{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"OBJECTID","type":"number","width":9,"decimals":0},{"name":"ID_R_FGC","type":"number","width":4,"decimals":0},{"name":"ID_S_FGC","type":"character","width":12},{"name":"DATA_ACCAO","type":"date","width":8},{"name":"COD_INE","type":"character","width":6},{"name":"DESC_FGC","type":"number","width":4,"decimals":0},{"name":"DESC_NOME","type":"character","width":254},{"name":"TIPO_FGC","type":"character","width":3},{"name":"OBJEC_FUNC","type":"number","width":4,"decimals":0},{"name":"sigprod_SD","type":"number","width":19,"decimals":11},{"name":"BUFFER","type":"number","width":9,"decimals":0},{"name":"RESP_GC","type":"character","width":75},{"name":"OCUP_SOLO","type":"character","width":254},{"name":"INTER_2013","type":"character","width":3},{"name":"EXEC_2013","type":"number","width":4,"decimals":0},{"name":"FIN_2013","type":"number","width":4,"decimals":0},{"name":"FASE_2013","type":"number","width":4,"decimals":0},{"name":"INTER_2014","type":"character","width":3},{"name":"EXEC_2014","type":"number","width":4,"decimals":0},{"name":"FIN_2014","type":"number","width":4,"decimals":0},{"name":"FASE_2014","type":"number","width":4,"decimals":0},{"name":"INTER_2015","type":"character","width":3},{"name":"EXEC_2015","type":"number","width":4,"decimals":0},{"name":"FIN_2015","type":"number","width":4,"decimals":0},{"name":"FASE_2015","type":"number","width":4,"decimals":0},{"name":"INTER_2016","type":"character","width":3},{"name":"EXEC_2016","type":"number","width":4,"decimals":0},{"name":"FIN_2016","type":"number","width":4,"decimals":0},{"name":"FASE_2016","type":"number","width":4,"decimals":0},{"name":"INTER_2017","type":"character","width":3},{"name":"EXEC_2017","type":"number","width":4,"decimals":0},{"name":"FIN_2017","type":"number","width":4,"decimals":0},{"name":"FASE_2017","type":"number","width":4,"decimals":0},{"name":"OBSERV","type":"character","width":254},{"name":"PERIG","type":"number","width":9,"decimals":0},{"name":"Shape_Leng","type":"number","width":19,"decimals":11},{"name":"ANO_INT","type":"number","width":4,"decimals":0},{"name":"Shape_Le_1","type":"number","width":19,"decimals":11},{"name":"Shape_Area","type":"number","width":19,"decimals":11}],"n_rows":3250,"rows_kept":3250,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[1,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"Faixa nº 1 - 2009",0,225.50385046000,2014,225.50385046600,1727.79333434000]
[2,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,986.94317494000,0,986.94317494200,9372.13458613000]
[3,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,106.55359187000,0,106.55359187800,672.36294587300]
[4,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,161.98060727000,0,161.98060727900,919.01234794400]
[5,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,237.35775467000,0,237.35775467100,1343.54601369000]
[6,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,259.54285569000,0,259.54285569500,1989.66990167000]
[7,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,390.05826059000,0,390.05826059100,3081.73153043000]
[8,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,395.13918684000,0,395.13918684400,3507.56758699000]
[9,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,446.63287653000,0,446.63287653300,3796.22155836000]
[10,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,506.64702408000,0,506.64702408000,4612.81179376000]
[11,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"Faixa nº 1 - 2009",0,2484.83192032000,2014,2484.83192032000,24373.67356050000]
[12,1,null,{"$raw":"00000000"},"141918",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2783.30305719000,0,2783.30305719000,27376.89420240000]
[13,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,72.74531239000,0,72.74531239740,250.11544010100]
[14,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,79.80025132000,0,79.80025132230,332.34933035100]
[15,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,124.47504383000,0,124.47504383000,586.83569936800]
[16,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,112.67625914000,0,112.67625914200,746.81453686300]
[17,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,135.24571497000,0,135.24571497900,777.04313459200]
[18,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,149.23814581000,0,149.23814581400,964.15647279800]
[19,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,168.38859146000,0,168.38859146600,1082.38784730000]
[20,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,193.93068607000,0,193.93068607400,1174.29093557000]
[21,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,255.73430277000,0,255.73430277900,1211.88852292000]
[22,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,179.71211555000,0,179.71211555400,1271.87924946000]
[23,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,284.85884001000,0,284.85884001100,1417.69289431000]
[24,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,189.92626181000,0,189.92626181100,1446.42829560000]
[25,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,229.92775954000,0,229.92775954000,1692.32074733000]
[26,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,224.87561394000,0,224.87561394900,1715.56601712000]
[27,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,249.51744217000,0,249.51744217300,1727.50006402000]
[28,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,440.22295891000,0,440.22295891700,1743.47512203000]
[29,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,244.99633054000,0,244.99633054100,1972.02927386000]
[30,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,252.39487896000,0,252.39487896800,2039.46176919000]
[31,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,248.75767746000,0,248.75767746600,2078.74553101000]
[32,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,311.46270701000,0,311.46270701700,2141.66830163000]
[33,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,331.08635477000,0,331.08635477700,2152.49971097000]
[34,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,311.11644731000,0,311.11644731500,2266.99470860000]
[35,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,340.11747330000,0,340.11747330100,2474.21344358000]
[36,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,293.29874240000,0,293.29874240800,2547.51707933000]
[37,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,355.68882242000,0,355.68882242500,2700.18509067000]
[38,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,343.48472098000,0,343.48472098300,3045.49859261000]
[39,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,373.82736159000,0,373.82736159400,3131.42501483000]
[40,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,367.19766005000,0,367.19766005500,3213.90850283000]
[41,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,395.39054857000,0,395.39054857000,3254.77287682000]
[42,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,399.70269505000,0,399.70269505600,3329.28438004000]
[43,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,381.54789135000,0,381.54789135800,3341.94202116000]
[44,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,385.23852125000,0,385.23852125300,3363.14444265000]
[45,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,395.64769277000,0,395.64769277000,3564.84521124000]
[46,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,411.08070887000,0,411.08070887300,3693.00846889000]
[47,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,428.33438008000,0,428.33438008700,3868.85685678000]
[48,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,475.59396862000,0,475.59396862200,4319.61522805000]
[49,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,659.78609141000,0,654.37226586400,4514.37339726000]
[50,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"Faixa nº 3 - 2012",0,505.81982810000,2016,505.81982810900,4658.15985413000]
[51,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,572.51822045000,0,572.51822045200,4844.50041519000]
[52,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,617.28176279000,0,617.28176279900,5719.43766012000]
[53,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"Faixa nº 3 - 2012",0,637.97743533000,2016,637.97743533400,5930.01300830000]
[54,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,706.18505433000,0,706.18505433400,6540.45824305000]
[55,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,804.16870291000,0,804.16870291700,7572.77553354000]
[56,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,834.03467795000,0,834.03467795900,7779.41610140000]
[57,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,853.64903489000,0,853.64903489000,7901.00414532000]
[58,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,941.93609042000,0,941.93609042700,8963.87775080000]
[59,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"Faixa nº 4 - 2012",0,1026.21193894000,2016,1026.21193894000,9866.36674718000]
[60,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1215.71204214000,0,1215.71204214000,11648.79220040000]
[61,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1272.71301404000,0,1272.71301404000,11955.61051300000]
[62,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1462.89385794000,0,1462.89385794000,14018.69218630000]
[63,1,null,{"$raw":"00000000"},"141904",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1527.71341434000,0,1527.71341434000,14816.02758710000]
[64,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,45.25876419000,0,45.25876419340,108.61892279100]
[65,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,123.09690204000,0,123.09690204400,796.01377993700]
[66,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,null,0,184.06018811000,2017,184.06018811700,876.51621354800]
[68,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,140.21569390000,0,140.21569390500,1017.49261208000]
[69,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,266.98620863000,0,266.98620863200,1135.20172123000]
[70,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,172.03145924000,0,172.03145924700,1216.88864986000]
[71,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,224.66776434000,0,224.66776434300,1716.75598589000]
[72,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,222.48034181000,0,222.48034181700,1773.84088517000]
[73,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,null,0,1071.22933081000,2017,1076.85214552000,10312.36956160000]
[74,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,227.72685197000,0,227.72685197800,1822.65553218000]
[75,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,271.70755311000,0,271.70755311900,2261.19748543000]
[76,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,364.97914875000,0,364.97914875700,3231.72086622000]
[77,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,462.25317230000,0,462.25317230700,3915.80628506000]
[78,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,538.61235826000,0,538.61235826400,4864.15659418000]
[79,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,589.74868580000,0,589.74868580500,5252.15261167000]
[80,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,579.38201403000,0,579.38201403400,5342.63552597000]
[81,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"Faixa nº 5 - 2012",0,617.10653626000,2016,617.10653626700,5587.16654729000]
[82,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,727.29728479000,0,727.29728479200,6764.82938426000]
[83,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,866.05374071000,0,866.05374071800,8259.38619145000]
[85,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1569.83634474000,0,1569.83634474000,13601.87528870000]
[86,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1765.17899737000,0,1765.17899737000,17115.37725890000]
[87,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2135.81684974000,0,2135.81684974000,20833.82743770000]
[88,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2166.91870279000,0,2166.91870279000,21282.28140710000]
[89,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1219.42349582000,0,1219.42349582000,11630.44991710000]
[90,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,78.43350344000,0,78.43350344430,385.58796553200]
[91,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,91.06649020000,0,91.06649020700,404.79031520600]
[92,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,154.09691824000,0,154.09691824300,444.15579898900]
[93,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,124.21177151000,0,124.21177151800,554.82741804700]
[633,17,null,{"$raw":"00000000"},"141909",2,"Buffer - A-do-Freire","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,296.88901097000,0,296.88901097600,1784.58807182000]
[634,17,null,{"$raw":"00000000"},"141909",2,"Buffer - A-do-Freire","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,383.16189749000,0,383.16189749100,6045.02315630000]
[635,17,null,{"$raw":"00000000"},"141909",2,"Buffer - A-do-Freire","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,620.44522349000,0,620.44522349800,6745.26537462000]
[636,17,null,{"$raw":"00000000"},"141909",2,"Buffer - A-do-Freire","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,658.46680022000,0,798.24414038400,18407.02162520000]
[641,18,null,{"$raw":"00000000"},"141909",2,"Buffer - Aglomerado","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,227.45657241000,0,227.45657241900,2004.14476258000]
[642,18,null,{"$raw":"00000000"},"141909",2,"Buffer - Aglomerado","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,528.04291878000,0,528.04291878100,7340.87431269000]
[643,18,null,{"$raw":"00000000"},"141909",2,"Buffer - Aglomerado","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1552.70513281000,0,1552.70513281000,58060.16658680000]
[644,18,null,{"$raw":"00000000"},"141921",2,"Buffer - Aglomerado","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,404.01866861000,0,404.01866861200,4201.94665466000]
[645,18,null,{"$raw":"00000000"},"141921",2,"Buffer - Aglomerado","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1239.55900672000,0,1239.55900672000,40046.21290280000]
[1561,118,null,{"$raw":"00000000"},"141920",2,"Buffer - Pintainhos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,2613.42733377000,0,2611.65429262000,93558.92985200000]
[1562,119,null,{"$raw":"00000000"},"141919",2,"Buffer - Pousos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2216.45557422000,0,2216.45557422000,94605.04672119999]
[559,7,null,{"$raw":"00000000"},"141919",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,231.99079483000,0,231.99079483700,1023.03567260000]
[560,7,null,{"$raw":"00000000"},"141919",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,362.73622414000,0,362.73622414700,1680.29156021000]
[561,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,32.49453796000,0,32.49453796620,50.62260946180]
[562,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,41.59996427000,0,41.59996427410,101.91525151700]
[563,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,118.38810370000,0,118.38810370600,484.07282484400]
[182,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1000.57683934000,0,1000.57683934000,20036.12126960000]
[183,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1283.59496168000,0,1283.59496168000,25280.06837260000]
[184,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"Está limpo - 2010",0,1307.22420140000,2015,1307.22420140000,26584.06136060000]
[185,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MAT (FGC) - em parte sem nada",0,1504.16438887000,2014,1504.16438887000,30188.98348060000]
[186,2,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,39.85512235000,0,39.85512235570,54.45344958440]
[187,2,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,36.56951620000,0,36.56951620580,61.44921293990]
[188,2,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,168.51551693000,0,168.51551693200,766.04719665100]
[1821,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2264.92782236000,0,2264.92782236000,75558.59355260000]
[1822,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2245.06013557000,0,2245.06013557000,96649.00699400000]
[1823,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,297.32912023000,0,297.32912023900,4112.29366652000]
[1047,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,592.55373414000,0,174.78160608600,864.21905103400]
[0,312,null,{"$raw":"00000000"},"141909",14,"Limpeza de linhas de água em zonas urbanas","FRC",2,0.00000000000,0,"CMTN","Vegetação ripícola","SSS",5,2,1,"CDE",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,3,0.00000000000,2014,640.05000685600,3613.32559203000]
[0,312,null,{"$raw":"00000000"},"141916",14,"Limpeza de linhas de água em zonas urbanas","FRC",2,0.00000000000,0,"CMTN","Vegetação ripícola","SSS",5,2,1,"CDE",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,3,0.00000000000,2014,577.35531932900,2795.05380807000]
[0,312,null,{"$raw":"00000000"},"141920",14,"Limpeza de linhas de água em zonas urbanas","FRC",2,0.00000000000,0,"CMTN","Vegetação ripícola","SSS",5,2,1,"CDE",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,3,0.00000000000,2014,4069.10282878000,50979.12987460000]
[0,312,null,{"$raw":"00000000"},"141921",14,"Limpeza de linhas de água em zonas urbanas","FRC",2,0.00000000000,0,"CMTN","Vegetação ripícola","SSS",5,2,1,"CDE",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,3,0.00000000000,2014,3431.94177813000,48777.48593090000]
[0,311,null,{"$raw":"00000000"},"141904",14,"Acções a desenvolver pelos Sapadores Florestais - ICNF","FRC",2,0.00000000000,0,"Sapadores Florestais 05-16C",null,"SSS",2,5,1,"CDO",2,5,1,"SSS",2,5,1,"SSS",2,5,1,"SSS",2,5,1,"Baldio",0,0.00000000000,2014,1780.35200975000,130146.55081600000]
[0,311,null,{"$raw":"00000000"},"141909",11,"Mosaico de Gestão de Combustível","FRC",2,0.00000000000,0,"Sapadores Florestais 05-16C ICNF (2013);","Vegetação diversa","CDO",2,5,1,"SSS",2,5,1,"SSS",2,5,1,"SSS",2,5,1,"SSS",2,5,2,null,4,0.00000000000,2013,3708.17290414000,572767.06443499995]
[3398,258,null,{"$raw":"00000000"},"141909",11,"Mosaico de Gestão de Combustível (Pinheiro Bravo (com Eucaliptos))","FRC",2,0.00000000000,0,"Junta de Freguesia de Pedrógão","Pinheiro Bravo (com Eucalipto)","SSS",7,4,2,"GSI",7,4,2,"GSI",7,4,2,"GSI",7,4,2,"GSI",7,4,2,"A partir de 2014 - Rebanho de caprinos em regime extensivo - Projecto LIFE Natureza+ \u0093Conservação de habitats naturais e semi-naturais nas Serras de Aire e Candeeiros\u0094",4,3161.15863149000,9999,1473.11147451000,77422.01060420000]
[3436,307,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 1","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,446.34537006000,0,593.61930723700,2861.30632047000]
[94,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,108.31099152000,0,108.31099152400,638.32006280900]
[95,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,165.54093209000,0,165.54093209900,759.84251849500]
[96,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,140.49323839000,0,140.49323839800,826.82468474300]
[97,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,141.22565862000,0,141.22565862800,865.71277900800]
[98,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,233.44334443000,0,233.44334443700,1717.01280233000]
[99,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,313.30414965000,0,313.30414965700,2089.05065416000]
[100,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,258.71169369000,0,258.71169369000,2111.48328971000]
[101,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,296.76533897000,0,296.76533897000,2562.79481577000]
[102,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,396.86662091000,0,396.86662091100,3490.72028442000]
[103,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,420.61242222000,0,420.61242222400,3603.37236020000]
[104,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,414.68696231000,0,414.68696231600,3719.47993519000]
[105,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,818.99434502000,0,818.99434502900,7676.87244704000]
[106,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,818.17502560000,2015,818.17502560700,7685.75782339000]
[107,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,897.22378836000,0,897.22378836100,8440.83612072000]
[108,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,961.13351629000,0,961.13351629200,8635.88307247000]
[109,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,978.31504641000,0,978.31504641300,9245.97817518000]
[110,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1026.68446177000,0,1026.68446177000,9868.93436221000]
[111,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"Faixa nº 2 - 2012",0,1384.62592896000,2015,1384.62592896000,13405.70731490000]
[112,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"Faixa nº 1 - 2012",0,1426.80423792000,2015,1426.80423792000,13737.67253570000]
[113,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1802.32221495000,0,1802.32221495000,17571.59076190000]
[114,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1913.15833389000,0,1913.15833389000,18733.55908890000]
[115,1,null,{"$raw":"00000000"},"141909",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2055.78033645000,0,2055.78033645000,20076.06958100000]
[116,1,null,{"$raw":"00000000"},"141910",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,993.70487940000,0,993.70487940200,8488.48909023000]
[117,1,null,{"$raw":"00000000"},"141910",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1383.92555374000,0,1383.92555374000,13152.42917700000]
[118,1,null,{"$raw":"00000000"},"141910",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2820.56258336000,0,2820.56258336000,27774.12966840000]
[119,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,45.32728599000,0,45.32728599290,112.93148664400]
[120,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,131.98078375000,0,131.98078375400,307.70906475600]
[121,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,137.60203996000,0,137.60203996900,711.09578846900]
[122,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,184.41093010000,0,184.41093010500,883.49849174300]
[123,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,140.09408204000,0,140.09408204200,947.60245074400]
[124,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,195.03169091000,0,195.03169091400,1519.56606092000]
[125,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,301.21880616000,0,301.21880616100,2623.87771144000]
[126,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,380.67126677000,0,380.67126677200,3229.05228747000]
[127,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,538.98850164000,0,538.98850164500,4928.98342617000]
[128,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,761.55275435000,0,761.55275435600,6217.71895825000]
[129,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2759.45473030000,0,2759.45473030000,26955.65491950000]
[130,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,67.99491243000,0,67.99491243590,258.85749946800]
[131,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,72.66855287000,0,72.66855287560,349.60069499300]
[132,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,397.86710866000,0,397.86710866100,1674.70996846000]
[133,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,516.17563600000,0,516.17563600600,4743.35468864000]
[134,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,709.16727336000,0,709.16727336900,6625.23310453000]
[135,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,870.14557705000,0,870.14557705100,6646.37723848000]
[136,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,848.44978265000,0,848.44978265400,8081.47855622000]
[137,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,887.78626330000,0,887.78626330500,8488.53759696000]
[138,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1190.80092816000,0,1190.80092816000,11493.43230970000]
[139,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2710.74484486000,0,2710.74484486000,26750.72873130000]
[140,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3088.06175526000,0,3088.06175526000,30480.77791470000]
[141,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,178.28825771000,0,178.28825771400,849.33817293100]
[142,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,375.44363359000,0,375.44363359300,2841.27760810000]
[143,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,544.88064628000,0,544.88064628200,4691.99819747000]
[144,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,687.72682118000,0,687.72682118800,6311.22531848000]
[145,1,null,{"$raw":"00000000"},"141920",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1267.97931779000,0,1267.97931779000,12108.04930950000]
[146,1,null,{"$raw":"00000000"},"141921",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,147.30268557000,0,147.30268557300,812.91569128000]
[147,1,null,{"$raw":"00000000"},"141921",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,331.02168760000,0,331.02168760300,2873.30823456000]
[148,1,null,{"$raw":"00000000"},"141921",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,735.71153279000,0,735.71153279100,6659.12944180000]
[149,1,null,{"$raw":"00000000"},"141916",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,105.20546796000,0,105.20546796900,632.35669283400]
[150,1,null,{"$raw":"00000000"},"141916",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,167.76299452000,0,167.76299452900,1262.53726758000]
[151,1,null,{"$raw":"00000000"},"141916",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,268.51544031000,0,268.51544031000,2217.50050861000]
[152,1,null,{"$raw":"00000000"},"141916",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,375.63835780000,0,375.63835780900,3329.73590641000]
[153,1,null,{"$raw":"00000000"},"141916",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,820.80467916000,0,820.80467916500,7223.16175483000]
[154,1,null,{"$raw":"00000000"},"141916",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1405.17582316000,0,1405.17582316000,12045.84075830000]
[155,1,null,{"$raw":"00000000"},"141916",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1521.85437154000,0,1521.85437154000,14798.01325530000]
[156,1,null,{"$raw":"00000000"},"141916",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1853.10091570000,0,1853.10091570000,18138.17054850000]
[157,1,null,{"$raw":"00000000"},"141916",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2132.47789442000,0,2132.47789442000,20900.74631220000]
[158,1,null,{"$raw":"00000000"},"141916",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2367.51613367000,0,2367.51613367000,23206.38812330000]
[159,1,null,{"$raw":"00000000"},"141917",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,115.16545907000,0,115.16545907300,556.70161886700]
[160,1,null,{"$raw":"00000000"},"141917",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,140.82120624000,0,140.82120624000,661.87344225400]
[161,1,null,{"$raw":"00000000"},"141917",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,203.59926959000,0,203.59926959300,1341.49228764000]
[162,1,null,{"$raw":"00000000"},"141917",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,201.87962942000,0,201.87962942400,1602.31081351000]
[163,1,null,{"$raw":"00000000"},"141917",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,560.94378594000,0,560.94378594100,3806.93255826000]
[164,1,null,{"$raw":"00000000"},"141917",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,487.78874736000,0,487.78874736500,4409.18253622000]
[165,1,null,{"$raw":"00000000"},"141917",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,536.47605610000,0,536.47605610100,4872.25789294000]
[166,1,null,{"$raw":"00000000"},"Fora",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,40.90767062000,0,40.90767062970,96.19511877300]
[167,1,null,{"$raw":"00000000"},"Fora",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,60.95301338000,0,60.95301338590,168.68180074600]
[169,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,280.81021218000,0,459.50922939700,7335.53551155000]
[170,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,318.81243501000,0,318.81243501200,2829.40379956000]
[171,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,408.91934928000,0,408.91934928400,6517.50724643000]
[172,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,854.54939577000,0,854.54939577200,16198.73985520000]
[173,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1145.02415013000,2014,503.63128681400,7763.66483908000]
[174,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,77.08136360000,0,77.08136360780,76.22503167710]
[176,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,108.88253933000,0,108.88253933800,590.22581539500]
[177,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,184.73932944000,2014,326.43200405000,3873.99420973000]
[179,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,254.09095314000,0,254.09095314600,2385.26111367000]
[180,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,227.49237547000,0,227.49237547700,2607.22864458000]
[181,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,308.44199495000,0,308.44199495900,4390.33424727000]
[189,2,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,204.13389454000,0,204.13389454100,2410.84088795000]
[190,2,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MAT (FGC)",0,306.02866769000,2014,306.02866769100,3021.77396933000]
[191,2,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,271.79687168000,0,271.79687168600,4026.41474387000]
[192,2,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,578.24583249000,0,578.24583249400,10754.74661020000]
[193,2,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MAT (FGC)",0,785.79092329000,2014,785.79092329800,14670.05989850000]
[194,2,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MAT (FGC)",0,1336.71496599000,2014,1336.71496599000,27288.34002780000]
[195,2,null,{"$raw":"00000000"},"141910",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,135.36423900000,0,135.36423900200,907.78376095100]
[196,2,null,{"$raw":"00000000"},"141910",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,149.89847817000,0,149.89847817400,912.04296341000]
[197,2,null,{"$raw":"00000000"},"141910",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,231.28178554000,0,231.28178554600,2313.95132439000]
[198,2,null,{"$raw":"00000000"},"141910",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,595.80289085000,2015,595.80289085300,10681.05216900000]
[199,2,null,{"$raw":"00000000"},"141910",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1422.07607860000,0,1422.07607860000,29087.64624090000]
[200,2,null,{"$raw":"00000000"},"141910",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2361.44677799000,0,2361.44677799000,46347.44224590000]
[201,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,227.12279558000,0,227.12279558100,1035.51458174000]
[202,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,217.28962667000,0,217.28962667800,1664.12387143000]
[203,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,261.83070045000,0,261.83070045500,1699.82558479000]
[204,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,233.24002034000,0,233.24002034600,1916.69964701000]
[205,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,268.57376874000,0,268.57376874900,3976.95939926000]
[206,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,398.67768261000,0,398.67768261100,4944.96770194000]
[207,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,336.53036461000,0,336.53036461200,5235.36024668000]
[208,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,636.92887810000,0,636.92887810300,9822.02441868000]
[209,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,931.62013039000,0,931.62013039800,14839.99168520000]
[210,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,994.53072479000,0,994.53072479600,16446.73228070000]
[211,2,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1155.24352369000,0,1155.24352369000,22091.90857920000]
[212,2,null,{"$raw":"00000000"},"141917",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,147.31520975000,2015,147.31520975600,966.43057848000]
[213,2,null,{"$raw":"00000000"},"141917",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,257.85356316000,0,257.85356316900,1397.77848338000]
[214,2,null,{"$raw":"00000000"},"141917",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,324.93341033000,0,324.93341033900,2556.73995580000]
[215,2,null,{"$raw":"00000000"},"141917",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,643.39247620000,0,643.39247620600,7334.45942388000]
[216,2,null,{"$raw":"00000000"},"141917",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MAT (FGC)",0,771.17751840000,2015,771.17751840100,13150.37716040000]
[217,2,null,{"$raw":"00000000"},"141917",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,999.12249187000,0,999.12249187700,14007.15133880000]
[218,2,null,{"$raw":"00000000"},"141917",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1118.01386686000,0,1118.01386686000,19175.28536270000]
[219,2,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,186.30131692000,0,186.30131692700,22.14752254280]
[220,2,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,34.56983239000,0,34.56983239990,49.59835320010]
[221,2,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,155.63750261000,0,155.63750261600,1100.85364108000]
[222,2,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,227.50937354000,0,227.50937354600,1330.78862673000]
[223,2,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,207.02046506000,0,207.02046506500,1390.69648156000]
[224,2,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,415.22596072000,0,415.22596072200,2617.34421172000]
[225,2,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,333.98823998000,0,333.98823998800,4357.59339953000]
[226,2,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,431.65850808000,0,431.65850808800,5220.73314814000]
[227,2,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MAT (FGC)",0,673.80726093000,2014,673.80726093900,11527.41770300000]
[228,2,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,186.30131692000,0,186.30131692700,22.14752254280]
[229,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,32.12932686000,0,32.12932686480,52.04993463680]
[230,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,426.79442461000,0,426.79442461400,3980.17282452000]
[231,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,544.87885289000,0,544.87885289000,8698.81827396000]
[232,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,812.64007183000,0,812.64007183900,13000.47096250000]
[233,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,137.82074470000,0,137.82074470200,1106.17961461000]
[234,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,219.20274470000,0,219.20274470500,2430.41694285000]
[235,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,241.72935691000,0,241.72935691500,2719.77185608000]
[236,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,433.14137898000,0,433.14137898200,7472.75945029000]
[237,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,487.28184571000,0,487.28184571600,8056.11211538000]
[238,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,684.32021784000,0,684.32021784200,12215.17942520000]
[239,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"Faixa - 2009",0,2187.75948404000,2014,2187.75948404000,46011.89003470000]
[240,3,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3120.57412161000,0,3120.57412161000,64267.25186670000]
[241,3,null,{"$raw":"00000000"},"141910",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1496.10589734000,0,1496.10589734000,30756.72120100000]
[242,3,null,{"$raw":"00000000"},"141910",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2085.94596987000,0,2085.94596987000,43303.38116810000]
[243,3,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,186.30131692000,0,186.30131692700,22.14752254280]
[244,3,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,186.30131692000,0,186.30131692700,22.14752254280]
[245,3,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,169.56550022000,0,169.56550022100,941.97131748600]
[246,3,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4031) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,349.31206017000,0,349.31206017200,5263.26541852000]
[247,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,84.03478875000,0,84.03478875720,305.52618624900]
[248,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,102.80769009000,0,102.80769009400,404.07466278000]
[249,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,130.41850361000,0,130.41850361800,716.69466153500]
[250,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,210.10652328000,0,210.10652328500,873.40594815300]
[251,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,140.00042339000,0,140.00042339900,1138.04676880000]
[252,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,155.46780928000,0,155.46780928700,1379.03366683000]
[253,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,164.58414982000,0,164.58414982900,1446.22124316000]
[254,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,214.58895205000,0,214.58895205200,1648.52006745000]
[255,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,168.52593911000,0,168.52593911500,1713.01525807000]
[256,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,183.70680993000,0,183.70680993400,1769.90725792000]
[257,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,283.77925617000,0,283.77925617700,1791.24239600000]
[258,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,168.54847976000,0,168.54847976300,1895.72681530000]
[259,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,182.41547498000,0,182.41547498200,1954.50647850000]
[260,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,311.32029783000,0,311.32029783000,2030.05580483000]
[261,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,196.57754777000,0,196.57754777200,2307.26929346000]
[262,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,226.31465749000,0,226.31465749300,2699.95730161000]
[263,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,221.90611400000,0,221.90611400300,2721.11082363000]
[264,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,303.95529049000,0,303.95529049700,2779.20399615000]
[265,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,240.24150249000,0,240.24150249700,3005.39776911000]
[266,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,284.83764431000,0,284.83764431100,3326.10822235000]
[267,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,270.78910447000,0,270.78910447300,3457.49812227000]
[268,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,288.63939625000,0,288.63939625700,4046.95628444000]
[269,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,295.61709561000,0,295.61709561500,4147.85614519000]
[270,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,490.53434272000,0,490.53434272000,4240.90506264000]
[271,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,null,0,328.22649026000,2017,328.22649026600,4752.88922794000]
[272,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,372.25385720000,0,372.25385720200,5073.46510138000]
[273,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,385.53448349000,0,385.53448349100,5689.54406290000]
[274,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,357.62762803000,0,357.62762803000,5979.03162423000]
[275,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,437.04545245000,0,437.04545245400,6536.49390751000]
[276,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,423.16139482000,0,423.16139482100,7286.08419298000]
[277,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,520.89649856000,0,520.89649856600,8055.82713028000]
[278,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,614.97814226000,0,614.97814226200,8645.90512025000]
[279,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,545.99056818000,0,545.99056818900,8837.86361970000]
[280,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"MAT (FGC)",0,553.61632923000,2017,553.61632923200,9192.68596474000]
[281,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,516.26261627000,0,516.26261627700,9256.13447153000]
[282,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,null,0,814.39296410000,2017,814.39296410800,10076.92138520000]
[283,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,null,0,633.80261121000,2017,633.80261121700,11241.51588850000]
[284,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,null,0,707.99791982000,2017,707.99791982500,11652.27058490000]
[285,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,826.47408233000,0,826.47408233500,14497.62738840000]
[286,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,941.05024127000,0,941.05024127000,18512.64648310000]
[287,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1012.35231679000,0,1012.35231679000,18620.92804140000]
[288,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1212.30972691000,0,1212.30972691000,19978.64923320000]
[289,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1508.36299346000,0,1508.36299346000,29102.14550150000]
[290,4,null,{"$raw":"00000000"},"141904",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,null,0,1896.20928118000,2017,1896.20928118000,32508.14051610000]
[291,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,139.01665520000,0,139.01665520600,462.72925923700]
[292,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,169.19254163000,0,169.19254163000,826.92915322300]
[293,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,190.59989515000,0,190.59989515000,906.60843948300]
[294,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,152.75769481000,0,152.75769481800,985.87082326600]
[295,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,181.28827279000,0,181.28827279800,999.30066361100]
[296,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,231.38838548000,0,231.38838548500,1451.53555868000]
[297,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,178.36946852000,0,178.36946852000,1806.72094764000]
[298,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,242.76651801000,0,242.76651801500,2694.47576146000]
[299,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,282.32895769000,0,282.32895769600,2754.56978014000]
[300,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,252.63033462000,0,252.63033462600,2859.32085166000]
[301,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,259.13939784000,0,259.13939784900,3354.16397482000]
[302,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,344.46778372000,0,344.46778372100,3922.96580700000]
[303,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,301.58335702000,0,301.58335702600,4658.74139621000]
[304,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,358.11209209000,0,358.11209209700,5727.52127066000]
[305,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,411.64054040000,0,411.64054040000,6683.54254602000]
[306,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,637.40375834000,0,637.40375834100,7615.73429529000]
[307,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,575.67058974000,0,575.67058974800,9615.11176783000]
[308,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,564.58745583000,0,564.58745583800,9813.48122085000]
[309,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,612.53956079000,0,612.53956079700,10798.17289050000]
[310,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,783.82227936000,0,783.82227936900,13361.63753260000]
[311,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,763.18612026000,0,763.18612026700,14942.78608220000]
[312,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1220.63213548000,0,1220.63213548000,20004.99187680000]
[313,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"MAT (FGC)",0,1061.64700209000,2017,1061.64700209000,20156.53130540000]
[314,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"MAT (FGC)",0,1217.73093220000,2017,1217.73093220000,23206.09584010000]
[315,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"MAT (FGC)",0,1469.48575419000,2017,1469.48575419000,29446.16578970000]
[316,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1996.24740752000,0,1996.24740752000,41533.99424160000]
[317,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,252.03335005000,0,252.03335005600,3303.34718005000]
[318,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,352.58614862000,0,352.58614862700,5380.83734617000]
[319,4,null,{"$raw":"00000000"},"141919",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,646.36455309000,0,646.36455309200,12164.75650050000]
[320,4,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,90.61082297000,0,90.61082297840,89.59374038240]
[321,4,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,387.58193826000,0,387.58193826700,5555.69626930000]
[322,4,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"MAT (FGC)",0,794.82245229000,2017,794.82245229600,14867.22049370000]
[323,4,null,{"$raw":"00000000"},"141920",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,931.94239678000,0,931.94239678400,18148.71237810000]
[324,4,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,144.37408556000,0,144.37408556100,1191.64091768000]
[325,4,null,{"$raw":"00000000"},"Fora",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 4052) - 400kV","FRC",2,0.00000000000,22,"REN",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,503.31966145000,0,503.31966145500,2809.20351266000]
[326,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,148.53416994000,0,148.53416994500,796.27809471800]
[327,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,306.38436652000,0,306.38436652300,1903.53734486000]
[328,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,522.96227085000,0,522.96227085600,3168.57799850000]
[329,5,null,{"$raw":"00000000"},"141904",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,393.64880540000,0,393.64880540100,2449.79874876000]
[330,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,146.01361438000,0,146.01361438300,714.66460462200]
[331,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,450.47646596000,0,450.47646596400,2956.95883339000]
[332,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,849.65124430000,0,849.65124430800,5588.52407356000]
[333,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,858.27103550000,0,858.27103550600,5711.49645533000]
[334,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,885.02777511000,0,885.02777511200,5888.21786749000]
[335,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,962.41157338000,0,962.41157338500,6459.17278131000]
[336,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1132.76500000000,0,1132.76500000000,7726.18592484000]
[337,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2017.27862095000,0,2017.27862095000,13884.34685780000]
[338,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,143.35601482000,0,143.35601482200,623.75984238800]
[339,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,222.83648034000,0,222.83648034100,670.77957460200]
[340,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,127.52466605000,0,127.52466605300,692.13817757400]
[341,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,208.91108760000,0,208.91108760400,779.93440704300]
[342,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,152.39962502000,0,152.39962502500,798.65938731000]
[343,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,209.58930365000,0,209.58930365700,931.99005994700]
[344,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,217.12104651000,0,217.12104651700,1311.13177991000]
[345,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,403.40938371000,0,403.40938371200,2627.01710292000]
[346,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,459.42866499000,0,459.42866499200,2970.47608127000]
[347,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1315.09061056000,0,1315.09061056000,9003.94132926000]
[348,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1398.07076685000,0,1398.07076685000,9067.02626079000]
[349,5,null,{"$raw":"00000000"},"141919",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5167.81710518000,0,5167.81710518000,35641.79135270000]
[350,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,261.29226872000,0,261.29226872400,1607.51710125000]
[351,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,265.44595897000,0,265.44595897500,1672.15717666000]
[352,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,599.61638359000,0,599.61638359800,1713.67689766000]
[353,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,286.60460104000,0,286.60460104900,1786.48590384000]
[354,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,294.09335594000,0,294.09335594700,1885.42988589000]
[355,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,540.75059497000,0,540.75059497800,2958.99629862000]
[356,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,757.67884699000,0,757.67884699300,4780.78094352000]
[357,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,789.57152513000,0,789.57152513800,5317.98650437000]
[358,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1170.47498392000,0,1170.47498392000,7984.05271010000]
[359,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1299.56255872000,0,1299.56255872000,8883.77979870000]
[360,5,null,{"$raw":"00000000"},"141918",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3097.09025871000,0,3097.09025871000,21063.98275330000]
[361,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,55.31137272000,0,55.31137272520,148.96395286400]
[362,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,68.54214175000,0,68.54214175630,200.58034295200]
[363,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,72.24106986000,0,72.24106986890,271.78862946100]
[364,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,70.93285494000,0,70.93285494340,289.88712078900]
[365,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,92.45821509000,0,92.45821509450,434.00229294800]
[366,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,101.11534015000,0,101.11534015400,468.47409585800]
[367,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,97.64161281000,0,97.64161281910,474.31781198000]
[368,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,106.17187940000,0,106.17187940100,549.91919779400]
[369,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,108.03838142000,0,108.03838142900,573.43889256400]
[370,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,180.95954290000,0,180.95954290800,641.46315568100]
[371,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,333.79069957000,0,333.79069957500,649.72518988300]
[372,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,122.04243903000,0,122.04243903100,650.24742768300]
[373,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,136.53863699000,0,136.53863699500,672.91030241700]
[374,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,172.78753280000,0,172.78753280900,758.05880284500]
[375,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,182.28777116000,0,182.28777116900,852.49308998600]
[376,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,155.66922139000,0,155.66922139300,889.89286988300]
[377,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,198.61075129000,0,198.61075129000,1111.81168352000]
[378,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,263.16194597000,0,263.16194597000,1140.72281104000]
[379,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,197.25308781000,0,197.25308781000,1167.00188541000]
[380,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,225.61131991000,0,153.20212012800,709.60299704200]
[381,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,251.93235063000,0,251.93235063100,1218.00592941000]
[382,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,210.83499337000,0,210.83499337500,1242.24545634000]
[383,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,243.48871719000,0,243.48871719400,1256.41100543000]
[384,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,408.80226916000,0,408.80226916200,1266.75842625000]
[385,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,221.23040817000,0,221.23040817000,1323.26747795000]
[386,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,228.51650141000,0,228.51650141500,1401.39953608000]
[387,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,252.39441633000,0,252.39441633200,1440.92191230000]
[388,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,247.86661174000,0,247.86661174900,1531.68472940000]
[389,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,369.64569554000,0,369.64569554300,1582.40419801000]
[390,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,261.48600417000,0,261.48600417200,1637.09042364000]
[391,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,451.78921554000,0,451.78921554200,1698.66288137000]
[392,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,316.37370027000,0,316.37370027100,1801.00709183000]
[393,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,319.24796594000,0,319.24796594800,1806.48588384000]
[394,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,323.15165365000,0,323.15165365100,2006.44486244000]
[395,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,341.69018276000,0,341.69018276700,2086.35593879000]
[396,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,564.84316118000,0,564.84316118500,2106.49011325000]
[397,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,346.92059302000,0,268.73077829100,1580.07814061000]
[398,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,347.43109115000,0,347.43109115100,2230.01663458000]
[399,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,381.34419369000,0,381.34419369300,2442.68158289000]
[400,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,387.36489748000,0,376.29604934100,2398.99241727000]
[401,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,380.57153982000,0,380.57153982700,2459.72356177000]
[402,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,419.68013266000,0,419.68013266500,2500.70608845000]
[403,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,391.54052118000,0,391.54052118700,2532.03059780000]
[404,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,409.57257951000,0,409.57257951500,2610.23774383000]
[405,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,530.30274435000,0,530.30274435200,2701.23288808000]
[406,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,459.41350680000,0,459.41350680400,2864.56017728000]
[407,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,613.24602733000,0,613.24602733500,2901.39067011000]
[408,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,487.88828442000,2015,487.88828442500,3117.83822861000]
[409,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,720.59349563000,0,720.59349563400,3174.82010286000]
[410,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,530.68241312000,0,530.68241312300,3315.89604502000]
[411,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,563.86112947000,0,563.86112947000,3553.12427113000]
[412,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,632.53191478000,0,632.53191478800,4094.61715408000]
[534,6,null,{"$raw":"00000000"},"141909",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,509.40551966000,9999,509.40551966600,899.15630152000]
[535,6,null,{"$raw":"00000000"},"141909",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1555.72793485000,0,1555.72793485000,7301.43103855000]
[536,6,null,{"$raw":"00000000"},"141909",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1971.50884442000,0,1971.50884442000,8538.71832883000]
[537,6,null,{"$raw":"00000000"},"141916",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,136.50080328000,0,136.50080328700,578.80717698000]
[538,6,null,{"$raw":"00000000"},"141916",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,183.77021575000,0,183.77021575100,793.63034999300]
[539,6,null,{"$raw":"00000000"},"141916",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,249.90593882000,0,249.90593882700,1141.68163356000]
