{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"Nome","type":"character","width":50},{"name":"Latitude","type":"character","width":50},{"name":"Longitude","type":"character","width":50},{"name":"RPA_Operac","type":"character","width":50},{"name":"Proprietár","type":"character","width":90},{"name":"Morada","type":"character","width":90},{"name":"Contacto","type":"number","width":10,"decimals":0},{"name":"Tipo","type":"character","width":50},{"name":"Freguesia","type":"character","width":50},{"name":"GMRotation","type":"number","width":24,"decimals":5},{"name":"ID_PA","type":"character","width":50},{"name":"_Nome","type":"character","width":50},{"name":"COD_INE","type":"character","width":50},{"name":"DATA_ACTLZ","type":"character","width":50},{"name":"COORD_X","type":"character","width":50},{"name":"COORD_Y","type":"character","width":50},{"name":"TIPO_PA","type":"character","width":50},{"name":"TIPO_PROP","type":"character","width":50},{"name":"FORMATO","type":"character","width":50},{"name":"LARGURA","type":"character","width":50},{"name":"COMPRIM","type":"character","width":50},{"name":"ALTURA","type":"number","width":9,"decimals":0},{"name":"RAIO","type":"number","width":9,"decimals":0},{"name":"VOL_MAX","type":"number","width":9,"decimals":0},{"name":"CAPTACAO","type":"character","width":50},{"name":"TIPO_VIA","type":"character","width":50},{"name":"OPERAC","type":"character","width":50},{"name":"CLASSE_PA","type":"character","width":50},{"name":"MEIO_EXEC","type":"character","width":50},{"name":"MEIO_FIN","type":"character","width":50},{"name":"FASE","type":"character","width":50},{"name":"CATEGORIA","type":"character","width":50},{"name":"COD_SINAL","type":"character","width":50},{"name":"OBSERV","type":"character","width":50},{"name":"INTER_2014","type":"character","width":3},{"name":"INTER_2015","type":"character","width":3},{"name":"INTER_2016","type":"character","width":3},{"name":"INTER_2017","type":"character","width":3},{"name":"INTER_2018","type":"character","width":3},{"name":"EXEC_2014","type":"number","width":4,"decimals":0},{"name":"EXEC_2015","type":"number","width":4,"decimals":0},{"name":"EXEC_2016","type":"number","width":4,"decimals":0},{"name":"EXEC_2017","type":"number","width":4,"decimals":0},{"name":"EXEC_2018","type":"number","width":4,"decimals":0},{"name":"FIN_2014","type":"number","width":4,"decimals":0},{"name":"FIN_2015","type":"number","width":4,"decimals":0},{"name":"FIN_2016","type":"number","width":4,"decimals":0},{"name":"FIN_2017","type":"number","width":4,"decimals":0},{"name":"FIN_2018","type":"number","width":4,"decimals":0},{"name":"FASE_2014","type":"number","width":4,"decimals":0},{"name":"FASE_2015","type":"number","width":4,"decimals":0},{"name":"FASE_2016","type":"number","width":4,"decimals":0},{"name":"FASE_2017","type":"number","width":4,"decimals":0},{"name":"FASE_2018","type":"number","width":4,"decimals":0}],"n_rows":123,"rows_kept":123,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
["3 - Alto da Malhada","38:38:54.7547","8:58:13.8791","Terrestre","José Ribeiro Chula e filho (José Alberto Mendes Ribeiro)","Alto da Malhada 2860 - 339 Moita",917566455,"Furo","Moita",0.00070,"123","Alto da Malhada","150603","2013","127.192,287","187.210,240","112","PUB","1","1","1",1,0,1,"2","3","1","T","7","4","005","1","MTA.PO.T1.001",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["8 - Quinta das Sete Fontes","38:37:18.03","8:59:44.3615","Terrestre","Miranda","EM - Arroteias - Barra Cheia",0,"Furo","Alhos Vedros",0.00070,"1","Quinta das Sete Fontes","150601","2013","124.927,686","184.247,884","112","PRI","4",null,null,0,0,0,"2","1","1","T","7","4","005","1","MTA.PO.T0.008",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["6 - Passagem de nível Penteado","38:38:13.1207","8:57:25.577","Terrestre","Câmara Municipal da Moita","Praça da República - Moita",0,"Marco de água","Moita",0.00070,"2","Passagem de nível Penteado","150603","2013","128.329,067","185.929,156","310","PUB","1","1","1",1,0,1,"2","2","1","T","7","4","005","1","MTA.RP.T1 .005",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["2 - Quinta da Nazaré","38:40:06.7835","8:59:57.894","Terrestre","José Ribeiro Chula e filho (José Alberto Mendes Ribeiro)","Alto da Malhada 2860 - 339 Moita",917566455,"Furo","Gaio - Rosário",0.00069,"3","Quinta da Nazaré","150604","2013","124.694,796","189.435,817","112","PRI","1","1","1",1,0,1,"2","3","1","T","7","4","005","1","MTA.PO.T1.003",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["1 - Quinta da Nazaré de Baixo","38:40:4.0439","9:0:4.5072","Misto (dá para hélio)","José Ribeiro Chula e filho (José Alberto Mendes Ribeiro)","Alto da Malhada 2860 - 339 Moita",917566455,"Poço","Gaio - Rosário",0.00070,"4","Quinta da Nazaré de Baixo","150604","2013","124.463,188","189.210,240","112","PRI","3",null,null,5,2,63,"2","3","1","T","7","4","005","1","MTA.PO.T1.002",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["4 - Quintinha do Palheirão - Santa Rosa","38:38:25.7208","8:59:34.6704","Misto (dá para hélio)","JOSÉ CHULA JÚNIOR",null,0,"Charco","Moita",0.00070,"5","Quintinha do Palheirão - Santa Rosa","150603","2013","125.282,605","186.335,497","214","PRI","2","6","100",3,0,1500,"2","3","1","T","7","4","005","2","MTA.CH.T1.004",null,"MAN","MAN","MAN","MAN","MAN",7,7,7,7,7,4,4,4,4,4,2,2,2,2,2]
["7 - Quinta do Paraíso - EM Arroteias - Barra Cheia",null,null,"Terrestre","Sociedade Agrícola Quinta do Paraíso (Zé João)","Brejos - Moita 2860",96846682,"Furo","Alhos Vedros",0.00000,"6","Quinta do Paraíso - EM Arroteias - Barra Cheia","150601","2013","124.938,155","185.119,132","112","PRI","2","1","1",1,0,1,"2","3","1","T","7","4","005","1","MTA.PO.T1.006",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["5 - EM do Penteado",null,null,"Terrestre","Câmara Municipal da Moita","Praça da República - Moita",0,"Furo","Moita",-0.00000,"7","EM do Penteado","150603","2013","128.391,302","186.158,431","112","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","005","1","MTA.PO.T0.007",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"8","Marco de Incendio","150606","2013","120614,578","187138,684","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.009",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"9","Marco de Incendio","150606","2013","121177,627","187373,758","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.010",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"10","Marco de Incendio","150606","2013","121080,771","186948,083","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.011",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"11","Marco de