","-6737,93709999977",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[634,"RAMALHAL","POMBEIRO","-7202,82170000021","-7202,82170000021",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[635,"CASANOVA","POMBEIRO","-7248,67860000018","-7248,67860000018",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[636,"CRUZEIRO","POMBEIRO","-6937,54839999976","-6937,54839999976",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[637,"SOUTO","POMBEIRO","-6960,88439999981","-6960,88439999981",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[638,"POMBEIRO","POMBEIRO","-8118,65930000035","-8118,65930000035",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[639,"MONTE","POMBEIRO","-8244,51209999996","-8244,51209999996",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[640,"RUA","VILA FRIA","-8019,92329999991","-8019,92329999991",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[641,"CALCADA","VILA FRIA","-8198,9452","-8198,9452",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[642,"SOUTO","IDAES","-11598,9868999999","-11598,9868999999",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[643,"GALO","S.JORGE VIZ.","-9755,65139999982","-9755,65139999982",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[644,"VAGAO","S.JORGE VIZ.","-9622,95399999991","-9622,95399999991",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[645,"FROIA","PENACOVA","-9392,22530000022","-9392,22530000022",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[646,"VILARINHO","PENACOVA","-9681,98220000046","-9681,98220000046",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[647,"SOUTO","REVINHADE","-11907,0936000003","-11907,0936000003",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[648,"CASANOVA","REVINHADE","-11616,4819999998","-11616,4819999998",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[649,"PENIDO","TORRADOS","-8942,99430000035","-8942,99430000035",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[650,"BASTO","TORRADOS","-9169,05740000033","-9169,05740000033",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[651,"CALVARIO","TORRADOS","-9571,98039999977","-9571,98039999977",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[652,"BOUCA","TORRADOS","-8393,9189999998","-8393,9189999998",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[653,"DEVESA GRANDE","TORRADOS","-8590,36099999963","-8590,36099999963",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[654,"BOCA","TORRADOS","-9320,30680000041","-9320,30680000041",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[655,"SAO DOMINGOS","SOUSA","-9539,88980000018","-9539,88980000018",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[656,"PENA GRANDE","TORRADOS","-9248,3519000001","-9248,3519000001",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[657,"FONTE","AIAO","-5488,29140000043","-5488,29140000043",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[658,"QUINTA BAIXO","BORBA GODIM","-411,696899999872","-411,696899999872",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[659,"BALAZAR","BORBA GODIM","-729,125300000376","-729,125300000376",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[660,"DEVESA ALTA","CARAMOS","-3120,54959999957","-3120,54959999957",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[661,"PENAS","CARAMOS","-3660,07760000047","-3660,07760000047",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[662,"LAMAS DO CONDE","CARAMOS","-2897,01960000021","-2897,01960000021",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[663,"CIMO VILA","CARAMOS","-2333,88219999987","-2333,88219999987",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[664,"ST.ANDRE","FRIANDE","-4076,06780000036","-4076,06780000036",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[665,"PRAIA","FRIANDE","-3268,96889999981","-3268,96889999981",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[666,"ESTRADINHA","FRIANDE","-4694,62669999985","-4694,62669999985",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[667,"TRAVASSOS","JUGUEIROS","-6463,08399999984","-6463,08399999984",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[668,"BOAVISTA","MACIEIRA","-1419,4216999998","-1419,4216999998",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[669,"PROTELICOVA","MACIEIRA","-1478,62880000007","-1478,62880000007",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[670,"MARCO SIMAES","MOURE","-2237,37810000035","-2237,37810000035",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[671,"PORTAL","MOURE","-3264,98240000014","-3264,98240000014",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[672,"MOINHOS","MOURE","-3904,64479999989","-3904,64479999989",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[673,"LAMEIRA","PINHEIRO","-1631,27250000002","-1631,27250000002",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[674,"POEIRA","PINHEIRO","-1687,76350000039","-1687,76350000039",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[675,"PACO","PINHEIRO","-2426,38080000034","-2426,38080000034",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[676,"LAMPACA","PINHEIRO","-1893,91029999959","-1893,91029999959",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[677,"RANHO","REFONTOURA","-5836,51960000026","-5836,51960000026",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[678,"ALVURA","REGILDE","-11395,8879000005","-11395,8879000005",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[679,"CRUZEIRO","REGILDE","-11177,8452000003","-11177,8452000003",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[680,"PRESINHAS","SANTAO","-3127,44479999976","-3127,44479999976",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[681,"FLARIZ","SANTAO","-3577,5629000003","-3577,5629000003",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[682,"REGANHUCA","SANTAO","-4258,18140000015","-4258,18140000015",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[683,"LEVADAS","SENDIM","-3828,50389999989","-3828,50389999989",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[684,"CALVARIO1","SENDIM","-3809,54800000038","-3809,54800000038",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[685,"CASAL1","SENDIM","-5301,38200000011","-5301,38200000011",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[686,"FONTE VELHA","UNHAO","-8784,92200000023","-8784,92200000023",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[687,"EIRADO","VARZIELA","-6508,59910000028","-6508,59910000028",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[688,"ESCALHEIRA","VILA COVA","-2102,29439999999","-2102,29439999999",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[689,"QUINTELA","VILA COVA","-2192,85560000041","-2192,85560000041",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[690,"SANTO","VILA COVA","-1679,24299999985","-1679,24299999985",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[691,"TANQUE VELHO","VILA COVA","-1117,93819999978","-1117,93819999978",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[692,"IGREJA","VILA COVA","-1275,4552999996","-1275,4552999996",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[693,"SEIXIDRO","VILA COVA","-1734,84750000021","-1734,84750000021",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[694,"CARVALHO","SERNANDE","-7935,92729999964","-7935,92729999964",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]
[695,"BURGO","SERNANDE","-8574,74820000032","-8574,74820000032",115,"PUB",2,"3","4",2,1,null,"T",2,"1","FLG.TQ.T.695",1,"LAVADOURO",null,"2014-06-01",1.000,"2","ESI","ESI","ESI","ESI",5,5,5,5,2,2,2,2,3,3,3,3,5,"ESI",2,3]