[540,6,null,{"$raw":"00000000"},"141916",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,277.80391906000,0,277.80391906100,1879.21857937000]
[541,6,null,{"$raw":"00000000"},"141916",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,476.18755287000,0,476.18755287500,2276.92129773000]
[542,6,null,{"$raw":"00000000"},"141916",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,619.57219135000,0,619.57219135800,2991.97933443000]
[543,6,null,{"$raw":"00000000"},"141916",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,672.52422868000,0,672.52422868700,3227.05456503000]
[544,6,null,{"$raw":"00000000"},"141916",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,670.35748161000,0,670.35748161900,3243.71908706000]
[545,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,45.10416917000,0,45.10416917690,94.30962808820]
[546,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,378.34744125000,0,378.34744125000,1765.77849610000]
[547,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,621.82689568000,0,621.82689568000,2930.92524751000]
[997,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,210.09520091000,9999,210.09520091000,2059.71111987000]
[998,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,202.84346319000,9999,202.84346319700,2196.28069969000]
[999,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,578.05613860000,9999,578.05613860600,5719.88758808000]
[1000,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,492.10106272000,9999,492.10106272400,5905.26205474000]
[1001,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,394.55808858000,0,394.55808858600,5951.30422928000]
[1002,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,407.96843699000,0,407.96843699500,6602.29961547000]
[1003,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,702.74850504000,0,702.74850504200,8593.22167028000]
[1004,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,574.15791570000,0,574.15791570400,10212.62455610000]
[1005,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,521.67167750000,0,521.67167750400,12914.15088510000]
[1006,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,884.10392854000,9999,884.10392854900,17170.20743720000]
[1007,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1714.09653876000,0,1714.09653876000,31179.68463540000]
[1008,67,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Pinhal","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1691.52224566000,0,1690.31948049000,61307.77497740000]
[1009,67,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Pinhal","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,36.28473613000,0,36.28473613910,65.79756547920]
[1010,67,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Pinhal","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,530.53417992000,0,530.53417992500,12736.95712670000]
[1317,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,172.23150695000,9999,172.23150695100,1715.00745381000]
[1318,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,180.30619528000,0,180.30619528400,1745.30994737000]
[1319,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,327.06646301000,9999,327.06646301600,1822.11190107000]
[1320,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,218.29170172000,9999,218.29170172500,1832.14674724000]
[1321,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,221.57014028000,0,221.57014028900,2201.66364153000]
[1322,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,409.93595193000,9999,409.93595193500,2345.65595924000]
[1323,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,303.20575995000,9999,303.20575995300,2665.70174030000]
[1324,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,306.95788160000,0,306.95788160500,2970.65544437000]
[1325,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,279.76558234000,9999,279.76558234000,3053.08999745000]
[1326,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,232.61373237000,9999,232.61373237100,3450.98539744000]
[1327,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,336.01018934000,0,336.01018934200,4198.45963182000]
[1328,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,313.17852658000,0,313.17852658400,4236.09153273000]
[1329,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,455.28968506000,0,455.28968506100,6007.77230735000]
[1330,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,611.67467250000,9999,611.67467250200,6238.40567932000]
[1718,133,null,{"$raw":"00000000"},"141917",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2249.17057322000,0,2249.17057322000,65360.14596070000]
[1719,134,null,{"$raw":"00000000"},"141919",2,"Buffer - Sentieiras (?)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,80.77109112000,0,80.77109112550,296.63223127900]
[1720,134,null,{"$raw":"00000000"},"141919",2,"Buffer - Sentieiras (?)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,269.29472685000,0,269.29472685900,3104.42697645000]
[1721,134,null,{"$raw":"00000000"},"141919",2,"Buffer - Sentieiras (?)","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,414.02034069000,9999,414.02034069200,4179.25241928000]
[1722,134,null,{"$raw":"00000000"},"141919",2,"Buffer - Sentieiras (?)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,621.50013782000,0,621.50013782300,8382.16979761000]
[1723,134,null,{"$raw":"00000000"},"141919",2,"Buffer - Sentieiras (?)","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,504.50184153000,9999,504.50184153400,10074.31754920000]
[1724,134,null,{"$raw":"00000000"},"141919",2,"Buffer - Sentieiras (?)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,626.99545855000,0,626.99545855700,12895.85574340000]
[1725,134,null,{"$raw":"00000000"},"141919",2,"Buffer - Sentieiras (?)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1625.92730846000,0,1625.92730846000,34778.92654900000]
[1726,135,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,125.93072783000,0,125.93072783200,570.77731593200]
[1727,135,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,263.63362826000,0,263.63362826700,2056.18715395000]
[1728,135,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,449.40388372000,0,449.40388372200,6669.03105132000]
[1729,135,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,438.80727072000,0,438.80727072600,7973.70992430000]
[1730,135,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1060.69734559000,0,1060.69734559000,39855.65611880000]
[1731,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,158.40261122000,0,158.40261122200,1198.77628498000]
[1833,142,null,{"$raw":"00000000"},"141920",2,"Buffer - Vale Carvão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,98.62267245000,0,98.62267245840,653.42921905300]
[1834,142,null,{"$raw":"00000000"},"141920",2,"Buffer - Vale Carvão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,185.22545415000,0,185.22545415000,1873.68304448000]
[1835,142,null,{"$raw":"00000000"},"141920",2,"Buffer - Vale Carvão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,321.48434143000,0,321.48434143400,4131.11271429000]
[1837,142,null,{"$raw":"00000000"},"141920",2,"Buffer - Vale Carvão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1735.16985075000,0,1735.16985075000,74396.32385550000]
[1838,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,63.35567050000,9999,63.35567050280,234.83086778800]
[1839,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,91.45450599000,9999,91.45450599520,340.17066872500]
[1840,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,96.79350202000,0,96.79350202490,348.47632156100]
[1841,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,104.22657966000,9999,104.22657966000,372.58028523300]
[1842,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,87.93103548000,0,87.93103548890,380.61298603800]
[1843,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,117.42084950000,9999,117.42084950300,458.05175742600]
[1844,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,111.55202786000,9999,111.55202786500,611.91637888100]
[1845,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,156.54383102000,9999,156.54383102000,639.40573180200]
[1846,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,189.70571644000,9999,189.70571644400,883.46342866500]
[2148,175,null,{"$raw":"00000000"},"141920",4,"CM 1158","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,901.84854576000,0,901.84854576300,4384.42684057000]
[2149,175,null,{"$raw":"00000000"},"141920",4,"CM 1158","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1316.14271026000,0,1316.14271026000,6457.72052844000]
[2150,176,null,{"$raw":"00000000"},"141921",4,"CM 1159","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,426.13294753000,0,426.13294753100,1988.60951802000]
[2151,176,null,{"$raw":"00000000"},"141921",4,"CM 1159","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2382.94946027000,0,2382.94946027000,11316.76064060000]
[2152,176,null,{"$raw":"00000000"},"141921",4,"CM 1159","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2318.48547689000,0,2318.48547689000,11483.92707430000]
[2153,177,null,{"$raw":"00000000"},"141920",4,"CM 1160","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1452.80212150000,0,1452.80212150000,7163.13408026000]
[2154,177,null,{"$raw":"00000000"},"141920",4,"CM 1160","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1710.85240805000,0,1710.85240805000,8454.54794634000]
[2155,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,629.90146339000,0,629.90146339100,356.81175939100]
[2156,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,123.84254926000,0,123.84254926000,508.77217224500]
[2157,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,213.20758439000,0,213.20758439600,703.39777253900]
[2158,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,166.69086540000,9999,166.69086540400,726.43898104100]
[2159,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,206.65986832000,0,206.65986832400,913.01498744300]
[2160,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,213.67326874000,0,213.67326874200,956.22399524700]
[2161,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,828.34323465000,0,828.34323465300,1462.42854000000]
[2162,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,389.81421585000,0,389.81421585000,1855.81622414000]
[2163,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,411.46363682000,9999,411.46363682400,1942.87929027000]
[2164,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,485.59312455000,9999,485.59312455200,2276.06838907000]
[2252,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,456.39549168000,0,456.39549168900,2033.88454458000]
[2253,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,552.16858161000,0,552.16858161800,2662.59664846000]
[2254,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,611.86687256000,0,611.86687256000,2946.57239596000]
[2255,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2989.25928114000,0,2989.25928114000,14798.46254280000]
[2256,186,null,{"$raw":"00000000"},"141920",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,104.52540561000,0,104.52540561700,46.10032764870]
[2257,186,null,{"$raw":"00000000"},"141920",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2507.63116621000,0,2507.63116621000,12397.23448570000]
[2258,187,null,{"$raw":"00000000"},"141918",4,"CM 1172","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,115.04958682000,9999,115.04958682100,470.12108594200]
[2259,187,null,{"$raw":"00000000"},"141918",4,"CM 1172","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,173.34616272000,9999,173.34616272300,688.10461101900]
[2260,187,null,{"$raw":"00000000"},"141918",4,"CM 1172","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,175.71110212000,9999,175.71110212400,730.57758350000]
[2261,187,null,{"$raw":"00000000"},"141918",4,"CM 1172","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,793.68400159000,0,793.68400159000,3749.70459033000]
[2262,187,null,{"$raw":"00000000"},"141918",4,"CM 1172","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1080.65863489000,0,1080.65863489000,5223.16025793000]
[2263,187,null,{"$raw":"00000000"},"141918",4,"CM 1172","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1142.02618590000,0,1142.02618590000,5465.68228291000]
[2264,187,null,{"$raw":"00000000"},"141918",4,"CM 1172","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1549.95771633000,0,1549.95771633000,7577.11699145000]
[2265,187,null,{"$raw":"00000000"},"141918",4,"CM 1172","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1957.87235825000,0,1957.87235825000,9668.07401416000]
[2266,188,null,{"$raw":"00000000"},"141918",4,"CM 1173","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,104.65301052000,0,104.65301052500,413.99129635900]
[2267,188,null,{"$raw":"00000000"},"141918",4,"CM 1173","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,162.03068694000,9999,162.03068694100,534.33056716300]
[2268,188,null,{"$raw":"00000000"},"141918",4,"CM 1173","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,203.95571474000,0,203.95571474100,751.09172352800]
[413,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,760.08270605000,0,760.08270605500,4872.00453083000]
[414,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,759.22533440000,0,759.22533440500,4904.03954781000]
[415,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1093.90828630000,0,1093.90828630000,6265.04557459000]
[416,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,993.23177072000,0,993.23177072800,6773.55527271000]
[417,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1230.55867408000,0,1077.75293871000,7410.15716333000]
[418,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1543.22285311000,0,1543.22285311000,10599.76239830000]
[419,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1938.52347121000,2015,1938.52347121000,13358.14528470000]
[420,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2433.08559879000,0,2433.08559879000,16588.55533330000]
[421,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2488.25400414000,0,2488.25400414000,16982.42845430000]
[422,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5531.53763171000,0,5531.53763171000,38061.58384460000]
[423,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,7088.86188878000,0,7088.86188878000,48784.88789880000]
[424,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,29.08833485000,0,29.08833485830,39.41017302210]
[425,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,74.84461748000,0,74.84461748250,297.69432539400]
[426,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,144.13212057000,0,144.13212057300,514.02983183400]
[427,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,116.35124318000,0,116.35124318200,580.88205731900]
[428,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,153.59914538000,0,153.59914538700,722.56268756800]
[429,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,195.98667222000,0,195.98667222200,1094.21254839000]
[430,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,203.14153163000,0,203.14153163700,1120.66160044000]
[431,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,230.41364901000,0,230.41364901000,1124.75551440000]
[432,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,366.40067464000,0,366.40067464900,1203.76728964000]
[433,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,228.95031062000,0,228.95031062400,1257.38039858000]
[434,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,277.15883029000,0,277.15883029700,1693.47224294000]
[435,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,423.26595320000,0,423.26595320500,1773.35780222000]
[436,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,341.89812480000,0,341.89812480500,2007.94353417000]
[437,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,356.50613893000,0,356.50613893000,2108.14300792000]
[438,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,401.02684195000,0,401.02684195300,2597.90349932000]
[439,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,477.08529007000,0,477.08529007300,3135.76446703000]
[440,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,642.29699949000,0,642.29699949400,4126.12939634000]
[441,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,835.32238784000,0,835.32238784600,5484.58604525000]
[442,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,879.91671911000,0,879.91671911300,5880.55810011000]
[443,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1525.34882356000,0,1525.34882356000,6698.14125431000]
[444,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1075.28720540000,0,1075.28720540000,7251.99952805000]
[445,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1076.79925601000,0,1076.79925601000,7320.42183049000]
[446,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1507.50496235000,0,1507.50496235000,10091.05511220000]
[447,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1616.78861012000,0,1616.78861012000,11015.63848320000]
[448,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1957.45433592000,0,1957.45433592000,13358.19390330000]
[449,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2091.47731713000,0,2091.47731713000,14442.45748810000]
[450,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3334.23256391000,0,3334.23256391000,22984.23228540000]
[451,5,null,{"$raw":"00000000"},"141910",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,4628.04354050000,0,4628.04354050000,31273.78480680000]
[452,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,47.51277477000,0,47.51277477250,34.76719255150]
[453,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,587.55799176000,0,587.55799176700,3890.01504680000]
[454,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1244.69197504000,0,1244.69197504000,8429.80649392000]
[455,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,114.44144856000,0,114.44144856000,235.75775993500]
[456,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,77.16591325000,0,77.16591325680,346.80108167500]
[457,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,116.49767120000,0,116.49767120000,531.30940155900]
[458,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,160.27324213000,0,160.27324213800,839.83146968600]
[459,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,561.24559088000,0,561.24559088700,3754.80356697000]
[460,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,631.04269651000,0,631.04269651000,4213.33845405000]
[461,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,811.56474688000,0,811.56474688100,5423.59120846000]
[462,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,175.52769568000,0,175.52769568000,910.04406083300]
[463,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,262.62715026000,0,262.62715026300,1318.30135662000]
[464,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,352.15872356000,0,352.15872356700,1862.49223738000]
[465,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,410.80617162000,0,410.80617162200,2111.10502240000]
[466,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,401.74360747000,0,401.74360747100,2507.32572161000]
[467,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1416.01234143000,0,1416.01234143000,9552.93470365000]
[468,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1405.57089032000,0,1405.57089032000,9601.49545260000]
[469,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3104.68236626000,0,3104.68236626000,21255.81940120000]
[470,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,109.91948415000,0,109.91948415800,528.75949156700]
[471,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,187.93244972000,0,187.93244972900,897.77636304800]
[472,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,862.96379605000,0,862.96379605700,5383.50145126000]
[473,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,974.53169508000,0,974.53169508600,6560.55045537000]
[474,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1020.79070507000,0,1020.79070507000,6922.35102347000]
[475,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1139.38521767000,0,1139.38521767000,7771.19022466000]
[476,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1214.38641410000,2014,1214.38641410000,8295.42548849000]
[477,5,null,{"$raw":"00000000"},"141920",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1872.34523869000,0,1872.34523869000,12897.88456880000]
[478,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,220.74505247000,0,180.70843603000,1038.19162399000]
[479,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,365.06954207000,0,365.06954207900,2352.71017946000]
[480,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2542.79494199000,0,2542.79494199000,17594.59599940000]
[481,5,null,{"$raw":"00000000"},"141921",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,4661.38190390000,0,4661.38190390000,32216.18047550000]
[482,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,94.97291286000,0,94.97291286500,477.29195810400]
[483,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,125.22351487000,0,125.22351487200,644.45035994000]
[484,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,221.36916966000,0,221.36916966000,1352.73960107000]
[485,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,391.58366335000,0,391.58366335100,2358.49701808000]
[486,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,423.68069053000,0,423.68069053200,2636.39623378000]
[487,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,411.68318276000,0,411.68318276000,2671.78857867000]
[488,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,639.91263423000,0,639.91263423300,4060.23418342000]
[489,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,990.21293435000,0,990.21293435300,6479.69541490000]
[490,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1188.51520641000,0,1188.51520641000,7707.83497836000]
[491,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1615.84756133000,0,1615.84756133000,10623.91802590000]
[492,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3111.92376276000,0,3111.92376276000,21171.43583010000]
[493,5,null,{"$raw":"00000000"},"141916",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3694.89090675000,0,3694.89090675000,25331.37222750000]
[494,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,75.88947018000,0,75.88947018930,317.85319576900]
[495,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,89.86602501000,0,89.86602501780,424.65235574400]
[496,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,106.86197830000,0,106.86197830400,553.26800105300]
[497,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,134.07792287000,0,134.07792287100,560.22759724200]
[498,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,149.82391238000,0,149.82391238800,577.62512411500]
[499,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,124.91970261000,0,124.91970261700,666.23985622700]
[500,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,191.17234777000,0,191.17234777100,724.41775203500]
[501,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,150.47718596000,0,150.47718596300,738.10615065300]
[502,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,201.32163550000,0,201.32163550300,1126.25084107000]
[503,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,289.27693163000,0,289.27693163200,1387.01974907000]
[504,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,286.84003491000,0,286.84003491900,1789.99347092000]
[505,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,337.39347055000,0,337.39347055900,1797.48212311000]
[506,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,363.19471373000,0,363.19471373000,2135.05713953000]
[507,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,362.08329231000,0,362.08329231700,2236.81107985000]
[508,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,395.06681018000,0,395.06681018900,2395.30534683000]
[509,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,396.64047872000,0,396.64047872100,2573.95195297000]
[510,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,464.38938354000,0,464.38938354000,2988.30680196000]
[511,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,500.39799331000,0,500.39799331300,3273.97861684000]
[512,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,610.45757444000,0,610.45757444100,4038.33876812000]
[513,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,628.90247460000,0,628.90247460200,4209.16499337000]
[514,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,728.71111608000,0,728.71111608200,4281.43613136000]
[515,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,654.02329812000,0,654.02329812900,4347.11465665000]
[516,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,695.60185190000,2014,695.60185190400,4603.84061959000]
[517,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,742.66261863000,0,742.66261863400,4977.69029200000]
[518,5,null,{"$raw":"00000000"},"141917",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1289.58325659000,0,1289.58325659000,8762.81529148000]
[519,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,28.91570371000,0,28.91570371350,23.79652081540]
[520,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,25.88376442000,0,25.88376442580,31.07566838510]
[521,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,38.99506999000,0,38.99506999020,53.44819510500]
[522,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,115.79868389000,0,115.79868389400,80.76049111010]
[523,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,52.44503547000,0,52.44503547710,95.93478885250]
[524,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,93.38809604000,0,93.38809604710,183.51916329500]
[525,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,63.25754139000,0,63.25754139690,246.44477371400]
[526,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,147.38341641000,0,147.38341641200,333.07281837600]
[527,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,93.55744063000,0,93.55744063880,439.43760314300]
[528,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,215.61592993000,0,215.61592993800,1248.54833093000]
[529,5,null,{"$raw":"00000000"},"Fora",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,314.83359973000,2015,314.83359973100,1909.59215077000]
[530,6,null,{"$raw":"00000000"},"141918",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,59.06675729000,0,59.06675729140,125.17094849500]
[531,6,null,{"$raw":"00000000"},"141918",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,238.92249602000,0,238.92249602700,755.30543767500]
[532,6,null,{"$raw":"00000000"},"141918",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,273.96926786000,0,273.96926786200,1184.31055967000]
[533,6,null,{"$raw":"00000000"},"141918",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,496.16647590000,0,496.16647590100,2363.88126864000]
[550,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,876.37120747000,0,876.37120747500,3916.75947844000]
[551,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1025.81300534000,0,1025.81300534000,4594.00956168000]
[553,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1871.75779814000,0,1871.75779814000,9210.12323798000]
[554,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3114.33618947000,0,3114.33618947000,15446.61334150000]
[555,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,4365.59871026000,0,4365.59871026000,21687.46384430000]
[556,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,7176.22280449000,0,7176.22280449000,35627.15908550000]
[557,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,7373.13865539000,0,7373.13865539000,36586.05592040000]
[558,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,7610.33791162000,0,7610.33791162000,37933.67027610000]
[564,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,159.63015218000,0,159.63015218900,699.39334998000]
[565,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1214.00251037000,0,1214.00251037000,5882.30814558000]
[566,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1313.21874289000,0,1313.21874289000,6457.61676924000]
[567,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,397.85683781000,9999,397.85683781400,1108.46643695000]
[568,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,302.65822821000,0,302.65822821500,1372.99307389000]
[569,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,390.95919420000,0,390.95919420800,1845.19400612000]
[570,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,739.62201018000,0,739.62201018500,3134.56496091000]
[571,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,717.58529238000,0,717.58529238900,3380.32380530000]
[572,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1151.36299582000,0,1151.36299582000,4514.66214494000]
[573,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1071.77159716000,0,1071.77159716000,4611.59060307000]
[574,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,981.93079572000,0,981.93079572800,4783.84706967000]
[575,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1015.92899585000,0,1015.92899585000,4982.61981546000]
[576,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1186.88270702000,0,1186.88270702000,5303.41240923000]
[577,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1260.06530688000,0,1260.06530688000,6200.09038488000]
[578,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1493.63251082000,0,1493.63251082000,7102.93739134000]
[579,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1843.32549543000,0,1843.32549543000,9109.98929406000]
[580,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1882.77414413000,0,1882.77414413000,9311.85148558000]
[581,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2698.47983495000,0,2698.47983495000,13372.47486780000]
[582,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2804.22903797000,0,2804.22903797000,13919.96678760000]
[583,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3101.43520839000,0,3101.43520839000,15403.22886520000]
[584,7,null,{"$raw":"00000000"},"141920",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3142.14956834000,0,3142.14956834000,15603.42288890000]
[585,7,null,{"$raw":"00000000"},"141916",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,419.17650120000,0,419.17650120700,1853.99665504000]
[586,7,null,{"$raw":"00000000"},"141916",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,470.50872962000,0,470.50872962800,2214.23039469000]
[587,7,null,{"$raw":"00000000"},"141916",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,521.25932043000,0,521.25932043700,2535.65509628000]
[589,7,null,{"$raw":"00000000"},"141916",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,865.97976330000,0,865.97976330300,4216.67524750000]
[590,7,null,{"$raw":"00000000"},"141916",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,879.32026619000,0,879.32026619000,4247.90832317000]
[591,7,null,{"$raw":"00000000"},"141916",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1438.88660386000,0,1438.88660386000,6816.04741379000]
[592,7,null,{"$raw":"00000000"},"141916",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2132.82863605000,0,2132.82863605000,10555.61562050000]
[593,7,null,{"$raw":"00000000"},"141916",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3152.70858031000,0,3152.70858031000,15589.85233990000]
[594,7,null,{"$raw":"00000000"},"141916",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3284.60048245000,0,3284.60048245000,16221.95970870000]
[595,7,null,{"$raw":"00000000"},"141917",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1109.36751473000,0,1109.36751473000,5431.87180181000]
[596,7,null,{"$raw":"00000000"},"141917",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1182.17386379000,0,1182.17386379000,5797.14561304000]
[597,7,null,{"$raw":"00000000"},"141917",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1739.47803499000,0,1739.47803499000,8589.47074989000]
[598,7,null,{"$raw":"00000000"},"141917",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1825.17033788000,0,1825.17033788000,9019.00004827000]
[599,7,null,{"$raw":"00000000"},"Fora",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,27.97488391000,0,27.97488391510,22.45217929070]
[600,7,null,{"$raw":"00000000"},"Fora",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,76.85170714000,0,76.85170714460,268.88702973700]
[601,7,null,{"$raw":"00000000"},"Fora",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1411.13908996000,0,1411.13908996000,6946.54449241000]
[602,7,null,{"$raw":"00000000"},"Fora",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5062.99261692000,0,5062.99261692000,25183.21614040000]
[603,7,null,{"$raw":"00000000"},"Fora",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5199.74949688000,0,5199.74949688000,25866.55230630000]
[604,8,null,{"$raw":"00000000"},"141920",1,"Agro-Pecuaria Quinta da Rainha, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,403.14551129000,0,403.14551129100,5203.23396444000]
[606,9,null,{"$raw":"00000000"},"141904",1,"Almondina - Móveis","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,202.52645935000,0,202.52645935300,1319.73281895000]
[607,9,null,{"$raw":"00000000"},"141904",1,"Almondina - Móveis","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,175.76105330000,9999,175.76105330100,2109.95472576000]
[609,10,null,{"$raw":"00000000"},"141920",1,"António José Mendes Faria - Unipessoal, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,170.27106734000,0,170.27106734800,822.16183793500]
[612,12,null,{"$raw":"00000000"},"141920",1,"Antonio Pinto Gomes, Lda","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,261.35500190000,9999,261.35500190900,1594.72745866000]
[614,13,null,{"$raw":"00000000"},"141919",1,"Artelonga - Artefactos de Betão e Materiais de Construção, Lda.","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,129.25168383000,0,129.25168383300,544.50726332600]
[615,13,null,{"$raw":"00000000"},"141919",1,"Artelonga - Artefactos de Betão e Materiais de Construção, Lda.","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,168.27265319000,9999,168.27265319100,781.50231922200]
[616,13,null,{"$raw":"00000000"},"141919",1,"Artelonga - Artefactos de Betão e Materiais de Construção, Lda.","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,423.34889153000,0,423.34889153600,7641.39689227000]
[617,13,null,{"$raw":"00000000"},"141919",1,"Artelonga - Artefactos de Betão e Materiais de Construção, Lda.","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,562.19264900000,0,562.19264900600,9598.84929087000]
[618,14,null,{"$raw":"00000000"},"141916",1,"Auto Camião Videla","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,231.93228590000,0,231.93228590200,1874.35172449000]
[620,15,null,{"$raw":"00000000"},"141918",1,"Aviária de Sta. Cita - Qta. do Bispo","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,81.57627994000,0,81.57627994050,373.17325289000]
[621,15,null,{"$raw":"00000000"},"141918",1,"Aviária de Sta. Cita - Qta. do Bispo","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,156.41235868000,0,156.41235868600,593.99794771400]
[622,15,null,{"$raw":"00000000"},"141918",1,"Aviária de Sta. Cita - Qta. do Bispo","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,102.69107533000,0,102.69107533200,594.15360358400]
[623,15,null,{"$raw":"00000000"},"141918",1,"Aviária de Sta. Cita - Qta. do Bispo","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,1251.45398142000,9999,1251.45398142000,17240.25586080000]
[624,15,null,{"$raw":"00000000"},"141918",1,"Aviária de Sta. Cita - Qta. do Bispo","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2611.73663864000,0,2611.73663864000,42492.70106280000]
[625,16,null,{"$raw":"00000000"},"141909",1,"Aviário","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,129.53771772000,0,129.53771772800,832.88657883700]
[626,16,null,{"$raw":"00000000"},"141909",1,"Aviário","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,150.73074373000,9999,150.73074373300,1188.97883485000]
[627,16,null,{"$raw":"00000000"},"141909",1,"Aviário","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,510.36750900000,0,510.36750900000,2586.42727131000]
[628,16,null,{"$raw":"00000000"},"141909",1,"Aviário","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,651.76185219000,9999,651.76185219400,12714.71689100000]
[631,17,null,{"$raw":"00000000"},"141909",2,"Buffer - A-do-Freire","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,120.66550096000,0,479.23162995700,4737.13021330000]
[638,17,null,{"$raw":"00000000"},"141909",2,"Buffer - A-do-Freire","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1156.89372850000,0,1294.61977882000,44117.35754410000]
[639,17,null,{"$raw":"00000000"},"141909",2,"Buffer - A-do-Freire","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1502.97903937000,0,1536.34908873000,61924.48462850000]
[640,18,null,{"$raw":"00000000"},"141909",2,"Buffer - Aglomerado","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,199.85286651000,0,199.85286651300,341.65711376300]
[646,19,null,{"$raw":"00000000"},"141918",2,"Buffer - Alcorochel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,201.86730580000,0,201.86730580900,1204.54259638000]
[647,19,null,{"$raw":"00000000"},"141918",2,"Buffer - Alcorochel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,289.59398899000,0,289.59398899100,2277.43933650000]
[648,19,null,{"$raw":"00000000"},"141918",2,"Buffer - Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1297.00379460000,0,1297.00379460000,45256.28332460000]
[649,19,null,{"$raw":"00000000"},"141918",2,"Buffer - Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1436.55057663000,0,1436.55057663000,46507.77808820000]
[650,19,null,{"$raw":"00000000"},"141918",2,"Buffer - Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2438.53914510000,0,2438.53914510000,104388.90342200000]
[651,19,null,{"$raw":"00000000"},"141918",2,"Buffer - Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,5053.52912458000,0,5033.30399122000,197723.90805299999]
[652,19,null,{"$raw":"00000000"},"141918",2,"Buffer - Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,5239.80427560000,0,5207.10176489000,227862.96715300001]
[653,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,117.32258530000,9999,117.32258530500,519.51159996800]
[654,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,101.62030714000,9999,101.62030714700,643.35113000800]
[655,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,141.94525801000,9999,141.94525801000,1020.42071433000]
[656,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,122.96943870000,9999,122.96943870300,1034.10804823000]
[657,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,322.53029476000,0,322.53029476300,1233.19725330000]
[658,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,172.69514298000,9999,172.69514298800,1809.23434611000]
[659,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,254.32919628000,0,254.32919628100,2404.30726481000]
[660,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,299.77306741000,9999,299.77306741400,2829.75204788000]
[661,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,299.44375994000,0,299.44375994000,2867.46275795000]
[662,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,496.48725509000,9999,496.48725509000,5434.73938158000]
[663,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,677.74423320000,9999,677.74423320000,6046.76271697000]
[664,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,361.08651122000,9999,361.08651122800,6526.31147752000]
[665,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,754.26215679000,9999,754.26215679700,9887.61647858000]
[666,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1592.84652885000,0,1592.84652885000,52664.19872520000]
[667,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,3053.29036981000,0,3053.26375753000,109368.94649600000]
[669,21,null,{"$raw":"00000000"},"141909",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,63.26975655000,0,63.26975655070,230.90032862000]
[670,21,null,{"$raw":"00000000"},"141916",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,88.64409106000,0,88.64409106410,317.37665708700]
[671,21,null,{"$raw":"00000000"},"141916",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,107.48559868000,9999,107.48559868700,732.73244149300]
[672,21,null,{"$raw":"00000000"},"141916",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,178.21926682000,0,178.21926682500,1235.53074072000]
[673,21,null,{"$raw":"00000000"},"141916",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,318.58924314000,0,318.58924314500,4540.67788080000]
[674,21,null,{"$raw":"00000000"},"141916",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,399.36223455000,0,399.36223455900,4890.69405235000]
[675,21,null,{"$raw":"00000000"},"141916",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,463.28561376000,9999,463.28561376100,5107.55183651000]
[676,21,null,{"$raw":"00000000"},"141916",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,576.68646802000,0,576.68646802300,18444.71770670000]
[677,21,null,{"$raw":"00000000"},"141916",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1000.30101484000,0,1000.30101484000,30850.87012700000]
[678,21,null,{"$raw":"00000000"},"141916",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1977.24285040000,0,1977.24285040000,68796.28935870000]
[679,21,null,{"$raw":"00000000"},"141916",2,"Buffer - Almonda","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2173.79288831000,0,2173.79288831000,86717.76990860001]
[680,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,79.13667867000,9999,79.13667867930,413.49002507400]
[681,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,97.83042718000,0,97.83042718040,475.00704778600]
[682,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,116.23456132000,9999,116.23456132200,591.43432622900]
[683,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,126.53667849000,9999,126.53667849000,697.02122885000]
[684,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,108.77257143000,9999,108.77257143500,697.46532927600]
[685,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,231.29149538000,9999,231.29149538000,1007.15577624000]
[686,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,176.36111732000,0,176.36111732200,1330.97422907000]
[687,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,276.43577487000,0,276.43577487800,1824.58255219000]
[688,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,230.11930703000,9999,230.11930703500,1902.31595361000]
[689,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,176.60161030000,9999,176.60161030700,2031.07452831000]
[690,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,226.57661016000,9999,226.57661016500,2528.74682282000]
[691,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,302.33002244000,9999,302.33002244300,3209.69769815000]
[692,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,355.14087535000,0,233.13841485900,2135.97956709000]
[693,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,352.59069951000,0,352.59069951500,4860.69180712000]
[694,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,408.02696806000,0,408.02696806900,5532.38551047000]
[695,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,363.72896422000,9999,363.72896422600,6133.96655756000]
[696,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,476.08730013000,0,476.08730013300,11449.63468640000]
[697,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,962.75020053000,0,962.75020053000,26375.47605550000]
[699,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,3232.88618680000,0,3249.15025899000,108043.26519100000]
[700,23,null,{"$raw":"00000000"},"141902",2,"Buffer - Alvorão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,669.02767609000,0,669.02767609700,22516.01616950000]
[701,23,null,{"$raw":"00000000"},"141902",2,"Buffer - Alvorão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1384.77101653000,0,1384.77101653000,49837.04028460000]
[702,24,null,{"$raw":"00000000"},"141919",2,"Buffer - Árgea","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,195.26108386000,0,195.26108386100,1932.37447817000]
[703,24,null,{"$raw":"00000000"},"141919",2,"Buffer - Árgea","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,637.05550799000,0,637.05550799800,19906.17026100000]
[704,24,null,{"$raw":"00000000"},"141919",2,"Buffer - Árgea","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,711.40611551000,0,711.40611551500,21578.55527030000]
[705,24,null,{"$raw":"00000000"},"141919",2,"Buffer - Árgea","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1608.32999435000,0,1608.32999435000,67312.37068460000]
[706,24,null,{"$raw":"00000000"},"141919",2,"Buffer - Árgea","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2142.67593190000,0,2142.67593190000,86488.40393879999]
[707,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,251.12277221000,9999,251.12277221800,592.95770093200]
[708,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,128.97459209000,9999,128.97459209800,776.59713869200]
[709,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,111.22418863000,9999,111.22418863400,803.65405884300]
[710,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,153.21789297000,0,153.21789297000,852.67294017600]
[711,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,154.97782290000,0,154.97782290500,1068.30954683000]
[712,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,366.03846342000,0,366.03846342000,1197.60625019000]
[713,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,189.95694375000,9999,189.95694375900,1613.86745218000]
[714,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,178.49195416000,9999,178.49195416900,2200.03502816000]
[715,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,237.90195151000,9999,237.90195151300,2885.32184070000]
[716,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,404.41253148000,9999,404.41253148400,3117.94956219000]
[717,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,288.60844088000,9999,288.60844088300,5023.51636133000]
[718,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,430.29156473000,9999,430.29156473000,5029.34635086000]
[719,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,546.89311003000,0,546.89311003700,5413.74166812000]
[720,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,407.56164159000,0,407.56164159400,7688.77002468000]
[721,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,716.12841096000,9999,716.12841096000,9628.49479751000]
[722,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,723.85975786000,9999,723.85975786400,14401.19354340000]
[723,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,729.44003617000,9999,729.44003617000,15087.93075560000]
[724,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1026.39217227000,9999,1026.39217227000,22897.49205990000]
[725,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1195.62675760000,0,1195.62675760000,25570.84737390000]
[726,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1146.34885426000,0,1146.34885426000,26654.66511830000]
[727,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1555.64629031000,0,1555.64629031000,44514.81958780000]
[728,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1315.45769297000,0,1315.45769297000,48045.49458580000]
[729,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1297.00362549000,0,1297.00362549000,51648.62418220000]
[732,27,null,{"$raw":"00000000"},"141902",3,"Buffer - Aterro/Etar (Carvalhal do Pombo)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,939.45038677000,0,939.45038677000,35991.60974930000]
[733,27,null,{"$raw":"00000000"},"141904",3,"Buffer - Aterro/Etar (Carvalhal do Pombo)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,340.97178373000,0,340.97178373200,5407.91661625000]
[734,27,null,{"$raw":"00000000"},"141904",3,"Buffer - Aterro/Etar (Carvalhal do Pombo)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,310.60807254000,0,310.60807254700,5586.10039852000]
[735,28,null,{"$raw":"00000000"},"141916",3,"Buffer - Aterro/Etar (Renova II)","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,234.14463879000,0,234.14463879800,2494.82312782000]
[736,28,null,{"$raw":"00000000"},"141916",3,"Buffer - Aterro/Etar (Renova II)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,757.81340582000,0,757.81340582400,14827.94657260000]
[738,28,null,{"$raw":"00000000"},"141916",3,"Buffer - Aterro/Etar (Renova II)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2990.23770548000,0,2990.23770548000,120115.82997599999]
[739,29,null,{"$raw":"00000000"},"141910",3,"Buffer - Aterro/Etar (Riachos)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,184.32972708000,0,184.32972708200,1397.94397294000]
[740,29,null,{"$raw":"00000000"},"141910",3,"Buffer - Aterro/Etar (Riachos)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,236.68204727000,0,236.68204727900,2316.05472838000]
[741,29,null,{"$raw":"00000000"},"141910",3,"Buffer - Aterro/Etar (Riachos)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,418.28907197000,0,418.28907197400,7076.65436714000]
[742,29,null,{"$raw":"00000000"},"141910",3,"Buffer - Aterro/Etar (Riachos)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1504.13459480000,0,1504.13459480000,39253.70274190000]
[743,29,null,{"$raw":"00000000"},"141910",3,"Buffer - Aterro/Etar (Riachos)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1093.91490808000,0,1093.91490808000,39825.24001890000]
[744,30,null,{"$raw":"00000000"},"141921",3,"Buffer - Aterro/Etar (Ribeira Branca)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,645.89803043000,0,645.89803043800,18174.49341460000]
[745,30,null,{"$raw":"00000000"},"141921",3,"Buffer - Aterro/Etar (Ribeira Branca)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1792.40186201000,0,1792.40186201000,58828.61709710000]
[746,30,null,{"$raw":"00000000"},"141921",3,"Buffer - Aterro/Etar (Ribeira Branca)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,157.80048028000,0,157.80048028600,777.52990381300]
[747,30,null,{"$raw":"00000000"},"141921",3,"Buffer - Aterro/Etar (Ribeira Branca)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,577.21558799000,0,577.21558799700,17460.99451640000]
[748,31,null,{"$raw":"00000000"},"141920",3,"Buffer - Aterro/Etar (Torres Novas)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,354.23995367000,0,354.23995367600,7809.19609920000]
[749,31,null,{"$raw":"00000000"},"141920",3,"Buffer - Aterro/Etar (Torres Novas)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,386.21066430000,0,386.21066430800,9127.11062756000]
[750,31,null,{"$raw":"00000000"},"141920",3,"Buffer - Aterro/Etar (Torres Novas)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,578.12196786000,0,578.12196786600,18332.95465650000]
[751,31,null,{"$raw":"00000000"},"141920",3,"Buffer - Aterro/Etar (Torres Novas)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,941.45565069000,0,941.45565069100,31099.73061570000]
[752,32,null,{"$raw":"00000000"},"141920",2,"Buffer - Atouguia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2234.17684217000,0,2234.17684217000,97747.38900880000]
[753,32,null,{"$raw":"00000000"},"141921",2,"Buffer - Atouguia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1012.34216114000,0,1012.34216114000,39924.59809590000]
[754,33,null,{"$raw":"00000000"},"141920",2,"Buffer - Bacelada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,671.15802923000,0,671.15802923900,22253.51900440000]
[755,33,null,{"$raw":"00000000"},"141920",2,"Buffer - Bacelada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1063.21549861000,0,1063.21549861000,41188.33956030000]
[756,34,null,{"$raw":"00000000"},"141916",2,"Buffer - Bairro de São José","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,438.87589173000,0,438.87589173200,9736.43097977000]
[757,34,null,{"$raw":"00000000"},"141916",2,"Buffer - Bairro de São José","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1112.22836199000,0,1112.22836199000,41325.64191530000]
[758,35,null,{"$raw":"00000000"},"141909",2,"Buffer - Bairro José Dias Simão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,129.66569936000,0,129.66569936500,1093.96099101000]
[759,35,null,{"$raw":"00000000"},"141909",2,"Buffer - Bairro José Dias Simão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,308.35589320000,0,308.35589320200,4770.37296923000]
[760,35,null,{"$raw":"00000000"},"141916",2,"Buffer - Bairro José Dias Simão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,415.80626313000,9999,415.80626313300,4767.33103355000]
[761,35,null,{"$raw":"00000000"},"141916",2,"Buffer - Bairro José Dias Simão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,449.67402283000,0,449.67402283700,10374.26132560000]
[762,35,null,{"$raw":"00000000"},"141916",2,"Buffer - Bairro José Dias Simão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,610.11101668000,0,610.11101668600,10551.99930490000]
[763,35,null,{"$raw":"00000000"},"141916",2,"Buffer - Bairro José Dias Simão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1322.05435868000,0,1322.05435868000,40942.28090940000]
[764,36,null,{"$raw":"00000000"},"141921",2,"Buffer - Barreira Alva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,977.41847748000,0,977.41847748000,36170.97317050000]
[765,36,null,{"$raw":"00000000"},"141920",2,"Buffer - Barreira Alva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,338.98964648000,0,338.98964648300,1956.94226602000]
[766,36,null,{"$raw":"00000000"},"141920",2,"Buffer - Barreira Alva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,274.59259176000,0,274.59259176000,2463.18708064000]
[767,36,null,{"$raw":"00000000"},"141920",2,"Buffer - Barreira Alva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,480.50778646000,0,480.50778646500,8257.74965474000]
[768,36,null,{"$raw":"00000000"},"141920",2,"Buffer - Barreira Alva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,426.38092409000,0,426.38092409400,10881.50754110000]
[769,36,null,{"$raw":"00000000"},"141920",2,"Buffer - Barreira Alva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,721.09569051000,0,721.09569051600,12892.90328650000]
[770,36,null,{"$raw":"00000000"},"141920",2,"Buffer - Barreira Alva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,785.39204274000,0,785.39204274700,13105.17172080000]
[771,36,null,{"$raw":"00000000"},"141920",2,"Buffer - Barreira Alva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,725.12611532000,0,725.12611532400,18542.37368600000]
[772,36,null,{"$raw":"00000000"},"141920",2,"Buffer - Barreira Alva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,762.24921035000,0,762.24921035600,20659.40691680000]
[773,36,null,{"$raw":"00000000"},"141920",2,"Buffer - Barreira Alva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1099.24934875000,0,1099.24934875000,34485.51038340000]
[774,37,null,{"$raw":"00000000"},"141918",2,"Buffer - Barreiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,179.56120399000,0,179.56120399000,1617.77338159000]
[775,37,null,{"$raw":"00000000"},"141918",2,"Buffer - Barreiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1239.35149489000,0,1239.35149489000,43948.43004850000]
[776,37,null,{"$raw":"00000000"},"141918",2,"Buffer - Barreiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1343.34531460000,0,1343.34531460000,50993.01111540000]
[777,37,null,{"$raw":"00000000"},"141918",2,"Buffer - Barreiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1459.39589016000,0,1459.39589016000,55146.04655660000]
[778,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,80.71087238000,0,80.71087238750,284.67408314400]
[779,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,100.88001792000,0,100.88001792800,349.50692568100]
[780,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,209.00701756000,0,209.00701756300,1474.12648481000]
[781,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,230.77887778000,0,230.77887778700,2302.42811455000]
[782,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,250.85645976000,0,250.85645976100,2870.97152031000]
[783,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,258.53240102000,9999,258.53240102900,3566.06832715000]