Incendio","150601","2013","121695,425","187513,531","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.012",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"12","Marco de Incendio","150601","2013","122464,857","187438,782","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.013",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"13","Marco de Incendio","150601","2013","122480,767","187377,266","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.014",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"14","Marco de Incendio","150601","2013","124037,753","186263,617","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.015",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"15","Marco de Incendio","150601","2013","124136,391","186309,224","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.016",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"16","Marco de Incendio","150601","2013","124118,36","186237,102","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.017",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"17","Marco de Incendio","150601","2013","124228,664","186280,587","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.018",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"18","Marco de Incendio","150601","2013","124480,031","186446,044","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.019",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"19","Marco de Incendio","150601","2013","123862,751","186825,745","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.020",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"20","Marco de Incendio","150601","2013","123781,084","186825,745","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.021",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"21","Marco de Incendio","150601","2013","123830,933","186920,14","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.022",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"22","Marco de Incendio","150601","2013","123769,417","186939,231","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.023",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"23","Marco de Incendio","150601","2013","123821,287","187007,11","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.024",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"24","Marco de Incendio","150601","2013","123743,962","187007,11","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.025",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"25","Marco de Incendio","150601","2013","123726,992","187055,899","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.026",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"26","Marco de Incendio","150601","2013","124578,016","187302,468","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.027",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"27","Marco de Incendio","150601","2013","124633,253","187265,125","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.028",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"28","Marco de Incendio","150603","2013","125080,871","187039,459","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.029",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"29","Marco de Incendio","150603","2013","125093,598","187636,587","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.030",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"30","Marco de Incendio","150603","2013","125077,689","187789,316","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.031",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"31","Marco de Incendio","150603","2013","125117,992","187835,983","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.032",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"32","Marco de Incendio","150601","2013","123541,364","187900,843","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.033",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"33","Marco de Incendio","150601","2013","123570,927","187959,97","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.034",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"34","Marco de Incendio","150601","2013","123656,506","188013,651","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.035",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"35","Marco de Incendio","150601","2013","123730,414","188082,114","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.036",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"36","Marco de Incendio","150601","2013","123801,989","188011,317","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.037",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"37","Marco de Incendio","150601","2013","123680,623","187891,507","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.038",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"38","Marco de Incendio","150601","2013","121966,367","188517,43","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.039",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"39","Marco de Incendio","150601","2013","121998,002","187724,851","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.040",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"40","Marco de Incendio","150601","2013","122568,798","187676,36","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.041",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"41","Marco de Incendio","150601","2013","122752,285","187623,329","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.042",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"42","Marco de Incendio","150601","2013","122567,737","187126,96","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.043",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"43","Marco de Incendio","150604","2013","123927,473","189914,569","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.044",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"44","Marco de Incendio","150604","2013","123596,459","190417,685","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.045",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"45","Marco de Incendio","150603","2013","124949,354","188085,228","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.046",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"46","Marco de Incendio","150603","2013","125008,749","188070,379","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.047",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"47","Marco de Incendio","150603","2013","125058,598","188181,744","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.048",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"48","Marco de Incendio","150603","2013","125085,113","188246,442","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.049",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"49","Marco