[784,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,656.30342263000,9999,656.30342263100,9638.83145301000]
[785,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,658.14770917000,0,658.14770917400,15274.28711500000]
[786,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,562.75458754000,0,562.75458754000,15381.23358690000]
[787,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,557.99270844000,0,557.99270844100,15637.95975430000]
[788,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1211.28468046000,9999,1211.28468046000,19520.44898260000]
[789,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1439.61904637000,0,1439.61904637000,25455.26950780000]
[790,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1129.53505944000,0,1129.53505944000,46848.73763150000]
[791,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1864.24156235000,0,1864.24156235000,77170.86924060000]
[792,38,null,{"$raw":"00000000"},"141919",2,"Buffer - Barroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,2305.17580698000,0,2305.17580698000,98941.56297620000]
[793,39,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Baixo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,225.55400278000,9999,225.55400278400,1818.73054943000]
[794,39,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Baixo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,398.33231532000,9999,398.33231532600,6369.75159464000]
[795,39,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,524.21473155000,0,524.21473155600,10845.68151450000]
[796,39,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,656.99108031000,0,648.22268607500,17178.77379200000]
[797,39,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,2596.53792367000,0,2596.09269036000,100585.35595700001]
[798,39,null,{"$raw":"00000000"},"Fora",2,"Buffer - Beselga de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,410.06647751000,0,410.06647751900,5194.63003220000]
[799,39,null,{"$raw":"00000000"},"Fora",2,"Buffer - Beselga de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1301.15043788000,0,1301.15043788000,47520.88943290000]
[800,40,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,125.94044473000,9999,125.94044473900,846.34510587300]
[801,40,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,156.09361262000,9999,156.09361262600,1297.22068950000]
[802,40,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,315.95480987000,9999,315.95480987600,3854.77517139000]
[803,40,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,646.94681297000,0,646.94681297600,8401.31563774000]
[804,40,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,620.64898954000,0,603.90694078000,13139.99618730000]
[805,40,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,626.17733084000,9999,626.17733084600,14170.83778510000]
[806,40,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,906.02020908000,0,889.48989090300,23108.43125180000]
[807,40,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,937.52301333000,0,937.52301333200,31455.63341240000]
[808,40,null,{"$raw":"00000000"},"141902",2,"Buffer - Beselga de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,2186.61601971000,0,2175.79150229000,95568.46025800001]
[809,41,null,{"$raw":"00000000"},"141921",3,"Buffer - Bomba de Gasolina","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,195.53364522000,0,195.53364522100,2094.86116117000]
[810,41,null,{"$raw":"00000000"},"141921",3,"Buffer - Bomba de Gasolina","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,424.86042613000,0,424.86042613800,9197.47373341000]
[811,41,null,{"$raw":"00000000"},"141921",3,"Buffer - Bomba de Gasolina","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,521.63301325000,0,521.63301325500,13661.34521420000]
[812,41,null,{"$raw":"00000000"},"141921",3,"Buffer - Bomba de Gasolina","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,560.61057733000,0,560.61057733200,14237.73669650000]
[813,42,null,{"$raw":"00000000"},"141920",2,"Buffer - Bonflorido","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,64.98627141000,0,64.98627141270,264.23332315500]
[814,42,null,{"$raw":"00000000"},"141920",2,"Buffer - Bonflorido","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,156.29401003000,0,156.29401003900,1016.93278164000]
[815,42,null,{"$raw":"00000000"},"141920",2,"Buffer - Bonflorido","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,244.07908815000,0,244.07908815800,3062.08598547000]
[816,42,null,{"$raw":"00000000"},"141920",2,"Buffer - Bonflorido","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,351.40302281000,0,351.40302281600,6318.24777799000]
[817,42,null,{"$raw":"00000000"},"141920",2,"Buffer - Bonflorido","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1285.91546867000,0,1285.91546867000,42314.42426040000]
[818,42,null,{"$raw":"00000000"},"141920",2,"Buffer - Bonflorido","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1198.45118685000,0,1198.45118685000,42446.64547020000]
[819,43,null,{"$raw":"00000000"},"141918",2,"Buffer - Boquilobo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,686.56967712000,0,686.56967712200,23519.35825650000]
[820,43,null,{"$raw":"00000000"},"141918",2,"Buffer - Boquilobo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1572.27244324000,0,2458.50843545000,104336.24659500000]
[821,43,null,{"$raw":"00000000"},"141918",2,"Buffer - Boquilobo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1969.81652511000,0,2038.51128296000,87283.66220280000]
[822,44,null,{"$raw":"00000000"},"141918",2,"Buffer - Borreco","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,311.06514537000,0,311.06514537200,3437.78811567000]
[823,44,null,{"$raw":"00000000"},"141918",2,"Buffer - Borreco","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1191.65331773000,0,1191.65331773000,11811.40073820000]
[824,44,null,{"$raw":"00000000"},"141918",2,"Buffer - Borreco","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1213.05242490000,0,1136.81714518000,33852.38314740000]
[825,44,null,{"$raw":"00000000"},"141918",2,"Buffer - Borreco","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1579.89605180000,0,1579.89605180000,65362.02918630000]
[826,44,null,{"$raw":"00000000"},"141918",2,"Buffer - Borreco","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,4200.95549098000,0,4200.95549098000,166862.15497900001]
[827,45,null,{"$raw":"00000000"},"141918",2,"Buffer - Brogueira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,338.96735076000,0,338.96735076100,3080.29052296000]
[828,45,null,{"$raw":"00000000"},"141918",2,"Buffer - Brogueira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,484.82722991000,0,484.82722991400,5899.04047245000]
[829,45,null,{"$raw":"00000000"},"141918",2,"Buffer - Brogueira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,925.45405926000,0,925.45405926900,29659.91946800000]
[830,45,null,{"$raw":"00000000"},"141918",2,"Buffer - Brogueira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,918.95606875000,0,918.95606875700,30083.55184270000]
[831,45,null,{"$raw":"00000000"},"141918",2,"Buffer - Brogueira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1384.13628569000,0,1384.13628569000,56894.90969440000]
[832,45,null,{"$raw":"00000000"},"141918",2,"Buffer - Brogueira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1540.37236340000,0,1539.31109531000,63785.57941980000]
[833,45,null,{"$raw":"00000000"},"141918",2,"Buffer - Brogueira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2273.60365141000,0,2273.60365141000,85745.56472810000]
[834,46,null,{"$raw":"00000000"},"141920",2,"Buffer - C. do Boias","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,763.13592675000,0,763.13592675800,7281.42889954000]
[835,46,null,{"$raw":"00000000"},"141920",2,"Buffer - C. do Boias","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,655.91983703000,9999,655.91983703800,21642.37435240000]
[836,46,null,{"$raw":"00000000"},"141920",2,"Buffer - C. do Boias","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1570.32879626000,0,1570.32879626000,64630.73534170000]
[837,46,null,{"$raw":"00000000"},"141921",2,"Buffer - C. do Boias","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,2163.07061227000,0,2163.07061227000,89676.12085160000]
[838,47,null,{"$raw":"00000000"},"141904",2,"Buffer - Cabeço do Soudo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,126.37597413000,0,126.37597413600,502.66113547700]
[839,47,null,{"$raw":"00000000"},"141904",2,"Buffer - Cabeço do Soudo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,940.82705809000,0,940.82705809600,33870.07192570000]
[840,47,null,{"$raw":"00000000"},"141904",2,"Buffer - Cabeço do Soudo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1700.64688612000,0,1700.64688612000,69161.00281590001]
[841,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,84.32643052000,0,84.32643052420,29.41661294750]
[842,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,189.25036466000,0,189.25036466700,480.87428542600]
[843,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,148.64096435000,0,148.64096435700,605.62890421400]
[844,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,168.68313456000,0,168.68313456400,800.15503462500]
[845,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,245.55429328000,0,245.55429328400,1480.74141097000]
[846,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,232.45446805000,0,232.45446805200,1912.43188080000]
[847,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,450.07675132000,0,450.07675132300,2769.99439852000]
[848,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,416.53968703000,0,416.53968703700,2897.49296830000]
[849,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,243.70619111000,0,243.70619111500,3359.44799240000]
[850,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,376.42398464000,0,376.42398464400,3438.54330581000]
[851,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,356.91709495000,0,356.91709495400,7802.91808888000]
[852,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1222.53929803000,0,1222.53929803000,25170.63267830000]
[853,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1612.98634533000,0,1612.98634533000,26973.64825770000]
[854,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2773.03892159000,0,2773.03892159000,67871.74513159999]
[855,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,3731.97610540000,0,3731.97610540000,158741.80148800000]
[856,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,98.44962697000,0,98.44962697360,106.63907981100]
[857,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,69.17816757000,0,69.17816757290,151.21720866400]
[858,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,109.18413150000,0,109.18413150600,507.55084558400]
[859,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,169.02158390000,0,169.02158390100,679.20028781000]
[860,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,189.65488550000,0,189.65488550900,1277.36763639000]
[861,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,251.75518085000,0,251.75518085800,2013.60113630000]
[862,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,187.75055083000,0,187.75055083000,2096.36538314000]
[863,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,343.86265850000,0,343.86265850200,3216.74419419000]
[864,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,542.03921184000,0,542.03921184400,6715.77515293000]
[865,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,546.72039468000,0,546.72039468300,14470.12598300000]
[866,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1302.64084959000,0,1302.64084959000,24123.37202390000]
[868,48,null,{"$raw":"00000000"},"141920",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,217.81147264000,0,217.81147264600,2137.84769620000]
[869,49,null,{"$raw":"00000000"},"141919",2,"Buffer - Carrasqueira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,141.40047481000,9999,141.40047481600,1039.01113638000]
[870,49,null,{"$raw":"00000000"},"141919",2,"Buffer - Carrasqueira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,241.82094154000,9999,241.82094154000,1478.82682926000]
[871,49,null,{"$raw":"00000000"},"141919",2,"Buffer - Carrasqueira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,223.13169278000,9999,223.13169278800,2677.11765683000]
[873,49,null,{"$raw":"00000000"},"141919",2,"Buffer - Carrasqueira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2573.46536941000,0,2573.46536941000,120873.85280800000]
[874,50,null,{"$raw":"00000000"},"141919",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,236.58086467000,0,236.58086467400,1007.69066359000]
[875,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,146.99874401000,0,146.99874401100,647.70688832500]
[876,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,215.38121174000,0,215.38121174100,1159.75609962000]
[877,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,159.09353436000,9999,159.09353436700,1186.52596263000]
[878,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,279.29364138000,9999,279.29364138600,1255.77649199000]
[879,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,162.32616498000,9999,162.32616498400,1431.27723115000]
[880,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,223.55178595000,0,223.55178595000,1922.10336806000]
[881,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,198.66038165000,9999,198.66038165600,2285.11339168000]
[882,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,453.45248253000,9999,453.45248253400,8216.38828208000]
[883,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,793.98662055000,0,793.98662055900,24446.29806690000]
[885,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,1854.47164929000,9999,1854.47164929000,55853.10364130000]
[886,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,2100.56487985000,0,2100.56487985000,83658.69413620001]
[887,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,2514.94918806000,0,2514.94918806000,99196.40231850000]
[888,51,null,{"$raw":"00000000"},"141920",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,336.11342209000,0,336.11342209500,2205.55225134000]
[889,51,null,{"$raw":"00000000"},"141920",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,283.14377485000,0,283.14377485700,2344.39592947000]
[890,51,null,{"$raw":"00000000"},"141920",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,242.12540175000,0,242.12540175300,2834.17165293000]
[891,51,null,{"$raw":"00000000"},"141920",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,299.92107123000,0,299.92107123900,4770.46033454000]
[892,51,null,{"$raw":"00000000"},"141920",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1551.03364198000,0,1551.03364198000,49995.55727430000]
[893,51,null,{"$raw":"00000000"},"141920",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,3454.93647915000,0,3454.93647915000,130971.59614900000]
[894,51,null,{"$raw":"00000000"},"141921",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,119.42497235000,0,119.42497235800,908.80037774900]
[895,51,null,{"$raw":"00000000"},"141921",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,299.97412120000,0,299.97412120100,2809.12868990000]
[896,51,null,{"$raw":"00000000"},"141921",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,371.80117160000,0,371.80117160100,6016.64433185000]
[897,51,null,{"$raw":"00000000"},"141921",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,615.73366308000,0,615.73366308300,8124.18190152000]
[898,51,null,{"$raw":"00000000"},"141921",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,4111.55154161000,0,4111.55154161000,185096.88465600001]
[899,51,null,{"$raw":"00000000"},"141921",2,"Buffer - Carvalhal da Aroeira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,6781.60305770000,0,6781.60305770000,273175.31944699999]
[900,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,160.42708588000,9999,160.42708588300,627.69769983800]
[901,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,114.09369185000,0,114.09369185400,659.98806050800]
[902,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,300.29450983000,9999,300.29450983600,3977.34509763000]
[903,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,387.23419098000,9999,387.23419098600,4106.85376560000]
[904,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,479.98688900000,9999,479.98688900500,4267.16724623000]
[905,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,439.70636094000,9999,439.70636094800,5085.20292868000]
[906,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,537.57624763000,9999,537.57624763900,6162.98838654000]
[907,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,737.92484996000,9999,737.92484996000,7142.01536279000]
[908,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,738.26019744000,9999,738.26019744000,13371.52602230000]
[909,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1555.47978507000,0,1555.47978507000,35933.63651230000]
[910,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2698.36164596000,0,2698.36164596000,98208.17633720000]
[911,52,null,{"$raw":"00000000"},"141902",2,"Buffer - Carvalhal do Pombo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,4505.59830114000,0,4505.59830114000,108253.65299600000]
[912,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,127.76812590000,9999,127.76812590200,989.87321396000]
[914,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,183.81278495000,0,183.81278495500,1238.82759600000]
[915,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,222.52442152000,9999,222.52442152500,1302.13997159000]
[916,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,201.89951319000,9999,201.89951319500,1781.07471133000]
[917,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,199.95236176000,0,199.95236176000,2248.80186822000]
[918,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,232.40673386000,9999,232.40673386800,2770.82958945000]
[919,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,368.10197824000,9999,368.10197824600,3224.53647640000]
[920,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,321.05364057000,0,321.05364057700,3579.15698602000]
[921,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,316.71985532000,9999,316.71985532500,3639.10498216000]
[922,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,342.52127689000,9999,342.52127689700,3949.68121353000]
[923,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,276.33007867000,9999,276.33007867300,4175.97138142000]
[924,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,425.02507475000,9999,425.02507475700,4602.31683401000]
[925,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,327.91104418000,9999,327.91104418800,5927.41197545000]
[926,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,554.52031352000,9999,554.52031352000,5991.57370279000]
[927,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,397.07677232000,9999,397.07677232200,7817.24400191000]
[928,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,536.71463134000,0,536.71463134000,8885.93304466000]
[929,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,567.99765678000,0,567.99765678700,16775.03235460000]
[930,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1216.55969497000,0,1216.55969497000,40704.23912050000]
[931,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1736.90694323000,0,1736.90694323000,45666.40373530000]
[932,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1601.03307091000,0,1612.16662545000,58415.14926770000]
[933,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2979.92739695000,0,2979.92739695000,90253.22136030000]
[934,53,null,{"$raw":"00000000"},"141902",2,"Buffer - Casais de Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,5189.94660515000,0,5189.94660515000,168694.75123500000]
[935,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,109.22901772000,0,109.22901772700,552.60112690100]
[936,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,229.02885069000,0,229.02885069100,1192.94774472000]
[937,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,243.97034664000,9999,243.97034664200,1462.89928820000]
[938,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,212.89907866000,9999,212.89907866000,2544.71575673000]
[939,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,225.91581013000,0,225.91581013400,3253.66404921000]
[940,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,405.01667297000,0,405.01667297100,3913.91465607000]
[941,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,466.76921000000,9999,466.76921000000,6095.02075612000]
[942,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,472.41038686000,9999,472.41038686600,7900.02420297000]
[943,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,381.44384746000,0,381.44384746100,8141.21085677000]
[944,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,394.27879071000,0,394.27879071700,9293.46484356000]
[945,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,571.64855523000,0,571.64855523900,11124.68939110000]
[946,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1205.69539127000,0,1205.69539127000,45039.70833430000]
[947,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1393.92521933000,0,1393.92521933000,55750.51572450000]
[948,54,null,{"$raw":"00000000"},"141909",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,2347.69972680000,0,2347.69972680000,77671.41861579999]
[949,54,null,{"$raw":"00000000"},"141916",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,73.43853194000,0,73.43853194380,157.24169805500]
[950,54,null,{"$raw":"00000000"},"141916",2,"Buffer - Casais Martanes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,216.68968207000,0,216.68968207300,2675.97378038000]
[951,55,null,{"$raw":"00000000"},"141918",2,"Buffer - Casais Novos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,116.84593478000,0,116.84593478900,724.62416204300]
[952,55,null,{"$raw":"00000000"},"141918",2,"Buffer - Casais Novos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1880.40425361000,0,1880.40425361000,78699.22856380000]
[953,55,null,{"$raw":"00000000"},"Fora",2,"Buffer - Casais Novos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1550.15693700000,0,1550.15693700000,60989.92938290000]
[954,56,null,{"$raw":"00000000"},"141920",2,"Buffer - Casais Sebes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,96.57004903000,0,96.57004903240,557.46061220200]
[955,56,null,{"$raw":"00000000"},"141920",2,"Buffer - Casais Sebes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,379.73530301000,0,379.73530301100,4235.98390031000]
[956,56,null,{"$raw":"00000000"},"141920",2,"Buffer - Casais Sebes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,241.90228747000,0,241.90228747000,3155.98940817000]
[957,56,null,{"$raw":"00000000"},"141920",2,"Buffer - Casais Sebes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,363.31167101000,0,363.31167101100,5834.13814947000]
[958,56,null,{"$raw":"00000000"},"141920",2,"Buffer - Casais Sebes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,406.60159518000,0,406.60159518000,9736.47791050000]
[959,56,null,{"$raw":"00000000"},"141920",2,"Buffer - Casais Sebes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1339.51134558000,0,1339.51134558000,44386.46557950000]
[961,58,null,{"$raw":"00000000"},"141918",2,"Buffer - Casal da Azinheira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,302.06586039000,0,302.06586039100,3099.43821609000]
[962,58,null,{"$raw":"00000000"},"141918",2,"Buffer - Casal da Azinheira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1382.42635790000,0,1382.42635790000,54473.39370170000]
[963,58,null,{"$raw":"00000000"},"141918",2,"Buffer - Casal da Azinheira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1616.25261764000,0,1616.25261764000,56565.42956560000]
[964,59,null,{"$raw":"00000000"},"141902",2,"Buffer - Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,178.11713928000,9999,178.11713928400,1652.43346296000]
[965,59,null,{"$raw":"00000000"},"141902",2,"Buffer - Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,255.51825484000,9999,255.51825484500,3185.94378148000]
[966,59,null,{"$raw":"00000000"},"141902",2,"Buffer - Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,333.28114987000,9999,333.28114987800,3843.02613733000]
[967,59,null,{"$raw":"00000000"},"141902",2,"Buffer - Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,497.68282126000,0,497.68282126200,6039.22662398000]
[968,59,null,{"$raw":"00000000"},"141902",2,"Buffer - Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,602.96087259000,9999,602.96087259100,16497.52344490000]
[969,59,null,{"$raw":"00000000"},"141902",2,"Buffer - Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,797.30685601000,0,797.30685601200,22857.62169310000]
[970,59,null,{"$raw":"00000000"},"141902",2,"Buffer - Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1530.53343464000,0,1530.53343464000,55278.48582690000]
[971,59,null,{"$raw":"00000000"},"141919",2,"Buffer - Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,414.12363628000,0,414.12363628900,7384.54779333000]
[972,60,null,{"$raw":"00000000"},"141921",2,"Buffer - Casal da Pinheira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,324.30247336000,0,324.30247336300,2832.04415835000]
[973,60,null,{"$raw":"00000000"},"141921",2,"Buffer - Casal da Pinheira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,294.80335801000,0,294.80335801000,3070.94659550000]
[974,60,null,{"$raw":"00000000"},"141921",2,"Buffer - Casal da Pinheira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,542.31805195000,0,542.31805195900,6738.91983271000]
[975,60,null,{"$raw":"00000000"},"141921",2,"Buffer - Casal da Pinheira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,3233.37261252000,0,3233.37261252000,84377.63752239999]
[976,60,null,{"$raw":"00000000"},"141921",2,"Buffer - Casal da Pinheira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,3214.39583622000,0,3228.73116951000,140694.95697200001]
[977,61,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal das Figueiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1028.11656003000,0,1028.53779095000,37353.88468080000]
[978,62,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal de Aires","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,399.22120002000,0,399.22120002000,3358.09558352000]
[979,62,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal de Aires","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,435.23919180000,0,435.23919180000,10011.55287280000]
[980,62,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal de Aires","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,871.08366772000,0,871.08366772700,29113.39099210000]
[981,62,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal de Aires","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1161.77341265000,0,1161.77341265000,37665.17452890000]
[982,63,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal do Vale","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,678.19610957000,0,678.19610957100,21741.74140950000]
[983,63,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal do Vale","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1120.41351027000,0,1120.41351027000,42346.66973570000]
[984,64,null,{"$raw":"00000000"},"141918",2,"Buffer - Casal dos Piscos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,217.02156094000,0,217.02156094500,1169.13331119000]
[985,64,null,{"$raw":"00000000"},"141918",2,"Buffer - Casal dos Piscos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2660.22058133000,0,2660.22058133000,114306.04035200000]
[986,65,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Gracia Mogo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,121.87390674000,0,121.87390674100,726.92019215100]
[987,65,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Gracia Mogo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,108.98078718000,0,108.98078718400,769.15608108100]
[988,65,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Gracia Mogo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,319.94900986000,0,319.94900986200,1456.77355791000]
[989,65,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Gracia Mogo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,413.00503657000,0,413.00503657700,3699.09616482000]
[990,65,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Gracia Mogo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,943.61852921000,0,943.61852921800,26979.62504580000]
[991,65,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Gracia Mogo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1023.53339923000,0,1023.53339923000,34471.42371040000]
[992,65,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Gracia Mogo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,111.52083495000,0,111.52083495300,460.26394065100]
[993,65,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Gracia Mogo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,222.69671601000,0,222.69671601000,1342.04177238000]
[994,65,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Gracia Mogo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,472.58943183000,0,472.58943183000,13304.54534930000]
[995,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,109.73395930000,0,109.73395930500,552.07105906800]
[996,66,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal João Dias","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,173.39738136000,9999,173.39738136800,1362.67817447000]
[1011,68,null,{"$raw":"00000000"},"141902",2,"Buffer - Casal Prior","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1145.44612844000,0,1145.44599597000,40575.49336830000]
[1012,68,null,{"$raw":"00000000"},"141902",2,"Buffer - Casal Prior","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1395.27037280000,0,1395.41250469000,56968.25152980000]
[1013,68,null,{"$raw":"00000000"},"Fora",2,"Buffer - Casal Prior","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,302.03275145000,0,303.82373325100,3760.67391612000]
[1014,68,null,{"$raw":"00000000"},"Fora",2,"Buffer - Casal Prior","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,574.28907315000,0,574.28907315700,13946.49918130000]
[1015,68,null,{"$raw":"00000000"},"Fora",2,"Buffer - Casal Prior","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,599.13435471000,0,599.13435471800,14309.71526870000]
[1016,69,null,{"$raw":"00000000"},"141918",2,"Buffer - Casal Ramos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1822.90690448000,0,1753.97051104000,66348.83792720000]
[1017,69,null,{"$raw":"00000000"},"141918",2,"Buffer - Casal Ramos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2279.14036936000,0,2279.14036936000,97731.96415170000]
[1018,69,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Ramos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,132.20746572000,0,132.20746572900,751.49341238300]
[1019,70,null,{"$raw":"00000000"},"141919",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,110.34578299000,9999,110.34578299100,432.79929529500]
[1020,70,null,{"$raw":"00000000"},"141919",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,266.78446583000,0,266.78446583800,4301.47274753000]
[1021,70,null,{"$raw":"00000000"},"141919",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1019.14914896000,0,1019.14914896000,10760.10443010000]
[1022,70,null,{"$raw":"00000000"},"141919",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,699.16135004000,0,699.16135004400,22513.13340340000]
[1023,70,null,{"$raw":"00000000"},"141919",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1037.79645975000,9999,1037.79645975000,23601.80110260000]
[1024,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,94.71263390000,9999,94.71263390520,400.83976817500]
[1025,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,178.39092553000,9999,178.39092553000,1494.86437602000]
[1026,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,282.74979140000,9999,282.74979140200,4627.29304642000]
[1027,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,366.70626020000,0,366.70626020900,5103.46358346000]
[1028,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,370.26494532000,9999,317.43780676000,5025.61097173000]
[1029,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,425.33620318000,9999,425.33620318700,7768.67744952000]
[1030,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,794.79036471000,9999,794.79036471500,15739.84865410000]
[1031,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,704.66976361000,0,704.66976361900,16951.05907680000]
[1032,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1061.70360406000,0,1061.70360406000,18875.53353080000]
[1033,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,620.61698949000,0,620.61698949400,19076.41855300000]
[1035,70,null,{"$raw":"00000000"},"141920",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,2177.04890320000,0,2177.04890320000,60911.84789370000]
[1036,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,80.94057271000,0,80.94057271550,215.06149653100]
[1037,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,123.32160913000,0,123.32160913000,575.07487542900]
[1038,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,115.24218232000,0,115.24218232600,802.04198998600]
[1039,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,129.80782788000,9999,129.80782788000,1034.94392531000]
[1040,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,193.09260935000,9999,193.09260935000,1263.02485767000]
[1041,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,198.42661865000,9999,198.42661865200,1616.28020713000]
[1042,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,284.44816690000,0,284.44816690600,1825.79198679000]
[1043,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,306.58499202000,0,306.58499202100,3492.91454659000]
[1044,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,334.56135268000,9999,334.56135268200,3877.34204748000]
[1045,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,356.11531050000,0,356.11531050300,4579.84023503000]
[1046,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,365.50321337000,9999,365.50321337300,6062.48173798000]
[1047,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,592.55373414000,0,266.33463555400,3358.58418278000]
[1048,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,499.14678122000,9999,499.14678122200,10716.05544700000]
[1049,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,751.88820483000,0,751.88820483900,13262.21962080000]
[1050,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,848.52521306000,0,848.52521306700,25952.36383640000]
[1051,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1263.00451617000,0,1263.00451617000,28547.36664250000]
[1052,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1348.29958388000,0,1348.29958388000,33021.66887250000]
[1053,70,null,{"$raw":"00000000"},"141917",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1477.57326221000,9999,1460.90400779000,52443.43603420000]
[1054,70,null,{"$raw":"00000000"},"Fora",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,51.13448567000,9999,51.13448567850,149.40573086300]
[1055,70,null,{"$raw":"00000000"},"Fora",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,129.67021663000,9999,129.67021663000,217.47102952400]
[1056,70,null,{"$raw":"00000000"},"Fora",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,267.71423221000,9999,267.71423221800,2902.71325133000]
[1057,70,null,{"$raw":"00000000"},"Fora",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,433.97274881000,0,433.97274881400,11805.24526270000]
[1058,70,null,{"$raw":"00000000"},"Fora",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,791.41413819000,0,791.41413819600,16978.89108880000]
[1059,70,null,{"$raw":"00000000"},"Fora",2,"Buffer - Casal Sentista","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,954.95451476000,0,2027.55018085000,80708.11368610000]
[1060,71,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal Valentão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,140.53398223000,9999,140.53398223600,1106.13860556000]
[1061,71,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal Valentão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,177.11690857000,9999,177.11690857800,1646.58318551000]
[1062,71,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal Valentão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,330.39079987000,0,330.39079987600,3135.34156605000]
[1063,71,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal Valentão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,324.71999947000,0,324.71999947300,3248.56644977000]
[1064,71,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal Valentão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,588.12168641000,9999,588.12168641900,10352.12794840000]
[1065,71,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal Valentão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1151.16420332000,9999,1151.16420332000,29137.46883720000]
[1066,71,null,{"$raw":"00000000"},"141909",2,"Buffer - Casal Valentão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,2649.00082892000,0,2649.00082892000,70421.59298930000]
[1067,72,null,{"$raw":"00000000"},"141917",2,"Buffer - Cascalheira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,104.21575135000,0,104.21575135700,696.18711524700]
[1068,72,null,{"$raw":"00000000"},"141917",2,"Buffer - Cascalheira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,423.58429703000,0,423.58429703200,2294.22165060000]
[1069,72,null,{"$raw":"00000000"},"141917",2,"Buffer - Cascalheira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,281.14588063000,0,281.14588063300,3451.74222636000]
[1070,72,null,{"$raw":"00000000"},"141917",2,"Buffer - Cascalheira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,513.07138727000,9999,513.07138727800,7668.29117879000]
[1071,72,null,{"$raw":"00000000"},"141917",2,"Buffer - Cascalheira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,683.06751852000,0,683.06751852700,15805.47071540000]
[1072,72,null,{"$raw":"00000000"},"141917",2,"Buffer - Cascalheira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1621.25496732000,0,1621.25496732000,37047.19965400000]
[1073,72,null,{"$raw":"00000000"},"Fora",2,"Buffer - Cascalheira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,78.10232629000,0,78.10232629290,255.29334375700]
[1074,73,null,{"$raw":"00000000"},"141919",2,"Buffer - Caseiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,521.49370445000,0,521.49370445500,10298.85519980000]
[1075,73,null,{"$raw":"00000000"},"141919",2,"Buffer - Caseiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,997.02146288000,0,997.02146288400,36378.27078900000]
[1076,73,null,{"$raw":"00000000"},"141919",2,"Buffer - Caseiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1321.69151691000,0,1321.69151691000,52864.13746730000]
[1077,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,103.01796995000,9999,103.01796995300,545.83367592900]
[1078,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,170.37958491000,0,170.37958491700,630.51645720200]
[1079,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,194.71805898000,9999,194.71805898600,829.43931419700]
[1080,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,200.43123420000,0,200.43123420200,1954.57776341000]
[1081,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,380.88916980000,9999,380.88916980000,3284.34893677000]
[1082,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,272.21446654000,0,272.21446654500,3616.50772813000]
[1083,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,462.84476770000,0,462.84476770300,4585.84051657000]
[1084,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,653.53489648000,9999,653.53489648100,5258.35014115000]
[1085,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,441.76203065000,0,441.76203065500,11131.82985970000]
[1086,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,541.00581492000,0,541.00581492400,13756.20216550000]
[1087,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,678.31733003000,9999,678.31733003700,17868.60956160000]
[1088,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1202.17043748000,0,1202.17043748000,38197.40039290000]
[1089,74,null,{"$raw":"00000000"},"141920",2,"Buffer - Caveira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1731.88332098000,0,1731.88332098000,62817.89590670000]
[1090,75,null,{"$raw":"00000000"},"141909",3,"Buffer - Centro Escola PNSAC","FRC",2,0.00000000000,100,"Entidades responsáveis","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,102.67506319000,9999,102.67506319000,567.96033554900]
[1091,75,null,{"$raw":"00000000"},"141909",3,"Buffer - Centro Escola PNSAC","FRC",2,0.00000000000,100,"Entidades responsáveis","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,868.40027729000,9999,868.40027729100,20611.04608200000]
[1092,75,null,{"$raw":"00000000"},"141909",3,"Buffer - Centro Escola PNSAC","FRC",2,0.00000000000,100,"Entidades responsáveis",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,896.77736808000,0,896.77736808600,20805.57641010000]
[1093,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,80.11619909000,0,80.11619909420,379.05652490100]
[1094,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,134.94123738000,0,134.94123738400,539.66960948200]
[1095,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,117.56080176000,0,117.56080176400,558.99954410300]
[1096,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,229.85293737000,0,229.85293737600,1439.93976440000]
[1097,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,196.39339012000,9999,196.39339012900,1503.83442613000]
[1098,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,179.13774839000,9999,179.13774839700,2010.04341251000]
[1099,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,465.91819661000,9999,465.91819661600,7771.49145585000]
[1100,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,385.52936551000,9999,385.52936551800,8417.19871438000]
[1101,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,567.89398824000,0,567.89398824900,16215.19147490000]
[1102,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1994.72334133000,0,1994.72334133000,74598.32565760000]
[1103,76,null,{"$raw":"00000000"},"141904",2,"Buffer - Chancelaria e Lugarinho","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,4038.42593407000,0,4062.10728251000,155003.03537000000]
[1104,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,103.72815147000,9999,103.72815147000,714.42137379800]
[1105,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,110.70673488000,9999,110.70673488600,731.30547996800]
[1106,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,172.53047399000,9999,172.53047399400,947.37547842000]
[1107,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,135.16822150000,9999,135.16822150800,980.23478812000]
[1108,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,230.80960866000,0,230.80960866700,1342.84528797000]
[1109,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,166.04808941000,9999,166.04808941300,1816.42154380000]
[1110,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,208.80954887000,9999,208.80954887900,2072.30719729000]
[1111,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,243.47869287000,9999,243.47869287300,3711.97802785000]
[1112,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,310.22622929000,9999,310.22622929800,4671.87316822000]
[1113,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,741.55393031000,0,741.55393031100,22347.03450520000]
[1114,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1796.16280560000,0,1796.16280560000,26841.26863290000]
[1115,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1198.86655746000,0,1198.86655746000,40538.16990610000]
[1117,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2851.00399599000,0,2851.00399599000,106187.21745200000]
[1118,77,null,{"$raw":"00000000"},"Fora",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,169.73714100000,0,169.73714100100,1338.56837319000]
[1119,77,null,{"$raw":"00000000"},"Fora",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,390.95121841000,0,390.95121841400,7629.92077496000]
[1120,78,null,{"$raw":"00000000"},"141902",2,"Buffer - Charruada","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,330.86619169000,9999,330.86619169800,2803.79366622000]
[1121,78,null,{"$raw":"00000000"},"141902",2,"Buffer - Charruada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,374.19030900000,0,374.19030900800,4264.51562153000]
[1122,78,null,{"$raw":"00000000"},"141902",2,"Buffer - Charruada","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,528.06753960000,9999,528.06753960500,4347.16800790000]
[1123,78,null,{"$raw":"00000000"},"141902",2,"Buffer - Charruada","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,380.79740528000,9999,380.79740528600,7631.44178892000]
[1124,78,null,{"$raw":"00000000"},"141902",2,"Buffer - Charruada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1531.95531941000,0,1531.95531941000,45441.33896670000]
[1125,78,null,{"$raw":"00000000"},"141902",2,"Buffer - Charruada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1580.46832091000,0,1580.46832091000,61569.85417950000]
[1126,78,null,{"$raw":"00000000"},"141902",2,"Buffer - Charruada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1782.64886498000,0,1782.64886498000,65790.56604020001]
[1127,78,null,{"$raw":"00000000"},"141904",2,"Buffer - Charruada","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,128.81229208000,9999,128.81229208700,689.07291962600]
[1128,78,null,{"$raw":"00000000"},"141904",2,"Buffer - Charruada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,155.72362159000,0,155.72362159000,1107.97570119000]
[1129,78,null,{"$raw":"00000000"},"141904",2,"Buffer - Charruada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,355.16317377000,0,355.16317377900,5609.59272436000]
[1130,79,null,{"$raw":"00000000"},"141919",2,"Buffer - Chícharo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,180.78714988000,0,180.78714988900,730.11333084900]
[1131,79,null,{"$raw":"00000000"},"141919",2,"Buffer - Chícharo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,366.25775310000,9999,366.25775310900,2238.05040503000]
[1132,79,null,{"$raw":"00000000"},"141919",2,"Buffer - Chícharo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,276.86608652000,0,276.86608652100,2762.70218092000]
[1133,79,null,{"$raw":"00000000"},"141919",2,"Buffer - Chícharo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,535.06494207000,9999,535.06494207400,5003.67610212000]
[1134,79,null,{"$raw":"00000000"},"141919",2,"Buffer - Chícharo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,642.18377587000,9999,642.18377587000,6157.48156942000]
[1135,79,null,{"$raw":"00000000"},"141919",2,"Buffer - Chícharo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,780.89068993000,0,780.89068993100,6802.97225459000]
[1136,79,null,{"$raw":"00000000"},"141919",2,"Buffer - Chícharo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,3032.76959541000,0,3032.76959541000,82855.61689260000]
[1137,80,null,{"$raw":"00000000"},"141920",3,"Buffer - Cotôas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,146.23962555000,0,146.23962555700,887.53507185200]
[1138,80,null,{"$raw":"00000000"},"141920",3,"Buffer - Cotôas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,163.74558863000,0,163.74558863300,1677.29724286000]
[1139,80,null,{"$raw":"00000000"},"141920",3,"Buffer - Cotôas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,227.68097415000,0,227.68097415500,2089.65779317000]
[1140,80,null,{"$raw":"00000000"},"141920",3,"Buffer - Cotôas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,546.13628469000,0,546.13628469000,5725.22329207000]
[1141,80,null,{"$raw":"00000000"},"141920",3,"Buffer - Cotôas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,292.33324451000,0,292.33324451000,6101.21110708000]
[1142,80,null,{"$raw":"00000000"},"141920",3,"Buffer - Cotôas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,411.58182451000,0,411.58182451200,9925.54844922000]
[1143,80,null,{"$raw":"00000000"},"141920",3,"Buffer - Cotôas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,800.79377689000,0,800.79377689600,13454.14025130000]
[1144,80,null,{"$raw":"00000000"},"141920",3,"Buffer - Cotôas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1829.26308541000,0,1829.26308541000,32826.78784350000]
[1145,80,null,{"$raw":"00000000"},"141920",3,"Buffer - Cotôas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1578.95734851000,0,1578.95734851000,41630.47203850000]
[1146,80,null,{"$raw":"00000000"},"141920",3,"Buffer - Cotôas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1329.04347977000,0,1329.04347977000,48437.23814200000]
[1147,81,null,{"$raw":"00000000"},"141920",3,"Buffer - CRIT","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,150.18083185000,0,150.18083185200,913.53003819200]
[1148,81,null,{"$raw":"00000000"},"141920",3,"Buffer - CRIT","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1914.77882728000,0,1914.77882728000,71744.78097350000]
[1149,82,null,{"$raw":"00000000"},"141902",2,"Buffer - Cruz da Pedra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,85.37831944000,9999,85.37831944180,438.81576865500]
[1150,82,null,{"$raw":"00000000"},"141902",2,"Buffer - Cruz da Pedra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,114.69285342000,9999,114.69285342800,677.74089784700]
[1151,82,null,{"$raw":"00000000"},"141902",2,"Buffer - Cruz da Pedra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,660.55372710000,0,660.55372710700,18387.45684980000]
[1152,82,null,{"$raw":"00000000"},"141902",2,"Buffer - Cruz da Pedra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,720.46127453000,0,720.46127453900,24696.80120900000]
[1153,82,null,{"$raw":"00000000"},"141902",2,"Buffer - Cruz da Pedra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,881.34758931000,0,881.34758931000,32346.49964130000]
[1154,83,null,{"$raw":"00000000"},"141920",3,"Buffer - ERAN","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,470.89320291000,9999,470.89320291000,10941.02751280000]
[1155,83,null,{"$raw":"00000000"},"141920",3,"Buffer - ERAN","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,520.21040845000,9999,520.21040845900,14712.76481070000]
[1156,83,null,{"$raw":"00000000"},"141920",3,"Buffer - ERAN","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1593.32125507000,0,1593.32125507000,32529.52537720000]
[1157,84,null,{"$raw":"00000000"},"141921",3,"Buffer - Fábrica de Papel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,114.76862935000,0,114.76862935400,739.37361495400]
[1158,84,null,{"$raw":"00000000"},"141921",3,"Buffer - Fábrica de Papel","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,415.22493104000,0,415.22493104700,6103.31094220000]
[1159,84,null,{"$raw":"00000000"},"141921",3,"Buffer - Fábrica de Papel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,870.60794624000,0,870.60794624400,28017.16877620000]
[1160,84,null,{"$raw":"00000000"},"141921",3,"Buffer - Fábrica de Papel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1282.11694216000,0,1282.11694216000,45588.01263190000]
[1161,85,null,{"$raw":"00000000"},"141918",2,"Buffer - Faia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,311.07765680000,0,311.07765680100,2930.06346478000]
[1163,86,null,{"$raw":"00000000"},"141920",3,"Buffer - Falux e Fabrióleo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,269.84417658000,9999,269.84417658000,2795.53821312000]
[1164,86,null,{"$raw":"00000000"},"141920",3,"Buffer - Falux e Fabrióleo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,265.55950450000,0,265.55950450100,2854.82077034000]
[1165,86,null,{"$raw":"00000000"},"141920",3,"Buffer - Falux e Fabrióleo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,269.77402967000,0,269.77402967300,2902.07156218000]
[1166,86,null,{"$raw":"00000000"},"141920",3,"Buffer - Falux e Fabrióleo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,369.05019431000,0,369.05019431700,8511.67352825000]
[1167,86,null,{"$raw":"00000000"},"141920",3,"Buffer - Falux e Fabrióleo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,909.38692635000,9999,909.38692635300,27997.77382340000]
[1168,87,null,{"$raw":"00000000"},"141920",2,"Buffer - Foros da Barreta","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1777.47972601000,0,1777.47972601000,77209.25354130000]
[1169,87,null,{"$raw":"00000000"},"141920",2,"Buffer - Foros da Barreta","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,3965.73931475000,0,3965.73931475000,179621.06333700000]
[1170,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,97.77941736000,0,97.77941736000,142.62197904200]
[1171,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,86.92895247000,9999,86.92895247250,490.71032414600]
[1172,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,107.73876843000,0,107.73876843800,604.90956830500]
[1173,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,186.98198767000,9999,186.98198767000,879.54613709900]
[1174,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,151.30156344000,0,151.30156344200,1133.36369158000]
[1175,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,191.16899257000,0,191.16899257300,1278.96333101000]
[1176,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,297.50911896000,0,297.50911896700,2227.79114563000]
[1177,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,5,213.15462366000,9999,213.15462366100,2403.36698567000]
[1178,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,383.67473356000,0,383.67473356900,3380.81687773000]
[1179,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,5,249.13176993000,9999,249.13176993500,3397.55545283000]
[1180,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,254.69174284000,0,254.69174284600,3543.58294515000]
[1181,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,5,590.66880408000,9999,590.66880408800,3900.36653724000]
[1182,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,324.92850028000,9999,324.92850028100,3980.14614940000]
[1183,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,5,406.03878175000,9999,406.03878175500,4480.81091313000]
[1184,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,314.58875645000,0,314.58875645000,4800.81237497000]
[1185,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,540.80997411000,9999,540.80997411500,7085.12470534000]
[1186,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,386.19002625000,0,386.19002625200,7453.94787155000]
[1187,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,718.52695754000,9999,718.52695754400,8325.01946780000]
[1188,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,557.28505458000,0,557.28505458400,9145.85317300000]
[1189,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"MDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,5,604.08819737000,9999,604.08819737700,9163.89286681000]
[1190,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,5,538.20161825000,9999,538.20161825300,11363.70353650000]
[1191,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1417.76549664000,0,1417.76549664000,20208.96282740000]
[1193,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1427.58420074000,9999,1427.58420074000,28347.78526280000]
[1194,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1320.49847658000,9999,1320.49847658000,38037.92259320000]
[1195,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1669.85596090000,0,1669.85596090000,42189.68918560000]
[1196,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,2696.56339617000,0,2696.56339617000,53103.22905740000]
[1197,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,2182.30475959000,0,2182.30475959000,53240.35356040000]
[1198,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1648.42785969000,0,1648.42785969000,67691.96301750001]
[1199,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,2289.59071211000,0,2289.59071211000,76524.39129220000]
[1200,88,null,{"$raw":"00000000"},"Fora",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,653.84618975000,0,653.84618975000,7042.61204739000]
[1201,88,null,{"$raw":"00000000"},"Fora",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1054.27920322000,0,1054.27920322000,22385.81599800000]
[1202,89,null,{"$raw":"00000000"},"141919",2,"Buffer - Gateiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,622.99099134000,0,622.99099134000,9851.88398952000]
[1203,89,null,{"$raw":"00000000"},"141920",2,"Buffer - Gateiras","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,309.41940323000,0,309.41940323800,3404.85190510000]
[1204,89,null,{"$raw":"00000000"},"141920",2,"Buffer - Gateiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,902.13205807000,0,902.13205807500,33773.66983740000]
[1205,89,null,{"$raw":"00000000"},"141920",2,"Buffer - Gateiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1621.71025279000,0,1621.71025279000,60848.02062190000]
[1206,89,null,{"$raw":"00000000"},"141920",2,"Buffer - Gateiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2348.30168407000,0,2348.30168407000,87426.81244949999]
[1207,90,null,{"$raw":"00000000"},"141920",2,"Buffer - Gavata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,387.28460558000,0,387.28460558800,2251.64046737000]
[1208,90,null,{"$raw":"00000000"},"141920",2,"Buffer - Gavata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,234.16519768000,0,234.16519768500,2930.48513736000]
[1209,90,null,{"$raw":"00000000"},"141920",2,"Buffer - Gavata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,270.06371081000,0,270.06371081800,3203.76473366000]
[1210,90,null,{"$raw":"00000000"},"141920",2,"Buffer - Gavata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1107.72995698000,0,1107.72995698000,40540.41616150000]
[1211,90,null,{"$raw":"00000000"},"141920",2,"Buffer - Gavata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1813.18871245000,0,1813.18871245000,72273.36455040000]
[1212,91,null,{"$raw":"00000000"},"141920",3,"Buffer - HOSPITAL","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,179.64585501000,0,179.64585501200,1234.90895921000]
[1213,91,null,{"$raw":"00000000"},"141920",3,"Buffer - HOSPITAL","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,228.97884547000,0,228.97884547700,1270.91148978000]
[1214,91,null,{"$raw":"00000000"},"141920",3,"Buffer - HOSPITAL","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,216.79804794000,0,216.79804794600,2534.19396526000]
[1215,91,null,{"$raw":"00000000"},"141920",3,"Buffer - HOSPITAL","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,275.08850729000,0,275.08850729600,2900.03494365000]
[1216,91,null,{"$raw":"00000000"},"141920",3,"Buffer - HOSPITAL","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,495.15772764000,0,495.15772764600,9257.84582502000]
[1217,91,null,{"$raw":"00000000"},"141920",3,"Buffer - HOSPITAL","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,570.13205605000,0,570.13205605800,13907.08031660000]
[1218,91,null,{"$raw":"00000000"},"141920",3,"Buffer - HOSPITAL","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,547.38302857000,0,547.38302857400,14918.01070670000]
[1219,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,52.41163097000,0,52.41163097600,104.19760954900]
[1220,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,119.30267573000,0,119.30267573000,555.86976634500]
[1221,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,181.26776411000,0,181.26776411900,874.50164374600]
[1222,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,224.76046225000,0,224.76046225200,1146.17970591000]
[1223,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,184.76516720000,0,184.76516720900,1178.76572026000]
[1224,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,224.19413680000,0,224.19413680900,2413.56836441000]
[1225,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,402.26201206000,0,402.26201206900,2842.06646241000]
[1226,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,497.84085762000,0,497.84085762200,2895.81755918000]
[1227,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,506.98927136000,0,506.98927136900,5832.53738923000]
[1228,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,335.49615883000,0,335.49615883300,7317.56180646000]
[1229,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,678.84270678000,0,678.84270678900,17051.10012730000]
[1230,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,768.66477530000,0,768.66477530100,27052.23954650000]
[1231,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,844.67916873000,0,844.67916873500,28585.48242800000]
[1232,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1134.60770125000,0,1134.60770125000,43540.10348540000]
[1233,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1957.60564984000,0,1957.60564984000,62997.14137120000]
[1234,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1819.02194543000,0,1819.02194543000,76542.59153060000]
[1235,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2442.34422505000,0,2442.34422505000,86628.88725040000]
[1236,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2645.43352373000,0,2645.43352373000,88992.01017720001]
[1237,92,null,{"$raw":"00000000"},"141919",2,"Buffer - Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2206.88702673000,0,2206.88702673000,91180.44141340000]
[1238,93,null,{"$raw":"00000000"},"141921",2,"Buffer - Lapas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,580.34362948000,0,580.34362948700,13833.73881020000]
[1239,93,null,{"$raw":"00000000"},"141921",2,"Buffer - Lapas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,738.34423437000,0,738.34423437800,18454.05912820000]
[1240,93,null,{"$raw":"00000000"},"141921",2,"Buffer - Lapas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1137.59585319000,0,1137.59585319000,37149.61775680000]
[1241,93,null,{"$raw":"00000000"},"141921",2,"Buffer - Lapas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1649.59110271000,0,1649.59110271000,62702.97833170000]
[1242,93,null,{"$raw":"00000000"},"141921",2,"Buffer - Lapas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1561.19323510000,0,1561.19323510000,62735.33339160000]
[1243,93,null,{"$raw":"00000000"},"141921",2,"Buffer - Lapas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,4319.33036771000,0,4319.33036771000,190806.07064399999]
[1244,93,null,{"$raw":"00000000"},"141921",2,"Buffer - Lapas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,607.66239821000,0,607.66239821600,15895.44675930000]
[1245,93,null,{"$raw":"00000000"},"141921",2,"Buffer - Lapas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1379.22829912000,0,1379.22829912000,50942.12437460000]
[1246,94,null,{"$raw":"00000000"},"141918",2,"Buffer - Liteiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,139.39262884000,0,139.39262884800,958.87599185900]
[1247,94,null,{"$raw":"00000000"},"141918",2,"Buffer - Liteiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,203.99811929000,0,203.99811929800,1942.12034134000]
[1248,94,null,{"$raw":"00000000"},"141920",2,"Buffer - Liteiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,245.41955739000,0,245.41955739000,3039.78950937000]
[1249,94,null,{"$raw":"00000000"},"141920",2,"Buffer - Liteiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1306.47763231000,0,1306.47763231000,52983.75305920000]
[1250,94,null,{"$raw":"00000000"},"141920",2,"Buffer - Liteiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2477.66576326000,0,2477.66576326000,100498.74321400000]
[1251,94,null,{"$raw":"00000000"},"141920",2,"Buffer - Liteiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2705.59789722000,0,2705.59789722000,120227.15695700000]
[1252,94,null,{"$raw":"00000000"},"141920",2,"Buffer - Liteiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2848.94883511000,0,2848.94883511000,126463.36969500000]
[1253,94,null,{"$raw":"00000000"},"141916",2,"Buffer - Liteiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,319.20310612000,0,319.20310612600,2468.71948617000]
[1254,94,null,{"$raw":"00000000"},"141916",2,"Buffer - Liteiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,345.98976907000,0,345.98976907500,6518.65594418000]
[1255,94,null,{"$raw":"00000000"},"141916",2,"Buffer - Liteiros","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,573.91890205000,0,573.91890205800,13842.46287760000]
[1256,95,null,{"$raw":"00000000"},"141904",2,"Buffer - Maçaroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,262.03954428000,0,262.03954428000,1703.47836894000]
[1257,95,null,{"$raw":"00000000"},"141904",2,"Buffer - Maçaroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,452.51770942000,0,452.51770942600,12296.15167550000]
[1258,95,null,{"$raw":"00000000"},"141904",2,"Buffer - Maçaroca","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1127.04266658000,9999,1127.04266658000,19644.44368540000]
[1259,95,null,{"$raw":"00000000"},"141904",2,"Buffer - Maçaroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1763.52320689000,0,1763.52320689000,34605.59956000000]
[1260,95,null,{"$raw":"00000000"},"141904",2,"Buffer - Maçaroca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1818.83533341000,0,1818.83533341000,78348.45281829999]
[1261,96,null,{"$raw":"00000000"},"141920",2,"Buffer - Marruas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1484.68072542000,0,1484.68072542000,58071.67591540000]
[1262,96,null,{"$raw":"00000000"},"141920",2,"Buffer - Marruas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,4309.83569042000,0,4345.01836111000,191939.07896899999]
[1263,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,93.01501969000,0,93.01501969110,386.40038113500]
[1264,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,96.10868609000,9999,96.10868609680,526.20478664900]
[1265,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,129.20688198000,0,129.20688198400,890.15327620500]
[1266,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,139.45564893000,0,139.45564893700,1010.27263360000]
[1267,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,163.44490359000,0,163.44490359500,1068.16407735000]
[1268,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,138.49780919000,9999,138.49780919300,1087.95658960000]
[1269,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,167.35962758000,0,167.35962758100,1315.60814951000]
[1270,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,188.87785877000,0,188.87785877600,1684.80871933000]
[1271,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,220.92140490000,9999,220.92140490100,1773.99583146000]
[1272,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,262.31115531000,0,262.31115531900,1830.29809238000]
[1273,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,306.38506701000,9999,306.38506701900,1934.50660122000]
[1274,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,3,207.81664088000,9999,207.81664088400,1995.89480507000]
[1275,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,265.70888250000,9999,265.70888250000,2498.25255573000]
[1276,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,227.14038740000,9999,227.14038740400,2517.88626279000]
[1277,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,3,301.82465322000,9999,301.82465322400,3794.68466752000]
[1278,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,563.34899859000,0,563.34899859500,4589.04273442000]
[1279,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,410.98552872000,0,410.98552872400,4895.31066504000]
[1280,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,3,499.64439255000,9999,499.64439255200,6109.91711880000]
[1281,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,385.54087717000,9999,385.54087717500,7351.69989561000]
[1282,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,457.18532334000,9999,457.18532334100,8646.64666991000]
[1283,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,738.16457790000,9999,738.16457790000,11075.25793050000]
[1284,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,836.79441309000,9999,836.79441309000,14510.75004330000]
[1285,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,935.24805228000,0,935.24805228300,17313.65686800000]
[1286,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,686.20787214000,0,686.20787214400,18007.08290170000]
[1287,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,921.20147560000,9999,921.20147560000,19788.44111140000]
[1288,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,1114.19015780000,9999,1100.75901503000,27606.55857720000]
[1289,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2136.87364099000,0,2111.70856947000,67366.99472010000]
[1290,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,3278.59357587000,0,3188.53133952000,78112.57368849999]
[1292,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,77.78235266000,0,77.78235266000,109.06987099100]
[1293,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,135.40496158000,0,135.40496158700,313.24439715400]
[1294,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,128.91715392000,9999,128.91715392500,532.33830068600]
[1295,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,105.49520911000,0,105.49520911000,578.71745105400]
[1296,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,133.01870963000,9999,133.01870963400,984.22538878500]
[1297,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,391.01441296000,9999,391.01441296200,2759.53558911000]
[1298,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,480.96147599000,9999,480.96147599200,13735.15853790000]
[1299,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,869.20263672000,0,869.20263672700,27705.56117900000]
[1300,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,843.91499361000,0,843.91499361800,31400.51074050000]
[1301,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,907.35703284000,0,907.35703284900,31444.40073390000]
[1303,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,88.69523454000,0,88.69523454140,356.72225089500]
[1304,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,151.88134344000,0,151.88134344500,386.56656968000]
[1305,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,111.00340307000,9999,111.00340307900,680.12654212800]
[1306,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,107.07196492000,9999,107.07196492400,688.21085384900]
[1307,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,144.71038167000,9999,144.71038167100,703.52657909800]
[1308,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,128.12971291000,9999,128.12971291900,714.96592052300]
[1309,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,169.15440850000,0,169.15440850500,770.22972309700]
[1310,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,129.58894972000,9999,129.58894972200,808.69456558800]
[1311,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,157.42873950000,9999,157.42873950700,948.19163899800]
[1312,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,162.93611020000,9999,162.93611020300,1165.02139758000]
[1313,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,160.32009675000,9999,160.32009675200,1362.96747459000]
[1314,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,227.06524731000,9999,227.06524731100,1440.35906951000]
[1315,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,290.76700493000,0,290.76700493400,1622.78293914000]
[1316,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,228.38524334000,0,228.38524334700,1658.18637508000]
[1331,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,488.15772378000,9999,488.15772378500,6257.65289269000]
[1332,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,370.40605064000,9999,370.40605064400,6998.41549618000]
[1333,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,496.35749670000,9999,496.35749670200,7950.87565632000]
[1334,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,624.70028449000,9999,624.70028449100,8156.94625621000]
[1335,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,475.85900519000,0,475.85900519400,8777.33177353000]
[1337,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,456.55185620000,0,456.55185620000,9681.16820452000]
[1338,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1266.98056247000,0,1266.98056247000,13898.76605810000]
[1339,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,745.68777710000,0,745.68777710300,14200.58727460000]
[1340,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,863.26840166000,0,863.26840166400,20786.10855100000]
[1341,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,944.36532197000,9999,944.36532197100,22897.04956740000]
[1342,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1872.32995645000,0,1872.32995645000,25294.00347730000]
[1343,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1692.97301101000,0,1692.97301101000,30026.41289380000]
[1344,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,959.66088229000,0,959.66088229300,32857.95162600000]
[1345,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1047.15628090000,0,1047.15628090000,40025.30882700000]
[1346,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2442.76868344000,0,2442.76868344000,47914.56737200000]
[1347,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2945.62833632000,0,2945.62833632000,75819.63218260001]
[1348,98,null,{"$raw":"00000000"},"Fora",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,115.24651543000,0,115.24651543600,552.52794161700]
[1349,98,null,{"$raw":"00000000"},"Fora",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,362.80721107000,0,362.80721107400,6421.52186399000]
[1350,98,null,{"$raw":"00000000"},"Fora",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,548.70379776000,9999,548.70379776200,17052.37833150000]
[1351,98,null,{"$raw":"00000000"},"Fora",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1080.89727673000,0,1080.89727673000,21317.14563490000]
[1352,98,null,{"$raw":"00000000"},"Fora",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2352.23683464000,0,2352.23683464000,101061.03699900000]
[1353,99,null,{"$raw":"00000000"},"141920",2,"Buffer - Meziões","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,149.68221156000,0,149.68221156500,960.02090953900]
[1354,99,null,{"$raw":"00000000"},"141920",2,"Buffer - Meziões","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,832.31288937000,0,832.31288937000,29589.67845160000]
[1355,99,null,{"$raw":"00000000"},"141920",2,"Buffer - Meziões","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1361.39241289000,0,1361.39241289000,53385.38043490000]
[1356,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,57.46988760000,9999,57.46988760440,160.71823175600]
[1357,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,148.81145997000,9999,148.81145997200,605.05285948000]
[1358,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,177.57673227000,9999,177.57673227400,977.22958763500]
[1359,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,137.76903213000,9999,137.76903213000,1063.15427052000]
[1360,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,145.88957743000,9999,145.88957743500,1348.22399645000]
[1361,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,277.07243627000,9999,277.07243627700,1834.26422187000]
[1362,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,256.67593854000,9999,256.67593854800,2251.15679750000]
[1363,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,246.55296980000,9999,246.55296980600,2564.82305790000]
[1364,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,371.83435942000,9999,371.83435942400,2884.24014920000]
[1365,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,262.84723069000,0,262.84723069300,3062.95451620000]
[1366,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,413.03024686000,9999,413.03024686800,3870.71482739000]
[1367,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,383.69326226000,9999,383.69326226200,4335.72205253000]
[1368,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,381.47792177000,9999,381.47792177100,4417.14766002000]
[1369,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,344.65508250000,9999,344.65508250000,4846.78274350000]
[1370,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,691.63821803000,0,691.63821803900,8731.54645628000]
[1371,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,543.88873197000,9999,543.88873197700,10358.29513520000]
[1372,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,701.65284356000,9999,701.65284356600,10447.94244860000]
[1373,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1117.48310768000,0,1117.48310768000,36597.35159710000]
[1375,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,3276.51265363000,0,3276.51265363000,108912.61616200001]
[1376,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,3097.27967810000,0,3097.27967810000,120081.24869900000]
[1377,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,3156.48508980000,0,3156.48508980000,123363.73944300000]
[1378,101,null,{"$raw":"00000000"},"141910",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,440.92697807000,0,440.92697807700,7926.47615640000]
[1379,101,null,{"$raw":"00000000"},"141910",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,939.84063253000,0,939.84063253000,23691.84133230000]
[1380,101,null,{"$raw":"00000000"},"141910",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,928.91419978000,0,928.91419978500,34499.64285370000]
[1381,101,null,{"$raw":"00000000"},"141910",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1156.92351306000,0,1156.92351306000,47258.24678800000]
[1382,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,229.74704438000,9999,229.74704438900,2455.49428662000]
[1383,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,321.57867386000,0,321.57867386600,4841.40216567000]
[1384,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,406.92933716000,0,406.92933716300,4890.65551059000]
[1385,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1050.81963486000,0,1050.81963486000,15702.14234940000]
[1386,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,797.89533817000,9999,797.89533817500,17077.46527290000]
[1387,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,708.23908985000,0,708.23908985000,23249.98495890000]
[1388,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1336.73402226000,0,1336.73402226000,45869.76979470000]
[1389,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1252.08547031000,0,1252.08547031000,52444.67161520000]
[1390,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,44.85723783000,0,44.85723783930,23.26279120560]
[1391,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,122.51225496000,0,122.51225496700,155.89616563300]
[1392,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,190.70241536000,0,190.70241536100,1750.46838233000]
[1393,101,null,{"$raw":"00000000"},"141920",2,"Buffer - Nicho dos Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,539.57451148000,0,539.57451148500,12357.49668560000]
[1394,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,107.31589959000,9999,107.31589959400,702.74859027300]
[1395,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,134.37056843000,0,134.37056843200,1107.86585260000]
[1396,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,4,211.01067001000,9999,211.01067001700,1302.71963119000]
[1397,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,257.15844759000,9999,257.15844759400,2374.37408392000]
[1398,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,349.29739715000,9999,349.29739715700,3405.31809114000]
[1399,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,332.94157860000,9999,332.94157860900,3514.00502347000]
[1400,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,387.57038440000,9999,387.57038440500,4272.85186262000]
[1401,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,4,286.97941364000,9999,286.97941364400,4351.66201195000]
[1402,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,446.88042863000,9999,446.88042863100,4524.10787827000]
[1403,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,4,329.96755972000,9999,329.96755972900,4606.82313908000]
[1404,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,440.13408180000,0,440.13408180500,6533.08607835000]
[1405,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,500.58838635000,9999,500.58838635600,9108.05326760000]
[1406,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,2496.81690486000,0,2456.55672139000,95737.56340410000]
[1407,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,3549.07968637000,0,3549.07968637000,138865.93138600001]
[1409,102,null,{"$raw":"00000000"},"141904",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,209.67252003000,0,209.67252003100,2488.20955323000]
[1410,103,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Pequeno","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,3016.23200114000,0,3016.23200114000,135034.65336000000]
[1411,104,null,{"$raw":"00000000"},"141919",2,"Buffer - Paço","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,199.35252891000,9999,199.35252891000,1000.91000160000]
[1412,104,null,{"$raw":"00000000"},"141919",2,"Buffer - Paço","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,149.71051114000,0,149.71051114900,1468.45890989000]
[1413,104,null,{"$raw":"00000000"},"141919",2,"Buffer - Paço","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,176.57169801000,9999,176.57169801900,2102.96188192000]
[1414,104,null,{"$raw":"00000000"},"141919",2,"Buffer - Paço","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,360.51462952000,9999,360.51462952400,3121.40762312000]
[1415,104,null,{"$raw":"00000000"},"141919",2,"Buffer - Paço","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,416.89551992000,9999,416.89551992500,4982.35243125000]
[1416,104,null,{"$raw":"00000000"},"141919",2,"Buffer - Paço","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,297.31413907000,9999,297.31413907700,5104.69028606000]
[1417,104,null,{"$raw":"00000000"},"141919",2,"Buffer - Paço","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,587.04259329000,9999,587.04259329800,10240.58744150000]
[1419,104,null,{"$raw":"00000000"},"141919",2,"Buffer - Paço","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2540.52714369000,0,2540.52714369000,93517.06074380000]
[1420,104,null,{"$raw":"00000000"},"141919",2,"Buffer - Paço","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2420.98122086000,0,2420.98122086000,100094.91137700000]
[1421,105,null,{"$raw":"00000000"},"141904",2,"Buffer - Pafarrão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,109.46275093000,0,109.46275093100,419.26651881500]
[1422,105,null,{"$raw":"00000000"},"141904",2,"Buffer - Pafarrão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,207.37636857000,0,207.37636857800,1486.62292782000]
[1423,105,null,{"$raw":"00000000"},"141904",2,"Buffer - Pafarrão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,176.31709970000,0,176.31709970900,1616.91378539000]
[1425,105,null,{"$raw":"00000000"},"141904",2,"Buffer - Pafarrão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,306.62416147000,9999,306.62416147100,4311.33151054000]
[1426,105,null,{"$raw":"00000000"},"141904",2,"Buffer - Pafarrão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,770.95766158000,9999,770.95766158900,23170.32846550000]
[1427,105,null,{"$raw":"00000000"},"141904",2,"Buffer - Pafarrão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1243.78197323000,0,1245.95378248000,43351.63648720000]
[1428,105,null,{"$raw":"00000000"},"141904",2,"Buffer - Pafarrão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1520.68971309000,0,1520.68971309000,46303.70575980000]
[1429,105,null,{"$raw":"00000000"},"141904",2,"Buffer - Pafarrão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1639.41502937000,0,1639.41502937000,52617.42209500000]
[1430,105,null,{"$raw":"00000000"},"141904",2,"Buffer - Pafarrão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1349.17684320000,0,1349.17684320000,54460.41636760000]
[1431,106,null,{"$raw":"00000000"},"141921",3,"Buffer - Paiol","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1401.99314039000,0,1401.99314039000,57569.09698150000]
[1432,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,176.11916853000,0,176.11916853600,1002.69854637000]
[1433,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,171.98385394000,0,171.98385394800,1204.76642291000]
[1434,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,250.71289871000,9999,250.71289871100,1711.92954774000]
[1435,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,306.03695452000,9999,306.03695452900,2302.08081145000]
[1436,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,356.85022560000,0,356.85022560900,4983.40548753000]
[1437,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,329.95703190000,9999,329.95703190600,5644.38105395000]
[1438,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,464.95356253000,0,464.95356253800,10159.70015360000]
[1439,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,569.11012052000,0,569.11012052000,10257.39416590000]
[1440,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,554.52867381000,0,554.52867381000,13568.55465620000]
[1441,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,871.32636944000,0,871.32636944400,31118.79927230000]
[1442,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,959.34179826000,0,959.34179826600,32943.11080920000]
[1443,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1491.59016618000,0,1491.59016618000,52589.45800100000]
[1444,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1403.26402526000,0,1403.26402526000,54346.37647370000]
[1445,107,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1844.79978539000,0,1844.79978539000,68007.54392430000]
[1446,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,77.15593799000,9999,77.15593799030,276.90562846500]
[1447,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,126.70372477000,9999,126.70372477700,525.48217761400]
[1448,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,149.17831355000,9999,149.17831355800,992.68073120400]
[1449,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,197.06731579000,9999,197.06731579100,1102.26303014000]
[1450,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,195.42652733000,0,195.42652733100,1354.37912261000]
[1451,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,208.89394559000,9999,208.89394559000,2105.50390224000]
[1452,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,331.45182288000,0,331.45182288700,3214.97303497000]
[1453,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,306.93536392000,0,306.93536392300,3297.05788977000]
[1454,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,336.96260970000,0,336.96260970600,6059.21235474000]
[1455,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,503.90549118000,0,503.90549118100,7390.74442522000]
[1456,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,517.12739472000,0,517.12739472000,8390.67233760000]
[1457,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,462.99096847000,0,462.99096847100,8808.23902170000]
[1458,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,685.37525239000,0,685.37525239400,11942.32053560000]
[1459,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,678.80862759000,0,678.80862759200,14639.62562520000]
[1460,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,773.49000270000,9999,773.49000270200,18774.78731680000]
[1461,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,1298.95554275000,9999,1298.95554275000,22659.01530180000]
[1462,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,748.79730433000,0,748.79730433600,23175.80036960000]
[1463,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,855.78725625000,0,855.78725625000,23790.04894400000]
[1464,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1708.49476721000,0,1708.49476721000,50275.90613710000]
[1465,108,null,{"$raw":"00000000"},"141918",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1599.80049558000,0,1599.80049558000,65699.14917800001]
[1466,108,null,{"$raw":"00000000"},"Fora",2,"Buffer - Parceiros de São João","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1030.45114790000,0,1030.45114790000,35189.73960510000]
[1467,109,null,{"$raw":"00000000"},"141918",3,"Buffer - Parceria de Azeites","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,175.49798664000,9999,175.49798664900,1958.49676968000]
[1468,109,null,{"$raw":"00000000"},"141918",3,"Buffer - Parceria de Azeites","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,525.95189603000,0,525.95189603000,13125.68755650000]
[1469,109,null,{"$raw":"00000000"},"141918",3,"Buffer - Parceria de Azeites","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,818.16206759000,0,818.16206759500,22000.95402370000]
[1470,109,null,{"$raw":"00000000"},"141918",3,"Buffer - Parceria de Azeites","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1037.50864333000,0,1037.50864333000,30504.26030380000]
[1471,110,null,{"$raw":"00000000"},"141921",3,"Buffer - Parque de Campismo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1448.45492141000,0,1448.45492141000,61521.20090290000]
[1472,111,null,{"$raw":"00000000"},"141909",3,"Buffer - Parque de Merendas PNSAC","FRC",2,0.00000000000,100,"ICNF",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,166.75785096000,0,166.75785096200,1336.79692355000]
[1473,111,null,{"$raw":"00000000"},"141909",3,"Buffer - Parque de Merendas PNSAC","FRC",2,0.00000000000,100,"ICNF",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,479.21896298000,0,479.21896298000,7826.69020846000]
[1475,112,null,{"$raw":"00000000"},"141918",2,"Buffer - Paul do Boquilobo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,390.15605770000,0,390.15605770700,8242.80940364000]
[1476,112,null,{"$raw":"00000000"},"141918",2,"Buffer - Paul do Boquilobo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2199.61782182000,0,2199.61782182000,89783.82940120000]
[1477,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,172.45566730000,9999,172.45566730200,1362.56410186000]
[1478,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,308.05931539000,9999,308.05931539900,3183.91386526000]
[1479,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,314.43379259000,9999,314.43379259700,4440.05709910000]
[1480,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,458.56781953000,9999,458.56781953500,4795.35599866000]
[1481,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,462.36795662000,9999,462.36795662100,8954.07859608000]
[1482,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,803.14718808000,9999,803.14718808000,9487.08505307000]
[1483,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,968.88979111000,0,968.88979111000,28896.85110270000]
[1484,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1204.54880012000,0,1204.54880012000,29839.89883620000]
[1485,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1431.89379650000,0,1431.89379650000,33087.26581050000]
[1486,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1139.29154064000,0,1139.29154064000,43997.06405490000]
[1487,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1402.41202286000,0,1402.41202286000,51959.16323960000]
[1488,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,100.97082847000,0,100.97082847300,618.39949424900]
[1489,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,174.86367836000,9999,174.86367836800,1313.28794438000]
[1490,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,426.56010671000,0,426.56010671500,7596.75007701000]
[1491,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,513.19422661000,0,513.19422661400,9862.23427209000]
[1492,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,1161.29247213000,9999,1161.29247213000,16361.89258570000]
[1493,113,null,{"$raw":"00000000"},"141919",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1609.41069304000,0,1609.41069304000,47372.44986240000]
[1494,113,null,{"$raw":"00000000"},"Fora",2,"Buffer - Pé de Cão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,311.61117432000,0,311.61117432600,5526.37874247000]
[1495,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,79.22681671000,0,79.22681671180,317.06532455100]
[1496,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,139.29475476000,0,139.29475476300,388.00797384400]
[1497,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,96.82225262000,9999,96.82225262310,449.92862381100]
[1498,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,119.79905036000,9999,119.79905036400,592.30296959200]
[1499,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,195.41205949000,9999,195.41205949500,1613.97256992000]
[1500,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,192.19807323000,9999,192.19807323800,1618.58657969000]
[1501,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,167.25709567000,9999,167.25709567400,1741.41900115000]
[1502,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,204.98935441000,0,204.98935441500,2130.50260821000]
[1503,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,283.69242178000,0,283.69242178000,2222.71189248000]
[1504,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,258.78999755000,9999,258.78999755400,2248.89439708000]
[1505,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,270.58568627000,9999,270.58568627400,2312.84189444000]
[1506,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,253.31520194000,9999,253.31520194900,2315.81224990000]
[1507,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,279.18851156000,9999,279.18851156300,2401.23850878000]
[1508,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,328.99504690000,9999,328.99504690300,3404.63443171000]
[1509,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,596.09777580000,0,596.09777580000,3720.71353090000]
[1510,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,382.88261394000,9999,382.88261394200,3846.20657805000]
[1511,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,490.39938671000,9999,490.39938671000,4912.51383476000]
[1512,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,523.15156144000,9999,523.15156144900,7292.20781350000]
[1513,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,812.33212233000,0,812.33212233700,19349.45013080000]
[1514,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,736.59764072000,0,736.59764072400,21130.68566480000]
[1515,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,821.32748947000,0,821.32748947900,23555.89131660000]
[1516,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1419.59246579000,0,1419.59246579000,25533.72994880000]
[1517,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,853.65370554000,0,853.65370554900,29413.50913030000]
[1518,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,945.33297596000,0,945.33297596000,34970.67852030000]
[1519,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1281.81693120000,0,1281.81693120000,42614.87075070000]
[1520,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1571.25017178000,0,1685.51592542000,70690.42379220000]
[1521,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1908.47559308000,0,1908.47559308000,65276.10168560000]
[1523,115,null,{"$raw":"00000000"},"141904",3,"Buffer - Pegadas dos Dinossáurios","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,164.74238887000,9999,164.74238887500,646.20020921400]
[1524,115,null,{"$raw":"00000000"},"141904",3,"Buffer - Pegadas dos Dinossáurios","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,308.56762644000,9999,308.56762644100,2154.00826125000]
[1525,115,null,{"$raw":"00000000"},"141904",3,"Buffer - Pegadas dos Dinossáurios","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,225.79889900000,9999,225.79889900000,2330.37755540000]
[1526,115,null,{"$raw":"00000000"},"141904",3,"Buffer - Pegadas dos Dinossáurios","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,364.86267622000,0,364.86267622600,2986.19949211000]
[1527,115,null,{"$raw":"00000000"},"141904",3,"Buffer - Pegadas dos Dinossáurios","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,489.96382488000,0,489.96382488200,5109.54330469000]
[1528,115,null,{"$raw":"00000000"},"141904",3,"Buffer - Pegadas dos Dinossáurios","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,501.08273510000,0,501.08273510700,6913.77616028000]
[1529,115,null,{"$raw":"00000000"},"141904",3,"Buffer - Pegadas dos Dinossáurios","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,448.62164301000,9999,448.62164301500,7013.65488470000]
[1530,115,null,{"$raw":"00000000"},"141904",3,"Buffer - Pegadas dos Dinossáurios","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1158.03568002000,9999,1158.03568002000,33459.26681680000]
[1531,115,null,{"$raw":"00000000"},"Fora",3,"Buffer - Pegadas dos Dinossáurios","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,130.01706610000,9999,130.01706610100,750.28773290100]
[1532,115,null,{"$raw":"00000000"},"Fora",3,"Buffer - Pegadas dos Dinossáurios","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,2575.21630816000,0,2575.21630816000,107754.60498000000]
[1533,116,null,{"$raw":"00000000"},"141902",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,116.22967907000,0,116.22967907400,345.39962590300]
[1534,116,null,{"$raw":"00000000"},"141902",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,735.92924572000,0,735.92924572200,13325.70265290000]
[1535,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,143.08188877000,9999,143.08188877600,772.37661090600]
[1536,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,188.47460903000,9999,188.47460903600,1050.68986460000]
[1537,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,150.09831558000,0,150.09831558900,1378.53189393000]
[1538,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,235.39474262000,9999,235.39474262600,1575.94148801000]
[1539,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,212.15185365000,9999,212.15185365700,1638.36937742000]
[1540,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,195.49672583000,0,195.49672583000,1783.84102184000]
[1541,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,379.89467895000,9999,379.89467895100,6377.78057431000]
[1542,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,529.87175391000,0,529.87175391200,6808.75310757000]
[1543,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,468.54014837000,9999,468.54014837800,9486.83626117000]
[1544,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,1565.48241460000,9999,1565.48241460000,14384.96631650000]
[1545,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1725.08574886000,0,1725.08574886000,41528.87442370000]
[1546,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2019.91716028000,0,2019.91716028000,52627.12690280000]
[1547,116,null,{"$raw":"00000000"},"141904",2,"Buffer - Pena","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,3004.52265346000,0,3004.52265346000,97045.31213860000]
[1548,117,null,{"$raw":"00000000"},"141902",2,"Buffer - Pimenteiras","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,119.76917597000,9999,119.76917597400,775.53226596300]
[1549,117,null,{"$raw":"00000000"},"141902",2,"Buffer - Pimenteiras","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,146.28236681000,9999,146.28236681000,1028.83848848000]
[1550,117,null,{"$raw":"00000000"},"141902",2,"Buffer - Pimenteiras","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,178.94912951000,9999,178.94912951000,1436.59939324000]
[1551,117,null,{"$raw":"00000000"},"141902",2,"Buffer - Pimenteiras","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,255.08365180000,9999,255.08365180700,4199.62613007000]
[1552,117,null,{"$raw":"00000000"},"141902",2,"Buffer - Pimenteiras","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,469.54775199000,9999,469.54775199900,4208.10105378000]
[1553,117,null,{"$raw":"00000000"},"141902",2,"Buffer - Pimenteiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1563.53052217000,0,1563.53052217000,58613.48926700000]
[1554,117,null,{"$raw":"00000000"},"141902",2,"Buffer - Pimenteiras","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,2519.75323127000,0,2518.38881985000,81483.48078260000]
[1555,118,null,{"$raw":"00000000"},"141920",2,"Buffer - Pintainhos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,132.88551079000,9999,132.88551079600,864.58701203200]
[1556,118,null,{"$raw":"00000000"},"141920",2,"Buffer - Pintainhos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,157.86333718000,9999,157.86333718200,1350.08227120000]
[1557,118,null,{"$raw":"00000000"},"141920",2,"Buffer - Pintainhos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,230.70273841000,9999,230.70273841500,1609.03119999000]
[1558,118,null,{"$raw":"00000000"},"141920",2,"Buffer - Pintainhos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,351.27900269000,9999,351.27900269600,6684.56027137000]
[1559,118,null,{"$raw":"00000000"},"141920",2,"Buffer - Pintainhos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,886.99488745000,9999,886.99488745100,17674.69871670000]
[1560,118,null,{"$raw":"00000000"},"141920",2,"Buffer - Pintainhos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1663.83168607000,0,1663.83168607000,52722.97737190000]
[1563,119,null,{"$raw":"00000000"},"141919",2,"Buffer - Pousos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2361.46823457000,0,2361.46823457000,99522.39659069999]
[1564,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,217.28965565000,9999,217.28965565600,857.41118679900]
[1565,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,134.21203197000,9999,134.21203197400,1094.27927393000]
[1566,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,165.82119964000,0,165.82119964200,1226.89011728000]
[1567,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,169.48210397000,9999,169.48210397700,1468.11236615000]
[1568,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,268.03235781000,0,268.03235781500,1781.27689052000]
[1569,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,444.04673266000,0,444.04673266000,2516.11304597000]
[1570,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,235.67401105000,0,235.67401105900,3446.46148531000]
[1571,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,489.15545440000,9999,489.15545440400,3457.49613466000]
[1572,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,254.62098207000,0,254.62098207100,3629.81827384000]
[1573,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,440.67174005000,0,440.67174005200,4570.53228289000]
[1574,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,411.26327467000,9999,411.26327467900,6617.50699114000]
[1575,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,355.89823773000,9999,355.89823773000,6832.87443742000]
[1576,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,601.80510418000,0,601.80510418800,7009.36249165000]
[1577,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1144.92980945000,0,1141.57541974000,33563.32792960000]
[1578,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1029.47132335000,9999,1029.47132335000,34950.34336400000]
[1579,120,null,{"$raw":"00000000"},"141919",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1616.63155408000,0,1616.63155408000,57168.57547910000]
[1580,120,null,{"$raw":"00000000"},"Fora",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,30.24475638000,0,30.24475638320,36.26202110000]
[1581,120,null,{"$raw":"00000000"},"Fora",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,105.05757026000,9999,105.05757026000,422.35891421800]
[1582,120,null,{"$raw":"00000000"},"Fora",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,141.62499957000,0,141.62499957700,657.92118928100]
[1583,120,null,{"$raw":"00000000"},"Fora",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,376.35639539000,0,376.35639539700,4232.26407612000]
[1584,120,null,{"$raw":"00000000"},"Fora",2,"Buffer - Quatro Estradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,469.31322733000,9999,469.31322733800,10150.15178880000]
[1585,121,null,{"$raw":"00000000"},"141920",2,"Buffer - Quebradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,119.33506711000,9999,119.33506711800,532.51113232900]
[1586,121,null,{"$raw":"00000000"},"141920",2,"Buffer - Quebradas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,325.37618814000,9999,325.37618814300,4750.71456134000]
[1587,121,null,{"$raw":"00000000"},"141920",2,"Buffer - Quebradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1326.23197533000,0,1326.23197533000,44229.72757140000]
[1588,121,null,{"$raw":"00000000"},"141921",2,"Buffer - Quebradas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,965.77315597000,0,965.77315597700,35051.21499520000]
[1589,122,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Capela","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,170.75107230000,0,170.75107230200,1885.57207323000]
[1590,122,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Capela","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,235.62012243000,9999,235.62012243400,2599.71953522000]
[1591,122,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Capela","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,470.16082096000,9999,470.16082096200,4074.05808218000]
[1592,122,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Capela","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,545.25278978000,9999,545.25278978300,12003.06108920000]
[1593,122,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Capela","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1325.40557115000,0,1325.40557115000,32747.97289730000]
[1594,122,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Capela","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1456.00028429000,0,1456.00028429000,35990.59488240000]
[1595,123,null,{"$raw":"00000000"},"141902",2,"Buffer - Rendufas da Estrada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,659.35241935000,0,659.35241935400,16727.51613790000]
[1596,123,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Estrada","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,295.81160684000,0,295.81160684400,2050.46849146000]
[1597,123,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Estrada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,923.76113128000,0,923.76113128700,15825.63712020000]
[1598,123,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Estrada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,805.44755727000,0,805.44755727000,26539.75743060000]
[1599,123,null,{"$raw":"00000000"},"141919",2,"Buffer - Rendufas da Estrada","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,132.42663085000,0,132.42663085400,512.32684491500]
[1600,123,null,{"$raw":"00000000"},"141919",2,"Buffer - Rendufas da Estrada","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1368.62757306000,0,1368.63671204000,46812.51744090000]
[1601,124,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,245.17119720000,9999,245.17119720300,1498.17441464000]
[1602,124,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Mata","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,497.42915259000,9999,497.42915259100,7395.05974697000]
[1603,124,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,506.63612718000,0,506.63612718000,14287.55941410000]
[1604,124,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,623.79019034000,0,623.79019034800,20740.67929150000]
[1605,124,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas da Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1440.47759205000,0,1440.47759205000,49005.86658530000]
[1606,125,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas do Meio","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,159.15517224000,0,159.15517224700,871.86619707100]
[1607,125,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas do Meio","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,176.84032800000,9999,176.84032800300,1086.16637448000]
[1608,125,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas do Meio","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,194.94960448000,9999,194.94960448500,2055.19264990000]
[1609,125,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas do Meio","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,292.67500519000,0,292.67500519300,3447.49248537000]
[1610,125,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas do Meio","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,582.34326407000,9999,582.34326407700,3499.84278733000]
[1611,125,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas do Meio","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,471.40702130000,9999,471.40702130200,5195.65445800000]
[1612,125,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas do Meio","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,545.20564388000,0,545.20564388100,16481.01923880000]
[1613,125,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas do Meio","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1040.17219035000,0,1040.17219035000,20115.55123190000]
[1614,125,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas do Meio","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1548.83463089000,0,1548.83463089000,56530.12563900000]
[1615,125,null,{"$raw":"00000000"},"141904",2,"Buffer - Rendufas do Meio","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2294.98017869000,0,2294.98017869000,64625.19570420000]
[1616,126,null,{"$raw":"00000000"},"141909",3,"Buffer - RENOVA I","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,182.50208112000,0,182.50208112100,1737.35993335000]
[1617,126,null,{"$raw":"00000000"},"141909",3,"Buffer - RENOVA I","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,440.36923312000,0,440.36923312800,2419.58179986000]
[1618,126,null,{"$raw":"00000000"},"141909",3,"Buffer - RENOVA I","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,558.75117745000,9999,558.75117745900,6432.03782393000]
[1619,126,null,{"$raw":"00000000"},"141909",3,"Buffer - RENOVA I","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,442.72769219000,9999,442.72769219400,12034.25140120000]
[1620,126,null,{"$raw":"00000000"},"141916",3,"Buffer - RENOVA I","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,660.88767526000,9999,660.88767526300,12941.26892650000]
[1621,126,null,{"$raw":"00000000"},"141916",3,"Buffer - RENOVA I","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,851.00490529000,0,851.00490529200,17768.31932610000]
[1622,127,null,{"$raw":"00000000"},"141916",3,"Buffer - RENOVA II","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,354.67277216000,0,354.67277216100,3807.92613287000]
[1623,127,null,{"$raw":"00000000"},"141916",3,"Buffer - RENOVA II","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1192.39700541000,0,1192.39700541000,10671.01026280000]
[1624,127,null,{"$raw":"00000000"},"141916",3,"Buffer - RENOVA II","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,1183.43222411000,9999,1183.43222411000,12775.07666960000]
[1625,127,null,{"$raw":"00000000"},"141916",3,"Buffer - RENOVA II","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1018.72062910000,0,1018.72062910000,17151.88828620000]
[1626,127,null,{"$raw":"00000000"},"141916",3,"Buffer - RENOVA II","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,1571.95098970000,9999,1571.95098970000,49379.36262070000]
[1627,127,null,{"$raw":"00000000"},"141916",3,"Buffer - RENOVA II","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2663.75029577000,0,2663.75029577000,79237.79370730001]
[1628,128,null,{"$raw":"00000000"},"141918",2,"Buffer - Resgais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,154.05340079000,0,154.05340079000,579.24187868200]
[1629,128,null,{"$raw":"00000000"},"141918",2,"Buffer - Resgais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,209.60547296000,0,209.60547296500,1471.77884316000]
[1630,128,null,{"$raw":"00000000"},"141918",2,"Buffer - Resgais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,182.60301746000,0,182.60301746800,2011.88213447000]
[1631,128,null,{"$raw":"00000000"},"141918",2,"Buffer - Resgais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,389.61401422000,0,389.61401422600,3744.82087465000]
[1632,128,null,{"$raw":"00000000"},"141918",2,"Buffer - Resgais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,298.16446767000,0,298.16446767800,4350.57633044000]