de Incendio","150603","2013","125210,266","188312,2","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.050",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"50","Marco de Incendio","150603","2013","125531,006","188259,461","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.051",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"51","Marco de Incendio","150603","2013","125159,356","187622,799","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.052",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"52","Marco de Incendio","150603","2013","125499,815","187266,431","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.053",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"53","Marco de Incendio","150603","2013","124864,505","186853,851","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.054",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"54","Marco de Incendio","150603","2013","125047,991","186848,548","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.055",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"55","Marco de Incendio","150603","2013","126308,301","186599,276","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.056",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"56","Marco de Incendio","150603","2013","126351,868","186659,181","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.057",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"57","Marco de Incendio","150603","2013","126424,221","186694,19","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.058",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"58","Marco de Incendio","150603","2013","126491,127","186673,185","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.059",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"59","Marco de Incendio","150603","2013","126436,668","186621,838","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.060",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"60","Marco de Incendio","150603","2013","126449,894","186614,836","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.061",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"61","Marco de Incendio","150603","2013","126502,019","186589,94","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.062",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"62","Marco de Incendio","150603","2013","126400,881","186563,489","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.063",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"63","Marco de Incendio","150603","2013","126408,661","186553,375","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.064",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"64","Marco de Incendio","150603","2013","126462,342","186522,256","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.065",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"65","Marco de Incendio","150603","2013","127983,787","186162,37","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.066",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"66","Marco de Incendio","150605","2013","126112,851","190860,864","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.067",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"67","Marco de Incendio","150605","2013","126094,821","190575,558","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.068",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"68","Marco de Incendio","150603","2013","126987,721","186718,127","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.069",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"69","Marco de Incendio","150603","2013","127182,218","186729,797","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.070",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"70","Marco de Incendio","150603","2013","126985,387","186679,228","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.071",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"71","Marco de Incendio","150603","2013","127004,837","186718,127","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.072",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"72","Marco de Incendio","150603","2013","126979,164","186746,913","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.073",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"73","Marco de Incendio","150603","2013","127062,408","186704,902","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.074",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"74","Marco de Incendio","150603","2013","127180,042","186745,568","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.075",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"75","Marco de Incendio","150603","2013","126932,484","186764,029","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.076",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"76","Marco de Incendio","150603","2013","127361,856","186411,702","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.077",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"77","Marco de Incendio","150601","2013","122570,919","187274,386","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.078",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"78","Marco de Incendio","150601","2013","122661,072","187160,9","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.079",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"79","Marco de Incendio","150601","2013","122594,253","187191,658","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.080",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"80","Marco de Incendio","150601","2013","122527,434","187396,357","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.081",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"81","Marco de Incendio","150601","2013","122625,128","187275,281","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.082",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"82","Marco de Incendio","150601","2013","122643,041","187325,296","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.083",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"83","Marco de Incendio","150601","2013","122719,406","187178,93","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.084",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"84","Marco de Incendio","150602","2013","120512,802","188682,693","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.085",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"85","Marco de Incendio","150602","2013","120820,629","188562,073","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.086",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"86","Marco de