[1633,128,null,{"$raw":"00000000"},"141918",2,"Buffer - Resgais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,536.85825711000,0,536.85825711200,5840.20412109000]
[1634,128,null,{"$raw":"00000000"},"141918",2,"Buffer - Resgais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,592.86288543000,0,592.86288543300,7172.30726665000]
[1635,128,null,{"$raw":"00000000"},"141918",2,"Buffer - Resgais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,532.84001866000,0,532.84001866400,10270.07694110000]
[1636,128,null,{"$raw":"00000000"},"141918",2,"Buffer - Resgais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1673.98218355000,0,1673.98218355000,45577.25539670000]
[1637,128,null,{"$raw":"00000000"},"141918",2,"Buffer - Resgais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,8861.03723606000,0,8861.03723606000,299702.95304599998]
[1638,129,null,{"$raw":"00000000"},"141902",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,489.19624767000,0,489.19624767700,5693.64366190000]
[1639,129,null,{"$raw":"00000000"},"141902",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,423.83848749000,0,423.83848749000,8124.84646422000]
[1640,129,null,{"$raw":"00000000"},"141902",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,476.97543016000,0,476.97543016000,13142.28480410000]
[1641,129,null,{"$raw":"00000000"},"141902",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,544.84112816000,0,544.84112816600,15804.88591850000]
[1642,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,56.87817472000,9999,56.87817472160,191.48789234700]
[1643,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,117.53858684000,9999,117.53858684000,577.56941727300]
[1644,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,169.24364932000,9999,169.24364932200,1122.09968326000]
[1645,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,190.78776963000,9999,190.78776963600,1219.07366233000]
[1646,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,211.61561934000,9999,211.61561934900,1864.49051139000]
[1647,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,336.32866461000,0,336.32866461100,4201.82673822000]
[1648,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1728.35183358000,0,1728.35183358000,23215.10227590000]
[1649,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,989.98366955000,9999,989.98366955900,23923.48095450000]
[1650,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,975.94256545000,0,975.94256545600,35380.04757130000]
[1651,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1173.33517140000,0,1173.33517140000,42312.28171880000]
[1652,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2315.57808247000,0,2315.57808247000,99800.67125520000]
[1653,129,null,{"$raw":"00000000"},"141904",2,"Buffer - Rexaldia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2932.96199202000,0,2932.96199202000,143055.13088600000]
[1654,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,76.72816111000,0,76.72816111240,183.32420673100]
[1655,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,58.62298362000,0,58.62298362610,187.66317336600]
[1656,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,95.79449772000,0,95.79449772600,508.25834264600]
[1657,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,258.36533225000,0,116.99731168500,326.57406130100]
[1658,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,114.23958648000,0,114.23958648800,623.46392181800]
[1659,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,178.40794602000,0,178.40794602300,742.93167716000]
[1660,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,198.47859701000,0,198.47859701400,805.41997509800]
[1661,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,169.17253710000,0,169.17253710100,1025.51707788000]
[1662,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,282.32212125000,0,282.32212125300,1403.21179134000]
[1663,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,168.14303671000,0,168.14303671500,1475.39174995000]
[1664,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,207.83072479000,0,207.83072479800,2337.04081622000]
[1665,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,428.05393702000,0,428.05393702500,2511.85132956000]
[1666,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,409.36703252000,0,409.36703252200,2634.93737940000]
[1667,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,263.85348174000,0,263.85348174400,2963.38744392000]
[1668,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,444.53245883000,0,444.53245883700,3189.14595305000]
[1669,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,408.95396201000,0,408.95396201300,3762.10079281000]
[1670,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,616.71719763000,0,616.71719763200,5287.51932998000]
[1671,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,350.28898087000,0,350.28898087100,5463.38777182000]
[1672,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,513.09397757000,0,513.09397757900,5925.49769713000]
[1673,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,410.96663250000,0,410.96663250600,7109.38745548000]
[1674,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,706.41716224000,0,706.41716224000,9792.40695284000]
[1675,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,621.04958027000,0,621.04958027500,10113.50122990000]
[1676,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,518.26314707000,0,518.26314707300,10154.01336800000]
[1677,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1215.84998221000,0,1215.84998221000,12322.68414620000]
[1678,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,511.58408730000,0,511.58408730500,13266.39929740000]
[1679,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,612.30565002000,0,612.30565002900,15092.96090890000]
[1680,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,525.47598890000,0,525.47598890700,15410.89589210000]
[1681,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,692.89142530000,0,692.89142530200,17659.86857850000]
[1682,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,814.94097532000,0,814.94097532600,20956.35472120000]
[1683,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,842.83846188000,0,842.83846188300,22751.31765740000]
[1684,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,965.57565323000,0,965.57565323300,24232.28118390000]
[1685,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1555.98993060000,0,1555.98993060000,45168.18440280000]
[1686,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1568.60426736000,0,1568.60426736000,47582.39095350000]
[1687,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1681.84301957000,0,1681.84301957000,51451.67824620000]
[1688,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1381.42989844000,0,1381.42989844000,53950.40244050000]
[1689,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1485.68460558000,0,1485.68460558000,55458.72445080000]
[1690,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2551.25607253000,0,2551.25607253000,97701.84042399999]
[1692,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2730.69328067000,0,2730.69328067000,101634.69908100000]
[1693,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,4788.44400309000,0,4788.44400309000,172715.38367400001]
[1694,131,null,{"$raw":"00000000"},"141921",2,"Buffer - Ribeira Branca","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,377.54349918000,0,377.54349918900,5463.31662796000]
[1695,131,null,{"$raw":"00000000"},"141921",2,"Buffer - Ribeira Branca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,644.60059695000,0,644.60059695300,23055.41964410000]
[1696,131,null,{"$raw":"00000000"},"141921",2,"Buffer - Ribeira Branca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1631.12953175000,0,1631.12953175000,48551.31324190000]
[1697,131,null,{"$raw":"00000000"},"141921",2,"Buffer - Ribeira Branca","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1942.86101748000,0,1942.86101748000,79870.31430090001]
[1698,132,null,{"$raw":"00000000"},"141921",2,"Buffer - Ribeira Ruiva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,107.42696434000,0,107.42696434000,406.10320358400]
[1699,132,null,{"$raw":"00000000"},"141921",2,"Buffer - Ribeira Ruiva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,256.91188051000,0,256.91188051300,2919.22344604000]
[1700,132,null,{"$raw":"00000000"},"141921",2,"Buffer - Ribeira Ruiva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1282.53540980000,0,1282.53540980000,51435.61296480000]
[1701,132,null,{"$raw":"00000000"},"141921",2,"Buffer - Ribeira Ruiva","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2977.48194658000,0,2977.48194658000,133562.63517600001]
[1702,133,null,{"$raw":"00000000"},"141920",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,61.90228536000,0,61.90228536830,107.60428556700]
[1703,133,null,{"$raw":"00000000"},"141920",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,290.03874547000,0,290.03874547700,420.47548924600]
[1704,133,null,{"$raw":"00000000"},"141920",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,112.23572680000,0,112.23572680900,420.35664867800]
[1705,133,null,{"$raw":"00000000"},"141920",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,268.04381888000,0,268.04381888900,558.84221902000]
[1706,133,null,{"$raw":"00000000"},"141920",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,154.74060841000,0,154.74060841200,917.66158073200]
[1707,133,null,{"$raw":"00000000"},"141920",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,299.37857036000,9999,299.37857036900,1395.69588002000]
[1708,133,null,{"$raw":"00000000"},"141920",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,394.00606624000,0,394.00606624100,3617.79734940000]
[1709,133,null,{"$raw":"00000000"},"141920",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,434.45291371000,0,434.45291371800,10871.14579070000]
[1710,133,null,{"$raw":"00000000"},"141920",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,732.62590134000,9999,732.62590134900,22217.02037580000]
[1711,133,null,{"$raw":"00000000"},"141917",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,61.10052116000,9999,61.10052116390,85.11067850830]
[1712,133,null,{"$raw":"00000000"},"141917",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,134.06302273000,0,134.06302273100,855.07329577400]
[1713,133,null,{"$raw":"00000000"},"141917",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,211.69120148000,0,211.69120148800,982.31653659900]
[1714,133,null,{"$raw":"00000000"},"141917",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,267.05845301000,0,267.05845301900,1891.96849566000]
[1715,133,null,{"$raw":"00000000"},"141917",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,220.18970889000,0,220.18970889300,2063.70281595000]
[1716,133,null,{"$raw":"00000000"},"141917",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,389.48374029000,9999,389.48374029500,3856.74784613000]
[1717,133,null,{"$raw":"00000000"},"141917",3,"Buffer - Santa da Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,358.61730756000,0,358.61730756300,7769.67438671000]
[1732,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,272.30559346000,0,272.30559346300,1501.44838503000]
[1733,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,228.43824925000,0,228.43824925100,1937.54135224000]
[1734,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,276.79255690000,0,276.79255690500,2280.72216363000]
[1735,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,405.29154330000,0,405.29154330800,2324.36350453000]
[1736,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,400.06594687000,0,400.06594687400,4264.00447380000]
[1737,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,279.92791944000,0,279.92791944600,4572.66706525000]
[1738,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,502.02377121000,0,502.02377121600,5578.24650891000]
[1739,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,377.02560364000,0,377.02560364800,6883.47332282000]
[1740,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1165.82299958000,0,1165.82299958000,8280.26134253000]
[1741,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,752.75647689000,0,752.75647689600,9046.20223643000]
[1742,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,437.86745689000,0,437.86745689400,9310.16272504000]
[1743,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,622.68828825000,0,622.68828825500,18457.95268980000]
[1744,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,805.06401904000,0,805.06401904500,26769.46732230000]
[1745,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1806.61795067000,0,1806.61795067000,44488.13524680000]
[1747,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,144.73025101000,0,144.73025101600,482.71224702500]
[1748,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,183.94917768000,0,183.94917768300,876.28275732800]
[1749,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,133.57036941000,0,133.57036941100,951.07647320900]
[1750,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,177.65793899000,0,177.65793899600,1888.19508900000]
[1751,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,271.08175324000,0,271.08175324000,4643.85465592000]
[1752,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,501.30267465000,0,501.30267465700,4763.84744376000]
[1753,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,744.44324953000,0,744.44324953800,5883.52678213000]
[1754,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,455.24027348000,0,455.24027348700,7183.45107033000]
[1755,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,648.19655582000,0,648.19655582400,8354.78517028000]
[1756,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,603.75489610000,0,603.75489610400,15229.46018930000]
[1757,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,589.95288492000,0,589.95288492600,16910.38312430000]
[1759,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2029.48019742000,0,2029.48019742000,35178.24072200000]
[1760,138,null,{"$raw":"00000000"},"141919",2,"Buffer - Soudos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,34.90121474000,0,34.90121474590,35.49454734840]
[1761,138,null,{"$raw":"00000000"},"141919",2,"Buffer - Soudos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,168.14713749000,0,168.14713749900,136.48606848300]
[1762,138,null,{"$raw":"00000000"},"141919",2,"Buffer - Soudos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1083.74320694000,0,1083.74320694000,42329.93681580000]
[1763,138,null,{"$raw":"00000000"},"141919",2,"Buffer - Soudos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1396.68792631000,0,1396.68792631000,56595.68632480000]
[1764,138,null,{"$raw":"00000000"},"Fora",2,"Buffer - Soudos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1827.08577002000,0,1827.08577002000,62382.42589180000]
[1765,139,null,{"$raw":"00000000"},"141902",2,"Buffer - Tejais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,140.25832664000,9999,140.25832664900,1088.62718501000]
[1766,139,null,{"$raw":"00000000"},"141902",2,"Buffer - Tejais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,213.89626717000,9999,213.89626717900,2522.94409873000]
[1767,139,null,{"$raw":"00000000"},"141902",2,"Buffer - Tejais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,352.78140695000,9999,352.78140695500,2643.82290069000]
[1768,139,null,{"$raw":"00000000"},"141902",2,"Buffer - Tejais","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,371.97360147000,9999,371.97360147500,8385.70467451000]
[1769,139,null,{"$raw":"00000000"},"141902",2,"Buffer - Tejais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,824.88993304000,0,824.88993304000,28041.66312600000]
[1770,139,null,{"$raw":"00000000"},"141902",2,"Buffer - Tejais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,2141.04368825000,0,2141.04368825000,62800.63287380000]
[1771,140,null,{"$raw":"00000000"},"141904",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,115.84321263000,9999,115.84321263500,630.85314020700]
[1772,140,null,{"$raw":"00000000"},"141904",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,150.49218101000,9999,150.49218101300,1021.01348934000]
[1773,140,null,{"$raw":"00000000"},"141904",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,322.36512369000,0,322.36512369100,2300.87920012000]
[1774,140,null,{"$raw":"00000000"},"141904",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,225.21760497000,9999,225.21760497000,3196.07011042000]
[1775,140,null,{"$raw":"00000000"},"141904",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,352.66254080000,0,352.66254080100,4338.58181407000]
[1776,140,null,{"$raw":"00000000"},"141904",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1111.86983131000,0,1111.86983131000,25591.62937310000]
[1777,140,null,{"$raw":"00000000"},"141919",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,176.77352274000,9999,176.77352274600,1495.94113794000]
[1778,140,null,{"$raw":"00000000"},"141919",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1173.52546832000,0,1173.52546832000,43536.90997540000]
[1779,140,null,{"$raw":"00000000"},"141920",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,124.32037694000,0,124.32037694800,799.39574480300]
[1780,140,null,{"$raw":"00000000"},"141920",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,209.79378975000,9999,209.79378975500,930.51254391700]
[1781,140,null,{"$raw":"00000000"},"141920",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,177.99273184000,9999,177.99273184100,1224.79038967000]
[1782,140,null,{"$raw":"00000000"},"141920",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,179.24475074000,9999,179.24475074300,1346.54774835000]
[1783,140,null,{"$raw":"00000000"},"141920",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,420.11780421000,0,420.11780421100,3767.12787150000]
[1784,140,null,{"$raw":"00000000"},"141920",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,636.30140778000,9999,636.30140778700,13616.45589470000]
[1785,140,null,{"$raw":"00000000"},"141920",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1213.10972577000,0,1213.10972577000,35265.04219990000]
[1786,140,null,{"$raw":"00000000"},"141920",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2620.27051106000,0,2620.27051106000,82636.52924710000]
[1787,140,null,{"$raw":"00000000"},"141921",2,"Buffer - Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,527.63156852000,0,527.63156852000,16255.99370150000]
[1788,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1062.63070624000,0,1062.63070624000,27556.63962130000]
[1789,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1678.54257868000,0,1678.54257868000,71098.16529170000]
[1790,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,219.16005073000,0,219.16005073000,1977.31829590000]
[1791,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,198.21796027000,0,198.21796027500,2017.61409761000]
[1792,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,215.89438107000,0,215.89438107500,2506.69282801000]
[1793,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,433.06907633000,0,433.06907633600,4181.83226482000]
[1794,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1253.01940922000,0,1253.01940922000,48482.90182850000]
[1795,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1494.42414137000,0,1494.42414137000,59235.12217340000]
[1796,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2288.23218406000,0,2288.23218406000,95229.29109340000]
[1797,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,48.55075173000,0,48.55075173750,96.05758437000]
[1798,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,61.47562335000,0,61.47562335050,158.11025614200]
[1799,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,124.24524638000,0,124.24524638000,479.04531853700]
[1800,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,311.42864591000,0,311.42864591000,1019.08431606000]
[1801,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,284.70914799000,0,284.70914799800,1591.19247159000]
[1802,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,243.63301880000,0,243.63301880600,1607.11513286000]
[1803,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,179.07882437000,0,179.07882437200,1638.41102645000]
[1804,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,263.96342755000,0,263.96342755400,2096.95096244000]
[1805,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,281.22461340000,0,281.22461340000,2287.25468699000]
[1806,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,313.62665817000,0,313.62665817000,2481.93389589000]
[1807,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,253.60546249000,0,253.60546249500,2918.97434744000]
[1808,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,274.90191437000,0,274.90191437100,3946.21804059000]
[1809,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,455.75344124000,0,455.75344124400,4133.34516885000]
[1810,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,312.02060496000,0,312.02060496500,4493.61510223000]
[1811,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,383.86349138000,0,383.86349138500,5377.13120310000]
[1812,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,684.34643327000,0,684.34643327600,11093.92119130000]
[1813,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,635.98621001000,0,635.98621001300,12512.68847400000]
[1814,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,594.51967110000,0,594.51967110200,15506.36867480000]
[1815,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1077.70579661000,0,1077.70579661000,24092.94250650000]
[1816,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,896.45701333000,0,896.45701333700,31299.75961490000]
[1817,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,928.81872651000,0,928.81872651300,34373.22408460000]
[1818,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1035.50948605000,0,1035.50948605000,39274.25714510000]
[1819,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1602.64819359000,0,1602.64819359000,48661.66775120000]
[1820,141,null,{"$raw":"00000000"},"141920",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1293.74050000000,0,1310.93143804000,48935.64873390000]
[1824,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,331.79461141000,0,315.33084521000,4608.80865286000]
[1825,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,375.98313861000,0,375.98313861100,8290.38620695000]
[1826,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,856.85629815000,0,856.85629815700,31694.83812640000]
[1827,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,853.55668459000,0,853.55668459500,32639.35304590000]
[1828,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1047.55853759000,0,1047.55853759000,40130.28981250000]
[1829,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1887.60737839000,0,1809.13712128000,41007.00296840000]
[1830,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1279.98184122000,0,1279.98184122000,53118.15730080000]
[1831,141,null,{"$raw":"00000000"},"141921",2,"Buffer - Torres Novas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,3278.03553126000,0,3278.03553126000,147664.03326600001]
[1832,142,null,{"$raw":"00000000"},"141918",2,"Buffer - Vale Carvão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,503.84384432000,0,503.84384432000,11727.25171110000]
[1847,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,174.90664882000,9999,174.90664882600,979.87199236900]
[1848,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,155.43147596000,9999,155.43147596300,999.25925678700]
[1849,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,190.88819274000,9999,190.88819274900,1206.08184800000]
[1850,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,173.29243891000,9999,173.29243891100,1232.68874395000]
[1851,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,183.63988986000,0,183.63988986700,1522.84643450000]
[1852,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,218.43927958000,0,218.43927958200,1688.78108610000]
[1853,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,189.99207961000,9999,189.99207961400,1714.96463841000]
[1854,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,331.41908156000,0,331.41908156000,1802.27925482000]
[1855,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,297.88275649000,9999,297.88275649800,2009.07473211000]
[1856,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,229.71453472000,0,229.71453472400,2445.17371631000]
[1857,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,254.13694511000,0,254.13694511900,2619.47222618000]
[1858,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,405.64823925000,9999,405.64823925400,3486.98929989000]
[1859,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,423.45011402000,9999,423.45011402600,3592.37128518000]
[1860,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,276.34762705000,9999,276.34762705500,3651.61213195000]
[1861,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,417.04721509000,9999,417.04721509200,3894.82582118000]
[1862,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,454.28788333000,0,454.28788333300,4168.78169139000]
[1863,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,313.83014470000,9999,313.83014470100,4423.11601534000]
[1864,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,414.75429076000,9999,414.75429076800,6193.94727929000]
[1865,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,553.53224148000,0,553.53224148900,7412.50925673000]
[1866,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,753.59872688000,0,753.59872688200,9283.12572079000]
[1867,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,901.75054030000,9999,901.75054030900,13135.25583340000]
[1868,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,671.00601361000,9999,671.00601361700,13415.80113090000]
[1869,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1055.22071163000,9999,1055.22071163000,14759.21339990000]
[1870,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1138.00722512000,0,1138.00722512000,16529.14886760000]
[1871,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1172.02056892000,0,1172.02056892000,18644.58339960000]
[1872,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,900.37859344000,0,900.37859344100,19983.20548750000]
[1873,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,796.10436381000,9999,796.10436381300,21294.20714770000]
[1874,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,912.00950970000,0,912.00950970100,21591.04223000000]
[1875,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,703.93557309000,0,703.93557309100,23036.73647490000]
[1876,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,953.47012080000,0,953.47012080900,25471.91053550000]
[1877,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,888.44451856000,0,888.44451856800,25950.46217880000]
[1878,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1013.39291396000,0,1013.39291396000,29183.39557880000]
[1879,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,1173.86455358000,0,1173.86455358000,30231.97598650000]
[1880,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,1068.23473407000,9999,1068.23473407000,35242.98995370000]
[1881,143,null,{"$raw":"00000000"},"141909",2,"Buffer - Vale da Serra","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,6010.91397347000,0,6010.91397347000,201446.44724099999]
[1882,144,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Baixo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,113.19549720000,9999,113.19549720500,440.87435260400]
[1883,144,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,153.68636239000,0,153.68636239300,1005.11321778000]
[1884,144,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,223.24052891000,0,223.24052891400,2364.33108645000]
[1885,144,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,318.33375885000,0,312.48890517900,2671.32789222000]
[1886,144,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,328.82953529000,0,328.82953529800,5012.72339067000]
[1887,144,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,486.45564444000,0,486.45564444000,7413.29899104000]
[1888,144,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,746.13619801000,0,746.13619801300,10302.35763770000]
[1889,144,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Baixo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,730.77006336000,9999,730.77006336800,13113.44312180000]
[1890,144,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Baixo","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,1555.66207400000,9999,1555.66207400000,17591.01069050000]
[1891,144,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Baixo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,763.04758949000,0,762.11877519000,20570.58047090000]
[1892,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,95.58725105000,9999,95.58725105480,532.45034192300]
[1893,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,126.16857540000,0,126.16857540000,780.99455608700]
[1894,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,4,172.06298469000,9999,172.06298469800,1016.18019260000]
[1895,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,4,231.99710766000,9999,231.99710766800,1572.47365466000]
[1896,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,249.39093247000,9999,249.39093247700,1842.79939046000]
[1897,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,509.71255503000,9999,509.71255503500,1958.80669771000]
[1898,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,4,460.04750646000,9999,460.04750646400,2346.16018648000]
[1899,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,4,606.76549132000,9999,606.76549132200,6245.65581827000]
[1900,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,454.60299744000,0,454.60299744600,7102.05347221000]
[1901,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1486.53344627000,0,1486.53344627000,24568.37752830000]
[1903,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,2130.73643529000,0,2130.73643529000,83710.16383000000]
[1904,145,null,{"$raw":"00000000"},"Fora",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,216.85709661000,0,216.85709661300,1687.42866086000]
[1905,145,null,{"$raw":"00000000"},"Fora",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,534.44493801000,9999,534.44493801100,5723.27031216000]
[1906,145,null,{"$raw":"00000000"},"Fora",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,548.06176536000,0,548.06176536100,11719.02207050000]
[1907,146,null,{"$raw":"00000000"},"141919",2,"Buffer - Valhelhas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,116.82078512000,0,116.82078512100,829.17514693900]
[1908,146,null,{"$raw":"00000000"},"141919",2,"Buffer - Valhelhas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,181.55073000000,0,181.55073000000,1423.83120135000]
[1909,146,null,{"$raw":"00000000"},"141919",2,"Buffer - Valhelhas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,236.03593513000,0,236.03593513500,1748.92221994000]
[1910,146,null,{"$raw":"00000000"},"141919",2,"Buffer - Valhelhas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,364.73529034000,0,364.73529034000,4705.89773368000]
[1911,146,null,{"$raw":"00000000"},"141919",2,"Buffer - Valhelhas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,449.81449417000,0,449.81449417800,5644.39811688000]
[1912,146,null,{"$raw":"00000000"},"141919",2,"Buffer - Valhelhas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,547.51286863000,0,547.51286863300,10883.42075050000]
[1913,146,null,{"$raw":"00000000"},"141919",2,"Buffer - Valhelhas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,613.48427937000,0,613.48427937100,17177.96577640000]
[1914,146,null,{"$raw":"00000000"},"141919",2,"Buffer - Valhelhas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,636.97551532000,0,636.97551532700,18378.18783180000]
[1915,146,null,{"$raw":"00000000"},"141919",2,"Buffer - Valhelhas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2092.64433292000,0,2092.64433292000,62856.02476130000]
[1916,146,null,{"$raw":"00000000"},"141920",2,"Buffer - Valhelhas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,783.21278155000,0,783.21278155300,22954.53620330000]
[1917,147,null,{"$raw":"00000000"},"141902",2,"Buffer - Vargos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,476.93824300000,0,476.93824300200,6266.73158225000]
[1918,147,null,{"$raw":"00000000"},"141919",2,"Buffer - Vargos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,500.76643104000,0,500.76643104100,13391.14104840000]
[1919,147,null,{"$raw":"00000000"},"141919",2,"Buffer - Vargos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,97.44536956000,0,97.44536956520,394.94232930300]
[1920,147,null,{"$raw":"00000000"},"141919",2,"Buffer - Vargos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,162.85012187000,0,162.85012187800,861.06114664300]
[1921,147,null,{"$raw":"00000000"},"141919",2,"Buffer - Vargos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,218.43614521000,9999,218.43614521200,1709.19980521000]
[1922,147,null,{"$raw":"00000000"},"141919",2,"Buffer - Vargos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,378.84048898000,9999,378.84048898100,3342.71806834000]
[1923,147,null,{"$raw":"00000000"},"141919",2,"Buffer - Vargos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,510.06410011000,9999,510.06410011100,5581.47357202000]
[1924,147,null,{"$raw":"00000000"},"141919",2,"Buffer - Vargos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,567.58931277000,9999,567.58931277200,8276.44971574000]
[1925,147,null,{"$raw":"00000000"},"141919",2,"Buffer - Vargos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,5664.63110264000,0,5664.63110264000,188077.16439600001]
[1926,148,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,687.46734897000,9999,687.46734897700,8245.22227373000]
[1927,148,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1202.23149654000,0,1202.23149654000,29708.19951340000]
[1928,149,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,82.83202791000,0,82.83202791250,395.18690098200]
[1929,149,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,97.30283865000,0,97.30283865690,528.16853449400]
[1930,149,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,146.98899289000,9999,146.98899289200,913.10239956000]
[1931,149,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,495.59145769000,9999,495.59145769100,4189.92418136000]
[1932,149,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,510.45352318000,9999,510.45352318100,6106.02673822000]
[1933,149,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,395.05560104000,0,395.05560104800,8255.26364449000]
[1934,149,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,483.19389520000,0,483.19389520000,10977.22917530000]
[1935,149,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1617.71822841000,0,1617.71822841000,54634.37696680000]
[1936,149,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1831.89813700000,0,1831.89813700000,55740.66794990000]
[1937,149,null,{"$raw":"00000000"},"141919",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,101.46799090000,0,101.46799090600,92.18054661030]
[1938,149,null,{"$raw":"00000000"},"141919",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,226.23698004000,0,226.23698004300,2390.41874830000]
[1939,149,null,{"$raw":"00000000"},"141919",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,4,214.95040884000,9999,214.95040884000,2412.66633606000]
[1940,149,null,{"$raw":"00000000"},"141919",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,278.90975741000,0,278.90975741300,2670.30554042000]
[1941,149,null,{"$raw":"00000000"},"141919",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,294.26941792000,0,294.26941792700,4841.43838338000]
[1942,149,null,{"$raw":"00000000"},"141919",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,516.16192607000,0,516.16192607800,9601.04797732000]
[1943,149,null,{"$raw":"00000000"},"141919",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,611.09343827000,0,611.09343827400,18814.45857440000]
[1944,149,null,{"$raw":"00000000"},"141919",3,"Buffer - ZAE Casal da Fonte","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1322.11874452000,0,1322.11874452000,33636.28607920000]
[1945,150,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Outeiro Pequeno","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,280.47331770000,9999,280.47331770400,2315.08703995000]
[1946,150,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Outeiro Pequeno","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,219.83098568000,9999,219.83098568500,2694.61235611000]
[1947,150,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Outeiro Pequeno","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,270.40215405000,9999,270.40215405300,2803.82758235000]
[1948,150,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Outeiro Pequeno","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,420.10101142000,9999,420.10101142900,6794.17848222000]
[1949,150,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Outeiro Pequeno","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,507.05091918000,9999,507.05091918500,6820.05374690000]
[1950,150,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Outeiro Pequeno","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,876.56220735000,0,876.56220735200,22399.14681400000]
[1951,150,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Outeiro Pequeno","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1309.61618274000,0,1309.61618274000,34694.54882650000]
[1952,150,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Outeiro Pequeno","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1787.30046620000,0,1787.30046620000,74792.02504660000]
[1953,150,null,{"$raw":"00000000"},"141902",3,"Buffer - ZAE Outeiro Pequeno","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1868.09167120000,0,1868.09167120000,78423.78263980000]
[1954,151,null,{"$raw":"00000000"},"141918",3,"Buffer - ZAE Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,141.53878193000,0,141.53878193200,928.71275524200]
[1955,151,null,{"$raw":"00000000"},"141918",3,"Buffer - ZAE Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,131.75461119000,0,131.75461119900,1029.74227007000]
[1956,151,null,{"$raw":"00000000"},"141918",3,"Buffer - ZAE Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,177.13884882000,0,177.13884882800,2296.31433088000]
[1957,151,null,{"$raw":"00000000"},"141918",3,"Buffer - ZAE Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,316.00250015000,0,316.00250015400,5124.91046689000]
[1958,151,null,{"$raw":"00000000"},"141918",3,"Buffer - ZAE Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,354.01039397000,0,354.01039397700,5996.63303862000]
[1959,151,null,{"$raw":"00000000"},"141918",3,"Buffer - ZAE Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,396.50730125000,9999,396.50730125800,8861.28667286000]
[1960,151,null,{"$raw":"00000000"},"141918",3,"Buffer - ZAE Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,714.82225759000,0,714.82225759300,22576.71751630000]
[1962,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,157.27537828000,0,157.27537828500,49.87947117570]
[1963,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,113.61201625000,0,113.61201625500,387.68705501100]
[1964,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,156.66709847000,0,156.66709847700,414.05197377300]
[1965,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,203.33147118000,0,203.33147118900,1598.87551411000]
[1966,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,852.04266885000,0,852.04266885900,2378.22929204000]
[1967,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,528.52387335000,0,528.52387335500,3418.55185716000]
[1968,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,260.10826541000,0,260.10826541600,3601.13304587000]
[1969,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,448.57502526000,0,448.57502526400,4384.09924923000]
[1970,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,298.69614097000,0,298.69614097700,4930.72634869000]
[1971,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,534.06375658000,0,534.06375658300,6007.97979053000]
[1972,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,532.47519816000,0,532.47519816400,6030.60418802000]
[1973,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,352.58444906000,0,352.58444906200,6575.83110859000]
[1974,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,478.90730450000,0,478.90730450700,9990.83234089000]
[1975,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,817.80743891000,0,817.80743891500,10341.81158980000]
[1976,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,435.22132368000,0,435.22132368000,10678.20786980000]
[1977,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,430.87542853000,0,430.87542853900,10843.91689260000]
[1978,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,546.67053446000,0,546.67053446500,12038.30517440000]
[1979,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,460.27959470000,0,460.27959470400,12551.76508620000]
[1980,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,914.52042848000,0,914.52042848700,14788.38915160000]
[1981,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,610.63403064000,0,610.63403064500,15875.32584170000]
[1982,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,597.59386349000,0,597.59386349100,16382.43119420000]
[1983,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,562.53491190000,0,562.53491190900,16466.66592880000]
[1984,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,648.53984551000,0,648.53984551300,20735.40337530000]
[1985,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,673.32707775000,0,673.32707775000,21240.14595950000]
[1986,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,712.24953112000,0,712.24953112400,22137.73372710000]
[1987,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,976.95691440000,0,976.95691440300,33088.38279640000]
[1988,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1019.05318937000,0,1019.05318937000,37629.32672150000]
[1989,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1096.23452031000,0,1096.23452031000,37930.31314600000]
[1990,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1666.87199647000,0,1666.87199647000,45340.14746310000]
[1991,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1852.07258162000,0,1852.07258162000,68542.98445560000]
[1992,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2312.19671251000,0,2312.19671251000,79707.17818940000]
[1993,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1992.91826986000,0,1992.91826986000,85170.85487410000]
[1994,152,null,{"$raw":"00000000"},"141910",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2808.97860770000,0,2808.97860770000,117319.61404499999]
[1995,152,null,{"$raw":"00000000"},"Fora",3,"Buffer - ZAE Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1049.05514275000,0,1049.05514275000,34179.31388210000]
[1996,153,null,{"$raw":"00000000"},"141904",3,"Buffer - ZAE Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,130.34166566000,0,130.34166566100,555.44319554800]
[1997,153,null,{"$raw":"00000000"},"141904",3,"Buffer - ZAE Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,370.53167263000,0,370.53167263300,4699.12006561000]
[1998,153,null,{"$raw":"00000000"},"141904",3,"Buffer - ZAE Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,464.83611630000,0,464.83611630800,7201.47093332000]
[1999,153,null,{"$raw":"00000000"},"141904",3,"Buffer - ZAE Terras Pretas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,636.44102618000,9999,636.44102618400,11250.92030110000]
[2000,153,null,{"$raw":"00000000"},"141904",3,"Buffer - ZAE Terras Pretas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,605.33078881000,0,605.33078881600,12680.73248490000]
[2001,153,null,{"$raw":"00000000"},"141904",3,"Buffer - ZAE Terras Pretas","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,501.25464058000,9999,501.25464058900,13970.69872070000]
[2002,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,178.24303965000,0,178.24303965400,311.21022610800]
[2003,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,127.09772865000,0,127.09772865100,939.79742216300]
[2004,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,184.81227999000,0,184.81227999400,1427.31365614000]
[2005,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,294.24387208000,0,294.24387208200,1984.30217047000]
[2006,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,365.87830310000,0,365.87830310600,2278.31192400000]
[2007,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,207.75404982000,0,207.75404982300,2404.47767992000]
[2008,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,318.07246881000,0,318.07246881000,2606.49692995000]
[2009,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,278.27946540000,0,278.27946540200,4388.12090883000]
[2010,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,276.28270829000,0,276.28270829800,5043.69922432000]
[2011,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,865.84877975000,0,865.84877975100,29050.97700540000]
[2012,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1109.61296483000,0,1109.61296483000,29542.63547650000]
[2014,154,null,{"$raw":"00000000"},"Fora",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,75.95365291000,0,75.95365291720,245.91045090500]
[2015,154,null,{"$raw":"00000000"},"Fora",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,216.49873511000,0,216.49873511200,2044.27886325000]
[2016,154,null,{"$raw":"00000000"},"Fora",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,338.55432271000,0,338.55432271100,5089.91590400000]
[2017,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,61.38269271000,0,61.38269271430,149.46880484300]
[2018,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,97.07067485000,0,97.07067485090,154.72202903400]
[2019,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,98.60928460000,0,98.60928460930,313.32948207900]
[2020,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,97.17925127000,0,97.17925127990,395.59608476000]
[2021,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,143.80705794000,0,143.80705794800,591.21708776300]
[2022,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,257.71786752000,0,257.71786752600,2179.07447966000]
[2023,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,270.84146016000,0,270.84146016000,3813.64368725000]
[2024,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,528.35077225000,0,528.35077225400,5468.68961335000]
[2025,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,342.79257074000,0,342.79257074000,6080.13305695000]
[2026,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,635.22088598000,0,635.22088598000,6812.14903934000]
[2027,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,481.21141275000,0,481.21141275900,14111.06882400000]
[2028,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1018.33476885000,0,1018.33476885000,21453.80324200000]
[2029,155,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1254.51718905000,0,1254.51718905000,34981.51445720000]
[2030,155,null,{"$raw":"00000000"},"Fora",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,358.06429604000,0,358.06429604800,2625.02394675000]
[2031,155,null,{"$raw":"00000000"},"Fora",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,220.83189690000,0,220.83189690400,2629.45221442000]
[2032,155,null,{"$raw":"00000000"},"Fora",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,314.30527515000,0,314.30527515000,3730.19354248000]
[2033,155,null,{"$raw":"00000000"},"Fora",3,"Buffer - ZAE Zibreira/Videla","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1007.82239747000,0,1007.82239747000,14912.36707920000]
[2034,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,153.83033131000,9999,153.83033131800,464.99238110500]
[2035,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,113.61053967000,0,113.61053967300,529.80434132500]
[2036,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,216.28266968000,9999,216.28266968200,1885.45809997000]
[2037,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,247.03422968000,9999,247.03422968400,3734.68037283000]
[2038,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,716.20569551000,0,716.20569551200,18234.11291050000]
[2039,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,3,1009.84061110000,9999,1009.84061110000,23262.83317790000]
[2040,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,965.38117657000,0,965.38117657100,33649.49491830000]
[2041,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1425.50994602000,0,1425.50994602000,34326.37506200000]
[2042,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1436.16007208000,0,1436.16007208000,59669.67010370000]
[2043,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2418.34699221000,0,2408.91320622000,104342.85112300000]
[2044,156,null,{"$raw":"00000000"},"141916",2,"Buffer - Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,4446.80607225000,0,4446.80607225000,194095.75726400001]
[2045,157,null,{"$raw":"00000000"},"141919",3,"Buffer -ZAE  Lamarosa","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,302.14247640000,0,302.14247640200,2338.02417151000]
[2046,157,null,{"$raw":"00000000"},"141919",3,"Buffer -ZAE  Lamarosa","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1480.72475585000,0,1480.72475585000,45493.04388460000]
[2049,159,null,{"$raw":"00000000"},"Fora",1,"Carlos M. Carvalho Correia","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,174.78944138000,0,174.78944138400,972.92732172900]
[2051,161,null,{"$raw":"00000000"},"141920",1,"Casal da Juge - Sociedade Agro-Pecuaria e Silvicola, Lda","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,241.85101064000,9999,241.85101064700,1581.75413655000]
[2052,161,null,{"$raw":"00000000"},"141920",1,"Casal da Juge - Sociedade Agro-Pecuaria e Silvicola, Lda","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,240.62704800000,9999,240.62704800100,2354.38554293000]
[2053,161,null,{"$raw":"00000000"},"141920",1,"Casal da Juge - Sociedade Agro-Pecuaria e Silvicola, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,358.91782931000,0,358.91782931700,5264.11854503000]
[2054,161,null,{"$raw":"00000000"},"141920",1,"Casal da Juge - Sociedade Agro-Pecuaria e Silvicola, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,424.05197292000,0,424.05197292500,5759.81573677000]
[2055,162,null,{"$raw":"00000000"},"141910",1,"Casal do Pote - Emp. Agrícolas e Pecuários, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,704.73847468000,0,704.73847468400,14621.04973820000]
[2056,163,null,{"$raw":"00000000"},"141918",1,"Caves Dom Teodosio, S.A.","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,231.42373990000,0,231.42373990700,2531.30840495000]
[2057,163,null,{"$raw":"00000000"},"141918",1,"Caves Dom Teodosio, S.A.","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,401.80301139000,9999,401.80301139600,4284.12852240000]
[2058,163,null,{"$raw":"00000000"},"141918",1,"Caves Dom Teodosio, S.A.","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,613.15720277000,0,613.15720277800,10493.02256470000]
[2059,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,111.17503185000,0,111.17503185800,436.57520799400]
[2060,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,240.92836188000,9999,240.92836188300,941.85533171200]
[2061,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,275.08114660000,0,275.08114660300,952.08033700700]
[2062,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,268.32873712000,9999,268.32873712100,1103.07764264000]
[2063,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,400.99064843000,0,400.99064843900,1803.44348709000]
[2064,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,405.83923381000,9999,405.83923381500,1918.95134919000]
[2065,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,511.98681549000,9999,511.98681549500,2380.40702719000]
[2066,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,549.75621801000,9999,549.75621801400,2559.78478664000]
[2067,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,625.20520392000,0,625.20520392100,2567.61701507000]
[2068,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,610.44801255000,0,610.44801255900,2939.48035063000]
[2069,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,782.28528142000,9999,782.28528142600,3160.44628349000]
[2070,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1272.02981083000,0,1272.02981083000,3875.46197819000]
[2071,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,877.59624883000,0,877.59624883300,3927.41605630000]
[2072,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2240.32358297000,0,2240.32358297000,10527.31011130000]
[2073,164,null,{"$raw":"00000000"},"141919",4,"CM 1125","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3725.55501530000,0,3725.55501530000,18416.39073370000]
[2074,165,null,{"$raw":"00000000"},"Fora",4,"CM 1127","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,388.06719930000,0,388.06719930300,1837.83731696000]
[2075,166,null,{"$raw":"00000000"},"141902",4,"CM 1145","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,196.58453366000,0,196.58453366200,600.33554372400]
[2076,166,null,{"$raw":"00000000"},"141902",4,"CM 1145","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,154.48222233000,9999,154.48222233100,647.94471387700]
[2077,166,null,{"$raw":"00000000"},"141902",4,"CM 1145","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,168.41968461000,0,168.41968461100,723.29039785300]
[2078,166,null,{"$raw":"00000000"},"141902",4,"CM 1145","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,196.78023937000,9999,196.78023937800,737.84595598700]
[2079,166,null,{"$raw":"00000000"},"141902",4,"CM 1145","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,269.69382361000,9999,269.69382361500,1153.95780582000]
[2080,166,null,{"$raw":"00000000"},"141902",4,"CM 1145","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,559.80046545000,0,559.80046545000,2590.02141711000]
[2081,166,null,{"$raw":"00000000"},"141902",4,"CM 1145","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1093.48357457000,0,1093.48357457000,5360.83940359000]
[2082,166,null,{"$raw":"00000000"},"141902",4,"CM 1145","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1134.56970869000,0,1134.56970869000,5551.32946368000]
[2083,166,null,{"$raw":"00000000"},"141902",4,"CM 1145","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1329.42080385000,0,1329.42080385000,6529.78127608000]
[2084,167,null,{"$raw":"00000000"},"141902",4,"CM 1148","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,153.58422602000,0,153.58422602300,655.82354419900]
[2086,167,null,{"$raw":"00000000"},"141902",4,"CM 1148","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,331.25721146000,0,319.27675064100,1488.05551559000]
[2087,167,null,{"$raw":"00000000"},"141902",4,"CM 1148","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1160.20941933000,0,1160.20941933000,5103.30536655000]
[2088,167,null,{"$raw":"00000000"},"141902",4,"CM 1148","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1299.13940070000,0,1299.13940070000,6395.22747432000]
[2089,168,null,{"$raw":"00000000"},"141902",4,"CM 1149 (?)","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,110.75322271000,0,110.75322271400,441.57073254200]
[2090,168,null,{"$raw":"00000000"},"141902",4,"CM 1149 (?)","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,910.46490134000,0,910.46490134000,4439.34350685000]
[2091,168,null,{"$raw":"00000000"},"141902",4,"CM 1149 (?)","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,947.90049251000,0,947.90049251300,4628.44195567000]
[2092,168,null,{"$raw":"00000000"},"141904",4,"CM 1149 (?)","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3107.37932970000,0,3107.37932970000,15364.52962700000]
[2093,168,null,{"$raw":"00000000"},"141904",4,"CM 1149 (?)","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3124.22545160000,0,3124.22545160000,15467.52268750000]
[2094,169,null,{"$raw":"00000000"},"141904",4,"CM 1151","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,261.00772234000,0,261.00772234600,1202.84081072000]
[2095,169,null,{"$raw":"00000000"},"141904",4,"CM 1151","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,327.33089305000,9999,327.33089305900,1510.18785756000]
[2096,169,null,{"$raw":"00000000"},"141904",4,"CM 1151","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,374.12674097000,9999,374.12674097900,1759.71949927000]
[2097,169,null,{"$raw":"00000000"},"141904",4,"CM 1151","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2567.77493662000,0,2567.77493662000,12657.16850110000]
[2098,169,null,{"$raw":"00000000"},"141904",4,"CM 1151","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2661.82709919000,0,2661.82709919000,13210.83012860000]
[2099,170,null,{"$raw":"00000000"},"141902",4,"CM 1152","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,192.21701023000,9999,192.21701023200,733.78688625900]
[2100,170,null,{"$raw":"00000000"},"141902",4,"CM 1152","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,177.74793003000,0,177.74793003300,736.75056293800]
[2101,170,null,{"$raw":"00000000"},"141902",4,"CM 1152","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,192.15183311000,0,192.15183311200,841.10114282700]
[2102,170,null,{"$raw":"00000000"},"141902",4,"CM 1152","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,256.01661221000,0,256.01661221200,1162.67984980000]
[2103,170,null,{"$raw":"00000000"},"141902",4,"CM 1152","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,319.06172662000,9999,319.06172662400,1400.42948516000]
[2104,170,null,{"$raw":"00000000"},"141902",4,"CM 1152","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,387.99532590000,0,383.60713438700,1821.72977355000]
[2105,170,null,{"$raw":"00000000"},"141902",4,"CM 1152","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,487.15806396000,0,489.60414223900,2343.39459663000]
[2106,170,null,{"$raw":"00000000"},"141902",4,"CM 1152","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,965.02477216000,0,965.02477216300,4353.93428073000]
[2107,170,null,{"$raw":"00000000"},"141902",4,"CM 1152","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,940.85534708000,0,940.85534708800,4366.34461452000]
[2108,171,null,{"$raw":"00000000"},"141902",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,109.34620810000,9999,109.34620810700,427.55212700200]
[2109,171,null,{"$raw":"00000000"},"141902",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,165.99633963000,0,165.99633963600,673.79112341500]
[2110,171,null,{"$raw":"00000000"},"141902",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,213.10430498000,0,213.10430498400,947.34095615400]
[2111,171,null,{"$raw":"00000000"},"141902",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,210.47399866000,9999,210.47399866800,950.83260744300]
[2113,171,null,{"$raw":"00000000"},"141902",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,412.50877070000,0,412.50877070400,1956.95079212000]
[2114,171,null,{"$raw":"00000000"},"141902",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,645.36521781000,9999,645.36521781000,3072.76962759000]
[2115,171,null,{"$raw":"00000000"},"141902",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2521.67001662000,0,2521.67001662000,12498.35852170000]
[2116,171,null,{"$raw":"00000000"},"141919",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,231.62626918000,9999,231.62626918500,1049.10585363000]
[2117,171,null,{"$raw":"00000000"},"141919",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1620.66337146000,0,1620.66337146000,7986.34234521000]
[2118,171,null,{"$raw":"00000000"},"141919",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2694.79221354000,0,2694.79221354000,13332.34005580000]
[2119,172,null,{"$raw":"00000000"},"141904",4,"CM 1154","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,409.02723800000,0,409.02723800600,1915.86599440000]
[2120,172,null,{"$raw":"00000000"},"141904",4,"CM 1154","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,454.44946256000,0,454.44946256500,2163.22751835000]
[2121,172,null,{"$raw":"00000000"},"141904",4,"CM 1154","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,742.18158412000,0,742.18158412500,3598.39937695000]
[2122,172,null,{"$raw":"00000000"},"141904",4,"CM 1154","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,997.11737573000,0,997.11737573800,4854.18324426000]
[2123,173,null,{"$raw":"00000000"},"141904",4,"CM 1156","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,227.32219737000,0,227.32219737300,1031.59770126000]
[2124,173,null,{"$raw":"00000000"},"141904",4,"CM 1156","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,245.70946055000,0,245.70946055000,1080.48300541000]
[2125,173,null,{"$raw":"00000000"},"141921",4,"CM 1156","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1004.83844210000,0,1004.83844210000,4766.20696342000]
[2126,173,null,{"$raw":"00000000"},"141909",4,"CM 1156","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,92.01129688000,0,92.01129688850,40.99687722150]
[2128,173,null,{"$raw":"00000000"},"141909",4,"CM 1156","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,138.81935038000,9999,138.81935038300,416.52315050000]
[2130,173,null,{"$raw":"00000000"},"141909",4,"CM 1156","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,470.38374648000,0,470.38374648800,2042.60309826000]
[2131,173,null,{"$raw":"00000000"},"141909",4,"CM 1156","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1054.22204547000,0,1054.22204547000,4823.92179678000]
[2132,173,null,{"$raw":"00000000"},"141909",4,"CM 1156","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1324.12276343000,0,1309.15632805000,6431.30081543000]
[2133,173,null,{"$raw":"00000000"},"141909",4,"CM 1156","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1486.93016953000,0,1486.93016953000,7320.57933306000]
[2134,173,null,{"$raw":"00000000"},"141909",4,"CM 1156","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2590.64385909000,0,2590.64385909000,12847.05154820000]
[2135,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,131.88325128000,9999,131.88325128800,483.26100063300]
[2136,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,276.62558973000,0,276.62558973900,841.71741690700]
[2137,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,304.51575977000,9999,304.51575977900,1402.67764626000]
[2138,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,316.54787247000,0,316.54787247900,1480.85861434000]
[2139,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,394.81903538000,9999,394.81903538600,1696.16947808000]
[2140,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,410.84506219000,9999,410.84506219400,1796.82217124000]
[2141,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,502.65253085000,0,502.65253085000,2144.39218340000]
[2142,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,860.02995053000,0,860.02995053100,4123.97292884000]
[2143,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1006.86387295000,0,1006.86387295000,4284.14205349000]
[2144,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1688.40415156000,0,1688.40415156000,8315.93673520000]
[2145,174,null,{"$raw":"00000000"},"141904",4,"CM 1157","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2910.58951775000,0,2910.58951775000,14424.34159480000]
[2146,175,null,{"$raw":"00000000"},"141920",4,"CM 1158","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,171.00362809000,9999,171.00362809800,713.35123006200]
[2147,175,null,{"$raw":"00000000"},"141920",4,"CM 1158","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,293.78434813000,0,293.78434813700,1365.88314694000]
[2165,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,642.44583852000,9999,642.44583852700,2803.11733316000]
[2166,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,656.19504885000,0,656.19504885700,3109.82086921000]
[2167,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,913.06719837000,0,913.06719837100,4347.09029152000]
[2168,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,1118.78743025000,9999,1118.78743025000,4657.32264189000]
[2169,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,1595.70818828000,9999,1595.70818828000,7479.18641834000]
[2170,178,null,{"$raw":"00000000"},"141919",4,"CM 1161","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2680.83666114000,0,2680.83666114000,13165.19713110000]
[2171,179,null,{"$raw":"00000000"},"141909",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,33.88965096000,0,33.88965096320,33.86747895980]
[2172,179,null,{"$raw":"00000000"},"141909",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,390.60728152000,0,390.60728152100,441.27182978600]
[2173,179,null,{"$raw":"00000000"},"141909",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,193.82603631000,0,193.82603631700,795.22305931400]
[2174,179,null,{"$raw":"00000000"},"141909",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1381.67780309000,0,1381.67780309000,6807.94230333000]
[2175,179,null,{"$raw":"00000000"},"141909",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1386.02152782000,0,1386.02152782000,6829.72642558000]
[2176,179,null,{"$raw":"00000000"},"141921",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,218.01280579000,0,218.01280579500,976.52879762000]
[2177,179,null,{"$raw":"00000000"},"141921",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,264.02355364000,0,264.02355364600,1115.07701192000]
[2178,179,null,{"$raw":"00000000"},"141921",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,366.58192210000,0,366.58192210000,1697.46342121000]
[2179,179,null,{"$raw":"00000000"},"141921",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,410.45619608000,0,410.45619608000,1928.01560048000]
[2180,179,null,{"$raw":"00000000"},"141921",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,476.10352088000,0,476.10352088300,2131.14948881000]
[2181,179,null,{"$raw":"00000000"},"141921",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,481.85556154000,0,481.85556154800,2306.48162852000]
[2182,179,null,{"$raw":"00000000"},"141921",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1350.23882763000,0,1350.23882763000,6606.22126099000]
[2183,179,null,{"$raw":"00000000"},"141921",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2373.04325042000,0,2373.04325042000,11759.35773480000]
[2184,179,null,{"$raw":"00000000"},"141921",4,"CM 1163","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3123.47836359000,0,3123.47836359000,15499.55474430000]
[2185,180,null,{"$raw":"00000000"},"141916",4,"CM 1164","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,253.49755576000,0,253.49755576800,1082.55668002000]
[2186,180,null,{"$raw":"00000000"},"141916",4,"CM 1164","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,315.39512209000,0,315.39512209300,1415.27369943000]
[2187,180,null,{"$raw":"00000000"},"141916",4,"CM 1164","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3315.55459481000,0,3315.55459481000,16476.55610960000]
[2188,180,null,{"$raw":"00000000"},"141916",4,"CM 1164","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3428.75296731000,0,3428.75296731000,17032.84340580000]
[2189,181,null,{"$raw":"00000000"},"141910",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,267.22253293000,0,267.22253293900,1232.40880604000]
[2190,181,null,{"$raw":"00000000"},"141910",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,484.47884703000,9999,484.47884703900,1536.27321062000]
[2191,181,null,{"$raw":"00000000"},"141910",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,780.96517838000,0,780.96517838800,2224.35081761000]
[2192,181,null,{"$raw":"00000000"},"141910",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,722.09843391000,9999,722.09843391800,3399.38341844000]
[2193,181,null,{"$raw":"00000000"},"141910",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,767.29981175000,0,767.29981175700,3730.05362420000]
[2194,181,null,{"$raw":"00000000"},"141917",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,95.41094579000,0,95.41094579040,329.35022048900]
[2195,181,null,{"$raw":"00000000"},"141917",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,148.46206063000,9999,148.46206063600,634.11776066800]
[2196,181,null,{"$raw":"00000000"},"141917",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,156.33745936000,9999,156.33745936200,681.15283909500]
[2197,181,null,{"$raw":"00000000"},"141917",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,160.10816638000,9999,160.10816638400,699.88502756900]
[2198,181,null,{"$raw":"00000000"},"141917",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,221.04460950000,0,221.04460950100,997.38960136000]
[2199,181,null,{"$raw":"00000000"},"141917",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,242.27134563000,0,242.27134563800,1085.26779838000]
[2200,181,null,{"$raw":"00000000"},"141917",4,"CM 1165","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,267.41251673000,9999,267.41251673800,1229.76854154000]
[2201,182,null,{"$raw":"00000000"},"141920",4,"CM 1166","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,843.04734977000,0,843.04734977500,2794.96736941000]
[2202,182,null,{"$raw":"00000000"},"141920",4,"CM 1166","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2760.38370224000,0,2760.38370224000,13656.65213620000]
[2203,183,null,{"$raw":"00000000"},"141918",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,223.20828909000,0,223.20828909800,89.33228574490]
[2204,183,null,{"$raw":"00000000"},"141918",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,139.09338523000,0,139.09338523600,96.73342109540]
[2205,183,null,{"$raw":"00000000"},"141918",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2402.92781055000,0,2402.92781055000,11653.42214060000]
[2206,183,null,{"$raw":"00000000"},"141918",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3392.49419485000,0,3392.49419485000,16840.85907330000]
[2207,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,84.58702240000,0,84.58702240810,320.29691401900]
[2208,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,162.24007094000,9999,162.24007094000,705.91193080000]
[2209,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,208.75672876000,0,208.75672876100,921.22542131900]
[2210,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,206.21373135000,9999,206.21373135100,926.91448632000]
[2211,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,247.25774029000,0,247.25774029000,967.77685301300]
[2212,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,306.74884172000,9999,306.74884172300,1427.43057639000]
[2213,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,942.71110819000,0,942.71110819500,4615.72327550000]
[2214,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,968.02503108000,0,968.02503108900,4650.07485684000]
[2215,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1186.15768729000,0,1186.15768729000,5641.92758604000]
[2216,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1620.95946991000,0,1620.95946991000,7983.89990440000]
[2217,183,null,{"$raw":"00000000"},"141920",4,"CM 1167","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1831.91127450000,0,1831.91127450000,8991.29346709000]
[2218,184,null,{"$raw":"00000000"},"141910",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,593.56740910000,0,593.56740910400,2818.99545765000]
[2219,184,null,{"$raw":"00000000"},"141910",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,637.44453261000,0,637.44453261600,3086.35825032000]
[2220,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,285.78783247000,0,285.78783247200,463.43793001300]
[2221,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,209.83737866000,9999,209.83737866300,539.27159173800]
[2222,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,174.44213838000,0,174.44213838700,596.10347276100]
[2223,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,208.25302879000,0,208.25302879500,792.56686414600]
[2224,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,198.26601988000,0,198.26601988700,811.18761344900]
[2225,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,251.23368917000,9999,251.23368917100,816.26187538300]
[2226,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,623.85731537000,9999,623.85731537300,1682.10845773000]
[2227,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,539.67932782000,9999,539.67932782600,1916.29172584000]
[2228,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,596.25967938000,0,596.25967938400,2245.68511638000]
[2229,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,498.34635789000,0,498.34635789500,2266.46283080000]
[2230,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,492.42409311000,9999,492.42409311400,2345.40720227000]
[2231,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,569.39234350000,0,569.39234350200,2724.11485619000]
[2232,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,961.08736699000,0,961.08736699300,3829.55607882000]
[2233,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,948.67207425000,0,948.67207425500,4619.59539012000]
[2234,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1759.58755579000,0,1759.58755579000,8688.50692602000]
[2235,184,null,{"$raw":"00000000"},"141920",4,"CM 1168","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2849.06942880000,0,2849.06942880000,14140.03485880000]
[2236,185,null,{"$raw":"00000000"},"141920",4,"CM 1170","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,252.65750569000,0,252.65750569200,1160.80421540000]
[2237,185,null,{"$raw":"00000000"},"141920",4,"CM 1170","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,298.40261521000,0,298.40261521700,1383.19707443000]
[2238,185,null,{"$raw":"00000000"},"141920",4,"CM 1170","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,471.49676825000,0,471.49676825900,2248.07733135000]
[2239,185,null,{"$raw":"00000000"},"141920",4,"CM 1170","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,547.42062755000,0,547.42062755400,2633.37982548000]
[2240,185,null,{"$raw":"00000000"},"141920",4,"CM 1170","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,574.89075620000,0,574.89075620200,2771.30236008000]
[2241,185,null,{"$raw":"00000000"},"141920",4,"CM 1170","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1234.68176307000,0,1234.68176307000,6058.25348933000]
[2242,185,null,{"$raw":"00000000"},"141920",4,"CM 1170","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1357.26426452000,0,1357.26426452000,6661.12883863000]
[2243,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,189.85586054000,0,189.85586054100,750.45459022200]
[2244,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,205.76921043000,0,205.76921043600,777.13894322400]
[2245,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,186.55400248000,0,186.55400248500,824.09982401900]
[2246,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,205.72783727000,0,205.72783727700,833.59605103800]
[2248,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,452.96024853000,0,452.96024853400,1815.76040862000]
[2249,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,391.56994942000,9999,391.56994942900,1818.43855804000]
[2250,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,397.97179064000,0,397.97179064200,1888.73159355000]
[2251,186,null,{"$raw":"00000000"},"141918",4,"CM 1171","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,430.12295951000,9999,430.12295951300,1998.36898194000]
[2269,188,null,{"$raw":"00000000"},"141918",4,"CM 1173","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,177.66016421000,9999,177.66016421100,757.65316611500]
[2270,188,null,{"$raw":"00000000"},"141918",4,"CM 1173","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,210.18878548000,0,210.18878548700,775.32895885800]
[2271,188,null,{"$raw":"00000000"},"141918",4,"CM 1173","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,243.44254371000,0,243.44254371600,1111.05845134000]
[2272,188,null,{"$raw":"00000000"},"141918",4,"CM 1173","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,303.08582937000,9999,303.08582937600,1175.21609611000]
[2273,188,null,{"$raw":"00000000"},"141918",4,"CM 1173","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,529.08085260000,0,529.08085260600,2456.58502180000]
[2274,188,null,{"$raw":"00000000"},"141918",4,"CM 1173","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,577.43536683000,0,577.43536683300,2700.73440704000]
[2275,188,null,{"$raw":"00000000"},"141918",4,"CM 1173","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,634.98086350000,0,634.98086350900,2739.58858091000]
[2276,189,null,{"$raw":"00000000"},"141918",4,"CM 1174","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,161.64686020000,9999,161.64686020900,695.27913429900]
[2277,189,null,{"$raw":"00000000"},"141918",4,"CM 1174","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,837.72687505000,0,837.72687505400,4070.74028998000]
[2278,189,null,{"$raw":"00000000"},"141918",4,"CM 1174","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1341.12877726000,0,1341.12877726000,6585.09920764000]
[2279,189,null,{"$raw":"00000000"},"141918",4,"CM 1174","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2826.03394114000,0,2826.03394114000,13732.58617070000]
[2280,189,null,{"$raw":"00000000"},"141918",4,"CM 1174","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3293.81766942000,0,3293.81766942000,16270.65514530000]
[2281,189,null,{"$raw":"00000000"},"141918",4,"CM 1174","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,860.76222201000,0,860.76222201700,4111.65592733000]
[2282,189,null,{"$raw":"00000000"},"141918",4,"CM 1174","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1100.54870019000,0,1100.54870019000,5219.53271374000]
[2283,189,null,{"$raw":"00000000"},"141918",4,"CM 1174","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1347.71769286000,0,1347.71769286000,6623.17789055000]
[2284,189,null,{"$raw":"00000000"},"Fora",4,"CM 1174","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,833.00001245000,0,833.00001245500,4005.96639619000]
[2285,189,null,{"$raw":"00000000"},"Fora",4,"CM 1174","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3542.14539857000,0,3542.14539857000,17563.48050330000]
[2286,190,null,{"$raw":"00000000"},"141918",4,"CM 1174-1","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,182.31029203000,9999,182.31029203200,750.54728972400]
[2287,190,null,{"$raw":"00000000"},"141918",4,"CM 1174-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,889.31341237000,0,889.31341237600,4273.76373084000]
[2288,190,null,{"$raw":"00000000"},"141918",4,"CM 1174-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2311.09318102000,0,2311.09318102000,11360.05196570000]
[2289,191,null,{"$raw":"00000000"},"141918",4,"CM 1175","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1913.77472023000,0,1913.77472023000,9462.57944363000]
[2290,191,null,{"$raw":"00000000"},"141918",4,"CM 1175","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2292.90514572000,0,2292.90514572000,11285.43222570000]
[2291,191,null,{"$raw":"00000000"},"141918",4,"CM 1175","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,155.25790555000,0,155.25790555000,676.18508237300]
[2292,191,null,{"$raw":"00000000"},"141918",4,"CM 1175","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1609.79385651000,0,1609.79385651000,6374.59021733000]
[2293,191,null,{"$raw":"00000000"},"141918",4,"CM 1175","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1596.24610912000,0,1596.24610912000,7877.66571860000]
[2294,192,null,{"$raw":"00000000"},"141918",4,"CM 1176","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,198.57836276000,0,198.57836276200,443.29294356900]
[2295,192,null,{"$raw":"00000000"},"141918",4,"CM 1176","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,154.11563102000,9999,154.11563102000,648.36207317300]
[2296,192,null,{"$raw":"00000000"},"141918",4,"CM 1176","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,403.05165020000,0,403.05165020500,1914.57786221000]
[2297,192,null,{"$raw":"00000000"},"141918",4,"CM 1176","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,615.29369353000,0,615.29369353900,2972.64134450000]
[2298,192,null,{"$raw":"00000000"},"141918",4,"CM 1176","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3809.06763367000,0,3809.06763367000,18917.06507230000]
[2299,192,null,{"$raw":"00000000"},"141918",4,"CM 1176","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3844.84302852000,0,3844.84302852000,19060.50154480000]
[2300,192,null,{"$raw":"00000000"},"Fora",4,"CM 1176","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,87.66572954000,0,87.66572954110,329.73615854900]
[2301,193,null,{"$raw":"00000000"},"141918",4,"CM 1177","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,176.07980285000,0,176.07980285000,770.36910074900]
[2302,193,null,{"$raw":"00000000"},"141918",4,"CM 1177","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,597.63538105000,0,597.63538105700,2855.83159535000]
[2303,193,null,{"$raw":"00000000"},"141918",4,"CM 1177","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,601.94199248000,0,601.94199248400,2871.84288654000]
[2304,193,null,{"$raw":"00000000"},"141910",4,"CM 1177","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,896.27995144000,0,896.27995144200,4332.64337471000]
[2305,193,null,{"$raw":"00000000"},"141910",4,"CM 1177","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1547.05052930000,0,1547.05052930000,7574.72714082000]
[2306,193,null,{"$raw":"00000000"},"Fora",4,"CM 1177","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,692.51024813000,0,692.51024813100,3332.44939911000]
[2307,194,null,{"$raw":"00000000"},"141910",4,"CM 1179","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,92.19018781000,0,92.19018781880,350.24492064700]
[2308,194,null,{"$raw":"00000000"},"141910",4,"CM 1179","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,381.27034674000,0,381.27034674300,1789.87495503000]
[2309,194,null,{"$raw":"00000000"},"141910",4,"CM 1179","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,734.01326577000,0,734.01326577100,2291.93224163000]
[2310,194,null,{"$raw":"00000000"},"141910",4,"CM 1179","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,552.51565791000,0,552.51565791100,2635.25428133000]
[2311,194,null,{"$raw":"00000000"},"141910",4,"CM 1179","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1081.55208153000,0,1081.55208153000,5244.34986744000]
[2312,194,null,{"$raw":"00000000"},"141910",4,"CM 1179","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1252.80263211000,0,1252.80263211000,6152.32247622000]
[2313,194,null,{"$raw":"00000000"},"141910",4,"CM 1179","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1501.46703142000,0,1501.46703142000,7392.30726381000]
[2314,194,null,{"$raw":"00000000"},"141910",4,"CM 1179","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1713.03149643000,0,1713.03149643000,7828.53039363000]
[2315,194,null,{"$raw":"00000000"},"Fora",4,"CM 1179","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,459.21763197000,0,459.21763197200,1988.60639260000]
[2316,195,null,{"$raw":"00000000"},"141910",4,"CM 1180","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,828.17912720000,0,828.17912720700,4714.76819794000]
[2317,195,null,{"$raw":"00000000"},"141910",4,"CM 1180","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1130.80088637000,0,1130.80088637000,5547.19966765000]
[2318,195,null,{"$raw":"00000000"},"141910",4,"CM 1180","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2568.39118394000,0,2568.39118394000,12729.88519290000]
[2319,196,null,{"$raw":"00000000"},"141910",4,"CM 1181","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2038.77092090000,0,2038.77092090000,10073.02316920000]
[2320,196,null,{"$raw":"00000000"},"141910",4,"CM 1181","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2055.13344965000,0,2055.13344965000,10154.49880320000]
[2321,196,null,{"$raw":"00000000"},"Fora",4,"CM 1181","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,159.06612019000,0,159.06612019600,691.72831121400]
[2322,197,null,{"$raw":"00000000"},"141919",4,"CM 1182","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,126.55959948000,0,126.55959948300,420.64011512400]
[2323,197,null,{"$raw":"00000000"},"141919",4,"CM 1182","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,116.80691446000,9999,116.80691446400,447.08868941700]
[2324,197,null,{"$raw":"00000000"},"141919",4,"CM 1182","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,276.57413480000,0,276.57413480400,1134.99635276000]
[2325,197,null,{"$raw":"00000000"},"141919",4,"CM 1182","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1872.01070171000,0,1872.01070171000,7913.89001993000]
[2326,197,null,{"$raw":"00000000"},"141920",4,"CM 1182","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,793.43025417000,0,793.43025417200,540.48543681400]
[2327,197,null,{"$raw":"00000000"},"141920",4,"CM 1182","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,591.63865099000,0,591.63865099700,731.74189173700]
[2328,197,null,{"$raw":"00000000"},"141920",4,"CM 1182","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,228.06438970000,9999,228.06438970900,1039.84373231000]
[2330,197,null,{"$raw":"00000000"},"141920",4,"CM 1182","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,486.54483125000,0,486.54483125300,2330.06402467000]
[2331,197,null,{"$raw":"00000000"},"141920",4,"CM 1182","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,661.93668787000,0,661.93668787700,3203.86110856000]
[2332,197,null,{"$raw":"00000000"},"Fora",4,"CM 1182","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,655.76323441000,0,657.97699468800,3036.59838668000]
[2333,198,null,{"$raw":"00000000"},"141902",4,"CM não class","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,242.29722053000,0,242.29722053800,1102.98360361000]
[2334,199,null,{"$raw":"00000000"},"141902",1,"Construçoes Outeirense, Lda.","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,238.05366739000,9999,238.05366739200,3735.82592265000]
[2335,199,null,{"$raw":"00000000"},"141902",1,"Construçoes Outeirense, Lda.","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,656.77907332000,0,656.77907332100,11819.59713380000]
[2336,200,null,{"$raw":"00000000"},"141910",1,"Coudelaria de Antonio T. Godinho de Carvalho","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,257.75490765000,0,257.75490765800,2333.78436328000]
[2337,200,null,{"$raw":"00000000"},"141910",1,"Coudelaria de Antonio T. Godinho de Carvalho","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,378.22465978000,0,378.22465978900,6840.98181936000]
[2338,201,null,{"$raw":"00000000"},"141921",1,"Destilaria - João Abreu","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,94.42071874000,9999,94.42071874330,255.59407352200]
[2339,201,null,{"$raw":"00000000"},"141921",1,"Destilaria - João Abreu","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,352.40594753000,0,352.40594753100,3991.74985720000]
[2340,201,null,{"$raw":"00000000"},"141921",1,"Destilaria - João Abreu","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,515.08357436000,0,515.08357436000,10303.58765000000]
[2342,202,null,{"$raw":"00000000"},"141910",1,"Edith Elvira Jeffrey Mcmillan Herdeiros","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,94.38039977000,0,94.38039977940,208.80439688300]
[2343,203,null,{"$raw":"00000000"},"141918",4,"EM 513","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,329.39315744000,0,329.39315744400,1509.63158433000]
[2344,203,null,{"$raw":"00000000"},"Fora",4,"EM 513","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,205.02980584000,0,205.02980584400,924.69331301800]
[2345,203,null,{"$raw":"00000000"},"Fora",4,"EM 513","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,495.07404538000,0,495.07404538200,2322.06977777000]
[2346,203,null,{"$raw":"00000000"},"Fora",4,"EM 513","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,800.52197133000,0,800.52197133300,3900.16222435000]
[2347,204,null,{"$raw":"00000000"},"141902",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,157.84556793000,0,157.84556793500,666.84326576500]
[2348,204,null,{"$raw":"00000000"},"141902",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,281.32463000000,0,281.32463000300,1273.90915821000]
[2349,204,null,{"$raw":"00000000"},"141902",4,"EM 538","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,422.76505816000,9999,422.76505816000,1933.12856338000]
[2350,204,null,{"$raw":"00000000"},"141902",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,445.70787810000,0,445.70787810100,2125.75652647000]
[2351,204,null,{"$raw":"00000000"},"141902",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,468.23794504000,0,468.23794504200,2239.71659737000]
[2352,204,null,{"$raw":"00000000"},"141902",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,528.82739086000,0,528.82739086100,2534.41744527000]
[2353,204,null,{"$raw":"00000000"},"141902",4,"EM 538","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,545.77810670000,9999,545.77810670700,2611.51765440000]
[2354,204,null,{"$raw":"00000000"},"141902",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,590.15996611000,0,590.15996611200,2842.56082357000]
[2355,204,null,{"$raw":"00000000"},"141902",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,643.97911787000,0,643.97911787600,2986.53467831000]
[2356,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,181.46223194000,9999,181.46223194000,577.75596862600]
[2357,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,148.65002266000,9999,148.65002266100,641.00579458600]
[2358,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,152.26189356000,9999,152.26189356500,648.91387670700]
[2359,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,197.78224228000,9999,197.78224228500,834.82524314800]
[2360,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,259.24723426000,0,259.24723426700,1180.35574501000]
[2361,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,284.14770219000,0,284.14770219400,1316.87202688000]
[2362,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,293.87294275000,9999,293.87294275500,1328.27024136000]
[2363,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,318.96943940000,9999,318.96943940600,1452.49538983000]
[2364,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,324.76012937000,0,324.76012937600,1452.58986757000]
[2365,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,445.70505412000,0,445.70505412000,2126.60204802000]
[2366,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,620.51593235000,0,620.51593235900,2880.68370111000]
[2367,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,856.19861751000,0,856.19861751100,4167.15916419000]
[2368,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1089.25326301000,0,1089.25326301000,5314.05499947000]
[2369,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1138.66116741000,0,1138.66116741000,5586.61978391000]
[2370,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1201.35830034000,0,1201.35830034000,5839.10667086000]
[2371,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1607.04157623000,0,1607.04157623000,7680.66659852000]
[2372,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1644.84126398000,0,1644.84126398000,7996.98636817000]
[2373,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3084.01434314000,0,3084.01434314000,15148.39275710000]
[2374,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,126.69002904000,0,126.69002904000,148.36109335100]
[2375,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,247.63539313000,0,247.63539313300,1110.20448750000]
[2376,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,387.03984845000,0,387.03984845400,1833.55134599000]
[2377,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,470.00835885000,0,470.00835885400,1935.08841915000]
[2378,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,440.77694026000,0,440.77694026700,2103.39904877000]
[2379,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,474.93578441000,0,474.93578441500,2214.74355423000]
[2380,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,582.34644748000,0,582.34644748200,2778.75757994000]
[2381,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,656.84937998000,0,656.84937998500,3180.07800629000]
[2382,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,674.54059195000,0,674.54059195300,3263.13745224000]
[2383,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,723.21890476000,0,723.21890476900,3432.99242731000]
[2384,204,null,{"$raw":"00000000"},"141919",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1833.61148084000,0,1833.61148084000,9062.91467090000]
[2385,204,null,{"$raw":"00000000"},"141920",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,137.20718377000,0,137.20718377600,527.69304882300]
[2386,204,null,{"$raw":"00000000"},"141920",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,577.00456432000,0,577.00456432400,2667.87919863000]
[2387,204,null,{"$raw":"00000000"},"Fora",4,"EM 538","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2026.99602860000,0,2026.99602860000,9829.28819680000]
[2388,205,null,{"$raw":"00000000"},"141902",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,186.40694087000,0,186.40694087000,825.50297683700]
[2389,205,null,{"$raw":"00000000"},"141902",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,239.60276987000,0,239.60276987000,934.66294826500]
[2390,205,null,{"$raw":"00000000"},"141902",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2087.41657939000,0,2087.41657939000,10339.87498350000]
[2391,205,null,{"$raw":"00000000"},"141902",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2159.14271231000,0,2159.14271231000,10677.73980140000]
[2392,205,null,{"$raw":"00000000"},"141919",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,91.60634716000,0,91.60634716210,315.73754133600]
[2393,205,null,{"$raw":"00000000"},"141919",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,117.89429038000,0,117.89429038300,421.39349610100]
[2394,205,null,{"$raw":"00000000"},"141919",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,181.44847706000,0,181.44847706300,672.63901942700]
[2395,205,null,{"$raw":"00000000"},"141919",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,273.23429581000,9999,273.23429581700,1266.10632740000]
[2396,205,null,{"$raw":"00000000"},"141919",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,372.09621093000,0,372.09621093500,1604.38249767000]
[2397,205,null,{"$raw":"00000000"},"141919",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,445.41286742000,0,445.41286742700,2122.94872740000]
[2398,205,null,{"$raw":"00000000"},"141919",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,838.21534469000,0,838.21534469200,4058.15651824000]
[2399,205,null,{"$raw":"00000000"},"141919",4,"EM 538-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1465.98964022000,0,1465.98964022000,6971.56656190000]
[2400,206,null,{"$raw":"00000000"},"141902",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,471.60366877000,0,471.60366877400,2212.89835113000]
[2401,206,null,{"$raw":"00000000"},"141902",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1624.70879132000,0,1624.70879132000,7998.54466365000]
[2402,206,null,{"$raw":"00000000"},"141919",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,99.19120829000,0,99.19120829840,395.61258683800]
[2403,206,null,{"$raw":"00000000"},"141919",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,190.62100776000,9999,190.62100776000,650.03801016200]
[2404,206,null,{"$raw":"00000000"},"141919",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,331.20189657000,0,331.20189657400,1544.92885027000]
[2405,206,null,{"$raw":"00000000"},"141919",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,374.67842833000,9999,374.67842833500,1769.01929383000]
[2406,206,null,{"$raw":"00000000"},"141919",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,478.38142630000,0,478.38142630300,2253.02706257000]
[2407,206,null,{"$raw":"00000000"},"141919",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,500.95452521000,9999,500.95452521600,2393.65579664000]
[2408,206,null,{"$raw":"00000000"},"141919",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,776.58735159000,0,776.58735159600,3631.81183626000]
[2409,206,null,{"$raw":"00000000"},"141919",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1112.41559168000,0,1112.41559168000,5442.54432632000]
[2410,206,null,{"$raw":"00000000"},"141919",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1593.29961085000,0,1593.29961085000,7845.23243011000]
[2411,206,null,{"$raw":"00000000"},"Fora",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,164.61866649000,9999,164.61866649000,500.14873840000]
[2412,206,null,{"$raw":"00000000"},"Fora",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,192.31205348000,0,192.31205348300,582.01682322300]
[2413,206,null,{"$raw":"00000000"},"Fora",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,195.73240576000,0,195.73240576900,850.66739457500]
[2414,206,null,{"$raw":"00000000"},"Fora",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,212.76007659000,0,212.76007659800,944.47360901200]
[2415,206,null,{"$raw":"00000000"},"Fora",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,942.32061778000,0,942.32061778300,3609.25802825000]
[2416,206,null,{"$raw":"00000000"},"Fora",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,892.45054022000,0,892.45054022700,4359.52326315000]
[2417,206,null,{"$raw":"00000000"},"Fora",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,953.19992121000,0,953.19992121600,4638.43543484000]
[2418,206,null,{"$raw":"00000000"},"Fora",4,"EM 538-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2239.92338563000,0,2239.92338563000,10723.70623540000]
[2419,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,68.86987821000,9999,68.86987821880,207.84962915600]
[2420,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,71.66828616000,0,71.66828616990,228.55605485700]
[2421,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,84.51466503000,0,84.51466503260,289.03645179200]
[2422,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,149.66405923000,0,149.66405923300,444.26357196800]
[2423,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,133.63255665000,0,133.63255665100,558.28051200900]
[2424,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,192.74587225000,0,192.74587225000,863.52133727000]
[2425,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,228.21782136000,0,228.21782136000,923.96875159600]
[2426,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,235.59082258000,0,235.59082258000,1064.88809722000]
[2427,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,264.87800353000,0,264.87800353000,1116.80986866000]
[2428,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,329.22657903000,9999,329.22657903300,1353.07177550000]
[2429,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,442.61114940000,9999,442.61114940500,1644.81836888000]
[2430,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,423.62853308000,0,423.62853308500,1962.71021942000]
[2431,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,477.17948752000,9999,477.17948752700,2166.07341147000]
[2432,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,607.39692186000,0,607.39692186500,2225.93992235000]
[2433,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,730.20023349000,9999,730.20023349500,3356.56779934000]
[2434,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,915.25853936000,0,915.25853936100,3498.93246826000]
[2435,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,983.85316225000,0,983.85316225000,4630.24128936000]
[2436,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,1069.82180217000,9999,1069.82180217000,5238.50721944000]
[2437,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1176.80736930000,0,1176.80736930000,5782.39115685000]
[2438,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1257.30092940000,0,1257.30092940000,6172.37141693000]
[2439,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1450.45044644000,0,1450.45044644000,7148.42640549000]
[2440,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1961.18631053000,0,1961.18631053000,8950.92566229000]
[2441,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2176.88040032000,0,2176.88040032000,10019.64021870000]
[2442,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2316.32969450000,0,2316.32969450000,11467.48004960000]
[2443,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3092.82414705000,0,3092.82414705000,15337.82837590000]
[2444,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,135.53324770000,0,135.53324770400,135.89810856700]
[2445,207,null,{"$raw":"00000000"},"141919",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1097.36782513000,0,1097.36782513000,5383.20007665000]
[2446,207,null,{"$raw":"00000000"},"Fora",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,205.57924159000,0,205.57924159500,239.76224326500]
[2447,207,null,{"$raw":"00000000"},"Fora",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,77.52775228000,0,77.52775228250,280.65228888400]
[2448,207,null,{"$raw":"00000000"},"Fora",4,"EM 539","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,234.16106222000,0,234.16106222600,381.52388060700]
[2449,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,72.98608441000,9999,72.98608441410,244.82302564800]
[2450,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,104.70510746000,9999,104.70510746800,393.75213149200]
[2451,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,149.62517464000,0,149.62517464200,429.25485847800]
[2452,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,139.84780297000,9999,139.84780297500,528.00572415400]
[2453,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,324.09248797000,0,324.09248797300,653.91894147500]
[2454,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,189.50720320000,0,189.50720320200,798.86434080300]
[2455,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,252.25101025000,9999,252.25101025500,830.49137639900]
[2456,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,194.31609620000,0,194.31609620700,863.97382249800]
[2457,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,203.15774394000,9999,203.15774394200,902.47694458800]
[2458,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,269.62472368000,0,269.62472368200,977.55561270200]
[2459,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,465.15797059000,0,465.15797059600,1061.06711970000]
[2460,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,321.97136976000,0,321.97136976400,1487.30151599000]
[2461,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,347.20667845000,0,347.20667845500,1595.82785815000]
[2462,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,390.27523201000,9999,390.27523201700,1737.67659454000]
[2463,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,393.69742604000,0,393.69742604300,1856.93650469000]
[2464,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,411.58914848000,0,411.58914848500,1952.11646936000]
[2465,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,566.17747208000,0,566.17747208000,2472.25634177000]
[2466,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,563.21554417000,9999,563.21554417300,2707.18797231000]
[2467,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,787.01997659000,9999,787.01997659600,3789.39590599000]
[2468,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1685.44524889000,0,1685.44524889000,7905.11955186000]
[2469,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2341.73981591000,0,2341.73981591000,11587.55218260000]
[2470,208,null,{"$raw":"00000000"},"141902",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2434.54262029000,0,2434.54262029000,12021.10222580000]
[2471,208,null,{"$raw":"00000000"},"141904",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,182.08016486000,0,182.08016486100,790.34067801700]
[2472,208,null,{"$raw":"00000000"},"141904",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,211.77861596000,0,211.77861596700,945.56880784100]
[2473,208,null,{"$raw":"00000000"},"141904",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,275.48631450000,0,275.48631450300,1274.31547162000]
[2474,208,null,{"$raw":"00000000"},"141904",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,900.78461032000,0,900.78461032700,4400.84282341000]
[2475,208,null,{"$raw":"00000000"},"141904",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,929.27687989000,0,929.27687989300,4542.53568994000]
[2476,208,null,{"$raw":"00000000"},"141904",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1962.22320111000,0,1962.22320111000,9661.32800139000]
[2477,208,null,{"$raw":"00000000"},"141904",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2139.33095590000,0,2139.33095590000,10579.75978720000]
[2478,208,null,{"$raw":"00000000"},"141904",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2672.00378435000,0,2672.00378435000,13245.59375310000]
[2479,208,null,{"$raw":"00000000"},"141904",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3538.81825091000,0,3538.81825091000,17590.85666770000]
[2480,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,109.16726585000,0,109.16726585200,321.39103314000]
[2481,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,97.35937043000,9999,97.35937043910,326.84923473500]
[2482,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,130.03005936000,0,130.03005936500,410.69672663700]
[2483,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,121.42557598000,0,121.42557598200,429.72252442700]
[2484,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,142.82966598000,9999,142.82966598600,578.98328922000]
[2485,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,142.32573567000,0,142.32573567500,589.24953250100]
[2486,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,177.99326783000,9999,177.99326783000,776.17194136900]
[2487,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,202.88576423000,0,202.88576423600,899.26591659300]
[2488,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,333.54123041000,9999,333.54123041000,1423.22379098000]
[2489,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,434.88671092000,0,434.88671092600,1485.07875641000]
[2490,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,364.31401146000,0,364.31401146400,1503.61108818000]
[2491,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,326.89870059000,0,326.89870059700,1520.48895364000]
[2492,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,333.27229521000,0,333.27229521700,1565.15651650000]
[2493,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,411.01181637000,9999,411.01181637600,1696.24683905000]
[2494,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,390.39438701000,9999,390.39438701700,1855.98223168000]
[2495,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,433.00419953000,0,433.00419953200,1948.59283822000]
[2496,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,450.91610454000,9999,450.91610454700,2086.03867797000]
[2497,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,467.64228915000,0,467.64228915900,2093.63697869000]
[2498,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,491.75043708000,9999,491.75043708300,2338.92783080000]
[2499,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,583.88857922000,0,583.88857922000,2816.20592525000]
[2500,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,633.16354580000,0,633.16354580400,3062.31389043000]
[2501,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,720.63650054000,0,720.63650054900,3488.35228708000]
[2502,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,835.48405737000,9999,835.48405737700,4059.10136315000]
[2503,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,872.83909650000,0,872.83909650000,4247.80915880000]
[2504,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,985.78363382000,9999,985.78363382600,4749.48843185000]
[2505,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1233.50109308000,0,1233.50109308000,6046.52101327000]
[2506,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1262.75452153000,0,1262.75452153000,6156.36139645000]
[2507,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1521.20189417000,0,1521.20189417000,7491.45814571000]
[2508,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1520.64718440000,0,1520.64718440000,7491.52347863000]
[2509,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1564.89715925000,0,1564.89715925000,7514.21942101000]
[2510,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2333.37844842000,0,2333.37844842000,11511.28752980000]
[2511,208,null,{"$raw":"00000000"},"141909",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2395.28317007000,0,2395.28317007000,11859.12324010000]
[2512,208,null,{"$raw":"00000000"},"Fora",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,73.56924718000,0,73.56924718940,255.44310513400]
[2513,208,null,{"$raw":"00000000"},"Fora",4,"EM 557","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,157.40034647000,0,157.40034647700,494.51761116000]
[2514,209,null,{"$raw":"00000000"},"141902",4,"EM 557-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,270.14541731000,0,270.14541731800,1177.67492261000]
[2515,209,null,{"$raw":"00000000"},"141902",4,"EM 557-1","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,303.23027477000,9999,303.23027477700,1276.32705691000]
[2516,209,null,{"$raw":"00000000"},"141902",4,"EM 557-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,832.08872252000,0,832.08872252600,3778.04002016000]
[2517,209,null,{"$raw":"00000000"},"141902",4,"EM 557-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,987.05669769000,0,987.05669769000,4803.81656240000]
[2518,209,null,{"$raw":"00000000"},"141902",4,"EM 557-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1890.84034529000,0,1854.04986503000,9163.70846233000]
[2519,209,null,{"$raw":"00000000"},"141902",4,"EM 557-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1903.79827093000,0,1871.70201058000,9252.15848995000]
[2520,209,null,{"$raw":"00000000"},"141902",4,"EM 557-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1988.56707265000,0,1988.56707265000,9827.52716752000]
[2521,210,null,{"$raw":"00000000"},"141921",4,"EM 557-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,890.95292745000,0,890.95292745100,4315.73294570000]
[2522,210,null,{"$raw":"00000000"},"141921",4,"EM 557-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2682.10236415000,0,2682.10236415000,13303.34567570000]
[2523,210,null,{"$raw":"00000000"},"141921",4,"EM 557-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3695.11041257000,0,3695.11041257000,18342.54894080000]
[2524,210,null,{"$raw":"00000000"},"141909",4,"EM 557-2","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,338.78457415000,9999,338.78457415600,1587.06543126000]
[2525,210,null,{"$raw":"00000000"},"141909",4,"EM 557-2","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,478.02977346000,9999,478.02977346400,1949.36496325000]
[2526,210,null,{"$raw":"00000000"},"141909",4,"EM 557-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1032.49428858000,0,1032.49428858000,4962.47915782000]
[2527,210,null,{"$raw":"00000000"},"141909",4,"EM 557-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1553.01604455000,0,1553.01604455000,5984.66858995000]
[2528,210,null,{"$raw":"00000000"},"141909",4,"EM 557-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1849.94482792000,0,1849.94482792000,9128.65753609000]
[2529,210,null,{"$raw":"00000000"},"141909",4,"EM 557-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3827.92473256000,0,3827.92473256000,19042.92882330000]
[2530,211,null,{"$raw":"00000000"},"141909",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,350.77073068000,9999,350.77073068300,742.62106655200]
[2531,211,null,{"$raw":"00000000"},"141909",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2649.49620271000,0,2649.49620271000,12360.50454920000]