Incendio","150602","2013","120804,291","188501,391","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.087",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"87","Marco de Incendio","150602","2013","120670,644","188040,859","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.088",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"88","Marco de Incendio","150602","2013","121389,686","188072,456","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.089",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"89","Marco de Incendio","150602","2013","120610,098","187570,617","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.090",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"90","Marco de Incendio","150602","2013","120778,476","187492,873","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.091",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"91","Marco de Incendio","150606","2013","121426,513","186933,928","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.092",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"92","Marco de Incendio","150606","2013","121642,706","186830,211","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.093",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"93","Marco de Incendio","150606","2013","121157,116","186630,591","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.094",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"94","Marco de Incendio","150606","2013","121511,362","186708,016","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.095",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"95","Marco de Incendio","150606","2013","121428,634","186787,563","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.096",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"96","Marco de Incendio","150606","2013","120819,84","187080,293","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.097",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"97","Marco de Incendio","150602","2013","120521,806","187226,658","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.098",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"98","Marco de Incendio","150601","2013","122221,976","187082,414","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.099",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"99","Marco de Incendio","150603","2013","127032,066","186735,243","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.100",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"100","Marco de Incendio","150603","2013","127096,639","186719,683","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.101",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"101","Marco de Incendio","150601","2013","123436,336","188005,871","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.102",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"102","Marco de Incendio","150601","2013","123629,276","187841,716","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.103",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"103","Marco de Incendio","150601","2013","123726,524","187939","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.104",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"104","Marco de Incendio","150601","2013","123497,797","188068,11","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.105",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"105","Marco de Incendio","150601","2013","123565,481","188126,459","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.106",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"106","Marco de Incendio","150604","2013","123794,438","189801,761","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.107",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"107","Marco de Incendio","150604","2013","123869,124","189841,438","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.108",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"108","Marco de Incendio","150604","2013","124127,635","189600,099","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.109",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"109","Marco de Incendio","150603","2013","127151,098","186711,126","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.110",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"110","Marco de Incendio","150603","2013","127587,471","186279,445","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.111",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"111","Marco de Incendio","150603","2013","127772,175","186203,603","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.112",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"112","Marco de Incendio","150603","2013","126889,695","186741,467","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.113",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"113","Marco de Incendio","150603","2013","126940,264","186729,019","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.114",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"114","Marco de Incendio","150603","2013","126886,583","186774,92","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.115",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"115","Marco de Incendio","150603","2013","127226,487","186449,045","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.116",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"116","Marco de Incendio","150601","2013","122546,525","187185,294","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.117",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"117","Marco de Incendio","150601","2013","122499,858","187312,568","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.118",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"118","Marco de Incendio","150601","2013","122600,617","187346,508","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.119",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"119","Marco de Incendio","150601","2013","122524,252","187245,749","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.120",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"120","Marco de Incendio","150601","2013","122676,981","187238,325","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.121",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"121","Marco de Incendio","150604","2013","123797,957","190590,398","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.122",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]
["Marco de Incendio",null,null,null,null,null,0,null,null,0.00000,"122","Marco de Incendio","150601","2013","124381,393","182723,276","310","PUB","4",null,null,0,0,0,"2","1","1","T","7","4","5","1","MTA.RP.T1.123",null,"ESI","ESI","ESI","ESI","ESI",7,7,7,7,7,4,4,4,4,4,5,5,5,5,5]