[2532,211,null,{"$raw":"00000000"},"141909",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3192.44310834000,0,3192.44310834000,15850.96832300000]
[2533,211,null,{"$raw":"00000000"},"141920",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,164.45834570000,0,164.45834570700,724.84537837100]
[2534,211,null,{"$raw":"00000000"},"141916",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,167.57828233000,0,167.57828233000,654.49818669100]
[2535,211,null,{"$raw":"00000000"},"141916",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,692.36689290000,0,692.36689290400,3337.89021014000]
[2536,211,null,{"$raw":"00000000"},"141916",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,708.92040925000,0,708.92040925200,3436.83457526000]
[2537,211,null,{"$raw":"00000000"},"141916",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,797.40115117000,0,797.40115117800,3880.01134709000]
[2538,211,null,{"$raw":"00000000"},"141916",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,799.79640485000,0,799.79640485600,3887.77794947000]
[2539,211,null,{"$raw":"00000000"},"141916",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1193.75501000000,0,1193.75501000000,5609.35660627000]
[2540,211,null,{"$raw":"00000000"},"141916",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1475.00232700000,0,1475.00232700000,7267.15739700000]
[2541,211,null,{"$raw":"00000000"},"141916",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1769.11185080000,0,1769.11185080000,8742.99092231000]
[2542,211,null,{"$raw":"00000000"},"141916",4,"EM 557-3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1822.55404843000,0,1822.55404843000,9014.02930600000]
[2543,212,null,{"$raw":"00000000"},"141902",4,"EM 558","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,129.10920758000,0,129.10920758900,387.83577067000]
[2544,212,null,{"$raw":"00000000"},"141902",4,"EM 558","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,133.83921605000,0,133.83921605200,455.57834104400]
[2545,212,null,{"$raw":"00000000"},"141902",4,"EM 558","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,113.08136386000,9999,113.08136386100,462.12797221100]
[2546,212,null,{"$raw":"00000000"},"141902",4,"EM 558","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,193.80850134000,9999,193.80850134800,705.09645432100]
[2547,212,null,{"$raw":"00000000"},"141902",4,"EM 558","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,237.32163315000,0,237.32163315500,831.35294989500]
[2548,212,null,{"$raw":"00000000"},"141902",4,"EM 558","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,209.77668931000,0,209.77668931400,944.62864231600]
[2549,212,null,{"$raw":"00000000"},"141902",4,"EM 558","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,248.57355005000,0,248.57355005200,1133.76283387000]
[2550,212,null,{"$raw":"00000000"},"141902",4,"EM 558","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,776.03877713000,0,776.03877713100,3725.68934326000]
[2551,212,null,{"$raw":"00000000"},"141902",4,"EM 558","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1667.61188311000,0,1667.61188311000,5675.90310743000]
[2552,212,null,{"$raw":"00000000"},"Fora",4,"EM 558","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,93.67192039000,0,93.67192039520,360.03291293300]
[2553,212,null,{"$raw":"00000000"},"Fora",4,"EM 558","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,145.35161539000,0,145.35161539900,587.75340679000]
[2554,212,null,{"$raw":"00000000"},"Fora",4,"EM 558","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,946.51807664000,0,946.51807664700,4598.38434877000]
[2555,213,null,{"$raw":"00000000"},"141904",4,"EM 562","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,350.10329958000,9999,350.10329958700,714.11709105600]
[2556,213,null,{"$raw":"00000000"},"141904",4,"EM 562","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,305.68699719000,9999,305.68699719100,1086.31013362000]
[2557,213,null,{"$raw":"00000000"},"141904",4,"EM 562","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,737.86386279000,9999,737.86386279600,3568.71784337000]
[2558,213,null,{"$raw":"00000000"},"141904",4,"EM 562","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,796.18118286000,0,796.18118286500,3854.60718639000]
[2559,213,null,{"$raw":"00000000"},"141904",4,"EM 562","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1338.44603502000,0,1338.44603502000,4716.34420316000]
[2560,213,null,{"$raw":"00000000"},"141904",4,"EM 562","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1236.80454048000,0,1236.80454048000,6058.75036315000]
[2561,213,null,{"$raw":"00000000"},"141904",4,"EM 562","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2416.48704056000,0,2416.48704056000,11983.37684140000]
[2562,213,null,{"$raw":"00000000"},"141904",4,"EM 562","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,4911.08296866000,0,4911.08296866000,24384.87013440000]
[2563,213,null,{"$raw":"00000000"},"141920",4,"EM 562","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,805.91305387000,0,805.91305387000,3844.10415290000]
[2564,213,null,{"$raw":"00000000"},"141921",4,"EM 562","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,194.53826906000,0,194.53826906100,536.41388124100]
[2565,213,null,{"$raw":"00000000"},"141921",4,"EM 562","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,179.78536760000,9999,179.78536760900,708.29219689700]
[2566,213,null,{"$raw":"00000000"},"141921",4,"EM 562","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3796.27559155000,0,3796.27559155000,18055.43946590000]
[2567,213,null,{"$raw":"00000000"},"141921",4,"EM 562","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,4745.44523704000,0,4745.44523704000,23630.80615590000]
[2568,213,null,{"$raw":"00000000"},"141921",4,"EM 562","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,8023.64383701000,0,8023.64383701000,40004.77957740000]
[2569,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,117.87038689000,0,117.87038689300,347.21746596000]
[2570,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,151.70665793000,9999,151.70665793200,464.89085766300]
[2571,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,134.31031873000,9999,134.31031873700,488.25884681500]
[2572,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,146.81408450000,9999,146.81408450800,612.45786548200]
[2573,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,171.41253584000,9999,171.41253584500,700.83162635500]
[2574,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,238.71373642000,9999,238.71373642700,716.41444454100]
[2575,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,291.11563696000,0,291.11563696300,1300.15908213000]
[2576,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,467.76568197000,0,467.76568197700,1905.10782298000]
[2577,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,993.33231516000,0,993.33231516900,4597.58239931000]
[2578,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1038.42111318000,0,1038.42111318000,5037.76534702000]
[2579,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1359.49052998000,0,1359.49052998000,6530.57054274000]
[2580,214,null,{"$raw":"00000000"},"141904",4,"EM 562-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1475.32913821000,0,1475.32913821000,7018.58271793000]
[2581,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,452.71994639000,0,452.71994639600,2040.65046500000]
[2582,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,592.00788796000,0,592.00788796800,2800.70641554000]
[2583,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,47.59587973000,0,47.59587973040,131.98778605900]
[2584,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,154.80328557000,0,154.80328557300,654.54967978500]
[2585,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,158.23392210000,0,158.23392210900,689.19557438900]
[2586,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,317.18377792000,9999,317.18377792300,1477.60570070000]
[2587,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,693.76627902000,0,693.76627902300,2343.09694076000]
[2588,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1197.59740003000,0,1197.59740003000,5829.61042021000]
[2589,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1396.53928042000,0,1396.53928042000,6857.04833277000]
[2590,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1727.10359401000,0,1727.10359401000,8506.69757498000]
[2591,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2961.94078672000,0,2961.94078672000,14684.57454290000]
[2592,215,null,{"$raw":"00000000"},"141921",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1320.27159449000,0,1320.27159449000,6488.24262066000]
[2593,215,null,{"$raw":"00000000"},"141916",4,"EM 563","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1296.66267316000,0,1296.66267316000,6333.13689557000]
[2594,216,null,{"$raw":"00000000"},"141921",4,"EM 563-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2168.81489888000,0,2168.81489888000,10743.55594950000]
[2595,216,null,{"$raw":"00000000"},"141921",4,"EM 563-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2996.27329748000,0,2996.27329748000,14824.82222150000]
[2596,217,null,{"$raw":"00000000"},"141916",4,"EM 564","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,78.23055456000,0,78.23055456070,273.16725891400]
[2597,217,null,{"$raw":"00000000"},"141916",4,"EM 564","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,106.06380141000,0,106.06380141600,426.18696066000]
[2598,217,null,{"$raw":"00000000"},"141916",4,"EM 564","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,535.89105869000,0,535.89105869100,2529.89702479000]
[2599,217,null,{"$raw":"00000000"},"Fora",4,"EM 564","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,426.58098807000,0,426.58098807000,2025.36073129000]
[2600,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,62.48189419000,0,62.48189419030,205.13858339700]
[2601,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,143.76113704000,0,143.76113704600,360.64545488400]
[2602,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,109.51078625000,0,109.51078625600,446.35323222900]
[2603,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,170.31742498000,0,170.31742498500,750.62952885000]
[2604,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,356.38017894000,0,356.38017894600,1673.86729726000]
[2605,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,430.28636078000,0,430.28636078500,1996.38460369000]
[2606,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,570.17380916000,0,570.17380916100,2750.71763438000]
[2607,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,683.58666859000,0,683.58666859600,3317.85686325000]
[2608,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,686.79544098000,0,686.79544098700,3333.63514103000]
[2609,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,855.98211650000,0,855.98211650200,4115.64783728000]
[2610,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,122.32570202000,0,122.32570202600,511.90948887400]
[2611,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,158.44130220000,0,158.44130220000,689.79546881200]
[2612,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,184.43663217000,0,184.43663217900,819.69256873600]
[2613,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,207.98611968000,0,207.98611968400,937.88240563900]
[2615,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,587.44013272000,0,587.44013272100,2813.80205331000]
[2616,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,661.31971122000,0,661.31971122100,2984.14769289000]
[2617,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,673.27783992000,0,673.27783992500,3222.64899068000]
[2618,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1395.22635205000,0,1395.22635205000,6862.07402477000]
[2619,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1478.03511128000,0,1478.03511128000,7287.72601372000]
[2620,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1868.13571064000,0,1868.13571064000,9240.21249263000]
[2621,218,null,{"$raw":"00000000"},"141918",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1911.31541677000,0,1911.31541677000,9448.73645248000]
[2622,218,null,{"$raw":"00000000"},"141920",4,"EM 567","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,63.96341380000,9999,63.96341380060,149.40114454100]
[2623,218,null,{"$raw":"00000000"},"141920",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,217.49146083000,0,217.49146083700,861.22116943300]
[2624,218,null,{"$raw":"00000000"},"141920",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,244.62115320000,0,244.62115320700,1118.86210771000]
[2625,218,null,{"$raw":"00000000"},"141920",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1597.72896087000,0,1597.72896087000,7878.62429624000]
[2626,218,null,{"$raw":"00000000"},"141920",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2070.70198963000,0,2070.70198963000,10246.12515440000]
[2627,218,null,{"$raw":"00000000"},"141920",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3192.01019558000,0,3192.01019558000,15815.36295370000]
[2628,218,null,{"$raw":"00000000"},"Fora",4,"EM 567","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,392.23290384000,0,392.23290384800,1824.71258900000]
[2629,219,null,{"$raw":"00000000"},"141918",4,"EM 567-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,195.65268804000,0,195.65268804000,843.95317777300]
[2630,219,null,{"$raw":"00000000"},"141918",4,"EM 567-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,189.99516538000,0,189.99516538900,849.23439432500]
[2631,219,null,{"$raw":"00000000"},"141918",4,"EM 567-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,244.32622380000,0,244.32622380700,1112.67719063000]
[2632,219,null,{"$raw":"00000000"},"141918",4,"EM 567-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,250.60229468000,0,250.60229468500,1154.57016491000]
[2633,219,null,{"$raw":"00000000"},"141918",4,"EM 567-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2160.65169509000,0,2160.65169509000,10689.51098220000]
[2634,219,null,{"$raw":"00000000"},"141918",4,"EM 567-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2196.76014211000,0,2196.76014211000,10866.06228970000]
[2635,219,null,{"$raw":"00000000"},"141920",4,"EM 567-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1856.04818877000,0,1856.04818877000,9174.56476958000]
[2636,219,null,{"$raw":"00000000"},"141920",4,"EM 567-1","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1868.89945513000,0,1868.89945513000,9246.75574924000]
[2637,220,null,{"$raw":"00000000"},"141918",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,106.55585489000,0,106.55585489400,35.86120733360]
[2638,220,null,{"$raw":"00000000"},"141918",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,117.97271391000,9999,117.97271391100,414.46277490500]
[2639,220,null,{"$raw":"00000000"},"141918",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,142.86096556000,0,142.86096556600,592.49902596600]
[2640,220,null,{"$raw":"00000000"},"141918",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,158.47589401000,0,158.47589401700,594.30596427900]
[2641,220,null,{"$raw":"00000000"},"141918",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,229.26277220000,0,229.26277220200,943.99048370000]
[2642,220,null,{"$raw":"00000000"},"141918",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,275.34092374000,0,275.34092374500,1068.26101747000]
[2643,220,null,{"$raw":"00000000"},"141918",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,765.94803840000,0,765.94803840500,3723.83822000000]
[2644,220,null,{"$raw":"00000000"},"141918",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,977.67813863000,9999,977.67813863400,4690.76354604000]
[2645,220,null,{"$raw":"00000000"},"141918",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1512.38119529000,0,1512.38119529000,7360.81591886000]
[2646,220,null,{"$raw":"00000000"},"141918",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,1660.76909218000,9999,1660.76909218000,7948.78091942000]
[2647,220,null,{"$raw":"00000000"},"Fora",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,285.62404466000,0,285.62404466200,1247.83014914000]
[2648,220,null,{"$raw":"00000000"},"Fora",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,300.91147006000,0,300.91147006200,1329.58604825000]
[2649,220,null,{"$raw":"00000000"},"Fora",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,534.92694291000,0,534.92694291700,2282.57061731000]
[2650,220,null,{"$raw":"00000000"},"Fora",4,"EM 567-2","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1169.51259462000,0,1169.51259462000,5579.79320597000]
[2651,221,null,{"$raw":"00000000"},"141918",4,"EM 568","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,338.27640371000,0,338.27640371100,1566.14456891000]
[2652,221,null,{"$raw":"00000000"},"141918",4,"EM 568","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,407.82107225000,0,407.82107225300,1874.89608440000]
[2653,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,89.19382472000,0,89.19382472720,294.46731080300]
[2654,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,131.56037488000,0,131.56037488700,540.25203602900]
[2655,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,250.01043950000,9999,250.01043950200,718.12178811900]
[2656,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,293.43402977000,9999,293.43402977100,1295.61290954000]
[2657,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,284.34420075000,0,284.34420075500,1314.26648293000]
[2658,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,834.91252609000,0,834.91252609500,3989.70382116000]
[2659,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,976.42586713000,9999,976.42586713800,4775.80364183000]
[2660,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,978.41788044000,9999,978.41788044800,4789.95447520000]
[2661,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1058.45480885000,0,1058.45480885000,5192.96686109000]
[2662,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1105.68030845000,0,1105.68030845000,5383.43546148000]
[2663,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1299.83146590000,0,1299.83146590000,6386.17782989000]
[2664,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1398.53483152000,0,1163.00837254000,5714.31899506000]
[2665,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2042.29663245000,0,2042.29663245000,10074.37476240000]
[2666,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3076.43701144000,0,3076.43701144000,14509.46517650000]
[2667,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3472.79469315000,0,3472.79469315000,17262.32029880000]
[2668,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3509.08229231000,0,3509.08229231000,17439.48320290000]
[2669,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,928.29329599000,0,928.29329599200,4540.23048416000]
[2670,222,null,{"$raw":"00000000"},"141918",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,986.74949588000,0,986.74949588400,4832.76465987000]
[2671,222,null,{"$raw":"00000000"},"141910",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,194.45557453000,0,194.45557453900,872.14310814700]
[2672,222,null,{"$raw":"00000000"},"141910",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,795.58944518000,0,795.58944518300,3876.36273015000]
[2673,222,null,{"$raw":"00000000"},"141910",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,820.89002192000,0,820.89002192300,3997.95609579000]
[2674,222,null,{"$raw":"00000000"},"141910",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1757.04661374000,0,1757.04661374000,8645.64403945000]
[2675,222,null,{"$raw":"00000000"},"141910",4,"EM 569","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1756.94897533000,0,1756.94897533000,8670.37793795000]
[2676,223,null,{"$raw":"00000000"},"141910",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,121.25998411000,9999,121.25998411300,446.91798566800]
[2677,223,null,{"$raw":"00000000"},"141910",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,156.00758584000,0,156.00758584100,676.05991409300]
[2678,223,null,{"$raw":"00000000"},"141910",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,283.86613767000,9999,283.86613767100,1167.56064606000]
[2679,223,null,{"$raw":"00000000"},"141910",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,590.64630535000,0,590.64630535400,2693.49817211000]
[2680,223,null,{"$raw":"00000000"},"141910",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,884.27408466000,0,884.27408466600,4319.76793740000]
[2681,223,null,{"$raw":"00000000"},"141910",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,903.90408020000,0,903.90408020500,4350.72798574000]
[2682,223,null,{"$raw":"00000000"},"141910",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,939.47111378000,0,939.47111378400,4563.84154786000]
[2683,223,null,{"$raw":"00000000"},"141910",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1315.51601558000,0,1315.51601558000,5237.35477498000]
[2684,223,null,{"$raw":"00000000"},"141910",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2659.19108674000,0,2659.19108674000,13159.23896560000]
[2685,223,null,{"$raw":"00000000"},"141910",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,4496.73861519000,0,4496.73861519000,22337.40843010000]
[2686,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,71.59896938000,9999,71.59896938820,247.99326645700]
[2687,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,108.94113954000,9999,108.94113954600,425.39872557100]
[2688,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,180.41606254000,9999,180.41606254100,541.12464308000]
[2689,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,151.02550791000,9999,151.02550791500,605.87780012700]
[2690,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,237.46925095000,0,237.46925095200,1033.39851443000]
[2691,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,234.99728436000,0,234.99728436700,1063.45749290000]
[2692,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,254.35276422000,0,254.35276422800,1087.12074628000]
[2693,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,271.93624512000,9999,271.93624512600,1247.03881763000]
[2694,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,401.23090203000,0,401.23090203000,1879.05775837000]
[2695,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,430.88047782000,0,430.88047782400,2006.88822266000]
[2696,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,452.48674698000,0,452.48674698600,2162.37193783000]
[2697,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,485.50445194000,0,485.50445194700,2327.44452450000]
[2698,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,581.91541217000,9999,581.91541217800,2589.92728817000]
[2699,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,550.94055799000,9999,550.94055799600,2641.66995873000]
[2700,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,682.55082332000,0,682.55082332900,2730.14406731000]
[2701,223,null,{"$raw":"00000000"},"141920",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1142.69496887000,0,1143.25350904000,5585.85389631000]
[2702,223,null,{"$raw":"00000000"},"141917",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,150.02310431000,0,150.02310431400,161.94059070000]
[2703,223,null,{"$raw":"00000000"},"141917",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,127.93166596000,9999,127.93166596600,543.84679278500]
[2704,223,null,{"$raw":"00000000"},"141917",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,186.79894866000,0,186.79894866400,794.12964476100]
[2705,223,null,{"$raw":"00000000"},"141917",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,203.75757271000,9999,203.75757271800,918.04498660700]
[2706,223,null,{"$raw":"00000000"},"141917",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,298.77889948000,0,298.77889948600,1328.08038568000]
[2707,223,null,{"$raw":"00000000"},"141917",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,386.27750236000,0,386.27750236500,1825.63794675000]
[2708,223,null,{"$raw":"00000000"},"141917",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,484.58185422000,0,484.58185422300,1980.67743198000]
[2709,223,null,{"$raw":"00000000"},"141917",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,822.34612349000,9999,822.34612349500,4000.89699613000]
[2710,223,null,{"$raw":"00000000"},"141917",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1230.68869064000,0,1230.68869064000,6048.65412332000]
[2711,223,null,{"$raw":"00000000"},"141917",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1459.93404398000,0,1459.93404398000,6889.10845679000]
[2712,223,null,{"$raw":"00000000"},"Fora",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,261.74303784000,0,261.74303784200,141.69910819000]
[2713,223,null,{"$raw":"00000000"},"Fora",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,246.71213777000,0,246.71213777000,338.37531435000]
[2714,223,null,{"$raw":"00000000"},"Fora",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,147.28627329000,9999,147.28627329600,632.22297440900]
[2715,223,null,{"$raw":"00000000"},"Fora",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,364.74478344000,0,364.74478344300,1369.40032410000]
[2716,223,null,{"$raw":"00000000"},"Fora",4,"EM 570","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,394.10140080000,9999,394.10140080300,1683.90244763000]
[2717,223,null,{"$raw":"00000000"},"Fora",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,483.14575678000,0,483.14575678400,2205.06784851000]
[2718,223,null,{"$raw":"00000000"},"Fora",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,664.48450440000,0,664.48450440100,3216.85179045000]
[2719,223,null,{"$raw":"00000000"},"Fora",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,968.53604730000,0,968.53604730200,4241.87648671000]
[2720,223,null,{"$raw":"00000000"},"Fora",4,"EM 570","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1889.51536097000,0,1889.51536097000,9341.15809326000]
[2721,224,null,{"$raw":"00000000"},"141920",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1179.33264719000,0,1179.33264719000,5749.37323905000]
[2722,224,null,{"$raw":"00000000"},"141920",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1272.51995619000,0,1272.51995619000,6251.27760139000]
[2723,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,52.68426835000,0,52.68426835860,155.43954724000]
[2724,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,84.09753513000,0,84.09753513480,319.81432183700]
[2725,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,96.00655963000,0,96.00655963420,374.54096370100]
[2726,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,103.88095984000,0,103.88095984000,420.47008225000]
[2727,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,173.67082872000,0,173.67082872300,685.97744183300]
[2728,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,292.38868062000,9999,292.38868062000,875.69765685600]
[2729,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,206.60601542000,0,206.60601542900,909.22822707100]
[2730,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,274.63334282000,0,274.63334282500,1272.72149525000]
[2731,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,329.66950949000,0,329.66950949700,1490.25219034000]
[2732,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,366.03927132000,0,366.03927132300,1638.85003040000]
[2733,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,451.92263619000,9999,451.92263619000,2130.43453016000]
[2734,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,483.06197767000,0,483.06197767700,2308.96271694000]
[2735,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1432.93331412000,0,1432.93331412000,6614.91705579000]
[2736,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3480.24327398000,0,3480.24327398000,17263.19036950000]
[2737,224,null,{"$raw":"00000000"},"141916",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3551.03466461000,0,3551.03466461000,17648.39459590000]
[2738,224,null,{"$raw":"00000000"},"Fora",4,"EN 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,345.11216873000,0,345.11216873400,1622.17793062000]
[2739,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,29.50635297000,0,29.50635297760,38.22101897770]
[2740,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,83.26025245000,0,83.26025245350,295.98076787300]
[2741,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,130.12914196000,9999,130.12914196400,534.93059610700]
[2742,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,135.80437741000,0,135.80437741100,583.87049929800]
[2743,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,258.15495317000,9999,258.15495317300,1184.25328559000]
[2744,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,312.11611101000,9999,312.11611101700,1457.39308941000]
[2745,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,352.90312804000,0,352.90312804400,1665.17673891000]
[2746,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,387.96941482000,0,387.96941482600,1829.43503067000]
[2747,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,469.27221550000,9999,469.27221550800,2245.28828131000]
[2748,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,743.45785965000,0,743.45785965400,3614.64648985000]
[2749,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,984.81315988000,0,984.81315988800,4812.35011433000]
[2750,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1398.72776947000,0,1398.72776947000,6534.74488297000]
[2751,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1508.15785361000,0,1092.79695179000,5354.96262525000]
[2752,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1500.26673168000,0,1500.26673168000,7289.63094964000]
[2753,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3700.90701631000,0,3700.90701631000,18394.95472040000]
[2754,225,null,{"$raw":"00000000"},"141920",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,283.96137136000,0,283.96137136600,1744.52318956000]
[2755,225,null,{"$raw":"00000000"},"Fora",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,24.29391900000,0,24.29391900460,27.09344642790]
[2756,225,null,{"$raw":"00000000"},"Fora",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,202.96216725000,0,202.96216725700,910.86063115900]
[2757,225,null,{"$raw":"00000000"},"Fora",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,211.60925737000,9999,211.60925737900,962.91152817400]
[2758,225,null,{"$raw":"00000000"},"Fora",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,248.57903463000,0,248.57903463200,1104.75912742000]
[2759,225,null,{"$raw":"00000000"},"Fora",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,945.04800792000,0,945.04800792100,4529.53425893000]
[2760,225,null,{"$raw":"00000000"},"Fora",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3986.45391835000,0,3986.45391835000,19830.04869690000]
[2761,226,null,{"$raw":"00000000"},"141921",4,"EN desc 243","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1426.43768496000,0,1426.43768496000,7000.74624199000]
[2762,226,null,{"$raw":"00000000"},"141920",4,"EN desc 243","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,312.20030593000,9999,312.20030593000,1451.29388916000]
[2763,226,null,{"$raw":"00000000"},"141920",4,"EN desc 243","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1613.42256609000,0,1613.42256609000,7952.12868417000]
[2764,226,null,{"$raw":"00000000"},"141916",4,"EN desc 243","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,27.34142760000,9999,27.34142760990,32.56678421760]
[2765,226,null,{"$raw":"00000000"},"141916",4,"EN desc 243","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1129.38796847000,0,1129.38796847000,5485.73696204000]
[2766,226,null,{"$raw":"00000000"},"141916",4,"EN desc 243","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1283.09265775000,0,1283.09265775000,6281.62200112000]
[2767,226,null,{"$raw":"00000000"},"141916",4,"EN desc 243","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2398.95625347000,0,2398.95625347000,11812.08409140000]
[2768,226,null,{"$raw":"00000000"},"141916",4,"EN desc 243","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2815.94989187000,0,2815.94989187000,13953.38689760000]
[2769,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,76.19333088000,0,76.19333088800,276.44115701000]
[2770,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,114.85782434000,0,114.85782434400,420.21267773200]
[2771,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,201.27126204000,9999,201.27126204800,875.90421625400]
[2772,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,237.03270778000,9999,237.03270778700,1055.33692908000]
[2773,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,284.61824436000,0,284.61824436800,1227.84000827000]
[2774,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,275.31134723000,0,275.31134723700,1275.65416426000]
[2775,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,507.41923797000,0,507.41923797800,2361.72866944000]
[2776,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,515.67156583000,0,515.67156583300,2477.61137695000]
[2777,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,546.57537809000,0,546.57537809300,2622.64767311000]
[2778,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,562.70458276000,9999,562.70458276600,2710.33787808000]
[2779,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,791.71699178000,0,791.71699178900,3719.61062590000]
[2780,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,796.00479769000,0,796.00479769000,3751.61479074000]
[2781,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1083.37349292000,0,1083.37349292000,5307.87093813000]
[3017,238,null,{"$raw":"00000000"},"141910",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2445.23613079000,0,2445.23613079000,24081.46408640000]
[3018,238,null,{"$raw":"00000000"},"141910",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2719.26440822000,0,2719.26440822000,28294.90580950000]
[3019,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,101.80145516000,0,101.80145516600,657.10069842400]
[3020,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,146.89063889000,0,146.89063889700,727.99775978500]
[3021,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,193.50464607000,9999,193.50464607300,995.98861800400]
[3022,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,193.90957321000,9999,193.90957321900,1348.28488946000]
[3023,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,420.08247274000,0,420.08247274200,3434.86203328000]
[3024,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,508.13314431000,0,508.13314431400,4230.76537325000]
[3025,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,489.89561319000,0,489.89561319100,4472.70603414000]
[3026,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,690.70015266000,0,690.70015266900,5608.78358540000]
[3027,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1313.54416397000,0,1313.54416397000,5842.59264900000]
[3028,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1219.65327120000,0,1219.65327120000,10519.07592250000]
[3029,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1350.39028632000,0,1350.39028632000,11302.16108150000]
[3030,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1660.52971003000,0,1660.52971003000,15309.15841930000]
[3326,7,null,{"$raw":"00000000"},"141916",4,"A23","FRC",2,0.00000000000,10,"Scutvias Autoestradas da Beira Interior S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,564.03323293000,0,564.03323293500,2847.15850145000]
[3327,8,null,{"$raw":"00000000"},"141920",1,"Agro-Pecuaria Quinta da Rainha, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,672.01087710000,0,672.01087710700,12702.52747830000]
[3328,9,null,{"$raw":"00000000"},"141904",1,"Almondina - Móveis","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,726.07800227000,0,726.07800227400,9849.95320243000]
[3329,10,null,{"$raw":"00000000"},"141920",1,"António José Mendes Faria - Unipessoal, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,375.36419117000,0,375.36419117100,3673.70883959000]
[3330,11,null,{"$raw":"00000000"},"141918",1,"António Manuel Carvalho do Rosário","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,690.97014795000,0,690.97014795000,17135.19359580000]
[3331,12,null,{"$raw":"00000000"},"141920",1,"Antonio Pinto Gomes, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,648.80658189000,0,648.80658189700,8798.06817932000]
[3332,14,null,{"$raw":"00000000"},"141916",1,"Auto Camião Videla","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,425.45863454000,0,425.45863454200,6996.35581276000]
[3333,17,null,{"$raw":"00000000"},"141909",2,"Buffer - A-do-Freire","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1917.62521587000,0,1922.63134521000,35805.51095330000]
[3334,20,null,{"$raw":"00000000"},"141920",2,"Buffer - Alcorriol","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,3864.28114816000,0,3854.59901749000,120340.17872900001]
[3335,22,null,{"$raw":"00000000"},"141909",2,"Buffer - Alqueidão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,3277.57274674000,0,3277.57274674000,106499.32298100000]
[3336,25,null,{"$raw":"00000000"},"141902",2,"Buffer - Assentiz e Moreiras Pequenas","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,4128.38712386000,0,4128.38712386000,163064.18456400000]
[3337,26,null,{"$raw":"00000000"},"141918",3,"Buffer - Aterro/Etar (Brogueira)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,1438.93413532000,0,1438.93413532000,69615.58185110000]
[3338,28,null,{"$raw":"00000000"},"141916",3,"Buffer - Aterro/Etar (Renova II)","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,930.28117907000,0,930.28117907300,19882.63117830000]
[3339,48,null,{"$raw":"00000000"},"141918",2,"Buffer - Cardais","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1506.85232388000,0,1506.85232388000,34234.71816620000]
[2782,227,null,{"$raw":"00000000"},"141902",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1111.05473020000,0,1111.05473020000,5428.54691118000]
[2783,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,54.01791579000,0,54.01791579570,159.13068511700]
[2784,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,200.85591851000,0,200.85591851400,564.93124359700]
[2785,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,239.28863767000,0,239.28863767500,1075.19010864000]
[2786,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,322.92924957000,9999,322.92924957500,1473.11756950000]
[2787,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,494.08079243000,9999,494.08079243600,2164.60388993000]
[2788,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,464.07283434000,9999,464.07283434700,2216.80981773000]
[2789,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1011.73236143000,0,1011.73236143000,4689.07214758000]
[2790,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,97.80597239000,0,97.80597239570,93.59929495360]
[2791,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,66.43119817000,0,66.43119817810,226.03443730100]
[2792,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,113.25609982000,9999,113.25609982100,380.89118615800]
[2793,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,122.34518634000,9999,122.34518634400,510.75235871400]
[2794,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,156.24024764000,0,156.24024764700,537.23521779800]
[2795,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,191.25261271000,9999,191.25261271800,687.22313922400]
[2796,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,241.98649703000,0,241.98649703300,1099.51125511000]
[2797,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,302.28745310000,0,302.28745310500,1374.61865908000]
[2798,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,342.43405203000,0,342.43405203500,1614.95963067000]
[2799,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,390.94251824000,9999,390.94251824500,1834.72139642000]
[2800,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,430.03880786000,9999,430.03880786900,2018.04560511000]
[2801,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,460.17276392000,0,460.17276392500,2174.48095914000]
[2802,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,488.60457181000,0,488.60457181000,2341.54408841000]
[2803,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,539.32316873000,9999,539.32316873400,2593.06768891000]
[2804,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,636.19363740000,0,636.19363740200,3061.34963545000]
[2805,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2169.77282812000,0,2169.77282812000,10724.04704930000]
[2807,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2334.87792867000,0,2334.87792867000,11557.00624310000]
[2808,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2383.17788871000,0,2383.17788871000,11811.30763120000]
[2809,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2888.54433661000,0,2888.54433661000,14245.21499060000]
[2810,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3538.82238374000,0,3538.82238374000,17588.41847020000]
[2811,227,null,{"$raw":"00000000"},"141920",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,205.02157896000,9999,205.02157896300,905.53141342700]
[2812,227,null,{"$raw":"00000000"},"141920",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,373.51629362000,0,373.51629362400,1728.41843634000]
[2813,227,null,{"$raw":"00000000"},"141920",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1862.57028014000,0,1862.57028014000,9138.78198158000]
[2814,227,null,{"$raw":"00000000"},"Fora",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,90.60236655000,0,90.60236655230,353.81043385900]
[2815,228,null,{"$raw":"00000000"},"141902",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1141.24250898000,0,1065.08301962000,5186.99653826000]
[2816,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,206.76891783000,9999,206.76891783800,681.22291003000]
[2817,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,169.17828078000,9999,169.17828078900,740.83858824300]
[2818,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,275.53034212000,9999,275.53034212200,829.58779236900]
[2819,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,196.94378698000,0,196.94378698100,875.10934926700]
[2820,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,216.49764129000,0,216.49764129200,986.94575570300]
[2821,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,227.28996141000,0,227.28996141100,1016.05474928000]
[2822,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,233.26101717000,9999,233.26101717500,1036.14708381000]
[2823,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,264.62150054000,0,264.62150054800,1131.20719994000]
[2824,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,290.47110005000,0,290.47110005600,1348.89105234000]
[2826,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,312.34197442000,0,312.34197442800,1462.60114604000]
[2827,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,399.25333961000,0,399.25333961500,1678.00621190000]
[2828,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,378.42605232000,0,378.42605232500,1712.78408856000]
[2829,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,379.05544329000,9999,379.05544329000,1743.69460268000]
[2830,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,453.97605297000,9999,453.97605297700,2128.00533742000]
[2831,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,573.77663317000,9999,573.77663317800,2705.50028305000]
[2832,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,751.46788593000,0,751.46788593000,3298.53393807000]
[2833,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,748.78471972000,9999,748.78471972500,3577.08579277000]
[2834,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,852.74048278000,0,852.74048278800,4163.35267906000]
[2835,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,901.28475449000,0,875.49963330300,4272.30277749000]
[2836,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1045.92660093000,0,1045.92660093000,4985.42100184000]
[2837,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1064.23303814000,0,1064.23303814000,5140.07027992000]
[2838,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1118.59764127000,0,1118.59764127000,5381.55484847000]
[2839,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,1216.62835933000,9999,1216.62835933000,5956.29534922000]
[2840,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1299.18596371000,0,1299.18596371000,6372.94228119000]
[2841,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1317.07047405000,0,1317.07047405000,6451.45669005000]
[2842,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1529.77542398000,0,1529.77542398000,6810.75616943000]
[2843,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,1829.94139328000,9999,1829.94139328000,8521.27358892000]
[2844,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2263.03156931000,0,2263.03156931000,11189.43927030000]
[2845,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2490.74054732000,0,2490.74054732000,11592.54559570000]
[2846,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2954.36857443000,0,2954.36857443000,12919.31937730000]
[2847,228,null,{"$raw":"00000000"},"Fora",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,140.35008997000,0,140.35008997000,601.20708253000]
[2848,229,null,{"$raw":"00000000"},"141919",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,295.24644782000,0,295.24644782000,1329.35717714000]
[2849,229,null,{"$raw":"00000000"},"141919",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,296.37981639000,0,296.37981639800,1379.59510403000]
[2850,229,null,{"$raw":"00000000"},"141919",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,379.37283122000,0,379.37283122100,1777.17909808000]
[2851,229,null,{"$raw":"00000000"},"141919",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,969.53111988000,0,969.53111988900,4713.76811573000]
[2852,229,null,{"$raw":"00000000"},"141919",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3136.79859431000,0,3136.79859431000,15554.50637550000]
[2853,229,null,{"$raw":"00000000"},"141919",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3340.86172745000,0,3340.86172745000,16558.10890990000]
[2854,229,null,{"$raw":"00000000"},"141919",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,3722.72496619000,0,3722.72496619000,18513.05195560000]
[2855,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,189.02957806000,9999,189.02957806500,850.39198757700]
[2856,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,424.81128275000,0,424.81128275200,2017.66218581000]
[2857,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,886.12175541000,0,886.12175541100,4282.70936604000]
[2858,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1461.13284120000,0,1461.13284120000,7193.92992636000]
[2859,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,119.34166171000,0,119.34166171900,456.89843200700]
[2860,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,139.61662137000,9999,139.61662137000,502.15826696700]
[2861,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,150.52872103000,9999,150.52872103900,630.88527561500]
[2862,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,162.42048486000,0,162.42048486900,670.27129545600]
[2863,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,210.74161324000,0,210.74161324900,755.49826593300]
[2864,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,246.45590139000,0,246.45590139900,1049.61652985000]
[2865,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,265.65661517000,9999,265.65661517200,1233.12933482000]
[2866,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,313.93715970000,9999,313.93715970900,1264.41311665000]
[2867,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,283.90523386000,0,283.90523386200,1314.25622266000]
[2868,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,478.77844189000,0,478.77844189700,1324.91890491000]
[2869,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,336.16813061000,0,336.16813061400,1495.55590799000]
[2870,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,337.39432799000,0,337.39432799700,1534.76482234000]
[2871,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,561.14070669000,0,561.14070669100,2625.60413296000]
[2872,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,637.41752768000,9999,637.41752768500,3069.17918941000]
[2873,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,736.03996699000,0,736.03996699100,3467.44720424000]
[2874,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1344.61576495000,0,1344.61576495000,6587.20156638000]
[2875,229,null,{"$raw":"00000000"},"141920",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1640.29922952000,0,1640.29922952000,8038.72437475000]
[2876,229,null,{"$raw":"00000000"},"Fora",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,51.97384136000,0,51.97384136560,120.06914054600]
[2877,229,null,{"$raw":"00000000"},"Fora",4,"EN desc 358","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,89.81433941000,0,89.81433941390,333.70550495100]
[2878,230,null,{"$raw":"00000000"},"141910",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,206.06191257000,9999,206.06191257400,915.23412918900]
[2879,230,null,{"$raw":"00000000"},"141910",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,389.49119357000,9999,389.49119357100,1470.87630898000]
[2880,230,null,{"$raw":"00000000"},"141910",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,541.82506528000,0,541.82506528100,2416.00254658000]
[2881,230,null,{"$raw":"00000000"},"141910",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,918.00692282000,0,918.00692282400,3620.10748401000]
[2882,230,null,{"$raw":"00000000"},"141921",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,860.35386008000,0,860.35386008400,4199.96128599000]
[2883,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,79.78941592000,0,79.78941592620,295.94363514700]
[2884,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,111.31277013000,0,111.31277013600,504.85889170700]
[2885,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,209.39500873000,0,209.39500873200,946.48951896800]
[2886,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,315.53002666000,0,315.53002666100,1465.77392520000]
[2887,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,89.36531975000,0,89.36531975950,346.32509608100]
[2888,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,191.33000959000,0,191.33000959700,634.17990135500]
[2889,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,255.06798708000,0,255.06798708300,1176.51080669000]
[2890,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,305.52855593000,0,305.52855593700,1357.02813440000]
[2891,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,416.05453068000,0,416.05453068100,1882.95138901000]
[2892,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,401.95334920000,0,401.95334920300,1895.94630981000]
[2893,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,462.00288419000,0,462.00288419700,2013.01483126000]
[2894,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,642.91653847000,0,642.91653847700,3106.06003513000]
[2895,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,647.77348337000,0,647.77348337600,3122.12180621000]
[2896,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,933.06261177000,0,933.06261177000,4558.51487264000]
[2897,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1046.70503130000,0,1046.70503130000,5125.78396094000]
[2898,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1667.55822799000,0,1667.55822799000,8236.96623003000]
[2899,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2103.50301657000,0,2103.50301657000,10410.07955170000]
[2900,230,null,{"$raw":"00000000"},"141920",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2179.30841958000,0,2179.30841958000,10783.06446350000]
[2901,230,null,{"$raw":"00000000"},"141921",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,652.56829895000,0,652.56829895200,3161.56276901000]
[2902,230,null,{"$raw":"00000000"},"141917",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,130.33810454000,9999,130.33810454700,541.10346180500]
[2903,230,null,{"$raw":"00000000"},"141917",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,152.45297041000,9999,152.45297041300,599.28601558100]
[2904,230,null,{"$raw":"00000000"},"141917",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,518.27111764000,0,518.27111764000,2468.40667313000]
[2905,230,null,{"$raw":"00000000"},"141917",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,538.44793276000,0,538.44793276000,2578.16993824000]
[2906,230,null,{"$raw":"00000000"},"141917",4,"EN desc3","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,683.16225129000,0,683.16225129200,3113.47160798000]
[2907,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,68.05799366000,9999,68.05799366670,216.97288752300]
[2908,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,199.58315607000,0,199.58315607000,849.40193080800]
[2910,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,319.64973106000,0,319.64973106300,1481.64675953000]
[2911,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,346.54866955000,0,346.54866955700,1613.21961111000]
[2912,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,398.77216271000,0,398.77216271700,1877.11002164000]
[2913,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,620.14260088000,0,620.14260088800,2989.63854734000]
[2914,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,963.82774063000,0,963.82774063600,4704.11857457000]
[2915,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,1075.44171567000,9999,1075.44171567000,5202.06702510000]
[2916,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1246.47438066000,0,1246.47438066000,6116.07221501000]
[2917,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2053.51871651000,0,2053.51871651000,9472.46886237000]
[2918,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2353.50485574000,0,2353.50485574000,10917.02472370000]
[2919,231,null,{"$raw":"00000000"},"Fora",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,121.66033512000,0,121.66033512300,486.72271505000]
[2920,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,89.94115929000,0,89.94115929470,349.72653540900]
[2921,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,161.54065377000,0,161.54065377900,708.63371337800]
[2922,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,217.95322862000,0,217.95322862300,981.68816120300]
[2923,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,232.41758812000,0,232.41758812000,1061.03865823000]
[2924,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,294.52314370000,9999,294.52314370800,1372.34665694000]
[2925,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,455.15388680000,0,455.15388680600,1408.16606100000]
[2926,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,447.91338227000,0,447.91338227200,2027.68321519000]
[2927,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,426.96812757000,0,426.96812757600,2030.89176532000]
[2928,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,646.76200635000,9999,646.76200635600,2859.54957166000]
[2929,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,625.88316373000,0,625.88316373700,3026.50217416000]
[2930,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,691.80387091000,0,691.80387091600,3358.29195271000]
[2931,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,775.58657486000,0,775.58657486000,3773.97354681000]
[2932,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,1090.18558456000,9999,1090.18558456000,5143.25336399000]
[2933,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,1071.00230573000,9999,1071.00230573000,5157.19378915000]
[2934,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2283.30808581000,0,2283.30808581000,11316.05478940000]
[2935,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3412.85237518000,0,3412.85237518000,16322.61900020000]
[2936,232,null,{"$raw":"00000000"},"141902",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3445.72354163000,0,3445.72354163000,17118.56706520000]
[2937,232,null,{"$raw":"00000000"},"141904",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,131.93320323000,9999,131.93320323000,544.41982261000]
[2938,232,null,{"$raw":"00000000"},"141904",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,226.75023344000,0,226.75023344500,855.23910456100]
[2939,232,null,{"$raw":"00000000"},"141904",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,292.08035548000,9999,292.08035548600,1236.16948000000]
[2940,232,null,{"$raw":"00000000"},"141904",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,313.45635191000,0,313.45635191200,1452.02444621000]
[2941,232,null,{"$raw":"00000000"},"141904",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,471.82609198000,0,471.82609198300,2251.90591787000]
[2942,232,null,{"$raw":"00000000"},"141904",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,505.80504545000,9999,505.80504545400,2419.29376078000]
[2943,232,null,{"$raw":"00000000"},"141904",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1760.92687654000,0,1760.92687654000,8687.67883629000]
[2944,232,null,{"$raw":"00000000"},"141904",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2227.34202320000,0,2227.34202320000,11019.61021430000]
[2945,232,null,{"$raw":"00000000"},"141919",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,66.74436637000,0,66.74436637530,233.53178891100]
[2946,232,null,{"$raw":"00000000"},"141919",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,163.81716501000,9999,163.81716501600,720.97490713600]
[2947,232,null,{"$raw":"00000000"},"141919",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,349.37689282000,9999,349.37689282600,1178.05238129000]
[2948,232,null,{"$raw":"00000000"},"141919",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1365.63306143000,0,1365.39658691000,6715.79528441000]
[2949,232,null,{"$raw":"00000000"},"141919",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2444.58110160000,0,2444.58110160000,9909.50825265000]
[2950,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,139.73472397000,0,139.73472397400,562.84031182600]
[2951,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,164.27240712000,0,164.27240712300,705.98121210600]
[2952,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,254.77301852000,0,254.77301852100,809.93268403600]
[2953,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,729.69232456000,0,729.69232456700,1427.05459397000]
[2954,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,338.10536780000,0,338.10536780700,1576.58656670000]
[2955,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,522.79016154000,9999,522.79016154500,2493.34086607000]
[2956,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,532.04671739000,0,532.04671739900,2551.15165903000]
[2958,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,910.17069015000,9999,910.17069015800,3678.98441392000]
[2959,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,916.57281387000,0,916.57281387900,4461.10764855000]
[2960,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,1626.90671425000,9999,1626.90671425000,8017.54863937000]
[2961,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1752.09152522000,0,1752.09152522000,8641.75428172000]
[2962,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1994.10811138000,0,1994.10811138000,9237.72898834000]
[2963,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2236.20169911000,0,2236.20169911000,11082.87754630000]
[2964,232,null,{"$raw":"00000000"},"141921",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,340.19270386000,9999,340.19270386500,1604.79120596000]
[2965,232,null,{"$raw":"00000000"},"141921",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,373.51587417000,0,373.51587417200,1632.73522176000]
[2966,232,null,{"$raw":"00000000"},"141921",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,398.18241093000,0,398.18241093100,1870.41471965000]
[2967,232,null,{"$raw":"00000000"},"141921",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,636.66080796000,0,636.66080796700,3072.48487820000]
[2968,232,null,{"$raw":"00000000"},"141921",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,856.26560182000,0,856.26560182700,4146.88068388000]
[2969,232,null,{"$raw":"00000000"},"141921",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,939.14281570000,0,939.14281570700,4595.61041727000]
[2970,232,null,{"$raw":"00000000"},"141921",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1435.39137103000,0,1435.39137103000,7076.85404102000]
[2971,232,null,{"$raw":"00000000"},"141921",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1579.77311252000,0,1579.77311252000,7744.20268678000]
[2972,232,null,{"$raw":"00000000"},"Fora",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,163.88318021000,9999,163.88318021900,706.69269115400]
[2973,233,null,{"$raw":"00000000"},"141918",4,"ER 361","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,194.68683481000,0,194.68683481900,699.61942366400]
[2974,233,null,{"$raw":"00000000"},"141918",4,"ER 361","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,171.50300040000,9999,171.50300040700,750.31010790200]
[2975,233,null,{"$raw":"00000000"},"141918",4,"ER 361","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,733.54072568000,0,733.54072568600,3479.97748490000]
[2976,233,null,{"$raw":"00000000"},"141918",4,"ER 361","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,875.62074376000,0,875.62074376600,4226.87089094000]
[2977,233,null,{"$raw":"00000000"},"Fora",4,"ER 361","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,285.33809657000,0,285.33809657300,1224.28741280000]
[2978,234,null,{"$raw":"00000000"},"141920",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,189.89981978000,0,189.89981978800,197.22357724300]
[2979,234,null,{"$raw":"00000000"},"141920",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,105.15063637000,9999,105.15063637500,395.31279363500]
[2980,234,null,{"$raw":"00000000"},"141920",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,173.57277496000,0,173.57277496600,568.04833911100]
[2981,234,null,{"$raw":"00000000"},"141920",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,388.62478610000,0,388.62478610400,579.56229158000]
[2982,234,null,{"$raw":"00000000"},"141920",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,240.44632551000,9999,240.44632551300,1041.01662232000]
[2983,234,null,{"$raw":"00000000"},"141920",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,706.24813138000,9999,706.24813138200,2728.80991450000]
[2984,234,null,{"$raw":"00000000"},"141920",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,583.14500054000,0,583.14500054000,2753.81346520000]
[2985,234,null,{"$raw":"00000000"},"141920",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2536.73078785000,0,2536.73078785000,12550.90670630000]
[2986,234,null,{"$raw":"00000000"},"141920",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,2657.32510540000,0,2657.32510540000,13122.87236140000]
[2987,234,null,{"$raw":"00000000"},"141917",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,294.04593703000,0,294.04593703300,1336.19651878000]
[2988,234,null,{"$raw":"00000000"},"141917",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,307.72269476000,0,307.72269476500,1434.47670137000]
[2989,234,null,{"$raw":"00000000"},"141917",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,535.88418423000,0,535.88418423200,2507.12764872000]
[2990,234,null,{"$raw":"00000000"},"141917",4,"Estrada da Sapeira","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,690.03849845000,0,690.03849845200,3316.54123407000]
[2993,236,null,{"$raw":"00000000"},"Fora",1,"Ferroentroncamento - Comércio e Indústria de Fernando de Pinho Teixeira, Lda. - \"Grupo Ferpinta\"","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,433.46259654000,0,433.46259654300,7249.92925578000]
[2995,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,131.60378827000,9999,131.60378827300,368.08539468300]
[2996,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,133.27333541000,0,133.27333541000,673.40476514900]
[2997,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,164.70413601000,0,164.70413601500,766.31898808500]
[2998,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,128.60099323000,0,128.60099323500,789.42715433700]
[2999,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,157.45024789000,0,157.45024789700,1188.98437593000]
[3000,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,290.31318825000,9999,290.31318825900,1318.99276345000]
[3001,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,272.02475214000,0,247.24928110700,1591.29996059000]
[3002,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,530.14618244000,9999,530.14618244900,1753.05794529000]
[3003,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,266.32764108000,0,266.32764108600,2198.46492805000]
[3004,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,311.10569969000,0,311.10569969800,2558.14890825000]
[3005,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,383.42567060000,0,383.42567060200,2654.53978059000]
[3006,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,385.03074353000,0,385.03074353700,3280.80659293000]
[3007,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,460.09511319000,0,460.09511319600,3924.31854370000]
[3008,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,483.68292634000,9999,483.68292634600,4251.84028276000]
[3009,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,535.08426672000,9999,535.08426672000,4497.07378874000]
[3010,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,576.42443484000,9999,576.42443484200,5282.98201306000]
[3011,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,607.37700865000,9999,607.37700865300,5393.83342963000]
[3012,238,null,{"$raw":"00000000"},"141919",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,766.81297954000,0,766.81297954100,7194.94627226000]
[3013,238,null,{"$raw":"00000000"},"141910",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,719.66366127000,0,719.66366127100,1407.32131355000]
[3014,238,null,{"$raw":"00000000"},"141910",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,456.00697335000,0,456.00697335500,1774.52950436000]
[3015,238,null,{"$raw":"00000000"},"141910",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,651.47557134000,0,651.47557134500,4075.80135451000]
[3016,238,null,{"$raw":"00000000"},"141910",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1278.67172421000,0,1278.67172421000,7516.89191305000]
[3031,238,null,{"$raw":"00000000"},"141920",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2914.22493726000,0,2914.22493726000,27857.33270520000]
[3032,238,null,{"$raw":"00000000"},"141916",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,91.36254959000,0,91.36254959590,429.34724301100]
[3033,238,null,{"$raw":"00000000"},"141916",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,103.20081642000,9999,103.20081642700,516.26620519600]
[3034,238,null,{"$raw":"00000000"},"141916",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,124.40181179000,0,124.40181179900,624.44176125700]
[3035,238,null,{"$raw":"00000000"},"141916",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,820.86046862000,0,820.86046862800,5221.83723062000]
[3036,238,null,{"$raw":"00000000"},"141916",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1257.18803793000,0,1257.18803793000,8342.36910184000]
[3037,238,null,{"$raw":"00000000"},"141916",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1010.60136694000,0,1010.60136694000,9112.69538462000]
[3038,238,null,{"$raw":"00000000"},"141916",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1152.57809135000,0,1152.57809135000,10368.25761000000]
[3039,238,null,{"$raw":"00000000"},"141916",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1654.35214553000,0,1654.35214553000,14016.74897280000]
[3040,238,null,{"$raw":"00000000"},"141916",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2469.75143563000,0,2469.75143563000,24194.72914420000]
[3041,238,null,{"$raw":"00000000"},"141917",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,29.55732160000,0,29.55732160600,36.29630960840]
[3042,238,null,{"$raw":"00000000"},"141917",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,401.74070338000,0,401.74070338500,849.18031402600]
[3043,238,null,{"$raw":"00000000"},"141917",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,501.67252265000,0,501.67252265800,1357.59807403000]
[3044,238,null,{"$raw":"00000000"},"141917",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1074.55864206000,0,1074.55864206000,10280.37088290000]
[3045,238,null,{"$raw":"00000000"},"141917",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2467.71385412000,0,2467.71385412000,22853.11560170000]
[3046,238,null,{"$raw":"00000000"},"Fora",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,84.69641727000,0,84.69641727510,532.69490139000]
[3047,238,null,{"$raw":"00000000"},"Fora",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,214.12307146000,0,214.12307146900,713.65318743100]
[3048,238,null,{"$raw":"00000000"},"Fora",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,151.25433060000,0,151.25433060100,1033.32982787000]
[3049,238,null,{"$raw":"00000000"},"Fora",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,139.75107982000,0,139.75107982900,1125.27608964000]
[3050,238,null,{"$raw":"00000000"},"Fora",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,436.25474072000,0,436.25474072800,2154.41404732000]
[3051,238,null,{"$raw":"00000000"},"Fora",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,300.58703331000,0,300.58703331800,2273.40895108000]
[3052,238,null,{"$raw":"00000000"},"Fora",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,653.05743552000,0,653.05743552000,6142.27440647000]
[3053,238,null,{"$raw":"00000000"},"Fora",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,755.83940936000,0,755.83940936600,6610.44031716000]
[3054,238,null,{"$raw":"00000000"},"Fora",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1363.27948341000,0,1363.27948341000,13275.85177290000]
[3055,238,null,{"$raw":"00000000"},"Fora",6,"Gasoduto de 2º escalão - TagusGás","FRC",2,0.00000000000,10,"TagusGás",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,8255.62583785000,0,8255.62583785000,82228.91935860000]
[3056,239,null,{"$raw":"00000000"},"141902",1,"Helder Jorge dos Santos Faustino Lopes","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,355.73921802000,0,355.73921802300,4393.46635616000]
[3057,239,null,{"$raw":"00000000"},"141902",1,"Helder Jorge dos Santos Faustino Lopes","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,370.40964701000,9999,370.40964701200,6279.70479663000]
[3058,240,null,{"$raw":"00000000"},"141919",1,"João Augusto da Silva Vitorino","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,256.36804211000,0,256.36804211600,2588.72954114000]
[3059,240,null,{"$raw":"00000000"},"141919",1,"João Augusto da Silva Vitorino","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,488.43158919000,0,488.43158919200,9524.45091962000]
[3061,242,null,{"$raw":"00000000"},"141918",1,"Jose Arsenio Mota & Companhia, Lda. CIMETAL","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,108.50356670000,0,108.50356670600,506.33587525000]
[3062,242,null,{"$raw":"00000000"},"141918",1,"Jose Arsenio Mota & Companhia, Lda. CIMETAL","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,385.85381520000,0,385.85381520400,6596.57774108000]
[3063,242,null,{"$raw":"00000000"},"Fora",1,"Jose Arsenio Mota & Companhia, Lda. CIMETAL","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,257.66735980000,0,257.66735980900,2833.22290585000]
[3064,243,null,{"$raw":"00000000"},"141919",1,"Jose Carlos Queiros Lopes - Oficina Auto","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,279.27129764000,0,279.27129764200,2418.51029744000]
[3065,243,null,{"$raw":"00000000"},"141919",1,"Jose Carlos Queiros Lopes - Oficina Auto","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,557.18665865000,0,557.18665865700,9976.68972581000]
[3066,244,null,{"$raw":"00000000"},"141920",1,"Jose da Silva Carvalho","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,184.32592541000,0,184.32592541400,1163.96683402000]
[3069,246,null,{"$raw":"00000000"},"141918",1,"Jose Manuel Carvalho Santos - \"JCS - Design\"","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,204.82068259000,9999,204.82068259100,1251.81475994000]
[3072,248,null,{"$raw":"00000000"},"141904",1,"Jose Sabogueiro Matos Costa","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,205.04772236000,0,205.04772236600,1324.12994320000]
[3075,249,null,{"$raw":"00000000"},"141920",1,"Litmat - Comercio de materiais de construção, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,238.51933998000,0,238.51933998900,1105.37469196000]
[3076,250,null,{"$raw":"00000000"},"141921",1,"LLR - Comércio Misto","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,297.43831878000,0,297.43831878600,4634.82115747000]
[3077,250,null,{"$raw":"00000000"},"141921",1,"LLR - Comércio Misto","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,418.26721413000,0,418.26721413300,7743.80967489000]
[3078,251,null,{"$raw":"00000000"},"141920",1,"Loja Quinta da Rainha, Produtos Alimentares, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,303.36384403000,0,303.36384403700,4470.14364827000]
[3079,251,null,{"$raw":"00000000"},"141920",1,"Loja Quinta da Rainha, Produtos Alimentares, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1465.26884406000,0,1465.26884406000,33399.24052900000]
[3081,252,null,{"$raw":"00000000"},"141920",1,"Lucio e Monteiro, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,173.52918954000,0,173.52918954300,925.80365506100]
[3083,254,null,{"$raw":"00000000"},"141921",1,"Mesilser-Administração de Bens, SA","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,398.39483947000,0,398.39483947800,5931.73594709000]
[3084,254,null,{"$raw":"00000000"},"141921",1,"Mesilser-Administração de Bens, SA","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,739.52036013000,0,739.52036013500,7511.71728871000]
[3085,254,null,{"$raw":"00000000"},"141921",1,"Mesilser-Administração de Bens, SA","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,556.31502585000,9999,556.31502585700,10041.43887430000]
[3152,261,null,{"$raw":"00000000"},"141918",1,"Nelson Calado Rosa (averbado para Amália Duarte Calado)","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,141.69426841000,9999,141.69426841800,1310.28091006000]
[3154,262,null,{"$raw":"00000000"},"141919",1,"Oleofat - Combustiveis e Lubrificantes, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,27.12722908000,0,27.12722908770,36.85833613300]
[3155,262,null,{"$raw":"00000000"},"141920",1,"Oleofat - Combustiveis e Lubrificantes, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,160.73719913000,0,160.73719913400,1131.00778178000]
[3156,262,null,{"$raw":"00000000"},"141920",1,"Oleofat - Combustiveis e Lubrificantes, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,177.88047697000,0,177.88047697300,1705.90579601000]
[3157,262,null,{"$raw":"00000000"},"141920",1,"Oleofat - Combustiveis e Lubrificantes, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,437.01157027000,0,437.01157027300,6874.45344583000]
[3158,263,null,{"$raw":"00000000"},"141909",12,"PA nº 1","FIC",2,0.00000000000,30,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,269.80376871000,0,269.80376871300,1556.65920127000]
[3160,264,null,{"$raw":"00000000"},"141920",12,"PA nº 11","FIC",2,0.00000000000,30,"CMTN","Ocupação Florestal","SSS",5,2,1,"SSS",5,2,1,"MDE",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,266.92426359000,2015,266.92426359200,2275.41253342000]
[3164,267,null,{"$raw":"00000000"},"141904",12,"PA nº 22","FIC",2,0.00000000000,30,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,88.86915598000,0,88.86915598420,439.94314663400]
[3165,267,null,{"$raw":"00000000"},"141904",12,"PA nº 22","FIC",2,0.00000000000,30,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,98.97691362000,0,98.97691362090,528.84938465400]
[3168,269,null,{"$raw":"00000000"},"141920",12,"PA nº 5","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,231.72048314000,0,231.72048314600,1591.49918228000]
[3169,269,null,{"$raw":"00000000"},"141920",12,"PA nº 5","FIC",2,0.00000000000,30,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,365.24997825000,0,365.24997825700,1721.11883001000]
[3170,269,null,{"$raw":"00000000"},"141920",12,"PA nº 5","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,809.38749002000,0,809.38749002300,9057.11043517000]
[3171,270,null,{"$raw":"00000000"},"141902",12,"PA nº 50","FIC",2,0.00000000000,30,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,111.48966001000,0,111.48966001800,424.55620727700]
[3173,270,null,{"$raw":"00000000"},"141919",12,"PA nº 50","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,151.06045837000,0,151.06045837800,551.26218301100]
[3175,271,null,{"$raw":"00000000"},"141921",12,"PA nº 51","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,178.92347239000,0,178.92347239400,1446.32903761000]
[3176,272,null,{"$raw":"00000000"},"141919",12,"PA nº 52","FIC",2,0.00000000000,30,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,219.47563159000,0,219.47563159000,2034.47072144000]
[3177,272,null,{"$raw":"00000000"},"141919",12,"PA nº 52","FIC",2,0.00000000000,30,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,292.70266473000,0,292.70266473700,3096.47176443000]
[3178,272,null,{"$raw":"00000000"},"141919",12,"PA nº 52","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,702.79738779000,0,702.79738779700,5144.70056295000]
[3180,274,null,{"$raw":"00000000"},"141918",12,"PA nº 54","FIC",2,0.00000000000,30,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,96.33750413000,0,96.33750413020,424.53987644600]
[3187,279,null,{"$raw":"00000000"},"141904",12,"PA nº 59","FIC",2,0.00000000000,30,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,393.16680411000,0,393.16680411600,4100.21549220000]
[3190,282,null,{"$raw":"00000000"},"141919",12,"PA nº 61","FIC",2,0.00000000000,30,"Proprietários","Ocupação Florestal","SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,103.71899424000,0,103.71899424400,466.32618515000]
[3192,282,null,{"$raw":"00000000"},"Fora",12,"PA nº 61","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,185.06670565000,0,185.06670565200,607.13170236300]
[3193,283,null,{"$raw":"00000000"},"141920",12,"PA nº 62","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,465.44584257000,0,465.44584257000,4238.00960669000]
[3196,285,null,{"$raw":"00000000"},"141921",12,"PA nº 64","FIC",2,0.00000000000,30,"CMTN","Ocupação Florestal","SSS",5,2,1,"SSS",5,2,1,"MDE",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,133.62711027000,2015,133.62711027200,678.47686297300]
[3197,285,null,{"$raw":"00000000"},"141921",12,"PA nº 64","FIC",2,0.00000000000,30,"CMTN","Ocupação Florestal","SSS",5,2,1,"SSS",5,2,1,"MDE",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,188.62672468000,2015,188.62672468400,1186.29544282000]
[3199,286,null,{"$raw":"00000000"},"141920",12,"PA nº 65","FIC",2,0.00000000000,30,"CMTN","Ocupação Florestal","SSS",5,2,1,"SSS",5,2,1,"MDE",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,102.58533324000,2015,102.58533324700,509.86034050400]
[3204,290,null,{"$raw":"00000000"},"141904",1,"PaviClaudio - Revestimentos de Pavimentos, Unipessoal, Lda","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,175.97361294000,9999,175.97361294100,1445.44694791000]
[3206,290,null,{"$raw":"00000000"},"141919",1,"PaviClaudio - Revestimentos de Pavimentos, Unipessoal, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,156.33520413000,0,156.33520413900,829.65861882700]
[3208,292,null,{"$raw":"00000000"},"141918",1,"Pedro Eduardo Oliveira Lopes","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,261.61842973000,0,261.61842973300,2959.79807706000]
[3209,292,null,{"$raw":"00000000"},"141918",1,"Pedro Eduardo Oliveira Lopes","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,488.68794902000,0,488.68794902100,9455.67497716000]
[3211,294,null,{"$raw":"00000000"},"141902",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,47.79641972000,0,47.79641972070,69.85991186420]
[3212,294,null,{"$raw":"00000000"},"141902",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,242.52045739000,0,242.52045739100,360.77264343300]
[3213,294,null,{"$raw":"00000000"},"141902",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,469.24208278000,9999,469.24208278400,1045.63645855000]
[3214,294,null,{"$raw":"00000000"},"141902",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,287.11710097000,0,287.11710097200,1310.50086318000]
[3215,294,null,{"$raw":"00000000"},"141902",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,789.41408950000,0,789.41408950000,3764.44045752000]
[3216,294,null,{"$raw":"00000000"},"141902",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,819.98533435000,0,787.49389496600,3720.76358428000]
[3217,294,null,{"$raw":"00000000"},"141902",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,1884.49350098000,9999,1884.49350098000,9321.39886707000]
[3218,294,null,{"$raw":"00000000"},"141902",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2133.96446475000,0,2133.96446475000,10524.88974400000]
[3219,294,null,{"$raw":"00000000"},"141918",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,243.30749827000,9999,243.30749827800,1091.81027330000]
[3220,294,null,{"$raw":"00000000"},"141918",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,626.90379171000,9999,626.90379171000,3027.07275605000]
[3221,294,null,{"$raw":"00000000"},"141918",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5235.20128185000,0,5235.20128185000,26062.53812310000]
[3222,294,null,{"$raw":"00000000"},"141918",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5593.88401933000,0,5593.88401933000,27831.51181040000]
[3223,294,null,{"$raw":"00000000"},"141919",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,596.42136222000,0,596.42136222800,2881.84027270000]
[3224,294,null,{"$raw":"00000000"},"141919",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,690.16058640000,9999,690.16058640700,3350.62060126000]
[3225,294,null,{"$raw":"00000000"},"141919",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,713.19198222000,0,713.19198222100,3464.66038328000]
[3226,294,null,{"$raw":"00000000"},"141919",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,726.19056020000,0,726.19056020300,3531.73687048000]
[3227,294,null,{"$raw":"00000000"},"141919",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,919.91481124000,9999,919.91481124800,4497.92268637000]
[3228,294,null,{"$raw":"00000000"},"141919",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1015.08078800000,0,1015.08078800000,4973.60908847000]
[3229,294,null,{"$raw":"00000000"},"141919",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5469.55546462000,0,5469.55546462000,27118.08207540000]
[3230,294,null,{"$raw":"00000000"},"141919",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,8619.05333689000,0,8619.05333689000,42986.56705970000]
[3231,294,null,{"$raw":"00000000"},"141910",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,61.52330738000,0,61.52330738750,205.67466799600]
[3232,294,null,{"$raw":"00000000"},"141910",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,528.57586946000,0,528.57586946000,2543.44385925000]
[3233,294,null,{"$raw":"00000000"},"141910",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1157.05380720000,0,1157.05380720000,5677.24101309000]
[3234,294,null,{"$raw":"00000000"},"141910",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1175.01323914000,0,1175.01323914000,5761.94878121000]
[3235,294,null,{"$raw":"00000000"},"141910",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2172.40267872000,0,2172.40267872000,10760.67401350000]
[3236,294,null,{"$raw":"00000000"},"141910",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2611.99336747000,0,2611.99336747000,12875.99933660000]
[3237,294,null,{"$raw":"00000000"},"141910",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2706.95611752000,0,2706.95611752000,13363.03678860000]
[3238,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,51.32600443000,0,51.32600443100,154.65805187700]
[3239,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,60.37456952000,9999,60.37456952820,201.03966181100]
[3240,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,65.79297086000,0,65.79297086410,224.18286859500]
[3241,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,72.16512150000,9999,72.16512150810,260.29134502800]
[3242,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,72.15500647000,9999,72.15500647020,260.67247534600]
[3243,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,74.80669830000,0,74.80669830610,272.24530680000]
[3244,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,88.85745629000,0,88.85745629320,343.53910044900]
[3245,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,124.92102824000,0,124.92102824500,522.44344780300]
[3246,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,126.83999155000,0,126.83999155700,533.75791658400]
[3247,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,558.73207718000,9999,558.73207718100,1647.06623482000]
[3248,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2411.45473766000,0,2412.70846508000,11478.59044880000]
[3249,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,3052.40618185000,0,3052.40618185000,14601.42161360000]
[3250,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5181.02102931000,0,5181.02102931000,25447.18531530000]
[3251,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5261.45775047000,0,5261.45775047000,26189.37647280000]
[3252,294,null,{"$raw":"00000000"},"Fora",5,"Rede Ferroviária","FRC",2,0.00000000000,10,"REFER",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,6072.38134767000,0,6072.38134767000,30155.42329890000]
[3256,298,null,{"$raw":"00000000"},"141920",1,"Sociedade Agro-Pecuária Lda. (ex Agrícola e Pastoril do Almonda, SA)","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,78.07766306000,9999,78.07766306520,373.33093034800]
[3257,298,null,{"$raw":"00000000"},"141920",1,"Sociedade Agro-Pecuária Lda. (ex Agrícola e Pastoril do Almonda, SA)","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,221.83650910000,9999,221.83650910600,1691.88994705000]
[3258,298,null,{"$raw":"00000000"},"141920",1,"Sociedade Agro-Pecuária Lda. (ex Agrícola e Pastoril do Almonda, SA)","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1021.46849688000,0,1021.46849688000,20721.21433220000]
[3259,299,null,{"$raw":"00000000"},"141920",1,"Sondagens F.P. Bernardino e Filhos, Lda","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,149.35079128000,9999,149.35079128400,1250.08061292000]
[3261,299,null,{"$raw":"00000000"},"141920",1,"Sondagens F.P. Bernardino e Filhos, Lda","FRC",2,0.00000000000,50,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,484.54641289000,9999,484.54641289600,8147.20129721000]
[3262,300,null,{"$raw":"00000000"},"141910",1,"Varias","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,154.75790474000,0,154.75790474600,934.84772250900]
[3263,300,null,{"$raw":"00000000"},"141910",1,"Varias","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,330.94247239000,0,330.94247239500,3490.77112104000]
[3264,300,null,{"$raw":"00000000"},"141910",1,"Varias","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1012.64792701000,0,1012.64792701000,19016.81940640000]
[3265,301,null,{"$raw":"00000000"},"141920",1,"Varios","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,416.84827455000,0,416.84827455300,4234.40234571000]
[3266,301,null,{"$raw":"00000000"},"141920",1,"Varios","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,650.04210805000,0,650.04210805000,12455.42187740000]
[3268,302,null,{"$raw":"00000000"},"141919",1,"Venescape, Lda (Fabriscape 2)","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,283.71941278000,0,283.71941278100,2458.27704785000]
[3269,303,null,{"$raw":"00000000"},"141920",4,"Vias de Ligação","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,132.36577210000,0,132.36577210200,524.34237395800]
[3270,303,null,{"$raw":"00000000"},"141920",4,"Vias de Ligação","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,139.91180137000,0,139.91180137400,575.31899599500]
[3271,303,null,{"$raw":"00000000"},"141920",4,"Vias de Ligação","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,193.58531330000,0,193.58531330600,777.08899674600]
[3272,303,null,{"$raw":"00000000"},"141920",4,"Vias de Ligação","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,564.90972023000,0,564.90972023900,2724.29833662000]
[3273,303,null,{"$raw":"00000000"},"141920",4,"Vias de Ligação","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,804.14996372000,0,804.14996372400,3914.95793355000]
[3274,303,null,{"$raw":"00000000"},"141920",4,"Vias de Ligação","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,853.39104089000,0,853.39104089600,4172.68599301000]
[3275,303,null,{"$raw":"00000000"},"141920",4,"Vias de Ligação","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,958.44433918000,0,958.44433918800,4694.41056687000]
[3276,303,null,{"$raw":"00000000"},"141920",4,"Vias de Ligação","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,1161.96859155000,0,1161.96859155000,5565.21400490000]
[3277,303,null,{"$raw":"00000000"},"141921",4,"Vias de Ligação","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,487.20809723000,0,487.20809723400,2335.37150621000]
[3279,304,null,{"$raw":"00000000"},"141904",1,"Virtuosa Rodrigues Felício","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,265.89214110000,0,265.89214110700,2447.96046398000]
[3280,305,null,{"$raw":"00000000"},"141909",1,"Vitor M. Nascimento Ferreira","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,246.59743897000,0,246.59743897100,1738.85582677000]
[3289,307,null,"1899-12-30","141909",4,"Vias - Rede Terciaria 1","FRC",2,0.00000000000,10,"Proprietários","Pinheiro Bravo","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,633.52306534000,9999,633.52306534100,3017.26237939000]
[3290,307,null,"1899-12-30","141909",4,"Vias - Rede Terciaria 1","FRC",2,0.00000000000,10,"Proprietários","Pinheiro Bravo","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,783.15873519000,9999,783.14703683800,3811.92288609000]
[3295,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,130.01914783000,0,130.01914783900,514.42390144000]
[3296,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,165.26360755000,0,165.25353559600,722.89687304500]
[3297,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,191.11867624000,0,191.11867624100,847.91773984200]
[3298,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,247.72585338000,0,247.72391581000,1138.20009358000]
[3299,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,249.49291749000,0,249.49291749500,1146.13919904000]
[3300,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,348.48835184000,0,348.48835184600,1631.11605809000]
[3301,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",0,351.16710861000,9999,351.16710861600,1646.82336043000]
[3302,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários","Pinheiro Bravo","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",0,368.76955693000,9999,368.76955693700,1728.36799956000]
[3303,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",0,405.07087378000,9999,405.07087378100,1871.44489545000]
[3304,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,411.03509801000,0,411.02965020400,1955.28160258000]
[3305,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários","Pinheiro Bravo (com subcoberto denso)","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",0,540.06186338000,9999,540.06186338400,2569.34509688000]
[3306,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários","Pinheiro Bravo (com subcoberto denso)","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",0,577.80008144000,9999,577.80008144800,2724.73665538000]
[3307,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1025.88671615000,0,1025.88671615000,4992.56346709000]
[3308,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1189.06999899000,0,1189.06999899000,5721.67662422000]
[3309,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5303.41049655000,0,5303.40302812000,26408.54484280000]
[3310,308,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 2","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,5320.38579948000,0,5320.38579948000,26483.38664010000]
[3311,309,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 3","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,937.32552772000,0,937.32552772900,4580.16180456000]
[3312,309,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 3","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,10337.83823910000,0,10337.83572390000,51581.29339100000]
[3313,310,null,"1899-12-30","141902",4,"Vias - Rede Terciaria 4","FRC",2,0.00000000000,10,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,326.41517583000,9999,326.41517583100,1490.69181522000]
[3314,310,null,"1899-12-30","141902",4,"Vias - Rede Terciaria 4","FRC",2,0.00000000000,10,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,325.55787985000,9999,325.55787985000,1515.00478462000]
[3315,310,null,"1899-12-30","141902",4,"Vias - Rede Terciaria 4","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,338.17897877000,0,338.17897877100,1559.84424005000]
[3316,310,null,"1899-12-30","141902",4,"Vias - Rede Terciaria 4","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,363.86519869000,0,363.85259102800,1680.72571419000]
[3317,310,null,"1899-12-30","141902",4,"Vias - Rede Terciaria 4","FRC",2,0.00000000000,10,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,696.09003355000,9999,696.09003355200,3378.83232797000]
[3318,310,null,"1899-12-30","141902",4,"Vias - Rede Terciaria 4","FRC",2,0.00000000000,10,"Proprietários","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,0,716.17628040000,9999,716.17628040100,3479.09333165000]
[3319,310,null,"1899-12-30","141902",4,"Vias - Rede Terciaria 4","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1284.66958107000,0,1284.66958107000,6265.03448693000]
[3320,310,null,"1899-12-30","141902",4,"Vias - Rede Terciaria 4","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1286.41466211000,0,1286.41466211000,6319.31962620000]
[3321,310,null,"1899-12-30","141902",4,"Vias - Rede Terciaria 4","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2723.99755312000,0,2723.99755312000,13498.38572160000]
[3322,310,null,"1899-12-30","141902",4,"Vias - Rede Terciaria 4","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2815.84467429000,0,2815.84467429000,13947.27004180000]
[3323,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,652.79385062000,0,652.79385062600,3165.22494768000]
[3324,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,724.18251755000,0,724.18251755700,3620.89555563000]
[3325,6,null,{"$raw":"00000000"},"Fora",4,"A1","FRC",2,0.00000000000,10,"Brisa - Auto-estradas de Portugal S.A",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1088.14607544000,0,1088.14607544000,5366.53263086000]
[3340,49,null,{"$raw":"00000000"},"141919",2,"Buffer - Carrasqueira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1832.21361346000,0,1832.21361346000,54433.82205840000]
[3341,50,null,{"$raw":"00000000"},"141920",2,"Buffer - Carreiro da Areia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,2011.59148054000,0,2011.59148054000,43873.55715020000]
[3342,57,null,{"$raw":"00000000"},"141918",2,"Buffer - Casal Cêpo","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2053.39755703000,0,2053.39755703000,100098.43475900000]
[3343,77,null,{"$raw":"00000000"},"141918",2,"Buffer - Charneca de Alcorochel","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,2424.28705898000,0,2424.28705898000,74631.71783340001]
[3344,85,null,{"$raw":"00000000"},"141918",2,"Buffer - Faia","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2636.55376998000,0,2636.55376998000,123502.52865399999]
[3345,88,null,{"$raw":"00000000"},"141902",2,"Buffer - Fungalvaz","FRC",2,0.00000000000,100,"Proprietários","Ocupação Florestal","CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,"CDE",7,4,1,null,5,1661.50335643000,9999,1661.50335643000,21086.96832740000]
[3346,97,null,{"$raw":"00000000"},"141904",2,"Buffer - Mata","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,3135.49207313000,0,3135.49207313000,101176.83081200000]
[3347,98,null,{"$raw":"00000000"},"141910",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,4222.34003342000,0,4234.09016991000,154006.35392600001]
[3348,98,null,{"$raw":"00000000"},"141917",2,"Buffer - Meia Via","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,766.73510721000,0,766.73510721500,9107.42080546000]
[3349,100,null,{"$raw":"00000000"},"141902",2,"Buffer - Moreiras Grandes","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1996.03845184000,0,1996.03845184000,61545.41442650000]
[3350,102,null,{"$raw":"00000000"},"141902",2,"Buffer - Outeiro Grande","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,5795.77808244000,0,5795.77808244000,195157.75923400000]
[3351,104,null,{"$raw":"00000000"},"141919",2,"Buffer - Paço","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,3673.04097480000,0,3673.04097480000,76762.35984140000]
[3352,111,null,{"$raw":"00000000"},"141909",3,"Buffer - Parque de Merendas PNSAC","FRC",2,0.00000000000,100,"ICNF","Ocupação Florestal","MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,"MDE",7,4,1,null,5,2368.10011294000,9999,2368.10011294000,79792.29404060000]
[3353,114,null,{"$raw":"00000000"},"141909",2,"Buffer - Pedrógão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,3646.29518980000,0,3646.29518980000,96866.76433590001]
[3354,130,null,{"$raw":"00000000"},"141910",2,"Buffer - Riachos","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2570.21433705000,0,2570.21433705000,100133.53486000000]
[3355,136,null,{"$raw":"00000000"},"141920",3,"Buffer - Serrada Grande - Geriparque","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,2966.69483774000,0,2966.69483774000,72287.42666529999]
[3356,137,null,{"$raw":"00000000"},"141918",2,"Buffer - Sobreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1313.12798488000,0,1313.12798488000,23573.18962930000]
[3357,142,null,{"$raw":"00000000"},"141920",2,"Buffer - Vale Carvão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2260.24062360000,0,2260.24062360000,60884.38713020000]
[3358,145,null,{"$raw":"00000000"},"141902",2,"Buffer - Vales de Cima","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,4,1982.56297724000,0,1982.56297724000,35220.75779840000]
[3359,151,null,{"$raw":"00000000"},"141918",3,"Buffer - ZAE Parceiros da Igreja","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,3,1749.85294971000,0,1749.85294971000,50108.64390110000]
[3360,154,null,{"$raw":"00000000"},"141916",3,"Buffer - ZAE Zibreira","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,1,2699.02069750000,0,2699.02069750000,91014.63054410000]
[3361,158,null,{"$raw":"00000000"},"141918",1,"Carlos Batista Inverno                           ?","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,596.63462350000,0,596.63462350100,13408.19614280000]
[3362,159,null,{"$raw":"00000000"},"141918",1,"Carlos M. Carvalho Correia","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,437.24809569000,0,437.24809569600,9205.34503539000]
[3363,160,null,{"$raw":"00000000"},"141918",1,"Carlos Reis - Transportes","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,594.99108639000,0,594.99108639300,14651.13372480000]
[3364,171,null,{"$raw":"00000000"},"141902",4,"CM 1153","FRC",2,0.00000000000,10,"CMTN","Ocupação Florestal","MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,"MDE",5,2,1,null,0,398.32933987000,9999,398.32933987000,1879.52863101000]
[3365,202,null,{"$raw":"00000000"},"141918",1,"Edith Elvira Jeffrey Mcmillan Herdeiros","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1314.14591779000,0,1314.14591779000,31870.03125100000]
[3366,227,null,{"$raw":"00000000"},"141919",4,"EN desc 349-3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,2321.35829277000,0,2321.35829277000,11503.87749440000]
[3367,228,null,{"$raw":"00000000"},"141904",4,"EN desc 357","FRC",2,0.00000000000,10,"CMTN",null,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,310.17881192000,0,310.17881192700,1444.27539201000]
[3368,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,757.83193728000,0,757.83193728900,3228.78119619000]
[3369,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,53.13407186000,0,53.13407186300,112.26315323000]
[3370,232,null,{"$raw":"00000000"},"141920",4,"ER 349","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,987.86055370000,0,987.86055370600,4843.23117837000]
[3371,235,null,{"$raw":"00000000"},"141902",1,"Faustino Santos Bento, Lda - Aviário","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,998.64310003000,0,998.64310003400,24692.79153580000]
[3372,236,null,{"$raw":"00000000"},"141917",1,"Ferroentroncamento - Comércio e Indústria de Fernando de Pinho Teixeira, Lda. - \"Grupo Ferpinta\"","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,807.10903910000,0,807.10903910100,13006.99548380000]
[3373,237,null,{"$raw":"00000000"},"141902",1,"Francisco Conde dos Reis","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,391.43086991000,0,391.43086991400,8353.87455628000]
[3374,241,null,{"$raw":"00000000"},"Fora",1,"Joaquim da Graça Silvério","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,449.47858068000,0,449.47858068100,11218.22958220000]
[3375,244,null,{"$raw":"00000000"},"141920",1,"Jose da Silva Carvalho","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,347.67092978000,0,347.67092978500,5960.97199909000]
[3376,245,null,{"$raw":"00000000"},"141909",1,"José Manuel B. Soares \"Adega O Zarias\"","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,452.50398385000,0,452.50398385200,11199.38105550000]
[3377,246,null,{"$raw":"00000000"},"141918",1,"Jose Manuel Carvalho Santos - \"JCS - Design\"","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,763.72746882000,0,763.72746882100,13191.76653510000]
[3378,247,null,{"$raw":"00000000"},"141920",1,"Jose Manuel Pinto Salgado, Lda - Auto Variante- Reparações Mecanicas","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,584.30760458000,0,584.30760458500,11726.82272080000]
[3379,248,null,{"$raw":"00000000"},"141904",1,"Jose Sabogueiro Matos Costa","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,462.13234145000,0,462.13234145500,8795.73782641000]
[3380,249,null,{"$raw":"00000000"},"141918",1,"Litmat - Comercio de materiais de construção, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,810.88411818000,0,810.88411818800,19121.47223740000]
[3381,252,null,{"$raw":"00000000"},"141920",1,"Lucio e Monteiro, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,459.67510445000,0,459.67510445600,10671.47992950000]
[3382,253,null,{"$raw":"00000000"},"141918",1,"Manuel Carvalho Cepo","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,441.94839634000,0,441.94839634100,11033.07615900000]
[3383,255,null,{"$raw":"00000000"},"141916",1,"Miguel Vieira - Fabrica de Cartonagens e Embalagens, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,468.30794401000,0,468.30794401700,11689.42622300000]
[3399,261,null,{"$raw":"00000000"},"141918",1,"Nelson Calado Rosa (averbado para Amália Duarte Calado)","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,644.62120472000,0,644.62120472900,13564.15309430000]
[3400,263,null,{"$raw":"00000000"},"141909",12,"PA nº 1","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,198.78839072000,0,198.78839072700,1942.78072714000]
[3401,264,null,{"$raw":"00000000"},"141920",12,"PA nº 11","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,622.56338620000,0,622.56338620500,7159.96738656000]
[3402,265,null,{"$raw":"00000000"},"141909",12,"PA nº 13","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,526.21908136000,0,526.21908136700,7885.12652505000]
[3403,266,null,{"$raw":"00000000"},"141904",12,"PA nº 15","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,342.60083364000,0,342.60083364600,5130.52553989000]
[3404,267,null,{"$raw":"00000000"},"141904",12,"PA nº 22","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,454.07317691000,0,454.07317691700,5426.03930540000]
[3405,268,null,{"$raw":"00000000"},"141904",12,"PA nº 44","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,452.08085755000,0,452.08085755800,6773.35174223000]
[3406,270,null,{"$raw":"00000000"},"141902",12,"PA nº 50","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,905.57519108000,0,905.57519108100,12434.12230620000]
[3407,271,null,{"$raw":"00000000"},"141909",12,"PA nº 51","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,300.42101031000,0,300.42101031100,3405.60851238000]
[3408,273,null,{"$raw":"00000000"},"141902",12,"PA nº 53","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,233.90901025000,0,233.90901025500,3499.44137714000]
[3409,274,null,{"$raw":"00000000"},"141918",12,"PA nº 54","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,244.21456230000,0,244.21456230600,3256.77615835000]
[3410,275,null,{"$raw":"00000000"},"141904",12,"PA nº 55","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,246.03235086000,0,246.03235086200,3682.72513615000]
[3411,276,null,{"$raw":"00000000"},"141904",12,"PA nº 56","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,349.50641352000,0,349.50641352100,5232.73216982000]
[3412,277,null,{"$raw":"00000000"},"141904",12,"PA nº 57","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,353.96446044000,0,353.96446044900,5301.84702300000]
[3413,278,null,{"$raw":"00000000"},"141904",12,"PA nº 58","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,425.97825795000,0,425.97825795600,6380.66197418000]
[3414,279,null,{"$raw":"00000000"},"141904",12,"PA nº 59","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,296.96644105000,0,296.96644105400,1635.28865644000]
[3415,280,null,{"$raw":"00000000"},"141910",12,"PA nº 6","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,531.21442256000,0,531.21442256600,7959.15878245000]
[3416,281,null,{"$raw":"00000000"},"141904",12,"PA nº 60","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,318.77688061000,0,318.77688061100,4772.79455008000]
[3417,282,null,{"$raw":"00000000"},"141919",12,"PA nº 61","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,438.78731128000,0,438.78731128000,5598.92059028000]
[3418,283,null,{"$raw":"00000000"},"141920",12,"PA nº 62","FIC",2,0.00000000000,30,"CMTN","Ocupação Florestal","SSS",5,2,1,"SSS",5,2,1,"MDE",5,2,1,"SSS",5,2,1,"SSS",5,2,1,null,0,680.81771384000,2015,680.81771384300,5325.63505502000]
[3419,284,null,{"$raw":"00000000"},"141918",12,"PA nº 63","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,380.41779012000,0,380.41779012800,5697.96059852000]
[3420,285,null,{"$raw":"00000000"},"141921",12,"PA nº 64","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,404.78060031000,0,404.78060031700,4044.25251270000]
[3421,286,null,{"$raw":"00000000"},"141920",12,"PA nº 65","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,485.35614832000,0,485.35614832400,6718.82415560000]
[3422,287,null,{"$raw":"00000000"},"141918",12,"PA nº 66","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,458.62557257000,0,458.62557257100,6871.79765617000]
[3423,288,null,{"$raw":"00000000"},"141920",12,"PA nº 68","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,443.67744676000,0,443.67744676800,6648.66750665000]
[3424,289,null,{"$raw":"00000000"},"141918",12,"PA nº 8","FIC",2,0.00000000000,30,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,418.97880698000,0,418.97880698900,6276.69534339000]
[3425,290,null,{"$raw":"00000000"},"141904",1,"PaviClaudio - Revestimentos de Pavimentos, Unipessoal, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,477.97127405000,0,477.97127405800,6568.14458895000]
[3426,291,null,{"$raw":"00000000"},"141919",1,"Pedecão Construções, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,851.91285383000,0,851.91285383200,21619.18420680000]
[3427,293,null,{"$raw":"00000000"},"141921",1,"Quinta Guimarães","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,726.94340898000,0,726.94340898400,17764.08962750000]
[3428,295,null,{"$raw":"00000000"},"141916",1,"Resin - Resíduos industriais, SA","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,792.51090780000,0,792.51090780500,19781.28106570000]
[3429,296,null,{"$raw":"00000000"},"141921",1,"Serralharia Guerra, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,598.11869584000,0,598.11869584200,14936.14151940000]
[3430,297,null,{"$raw":"00000000"},"141920",1,"Sociedade Agricola Quinta Bonflorido, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,779.63751283000,0,779.63751283700,19415.29184200000]
[3431,299,null,{"$raw":"00000000"},"141920",1,"Sondagens F.P. Bernardino e Filhos, Lda","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,497.63455863000,0,497.63455863600,2213.15626395000]
[3432,302,null,{"$raw":"00000000"},"141919",1,"Venescape, Lda (Fabriscape 2)","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,851.66172360000,0,851.66172360900,14260.29373480000]
[3433,304,null,{"$raw":"00000000"},"141902",1,"Virtuosa Rodrigues Felício","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,642.21036267000,0,642.21036267100,13603.33514680000]
[3434,305,null,{"$raw":"00000000"},"141909",1,"Vitor M. Nascimento Ferreira","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,333.05913442000,0,333.05913442200,5468.62333010000]
[3435,306,null,{"$raw":"00000000"},"141918",1,"Vitor Manuel Rosa - serviços de Torno, Mecanica e Serralharia","FRC",2,0.00000000000,50,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,505.54088051000,0,505.54088051300,12555.82800930000]
[3442,307,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 1","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,146.86827518000,0,146.86827518700,548.44199108600]
[3443,307,null,"1899-12-30","141904",4,"Vias - Rede Terciaria 1","FRC",2,0.00000000000,10,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,416.34957233000,0,617.59326495400,2964.26470007000]
[84,1,null,{"$raw":"00000000"},"141919",13,"08010401 - TransAbast - Energ Electrica - LAT - 60 kV","FRC",2,0.00000000000,10,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1214.28179058000,0,244.71500506100,1632.72078261000]
[173,2,null,{"$raw":"00000000"},"141918",7,"08010403 - TransAbast - Energ Electrica - MAT (Nº 2146) - 220kV","FRC",2,0.00000000000,22,"REN","Ocupação Florestal","SSS",7,4,1,"MDE",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1145.02415013000,2014,436.29355563300,6545.25238035000]
[2751,225,null,{"$raw":"00000000"},"141918",4,"EN 3","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1508.15785361000,0,232.71014088500,995.64764987800]
[2909,231,null,{"$raw":"00000000"},"141910",4,"ER 243","FRC",2,0.00000000000,10,"Estradas de Portugal S.A.",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,319.40423163000,0,168.02073509700,681.65869797700]
[1424,105,null,{"$raw":"00000000"},"141904",2,"Buffer - Pafarrão","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,5,264.13490614000,0,205.62967549400,1410.72770731000]
[397,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,346.92059302000,0,43.51252192100,72.06638310180]
[638,17,null,{"$raw":"00000000"},"141909",2,"Buffer - A-do-Freire","FRC",2,0.00000000000,100,"Proprietários",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,2,1156.89372850000,0,207.23161521300,1695.34764726000]
[417,5,null,{"$raw":"00000000"},"141909",10,"08010405 - TransAbast - Energ Electrica - LMT - 30 kV","FRC",2,0.00000000000,7,"EDP",null,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,"SSS",7,4,1,null,0,1230.55867408000,0,9.34959789995,0.33527213128]